
 GPS week: 1378   Day: 5   MJD: 53895                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2778      0     0.87    -1.10     2.90     0.00      0
 cod |   288     0  27563     78    -0.05    -0.25     0.05    16.94      0
 emr |   288     0  24779      2  2772.43    53.76     0.04    22.17      0
 esa |   288     0  18639   1257     2.44     1.01     0.07     9.72      0
 gfz |   279     0  29840   1652     0.16    -1.19     0.06    13.27      0
 iga |    96     0   2778     22     0.51    -1.02     0.09     0.00      0
 igu |    96     0   2778      0     0.51    -0.46     4.35     0.00      0
 jpl |   288     0  20210     17     0.60     1.07     0.04    20.94      0
 ngs |    96     0   2778      0     0.69    -1.04     2.71     0.00      0
 usn |   288     0  39250    575     0.58     1.25     0.05    16.96      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |  5329     6   -99   132    11   100 19044    91  4264   -73 |
    2 | -2030    94   -85   -22   159   149  2540    60 -1807  -160 |
    3 | -1904   -15  -183   -22   131    41   729    94 -2558    52 |
    4 | -1602   199   -96     X   163   108   368    95 -1413  -315 |
    5 | -1418   -24   -62    12    64   123-12079   -47 -1386   107 |
    6 | -1279   141  -189    21   113   -28 -3974    80 -1278   -89 |
    7 | -3250   -34  -153    20    37   -97 -1842    14 -2870   177 |
    8 | -7947  -149   -30   144    96   195  8153   -57 -6333   103 |
    9 |  -383    -6   -10  -100   103   -87  6525    90    24  -114 |
   10 | -4438  -197   -85   118    78   -76 -6876  -150 -3016   367 |
   11 |  2522    71    11  -160    72   -85  1331   148  2817  -230 |
   13 |  2160   235   -35     9    57   118  2634   235  2834  -528 |
   14 |  5000    49  -116    39    59   -14  2559   154  4944  -155 |
   15 | -3876  -109  -122    74    36    27 -5476    16 -4061   181 |
   16 |  3614   -43  -124   -82    86    43  2595    86  3860    80 |
   17 |  3548    75  -147    52    69   -63   749   266  3017  -292 |
   18 |  3087    48   -61   -53    72   -39  2069   152  3350  -180 |
   19 | -2530  -119  -200    27   -14  -153  2326   -69 -2345   460 |
   20 |  3417   -63   -99   112    -3   -98  2022     0  3778   131 |
   21 |  4253    13   -66   -36    61    87  1571    70  4456   -37 |
   22 | -3777    39   -65  -116   144    60  -421   242 -3152  -296 |
   23 | -1150   166   -69    -4    83    20  2373    29 -1013  -172 |
   24 |  1338    62   -29   286     1   -39  1227   -88  -940   -50 |
   25 |  5104   -23  -126     X    94   -47-14894   151  4668   -70 |
   26 | -2209   104   -50    87    57   -57   533   149 -1957  -317 |
   27 | -9801  -101    27    56    71   -71 -7533   -50 -7800    41 |
   28 |  2056   -26    -1  -183    19    85-12814    77  1394    23 |
   29 | -3139    64   -80    97   115   -91 -1880    82 -2636  -203 |
   30 |  9337   202   -17   115     -   -71  8119   213  5192  -508 |
 -----+-------------------------------------------------------------+
 ALBH |     -    70   -31     -     -     -     -    22     -   -57 |
 ALGO |     -   107   -43    13  -212     -     -   137     -   -88 |
 ALIC |     -  -256     -     -   327     -     -     -     -     - |
 ALRT |     -  -211     -     -     -     -     -     -     -   211 |
 AMC2 |     -   -58   153   -35     -     -     -  -182     -   103 |
 AREQ |     -   -36    49     -   -93     -     -     -     -    35 |
 ARTU |     -   127     -    82    57     -     -     -     -  -216 |
 ASPA |     -     -     -     -   372     -     -     -     -  -291 |
 AUCK |     -  -263     -     X   -22     -     -     -     -   278 |
 BAHR |     -    43    -5     -   -59     -     -    28     -   -28 |
 BILI |     -    -7     -     -    68     -     -     -     -   -42 |
 BJFS |     -     -     -     -   -83     -     -     -     -    65 |
 BOGT |     -     -     -   -75     X     -     -     -     -    43 |
 BOR1 |     -    32     -     -  -211     -     -   100     -     X |
 BREW |     -     -    13     -     -     -     -     -     -   -17 |
 BRFT |     -     -     -     -    68     -     -     -     -   -53 |
 BRMU |     -     -     -     -   104     -     -     -     -   -81 |
 BRUS |     -    -4    73     -     -     -     -     -     -   -92 |
 CAS1 |     -    44     -   119    34     -     -   -29     -   -98 |
 CHAT |     -     -     -     -   -54     -     -     -     -    42 |
 CHUR |     -     -    41     -  -146     -     -     -     -    36 |
 CRO1 |     -    82    31  -121   113     -     -   -31     -   -98 |
 DAEJ |     -   -16     -     -     -     -     -     -     -    16 |
 DAKA |     -   -10     -     -    13     -     -     -     -     - |
 DARW |     -     -   266     -  -513     -     -  -139     -   113 |
 DAV1 |     -  -346     -     -   442     -     -     -     -     - |
 DGAR |     -   -99     -     -    10     -     -     -     -    92 |
 DRAO |     -   184   -80     -  -163     -     -    40     -   -12 |
 FAIR |     -     -    11   169     X     -     -   -52     -   -47 |
 FLIN |     -   103     -     -  -131     -     -     -     -     - |
 GLPS |     -    52     -     -    -2     -     -   -84     -    53 |
 GMAS |     -     -   190     -     -     -     -     -     -  -249 |
 GODE |     -   125   -36     -     -     -     -     -     -   -77 |
 GOLD |     -    66     -    51    20     -     -   -52     -   -46 |
 GRAS |     -     6     -     -   -23     -     -     -     -    10 |
 GRAZ |     -  -190   178     -     -     -     -     -     -   -43 |
 GUAM |     -   -88     -   -27    20     -     -     -     -    89 |
 GUAT |     -     -     -     -   -66     -     -     -     -    52 |
 HARB |     -  -196     -     -     -     -     -     -     -   196 |
 HLFX |     -     -   -51     -     -     -     -     -     -    67 |
 HOB2 |     -     -   148     -   -51     -     -    -3     -  -161 |
 HOFN |     -     -     -     -   -37     -     -     -     -    29 |
 HRAO |     -     -     -     -  -139     -     -    43     -    47 |
 IISC |     -    59     -  -101    -2     -     -     -     -     X |
 IRKT |     -     -     -  -284   -37     -     -     -     -   183 |
 ISPA |     -     -     -     -   120     -     -  -121     -    63 |
 JPLM |     -     -   -66     -  -205     -     -     -     -   234 |
 KARR |     -    28     -     -   -35     -     -     -     -     - |
 KERG |     -     -   -95   -53    50     -     -     4     -   114 |
 KIRU |     -     2     -     -     -     -     -     -     -    -2 |
 KOKB |     -     -   145     -   -83     -     -     9     -  -142 |
 KOUR |     -     -     -    48    27     -     -  -156     -   148 |
 LPGS |     -    24   134   -28    57     -     -  -163     -   -21 |
 MAC1 |     -     0     -    60   -53     -     -     -     -     4 |
 MAD2 |     -     -   155     -     -     -     -  -239     -    93 |
 MALI |     -     -     -   -10    65     -     -     -     -   -41 |
 MAS1 |     -     -   106   -84    -8     -     -     -     -   -85 |
 MATE |     -     -     -     -   -32     -     -     -     -    25 |
 MAW1 |     -   194     -     -  -250     -     -     -     -   -46 |
 MBAR |     -     2     -     -    -8     -     -     -     -     3 |
 MCM4 |     -   147  -192   134   185     -     -   -37     -   -35 |
 MDO1 |     -   -55     -     -  -412     -     -     -     -   361 |
 MEDI |     -     -   -71     -     -     -     -     -     -    93 |
 MIZU |     -   -90    65     -     -     -     -     -     -     8 |
 MKEA |     -     -     -    81   -71     -     -     -     -     6 |
 NICO |     -     -     -     -   -36     -     -    23     -     - |
 NKLG |     -     -     -     -   -55     -     -     -     -    43 |
 NLIB |     -     -     -     -  -217     -     -   105     -    35 |
 NNOR |     -     -   119   -42     -     -     -  -201     -   117 |
 NOUM |     -     -     -     -   518     -     -  -328     -     - |
 NPLD |     -  -113    84     -     -     -     -     -     -     2 |
 NRC1 |     -    95   -37     -   -92     -     -    17     -     1 |
 NRIL |     -     -     -     -   -22     -     -     -     -    17 |
 NTUS |     -   -60     -   -43    98     -     -   -90     -   143 |
 NYA1 |     -    44     -     -     -     -     -   -37     -     3 |
 NYAL |     -     -     -     -   -33     -     -     -     -    26 |
 OHI2 |     -   172     -   198     X     -     -     -     -  -281 |
 ONSA |     -   -82    93  -113    40     -     -     -     -     - |
 PDEL |     -   -42     -     -    54     -     -     -     -     - |
 PERT |     -   109  -113    24   167     -     -     -     -   -95 |
 PIE1 |     -     -  -109   -70     -     -     -     -     -   176 |
 PIMO |     -     -     -   -70   228     -     -     -     -  -128 |
 POL2 |     -    44     -     -   -40     -     -     -     -   -13 |
 POTS |     -     -     -     -     1     -     -     -     -    -1 |
 PRDS |     -     -    40     -     -     -     -   -47     -     5 |
 PTBB |     -   -56    25     -     -     -     -     -     -    24 |
 QAQ1 |     -   -82     9     -     -     -     -     -     -    71 |
 RABT |     -  -209     -     -     -     -     -     -     -   208 |
 RESO |     -   -15     -     -    19     -     -     -     -     - |
 RIOG |     -    62   -10   -15   -49     -     -    -3     -    -2 |
 SCH2 |     -    73     0     -  -152     -     -     -     -    41 |
 SELE |     -  -100     -     -     -     -     -     -     -   100 |
 SFER |     -  -393   301     -     -     -     -     -     -     - |
 SPT0 |     -  -114    87     -     -     -     -     -     -     - |
 STJO |     -     -   -55     -   -56     -     -    17     -    93 |
 STR1 |     -     -   -14     -     -     -     -     -     -    18 |
 SUTH |     -   -78     -     -     -     -     -     -     -    78 |
 SUTM |     -     -    36     -  -336     -     -  -138     -   347 |
 SYOG |     -     -   -51     -  -197     -     -   -48     -   263 |
 THTI |     -     -   103   -60   -58     -     -     -     -   -57 |
 THU3 |     -   143   188     -     X     -     -  -315     -     - |
 TID1 |     -     -     -     -     -     -     -    22     -   -27 |
 TIDB |     -     -    42   -99   132     -     -     -     -   -72 |
 TIXI |     -    -5     -    28   -46     -     -    45     -   -33 |
 TLSE |     -     -    -2     -     -     -     -     -     -     2 |
 TOW2 |     -     -     -     -    -7     -     -     -     -     5 |
 TRO1 |     -   -89     -     -     -     -     -     -     -    89 |
 TROM |     -     -     -     -  -126     -     -     -     -    99 |
 TSKB |     -   -72   115   -15    49     -     -   -72     -   -16 |
 TWTF |     -  -118    74     -     -     -     -  -141     -   195 |
 UNSA |     -     -     -     -   -55     -     -     -     -    43 |
 URUM |     -   -30     -     -    -5     -     -     -     -    34 |
 USN3 |     -    32    12     -     -     -     -    10     -   -59 |
 USNO |     -    80   -23     -     -     -     -    29     -   -85 |
 USUD |     -     -    34   -59     -     -     -     -     -   -11 |
 VILL |     -     -     -   -23    13     -     -     -     -     5 |
 WES2 |     -     -  -126     -     -     -     -     -     -   164 |
 WHIT |     -    34     -     -     -     -     -     -     -   -34 |
 WILL |     -   -12   120     -     -     -     -     -     -  -145 |
 WSRT |     -     -    68     -     8     -     -   -54     -   -28 |
 WTZA |     -     7     -     -     -     -     -     -     -    -7 |
 WTZR |     -     -   147  -183  -118     -     -     -     -     - |
 YAR2 |     -    18   206     -  -357     -     -     -     -   -83 |
 YELL |     -    94    14     X   -13     -     -  -147     -    78 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5598    42   103    80    73    78 10114    43  5267    26 |  288   4.50
    2 |   640    53    22   125    17    96  1569    55   527   121 |  288   0.19
    3 |  3441    32    33   146    17   102  4158    41  2694    61 |  288   1.56
    4 |   935   170    85     X   103   132   856   113  1009    95 |  277   0.69
    5 |   849    48    38    38    30    71  7674    26   685    33 |  288   1.06
    6 |  1656    39    41    61    23    94  1890    24  1316    61 |  288   0.71
    7 |  1239    41    31    81    17    87  1130    46  1001    27 |  288   0.53
    8 |  2046   107    52   109    39    33  3278    35  2430    88 |  288   1.27
    9 |  4078    81    30    49    45    65  4343    29  3016    56 |  288   1.89
   10 |  3783    54    21   102    24    81  3596    41  4532    80 |  288   2.98
   11 |   612    63    43    50    19   116   740    32   554    39 |  288   0.31
   13 |  1137    49    79    82    27    82  1569    31   977    31 |  288   0.22
   14 |  1063    43    36    29    43    79  1631    60   834    73 |  288   0.20
   15 |  2786   121    58   105   102   173  2421   117  2553    59 |  288   1.96
   16 |   657    37    26    40    15    61  1583    31   628    45 |  288   0.31
   17 |  3407    20    63    57    24    44   612    40  3594    69 |  288   0.32
   18 |  1094    44    24    36    21    89  1538    47   921    43 |  288   0.23
   19 |   427    63    57   114    57   102  1297    27   525    70 |  288   0.21
   20 |   942    74    25    72    33    29  1360    28   851   120 |  288   0.22
   21 |   908    73    25    36    29   109  1417    53   903    47 |  288   0.31
   22 |   809    37    26    51    45    84   525    47  1243    65 |  288   0.26
   23 |   924    57    23    55    22    68  1549    42   589    35 |  288   0.34
   24 |  5867    89    60   109   115   204  2581    74  4887    61 |  288   2.58
   25 |  2418    87    52     X    42    85 13487    44  3000    64 |  282   2.93
   26 |  1202    45    72    85    29    87  1119    60  1027    28 |  288   0.44
   27 |  4321    76    75    39    40    61  3518    28  4246    49 |  288   2.67
   28 |  7718    62    61    52    54    80  8389    35  6504    29 |  288   0.82
   29 |  1355    49    72    59    23    77   827    34  1518    79 |  288   0.82
   30 |  3642    48    51    39     -    86  5556    33  4132    81 |  288   2.29
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    39    25     -     -     -     -    29     -    26 |  288   9.72
 ALGO |     -    34    23    36    28     -     -    24     -    30 |  288   0.05
 ALIC |     -    17     -     -    21     -     -     -     -     - |  202   8.12
 ALRT |     -    20     -     -     -     -     -     -     -    20 |  288   6.43
 AMC2 |     -    46    17    77     -     -     -    18     -    26 |  288   0.05
 AREQ |     -    46    54     -    85     -     -     -     -    66 |  267  10.67
 ARTU |     -    31     -    34    29     -     -     -     -    33 |  288   9.93
 ASPA |     -     -     -     -    39     -     -     -     -    31 |  279    >>>
 AUCK |     -    54     -     X   131     -     -     -     -    55 |  288    >>>
 BAHR |     -    49    26     -    46     -     -    27     -    22 |  288   0.51
 BILI |     -    33     -     -   103     -     -     -     -    52 |  286   7.90
 BJFS |     -     -     -     -    35     -     -     -     -    28 |  269   8.39
 BOGT |     -     -     -    44     X     -     -     -     -    25 |  288  10.25
 BOR1 |     -    22     -     -    37     -     -    26     -     X |  282   0.61
 BREW |     -     -    20     -     -     -     -     -     -    27 |  288   0.04
 BRFT |     -     -     -     -    29     -     -     -     -    23 |  199   0.08
 BRMU |     -     -     -     -    27     -     -     -     -    21 |  242    >>>
 BRUS |     -    38    22     -     -     -     -     -     -    21 |  288   0.04
 CAS1 |     -    19     -    63    28     -     -    24     -    30 |  288   7.79
 CHAT |     -     -     -     -    39     -     -     -     -    30 |  278  13.00
 CHUR |     -     -    40     -   119     -     -     -     -    37 |  288   0.21
 CRO1 |     -    29    18    49    25     -     -    27     -    19 |  288   0.05
 DAEJ |     -    36     -     -     -     -     -     -     -    36 |  287   7.00
 DAKA |     -    43     -     -    55     -     -     -     -     - |  267   8.08
 DARW |     -     -    37     -    32     -     -    25     -    45 |  288   2.95
 DAV1 |     -    25     -     -    31     -     -     -     -     - |  131   3.44
 DGAR |     -    17     -     -    15     -     -     -     -    20 |  288  15.56
 DRAO |     -    30    13     -    32     -     -    41     -    28 |  288   0.05
 FAIR |     -     -    13    36     X     -     -    37     -    44 |  288   8.17
 FLIN |     -    26     -     -    33     -     -     -     -     - |  273  10.48
 GLPS |     -    27     -     -    69     -     -    32     -    27 |  288   8.53
 GMAS |     -     -    13     -     -     -     -     -     -    17 |  288 338.48
 GODE |     -    30    13     -     -     -     -     -     -    30 |  288    >>>
 GOLD |     -    28     -    50    60     -     -    29     -    45 |  288  11.24
 GRAS |     -    35     -     -    22     -     -     -     -    41 |  288   7.77
 GRAZ |     -    38    23     -     -     -     -     -     -    17 |  288   5.07
 GUAM |     -    57     -   126    62     -     -     -     -   111 |  275  13.19
 GUAT |     -     -     -     -    22     -     -     -     -    17 |  279    >>>
 HARB |     -    35     -     -     -     -     -     -     -    35 |  287  45.53
 HLFX |     -     -    19     -     -     -     -     -     -    25 |  286  27.73
 HOB2 |     -     -    31     -    21     -     -    35     -    30 |  288   0.16
 HOFN |     -     -     -     -    53     -     -     -     -    42 |  265    >>>
 HRAO |     -     -     -     -    76     -     -    33     -    31 |  288   0.69
 IISC |     -    24     -    47    31     -     -     -     -     X |  288  12.44
 IRKT |     -     -     -    80    27     -     -     -     -    52 |  288   0.22
 ISPA |     -     -     -     -   103     -     -    59     -    42 |  288   8.75
 JPLM |     -     -    29     -    33     -     -     -     -    40 |  288   1.04
 KARR |     -    22     -     -    28     -     -     -     -     - |  270   8.47
 KERG |     -     -    22    72    75     -     -    17     -    20 |  288   1.78
 KIRU |     -    19     -     -     -     -     -     -     -    19 |  288   8.14
 KOKB |     -     -    61     -   137     -     -    32     -   168 |  288   0.09
 KOUR |     -     -     -    83    33     -     -    28     -    50 |  288  13.27
 LPGS |     -    43    37   116    60     -     -    24     -    27 |  288  17.60
 MAC1 |     -    34     -    71   102     -     -     -     -    24 |  288   5.96
 MAD2 |     -     -    17     -     -     -     -    14     -    18 |  288   0.08
 MALI |     -     -     -    59    70     -     -     -     -    61 |  288  21.48
 MAS1 |     -     -    19    30    38     -     -     -     -    15 |  288  14.74
 MATE |     -     -     -     -    19     -     -     -     -    15 |  253   0.10
 MAW1 |     -    34     -     -    26     -     -     -     -    33 |  240   7.27
 MBAR |     -    48     -     -    55     -     -     -     -    50 |  287  22.08
 MCM4 |     -   125    51    62    65     -     -    22     -    43 |  288  33.83
 MDO1 |     -    70     -     -   154     -     -     -     -    53 |  288  15.42
 MEDI |     -     -    21     -     -     -     -     -     -    28 |  276   0.18
 MIZU |     -    53    36     -     -     -     -     -     -   109 |  283    >>>
 MKEA |     -     -     -    52    33     -     -     -     -    25 |  288  24.49
 NICO |     -     -     -     -    31     -     -    20     -     - |  246  43.90
 NKLG |     -     -     -     -    74     -     -     -     -    58 |  266    >>>
 NLIB |     -     -     -     -    28     -     -    43     -    59 |  288   0.05
 NNOR |     -     -    39    32     -     -     -    27     -    34 |  288  12.20
 NOUM |     -     -     -     -    26     -     -    16     -     - |  174    >>>
 NPLD |     -    29    24     -     -     -     -     -     -    23 |  287   0.04
 NRC1 |     -    33    23     -    29     -     -    22     -    34 |  288   0.04
 NRIL |     -     -     -     -    32     -     -     -     -    25 |  275   6.50
 NTUS |     -    34     -    71    67     -     -    36     -    38 |  288   9.27
 NYA1 |     -    16     -     -     -     -     -    22     -    27 |  288   0.07
 NYAL |     -     -     -     -    27     -     -     -     -    21 |  279   0.05
 OHI2 |     -    48     -   147     X     -     -     -     -   113 |  288  22.55
 ONSA |     -    24    46    46    38     -     -     -     -     - |  288   0.06
 PDEL |     -    30     -     -    39     -     -     -     -     - |  241  53.91
 PERT |     -    34    33    56    58     -     -     -     -    21 |  288   1.53
 PIE1 |     -     -    52    56     -     -     -     -     -    57 |  252    >>>
 PIMO |     -     -     -    44    49     -     -     -     -    24 |  288   9.94
 POL2 |     -    57     -     -    33     -     -     -     -    70 |  288   9.59
 POTS |     -     -     -     -    15     -     -     -     -    12 |  271  10.89
 PRDS |     -     -    25     -     -     -     -    28     -    11 |  287  12.52
 PTBB |     -    23    23     -     -     -     -     -     -    27 |  288   0.25
 QAQ1 |     -    43    22     -     -     -     -     -     -    27 |  288   7.20
 RABT |     -    25     -     -     -     -     -     -     -    25 |  288  23.00
 RESO |     -    21     -     -    27     -     -     -     -     - |  258   5.86
 RIOG |     -    31    25   102    40     -     -    33     -    42 |  288   9.02
 SCH2 |     -    27    12     -    45     -     -     -     -    25 |  288  14.19
 SELE |     -    33     -     -     -     -     -     -     -    33 |  288  39.63
 SFER |     -   104    80     -     -     -     -     -     -     - |  150 412.83
 SPT0 |     -    19    14     -     -     -     -     -     -     - |  288   0.08
 STJO |     -     -    21     -    59     -     -    29     -    29 |  288   0.06
 STR1 |     -     -    22     -     -     -     -     -     -    29 |  288   4.41
 SUTH |     -    12     -     -     -     -     -     -     -    12 |  288   7.98
 SUTM |     -     -    40     -   187     -     -    80     -    39 |  281  12.88
 SYOG |     -     -    20     -    40     -     -    18     -    26 |  288   0.71
 THTI |     -     -    43    59    58     -     -     -     -    44 |  288    >>>
 THU3 |     -    46    59     -     X     -     -    97     -     - |  288   6.34
 TID1 |     -     -     -     -     -     -     -    26     -    32 |  287   7.73
 TIDB |     -     -    36    49    52     -     -     -     -    42 |  288   0.10
 TIXI |     -    35     -    60    82     -     -    18     -    41 |  287   6.80
 TLSE |     -     -    18     -     -     -     -     -     -    24 |  288   0.60
 TOW2 |     -     -     -     -    35     -     -     -     -    27 |  264   1.82
 TRO1 |     -    24     -     -     -     -     -     -     -    24 |  288   9.19
 TROM |     -     -     -     -    20     -     -     -     -    16 |  268   8.65
 TSKB |     -    44    28   109    89     -     -    42     -    62 |  288   1.69
 TWTF |     -    38    29     -     -     -     -    28     -    48 |  288   0.07
 UNSA |     -     -     -     -    30     -     -     -     -    24 |  182  13.36
 URUM |     -    26     -     -    37     -     -     -     -    15 |  288  16.88
 USN3 |     -    42    31     -     -     -     -    40     -    28 |  288   0.03
 USNO |     -    33    21     -     -     -     -    26     -    31 |  288   0.03
 USUD |     -     -    14    71     -     -     -     -     -    47 |  288   0.10
 VILL |     -     -     -    26    23     -     -     -     -    13 |  288  12.36
 WES2 |     -     -    11     -     -     -     -     -     -    14 |  286   0.06
 WHIT |     -    27     -     -     -     -     -     -     -    27 |  288   3.21
 WILL |     -    37    15     -     -     -     -     -     -    32 |  288 138.04
 WSRT |     -     -    20     -    26     -     -    15     -    15 |  288   0.03
 WTZA |     -    25     -     -     -     -     -     -     -    25 |  276   0.53
 WTZR |     -     -    28    33    56     -     -     -     -     - |  288   0.09
 YAR2 |     -    33    20     -    27     -     -     -     -    30 |  288  13.11
 YELL |     -    71    42     X   204     -     -    20     -    33 |  288   0.06
 -----+-------------------------------------------------------------+--------------
 TOT  |  2905    50    39    72    60    95  4354    42  2710    47 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.96   | 3.73e-14  7.84e-15  3.44e-15 |
 NPLD |   287     0     0   286    9.83   | 3.84e-14  8.08e-15  2.99e-15 |
 NRC1 |   288     0     0   288    8.45   | 4.30e-14  9.26e-15  3.31e-15 |
 AMC2 |   288     0     0   288    7.14   | 4.55e-14  1.05e-14  2.25e-15 |
 USNO |   288     0     0   288    6.23   | 5.97e-14  2.71e-14  2.88e-15 |
 KOKB |   288     0     0   288    5.76   | 4.59e-14  1.01e-14  5.03e-15 |
 ONSA |   288     0     0   287    5.64   | 3.78e-14  7.55e-15  3.35e-15 |
 YELL |   288     0     0   288    4.70   | 3.46e-14  9.10e-15  4.25e-15 |
 USN3 |   288     0     0   288    4.58   | 7.45e-14  2.76e-14  3.49e-15 |
 WSRT |   288     0     0   288    4.03   | 2.46e-14  6.42e-15  1.74e-15 |
 SPT0 |   288     1     0   287    3.87   | 3.97e-14  4.96e-15  4.44e-15 |
 PIE1 |   252     0     0   249    2.78   | 7.58e-14  1.63e-14         - |
 BREW |   288     0     0   143    2.74   | 6.18e-14  1.05e-14  3.77e-15 |
 WES2 |   286     0     0   141    2.72   | 4.18e-14  1.59e-14  4.80e-15 |
 WTZR |   288     0     0   288    2.41   | 5.05e-14  2.05e-14  4.25e-15 |
 CRO1 |   288     0     0   288    2.19   | 1.17e-13  1.33e-14  2.69e-15 |
 MATE |   253     0     0   251    1.91   | 4.11e-14  1.17e-14         - |
 NLIB |   288     0     0   288    1.76   | 4.46e-14  1.33e-14  2.26e-15 |
 DRAO |   288     0     0   288    1.62   | 3.66e-14  9.11e-15  6.63e-15 |
 STJO |   288     0     0   288    1.57   | 3.22e-14  8.53e-15  4.99e-15 |
 NYA1 |   288     0     0   288    1.35   | 2.84e-14  1.18e-14  5.60e-15 |
 MAD2 |   288     0     0   288    1.22   | 6.70e-14  1.71e-14  6.83e-15 |
 CHUR |   288     2     0   286    1.09   | 5.81e-14  1.65e-14  5.83e-15 |
 TWTF |   288     0     0   143    1.05   | 6.21e-14  1.81e-14  5.47e-15 |
 ALGO |   288     0     0   288    0.98   | 2.73e-14  9.38e-15  2.88e-15 |
 NYAL |   279     0     0   278    0.89   | 2.98e-14  9.37e-15  2.70e-15 |
 HOB2 |   288     0     0   288    0.86   | 1.47e-13  1.68e-14  1.17e-14 |
 IRKT |   288     2     0   286    0.73   | 9.15e-14  2.79e-14  2.06e-14 |
 GODE |   288     1     0   142    0.34   | 6.85e-14  1.79e-14  3.63e-15 |
 TIDB |   288     0     0   288    0.25   | 2.33e-13  2.72e-14  6.74e-15 |
 BRFT |   199     0     0   199    0.24   | 6.65e-14  1.79e-14         - |
 USUD |   288     0     3    76    0.15   | 2.50e-13  2.94e-14  7.90e-15 |
 G02  |   288     0     3   121    0.14   | 5.61e-13  5.82e-14  2.06e-14 |
 PTBB |   288     0     1   170    0.12   | 3.50e-13  7.47e-14  2.21e-14 |
 G07  |   288     0     0   288    0.08   | 3.41e-13  6.57e-14  5.83e-14 |
 G06  |   288     0     1   285    0.08   | 5.44e-13  1.39e-13  4.65e-14 |
 G26  |   288     0     0   288    0.06   | 3.96e-13  1.09e-13  4.81e-14 |
 WTZA |   276     0     0   275    0.06   | 4.47e-13  1.36e-13  4.51e-14 |
 BOR1 |   282     0     0   279    0.05   | 4.67e-13  1.23e-13  4.15e-14 |
 G05  |   288     0     0   288    0.05   | 1.80e-13  6.50e-14  7.11e-14 |
 G23  |   288     0     1   143    0.04   | 5.29e-13  7.53e-14  3.05e-14 |
 G29  |   288     0     0   288    0.04   | 4.05e-13  1.28e-13  1.07e-13 |
 MEDI |   276     0     0   131    0.04   | 4.40e-14  1.20e-14  1.16e-14 |
 TLSE |   288     0     0   143    0.03   | 3.87e-13  1.35e-13  3.81e-14 |
 HRAO |   288     0     0   288    0.03   | 1.50e-13  3.10e-14  6.76e-14 |
 BAHR |   288     0     0   288    0.03   | 3.58e-13  1.04e-13  3.29e-14 |
 G04  |   277     0     0   275    0.03   | 4.40e-13  1.63e-13  7.39e-14 |
 G25  |   282     0     0   281    0.02   | 2.08e-13  1.18e-13  1.67e-13 |
 SYOG |   288     0     0   288    0.02   | 8.16e-13  2.10e-13  6.28e-14 |
 TSKB |   288     0     0   288    0.01   | 1.07e-12  3.29e-13  1.87e-13 |
 KERG |   288     0     0   288    0.01   | 1.20e-12  3.45e-13  1.32e-13 |
 G08  |   288     0     0   288    0.01   | 1.29e-12  4.29e-13  1.04e-13 |
 G03  |   288     0     0   288    0.01   | 1.29e-12  4.84e-13  1.74e-13 |
 TOW2 |   264     0     0   262    0.00   | 3.95e-13  1.67e-13  1.43e-13 |
 SFER |   150     0     0    10    0.00   | 3.74e-13  1.16e-13         - |
 JPLM |   288     0     0   288    0.00   | 7.17e-13  2.04e-13  8.54e-14 |
 WHIT |   288     0     0   288    0.00   | 4.53e-13  3.03e-13  3.09e-13 |
 GPST |   288     0     0     0    0.00   | 3.15e-14  1.10e-14  1.89e-15 |
 ALIC |   202     0     0     0    0.00   |        -         -         - |
 DAV1 |   131     0     0     0    0.00   | 2.51e-13  5.94e-13         - |
 NICO |   246     1     0     0    0.00   |        -         -         - |
 NOUM |   174     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   266     2     0     0    0.00   |        -         -         - |
 HOFN |   265     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   278     0     0     0    0.00   |        -         -         - |
 BJFS |   269     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G30  |   288     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     4     0    0.00   | 7.05e-13  7.17e-14  8.52e-14 |
 G27  |   288     0     0     0    0.00   | 1.24e-12  4.49e-13  2.71e-13 |
 G24  |   288     0     0     0    0.00   | 1.19e-12  4.58e-13  2.02e-13 |
 G22  |   288     0     6     0    0.00   | 7.05e-13  6.89e-14  2.59e-14 |
 G21  |   288     1     6     0    0.00   | 1.17e-12  1.64e-13  3.98e-14 |
 G20  |   288     0     6     0    0.00   | 6.69e-13  6.16e-14  2.07e-14 |
 G19  |   288     0     6     0    0.00   | 7.00e-13  7.13e-14  1.57e-14 |
 G18  |   288     0     6     0    0.00   | 8.59e-13  9.00e-14  2.02e-14 |
 G17  |   288     0     4     0    0.00   | 6.13e-13  7.27e-14  2.65e-14 |
 G16  |   288     0     6     0    0.00   | 5.45e-13  6.42e-14  3.76e-14 |
 G15  |   288     0     0     0    0.00   | 1.57e-12  5.36e-13  1.71e-13 |
 G14  |   288     0     6     0    0.00   | 5.64e-13  6.83e-14  1.90e-14 |
 G13  |   288     0     6     0    0.00   | 5.84e-13  6.06e-14  2.34e-14 |
 G11  |   288     0     6     0    0.00   | 6.63e-13  6.76e-14  3.27e-14 |
 G10  |   288     0     0     0    0.00   | 1.15e-12  3.91e-13  2.87e-13 |
 G09  |   288     0     0     0    0.00   | 1.65e-12  4.90e-13  1.82e-13 |
 G01  |   288     0     0     0    0.00   | 1.48e-12  6.58e-13  4.29e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   182     0     0     0    0.00   |        -         -         - |
 TROM |   268     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TID1 |   287     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     1     0     0    0.00   | 3.96e-13  4.35e-13  3.48e-13 |
 SUTM |   281     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 STR1 |   288     0     0     0    0.00   |        -         -         - |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 5.82e-13  4.23e-13  9.34e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   258     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   287     0     0     0    0.00   |        -         -         - |
 POTS |   271     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.88e-12  4.62e-13  1.41e-13 |
 PDEL |   241     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   275     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MIZU |   283     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 8.59e-13  6.24e-13  2.20e-12 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAW1 |   240     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KARR |   270     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   286     0     1     0    0.00   | 2.27e-13  4.48e-13  2.19e-12 |
 GUAT |   279     2     0     0    0.00   |        -         -         - |
 GUAM |   275     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GMAS |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   273     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.56e-13  4.76e-13  2.85e-13 |
 DAKA |   267     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   242     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   279     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   267     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.75e-17  3.30e-16  1.98e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      SPT0      WSRT |
------------------------------------------+------------------------------+
