
 GPS week: 1373   Day: 6   MJD: 53861                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2773      0    -0.81     1.07     3.45     0.00      0
 cod |   288     0  30071    845    -1.39     1.56     0.04    14.03      0
 emr |   288     0  23268      0   818.90    48.43     0.03    22.43      0
 esa |   288     0  18438    736   818.88    48.52     0.05     8.17      0
 gfz |   288     0  31696    376    -0.76     0.95     0.03    21.36      0
 iga |    96     0   2773      0    -0.84     1.11     0.14     0.00      0
 igu |    96     0   2773     17    -1.01     2.20     4.52     0.00      0
 jpl |   288     0  20950      1     0.87    -3.16     0.03    19.28      0
 usn |   288     0  39379    672     0.90    -3.14     0.04    14.73      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn |
 -----+-------------------------------------------------------+
    1 |  2131     X   -39     X    65   -87  2229   -10   -20 |
    2 | -1998   -17    -3  -131    77   -35  2468    67  -107 |
    3 | -2832   -28  -147   -91    54    24 -5798   133    49 |
    4 | -1614   127   -75   162    31    72   204    22  -171 |
    5 | -1161    -9   -47   -63   116    35-11986   -53    17 |
    6 | -3467   -45  -174   315    53   121 -6194   139  -127 |
    7 |   370  -111  -109     7   -39    20  -187   167   105 |
    8 |  3224   -71    11   -12   111    52  3966   -83     8 |
    9 | -7554   -95   -59   145   114    94  -420    37  -114 |
   10 |   123  -194   119   -97    82  -121   667   -91    59 |
   11 |    12    27  -144     0    74    19 -1379   145   -98 |
   13 |  2468   185  -268   -96    83   203  2178   128     X |
   14 |  3153   104   -54   -77   -30   -66  1716   151  -129 |
   15 | -7743  -211   -58     9    59   -57  4782    95    74 |
   16 |  4571  -117  -108    13    57   -69  2390   130    18 |
   17 | -2424   136  -271    78    27   109  2678   174   -27 |
   18 |  4600   -43   -20   -19     1  -162  2590   158  -127 |
   19 | -2127   -59   -80    -2    95   -98  1758  -169   261 |
   20 |  3209   -27   -25  -104    27  -126  1184   -84   192 |
   21 |  4060  -124   -44    10    49  -106  2443   134   -72 |
   22 |  4636     1  -107    48    42  -107 13527   217  -210 |
   23 |  -472   128   -28   -36    66    92  2692    13  -167 |
   24 |  -819    18    13  -119    86    89 10451   -67    -7 |
   25 | -1039    30  -117   114    13     5-23240   161  -145 |
   26 | -1238     X  -164   106    66   -14  1143   194  -149 |
   27 | -4634   -46   -11    50    98    77  1993   -72   -15 |
   28 |  7895   -30   -27  -222    81   -53  8026    72   -19 |
   29 | -1471     X   -65    62     3   -79 -1236   119   -94 |
   30 |   127   133  -260   177    55   162-22749   292  -290 |
 -----+-------------------------------------------------------+
 ALGO |     -   129   -17   -40  -113     -     -    93   -31 |
 ALIC |     -    59     -     -   -94     -     -    61     - |
 ALRT |     -  -195     -     -   -92     -     -     -   320 |
 AMC2 |     -   -87   170     -     -     -     -  -213   104 |
 ARTU |     -     -     -   123    36     -     -     -  -133 |
 ASPA |     -     -     -     -   177     -     -     -  -257 |
 AUCK |     -  -267     -     -   161     -     -     -    20 |
 BAHR |     -    40    16     -   -48     -     -     -     8 |
 BILI |     -     -     -     -    51     -     -     -   -74 |
 BJFS |     -     -     -     -   -96     -     -     -   139 |
 BOGT |     -     -     -   -47    48     -     -     -   -44 |
 BOR1 |     -   163     -     -   -94     -     -    16   -37 |
 BREW |     -     -    16     -     -     -     -     -   -25 |
 BRFT |     -   104     -     -   -69     -     -     -     - |
 BRMU |     -     -     -     -    68     -     -     -   -99 |
 BRUS |     -   -39    79     -     -     -     -     -   -82 |
 CAS1 |     -    -5     -   132   -10     -     -    -6   -46 |
 CEDU |     -     -     -  -191     -     -     -     -   106 |
 CHAT |     -    19     -     -   -59     -     -     -    67 |
 CHUR |     -    73    68     -  -184     -     -     -    98 |
 COCO |     -    45     -  -145   -66     -     -   -71   226 |
 CRO1 |     -   -14    32   -22   100     -     -   -24  -136 |
 DAEJ |     -   159   -65     -     -     -     -     -   -52 |
 DARW |     -    25    95     -   -18     -     -   -66   -56 |
 DAV1 |     -    59     -     -  -130     -     -     -   137 |
 DGAR |     -  -151     -     -    15     -     -     -   121 |
 DRAO |     -   130   -50     -  -101     -     -    79    -5 |
 DWH1 |     -   321   161     -     -     -     -  -324  -144 |
 FAIR |     -     -    92   -70   -48     -     -   -37    14 |
 FLIN |     -    60     -     -   -39     -     -     -     - |
 GLPS |     -    21     -     -    79     -     -  -106     5 |
 GMAS |     -     -    98     -     -     -     -     -  -149 |
 GODE |     -     -     6    45     -     -     -     -   -34 |
 GOLD |     -   156     -   -55  -115     -     -   -17    71 |
 GRAS |     -   -17     -     -   -11     -     -     -    32 |
 GRAZ |     -  -264   131     -    16     -     -     -    29 |
 GUAM |     -  -150     -     -    92     -     -     -     9 |
 GUAT |     -   -89     -     -   -23     -     -     -   118 |
 HARB |     -  -123     -     -   -23     -     -     -   151 |
 HLFX |     -     -   -12     -     -     -     -     -    18 |
 HOB2 |     -   116   106     -   -80     -     -    -1  -155 |
 HOFN |     -     -     -     -    86     -     -     -  -125 |
 HRAO |     -     -     -     -  -157     -     -   100    97 |
 INVK |     -  -137     -     -     -     -     -     -   130 |
 ISPA |     -    20     -     -    -4     -     -   -84    97 |
 JPLM |     -     -    62     -  -102     -     -     -    54 |
 KERG |     -     -   -87   -88    23     -     -    46    87 |
 KIRU |     -   -48     -   108     -     -     -     -   -10 |
 KOKB |     -     -   182     -   -76     -     -   -61   -88 |
 KOUR |     -   105     -     8   -93     -     -   -66   116 |
 LPGS |     -    -7   -11    66   111     -     -  -102   -40 |
 MAC1 |     -   -79     -    87   -34     -     -     -    82 |
 MAD2 |     -     -   146     -     -     -     -  -221    68 |
 MAS1 |     -    74    -7   -33  -112     -     -    79    17 |
 MATE |     -    25     -    62    -5     -     -     -   -51 |
 MAW1 |     -   106     -     -   -12     -     -     -   -87 |
 MCM4 |     -     -   113  -371     X     -     -     -    11 |
 MDO1 |     -     -     -     -  -153     -     -     -   222 |
 MEDI |     -     -     0     -     -     -     -     -     0 |
 MKEA |     -     -     -   113   -67     -     -     -    34 |
 NICO |     -     -     -     -    12     -     -   -13     - |
 NISU |     -   118     -     -     -     -     -     -  -113 |
 NKLG |     -    87     -     -   -78     -     -     -    30 |
 NLIB |     -     -     -     -   -31     -     -     2    43 |
 NNOR |     -     -    55   248     -     -     -  -187    23 |
 NOT1 |     -     0     -     -     -     -     -     -     0 |
 NPLD |     -  -134    72     -     -     -     -     -    18 |
 NRC1 |     -    95    15     -  -122     -     -    42     9 |
 NRIL |     -     -     -     -   -66     -     -     -    95 |
 NTUS |     -  -289     -  -150   141     -     -     -   154 |
 NYA1 |     -    80     -     -     -     -     -   -68    14 |
 NYAL |     -     -     -     -   -25     -     -     -    36 |
 OHI2 |     -     8     -   149   -62     -     -     -     X |
 ONSA |     -  -130     -    81    54     -     -     -     - |
 PDEL |     -   -13     -     -     8     -     -     -     - |
 PERT |     -     -   -29   -83     1     -     -     -    88 |
 PIE1 |     -     -     6   -22     -     -     -     -     2 |
 PIMO |     -     -     -   -92    26     -     -     -    13 |
 POL2 |     -   126     -     -   -52     -     -     -   -45 |
 POTS |     -     -     -     -   -24     -     -     -    35 |
 PRDS |     -   -39    67     -     -     -     -   -50     1 |
 PTBB |     -    12    25     -     -     -     -     -   -49 |
 QAQ1 |     -  -191    98     -     -     -     -     -    32 |
 QUIN |     -  -116     -     -     -     -     -     -   111 |
 RESO |     -    51     -     -   -37     -     -     4     - |
 RIOG |     -   498   143     X    57     -     -  -421  -222 |
 SANT |     -   -40     -   190   -15     -     -     -   -46 |
 SCH2 |     -    19   118     -  -129     -     -   -38    39 |
 SCUB |     -     -     -     -     -     -     -   -62    81 |
 STJO |     -   104    13     -   -78     -     -     2    -8 |
 STR1 |     -     -    -5     -     -     -     -     -     7 |
 SUTH |     -     -     -     -   -74     -     -     -   107 |
 SUTM |     -     -  -163     -   628     -     -  -288  -200 |
 SYOG |     -    83   -79     -  -115     -     -   136    31 |
 THTI |     -     -   109  -171  -130     -     -     -   116 |
 THU3 |     -  -151     -     -    99     -     -     -     - |
 TID1 |     -     -     -     -     -     -     -   -36    47 |
 TIDB |     -    82   -30    74   -11     -     -     -   -58 |
 TIXI |     -    43     -    85    78     -     -   -41  -142 |
 TLSE |     -     -     4     -     -     -     -     -    -6 |
 TOW2 |     -   101     -     -   -86     -     -    -3    31 |
 TRO1 |     -  -154     -     -     -     -     -     -   147 |
 TROM |     -     -     -     -  -109     -     -     -   158 |
 TSKB |     -    14    70   -84   -71     -     -   -38    56 |
 TWTF |     -   -31    76     -     -     -     -   -87    28 |
 USN3 |     -   -45    18     -     -     -     -     7     6 |
 USNO |     -    74    22     -     -     -     -    29  -143 |
 USUD |     -     -    58    24   -48     -     -     -   -32 |
 VILL |     -     -     -  -117   -41     -     -     -   124 |
 WES2 |     -     -    38     -     -     -     -     -   -58 |
 WHIT |     -    59     -     -     -     -     -     -   -56 |
 WILL |     -    16   106     -     -     -     -     -  -177 |
 WSRT |     -     -    99     -   -44     -     -     1   -89 |
 WTZA |     -   -44     -     -     -     -     -     -    42 |
 YAKT |     -    20     -   -35     -     -     -     -     - |
 YAR2 |     -  -137    86     -    76     -     -     -  -111 |
 YELL |     -    93    40   -24   -46     -     -   -71    22 |
 YSSK |     -   -22     -     -    14     -     -     -     - |
 ZIMM |     -  -237     -     -     -     -     -     -   226 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6697     X    34     X    45   352  4928   104    55 |  276   4.95
    2 |  1420    51    24    50    33    67  1374    45    41 |  288   0.24
    3 |  3887    60    15    29    14   139  3820    23    50 |  288   2.13
    4 |  1739    48    40    35    38    80   920    15    73 |  288   0.72
    5 |  6150    27    23    18    24    89  6919    20    31 |  288   1.06
    6 |  1134    54    17    39    22   130  3419    18    24 |  288   0.96
    7 |  1383    52    14    44    18   102  1013    20    23 |  288   0.82
    8 |  2534    40    13    47    11   101  4369    17    17 |  288   2.64
    9 |  2710    40    17    27    25    75  3257    22    38 |  288   3.03
   10 |  2056    40    17    36    34    96  1613    28    23 |  288   2.04
   11 |  2263    54    22    65    33   152  1825    22    29 |  288   0.50
   13 |  1384    49    24    55    12   190  1366    31     X |  288   0.30
   14 |  1445    75    27    36    28   155  1104    48    33 |  288   0.22
   15 |  4123    51    18    32    33    77  3758    16    73 |  288   3.13
   16 |  1176    41    20    35    21   118  1371    32    53 |  288   0.17
   17 |   886    45    19    52    21   134  1338    35    33 |  288   0.15
   18 |  1135    43    22    28    33    82  1284    30    41 |  288   0.33
   19 |  1489    55    70    48    25   141   748    83    38 |  288   0.18
   20 |  1045    56    20    33    29   147   798    27    61 |  288   0.38
   21 |   655    56    21    34    33    49  1454    24    66 |  288   0.32
   22 |  6768    43    19    55    18   123  9464    34    29 |  288   0.69
   23 |   864    72    33    51    26   181  1273    46    60 |  288   0.21
   24 |  5091    40    12    36    26   149  3067    19    41 |  288   4.10
   25 |  9800    35    26    25    18   101 11483    22    53 |  288   3.66
   26 |   941     X    34   143    43   143   963    48    58 |  276   0.66
   27 |  4006    62    18    46    13    81  2582    17    64 |  288   3.14
   28 |  1807    26    45    28    18   118  4077    28   109 |  288   0.26
   29 |  1541     X    36   138    36   282  1595    32    22 |  280   0.69
   30 |  1228    19    21    66    17    88 14444    18    40 |  288   2.39
 -----+-------------------------------------------------------+--------------
 ALGO |     -    24    10    30    15     -     -    11    12 |  288   0.03
 ALIC |     -    22     -     -    16     -     -    23     - |  288   9.89
 ALRT |     -    13     -     -    13     -     -     -    16 |  288   7.17
 AMC2 |     -    20    11     -     -     -     -    12    25 |  288   0.03
 ARTU |     -     -     -   115    34     -     -     -    79 |  211   8.86
 ASPA |     -     -     -     -    22     -     -     -    31 |  288    >>>
 AUCK |     -    31     -     -     8     -     -     -    26 |  288    >>>
 BAHR |     -    18    39     -    21     -     -     -    43 |  288   0.39
 BILI |     -     -     -     -    30     -     -     -    43 |  287   9.29
 BJFS |     -     -     -     -    22     -     -     -    32 |  287   8.72
 BOGT |     -     -     -    26    11     -     -     -    17 |  288  14.14
 BOR1 |     -    17     -     -    24     -     -    18    32 |  288   0.42
 BREW |     -     -    15     -     -     -     -     -    22 |  288   0.03
 BRFT |     -    34     -     -    22     -     -     -     - |  288   0.13
 BRMU |     -     -     -     -    10     -     -     -    15 |  288    >>>
 BRUS |     -    29    21     -     -     -     -     -    11 |  288   0.03
 CAS1 |     -    30     -    66    13     -     -    18    14 |  288   6.93
 CEDU |     -     -     -    58     -     -     -     -    32 |  189  63.89
 CHAT |     -    32     -     -    17     -     -     -    42 |  287  12.55
 CHUR |     -    31    39     -    38     -     -     -    29 |  288   0.05
 COCO |     -    26     -    69    20     -     -    42    18 |  288   5.77
 CRO1 |     -    50    15    39    26     -     -    17    15 |  288   0.18
 DAEJ |     -    22    16     -     -     -     -     -    29 |  288   8.33
 DARW |     -    13    18     -    16     -     -    33    54 |  288   2.80
 DAV1 |     -    51     -     -    29     -     -     -    75 |  288   2.57
 DGAR |     -    28     -     -    19     -     -     -    23 |  288  16.29
 DRAO |     -    27    14     -    16     -     -    13    37 |  288   0.03
 DWH1 |     -    28    12     -     -     -     -    26    15 |  288   0.58
 FAIR |     -     -    16    68    20     -     -    13    24 |  282   7.39
 FLIN |     -    16     -     -    11     -     -     -     - |  288   8.80
 GLPS |     -    19     -     -    21     -     -    13    17 |  288  13.23
 GMAS |     -     -    13     -     -     -     -     -    20 |  288   1.91
 GODE |     -     -    10    28     -     -     -     -    14 |  288   0.08
 GOLD |     -    39     -    55    20     -     -    19    28 |  288  13.55
 GRAS |     -    21     -     -    15     -     -     -    29 |  288   8.89
 GRAZ |     -    26    34     -    29     -     -     -    16 |  288  10.36
 GUAM |     -    26     -     -    24     -     -     -    25 |  288  11.82
 GUAT |     -    61     -     -    41     -     -     -    19 |  288    >>>
 HARB |     -    37     -     -    25     -     -     -    30 |  287  31.16
 HLFX |     -     -     9     -     -     -     -     -    14 |  286   9.50
 HOB2 |     -    34    26     -    26     -     -    24    21 |  288   0.13
 HOFN |     -     -     -     -    24     -     -     -    35 |  287    >>>
 HRAO |     -     -     -     -    31     -     -    37    26 |  288   0.47
 INVK |     -    31     -     -     -     -     -     -    30 |  287   7.47
 ISPA |     -    30     -     -    16     -     -    30    41 |  288  12.73
 JPLM |     -     -    26     -    31     -     -     -    42 |  288    >>>
 KERG |     -     -    24    50    26     -     -    42    20 |  288   2.56
 KIRU |     -    34     -    37     -     -     -     -    34 |  286   7.70
 KOKB |     -     -    19     -    38     -     -    25    53 |  288   0.06
 KOUR |     -    27     -    49    19     -     -    20    17 |  288  13.75
 LPGS |     -    44    21    31    30     -     -    31    32 |  288  32.96
 MAC1 |     -    39     -   106    36     -     -     -   102 |  288   7.68
 MAD2 |     -     -    22     -     -     -     -    18    25 |  288   0.05
 MAS1 |     -    22    27    34    16     -     -    16    29 |  288  19.13
 MATE |     -    19     -    31    10     -     -     -    26 |  288   0.10
 MAW1 |     -    46     -     -    25     -     -     -    30 |  240   9.73
 MCM4 |     -     -    21    73     X     -     -     -    17 |  286  16.81
 MDO1 |     -     -     -     -    14     -     -     -    20 |  288  28.69
 MEDI |     -     -    17     -     -     -     -     -    26 |  288   0.17
 MKEA |     -     -     -    37    11     -     -     -    20 |  288  19.92
 NICO |     -     -     -     -    21     -     -    23     - |  288  11.51
 NISU |     -    38     -     -     -     -     -     -    36 |  286   0.04
 NKLG |     -    50     -     -    27     -     -     -    42 |  287    >>>
 NLIB |     -     -     -     -    15     -     -    10    26 |  288   0.05
 NNOR |     -     -    16    50     -     -     -    25    19 |  288  11.27
 NOT1 |     -    12     -     -     -     -     -     -    12 |  288   0.21
 NPLD |     -    29    21     -     -     -     -     -    13 |  287   0.03
 NRC1 |     -    21     9     -    19     -     -    11    13 |  288   0.02
 NRIL |     -     -     -     -    28     -     -     -    40 |  280   7.27
 NTUS |     -    27     -    51    28     -     -     -    23 |  288   8.50
 NYA1 |     -    20     -     -     -     -     -    27    25 |  288   0.08
 NYAL |     -     -     -     -    21     -     -     -    31 |  287   0.08
 OHI2 |     -    33     -    76    25     -     -     -     X |  288   7.87
 ONSA |     -    40     -    38    39     -     -     -     - |  288   0.06
 PDEL |     -    19     -     -    13     -     -     -     - |  288  56.12
 PERT |     -     -    26    72    31     -     -     -    25 |  288   2.90
 PIE1 |     -     -    46    74     -     -     -     -    32 |  288   0.11
 PIMO |     -     -     -    51    34     -     -     -    42 |  288  13.43
 POL2 |     -    18     -     -    16     -     -     -    18 |  288   7.51
 POTS |     -     -     -     -    13     -     -     -    20 |  286  11.06
 PRDS |     -    27    12     -     -     -     -    14    27 |  288   0.33
 PTBB |     -    50    29     -     -     -     -     -    12 |  288   0.26
 QAQ1 |     -    19    11     -     -     -     -     -    15 |  288   6.86
 QUIN |     -    45     -     -     -     -     -     -    43 |  288   9.32
 RESO |     -    14     -     -     9     -     -    13     - |  288   6.73
 RIOG |     -    41    53     X    68     -     -    23    26 |  288   7.08
 SANT |     -    19     -    24    29     -     -     -    41 |  288   3.99
 SCH2 |     -    21    17     -    18     -     -    17    20 |  288  18.30
 SCUB |     -     -     -     -     -     -     -    13    17 |  286  12.20
 STJO |     -    21     9     -    17     -     -    14    13 |  288   0.05
 STR1 |     -     -     9     -     -     -     -     -    14 |  288   0.70
 SUTH |     -     -     -     -    19     -     -     -    28 |  288   9.04
 SUTM |     -     -    15     -    27     -     -    31    38 |  288  17.05
 SYOG |     -    56    15     -    20     -     -    54    17 |  286   0.91
 THTI |     -     -    25    61    24     -     -     -    41 |  288   7.26
 THU3 |     -    12     -     -     8     -     -     -     - |  288   7.40
 TID1 |     -     -     -     -     -     -     -    19    25 |  288   8.46
 TIDB |     -    49    37    44    15     -     -     -    15 |  288   0.12
 TIXI |     -    61     -    24    57     -     -    48    84 |  286   7.23
 TLSE |     -     -    11     -     -     -     -     -    16 |  288   0.46
 TOW2 |     -    30     -     -    16     -     -    20    17 |  288   1.57
 TRO1 |     -    10     -     -     -     -     -     -     9 |  256   7.57
 TROM |     -     -     -     -    13     -     -     -    19 |  288  10.08
 TSKB |     -    25    21    50    42     -     -    19    23 |  288   1.60
 TWTF |     -    18    13     -     -     -     -    19    22 |  288   0.07
 USN3 |     -    24     7     -     -     -     -    12    12 |  288   0.03
 USNO |     -    19     7     -     -     -     -    14    11 |  288   0.04
 USUD |     -     -    31    48    42     -     -     -    21 |  288   0.08
 VILL |     -     -     -    30    34     -     -     -    40 |  288  14.89
 WES2 |     -     -     7     -     -     -     -     -    11 |  286   0.33
 WHIT |     -    72     -     -     -     -     -     -    69 |  288  20.48
 WILL |     -    28    10     -     -     -     -     -    25 |  288 135.01
 WSRT |     -     -    36     -    34     -     -    15    15 |  288   0.03
 WTZA |     -    29     -     -     -     -     -     -    28 |  269   0.55
 YAKT |     -    31     -    53     -     -     -     -     - |  288   8.90
 YAR2 |     -    16    18     -    24     -     -     -    16 |  288  17.39
 YELL |     -    63    66    55    64     -     -    24    40 |  288   0.05
 YSSK |     -    21     -     -    14     -     -     -     - |  287  11.19
 ZIMM |     -    18     -     -     -     -     -     -    17 |  288   9.85
 -----+-------------------------------------------------------+--------------
 TOT  |  3452    37    25    54    26   142  4521    30    36 |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.98   | 4.18e-14  7.67e-15  2.93e-15 |
 WSRT |   288     0     0   288    7.92   | 3.02e-14  6.81e-15  2.00e-15 |
 NPLD |   287     0     0   286    7.78   | 3.66e-14  8.67e-15  1.71e-15 |
 BREW |   288     0     0   288    7.65   | 5.19e-14  8.75e-15  3.13e-15 |
 NRC1 |   288     0     0   288    7.32   | 3.74e-14  7.43e-15  1.84e-15 |
 AMC2 |   288     0     0   288    6.69   | 4.01e-14  1.09e-14  2.07e-15 |
 BRUS |   288     0     0   288    6.49   | 4.26e-14  9.44e-15  1.99e-15 |
 ONSA |   288     0     0   288    6.23   | 3.52e-14  8.22e-15  3.79e-15 |
 DRAO |   288     0     0   288    5.05   | 2.73e-14  6.55e-15  2.84e-15 |
 STJO |   288     0     0   288    4.02   | 3.32e-14  9.86e-15  4.13e-15 |
 NLIB |   288     0     0   288    3.70   | 4.02e-14  7.03e-15  2.51e-15 |
 ALGO |   288     0     0   288    3.45   | 2.97e-14  8.26e-15  3.88e-15 |
 PIE1 |   288     0     0   288    2.91   | 6.11e-14  1.28e-14  6.85e-15 |
 NYA1 |   288     0     0   288    2.89   | 3.43e-14  1.19e-14  5.31e-15 |
 KOKB |   288     0     0   288    2.61   | 6.58e-14  1.69e-14  3.05e-15 |
 TWTF |   288     0     0   288    2.45   | 6.56e-14  1.56e-14  6.66e-15 |
 NYAL |   287     1     0   285    2.22   | 5.30e-14  1.78e-14  5.68e-15 |
 MAD2 |   288     0     0   288    2.09   | 4.77e-14  1.32e-14  3.92e-15 |
 MATE |   288     0     0   288    1.25   | 4.06e-14  1.30e-14  5.17e-15 |
 NOT1 |   288     0     0   288    1.05   | 4.47e-14  1.34e-14  1.24e-14 |
 YELL |   288     0     0   288    0.91   | 4.14e-14  1.19e-14  5.11e-15 |
 MEDI |   288     0     0   288    0.80   | 4.44e-14  1.08e-14  1.37e-14 |
 HOB2 |   288     0     0   288    0.74   | 1.86e-13  2.20e-14  1.12e-14 |
 CRO1 |   288     0     0   288    0.68   | 1.09e-13  1.22e-14  1.52e-14 |
 CHUR |   288     0     0   288    0.66   | 5.00e-14  1.34e-14  6.91e-15 |
 GODE |   288     0     0   288    0.57   | 5.22e-14  1.17e-14  6.02e-15 |
 TIDB |   288     0     0   288    0.37   | 1.06e-13  2.04e-14  1.01e-14 |
 PTBB |   288     0     0   288    0.22   | 2.53e-13  7.16e-14  1.90e-14 |
 USUD |   288     0     0   288    0.19   | 2.60e-13  3.00e-14  7.09e-15 |
 BRFT |   288     0     0   143    0.17   | 6.18e-14  2.36e-14  1.42e-14 |
 G05  |   288     0     0   288    0.11   | 1.81e-13  5.49e-14  8.39e-14 |
 WES2 |   286     0     1   139    0.10   | 3.29e-14  9.17e-15  2.07e-14 |
 TLSE |   288     0     0   288    0.07   | 3.61e-13  1.17e-13  3.43e-14 |
 NISU |   286     0     0   285    0.06   | 1.04e-13  1.01e-14  1.98e-15 |
 G29  |   280     0     0   277    0.06   | 3.52e-13  1.04e-13  6.70e-14 |
 PRDS |   288     0     0   288    0.06   | 3.39e-13  1.05e-13  2.66e-14 |
 HRAO |   288     0     0   288    0.06   | 1.36e-13  3.11e-14  4.34e-14 |
 WTZA |   269     0     0   263    0.05   | 4.58e-13  1.02e-13  5.42e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.43e-13  1.26e-13  3.51e-14 |
 G26  |   276     0     0   274    0.04   | 4.06e-13  1.20e-13  9.12e-14 |
 DWH1 |   288     0     0   143    0.03   | 3.40e-13  1.01e-13  5.24e-14 |
 G06  |   288     0     0   288    0.03   | 5.12e-13  1.38e-13  1.13e-13 |
 G07  |   288     0     0   288    0.03   | 2.84e-13  9.90e-14  1.12e-13 |
 G30  |   288     0     0   288    0.03   | 5.97e-13  1.69e-13  1.41e-13 |
 BAHR |   288     0     0   143    0.03   | 3.47e-13  1.05e-13  2.37e-14 |
 G04  |   288     0     0   288    0.03   | 4.59e-13  1.80e-13  8.90e-14 |
 STR1 |   288     0     0   288    0.02   | 6.53e-13  1.79e-13  5.47e-14 |
 G22  |   288     0     1   143    0.01   | 6.13e-13  1.11e-13  3.42e-14 |
 SYOG |   286     0     0   285    0.01   | 7.08e-13  2.39e-13  1.07e-13 |
 TSKB |   288     0     0   288    0.01   | 1.03e-12  2.53e-13  1.75e-13 |
 USN3 |   288     0     4     1    0.01   | 1.23e-13  1.88e-14  3.79e-15 |
 G25  |   288     0     0   288    0.01   | 2.39e-13  1.39e-13  3.80e-13 |
 G10  |   288     0     0   288    0.01   | 1.05e-12  3.85e-13  2.16e-13 |
 GMAS |   288     0     0   288    0.01   | 1.24e-12  5.40e-13  2.25e-13 |
 TOW2 |   288     0     0   288    0.01   | 4.24e-13  1.37e-13  1.25e-13 |
 KERG |   288     0     0   288    0.00   | 1.20e-12  3.83e-13  2.29e-13 |
 G08  |   288     0     0   288    0.00   | 1.28e-12  3.66e-13  2.49e-13 |
 G03  |   288     0     0   288    0.00   | 1.31e-12  4.19e-13  2.70e-13 |
 PERT |   288     0     0   288    0.00   | 1.89e-12  5.47e-13  2.80e-13 |
 THTI |   288     0     0   288    0.00   | 4.16e-13  1.88e-13  5.24e-13 |
 GPST |   288     0     0     0    0.00   | 4.81e-14  7.54e-15  2.16e-15 |
 CEDU |   189     2     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 NKLG |   287     2     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.75e-13  7.54e-14  2.40e-14 |
 G27  |   288     0     0     0    0.00   | 1.17e-12  4.77e-13  4.01e-13 |
 G24  |   288     0     0     0    0.00   | 1.39e-12  4.16e-13  5.30e-13 |
 G23  |   288     0     6     0    0.00   | 5.22e-13  5.78e-14  2.19e-14 |
 G21  |   288     1     6     0    0.00   | 9.12e-13  1.28e-13  5.36e-14 |
 G20  |   288     0     6     0    0.00   | 7.13e-13  8.12e-14  4.75e-14 |
 G19  |   288     0     5     0    0.00   | 6.12e-13  6.34e-14  1.07e-14 |
 G18  |   288     0     6     0    0.00   | 8.75e-13  7.88e-14  3.85e-14 |
 G17  |   288     0     6     0    0.00   | 5.90e-13  5.85e-14  1.07e-14 |
 G16  |   288     0     6     0    0.00   | 5.33e-13  5.77e-14  1.79e-14 |
 G15  |   288     0     0     0    0.00   | 1.49e-12  5.71e-13  3.83e-13 |
 G14  |   288     0     6     0    0.00   | 6.13e-13  6.48e-14  2.45e-14 |
 G13  |   288     0     6     0    0.00   | 6.03e-13  6.85e-14  2.51e-14 |
 G11  |   288     1     6     0    0.00   | 6.25e-13  6.99e-14  3.46e-14 |
 G09  |   288     0     1     0    0.00   | 1.44e-12  4.53e-13  2.54e-13 |
 G02  |   288     0     6     0    0.00   | 6.00e-13  5.41e-14  2.61e-14 |
 G01  |   276     0     0     0    0.00   | 1.44e-12  8.88e-13  2.11e-13 |
 ZIMM |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 YAKT |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.12e-13  3.10e-13  1.33e-12 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 TROM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   256     0     0     0    0.00   |        -         -         - |
 TID1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   286     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   | 2.04e-12  8.13e-13  2.49e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   286     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   280     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   286     0     2     0    0.00   | 8.70e-13  3.50e-13  1.03e-12 |
 MAW1 |   240     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   286     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     1     0    0.00   | 6.93e-13  4.75e-13  1.70e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   287     0     0     0    0.00   |        -         -         - |
 HLFX |   286     0     0     0    0.00   | 2.19e-13  1.67e-13  5.96e-13 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   282     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   | 1.89e-13  4.34e-13  3.22e-13 |
 DARW |   288     0     0     0    0.00   | 2.27e-13  7.19e-13  2.80e-13 |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.18e-13  7.73e-13  5.08e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   211     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.85e-17  3.42e-16  2.06e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     DRAO      DRAO      NPLD |
------------------------------------------+------------------------------+
