
 GPS week: 1373   Day: 5   MJD: 53860                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2771     14     0.06    -0.27     2.54     0.00      0
 cod |   288     0  26944    834    -0.34    -0.49     0.04    14.77      0
 emr |   288     0  22980    584   768.34    50.07     0.03    21.67      0
 esa |   288     0  18634   1546   768.23    50.08     0.06     9.11      0
 gfz |   288     0  31330    577    -0.18     0.18     0.03    18.25      0
 iga |    96     0   2771      0    -0.02     0.07     0.12     0.00      0
 igu |    96     0   2771     51    -0.48     3.00     3.51     0.00      0
 jpl |   288     0  20670      0     1.58    -0.64     0.03    22.01      0
 usn |   288     0  38281    900     1.57    -0.64     0.04    14.19      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn |
 -----+-------------------------------------------------------+
    1 | -1665     X   -42     X    43    -6 -8526    -8    22 |
    2 |  -521  -166     X  -122   161   -70  3992   114  -133 |
    3 |  -544    29  -162    66    70     9  7136    46    14 |
    4 | -3817    14   -90   -16    92    -4  2710   110  -155 |
    5 |  6736    42   -35   -67    71   -34 -6803   -32    10 |
    6 |  1110    99  -221   239    73   120 -2164   106  -177 |
    7 |  -456    33   -68    50   -35    62  2346    19    55 |
    8 | -3128    14    49  -117    80    17  -345  -118    65 |
    9 | -1264   -57  -146   160   139    22   184    58   -89 |
   10 |  -739  -122   116  -189    98  -105   375   -85    77 |
   11 |  4191   -66   -35   -47    40   -71  2141   119   -84 |
   13 |  5207    98   -60    20   111   150  2271   108  -328 |
   14 |  5694    92  -140   -80    44   101  2961   136   -94 |
   15 | -9545   -95    -3   -50    24    23 -1750    19    78 |
   16 |  5427   -60  -123   137    28   -48  3723    83     0 |
   17 | -7389    25  -219   129    41   -47 -3593   150   -60 |
   18 |  4992    61   -84    11   -40     0  4023   161  -141 |
   19 |  -832   -25    19   234    -8    24  4090  -225   206 |
   20 |  4157    -8   -24  -232    25  -118  3408   -11   179 |
   21 |  5396   -95    30    49   -54   -36  1837   102   -67 |
   22 | -3466   -15   -66    89    10    33  2714   185  -241 |
   23 |   213    68   -13    99    40    55  3213   -25  -125 |
   24 | -5082    61    29  -113   116    32 -3259   -89   -47 |
   25 | -5728    77  -195   -23    11   -45-19462   140     X |
   26 |  1402     X  -145     X    60   -52  -952   202  -175 |
   27 | -5630   -22   -40   103   130    24  -432  -127    48 |
   28 | -1605   -81    87  -265   149  -147  6077   -27   -29 |
   29 |  3131     X  -102     X     2  -129  -146   149   -82 |
   30 |  3730   104  -179   117   104   227-15682   189  -337 |
 -----+-------------------------------------------------------+
 ALGO |     -     -   -52    81  -143     -     -   139    -5 |
 ALIC |     -    31     -     -   -44     -     -    16     - |
 ALRT |     -  -246     -     -     -     -     -     -   256 |
 AMC2 |     -   -66   166     -     -     -     -  -211   142 |
 ARTU |     -     -     -    56    67     -     -     -  -113 |
 ASPA |     -     -     -     -   195     -     -     -  -251 |
 AUCK |     -  -129     -     -   132     -     -     -   -36 |
 BILI |     -    37     -     -     X     -     -     -   -38 |
 BJFS |     -     -     -     -  -123     -     -     -   158 |
 BOGT |     -    90     -  -144   105     -     -     -  -136 |
 BOR1 |     -   210     -     -   -98     -     -   -60    -8 |
 BREW |     -     -     5     -     -     -     -     -    -8 |
 BRMU |     -     -     -     -   100     -     -     -  -128 |
 BRUS |     -    -9    75     -     -     -     -     -  -105 |
 CAS1 |     -    11     -    44    -6     -     -    -6   -24 |
 CEDU |     -     -     -  -355     -     -     -     -   228 |
 CHAT |     -    15     -     -   -80     -     -     -    87 |
 CHUR |     -     -    46     -  -158     -     -    17   108 |
 COCO |     -    -9     -   -84    48     -     -  -101   158 |
 CRO1 |     -     -    44   -22    92     -     -   -30  -125 |
 DAEJ |     -   199    -2     -     -     -     -     -  -204 |
 DARW |     -    27   140     -     X     -     -  -134   -34 |
 DGAR |     -  -115     -     -    60     -     -     -    42 |
 DRAO |     -   154   -65     -  -174     -     -    86    31 |
 FAIR |     -     -    47    53   -15     -     -   -41   -21 |
 FLIN |     -     4     -     -    -3     -     -     -     - |
 GLPS |     -    82     -     -    61     -     -  -117    21 |
 GMAS |     -     -    86     -     -     -     -     -  -132 |
 GODE |     -     -    36   -68     -     -     -     -   -16 |
 GOLD |     -    94     -   -22   -71     -     -   -17    34 |
 GRAS |     -     -     -     -    17     -     -     -   -22 |
 GRAZ |     -  -181   133     -    91     -     -     -  -132 |
 GUAM |     -  -178     -     -    78     -     -     -    83 |
 GUAT |     -     -     -     -   -20     -     -     -    26 |
 HARB |     -   -39     -     -  -101     -     -     -   171 |
 HLFX |     -     -   -13     -     -     -     -     -    20 |
 HOB2 |     -    32   207     -  -111     -     -   -25  -168 |
 HOFN |     -     -     -     -    43     -     -     -   -56 |
 HRAO |     -   -44     -     -  -114     -     -    18   166 |
 IISC |     -   -29     -     1    23     -     -     -     X |
 JPLM |     -     -    46     -  -139     -     -     -   108 |
 KARR |     -    69     -     -   -56     -     -     -     - |
 KERG |     -    27  -169   -45   101     -     -    31    81 |
 KIRU |     -   -26     -   -11     -     -     -     -    34 |
 KOKB |     -     -   109     -    36     -     -   -92   -70 |
 KOUR |     -    21     -   -34     -     -     -     -     - |
 LPGS |     -    78    85  -146    16     -     -   -92   -13 |
 MAC1 |     -   -46     -    79  -119     -     -     -   150 |
 MAD2 |     -     -    53     -     -     -     -  -153   155 |
 MALI |     -     -     -     -    69     -     -     -   -89 |
 MAS1 |     -     -   -51    74    19     -     -    31   -42 |
 MATE |     -     -     -  -106    53     -     -     -     - |
 MAW1 |     -     -     -     -   -89     -     -     -   115 |
 MCM4 |     -     -     -   339  -228     -     -     -    76 |
 MDO1 |     -     -     -     -  -183     -     -     -   236 |
 MEDI |     -     -    41     -     -     -     -     -   -63 |
 MKEA |     -     -     -    77   -98     -     -     -    77 |
 NICO |     -     -     -     -     7     -     -    -6     - |
 NISU |     -   138     -     -     -     -     -     -  -144 |
 NKLG |     -   -31     -     -   111     -     -     -  -111 |
 NLIB |     -     -     -     -   -41     -     -    -6    63 |
 NNOR |     -     -    64   141     -     -     -  -188   103 |
 NOT1 |     -    -6     -     -     -     -     -     -     6 |
 NPLD |     -  -146    71     -     -     -     -     -    44 |
 NRC1 |     -     -    41     -   -98     -     -     3    59 |
 NRIL |     -  -119     -     -   -25     -     -     -   157 |
 NTUS |     -  -205     -  -263    64     -     -     -   300 |
 NYA1 |     -    74     -     -     -     -     -   -37   -19 |
 NYAL |     -     -     -     -    -5     -     -     -     7 |
 OHI2 |     -   -56     -    41   -96     -     -   101     X |
 ONSA |     -   -74     -    82    19     -     -     -     - |
 PDEL |     -    -3     -     -     3     -     -     -     - |
 PERT |     -   158   -80  -231    35     -     -     -    60 |
 PETP |     -    19     -     -   -16     -     -     -     - |
 PIE1 |     -   -78    30   -67     -     -     -     -    75 |
 PIMO |     -     -     -    20    -2     -     -     -   -10 |
 POL2 |     -   158     -     -   -47     -     -   -93    41 |
 POTS |     -     -     -     -   -52     -     -     -    66 |
 PRDS |     -     -    56     -     -     -     -  -123   105 |
 PTBB |     -    53    16     -     -     -     -     -   -79 |
 QAQ1 |     -     -    22     -     -     -     -     -   -33 |
 RESO |     -    -6     -     -    92     -     -   -73     - |
 RIOG |     -   -67   150   -19   -11     -     -   -39   -72 |
 SANT |     -   -27     -   122    -5     -     -     -   -44 |
 SCH2 |     -    -3   108     -  -111     -     -   -48    55 |
 SCUB |     -    38     -     -     -     -     -  -124   154 |
 STJO |     -    93   -27     -   -50     -     -    18   -18 |
 STR1 |     -     -    18     -     -     -     -     -   -28 |
 SUTH |     -     -     -     -   -86     -     -     -   111 |
 SUTM |     -     -   120     -  -448     -     -   171   128 |
 SUWN |     -     -   110     -     -     -     -     -  -168 |
 SYOG |     -    51   -59     -  -118     -     -    65    88 |
 THTI |     -     -   -63   -79    33     -     -     -   104 |
 THU3 |     -  -136     -     -   110     -     -     -     - |
 TID1 |     -     -     -     -     -     -     -    -5     7 |
 TIDB |     -     -   -23   126    -3     -     -     -   -42 |
 TIXI |     -    86     -     X    39     -     -   -36   -83 |
 TLSE |     -     -     0     -     -     -     -     -     0 |
 TOW2 |     -    -2     -     -   -60     -     -     1    77 |
 TRO1 |     -  -130     -     -     -     -     -     -   135 |
 TROM |     -     -     -     -  -114     -     -     -   146 |
 TSKB |     -     4    38    21     0     -     -   -97    75 |
 TWTF |     -   -80    45     -     -     -     -     -    14 |
 UNSA |     -     -     -    33   127     -     -     -  -185 |
 USN3 |     -   -56    17     -     -     -     -    -4    37 |
 USNO |     -    90    27     -     -     -     -   -19  -105 |
 USUD |     -     -    25    11     -     -     -     -   -45 |
 VILL |     -     -     -   -80   -91     -     -     -   168 |
 WES2 |     -     -   -55     -     -     -     -     -    84 |
 WHIT |     -    34     -     -     -     -     -     -   -35 |
 WILL |     -    14   122     -     -     -     -     -  -201 |
 WSRT |     -     -    69     -   -58     -     -    -6   -22 |
 WTZA |     -   -37     -     -     -     -     -     -    38 |
 WUHN |     -     -    -9     -    63     -     -     -   -68 |
 YAR2 |     -     -    44     -   -23     -     -     -   -36 |
 YELL |     -   145     X     X    46     -     -  -151    23 |
 YSSK |     -    48     -     -   -39     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6335     X    20     X    56   232  5132    90    53 |  276   5.66
    2 |   503    43     X    75    41    63  1868    56    29 |  288   0.18
    3 |  3488    47    20    61    30    75  5170    26    24 |  288   1.75
    4 |  1725    47    45    30    29    95  1627    33    49 |  288   0.68
    5 |  2076    28    27    39    62    76  6975    17    25 |  288   3.13
    6 |  1345    64    18    57    24    79  3217    15    19 |  288   1.37
    7 |  1048    60    18    73    25    44  1323    18    47 |  288   0.83
    8 |  3766    63    29    32    20    95  3827    27    44 |  288   4.04
    9 |  2575    37    16    40    12    72  2516    16    22 |  288   1.33
   10 |  2256    41    17    37    18    97  2222    29    23 |  288   2.41
   11 |   946    50    27    85    33    59  1227    45    61 |  288   0.36
   13 |  1769    58    33    97    24    75  1193    29    81 |  288   0.26
   14 |   812    71    35    43    31   132  1431    34    28 |  288   0.24
   15 |  3450    46    30    24    31    78  2393    25   109 |  288   1.24
   16 |  1129    33    28    79    20   105  1781    33    45 |  288   0.22
   17 |  4182    67    45    36    42    87  2200    59    40 |  288   0.19
   18 |   670    44    38    42    35    93  1837    31    34 |  288   0.35
   19 |   736    74    58    52    67    89  2049    28    36 |  288   0.20
   20 |   629    47    38    35    28    72  1723    51    66 |  288   0.19
   21 |   827    49    42    34    36    72  1180    38    58 |  288   0.30
   22 |  1336    36    32    34    17   131  1459    27    32 |  288   0.28
   23 |   697    78    54    87    27   130  1530    22    47 |  288   0.18
   24 |  4922    55    40    33    30    73  3457    23    58 |  288   4.09
   25 |  2477    60    26    24    21    80  9719    23     X |  288   3.96
   26 |  2392     X    31     X    45   285  1105    38    62 |  276   0.44
   27 |  2883    80    35    32    21    90  1949    33    54 |  288   2.52
   28 |  2818    28    24    34    21    46  3130    47    74 |  288   0.83
   29 |  1314     X    68     X    28   264  1990    29    67 |  273   0.87
   30 |  3662    27    26    83    26   120  9976    14    35 |  288   3.36
 -----+-------------------------------------------------------+--------------
 ALGO |     -     -     8    12    12     -     -     9     7 |  288   0.03
 ALIC |     -    19     -     -    19     -     -    15     - |  288   9.44
 ALRT |     -    10     -     -     -     -     -     -    10 |  288   6.05
 AMC2 |     -    20    12     -     -     -     -     9    30 |  288   0.04
 ARTU |     -     -     -    80    49     -     -     -    79 |  252   9.32
 ASPA |     -     -     -     -    20     -     -     -    26 |  288    >>>
 AUCK |     -    31     -     -    28     -     -     -    49 |  288    >>>
 BILI |     -    15     -     -     X     -     -     -    16 |  287   8.62
 BJFS |     -     -     -     -    21     -     -     -    27 |  287   8.57
 BOGT |     -    21     -    58    16     -     -     -    21 |  288  16.85
 BOR1 |     -    24     -     -    18     -     -    20    15 |  288   0.49
 BREW |     -     -    21     -     -     -     -     -    32 |  288   0.06
 BRMU |     -     -     -     -    10     -     -     -    13 |  287    >>>
 BRUS |     -    33    33     -     -     -     -     -    19 |  288   0.03
 CAS1 |     -    32     -    55    22     -     -    20    30 |  288   6.05
 CEDU |     -     -     -    45     -     -     -     -    29 |  192  86.29
 CHAT |     -    22     -     -    32     -     -     -    55 |  287  11.72
 CHUR |     -     -    52     -    57     -     -    27    29 |  287   0.07
 COCO |     -    24     -    45    43     -     -    37    22 |  288  17.81
 CRO1 |     -     -    19    39    27     -     -    17    19 |  288   0.15
 DAEJ |     -    30    13     -     -     -     -     -    43 |  288   7.93
 DARW |     -    34    12     -     X     -     -    27    20 |  288   3.88
 DGAR |     -    40     -     -    39     -     -     -    32 |  288  14.04
 DRAO |     -    29     9     -    14     -     -    12    46 |  288   0.08
 FAIR |     -     -    17    80    26     -     -    18    37 |  288   7.57
 FLIN |     -    20     -     -    16     -     -     -     - |  288   7.58
 GLPS |     -    31     -     -    14     -     -    18    21 |  288  16.45
 GMAS |     -     -    11     -     -     -     -     -    17 |  288   1.34
 GODE |     -     -    20   112     -     -     -     -    65 |  283    >>>
 GOLD |     -    51     -   143    28     -     -    27    21 |  288  12.50
 GRAS |     -     -     -     -    11     -     -     -    14 |  288   9.59
 GRAZ |     -    16    49     -    20     -     -     -    40 |  288   8.00
 GUAM |     -    35     -     -    96     -     -     -   107 |  288  10.54
 GUAT |     -     -     -     -    15     -     -     -    19 |  288    >>>
 HARB |     -    59     -     -    74     -     -     -    40 |  287  30.20
 HLFX |     -     -     7     -     -     -     -     -    11 |  286   8.79
 HOB2 |     -    35    41     -    24     -     -    19    28 |  288   0.08
 HOFN |     -     -     -     -    22     -     -     -    28 |  277    >>>
 HRAO |     -    85     -     -    52     -     -    33    51 |  288   0.56
 IISC |     -    26     -    33    16     -     -     -     X |  288  14.97
 JPLM |     -     -    45     -    28     -     -     -    46 |  288  14.72
 KARR |     -    20     -     -    16     -     -     -     - |  288  10.39
 KERG |     -    51    32    36    46     -     -    33    23 |  288   1.34
 KIRU |     -    11     -    23     -     -     -     -    16 |  288  10.83
 KOKB |     -     -    23     -    63     -     -    52   116 |  288   0.05
 KOUR |     -    27     -    44     -     -     -     -     - |  250  15.27
 LPGS |     -    63    35    40    17     -     -    27    16 |  287  26.86
 MAC1 |     -    22     -    27    25     -     -     -    32 |  288   7.81
 MAD2 |     -     -    24     -     -     -     -    16    22 |  288   0.03
 MALI |     -     -     -     -    79     -     -     -   102 |  281  25.29
 MAS1 |     -     -    36    33    57     -     -    25    17 |  288  15.18
 MATE |     -     -     -    62    31     -     -     -     - |  174   0.12
 MAW1 |     -     -     -     -    18     -     -     -    23 |  219   7.98
 MCM4 |     -     -     -    69    12     -     -     -    46 |  288  49.15
 MDO1 |     -     -     -     -    20     -     -     -    26 |  288  31.13
 MEDI |     -     -    19     -     -     -     -     -    29 |  288   0.15
 MKEA |     -     -     -    49    23     -     -     -    15 |  288  22.60
 NICO |     -     -     -     -    22     -     -    18     - |  288  11.43
 NISU |     -    29     -     -     -     -     -     -    30 |  285   0.04
 NKLG |     -    48     -     -    39     -     -     -    88 |  287    >>>
 NLIB |     -     -     -     -    18     -     -    13    26 |  288   0.04
 NNOR |     -     -    23    31     -     -     -    17    27 |  288  11.12
 NOT1 |     -    11     -     -     -     -     -     -    12 |  288   0.18
 NPLD |     -    50    38     -     -     -     -     -    11 |  287   0.04
 NRC1 |     -     -     8     -    13     -     -    11     7 |  288   0.03
 NRIL |     -    11     -     -    15     -     -     -    23 |  288   6.21
 NTUS |     -    32     -    44    26     -     -     -    32 |  288  10.36
 NYA1 |     -    21     -     -     -     -     -    10    19 |  288   0.08
 NYAL |     -     -     -     -    11     -     -     -    14 |  288   0.08
 OHI2 |     -    29     -    63    23     -     -    26     X |  288   6.66
 ONSA |     -    25     -    41    33     -     -     -     - |  288   0.04
 PDEL |     -    24     -     -    19     -     -     -     - |  288  53.99
 PERT |     -    31    27    30    24     -     -     -    18 |  288   1.63
 PETP |     -    12     -     -    10     -     -     -     - |  287  10.53
 PIE1 |     -    68    43    75     -     -     -     -    53 |  284   0.13
 PIMO |     -     -     -    24    24     -     -     -    30 |  288  10.30
 POL2 |     -    35     -     -    23     -     -    13    14 |  288   6.35
 POTS |     -     -     -     -     9     -     -     -    12 |  286  11.75
 PRDS |     -     -    11     -     -     -     -    11    27 |  288   0.43
 PTBB |     -    48    40     -     -     -     -     -    14 |  288   0.26
 QAQ1 |     -     -    10     -     -     -     -     -    16 |  288   6.19
 RESO |     -    15     -     -    10     -     -     8     - |  288   6.53
 RIOG |     -    31    24    84    35     -     -    35    17 |  288   7.13
 SANT |     -    26     -    38    18     -     -     -    25 |  288   4.44
 SCH2 |     -    21    21     -    38     -     -    19    15 |  288   9.55
 SCUB |     -    38     -     -     -     -     -    21    21 |  288  11.91
 STJO |     -    43    22     -    48     -     -    23    14 |  288   0.05
 STR1 |     -     -    19     -     -     -     -     -    29 |  288   0.87
 SUTH |     -     -     -     -    68     -     -     -    87 |  286  11.71
 SUTM |     -     -    25     -    58     -     -    40    23 |  288  14.59
 SUWN |     -     -    14     -     -     -     -     -    21 |  288   7.52
 SYOG |     -    32    21     -    17     -     -    44    14 |  288   0.95
 THTI |     -     -    20    45    20     -     -     -    38 |  288   8.28
 THU3 |     -    17     -     -    14     -     -     -     - |  288  10.52
 TID1 |     -     -     -     -     -     -     -    12    19 |  288   8.57
 TIDB |     -     -    23    43    25     -     -     -    28 |  288   0.13
 TIXI |     -    16     -     X    14     -     -    12    14 |  287   8.45
 TLSE |     -     -    24     -     -     -     -     -    37 |  288   0.46
 TOW2 |     -    40     -     -    32     -     -    17    25 |  288   1.16
 TRO1 |     -    11     -     -     -     -     -     -    12 |  288   8.01
 TROM |     -     -     -     -    14     -     -     -    18 |  288   9.40
 TSKB |     -    20    15    37    27     -     -    17    23 |  288   1.83
 TWTF |     -    19    15     -     -     -     -     -    29 |  288   0.10
 UNSA |     -     -     -    53    21     -     -     -    45 |  288  14.03
 USN3 |     -    31     9     -     -     -     -    11    12 |  288   0.03
 USNO |     -    32    15     -     -     -     -    16    10 |  288   0.03
 USUD |     -     -    12    38     -     -     -     -    23 |  288   0.08
 VILL |     -     -     -    20    13     -     -     -    13 |  288  13.03
 WES2 |     -     -    11     -     -     -     -     -    17 |  286   0.10
 WHIT |     -    16     -     -     -     -     -     -    17 |  288  10.32
 WILL |     -    18    13     -     -     -     -     -    25 |  288 133.22
 WSRT |     -     -    49     -    30     -     -    18    36 |  288   0.04
 WTZA |     -     8     -     -     -     -     -     -     8 |  277   0.53
 WUHN |     -     -    24     -    55     -     -     -    44 |  287   9.35
 YAR2 |     -     -    27     -    29     -     -     -    22 |  288  21.79
 YELL |     -    64     X     X    67     -     -    21   137 |  288   0.04
 YSSK |     -    26     -     -    21     -     -     -     - |  287  10.10
 -----+-------------------------------------------------------+--------------
 TOT  |  2544    40    29    55    34   117  3506    29    41 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.92   | 3.84e-14  9.24e-15  1.41e-15 |
 NPLD |   287     0     0   286    8.35   | 4.09e-14  7.36e-15  4.48e-15 |
 WSRT |   288     0     0   288    7.52   | 2.54e-14  7.76e-15  2.06e-15 |
 BREW |   288     0     0   288    7.48   | 4.71e-14  7.68e-15  2.93e-15 |
 ONSA |   288     0     0   288    7.09   | 3.65e-14  6.77e-15  2.68e-15 |
 AMC2 |   288     0     0   288    6.33   | 3.67e-14  6.06e-15  1.43e-15 |
 BRUS |   288     0     0   288    6.29   | 3.74e-14  7.81e-15  2.43e-15 |
 DRAO |   288     0     0   288    5.55   | 2.80e-14  8.04e-15  4.03e-15 |
 PIE1 |   284     0     0   283    5.15   | 6.38e-14  9.84e-15  2.10e-15 |
 STJO |   288     0     0   288    4.17   | 3.62e-14  1.14e-14  3.30e-15 |
 NLIB |   288     0     0   288    3.55   | 3.87e-14  8.27e-15  1.66e-15 |
 KOKB |   288     0     0   288    3.29   | 7.46e-14  2.25e-14  4.56e-15 |
 ALGO |   288     0     0   288    3.27   | 3.04e-14  7.65e-15  2.48e-15 |
 TWTF |   288     0     0   288    3.12   | 4.71e-14  1.51e-14  5.84e-15 |
 NRC1 |   288     0     0   288    3.06   | 4.73e-14  9.13e-15  3.09e-15 |
 NYA1 |   288     0     0   288    2.71   | 2.78e-14  8.18e-15  6.15e-15 |
 MAD2 |   288     0     0   288    2.18   | 4.07e-14  1.00e-14  2.50e-15 |
 NYAL |   288     0     0   288    2.03   | 2.95e-14  9.31e-15  5.58e-15 |
 CRO1 |   288     0     0   288    1.42   | 1.01e-13  1.40e-14  1.45e-14 |
 NOT1 |   288     0     0   288    1.31   | 4.49e-14  1.93e-14  2.34e-14 |
 YELL |   288     0     0   288    1.00   | 4.84e-14  1.09e-14  3.37e-15 |
 USN3 |   288     0     2    94    0.81   | 1.00e-13  1.69e-14  4.00e-15 |
 MEDI |   288     0     0   288    0.80   | 3.99e-14  1.04e-14  8.33e-15 |
 HOB2 |   288     0     0   288    0.70   | 1.72e-13  2.01e-14  4.98e-15 |
 CHUR |   287     0     0   286    0.59   | 6.54e-14  1.53e-14  5.43e-15 |
 GODE |   283     1     0   281    0.49   | 5.38e-14  1.14e-14  7.81e-15 |
 WES2 |   286     0     0   285    0.42   | 4.30e-14  1.12e-14  7.35e-15 |
 TIDB |   288     0     0   288    0.39   | 1.08e-13  2.09e-14  1.08e-14 |
 PTBB |   288     0     0   288    0.22   | 2.49e-13  6.37e-14  2.32e-14 |
 USUD |   288     0     0   288    0.16   | 2.52e-13  2.51e-14  6.49e-15 |
 TLSE |   288     0     0   288    0.08   | 3.81e-13  1.08e-13  4.76e-14 |
 PRDS |   288     0     0   288    0.06   | 2.51e-13  9.48e-14  3.99e-14 |
 WTZA |   277     0     0   269    0.06   | 4.52e-13  1.40e-13  3.91e-14 |
 HRAO |   288     0     0   288    0.05   | 1.33e-13  3.50e-14  5.53e-14 |
 G26  |   276     0     0   274    0.05   | 3.75e-13  8.89e-14  5.05e-14 |
 BOR1 |   288     0     0   288    0.04   | 5.02e-13  1.44e-13  3.53e-14 |
 G04  |   288     0     0   288    0.04   | 4.20e-13  1.18e-13  7.79e-14 |
 G07  |   288     0     0   288    0.03   | 3.09e-13  8.66e-14  1.17e-13 |
 G29  |   273     0     0   270    0.03   | 3.68e-13  1.15e-13  9.99e-14 |
 G30  |   288     0     0   288    0.02   | 6.09e-13  1.97e-13  1.85e-13 |
 NISU |   285     0     1   141    0.02   | 2.04e-13  1.55e-14  2.68e-15 |
 STR1 |   288     0     0   288    0.02   | 6.09e-13  1.79e-13  7.22e-14 |
 G06  |   288     0     0   277    0.02   | 4.31e-13  1.49e-13  1.04e-13 |
 SYOG |   288     0     0   288    0.01   | 7.25e-13  1.96e-13  8.86e-14 |
 G05  |   288     0     0   288    0.01   | 4.51e-13  2.59e-13  1.91e-13 |
 TSKB |   288     0     0   288    0.01   | 1.01e-12  3.03e-13  1.92e-13 |
 G25  |   288     0     0   288    0.01   | 2.62e-13  1.83e-13  2.99e-13 |
 GMAS |   288     0     0   288    0.01   | 1.42e-12  4.56e-13  9.16e-14 |
 G10  |   288     0     0   288    0.01   | 1.09e-12  3.19e-13  1.98e-13 |
 KERG |   288     0     0   288    0.01   | 1.18e-12  4.28e-13  9.59e-14 |
 G03  |   288     0     0   288    0.00   | 1.27e-12  3.60e-13  2.24e-13 |
 G08  |   288     0     0   288    0.00   | 1.31e-12  3.62e-13  2.65e-13 |
 PERT |   288     0     0   288    0.00   | 1.82e-12  6.45e-13  9.69e-14 |
 G09  |   288     0     5    71    0.00   | 1.46e-12  4.38e-13  9.44e-14 |
 MATE |   174     0     0    37    0.00   | 8.12e-14  3.41e-14         - |
 G15  |   288     0     2    91    0.00   | 1.40e-12  5.84e-13  1.11e-13 |
 TOW2 |   288     0     0   143    0.00   | 4.29e-13  1.52e-13  1.36e-13 |
 THTI |   288     0     0   288    0.00   | 3.88e-13  1.85e-13  5.48e-13 |
 GPST |   288     0     0     0    0.00   | 4.23e-14  7.82e-15  1.58e-15 |
 CEDU |   192     1     0     0    0.00   |        -         -         - |
 HOFN |   277     0     0     0    0.00   |        -         -         - |
 ARTU |   252     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     2     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.71e-13  6.66e-14  6.80e-14 |
 G27  |   288     0     0     0    0.00   | 1.32e-12  4.51e-13  3.34e-13 |
 G24  |   288     0     0     0    0.00   | 1.28e-12  5.44e-13  5.57e-13 |
 G23  |   288     0     5     0    0.00   | 5.21e-13  6.08e-14  1.86e-14 |
 G22  |   288     0     6     0    0.00   | 6.02e-13  5.81e-14  2.11e-14 |
 G21  |   288     0     6     0    0.00   | 9.33e-13  1.18e-13  3.02e-14 |
 G20  |   288     0     6     0    0.00   | 6.36e-13  6.31e-14  1.35e-14 |
 G19  |   288     0     4     0    0.00   | 6.13e-13  7.12e-14  1.41e-14 |
 G18  |   288     0     6     0    0.00   | 7.73e-13  6.76e-14  4.24e-14 |
 G17  |   288     0     5     0    0.00   | 5.63e-13  6.59e-14  1.15e-14 |
 G16  |   288     0     6     0    0.00   | 5.13e-13  5.65e-14  2.31e-14 |
 G14  |   288     0     6     0    0.00   | 5.75e-13  6.45e-14  1.80e-14 |
 G13  |   288     0     6     0    0.00   | 5.73e-13  5.48e-14  1.88e-14 |
 G11  |   288     0     4     0    0.00   | 5.60e-13  6.02e-14  3.99e-14 |
 G02  |   288     0     6     0    0.00   | 5.21e-13  4.77e-14  1.43e-14 |
 G01  |   276     0     0     0    0.00   | 1.63e-12  9.55e-13  4.22e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     1     0    0.00   | 5.31e-13  2.41e-13  7.64e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TROM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TID1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     2     0     0    0.00   |        -         -         - |
 SUWN |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   286     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 1.28e-12  1.09e-12  7.94e-13 |
 SANT |   288     0     2     0    0.00   | 1.99e-12  7.43e-13  5.87e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   286     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   219     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     1     0     0    0.00   |        -         -         - |
 MALI |   281     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   287     0     0     0    0.00   |        -         -         - |
 KOUR |   250     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 7.38e-13  4.24e-13  1.55e-12 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   286     0     1     0    0.00   | 2.65e-13  3.47e-13  8.83e-13 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.25e-13  7.79e-13  4.93e-13 |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   287     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.90e-17  3.48e-16  2.09e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      AMC2      USNO |
------------------------------------------+------------------------------+
