
 GPS week: 1356   Day: 1   MJD: 53737                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2779     71    -1.08     1.40     2.64     0.00      0
 cod |   288     0  25899     85     0.11     0.95     0.05    19.17      0
 emr |   288     0  13173    600  1124.86    37.30     0.04    23.12      0
 esa |   288     0  18806    840 99999.99     1.90     0.06    13.87      0
 gfz |   288     0  27128    623    -0.91     1.17     0.04    26.55      0
 iga |    96     0   2778      3     2.31    -0.55     0.12     0.00      0
 igu |    96     0   2779     59     2.58    -5.16     3.06     0.00      0
 usn |   288     0  32474   1226     0.54     0.14     0.05    17.30      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   usn |
 -----+-------------------------------------------------+
    1 |  2154     7   -64    40    45    32 -2221   -22 |
    2 | -1248   -40    -6    46   116   -28   713  -163 |
    3 | -8669   -24    21   -56    30    39  6406    -1 |
    4 |  -400    40   -77   254    66   132   834  -246 |
    5 |   241  -103     4    17    20  -119 -3009    65 |
    6 |  -797   -63   -68    74    90   100 -2106   -35 |
    7 | -2517   -41    40  -101    -9    32  6037    86 |
    8 |    25   -40    12   175   -56    74 -1543   -38 |
    9 | -6997   -31   -11     X    48  -134-13677   -33 |
   10 | -6919  -145    78   -14    15   -79 -2154    44 |
   11 |  3152    59    49    41    43   -59   231  -230 |
   13 |  5248    94     X   -77   -28   -11  1016     X |
   14 |  4111   121    -7  -116    79     8  1363  -154 |
   15 | -2638  -187   137  -100     9   -77  2136    91 |
   16 |  5694     1    41  -199    10   -25   197    88 |
   17 | -8488   244  -216   260    36    36  -953  -246 |
   18 |  5168   -67   -34    -8    82   -95   512     X |
   19 |   123   -12   -94    15   -77   -13  2137   245 |
   20 |  4447   -70    21   -31    -9    -4  1078    88 |
   21 |  5472    41    74  -109    -9  -129  1247   -44 |
   22 | -1477    -1   -14   -54   158   -15 -7889  -214 |
   23 | -1601   122   -13  -150   -29    -5  2007    52 |
   24 |  3326   -74    29   138   -22    68 -2148   -33 |
   25 | 21301   -13   -53     -   108   193 24877   -82 |
   26 |  3274    88  -168   136    91     8  1798  -121 |
   27 | -2766   -13   -27   106   -13    59-11539   -18 |
   28 |  1714    95   136   -46   -61   -10 11883  -156 |
   29 | -1267    44  -129   -48   133   -28   195   -47 |
   30 | -3310   -10   -94   140   160    52 -1606  -220 |
 -----+-------------------------------------------------+
 ALGO |     -     -    69    27   -71     -     -    -6 |
 ALRT |     -  -187     -     -   -63     -     -   304 |
 AMC2 |     -  -138     -     -     -     -     -   153 |
 ARTU |     -   216     -    98   -34     -     -  -264 |
 BAHR |     -    22   -59     -    79     -     -   -68 |
 BILI |     -    80     -     -  -106     -     -    75 |
 BOGT |     -     -     -   125   -18     -     -   -72 |
 BOR1 |     -    89     -     -  -106     -     -    65 |
 BRMU |     -     -     -     -    92     -     -  -141 |
 BRUS |     -   -12     -     -     -     -     -    14 |
 CHAT |     -    17     -    92     6     -     -  -102 |
 CHUR |     -    24     -     -   -93     -     -   117 |
 CORD |     -   -46     -     -     -     -     -    51 |
 CRO1 |     -    44    95   -86     2     -     -  -110 |
 DAEJ |     -   107     -     -     -     -     -  -119 |
 DGAR |     -     -     -    44    30     -     -   -81 |
 DRAO |     -   138   -15     -  -114     -     -    42 |
 DWH1 |     -   194     -     -     -     -     -  -215 |
 FAIR |     -     -     -    73   -38     -     -     - |
 GMAS |     -     -   110     -     -     -     -  -147 |
 GOLD |     -    61     -   -98  -106     -     -   174 |
 GRAS |     -     -     -     -    57     -     -   -87 |
 GUAM |     -     -     -  -390    38     -     -   253 |
 GUAT |     -     -     -     -   -68     -     -   104 |
 HARB |     -   -57     -     -     0     -     -    63 |
 HERS |     -  -310     -     -     -     -     -   344 |
 HOFN |     -     -     -     -   -23     -     -    35 |
 HRAO |     -     -     -     -   -52     -     -    80 |
 IISC |     -     7     -   -10     0     -     -     - |
 INVK |     -  -147     -     -     -     -     -   163 |
 ISPA |     -     -     -     -    15     -     -   -23 |
 JPLM |     -     -     -     -  -197     -     -   303 |
 KERG |     -     -   -75   255    68     -     -  -208 |
 KIRU |     -    12     -     7     -     -     -   -19 |
 KIT3 |     -     -     -  -101    94     -     -   -63 |
 KOKB |     -   -30   139   -88   -93     -     -    59 |
 KOUR |     -   -80     -   -97    61     -     -    72 |
 LHAS |     -  -127     -     -     -     -     -   141 |
 LPGS |     -   -85     -    10   119     -     -   -97 |
 MAS1 |     -     -     -    72   -53     -     -    25 |
 MBAR |     -    27     -     -   -55     -     -    55 |
 MCM4 |     -    34     X   -47     X     -     -     - |
 MDO1 |     -    -3    17     -  -148     -     -   206 |
 METS |     -    41     -     -     -     -     -   -45 |
 MKEA |     -    22     -    20  -106     -     -   122 |
 NKLG |     -     -     -     X   -30     -     -    46 |
 NLIB |     -    -5     -     -   -38     -     -    64 |
 NNOR |     -     -     -    72     -     -     -   -58 |
 NPLD |     -   -75     -     -     -     -     -    83 |
 NRC1 |     -   118   -20     -   -46     -     -   -34 |
 NRIL |     -    32     -     -   -27     -     -     6 |
 NYA1 |     -     6     -     -     -     -     -    -7 |
 NYAL |     -     -     -     -    12     -     -   -19 |
 OHI2 |     -    29     -     -   -21     -     -     X |
 ONSA |     -   -56     -   115   -20     -     -     - |
 PERT |     -    73   -96    11   161     -     -  -208 |
 PETP |     -     -     -   130     X     -     -  -105 |
 PIE1 |     -     -     -  -182     -     -     -   146 |
 PIMO |     -     7     -   -68    53     -     -   -35 |
 POL2 |     -     -     -     -    -9     -     -    14 |
 POTS |     -     -     -     -   -27     -     -    41 |
 PTBB |     -     1     -     -     -     -     -    -1 |
 RABT |     -   -12     -     -     -     -     -    13 |
 RBAY |     -   -44     -    27  -209     -     -   314 |
 REYK |     -   -76     -     -     -     -     -    84 |
 RIOG |     -   -39     -    11    59     -     -   -56 |
 SANT |     -    61     -     X   -44     -     -     - |
 SCH2 |     -    77     -     -  -142     -     -   132 |
 SCUB |     -   -57     -     -     -     -     -    63 |
 SELE |     -   -48     -     -     -     -     -    53 |
 STJO |     -     -   -10     -   -19     -     -    43 |
 SUTH |     -  -103     -    26   -96     -     -   241 |
 SUTM |     -     -     -     -   -60     -     -    92 |
 SUWN |     -    -8     -     -     -     -     -     9 |
 THTI |     -     -   113  -239   -34     -     -    92 |
 THU3 |     -  -106     -     -    77     -     -     - |
 TID2 |     -     -     -     -   166     -     -  -255 |
 TIDB |     -   194    63  -170     3     -     -  -167 |
 TIXI |     -    30     -   230   -13     -     -  -196 |
 TRO1 |     -   -73     -     -     -     -     -    80 |
 TROM |     -     -     -     -   -47     -     -    72 |
 TSKB |     -   -36    -4   -57    82     -     -   -35 |
 TWTF |     -   -57     -     -     -     -     -    63 |
 UNSA |     -     -     -  -134    70     -     -     X |
 USN3 |     -     7     -     -     -     -     -    -8 |
 USNO |     -    63    56     -     -     -     -  -144 |
 USUD |     -   -50     -    43     -     -     -    21 |
 VILL |     -     -     -    64    14     -     -   -73 |
 WILL |     -    57     -     -     -     -     -   -63 |
 WSRT |     -    97     -     -   -70     -     -     - |
 WTZA |     -   -56     -     -     -     -     -    62 |
 WUHN |     -     -     -     -    62     -     -   -95 |
 YELL |     -   -31    32   -34    -2     -     -    21 |
 ZWE2 |     -    25     -     -   -18     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3509    54    30    34    16    31  5171    89 |  288   4.04
    2 |   694    53    31    56    34    75   508    63 |  288   0.17
    3 |  4528    23    37    85    26    73  4345    63 |  288   2.01
    4 |  1018    87    25    45    24    45   923    84 |  288   0.55
    5 |  1180   108    29    40    21    68  2422    69 |  288   1.95
    6 |   856    59    36    47    24    92  1160    32 |  288   0.54
    7 |  1186    53    30    53    38    41  2887    53 |  288   0.74
    8 |  2479    89   103   138    94   191  2608    97 |  288   2.01
    9 |  3787   146    97     X   108   253  5472   134 |  280   1.96
   10 |  3982    48    25    48    33   105  2217    31 |  288   1.81
   11 |   666    49    30    40    62   101   391    68 |  288   0.46
   13 |   582    57     X    38    37   251   804     X |  288   0.25
   14 |   838    44    28    74    33    36   864    44 |  288   0.38
   15 |  6139    44    43    52    20    86  3605    52 |  288   2.26
   16 |   930    50    28    59    29    74   390    43 |  288   0.24
   17 |  5567    48    36    68    23    38   761    48 |  288   0.23
   18 |  1199    54    36    47    22    52   472     X |  288   0.26
   19 |   605    63    49    61    52   359  1411    98 |  288   0.20
   20 |   544    65    42    23    37    58   629    60 |  288   0.26
   21 |   640    49    22    70    28    53   806    84 |  288   0.29
   22 |  1507    58    52    37    43    58  5541   153 |  288   0.31
   23 |  1268    70    59    58    56    54   712    90 |  288   0.23
   24 |  3197    61    25    50    38    57  2512    74 |  288   1.77
   25 |  4857   125    43     -    61   167  5716    81 |  276  20.86
   26 |  1947    40    34    96    28    40   677   112 |  288   0.71
   27 |  3925   121   149    90    72   100  5656   107 |  288   1.94
   28 |  1491    35    38   102    35    34  7834    71 |  288   0.49
   29 |  2032    61    36   124    37    82  1440    57 |  288   0.88
   30 |  2472    99    42    55    27    41  1285    89 |  288   0.82
 -----+-------------------------------------------------+--------------
 ALGO |     -     -    17    36    12     -     -    12 |  288   0.05
 ALRT |     -    20     -     -    13     -     -    14 |  288   5.90
 AMC2 |     -    11     -     -     -     -     -    13 |  288   0.04
 ARTU |     -    58     -    56    40     -     -    44 |  288  10.56
 BAHR |     -    26    29     -    23     -     -    43 |  288   0.49
 BILI |     -    33     -     -    18     -     -    21 |  287   8.00
 BOGT |     -     -     -    53    29     -     -    21 |  288  15.02
 BOR1 |     -    81     -     -    90     -     -    95 |  287  26.40
 BRMU |     -     -     -     -    21     -     -    32 |  288    >>>
 BRUS |     -    30     -     -     -     -     -    33 |  288   0.03
 CHAT |     -    48     -    74    51     -     -    53 |  287  12.91
 CHUR |     -    31     -     -    14     -     -    24 |  288   0.05
 CORD |     -    31     -     -     -     -     -    34 |  286  12.91
 CRO1 |     -    43    22    47    28     -     -    32 |  288   0.08
 DAEJ |     -    71     -     -     -     -     -    78 |  287   6.73
 DGAR |     -     -     -    22    36     -     -    54 |  288  14.55
 DRAO |     -    25    17     -    16     -     -    15 |  288   0.03
 DWH1 |     -    20     -     -     -     -     -    22 |  287   0.32
 FAIR |     -     -     -    19    10     -     -     - |  287   8.29
 GMAS |     -     -    14     -     -     -     -    18 |  288   1.18
 GOLD |     -    39     -    51    42     -     -    24 |  287   9.13
 GRAS |     -     -     -     -    45     -     -    70 |  288   8.18
 GUAM |     -     -     -    61    37     -     -    37 |  288  19.52
 GUAT |     -     -     -     -    13     -     -    19 |  288    >>>
 HARB |     -    44     -     -    29     -     -    64 |  287  30.68
 HERS |     -    37     -     -     -     -     -    40 |  253  11.12
 HOFN |     -     -     -     -    20     -     -    30 |  287    >>>
 HRAO |     -     -     -     -    36     -     -    55 |  288   0.54
 IISC |     -    30     -    54    16     -     -     - |  288  19.97
 INVK |     -    27     -     -     -     -     -    30 |  283   8.11
 ISPA |     -     -     -     -    13     -     -    19 |  288  10.81
 JPLM |     -     -     -     -    17     -     -    26 |  288  10.99
 KERG |     -     -    30    36    35     -     -    20 |  288   1.81
 KIRU |     -    14     -    31     -     -     -    27 |  288  12.12
 KIT3 |     -     -     -    42    16     -     -    16 |  288  10.20
 KOKB |     -    31    31    41    25     -     -    71 |  288   0.05
 KOUR |     -    24     -    52    29     -     -    31 |  288  15.05
 LHAS |     -    20     -     -     -     -     -    22 |  159   9.87
 LPGS |     -    38     -    36    24     -     -    21 |  288  19.85
 MAS1 |     -     -     -    43    32     -     -    67 |  288   7.88
 MBAR |     -    63     -     -    47     -     -   124 |  288  13.39
 MCM4 |     -    16     X    22     X     -     -     - |  287  39.47
 MDO1 |     -    29    11     -    15     -     -    19 |  288  26.10
 METS |     -    16     -     -     -     -     -    18 |  192   6.32
 MKEA |     -    35     -    25    27     -     -    37 |  288  16.92
 NKLG |     -     -     -     X    36     -     -    56 |  282    >>>
 NLIB |     -    15     -     -     9     -     -    11 |  288   0.04
 NNOR |     -     -     -    65     -     -     -    52 |  287  11.91
 NPLD |     -    24     -     -     -     -     -    26 |  287   0.03
 NRC1 |     -    16    18     -     9     -     -    12 |  288   0.04
 NRIL |     -    24     -     -    13     -     -    29 |  288   6.58
 NYA1 |     -    18     -     -     -     -     -    20 |  288   0.05
 NYAL |     -     -     -     -     6     -     -    10 |  288   0.05
 OHI2 |     -   126     -     -    91     -     -     X |  189    >>>
 ONSA |     -    13     -    20    12     -     -     - |  288   0.07
 PERT |     -    54    65   100    70     -     -    33 |  288   4.35
 PETP |     -     -     -    67     X     -     -    54 |  285   7.76
 PIE1 |     -     -     -   125     -     -     -   100 |  288   0.27
 PIMO |     -    29     -    39    34     -     -    27 |  288  19.49
 POL2 |     -     -     -     -    10     -     -    15 |  288   8.62
 POTS |     -     -     -     -    25     -     -    39 |  284  24.03
 PTBB |     -    28     -     -     -     -     -    31 |  288   0.28
 RABT |     -    49     -     -     -     -     -    54 |  286  12.93
 RBAY |     -   102     -   111    90     -     -    74 |  261  56.88
 REYK |     -    10     -     -     -     -     -    11 |  144   6.66
 RIOG |     -    48     -    73    37     -     -    35 |  288   8.99
 SANT |     -    63     -     X    46     -     -     - |  288 298.86
 SCH2 |     -    32     -     -    13     -     -    19 |  288  74.83
 SCUB |     -    14     -     -     -     -     -    15 |  286  15.72
 SELE |     -    25     -     -     -     -     -    27 |  288  43.10
 STJO |     -     -    16     -    11     -     -    23 |  276   0.04
 SUTH |     -    36     -    76    36     -     -    43 |  288  12.01
 SUTM |     -     -     -     -    24     -     -    36 |  288  13.70
 SUWN |     -    28     -     -     -     -     -    31 |  288   6.28
 THTI |     -     -    36    61    23     -     -    45 |  276   2.87
 THU3 |     -    22     -     -    16     -     -     - |  288   5.95
 TID2 |     -     -     -     -    80     -     -   122 |  286   0.07
 TIDB |     -    35    38    65    33     -     -    59 |  288   0.25
 TIXI |     -    31     -    48    12     -     -    36 |  287   8.34
 TRO1 |     -    21     -     -     -     -     -    23 |  288   9.50
 TROM |     -     -     -     -    14     -     -    21 |  288  12.09
 TSKB |     -    36    15    53    24     -     -    31 |  288   1.14
 TWTF |     -    20     -     -     -     -     -    23 |  288   0.05
 UNSA |     -     -     -    45    24     -     -     X |  286  22.57
 USN3 |     -     9     -     -     -     -     -    10 |  288   0.03
 USNO |     -    22    17     -     -     -     -    16 |  288   0.03
 USUD |     -    21     -    38     -     -     -    28 |  288   0.10
 VILL |     -     -     -    41    32     -     -    65 |  288  10.37
 WILL |     -     9     -     -     -     -     -    10 |  288  33.02
 WSRT |     -    18     -     -    13     -     -     - |  288   0.03
 WTZA |     -    20     -     -     -     -     -    22 |  288   0.36
 WUHN |     -     -     -     -    13     -     -    20 |  287  17.97
 YELL |     -    28    17    32    15     -     -    15 |  288   0.06
 ZWE2 |     -    13     -     -     9     -     -     - |  288   7.32
 -----+-------------------------------------------------+--------------
 TOT  |  2638    51    44    61    37   120  3061    54 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288   11.30   | 3.30e-14  7.28e-15  2.84e-15 |
 NPLD |   287     0     0   286   11.21   | 3.12e-14  5.13e-15  8.75e-16 |
 USNO |   288     0     0   288   10.72   | 3.42e-14  8.91e-15  2.37e-15 |
 NLIB |   288     0     0   288   10.24   | 3.33e-14  1.05e-14  1.98e-15 |
 WSRT |   288     0     0   288    9.88   | 2.37e-14  7.31e-15  1.72e-15 |
 NRC1 |   288     0     0   288    6.75   | 2.67e-14  5.42e-15  1.66e-15 |
 DRAO |   288     0     0   288    5.91   | 2.71e-14  8.88e-15  2.00e-15 |
 BRUS |   288     0     0   288    5.66   | 3.71e-14  4.76e-15  9.76e-16 |
 CHUR |   288     0     0   288    5.44   | 3.76e-14  1.25e-14  3.50e-15 |
 YELL |   288     0     0   288    4.82   | 3.17e-14  5.62e-15  2.39e-15 |
 ONSA |   288     0     0   143    4.20   | 3.33e-14  6.41e-15  4.99e-15 |
 STJO |   276     0     0   276    3.26   | 3.52e-14  6.04e-15  1.42e-15 |
 KOKB |   288     0     0   288    2.59   | 4.08e-14  6.76e-15  1.74e-15 |
 ALGO |   288     1     0   287    1.81   | 2.80e-14  5.51e-15  2.76e-15 |
 TWTF |   288     0     0   288    1.62   | 4.22e-14  8.64e-15  5.56e-15 |
 TID2 |   286     1     0   285    1.14   | 8.88e-14  2.73e-14  4.89e-15 |
 NYA1 |   288     0     0   288    0.89   | 3.04e-14  7.74e-15  3.53e-15 |
 NYAL |   288     0     0   288    0.70   | 3.55e-14  7.23e-15  2.83e-15 |
 PIE1 |   288     1     0   142    0.43   | 7.98e-14  1.53e-14  7.56e-15 |
 TIDB |   288     0     0   288    0.31   | 1.30e-13  4.83e-14  3.11e-14 |
 CRO1 |   288     0     0   288    0.23   | 1.70e-13  2.52e-14  5.65e-15 |
 PTBB |   288     0     0   288    0.15   | 3.02e-13  8.30e-14  1.75e-14 |
 G07  |   288     0     0   288    0.13   | 2.92e-13  7.22e-14  5.59e-14 |
 G06  |   288     0     0   288    0.07   | 4.63e-13  1.62e-13  3.85e-14 |
 DWH1 |   287     0     0   286    0.06   | 3.22e-13  1.19e-13  2.88e-14 |
 HRAO |   288     0     0   288    0.05   | 1.29e-13  5.37e-14  4.51e-14 |
 G30  |   288     0     0   288    0.05   | 2.61e-13  7.57e-14  1.03e-13 |
 WTZA |   288     0     0   287    0.05   | 4.78e-13  1.01e-13  3.03e-14 |
 G04  |   288     0     0   288    0.05   | 4.33e-13  1.26e-13  5.27e-14 |
 G11  |   288     0     1   192    0.05   | 6.34e-13  7.41e-14  5.09e-14 |
 BAHR |   288     0     0   288    0.04   | 3.61e-13  1.02e-13  4.67e-14 |
 G29  |   288     0     0   288    0.04   | 4.18e-13  9.92e-14  5.39e-14 |
 G26  |   288     0     0   288    0.04   | 3.36e-13  1.08e-13  8.24e-14 |
 BOR1 |   287     0     0   286    0.03   | 4.77e-13  1.53e-13  6.29e-14 |
 G05  |   288     0     0   288    0.02   | 2.24e-13  7.78e-14  1.54e-13 |
 G23  |   288     0     5    18    0.02   | 5.75e-13  5.84e-14  2.03e-14 |
 TSKB |   288     0     0   288    0.01   | 9.84e-13  3.01e-13  1.36e-13 |
 G25  |   276     0     0   162    0.01   | 2.79e-13  2.42e-13  1.22e-12 |
 G03  |   288     0     0   288    0.01   | 1.28e-12  3.61e-13  2.42e-13 |
 G08  |   288     0     0   288    0.01   | 1.47e-12  4.11e-13  2.33e-13 |
 KERG |   288     0     0   288    0.00   | 1.24e-12  3.73e-13  1.38e-13 |
 G24  |   288     0     0   288    0.00   | 1.32e-12  4.50e-13  1.99e-13 |
 G09  |   280     0     0   278    0.00   | 1.61e-12  4.39e-13  1.24e-13 |
 GMAS |   288     0     0   143    0.00   | 1.14e-12  3.12e-13  8.36e-14 |
 THTI |   276     0     0   131    0.00   | 4.48e-13  1.64e-13  3.14e-13 |
 GPST |   288     0     0     0    0.00   | 3.53e-14  5.89e-15  2.24e-15 |
 LHAS |   159     0     0     0    0.00   |        -         -         - |
 METS |   192     0     0     0    0.00   |        -         -         - |
 OHI2 |   189     2     0     0    0.00   |        -         -         - |
 PETP |   285     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 UNSA |   286     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   253     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     1     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 6.44e-13  8.02e-14  4.05e-14 |
 G27  |   288     0     0     0    0.00   | 1.32e-12  4.61e-13  1.84e-13 |
 G22  |   288     0     5     0    0.00   | 6.11e-13  6.48e-14  2.55e-14 |
 G21  |   288     0     6     0    0.00   | 9.82e-13  1.06e-13  2.93e-14 |
 G20  |   288     0     5     0    0.00   | 6.34e-13  8.23e-14  2.20e-14 |
 G19  |   288     0     6     0    0.00   | 5.69e-13  6.29e-14  2.00e-14 |
 G18  |   288     1     6     0    0.00   | 1.09e-12  9.44e-14  3.29e-14 |
 G17  |   288     0     5     0    0.00   | 6.09e-13  6.57e-14  2.11e-14 |
 G16  |   288     0     6     0    0.00   | 5.59e-13  5.88e-14  2.30e-14 |
 G15  |   288     0     0     0    0.00   | 1.53e-12  4.85e-13  2.82e-13 |
 G14  |   288     0     6     0    0.00   | 5.94e-13  5.86e-14  3.40e-14 |
 G13  |   288     0     6     0    0.00   | 5.30e-13  5.90e-14  1.88e-14 |
 G10  |   288     0     0     0    0.00   | 1.27e-12  3.86e-13  2.02e-13 |
 G02  |   288     0     6     0    0.00   | 6.46e-13  5.32e-14  1.60e-14 |
 G01  |   288     0     1     0    0.00   | 1.78e-12  6.56e-13  4.74e-13 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     2     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     3     0    0.00   | 2.50e-13  3.68e-14  5.81e-15 |
 USN3 |   288     0     6     0    0.00   | 1.14e-13  1.55e-14  4.00e-15 |
 TROM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUWN |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   286     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     1     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   144     0     0     0    0.00   |        -         -         - |
 RBAY |   261     0     0     0    0.00   |        -         -         - |
 RABT |   286     0     0     0    0.00   |        -         -         - |
 POTS |   284     1     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.78e-12  5.19e-13  3.58e-13 |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   282     2     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   287     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.49e-13  2.33e-13  7.31e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   283     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   287     0     0     0    0.00   |        -         -         - |
 FAIR |   287     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CORD |   286     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.36e-17  2.83e-16  1.69e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      BRUS      NPLD |
------------------------------------------+------------------------------+
