
 GPS week: 1325   Day: 6   MJD: 53525                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2781      2     0.26    -0.37     3.02     0.00      0
 cod |   288     0  27385    165    -0.13    -0.57     0.05    18.58      0
 emr |   288     0  24755      0   297.42     0.62     0.03    31.43      0
 esa |   288     0  18566   1826  -620.57   -27.52     0.08     9.36      0
 gfz |   288     0  29993    254    -0.02    -0.33     0.03    24.11      0
 iga |    96     0   2781     11     0.24    -0.27     0.07     0.00      0
 igu |    96     0   2781     60    -1.21    -1.09     3.52     0.00      0
 ngs |    96     0   2781      0     0.28    -0.40     2.69     0.00      0
 usn |   288     0  38647    141   297.48     0.56     0.05    16.52      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   usn |
 -----+-------------------------------------------------------+
    1 |   181   164  -109    66    61   -40 -5011    94   -81 |
    2 | -4633     8    -7   -87    38    37  -189 -4165    -1 |
    3 |  3258   -86   -10   -54   123   -53 13080  2179   -34 |
    4 | -1837    53    13     X    25    81     6 -1495  -121 |
    5 |  7820   113  -139    58   172   120  1500  5531  -147 |
    6 | -2717    49   -97  -109   157   -48-14240 -4104   -38 |
    7 |   -51    22   -61   150    81    65 -3210  -289  -111 |
    8 | -1417   -92     4    64    56   -20 -5780 -1762   -13 |
    9 | -1763   129   -91    30    68    71 -9141  -566   -88 |
   10 |  2330    -3     8    99    54    66 -2886  1402  -147 |
   11 |  6195    22    12   175    15   -32  1691  5826  -167 |
   13 |  3381   -52    57    39   103    37  1187  3902  -216 |
   14 |  4228   126   -92   110    60    12   216  4281  -134 |
   15 | -5076    45  -111    26    91   -55 10090 -4885    12 |
   16 |  2756   -25   -78   -20   144     4   743  3028   -22 |
   18 |  3921    83   -93   177    15   -37    -1  4372   -39 |
   19 | -2511   107  -128   -82   111   -83  -253 -2287     7 |
   20 |  3410    -3   -56    21   132   -49   -47  3622   -95 |
   21 |  1797    88   -37   -20    89    16 18355  2227  -142 |
   22 | -7750   112   -50   -18    -4   -11 -1184 -6093   -16 |
   23 | -3273   156   -78   -57    22   -48   479 -2945   -26 |
   24 | -4555   -91    14   184    31   -88  -776 -4072   -74 |
   25 |  -233   -14   -76   -10   157   -41  3556    31   -64 |
   26 | -2946   117   -33   133     1    75 -4389 -2931  -145 |
   27 | -6089  -151   -63   154   108     3  6324 -4762    46 |
   28 |  6961   -15     8   112   -21    87  6568  6718   -32 |
   29 | -2367    51   -36     X    18     0 -2985 -2262   -16 |
   30 | -3686    16   -45   -42   131   -18 -1983 -3588   -99 |
   31 |  4627    92   -48  -105   100   -46  -115  2957  -111 |
 -----+-------------------------------------------------------+
 ALBH |     -     -   -15     -     -     -     -     -    29 |
 ALGO |     -     6    45  -130    -1     -     -     -   -18 |
 ALIC |     -   279     -     -  -215     -     -     -     - |
 ALRT |     -  -221     -     -   -68     -     -     -   348 |
 AMC2 |     -  -207    98     -     -     -     -     -    46 |
 AREQ |     -    36    39     -   -28     -     -     -   -72 |
 ARTU |     -     -     -    87    78     -     -     -  -163 |
 ASPA |     -     -     -     -    -2     -     -     -     3 |
 AUCK |     -   -10     -     X    -6     -     -     -    20 |
 BAHR |     -     -    -1     -     5     -     -     -    -6 |
 BILI |     -     -     -     -    22     -     -     -   -33 |
 BOGT |     -     -     -   154    -3     -     -     -   -82 |
 BOR1 |     -    75    -1     -   -72     -     -     -    23 |
 BREW |     -     -   -14     -     -     -     -     -    26 |
 BRMU |     -     -     -     -   -48     -     -     -    70 |
 BRUS |     -   -30    60     -  -123     -     -     -   100 |
 CAGZ |     -    59     -     -     -     -     -     -   -67 |
 CAS1 |     -    42     -    41   -39     -     -     -   -14 |
 CHAT |     -   -16     -     -   -32     -     -     -    64 |
 CHUR |     -     -    35     -  -222     -     -     -   258 |
 COCO |     -   -41     -  -156   113     -     -     -   -30 |
 CORD |     -   -57     -     -    -3     -     -     -    69 |
 DAKA |     -    -9     -     -     7     -     -     -     - |
 DARW |     -     -    57     -     X     -     -     -  -109 |
 DGAR |     -   -91     -     -    94     -     -     -   -34 |
 DRAO |     -   109   -36   164   -52     -     -     -   -71 |
 DWH1 |     -   174   -60     -     -     -     -     -   -81 |
 FAIR |     -     -    47   -33   -48     -     -     -     - |
 GLPS |     -     -     -     -   -12     -     -     -    17 |
 GODE |     -  -139   103   -35     -     -     -     -   -20 |
 GOLD |     -     -     -  -175   -53     -     -     -   177 |
 GRAS |     -     -     -     -    12     -     -     -   -17 |
 GUAM |     -  -113     -     X   -86     -     -     -   252 |
 GUAT |     -     -     -     -    35     -     -     -   -51 |
 HARB |     -    26     -     -  -110     -     -     -   132 |
 HERS |     -     -  -117     -     -     -     -     -   222 |
 HLFX |     -     -   139     -     -     -     -     -  -265 |
 HOB2 |     -   -86   125     -  -116     -     -     -    26 |
 HRAO |     -     -     -     -   -17     -     -     -    26 |
 IENG |     -   -39    23     -     -     -     -     -     - |
 INVK |     -   -33     -     -     -     -     -     -    38 |
 ISPA |     -     -     -     -    82     -     -     -  -120 |
 JOZE |     -     -     -     -  -272     -     -     -   397 |
 JPLM |     -     -    68     -  -193     -     -     -   152 |
 KARR |     -   -18     -     -    14     -     -     -     - |
 KERG |     -   -79     1    -3    89     -     -     -   -43 |
 KGN0 |     -    15   -23     -     -     -     -     -    26 |
 KIT3 |     -     -     -   -98   -14     -     -     -    77 |
 KOKB |     -   -68    55     -   -93     -     -     -   108 |
 KOSG |     -   -50     -     -     -     -     -     -    56 |
 KOUR |     -   117     -  -104  -116     -     -     -    97 |
 LAE1 |     -   149     -     -  -143     -     -     -    41 |
 LHAS |     -   -95     -     -   -66     -     -     -   204 |
 LPGS |     -   -10     9   136     -     -     -     -   -83 |
 MAC1 |     -    13     -     X   -69     -     -     -    80 |
 MAD2 |     -     -   -23     -     -     -     -     -    44 |
 MALI |     -    21     -   -53    85     -     -     -  -118 |
 MAS1 |     -     -    68   -82   -52     -     -     -    -7 |
 MATE |     -     -     -  -118    67     -     -     -   -30 |
 MAW1 |     -    79     -     -    29     -     -     -  -130 |
 MBAR |     -    17     -     -   -13     -     -     -     0 |
 MCM4 |     -  -204     -     -   157     -     -     -     - |
 MDO1 |     -    52   -69     -  -156     -     -     -   299 |
 MEDI |     -     -   -39     -     -     -     -     -    74 |
 METS |     -  -104   -19     -     -     -     -     -   153 |
 MIZU |     -     -    75  -324     -     -     -     -    42 |
 MKEA |     -    42     -   -52   -91     -     -     -   115 |
 NLIB |     -   -11   156     -  -101     -     -     -  -138 |
 NNOR |     -     -    -2  -138     -     -     -     -    80 |
 NRC1 |     -     -    29     -   -11     -     -     -   -39 |
 NRIL |     -     -     -     -     2     -     -     -    -3 |
 NSSP |     -   -45     -     -     -     -     -     -    51 |
 NTUS |     -   -64     -   -23     -     -     -     -    85 |
 OHI2 |     -   224     -   -13    76     -     -     -  -355 |
 ONSA |     -     -    49  -163     -     -     -     -     - |
 PDEL |     -    96     -     -   -44     -     -     -   -45 |
 PERT |     -   -87    88   -22     -     -     -     -   -57 |
 PETP |     -     -     -     -   146     -     -     -  -213 |
 PIE1 |     -     -    -2     X     -     -     -     -     4 |
 POL2 |     -    23     -     -   -61     -     -     -    64 |
 POTS |     -    13     -     -   -11     -     -     -     1 |
 PRDS |     -     -   -32     -     -     -     -     -    61 |
 PTBB |     -   -34   -14     -     -     -     -     -    65 |
 QAQ1 |     -     -    -5     -     -     -     -     -    10 |
 RBAY |     -    86     -     -  -209     -     -     -   226 |
 REYK |     -   -63     -     -     -     -     -     -    70 |
 RIOG |     -    35    71     -  -150     -     -     -    45 |
 SANT |     -   -60     -    -1    47     -     -     -     - |
 SCH2 |     -     -    70     -  -192     -     -     -   147 |
 SCUB |     -    13     -     -     -     -     -     -   -14 |
 SFER |     -   -33    19     -     -     -     -     -     - |
 SPT0 |     -  -148    30     -     -     -     -     -   109 |
 STJO |     -     -    33     -   -13     -     -     -   -44 |
 STR1 |     -     -   -21     -     -     -     -     -    40 |
 SUTM |     -     -   104     -  -174     -     -     -    56 |
 THTI |     -     -    74   -92    58     -     -     -  -175 |
 THU3 |     -   -47    82     -   145     -     -     -  -314 |
 TIDB |     -    10   -52   270   -65     -     -     -    29 |
 TIXI |     -     3     -    35    47     -     -     -   -92 |
 TLSE |     -     -    -5     -     -     -     -     -    10 |
 TROM |     -     -     -     -   -93     -     -     -   135 |
 TSKB |     -   -73    31    63    46     -     -     -   -79 |
 TWTF |     -   -63   -98     -     -     -     -     -   258 |
 UNSA |     -     -     -    70   150     -     -     -  -259 |
 USN3 |     -   -38    58     -     -     -     -     -   -68 |
 USNO |     -  -113    29     -     -     -     -     -    71 |
 VILL |     -     -     -   -59   -81     -     -     -   152 |
 WES2 |     -     -    57     -     -     -     -     -  -109 |
 WHIT |     -    11     -     -     -     -     -     -   -12 |
 WILL |     -   -74    72     -     -     -     -     -   -54 |
 WTZA |     -   -93     -     -     -     -     -     -   105 |
 WTZR |     -     -   105  -214    47     -     -     -  -192 |
 WUHN |     -     -     -     -    14     -     -     -   -20 |
 YEBE |     -     -   -98     -     -     -     -     -   187 |
 YELL |     -     -   -32    22   -30     -     -     -    94 |
 YSSK |     -   -44     -     -    34     -     -     -     - |
 ZIMM |     -     -     -     -    63     -     -     -   -92 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7705   119    56   182    76    48  7057  5865   118 |  288   3.52
    2 |   523    70    52    36    37    61   613   539    81 |  288   0.17
    3 |  4429    40    21    45    31    33  5102  4933    60 |  288   2.93
    4 |  1804   132    54     X    60    95  1180  1621   103 |  277   0.97
    5 |  3997    30    17    27    15    57  3372  3148    71 |  288   2.43
    6 |  4989    64    21    39    17    32  7979  3383    46 |  288   1.23
    7 |  1063    52    13    41    18    34  1597   971    63 |  288   0.68
    8 |  3038    34    27    42    31    62  4927  3665    43 |  288   2.82
    9 |  3688    32    31    48    18    47  4942  2955    49 |  288   2.32
   10 |  2410    37    28    57    19    50  1401  2276    38 |  288   1.21
   11 |   923    55    61    78    55    59  1428  1275    86 |  288   0.33
   13 |   964    56    27    78    42    66  1688   987   101 |  288   0.46
   14 |   472    58    47    47    58    48   619   499   182 |  288   0.25
   15 |  6473   115    72   118    60    83  6010  5233    68 |  288   2.85
   16 |   532    28    19   100    24    66   958   550    68 |  288   0.21
   18 |   924    32    21    37    33    60   956   834    89 |  288   0.32
   19 |   520    51    48    67    29    61   583   589    85 |  288   0.23
   20 |   427    40    30    31    21    58   669   413    65 |  288   0.24
   21 |   508    69    34    45    20    52 10663   646   107 |  288   0.33
   22 |  2675    39    32    38    28    38   542  2995    71 |  288   0.33
   23 |   648    75    26    99    39    83   823   779   139 |  288   0.25
   24 |  2850   113    52   148    50   134  2067  3126    58 |  288   2.59
   25 |  1532    42    15    39    24    50  2360  1629    70 |  288   1.50
   26 |  1760   128    55   147    63   109  1794  1709    78 |  288   0.52
   27 |  5906    52    26    80    39    38  5657  5455    60 |  288   1.78
   28 |  1232    31    19    59    50    57  3850  1109   109 |  288   0.32
   29 |  1014    82    45     X    30   163  1126   865    84 |  288   0.75
   30 |   874    16    17    48    11    40   972   893    35 |  288   0.46
   31 |  3164   112    41   108    42   126   738  3239    62 |  288   0.71
 -----+-------------------------------------------------------+--------------
 ALBH |     -     -     7     -     -     -     -     -    13 |  288   0.22
 ALGO |     -    45    22    31    17     -     -     -    15 |  288   0.01
 ALIC |     -    17     -     -    13     -     -     -     - |  252   7.98
 ALRT |     -    15     -     -    16     -     -     -    13 |  288   6.36
 AMC2 |     -    40    13     -     -     -     -     -    36 |  288   0.05
 AREQ |     -    31    23     -    16     -     -     -    27 |  288  12.45
 ARTU |     -     -     -    78    25     -     -     -    67 |  288   9.59
 ASPA |     -     -     -     -    30     -     -     -    44 |  282    >>>
 AUCK |     -    60     -     X    15     -     -     -    73 |  264  10.09
 BAHR |     -     -    13     -    14     -     -     -    23 |  288   0.78
 BILI |     -     -     -     -    11     -     -     -    17 |  286   8.94
 BOGT |     -     -     -    36    20     -     -     -    29 |  288  12.64
 BOR1 |     -    24    13     -    34     -     -     -    27 |  288   0.62
 BREW |     -     -     6     -     -     -     -     -    11 |  288   0.03
 BRMU |     -     -     -     -    21     -     -     -    31 |  288    >>>
 BRUS |     -    48    23     -    19     -     -     -    17 |  288   0.03
 CAGZ |     -    14     -     -     -     -     -     -    16 |  288   0.90
 CAS1 |     -    19     -    91    26     -     -     -    42 |  288   7.75
 CHAT |     -    65     -     -    31     -     -     -    82 |  251   9.77
 CHUR |     -     -    15     -    11     -     -     -    26 |  288   0.04
 COCO |     -    27     -    87    35     -     -     -    36 |  288   9.00
 CORD |     -    25     -     -    17     -     -     -    27 |  288   8.29
 DAKA |     -    26     -     -    20     -     -     -     - |  287  14.45
 DARW |     -     -    18     -     X     -     -     -    34 |  228   9.87
 DGAR |     -    39     -     -    28     -     -     -    22 |  288  14.12
 DRAO |     -    38    13    39    17     -     -     -    54 |  288   0.06
 DWH1 |     -    51    39     -     -     -     -     -    38 |  288   0.52
 FAIR |     -     -    13    29    11     -     -     -     - |  288   0.04
 GLPS |     -     -     -     -    13     -     -     -    19 |  288  12.69
 GODE |     -    19    12    26     -     -     -     -    16 |  288   0.03
 GOLD |     -     -     -    60    18     -     -     -    48 |  288  13.92
 GRAS |     -     -     -     -    16     -     -     -    24 |  288   9.47
 GUAM |     -    29     -     X    21     -     -     -    38 |  288  13.13
 GUAT |     -     -     -     -    13     -     -     -    19 |  288    >>>
 HARB |     -    34     -     -    25     -     -     -    17 |  287  29.50
 HERS |     -     -    16     -     -     -     -     -    30 |  241  10.78
 HLFX |     -     -    17     -     -     -     -     -    32 |  286  11.33
 HOB2 |     -    31    33     -    80     -     -     -    36 |  288   0.10
 HRAO |     -     -     -     -    24     -     -     -    35 |  288   0.81
 IENG |     -    37    22     -     -     -     -     -     - |  286   1.01
 INVK |     -    26     -     -     -     -     -     -    30 |  288   7.99
 ISPA |     -     -     -     -    40     -     -     -    58 |  288  12.37
 JOZE |     -     -     -     -    18     -     -     -    27 |  288    >>>
 JPLM |     -     -     9     -    19     -     -     -    32 |  288   8.83
 KARR |     -    68     -     -    53     -     -     -     - |  274   9.83
 KERG |     -    37    33    63    49     -     -     -    78 |  252   1.74
 KGN0 |     -    31    12     -     -     -     -     -    22 |  287   0.42
 KIT3 |     -     -     -   148    56     -     -     -    19 |  286  69.73
 KOKB |     -    66    32     -    29     -     -     -    40 |  288   0.04
 KOSG |     -    19     -     -     -     -     -     -    21 |  288  11.77
 KOUR |     -    33     -    88    41     -     -     -    29 |  288    >>>
 LAE1 |     -    52     -     -    53     -     -     -    52 |  287    >>>
 LHAS |     -    22     -     -    12     -     -     -    26 |  288  10.31
 LPGS |     -    37    27    66     -     -     -     -    34 |  288  18.35
 MAC1 |     -    47     -     X    35     -     -     -    30 |  264  12.83
 MAD2 |     -     -     8     -     -     -     -     -    15 |  288   0.09
 MALI |     -    28     -   106    63     -     -     -    56 |  288  19.87
 MAS1 |     -     -    22    79    28     -     -     -    37 |  288  17.84
 MATE |     -     -     -    62    24     -     -     -    32 |  288   0.12
 MAW1 |     -    46     -     -    56     -     -     -   106 |  288   7.07
 MBAR |     -    79     -     -    49     -     -     -    97 |  288  21.56
 MCM4 |     -    15     -     -    11     -     -     -     - |  270 242.69
 MDO1 |     -    50    21     -    17     -     -     -    31 |  288  21.83
 MEDI |     -     -    15     -     -     -     -     -    29 |  288   0.16
 METS |     -    21    18     -     -     -     -     -    20 |  271   8.94
 MIZU |     -     -    14    75     -     -     -     -    25 |  288   0.33
 MKEA |     -    33     -    88    14     -     -     -    69 |  288  23.88
 NLIB |     -    34    18     -    48     -     -     -    29 |  288   0.06
 NNOR |     -     -    30    90     -     -     -     -    24 |  277  12.03
 NRC1 |     -     -    12     -    14     -     -     -    17 |  288   0.02
 NRIL |     -     -     -     -    32     -     -     -    46 |  278   7.56
 NSSP |     -    11     -     -     -     -     -     -    12 |  288  10.49
 NTUS |     -    33     -    38     -     -     -     -    41 |  286  11.82
 OHI2 |     -    41     -   102    18     -     -     -    60 |  288   7.16
 ONSA |     -     -    13    44     -     -     -     -     - |  288   0.03
 PDEL |     -    39     -     -    23     -     -     -    16 |  288  56.24
 PERT |     -    38    37    90     -     -     -     -    48 |  288   1.82
 PETP |     -     -     -     -    17     -     -     -    24 |  287  11.47
 PIE1 |     -     -    34     X     -     -     -     -    65 |  267   1.03
 POL2 |     -    21     -     -    18     -     -     -    16 |  288   8.32
 POTS |     -    26     -     -    29     -     -     -    19 |  288  11.03
 PRDS |     -     -     7     -     -     -     -     -    13 |  288   0.12
 PTBB |     -    37    20     -     -     -     -     -    29 |  288   0.20
 QAQ1 |     -     -    22     -     -     -     -     -    42 |  288   5.52
 RBAY |     -    31     -     -    29     -     -     -    37 |  288  47.21
 REYK |     -    35     -     -     -     -     -     -    40 |  287   7.02
 RIOG |     -    30    19     -    23     -     -     -    23 |  288   7.91
 SANT |     -    25     -    69    22     -     -     -     - |  288   2.80
 SCH2 |     -     -    10     -     9     -     -     -    16 |  288  21.37
 SCUB |     -    33     -     -     -     -     -     -    37 |  280  10.64
 SFER |     -    29    17     -     -     -     -     -     - |  282   0.35
 SPT0 |     -    18    14     -     -     -     -     -    19 |  288   0.04
 STJO |     -     -    21     -    38     -     -     -    24 |  288   0.10
 STR1 |     -     -    11     -     -     -     -     -    22 |  288   0.62
 SUTM |     -     -    22     -    27     -     -     -    35 |  276  13.02
 THTI |     -     -    23    98    22     -     -     -    43 |  276  11.68
 THU3 |     -    31    13     -    16     -     -     -    40 |  288   7.63
 TIDB |     -    31    24    44    52     -     -     -    14 |  288   0.06
 TIXI |     -    24     -    26    11     -     -     -    31 |  287   8.05
 TLSE |     -     -    17     -     -     -     -     -    33 |  288   0.39
 TROM |     -     -     -     -    19     -     -     -    27 |  286    >>>
 TSKB |     -    27    20    72    43     -     -     -    56 |  288   1.33
 TWTF |     -    27    28     -     -     -     -     -    46 |  288   0.06
 UNSA |     -     -     -    73    35     -     -     -    27 |  288  12.76
 USN3 |     -    33    17     -     -     -     -     -    32 |  288   0.05
 USNO |     -    57    29     -     -     -     -     -    22 |  288   0.04
 VILL |     -     -     -    75    27     -     -     -    14 |  288  12.56
 WES2 |     -     -     9     -     -     -     -     -    17 |  286   0.33
 WHIT |     -    25     -     -     -     -     -     -    28 |  288   3.51
 WILL |     -    41    28     -     -     -     -     -    35 |  288 176.53
 WTZA |     -    16     -     -     -     -     -     -    18 |  286   0.51
 WTZR |     -     -    58    69    80     -     -     -    25 |  285   0.05
 WUHN |     -     -     -     -    32     -     -     -    47 |  287   8.39
 YEBE |     -     -     9     -     -     -     -     -    16 |  288    >>>
 YELL |     -     -    14    49    20     -     -     -    14 |  288   0.04
 YSSK |     -    15     -     -    12     -     -     -     - |  287  11.06
 ZIMM |     -     -     -     -    85     -     -     -   124 |  253    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  3021    49    28    76    34    72  3522  2687    52 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.95   | 3.79e-14  5.77e-15  2.24e-15 |
 NRC1 |   288     0     0   288    9.95   | 3.18e-14  7.30e-15  2.27e-15 |
 BREW |   288     0     0   288    9.89   | 5.17e-14  7.99e-15  1.13e-15 |
 BRUS |   288     0     0   288    8.17   | 4.03e-14  1.04e-14  2.40e-15 |
 AMC2 |   288     0     0   288    7.32   | 4.17e-14  9.53e-15  2.53e-15 |
 ALGO |   288     0     0   288    6.57   | 2.81e-14  6.93e-15  1.70e-15 |
 ONSA |   288     0     0   288    5.94   | 3.72e-14  6.98e-15  2.87e-15 |
 MAD2 |   288     0     0   288    4.51   | 4.33e-14  9.76e-15  6.64e-15 |
 KOKB |   288     0     0   288    4.32   | 5.36e-14  1.33e-14  2.68e-15 |
 TWTF |   288     0     0   288    4.21   | 5.59e-14  1.55e-14  3.90e-15 |
 SPT0 |   288     0     0   288    4.14   | 4.15e-14  9.70e-15  4.02e-15 |
 WTZR |   285     0     0   282    3.81   | 5.68e-14  1.37e-14  4.86e-15 |
 FAIR |   288     0     0   288    3.46   | 5.91e-14  9.59e-15  3.05e-15 |
 USN3 |   288     0     0   288    3.18   | 9.55e-14  1.04e-14  2.78e-15 |
 NLIB |   288     0     0   288    2.44   | 6.85e-14  1.92e-14  6.03e-15 |
 HOB2 |   288     0     0   287    1.69   | 4.86e-14  1.53e-14  5.33e-15 |
 DRAO |   288     0     0   288    1.56   | 2.70e-14  8.49e-15  3.81e-15 |
 YELL |   288     0     0   288    1.55   | 3.55e-14  7.16e-15  2.62e-15 |
 GODE |   288     0     0   288    1.17   | 4.16e-14  7.36e-15  1.79e-15 |
 TIDB |   288     1     0   287    1.16   | 1.61e-13  1.55e-14  6.65e-15 |
 STJO |   288     0     0   288    0.97   | 4.15e-14  1.95e-14  8.48e-15 |
 MATE |   288     0     0   288    0.83   | 4.84e-14  1.42e-14  9.58e-15 |
 ALBH |   288     0     0   288    0.60   | 4.13e-14  1.75e-14  2.32e-14 |
 MEDI |   288     0     0   288    0.36   | 4.86e-14  1.20e-14  8.64e-15 |
 CHUR |   288     0     0   288    0.35   | 4.87e-14  1.16e-14  4.09e-15 |
 PRDS |   288     0     0   288    0.28   | 6.59e-14  1.81e-14  1.26e-14 |
 PTBB |   288     0     0   288    0.22   | 2.90e-13  7.11e-14  2.00e-14 |
 PIE1 |   267     1     0   265    0.21   | 9.48e-14  3.13e-14  7.52e-15 |
 DWH1 |   288     0     0   288    0.12   | 3.24e-13  8.56e-14  2.97e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.21e-13  8.54e-14  2.72e-14 |
 G26  |   288     0     0   288    0.10   | 3.56e-13  1.12e-13  4.52e-14 |
 G30  |   288     0     0   288    0.08   | 2.90e-13  9.42e-14  5.45e-14 |
 MIZU |   288     1     0   287    0.07   | 4.01e-13  9.91e-14  2.55e-14 |
 G31  |   288     0     0   288    0.07   | 2.18e-13  7.11e-14  7.64e-14 |
 SFER |   282     0     0   278    0.06   | 3.80e-13  1.13e-13  3.35e-14 |
 TLSE |   288     0     0   288    0.06   | 4.18e-13  9.51e-14  3.64e-14 |
 G07  |   288     0     0   288    0.06   | 2.82e-13  7.66e-14  8.90e-14 |
 G23  |   288     0     1    67    0.05   | 5.34e-13  6.65e-14  2.49e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.70e-13  1.29e-13  4.65e-14 |
 G29  |   288     0     0   288    0.04   | 4.51e-13  1.39e-13  9.88e-14 |
 HRAO |   288     0     0   288    0.04   | 1.29e-13  3.40e-14  7.88e-14 |
 WES2 |   286     0     0   141    0.04   | 4.54e-14  3.60e-14  2.20e-14 |
 IENG |   286     0     0   285    0.04   | 5.71e-13  1.52e-13  9.32e-14 |
 WTZA |   286     0     0   284    0.04   | 4.58e-13  1.39e-13  4.09e-14 |
 G04  |   277     0     0   275    0.03   | 4.42e-13  1.08e-13  1.01e-13 |
 G06  |   288     0     0   288    0.03   | 3.97e-13  1.43e-13  8.88e-14 |
 CAGZ |   288     0     0   280    0.01   | 1.12e-12  2.76e-13  1.04e-13 |
 STR1 |   288     0     0   143    0.01   | 6.50e-13  1.49e-13  5.99e-14 |
 TSKB |   288     0     0   288    0.01   | 1.00e-12  2.52e-13  1.47e-13 |
 BAHR |   288     0     0   288    0.01   | 3.35e-13  1.93e-13  9.09e-14 |
 G10  |   288     0     0   288    0.01   | 1.25e-12  4.04e-13  1.20e-13 |
 G27  |   288     0     0   288    0.01   | 1.42e-12  4.32e-13  1.52e-13 |
 G03  |   288     0     0   288    0.01   | 1.24e-12  3.87e-13  2.07e-13 |
 G25  |   288     0     0   288    0.01   | 1.45e-12  3.94e-13  1.55e-13 |
 KERG |   252     0     0   251    0.01   | 1.07e-12  3.28e-13         - |
 G15  |   288     0     0   288    0.01   | 1.61e-12  5.76e-13  3.43e-13 |
 G09  |   288     0     0   288    0.00   | 1.27e-12  4.31e-13  3.10e-13 |
 WHIT |   288     0     1   166    0.00   | 5.11e-13  2.30e-13  3.77e-13 |
 GPST |   288     0     0     0    0.00   | 2.16e-14  5.29e-15  1.22e-15 |
 METS |   271     0     0     0    0.00   |        -         -         - |
 DARW |   228     0     0     0    0.00   |        -         -         - |
 ASPA |   282     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   264     1     0     0    0.00   |        -         -         - |
 LAE1 |   287     2     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   251     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.48e-13  7.22e-14  2.74e-14 |
 G24  |   288     0     0     0    0.00   | 1.32e-12  4.68e-13  3.06e-13 |
 G22  |   288     0     6     0    0.00   | 6.16e-13  6.00e-14  2.40e-14 |
 G21  |   288     1     6     0    0.00   | 1.16e-12  1.43e-13  4.39e-14 |
 G20  |   288     0     6     0    0.00   | 6.38e-13  7.79e-14  2.29e-14 |
 G19  |   288     0     6     0    0.00   | 8.03e-13  7.10e-14  2.44e-14 |
 G18  |   288     0     6     0    0.00   | 1.06e-12  8.51e-14  3.68e-14 |
 G16  |   288     0     6     0    0.00   | 5.09e-13  5.40e-14  2.30e-14 |
 G14  |   288     0     5     0    0.00   | 6.05e-13  5.74e-14  1.80e-14 |
 G13  |   288     0     4     0    0.00   | 5.77e-13  6.44e-14  4.08e-14 |
 G11  |   288     0     4     0    0.00   | 6.52e-13  7.69e-14  3.95e-14 |
 G08  |   288     1     1     0    0.00   | 1.79e-12  4.30e-13  2.83e-13 |
 G05  |   288     0     0     0    0.00   | 1.40e-12  5.53e-13  2.17e-13 |
 G02  |   288     0     6     0    0.00   | 5.16e-13  6.00e-14  1.73e-14 |
 G01  |   288     0     0     0    0.00   | 1.44e-12  6.60e-13  3.23e-13 |
 ZIMM |   253     0     0     0    0.00   |        -         -         - |
 YEBE |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TROM |   286     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     0     0     0    0.00   | 3.65e-13  1.96e-13  7.60e-13 |
 SUTM |   276     0     0     0    0.00   |        -         -         - |
 SCUB |   280     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 6.95e-13  3.98e-13  1.32e-12 |
 SANT |   288     1     0     0    0.00   | 1.98e-12  7.93e-13  1.89e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 RBAY |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.87e-12  5.51e-13  2.03e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   286     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   278     0     0     0    0.00   |        -         -         - |
 NNOR |   277     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   270     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     2     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     2     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.56e-13  8.74e-13  1.17e-12 |
 KIT3 |   286     3     0     0    0.00   |        -         -         - |
 KARR |   274     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.22e-13  2.54e-13  8.71e-13 |
 JOZE |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   286     0     0     0    0.00   | 2.04e-13  2.72e-13  1.19e-12 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAKA |   287     0     0     0    0.00   |        -         -         - |
 CORD |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.49e-13  9.72e-13  8.48e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   252     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.87e-17  3.45e-16  2.07e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     DRAO      USNO      BREW |
------------------------------------------+------------------------------+
