
 GPS week: 1309   Day: 1   MJD: 53408                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2880      0    -0.02     0.08     2.90     0.00      0
 cod |   288     0  26353      0     0.13    -0.88     0.04    21.12      0
 emr |   288     0  24150    320  4056.01    52.66     0.05    15.02      0
 esa |   288     0  18566   1177  8506.88    69.85     0.07     9.44      0
 gfz |   288     0  20793    345     0.07    -0.64     0.03    25.40      0
 iga |    96     0   2880     14     0.00    -0.02     0.08     0.00      0
 igu |    96     0   2880      1     0.01    -0.05     3.29     0.00      0
 jpl |   288     0  17929     89     1.08     0.08     0.06    11.63      0
 ngs |    96     0   2880      0    -0.02     0.08     2.85     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  34408   3329  4055.92    52.65     0.05    17.40      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |   898   -26   -19    94    12    53   715   -43   985     -     7 |
    2 | -3674    73   -39   -36   -35   -66 -3445    30 -3659     -    -4 |
    3 | -5304   -74   -37    69    32    56  6744    46 -4696     -     8 |
    4 | -5164   -12  -155   151   -11   -47 -7234   142 -5435     -   -12 |
    5 | -3476   -37   -58   -13    78    12 -1915    36 -3592     -   -35 |
    6 |  3098   -12   -79   -40   130  -170 -9047    12  2436     -   -94 |
    7 | -1577   -28  -152   -80   139    57 -1300    94 -1533     -   -56 |
    8 |  5449   -38     X    23    37   -66  -372   119  5369     -  -100 |
    9 | -1498    33   -51   -56    56  -190  1049    72 -1560     -   -95 |
   10 |  -580   -52   -52   127    95   219  2491    41  -975     -  -126 |
   11 |  3668     6   -66   101   -38     0  -276    73  3932     -     2 |
   13 |  5170   137    52  -126   -70   -49 -1737    27  4890     -   -59 |
   14 |  2133    74   -59   103    -8   -43 -1856    31  2171     -  -105 |
   15 |  -791   -86   -68   173   110   234 22021   -85  -746     -   -35 |
   16 |  4269    10    41    31    30   -21  -647   -20  4225     -   -94 |
   17 | -3880    82   -83   112   -36   189  3393   107 -3904     -  -108 |
   18 |  2512     8   -53   -25    55    -2 -1577    12  2714     -   -36 |
   19 |  4073    29   -67    26    86  1020  -492   115  4174     -  -194 |
   20 |  3233   -70  -102    14    87   -48 -1564   151  3383     -   -57 |
   21 |   381   107   -59    12   -23    44 -2555    81   500     -  -107 |
   22 |  2630    40    66    49   -27   -14  3716    48  2694     -  -126 |
   23 | -1549    55    16  -112   -25  -263 -2366    31 -1462     -    -5 |
   24 | -5910   -57  -179    72    92   -57   874   119 -5777     -   -28 |
   25 | -2306     1    15  -202    -8  -156 12779    70 -2166     -    60 |
   26 | -4332    63   -87     X   -16  -166 -4069    86 -4270     -   -34 |
   27 | -3885   -89   -61   106   105  -125 -3622   144 -3902     -  -146 |
   28 |  2240   100  -101   -17   -25   103   309    87  2202     -   -44 |
   29 | -3474    50  -136    82    45  -183 -4412    50 -3450     -   -87 |
   30 | -3360     3   -11    44     7   -86 -5049   -27 -3571     -   -12 |
   31 | 11004    66  -307   -12   141   -84  -319   163 11021     -  -100 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    54   -19     -     -     -     -   -27     -     -   -31 |
 ALGO |     -     -  -148   361     -     -     -     -     -     -   -68 |
 ALRT |     -   -25     -     -    21     -     -     -     -     -     - |
 AMC2 |     -  -129   151     -     -     -     -  -279     -     -   213 |
 AREQ |     -     -   113     -     8     -     -  -276     -     -    75 |
 ARTU |     -   110     -   137  -100     -     -  -119     -     -     X |
 ASPA |     -     -     -     -    86     -     -   -75     -     -   -77 |
 AUCK |     -     -     -     4     -     -     -     -     -     -    -2 |
 BAHR |     -   -55   102     -    36     -     -     -     -     -   -74 |
 BAN2 |     -     -     -     -     -     -     -   -70     -     -    47 |
 BILI |     -   131     -     -  -109     -     -     -     -     -     X |
 BOGT |     -   208     -    69   -99     -     -  -161     -     -   -37 |
 BOR1 |     -   -21    94     -     -     -     -     -     -     -   -55 |
 BRMU |     -     -     -     -    27     -     -     -     -     -   -40 |
 BRUS |     -   -23    55     -     -     -     -   -67     -     -    25 |
 CAGZ |     -   129     -     -     -     -     -     -     -     -  -157 |
 CAS1 |     -    43     -    43   -72     -     -     -     -     -    30 |
 CHAT |     -     -     -     -   -33     -     -     -     -     -    48 |
 COCO |     -   -21     -     2   -18     -     -     -     -     -    51 |
 DGAR |     -     -     -     -     -     -     -    78     -     -   -52 |
 DRAO |     -   -41    -3     X     -     -     -    19     -     -    40 |
 DWH1 |     -    99   113     -     -     -     -  -260     -     -   -43 |
 FAIR |     -     -   125   -17   -74     -     -    10     -     -     - |
 GLPS |     -    14     -    35    15     -     -   -87     -     -     X |
 GODE |     -     -    43   -12     -     -     -   -67     -     -    15 |
 GOLD |     -     0     -    56     -     -     -   -45     -     -     X |
 GRAZ |     -     -   121     -     -     -     -     -     -     -  -105 |
 GUAM |     -     -     -  -479    -2     -     -   -50     -     -   296 |
 GUAT |     -   -47     -     -   -93     -     -     -     -     -   192 |
 HLFX |     -     -   223     -     -     -     -  -288     -     -     X |
 HOB2 |     -   -52   203     -     -     -     -     -     -     -  -112 |
 HOFN |     -     -     -     -   -98     -     -     -     -     -   143 |
 HOLM |     -    95     -     -     -     -     -  -172     -     -     - |
 HRAO |     -     -     -     -  -100     -     -   109     -     -    74 |
 IENG |     -   -65    91     -     -     -     -     -     -     -     - |
 IISC |     -     -     -   132   -49     -     -     -     -     -     - |
 INVK |     -    19     -     -     -     -     -   -35     -     -     - |
 IRKT |     -     -   118  -188     -     -     -     -     -     -     - |
 JPLM |     -     -    30     -   -40     -     -  -139     -     -   124 |
 KERG |     -    44    32  -412   -13     -     -     -     -     -   162 |
 KGN0 |     -   -52    75     -     -     -     -     -     -     -    -1 |
 KIRU |     -   -21     -     -     -     -     -   138     -     -   -67 |
 KOKB |     -   -25   111     -  -103     -     -    10     -     -    77 |
 KOUR |     -   -68     -   -38   -34     -     -     -     -     -   153 |
 KUNM |     -  -129     -     -     -     -     -     -     -     -   156 |
 LPGS |     -   -41   219  -284     -     -     -     -     -     -    14 |
 MAC1 |     -   -76     -    -5    65     -     -     -     -     -     X |
 MADR |     -     -     -     -     -     -     -   -34     -     -    23 |
 MALI |     -    81     -    11   -68     -     -     -     -     -     X |
 MAS1 |     -    25    -2  -317   -22     -     -   119     -     -    97 |
 MAW1 |     -   105     -     -   -36     -     -     -     -     -   -74 |
 MBAR |     -     7     -     -   -55     -     -    60     -     -    32 |
 MCM4 |     -   141  -199     -     X     -     -     -     -     -     - |
 MDO1 |     -   -43  -150     -     -     -     -     -     -     -   182 |
 MEDI |     -     -    54     -     -     -     -     -     -     -   -47 |
 METS |     -  -168    73     -     -     -     -     -     -     -   141 |
 MIZU |     -     -  -127   276     -     -     -     -     -     -   -40 |
 NISU |     -    27     -     -   -22     -     -     -     -     -     - |
 NKLG |     -     -     -     -    42     -     -     -     -     -   -62 |
 NLIB |     -   -25   -65     -     -     -     -   -10     -     -    94 |
 NNOR |     -     -    77  -135     -     -     -     -     -     -     7 |
 NPLD |     -  -143   116     -     -     -     -     -     -     -    73 |
 NRC1 |     -     -    36     -   -98     -     -     -     -     -   112 |
 NRIL |     -     -     -     -   -19     -     -    41     -     -     X |
 NTUS |     -  -178     -   173    13     -     -     -     -     -   102 |
 NYA1 |     -    91     -     -   -66     -     -     -     -     -   -13 |
 ONSA |     -     -  -117   186     -     -     -     -     -     -     - |
 PERT |     -     -    21     X    71     -     -   -12     -     -  -114 |
 PIE1 |     -     -   -51   -98     -     -     -     -     -     -    97 |
 PIMO |     -     -     -    12     -     -     -     -     -     -    -7 |
 POL2 |     -     -     -     -     -     -     -  -127     -     -    85 |
 POTS |     -    32     -     -   -26     -     -     -     -     -     X |
 PRDS |     -   -71    -7     -     -     -     -     -     -     -    91 |
 PTBB |     -   -36    54     -     -     -     -     -     -     -    -3 |
 REYK |     -     2     -     -     -     -     -     -     -     -    -2 |
 RIOG |     -   -12    32     -   -10     -     -     -     -     -     3 |
 SCH2 |     -     -   -30     -     -     -     -     -     -     -    26 |
 SFER |     -    85  -120     -     -     -     -     -     -     -     - |
 SPT0 |     -  -199   102     -     -     -     -     -     -     -   153 |
 STJO |     -    53   -74     -     -     -     -     -     -     -     X |
 STR1 |     -     -   115     -     -     -     -     -     -     -   -99 |
 SUTH |     -   -30     -     -     -     -     -     -     -     -    36 |
 THTI |     -     -   -64    27    35     -     -     -     -     -   -11 |
 THU3 |     -   116     -     -     -     -     -     -     -     -  -141 |
 TID1 |     -     -     -     -     -     -     -     2     -     -    -1 |
 TIDB |     -     0   111    73     -     -     -     -     -     -  -122 |
 TLSE |     -     -   -30     -     -     -     -     -     -     -    26 |
 TOW2 |     -    55     -     -   -52     -     -     -     -     -     9 |
 TRO1 |     -   -11     -     -    45     -     -     -     -     -   -55 |
 TSKB |     -   -56    -7    34    61     -     -     -     -     -   -34 |
 TWTF |     -   -62   -43     -     -     -     -     -     -     -   112 |
 UNSA |     -     -     -  -357   133     -     -     -     -     -     X |
 USN3 |     -    59     -     -     -     -     -   -23     -     -   -57 |
 USNO |     -   -25   -21     -     -     -     -     -     -     -    48 |
 USUD |     -     -   -36    13     -     -     -    36     -     -     X |
 VILL |     -     -     -    13     -     -     -     -     -     -    -7 |
 WHIT |     -   -41     -     -     -     -     -     -     -     -    50 |
 WILL |     -   -41    97     -     -     -     -     -     -     -   -34 |
 WTZR |     -   -54   120    32     -     -     -     -     -     -   -55 |
 YAR2 |     -   -62   146     -     -     -     -     -     -     -   -51 |
 YEBE |     -     -   -44     -     -     -     -     -     -     -    38 |
 YELL |     -     -    83     X  -230     -     -     -     -     -   197 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5866    57    73    68    31    43  3480    66  6016     -    65 |  288   5.78
    2 |   924    48    44    45    29    53  1797    34   974     -    49 |  288   0.22
    3 |  3723   110    35    58    74   232  4581    41  3497     -    58 |  288   1.42
    4 |  3210    41    30   127    26    27  3274    57  3084     -    32 |  288   0.63
    5 |  3677    46    56    30    39    51  3153    53  3324     -    74 |  288   3.15
    6 |  3797    36    41    40    20    30  6810    28  3599     -    35 |  288   1.64
    7 |   831    18    32    60    22    69   956    70   831     -    40 |  288   0.72
    8 |  2893    46     X    81    29    50  2412    83  2824     -    67 |  288   1.85
    9 |  3995    48    27    84    22    38  2170    27  3777     -    39 |  288   2.39
   10 |  2276    44    43    63    32   100  2608    64  2251     -    57 |  288   1.34
   11 |  1562    38    41    54    22    85   863    62  1633     -    70 |  288   0.53
   13 |  1101    46   107    97    14    49   662    81  1073     -    60 |  288   0.27
   14 |   519    38    55    91    20    46   643   118   461     -    58 |  288   0.19
   15 |  4804    32    32    75    43    63 10067    63  4759     -    87 |  288   2.59
   16 |   600    50    48    47    21    40   328    76   550     -    53 |  288   0.38
   17 |  1358    53    34    69    27    55  4758    25  1277     -    45 |  288   1.98
   18 |   495    55   103    68    50    55   677    49   532     -    46 |  288   0.38
   19 |   371    52    95   148    44   104   833    81   444     -    69 |  288   0.29
   20 |   598    70    88    29    25    61   565    89   561     -    55 |  288   0.27
   21 |   824    43    50    46    40    58  1077    37   765     -    86 |  288   0.26
   22 |  5645    78    86    23    24    64  5671    89  5594     -    85 |  288   2.29
   23 |   575    48    67    89    36    61   896    46   606     -    41 |  288   0.25
   24 |  3835    40    30    77    24    31  2645    83  3876     -    85 |  288   2.52
   25 |  2106    52    52    35    20    93  4466    53  2210     -    58 |  288   2.07
   26 |  1645    32    38     X    46    41  1749    49  1569     -    61 |  288   0.64
   27 |  1295    47    78   103    38    51  1275   117  1292     -    43 |  288   0.91
   28 |   679    56    71    89    59    86  1086   129   718     -    77 |  288   0.41
   29 |  1241    31    40   109    42   113  1843    36  1251     -    62 |  288   0.88
   30 |  1905    44    41    45    27   128  3014    56  1809     -    66 |  288   0.79
   31 |  6775    96   101    50    93    96   633   114  6696     -    56 |  288   0.82
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    24    46     -     -     -     -    36     -     -    22 |  288   0.06
 ALGO |     -     -    19    56     -     -     -     -     -     -    18 |  288   0.04
 ALRT |     -    14     -     -    11     -     -     -     -     -     - |  288   5.75
 AMC2 |     -    16    40     -     -     -     -    36     -     -    13 |  288   0.05
 AREQ |     -     -    57     -    18     -     -    54     -     -    50 |  288  15.22
 ARTU |     -    25     -    46    33     -     -    27     -     -     X |  287   8.58
 ASPA |     -     -     -     -    24     -     -    47     -     -    30 |  288    >>>
 AUCK |     -     -     -   133     -     -     -     -     -     -    72 |  167  12.07
 BAHR |     -    30    30     -    17     -     -     -     -     -    25 |  288   0.32
 BAN2 |     -     -     -     -     -     -     -    72     -     -    48 |  215  16.43
 BILI |     -    26     -     -    21     -     -     -     -     -     X |  227   6.38
 BOGT |     -    21     -    28    23     -     -    44     -     -    34 |  288  16.02
 BOR1 |     -    16    15     -     -     -     -     -     -     -    11 |  288   0.64
 BRMU |     -     -     -     -    14     -     -     -     -     -    20 |  288    >>>
 BRUS |     -    35    18     -     -     -     -    27     -     -    20 |  288   0.03
 CAGZ |     -    19     -     -     -     -     -     -     -     -    24 |  279   0.32
 CAS1 |     -    27     -    39    21     -     -     -     -     -    61 |  288   8.93
 CHAT |     -     -     -     -    31     -     -     -     -     -    46 |  287  13.65
 COCO |     -    53     -    57    26     -     -     -     -     -    44 |  287    >>>
 DGAR |     -     -     -     -     -     -     -    51     -     -    34 |  288  18.02
 DRAO |     -    33    35     X     -     -     -    28     -     -    32 |  288   0.07
 DWH1 |     -    28    60     -     -     -     -    31     -     -    15 |  288   0.83
 FAIR |     -     -    35    29    18     -     -    34     -     -     - |  285   0.30
 GLPS |     -    30     -    34    17     -     -    37     -     -     X |  288  17.81
 GODE |     -     -    43    56     -     -     -    32     -     -    11 |  288   0.19
 GOLD |     -    40     -    66     -     -     -    28     -     -     X |  288  13.49
 GRAZ |     -     -    20     -     -     -     -     -     -     -    17 |  286    >>>
 GUAM |     -     -     -    65    23     -     -    47     -     -    36 |  288  11.32
 GUAT |     -    43     -     -    19     -     -     -     -     -    32 |  288    >>>
 HLFX |     -     -    31     -     -     -     -    39     -     -     X |  288   3.49
 HOB2 |     -    26    39     -     -     -     -     -     -     -    32 |  288   0.06
 HOFN |     -     -     -     -    22     -     -     -     -     -    32 |  279    >>>
 HOLM |     -    12     -     -     -     -     -    22     -     -     - |  288   6.14
 HRAO |     -     -     -     -    15     -     -    38     -     -    30 |  288   0.28
 IENG |     -    29    41     -     -     -     -     -     -     -     - |  288   0.50
 IISC |     -     -     -    54    20     -     -     -     -     -     - |  288  23.39
 INVK |     -    28     -     -     -     -     -    50     -     -     - |  288   6.22
 IRKT |     -     -    26    42     -     -     -     -     -     -     - |  288   0.16
 JPLM |     -     -    68     -    28     -     -    45     -     -    16 |  288   6.77
 KERG |     -    27    31    44    30     -     -     -     -     -    66 |  288   2.12
 KGN0 |     -    19    32     -     -     -     -     -     -     -    39 |  287   0.42
 KIRU |     -    36     -     -     -     -     -    34     -     -    59 |  288   7.21
 KOKB |     -    30    39     -    31     -     -    35     -     -    41 |  288   0.08
 KOUR |     -    31     -    44    29     -     -     -     -     -    28 |  288   1.37
 KUNM |     -    22     -     -     -     -     -     -     -     -    26 |  282  32.31
 LPGS |     -    22    41    53     -     -     -     -     -     -    49 |  288  20.45
 MAC1 |     -    49     -    44    35     -     -     -     -     -     X |  288  15.19
 MADR |     -     -     -     -     -     -     -    53     -     -    35 |  288   8.91
 MALI |     -    24     -    84    31     -     -     -     -     -     X |  288  17.43
 MAS1 |     -    27    22    35    40     -     -    40     -     -    50 |  286   1.80
 MAW1 |     -    28     -     -    32     -     -     -     -     -    71 |  286   8.21
 MBAR |     -    59     -     -    38     -     -   124     -     -    37 |  288  11.55
 MCM4 |     -    35    49     -     X     -     -     -     -     -     - |  288  18.27
 MDO1 |     -    37    56     -     -     -     -     -     -     -    20 |  288  33.85
 MEDI |     -     -    10     -     -     -     -     -     -     -     9 |  288   0.18
 METS |     -    24    25     -     -     -     -     -     -     -    22 |  287   6.20
 MIZU |     -     -    70   152     -     -     -     -     -     -    28 |  287   0.47
 NISU |     -    17     -     -    14     -     -     -     -     -     - |  288   0.06
 NKLG |     -     -     -     -    21     -     -     -     -     -    30 |  287    >>>
 NLIB |     -    21    38     -     -     -     -    31     -     -    14 |  288   0.03
 NNOR |     -     -    35    24     -     -     -     -     -     -    29 |  288  13.33
 NPLD |     -    17    20     -     -     -     -     -     -     -    18 |  287   0.11
 NRC1 |     -     -    17     -    16     -     -     -     -     -    15 |  288   0.03
 NRIL |     -     -     -     -    14     -     -    30     -     -     X |  208   9.79
 NTUS |     -    22     -    64    38     -     -     -     -     -    48 |  288   9.38
 NYA1 |     -    30     -     -    33     -     -     -     -     -    28 |  287 344.61
 ONSA |     -     -    54    85     -     -     -     -     -     -     - |  286   0.09
 PERT |     -     -    48     X    31     -     -    30     -     -    42 |  288   2.29
 PIE1 |     -     -    51    63     -     -     -     -     -     -    16 |  288   0.07
 PIMO |     -     -     -    72     -     -     -     -     -     -    39 |  270  13.60
 POL2 |     -     -     -     -     -     -     -    18     -     -    12 |  288   9.04
 POTS |     -    21     -     -    17     -     -     -     -     -     X |  288  17.70
 PRDS |     -    20    31     -     -     -     -     -     -     -    23 |  288   2.07
 PTBB |     -    25    34     -     -     -     -     -     -     -    34 |  288   0.28
 REYK |     -    26     -     -     -     -     -     -     -     -    31 |  270   7.19
 RIOG |     -    25    31     -    26     -     -     -     -     -    40 |  288   7.98
 SCH2 |     -     -    13     -     -     -     -     -     -     -    11 |  288  33.02
 SFER |     -    23    33     -     -     -     -     -     -     -     - |  286   0.91
 SPT0 |     -    41    33     -     -     -     -     -     -     -    27 |  287   0.04
 STJO |     -    11    15     -     -     -     -     -     -     -     X |  288   0.04
 STR1 |     -     -    53     -     -     -     -     -     -     -    45 |  288   0.47
 SUTH |     -    27     -     -     -     -     -     -     -     -    32 |  288  12.87
 THTI |     -     -    42    58    34     -     -     -     -     -    51 |  288   5.88
 THU3 |     -    18     -     -     -     -     -     -     -     -    22 |  288   6.82
 TID1 |     -     -     -     -     -     -     -    60     -     -    40 |  288   7.20
 TIDB |     -    62   110   160     -     -     -     -     -     -    69 |  283    >>>
 TLSE |     -     -    13     -     -     -     -     -     -     -    11 |  288   0.51
 TOW2 |     -    39     -     -    29     -     -     -     -     -    39 |  288  13.30
 TRO1 |     -    30     -     -    19     -     -     -     -     -    49 |  288   8.92
 TSKB |     -    49    31    33    27     -     -     -     -     -    65 |  288   1.05
 TWTF |     -    19    48     -     -     -     -     -     -     -    35 |  288   0.07
 UNSA |     -     -     -    47    17     -     -     -     -     -     X |  288  19.03
 USN3 |     -    26     -     -     -     -     -    35     -     -    16 |  288   0.07
 USNO |     -    13    13     -     -     -     -     -     -     -    17 |  288   0.04
 USUD |     -     -    48    24     -     -     -    60     -     -     X |  288  11.32
 VILL |     -     -     -    39     -     -     -     -     -     -    21 |  288   7.53
 WHIT |     -    21     -     -     -     -     -     -     -     -    25 |  288   1.05
 WILL |     -    28    48     -     -     -     -     -     -     -    13 |  288  18.49
 WTZR |     -    26    22    25     -     -     -     -     -     -    24 |  288   0.05
 YAR2 |     -    31    46     -     -     -     -     -     -     -    13 |  288   6.78
 YEBE |     -     -    36     -     -     -     -     -     -     -    31 |  283  72.61
 YELL |     -     -   115     X   114     -     -     -     -     -   136 |  288   0.44
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2903    39    50    70    34    79  3287    59  2853     -    46 |


 BEST CLOCK FIT: BRUS   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.96   | 2.99e-14  4.69e-15  1.45e-15 |
 SPT0 |   287     0     0   286    9.89   | 3.39e-14  4.99e-15  1.44e-15 |
 BRUS |   288     0     0   288    9.33   | 3.11e-14  4.59e-15  1.03e-15 |
 ALGO |   288     0     0   288    8.39   | 3.56e-14  7.14e-15  6.20e-15 |
 AMC2 |   288     0     0   288    7.95   | 3.02e-14  6.45e-15  2.66e-15 |
 NPLD |   287     0     0   286    7.67   | 3.70e-14  4.70e-15  6.85e-15 |
 USN3 |   288     0     0   288    6.00   | 6.32e-14  8.06e-15  2.41e-15 |
 ALBH |   288     0     0   288    5.72   | 3.42e-14  1.32e-14  4.01e-15 |
 ONSA |   286     0     0   284    5.26   | 3.38e-14  1.16e-14  3.74e-15 |
 NISU |   288     0     0   143    4.81   | 4.58e-14  6.53e-15  3.65e-15 |
 TWTF |   288     0     0   288    4.38   | 3.37e-14  8.43e-15  8.50e-15 |
 NLIB |   288     0     0   288    3.28   | 2.83e-14  6.27e-15  3.05e-15 |
 STJO |   288     0     0   288    2.45   | 2.89e-14  6.95e-15  2.19e-15 |
 WTZR |   288     0     0   288    2.41   | 3.43e-14  9.64e-15  3.56e-15 |
 NRC1 |   288     0     0   288    2.26   | 5.11e-14  1.18e-14  2.96e-15 |
 DRAO |   288     0     0   288    2.08   | 6.24e-14  1.60e-14  3.57e-15 |
 YELL |   288     1     0   287    1.53   | 6.60e-14  1.34e-14  5.21e-15 |
 HOB2 |   288     0     0   288    1.18   | 4.77e-14  1.49e-14  7.20e-15 |
 PIE1 |   288     0     0   288    0.68   | 3.70e-14  8.13e-15  4.28e-15 |
 IRKT |   288     0     0   143    0.53   | 4.82e-14  1.57e-14  1.51e-14 |
 GODE |   288     0     0   288    0.52   | 3.28e-14  7.81e-15  1.12e-14 |
 KOKB |   288     0     0   288    0.46   | 3.52e-14  7.76e-15  5.68e-15 |
 YEBE |   283     0     0   139    0.44   | 2.11e-13  1.11e-14  7.37e-15 |
 FAIR |   285     0     0   284    0.41   | 2.18e-13  6.43e-14  1.86e-14 |
 MEDI |   288     0     0   143    0.37   | 3.79e-14  8.13e-15  9.67e-15 |
 NYA1 |   287     0     0   286    0.20   | 2.44e-14  2.20e-14  2.72e-14 |
 PTBB |   288     0     0   143    0.13   | 2.72e-13  5.36e-14  2.16e-14 |
 G13  |   288     0     3    83    0.12   | 5.19e-13  5.43e-14  3.37e-14 |
 HRAO |   288     0     0   288    0.10   | 1.08e-13  2.55e-14  3.40e-14 |
 KGN0 |   287     0     0   286    0.10   | 3.85e-13  1.01e-13  3.97e-14 |
 G30  |   288     0     0   288    0.09   | 2.89e-13  1.10e-13  6.17e-14 |
 G28  |   288     0     0   239    0.09   | 5.48e-13  8.39e-14  2.65e-14 |
 G07  |   288     0     0   288    0.09   | 2.70e-13  8.71e-14  5.66e-14 |
 TLSE |   288     0     0   288    0.07   | 4.05e-13  1.06e-13  5.44e-14 |
 MIZU |   287     0     0   286    0.07   | 3.80e-13  1.11e-13  3.39e-14 |
 G16  |   288     0     0   288    0.07   | 4.80e-13  7.67e-14  4.16e-14 |
 BAHR |   288     0     0   288    0.07   | 3.25e-13  9.89e-14  2.51e-14 |
 G06  |   288     0     0   288    0.07   | 4.02e-13  1.22e-13  9.53e-14 |
 G23  |   288     0     0   166    0.06   | 5.46e-13  6.89e-14  1.98e-14 |
 G26  |   288     0     0   288    0.06   | 4.02e-13  1.16e-13  7.70e-14 |
 SFER |   286     0     0   284    0.06   | 3.72e-13  1.05e-13  9.08e-14 |
 DWH1 |   288     0     0   288    0.05   | 4.90e-13  1.30e-13  5.85e-14 |
 G31  |   288     0     0   288    0.05   | 2.01e-13  7.71e-14  8.39e-14 |
 CAGZ |   279     0     1   167    0.05   | 4.98e-13  1.27e-13  2.55e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.39e-13  1.76e-13  4.24e-14 |
 G29  |   288     0     0   288    0.05   | 4.20e-13  1.20e-13  9.51e-14 |
 G04  |   288     0     0   288    0.04   | 4.25e-13  1.63e-13  6.22e-14 |
 IENG |   288     0     0   288    0.04   | 5.57e-13  1.89e-13  4.28e-14 |
 G11  |   288     0     3    95    0.04   | 6.92e-13  6.89e-14  6.38e-14 |
 G27  |   288     0     0   288    0.03   | 3.22e-13  1.00e-13  1.09e-13 |
 STR1 |   288     0     0   288    0.03   | 6.25e-13  1.77e-13  4.81e-14 |
 TIDB |   283     0     0   282    0.03   | 1.92e-13  7.09e-14  1.94e-13 |
 G17  |   288     0     0   288    0.02   | 6.19e-13  1.96e-13  1.30e-13 |
 G22  |   288     0     2   114    0.01   | 9.77e-13  1.27e-13  1.50e-13 |
 TSKB |   288     0     0   288    0.01   | 1.01e-12  2.84e-13  7.99e-14 |
 G08  |   288     0     0   288    0.01   | 1.39e-12  4.94e-13  1.55e-13 |
 TID1 |   288     1     0   143    0.01   | 5.85e-14  5.65e-14  1.86e-13 |
 G20  |   288     0     4    20    0.01   | 6.92e-13  9.33e-14  1.62e-14 |
 KERG |   288     0     0   288    0.01   | 1.19e-12  3.53e-13  1.52e-13 |
 G24  |   288     0     0   288    0.01   | 1.32e-12  4.56e-13  2.34e-13 |
 G10  |   288     0     0   288    0.01   | 1.24e-12  3.42e-13  7.90e-14 |
 G03  |   288     0     0   288    0.01   | 1.35e-12  3.48e-13  1.35e-13 |
 G25  |   288     0     0   288    0.01   | 1.52e-12  4.21e-13  1.53e-13 |
 KOUR |   288     0     0   288    0.00   | 1.39e-12  4.12e-13  1.26e-13 |
 MAS1 |   286     0     0   285    0.00   | 2.08e-12  5.87e-13  1.76e-13 |
 PRDS |   288     0     0   288    0.00   | 1.40e-12  5.07e-13  1.50e-13 |
 G19  |   288     0     3     2    0.00   | 5.57e-13  5.70e-14  2.60e-14 |
 GPST |   288     0     0     0    0.00   | 2.00e-14  4.37e-15  2.87e-15 |
 AUCK |   167     0     0     0    0.00   |        -         -         - |
 BAN2 |   215     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   279     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   227     0     0     0    0.00   |        -         -         - |
 G21  |   288     0     6     0    0.00   | 8.75e-13  1.07e-13  2.24e-14 |
 G18  |   288     0     6     0    0.00   | 1.22e-12  1.30e-13  3.99e-14 |
 G15  |   288     0     0     0    0.00   | 1.57e-12  5.02e-13  1.77e-13 |
 G14  |   288     0     4     0    0.00   | 5.57e-13  6.54e-14  1.42e-14 |
 G09  |   288     0     0     0    0.00   | 1.28e-12  5.79e-13  2.66e-13 |
 G05  |   288     0     0     0    0.00   | 1.41e-12  4.63e-13  3.77e-13 |
 G02  |   288     0     6     0    0.00   | 5.10e-13  5.08e-14  1.24e-14 |
 G01  |   288     0     0     0    0.00   | 1.65e-12  7.02e-13  7.26e-13 |
 YAR2 |   288     0     1     0    0.00   | 8.05e-13  1.16e-12  7.65e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.14e-13  1.69e-13  7.66e-14 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.04e-13  2.18e-13  4.73e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   270     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   270     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.99e-12  5.18e-13  2.04e-13 |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   208     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.96e-13  2.93e-13  1.22e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   286     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   282     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.75e-13  2.62e-13  5.57e-13 |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     0     0    0.00   | 1.93e-13  1.11e-13  2.18e-13 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   286     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 COCO |   287     0     0     0    0.00   | 4.88e-13  8.97e-13  7.53e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   287     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.19e-17  2.63e-16  1.58e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      BRUS      BRUS |
------------------------------------------+------------------------------+
