
 GPS week: 1307   Day: 0   MJD: 53393                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      0     0.01    -0.04     2.79     0.00      0
 cod |   288     0  28799    300    -0.27     0.02     0.06    15.50      0
 emr |   288     0  24047      0  3273.89    50.13     0.04    21.36      0
 esa |   288     0  18745    744  3273.20    50.07     0.07    11.77      0
 gfz |   288     0  21498    290    -0.18     0.32     0.05    17.85      0
 iga |    96     0   2784      2     0.00    -0.01     0.07     0.00      0
 igu |    96     0   2784      0     0.01    -0.05     3.48     0.00      0
 jpl |   288     0  15421     30     0.85    -4.23     0.07    11.24      0
 ngs |    96     0   2784      0     0.01    -0.03     2.42     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  35158   2800  3273.88    50.08     0.04    22.28      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -3295   108   -50   -33    19   -48 10087   -33 -4370     -   -10 |
    2 |  3052   -27  -182   447   -86   -89 -2516   116  2371     -   -34 |
    3 | -3247   -41   -11   -47   110    70  4193   -36 -3215     -    -6 |
    4 | -1963    -7   -27    10    -5    30 -2788   161 -2006     -   -52 |
    5 | -2340    33   -35   -75    66  -111 13036    30 -1740     -   -18 |
    6 | -2559    80   -98  -193   141  -136-10189    71 -2457     -    -9 |
    7 | -1311   -58    90  -259   137   -24 -2828   123 -1076     -   -82 |
    8 |  3152    13   -72   243   -48     6  4880    43  2261     -   -57 |
    9 | -3327    46  -101   120    16  -248 -4733   130 -3061     -   -82 |
   10 |    41    42    84  -159    29   101  1513    21   890     -   -60 |
   11 |  3383   -11   -33  -109    36    82  -738   223  3115     -   -44 |
   13 |  3197   156   -67   -32   -42    33 -2769   148  3254     -   -70 |
   14 |  2817   105   -50  -158     5   -53  -157   184  2948     -   -39 |
   15 | -2240     X    70    99    22   107 -4706   -92 -1885     -   -91 |
   16 |  4043    28   -72    87   -36   -45   353    95  3714     -   -16 |
   17 |   854    99     7  -158    79    68  6434    31   765     -   -71 |
   18 |  3779    21   -76   -25   161   -78   897   -39  3900     -   -39 |
   19 |  3866   -66   -64  -156   275  1017  1229   139  3727     -  -100 |
   20 |  4822  -101  -136   -89   153   -83  1857   244  4364     -     2 |
   21 |  1746    70   -15    26   -19   -16  1186   130  2180     -   -98 |
   22 | -3413    22    28  -107    89   -82  -947    -9 -2682     -   -53 |
   23 |  -901    32  -169   -94    -6  -180  -615   210 -1159     -    89 |
   24 | -2372    -6    10   104   -48    38 10247    66 -2934     -   -56 |
   25 | -5992    75  -140   -32    63  -212 -7307    62 -4938     -    14 |
   26 | -3448    43   -13    10    10   -70 -3622    69 -2675     -   -66 |
   27 |  -850    41  -117   304   -53   -88 -2011   121 -1133     -   -99 |
   28 |  7637   -52   -47   143   -52    77 -7437    30  6282     -    32 |
   29 | -1535    39   -41   194   -90    14 -1647     - -1552     -   -19 |
   30 | -3597    19   -30     1    58   -73  -905    -5 -2889     -   -29 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   293   -77     -     -     -     -   -90     -     -   -84 |
 ALGO |     -   -92  -132   639     -     -     -   -98     -     -   -98 |
 ALRT |     -    -2     -     -     2     -     -     -     -     -     - |
 AMC2 |     -   106    54     -     -     -     -  -374     -     -    63 |
 AREQ |     -   217    54     -   -19     -     -  -364     -     -    -3 |
 ARTU |     -   103     -   120  -102     -     -  -106     -     -     X |
 ASPA |     -   200     -     -     6     -     -  -440     -     -    78 |
 AUCK |     -     -     -   -68     -     -     -     -     -     -    36 |
 BAHR |     -     -    64     -   -51     -     -     -     -     -   -20 |
 BAN2 |     -     -    -9     -     -     -     -     -     -     -     9 |
 BILI |     -    69     -     -   -60     -     -     -     -     -     X |
 BOR1 |     -  -143    94     -     -     -     -     -     -     -     9 |
 BRUS |     -  -168    75     -     -     -     -     -     -     -    45 |
 CAS1 |     -    37     -   -95    -3     -     -     -     -     -    27 |
 CEDU |     -     -     -   547     -     -     -     -     -     -  -289 |
 CHAT |     -   112     -     -  -118     -     -     -     -     -    17 |
 COCO |     -   -19     -   116  -170     -     -     -     -     -    88 |
 DAEJ |     -    77     -     -     -     -     -     -     -     -   -53 |
 DGAR |     -  -102     -     -     -     -     -   141     -     -     X |
 DRAO |     -     -   -46   162     -     -     -     0     -     -   -42 |
 DWH1 |     -    98    45     -     -     -     -     -     -     -  -111 |
 FAIR |     -     -    50   -41   -33     -     -     -     -     -     - |
 FORT |     -   157    27  -351    35     -     -     -     -     -     X |
 GLPS |     -    61     -  -103    16     -     -     -     -     -     0 |
 GMAS |     -     -    -8     -     -     -     -     -     -     -     8 |
 GODE |     -     -    78    31     -     -     -     -     -     -   -91 |
 GOLD |     -    54     -  -168     -     -     -  -145     -     -   124 |
 GUAM |     -    91     -  -664    97     -     -  -244     -     -   324 |
 GUAT |     -   -39     -     -   -13     -     -     -     -     -    37 |
 HARB |     -   -33     -     -   -12     -     -     -     -     -    32 |
 HERS |     -  -116    84     -     -     -     -     -     -     -     X |
 HLFX |     -     -   181     -     -     -     -  -345     -     -     X |
 HOB2 |     -   -24    66     -     -     -     -     -     -     -   -47 |
 HOFN |     -     -     -     -  -159     -     -     -     -     -   128 |
 HOLM |     -   107     -     -     -     -     -  -148     -     -     - |
 HRAO |     -     -     -     -  -141     -     -   201     -     -    10 |
 IISC |     -  -139     -   -23   136     -     -     -     -     -     - |
 JAB1 |     -   -27     -    35     -     -     -     -     -     -     - |
 JPLM |     -     -    70     -  -189     -     -    57     -     -    56 |
 KERG |     -     -  -160  -525   232     -     -     -     -     -   132 |
 KIRU |     -   -71     -     -     -     -     -   187     -     -   -45 |
 KIT3 |     -     -     -   -97    79     -     -   -24     -     -     0 |
 KOKB |     -    60   124     -  -179     -     -   -81     -     -    24 |
 KOSG |     -   -89     -     -     -     -     -     -     -     -    62 |
 KOUR |     -    43     -  -119    63     -     -     -     -     -   -17 |
 LAE1 |     -   -66     -     -    48     -     -     -     -     -     7 |
 LPGS |     -   167    85  -484     -     -     -     -     -     -    58 |
 MAC1 |     -  -116     -   145     5     -     -     -     -     -     X |
 MAD2 |     -     -   -15     -     -     -     -     -     -     -    14 |
 MADR |     -     -     -     -     -     -     -    42     -     -   -21 |
 MALI |     -     9     -    25    65     -     -     -     -     -   -72 |
 MATE |     -     -     -  -540     -     -     -     -     -     -   286 |
 MAW1 |     -     -     -     -   -49     -     -     -     -     -    39 |
 MBAR |     -  -191     -     -  -109     -     -    13     -     -   214 |
 MCM4 |     -   196  -142     -     X     -     -     -     -     -     - |
 MDO1 |     -   -10  -134     -     -     -     -     -     -     -   135 |
 MEDI |     -  -119   130     -     -     -     -     -     -     -   -42 |
 METS |     -  -117    84     -     -     -     -     -     -     -     1 |
 MIZU |     -     -   -67   277     -     -     -     -     -     -   -82 |
 MSKU |     -   104     -     -   -90     -     -     -     -     -     - |
 NISU |     -    -7     -     -     6     -     -     -     -     -     - |
 NLIB |     -     -    53     -     -     -     -  -105     -     -     2 |
 NNOR |     -     -   -26  -128     -     -     -     -     -     -    92 |
 NPLD |     -  -210   106     -     -     -     -     -     -     -    45 |
 NRC1 |     -   154   -32     -  -161     -     -     -     -     -    52 |
 NRIL |     -   -89     -     -    77     -     -     -     -     -     X |
 NSSP |     -   -36     -     -     -     -     -     -     -     -    25 |
 NTUS |     -  -215     -    89     -     -     -     -     -     -   103 |
 NYA1 |     -    59     -     -   -63     -     -     -     -     -    11 |
 ONSA |     -  -166   114   199  -123     -     -     -     -     -     - |
 PERT |     -     -   -74     X   146     -     -   -28     -     -   -32 |
 PIE1 |     -   286  -172   272     -     -     -     -     -     -  -163 |
 PIMO |     -     -     -   552     -     -     -     -     -     -  -292 |
 POL2 |     -     -     -     -     -     -     -   -48     -     -    24 |
 POTS |     -   102     -     -   -89     -     -     -     -     -     X |
 PRDS |     -     -   -32     -     -     -     -     -     -     -    31 |
 PTBB |     -  -139   106     -     -     -     -     -     -     -    -5 |
 QAQ1 |     -     -   -11     -     -     -     -     -     -     -    11 |
 REYK |     -   -92     -     -     -     -     -     -     -     -    64 |
 RIOG |     -     9     9     -    15     -     -     -     -     -   -27 |
 SANT |     -  -118     -     X   103     -     -     -     -     -     - |
 SFER |     -    46   -34     -     -     -     -     -     -     -     - |
 SPT0 |     -  -184   114     -     -     -     -     -     -     -    18 |
 STJO |     -   139   -18     -  -117     -     -    -9     -     -    19 |
 STR1 |     -     -    50     -     -     -     -     -     -     -   -48 |
 SUTH |     -  -194     -     -     -     -     -     -     -     -   135 |
 THTI |     -     -   101    87  -115     -     -     -     -     -   -51 |
 THU3 |     -   -83   165     -     -     -     -     -     -     -  -101 |
 TIDB |     -    75    35    32     -     -     -     -     -     -  -103 |
 TLSE |     -     -    29     -     -     -     -     -     -     -   -28 |
 TRO1 |     -  -191     -     -    39     -     -     -     -     -   101 |
 TSKB |     -    18    29   -67     4     -     -     -     -     -    -9 |
 TWTF |     -  -138    -3     -     -     -     -     -     -     -    99 |
 UNSA |     -     -     -    97    51     -     -     -     -     -   -92 |
 URUM |     -   -60     -     -     -     -     -     -     -     -    42 |
 USN3 |     -   -26     -     -     -     -     -   -58     -     -    47 |
 USUD |     -     -    87  -153     -     -     -    -5     -     -     X |
 VILL |     -   -31     -    28     -     -     -     -     -     -     7 |
 WHIT |     -    17     -     -     -     -     -  -163     -     -    70 |
 WILL |     -   185    26     -     -     -     -     -     -     -  -154 |
 WTZR |     -  -243   183    16     -     -     -     -     -     -   -15 |
 WUHN |     -     -   -33     -    48     -     -     -     -     -    -7 |
 YAR2 |     -     -   -37     -     -     -     -     -     -     -    36 |
 YEBE |     -     -    18     -     -     -     -     -     -     -   -17 |
 YELL |     -   -63    -7   160   -97     -     -     -     -     -    43 |
 ZIMM |     -  -143     -     -     -     -     -     -     -     -   100 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4843    66    66   135    31   110  6528    86  3917     -    41 |  288   3.93
    2 |  1361    58    29    46    55    52  1837    22  1238     -    43 |  288   0.23
    3 |  2439   125    44    58    61    92  5852   146  2730     -    49 |  288   1.46
    4 |  1840    50    43   121    48    26  1785    42  1729     -    75 |  288   0.65
    5 |  3885    54    23    36    72    51  7934    77  4412     -    82 |  288   3.53
    6 |   914    55    28    54    27    38  6494    75   977     -    33 |  288   1.34
    7 |  1258    48    40    94    20    44  2288    74  1251     -    45 |  288   0.30
    8 |  4091   112    32    55   136   112  3612   111  3765     -    55 |  288   2.08
    9 |  2489   154   162    96   110   111  3728   131  2499     -    68 |  288   2.02
   10 |  3837    44    41    75    22    62  2364    52  3319     -    56 |  288   2.79
   11 |  1358    56    26    78    18    26   950    76  1117     -    49 |  288   0.39
   13 |   839    55    37   162    34    58  1330    79   815     -    66 |  288   0.42
   14 |   728    52    94    54    40    47   529   113   624     -    54 |  288   0.31
   15 |  7361     X    49    65    55    68  2716    76  5833     -    63 |  288   2.86
   16 |  1945    48    34    56    24    52   534   102  1560     -    37 |  288   0.26
   17 |  2218    76    27    46    32    76  5206    66  2421     -    76 |  288   2.56
   18 |   550    69    60    36    26    52   438    60   535     -    46 |  288   0.37
   19 |  1200    51    42    89    27   122   761    74  1150     -    36 |  288   0.22
   20 |  1018    72    70    64    22    65   647    59   885     -    37 |  288   0.37
   21 |  1085    66    31    60    51    68   581    54  1202     -    57 |  288   0.37
   22 |  1189    68    54    30    22    35  1092    45  1040     -    35 |  288   0.42
   23 |   667    49    42    78    24    51   614    75   931     -    57 |  288   0.17
   24 |  3280    56    44    86    47    73  4678    61  3256     -    67 |  288   2.42
   25 |  3070   120    45    80    51    55  4367    82  2168     -    68 |  288   1.98
   26 |  1420    51    39    63    37    49  1860    91  1095     -    52 |  288   0.51
   27 |  1094   127    75    53    76    63  1233   173  1079     -    67 |  288   0.99
   28 |  4911    59    31    54    51    65  6097    82  3137     -    71 |  288   0.49
   29 |  1178    73    28    53    34    84  1867     -   977     -    50 |  288   0.68
   30 |  4182    39    60    66    41    50   760    87  3401     -    40 |  288   0.87
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    52    43     -     -     -     -    31     -     -    19 |  288   0.04
 ALGO |     -    37    11    21     -     -     -    21     -     -    15 |  288   0.02
 ALRT |     -    37     -     -    32     -     -     -     -     -     - |  288   4.83
 AMC2 |     -    51    40     -     -     -     -    23     -     -    22 |  288   0.04
 AREQ |     -    52    37     -    21     -     -    41     -     -    29 |  288  13.89
 ARTU |     -    42     -    63    30     -     -    64     -     -     X |  275   9.91
 ASPA |     -    30     -     -    21     -     -    59     -     -    37 |  288    >>>
 AUCK |     -     -     -   155     -     -     -     -     -     -    82 |  163  12.69
 BAHR |     -     -    30     -    54     -     -     -     -     -    32 |  288   0.32
 BAN2 |     -     -    12     -     -     -     -     -     -     -    12 |  288  18.11
 BILI |     -    18     -     -    15     -     -     -     -     -     X |  287   7.26
 BOR1 |     -    48    22     -     -     -     -     -     -     -    19 |  288   0.59
 BRUS |     -    68    28     -     -     -     -     -     -     -    24 |  288   0.03
 CAS1 |     -    38     -    86    18     -     -     -     -     -    43 |  288   6.94
 CEDU |     -     -     -    35     -     -     -     -     -     -    18 |  214  11.61
 CHAT |     -    39     -     -    43     -     -     -     -     -    35 |  287  13.25
 COCO |     -    38     -    52    23     -     -     -     -     -    38 |  288   8.48
 DAEJ |     -    25     -     -     -     -     -     -     -     -    17 |  287    >>>
 DGAR |     -    20     -     -     -     -     -    27     -     -     X |  288  15.91
 DRAO |     -     -    19   117     -     -     -    42     -     -    29 |  287 105.91
 DWH1 |     -    71   103     -     -     -     -     -     -     -   135 |  288   0.39
 FAIR |     -     -    32    38    22     -     -     -     -     -     - |  288   0.21
 FORT |     -   122    43   123    37     -     -     -     -     -     X |  288   0.08
 GLPS |     -    39     -    34    28     -     -     -     -     -    17 |  288  27.81
 GMAS |     -     -    22     -     -     -     -     -     -     -    21 |  288   1.90
 GODE |     -     -    25    45     -     -     -     -     -     -    13 |  288   0.26
 GOLD |     -    28     -    46     -     -     -    31     -     -    27 |  288  13.57
 GUAM |     -    29     -    41    20     -     -    66     -     -    37 |  288  12.56
 GUAT |     -    41     -     -    25     -     -     -     -     -    24 |  288    >>>
 HARB |     -    60     -     -    54     -     -     -     -     -    23 |  287  30.78
 HERS |     -    92    67     -     -     -     -     -     -     -     X |  241  34.38
 HLFX |     -     -    21     -     -     -     -    40     -     -     X |  288  21.02
 HOB2 |     -    70    35     -     -     -     -     -     -     -    22 |  288   0.07
 HOFN |     -     -     -     -    25     -     -     -     -     -    20 |  287    >>>
 HOLM |     -    18     -     -     -     -     -    25     -     -     - |  288   7.45
 HRAO |     -     -     -     -   235     -     -    94     -     -   142 |  287    >>>
 IISC |     -    45     -    47    23     -     -     -     -     -     - |  288  24.22
 JAB1 |     -   108     -   142     -     -     -     -     -     -     - |  211  13.84
 JPLM |     -     -    74     -    59     -     -    57     -     -    22 |  288   9.28
 KERG |     -     -    54    92    31     -     -     -     -     -    75 |  288   1.13
 KIRU |     -    39     -     -     -     -     -    19     -     -    23 |  288   4.85
 KIT3 |     -     -     -    85    51     -     -    66     -     -    46 |  286  23.26
 KOKB |     -    59    24     -    29     -     -    29     -     -    43 |  288   0.22
 KOSG |     -    40     -     -     -     -     -     -     -     -    28 |  288  87.82
 KOUR |     -    33     -    58    33     -     -     -     -     -    26 |  288   2.56
 LAE1 |     -    50     -     -    46     -     -     -     -     -    27 |  287  14.54
 LPGS |     -    30    35    53     -     -     -     -     -     -    28 |  288  18.30
 MAC1 |     -    28     -    64    51     -     -     -     -     -     X |  288  18.87
 MAD2 |     -     -    13     -     -     -     -     -     -     -    12 |  288   0.04
 MADR |     -     -     -     -     -     -     -    22     -     -    11 |  288   8.64
 MALI |     -    27     -    44    45     -     -     -     -     -    28 |  287  13.12
 MATE |     -     -     -    30     -     -     -     -     -     -    16 |  288   0.07
 MAW1 |     -     -     -     -    90     -     -     -     -     -    72 |  287   8.22
 MBAR |     -    51     -     -    41     -     -    49     -     -    41 |  288   9.95
 MCM4 |     -    46    33     -     X     -     -     -     -     -     - |  281   4.87
 MDO1 |     -    37    47     -     -     -     -     -     -     -    27 |  288  17.39
 MEDI |     -    40    19     -     -     -     -     -     -     -    21 |  288   0.08
 METS |     -    47    25     -     -     -     -     -     -     -    18 |  287   6.57
 MIZU |     -     -    28    41     -     -     -     -     -     -    19 |  288   0.57
 MSKU |     -    38     -     -    33     -     -     -     -     -     - |  288   8.55
 NISU |     -    19     -     -    16     -     -     -     -     -     - |  287   0.03
 NLIB |     -     -    25     -     -     -     -    29     -     -    17 |  288   0.05
 NNOR |     -     -    16    62     -     -     -     -     -     -    35 |  285  12.88
 NPLD |     -    52    20     -     -     -     -     -     -     -    23 |  287   0.05
 NRC1 |     -    47    17     -    16     -     -     -     -     -    16 |  288   0.03
 NRIL |     -    64     -     -    55     -     -     -     -     -     X |  273   9.56
 NSSP |     -    38     -     -     -     -     -     -     -     -    27 |  288   8.11
 NTUS |     -    23     -    31     -     -     -     -     -     -    23 |  288   7.72
 NYA1 |     -    39     -     -    29     -     -     -     -     -    38 |  288   0.48
 ONSA |     -    75   106    89    45     -     -     -     -     -     - |  288   0.04
 PERT |     -     -    34     X    37     -     -   103     -     -    31 |  288   3.47
 PIE1 |     -    43    46    78     -     -     -     -     -     -    31 |  257   0.96
 PIMO |     -     -     -   110     -     -     -     -     -     -    58 |  183  14.97
 POL2 |     -     -     -     -     -     -     -    15     -     -     8 |  224   7.93
 POTS |     -    36     -     -    32     -     -     -     -     -     X |  288  13.55
 PRDS |     -     -    21     -     -     -     -     -     -     -    20 |  288   1.45
 PTBB |     -    45    37     -     -     -     -     -     -     -    31 |  288   0.39
 QAQ1 |     -     -    29     -     -     -     -     -     -     -    28 |  288   5.90
 REYK |     -    32     -     -     -     -     -     -     -     -    22 |  287   5.61
 RIOG |     -    35    25     -    25     -     -     -     -     -    25 |  288   7.57
 SANT |     -   132     -     X   115     -     -     -     -     -     - |  285  52.29
 SFER |     -    44    32     -     -     -     -     -     -     -     - |  287   0.68
 SPT0 |     -    49    24     -     -     -     -     -     -     -    21 |  288   0.05
 STJO |     -    55    14     -    19     -     -    30     -     -    18 |  288   0.10
 STR1 |     -     -    17     -     -     -     -     -     -     -    16 |  288   1.04
 SUTH |     -    20     -     -     -     -     -     -     -     -    14 |  288  12.47
 THTI |     -     -    42    79    37     -     -     -     -     -    57 |  288  10.84
 THU3 |     -    34    14     -     -     -     -     -     -     -    29 |  288   6.19
 TIDB |     -    34    27    61     -     -     -     -     -     -    16 |  288   0.08
 TLSE |     -     -    32     -     -     -     -     -     -     -    30 |  288   0.32
 TRO1 |     -    57     -     -    30     -     -     -     -     -    31 |  286   8.55
 TSKB |     -    56    57    30    31     -     -     -     -     -    41 |  288   1.14
 TWTF |     -    23    41     -     -     -     -     -     -     -    32 |  288   0.06
 UNSA |     -     -     -    61    30     -     -     -     -     -    34 |  287  19.51
 URUM |     -    47     -     -     -     -     -     -     -     -    33 |  288  22.09
 USN3 |     -    31     -     -     -     -     -    24     -     -    18 |  288   0.02
 USUD |     -     -    36    32     -     -     -    69     -     -     X |  288  10.75
 VILL |     -    48     -    44     -     -     -     -     -     -    31 |  287   8.88
 WHIT |     -    29     -     -     -     -     -    25     -     -    20 |  288   2.62
 WILL |     -    51    35     -     -     -     -     -     -     -    28 |  288  84.83
 WTZR |     -    48    20    41     -     -     -     -     -     -    28 |  288   0.04
 WUHN |     -     -    44     -    37     -     -     -     -     -    29 |  287  16.58
 YAR2 |     -     -    33     -     -     -     -     -     -     -    32 |  288  14.20
 YEBE |     -     -     9     -     -     -     -     -     -     -     9 |  288   0.14
 YELL |     -   120    28    40    44     -     -     -     -     -    52 |  288   0.03
 ZIMM |     -    39     -     -     -     -     -     -     -     -    27 |  288    >>>
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2789    59    45    71    52    68  3477    70  2417     -    43 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.93   | 3.34e-14  6.10e-15  3.23e-15 |
 NPLD |   287     0     0   286    9.86   | 3.12e-14  5.27e-15  3.16e-15 |
 NISU |   287     0     0   286    9.86   | 5.20e-14  8.72e-15  2.30e-15 |
 BRUS |   288     0     0   288    7.80   | 4.19e-14  8.54e-15  1.83e-15 |
 ONSA |   288     0     0   288    7.62   | 3.75e-14  6.89e-15  3.18e-15 |
 NRC1 |   288     1     0   287    6.15   | 2.79e-14  6.41e-15  2.91e-15 |
 USN3 |   288     0     0   288    5.28   | 6.92e-14  1.02e-14  2.08e-15 |
 SPT0 |   288     0     0   288    5.15   | 3.85e-14  8.43e-15  3.79e-15 |
 ALBH |   288     0     0   288    4.49   | 4.10e-14  1.28e-14  3.32e-15 |
 STJO |   288     0     0   288    4.04   | 3.73e-14  1.05e-14  5.40e-15 |
 PIE1 |   257     1     0   255    3.89   | 3.69e-14  6.98e-15         - |
 ALGO |   288     1     0   287    3.76   | 3.29e-14  6.01e-15  3.64e-15 |
 MAD2 |   288     0     0   288    3.30   | 3.69e-14  7.22e-15  4.62e-15 |
 MEDI |   288     0     0   288    2.87   | 4.01e-14  1.01e-14  5.27e-15 |
 NLIB |   288     0     0   288    2.39   | 3.75e-14  8.43e-15  4.90e-15 |
 TWTF |   288     0     0   288    2.31   | 3.68e-14  9.81e-15  5.07e-15 |
 FORT |   288     0     0   288    2.05   | 8.33e-14  1.61e-14  4.95e-15 |
 HOB2 |   288     0     0   288    2.05   | 4.59e-14  1.15e-14  5.58e-15 |
 WTZR |   288     0     0   288    1.55   | 3.60e-14  9.25e-15  2.35e-15 |
 DRAO |   287     0     0   286    1.11   | 6.40e-14  2.28e-14  6.60e-15 |
 MATE |   288     0     0   288    0.63   | 4.72e-14  1.10e-14  5.35e-15 |
 TIDB |   288     0     1   143    0.60   | 2.09e-13  2.40e-14  5.64e-15 |
 G07  |   288     0     0   288    0.48   | 3.08e-13  7.14e-14  2.28e-14 |
 GODE |   288     0     0   288    0.42   | 3.29e-14  7.90e-15  1.34e-14 |
 YELL |   288     0     0   288    0.36   | 3.77e-14  1.10e-14  3.23e-15 |
 PTBB |   288     0     0   288    0.35   | 2.73e-13  5.86e-14  2.90e-14 |
 FAIR |   288     0     0   288    0.24   | 1.92e-13  5.51e-14  2.01e-14 |
 HRAO |   287     0     0   286    0.17   | 1.70e-13  3.15e-14  2.22e-14 |
 G16  |   288     0     1   168    0.16   | 4.50e-13  5.64e-14  3.12e-14 |
 BAHR |   288     0     0   288    0.12   | 3.83e-13  1.20e-13  2.31e-14 |
 NYA1 |   288     0     0   288    0.11   | 5.03e-14  3.11e-14  3.39e-14 |
 G04  |   288     0     0   288    0.10   | 4.46e-13  1.27e-13  3.88e-14 |
 MIZU |   288     0     0   288    0.10   | 3.50e-13  1.02e-13  4.74e-14 |
 TLSE |   288     0     0   203    0.08   | 4.11e-13  1.04e-13  3.07e-14 |
 SFER |   287     0     0   286    0.07   | 3.47e-13  1.11e-13  7.38e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.32e-13  1.22e-13  3.16e-14 |
 G26  |   288     0     0   288    0.06   | 3.86e-13  1.13e-13  6.76e-14 |
 KOKB |   288     0     0   270    0.06   | 4.65e-14  1.02e-14  1.55e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.80e-13  1.18e-13  3.78e-14 |
 G13  |   288     0     4    20    0.05   | 5.48e-13  6.18e-14  2.87e-14 |
 G27  |   288     0     0   288    0.05   | 3.35e-13  1.14e-13  9.50e-14 |
 G29  |   288     0     0   288    0.04   | 3.66e-13  1.10e-13  8.06e-14 |
 G30  |   288     0     0   288    0.04   | 3.31e-13  1.18e-13  8.98e-14 |
 G06  |   288     0     0   288    0.04   | 4.17e-13  1.52e-13  1.04e-13 |
 STR1 |   288     0     0   288    0.04   | 6.51e-13  1.99e-13  1.28e-13 |
 G17  |   288     0     0   288    0.01   | 6.01e-13  2.12e-13  1.99e-13 |
 G22  |   288     0     6    18    0.01   | 7.33e-13  8.58e-14  3.25e-14 |
 GMAS |   288     0     0   288    0.01   | 1.04e-12  3.95e-13  1.22e-13 |
 KERG |   288     0     0   287    0.01   | 1.17e-12  2.76e-13  1.25e-13 |
 G03  |   288     0     0   288    0.01   | 1.22e-12  4.84e-13  1.08e-13 |
 PRDS |   288     0     0   288    0.01   | 1.42e-12  4.21e-13  1.22e-13 |
 G15  |   288     0     0   288    0.01   | 1.55e-12  5.23e-13  2.20e-13 |
 TSKB |   288     0     0   143    0.01   | 9.22e-13  3.08e-13  7.58e-14 |
 KOUR |   288     0     0   288    0.01   | 1.37e-12  4.08e-13  1.73e-13 |
 G24  |   288     0     0   288    0.01   | 1.35e-12  3.90e-13  2.76e-13 |
 G25  |   288     0     0   288    0.01   | 1.38e-12  4.77e-13  2.38e-13 |
 G09  |   288     0     0   288    0.01   | 1.24e-12  3.95e-13  1.80e-13 |
 G08  |   288     0     0   288    0.01   | 1.38e-12  4.48e-13  1.93e-13 |
 HLFX |   288     0     1   200    0.00   | 1.93e-13  2.35e-13  1.20e-12 |
 GPST |   288     0     0     0    0.00   | 2.27e-14  4.62e-15  2.02e-15 |
 CEDU |   214     0     0     0    0.00   |        -         -         - |
 PIMO |   183     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 UNSA |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 JAB1 |   211     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   163     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     2     0    0.00   | 5.68e-13  7.24e-14  3.12e-14 |
 G23  |   288     0     5     0    0.00   | 5.25e-13  5.95e-14  1.35e-14 |
 G21  |   288     1     6     0    0.00   | 9.20e-13  1.33e-13  5.19e-14 |
 G20  |   288     0     5     0    0.00   | 5.84e-13  7.40e-14  2.09e-14 |
 G19  |   288     0     6     0    0.00   | 6.75e-13  6.88e-14  1.32e-14 |
 G18  |   288     0     6     0    0.00   | 1.39e-12  1.29e-13  3.63e-14 |
 G14  |   288     2     3     0    0.00   | 7.40e-13  9.85e-14  3.87e-14 |
 G11  |   288     0     5     0    0.00   | 6.56e-13  6.04e-14  4.76e-14 |
 G10  |   288     0     0     0    0.00   | 1.17e-12  4.21e-13  3.77e-13 |
 G05  |   288     0     0     0    0.00   | 1.30e-12  5.22e-13  4.85e-13 |
 G02  |   288     0     6     0    0.00   | 5.27e-13  5.94e-14  1.46e-14 |
 G01  |   288     0     0     0    0.00   | 1.78e-12  7.02e-13  3.54e-13 |
 ZIMM |   288     0     0     0    0.00   |        -         -         - |
 YEBE |   288     0     6     0    0.00   | 2.14e-13  1.01e-14  1.38e-14 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.68e-13  1.84e-13  1.33e-13 |
 VILL |   287     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   286     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.27e-13  2.53e-13  7.18e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SANT |   285     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   224     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.84e-12  5.14e-13  2.51e-13 |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   273     0     0     0    0.00   |        -         -         - |
 NNOR |   285     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   281     0     2     0    0.00   | 6.83e-13  5.66e-13  3.76e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   287     0     0     0    0.00   |        -         -         - |
 MALI |   287     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.40e-13  9.98e-13  5.04e-12 |
 KIT3 |   286     1     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.33e-13  3.43e-13  9.62e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.31e-13  5.50e-13  1.09e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   275     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.13e-17  2.56e-16  1.54e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      NPLD      BRUS |
------------------------------------------+------------------------------+
