
 GPS week: 1306   Day: 2   MJD: 53388                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2688      0     0.01     0.01     2.84     0.00      0
 cod |   288     0  26594    549    -0.12    -0.07     0.05    18.43      0
 emr |   288     0  24209     34    -6.85    -0.62     0.03    25.87      0
 esa |   288     0  18281   2301  3007.22    52.51     0.07     9.49      0
 gfz |   288     0  19744    310     0.14    -0.36     0.05    15.06      0
 iga |    96     0   2688      0     0.02     0.02     0.09     0.00      0
 igu |    96     0   2688      0     0.01     0.01     3.50     0.00      0
 jpl |   288     0  18455    221    -0.08    -0.47     0.04    18.28      0
 ngs |    96     0   2688      0     0.01     0.02     2.49     0.00      0
 usn |   288     0  34377   2766  3008.57    52.66     0.06    12.87      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |  1169    93   -82    83    45    13 11297   -51  -846   -11 |
    2 | -9616    67   -41   -49   -89   -14 -2079   130 -7412   -58 |
    3 |  -451   -60  -150   103   361   -31   542   -45 -1391   -46 |
    5 |  2900    86    49    77   -28   123 12545   -92  1370  -114 |
    6 | -6311    28   -67    77   241  -149-12080   -77 -5476  -135 |
    7 | -3176   119   -21   -80    -8     4  -946    63 -2746  -151 |
    8 |  1758    63  -160   186   104   -70  3224   -31  1905     7 |
    9 | -7687    14     6   123  -106  -218-14492    37 -4857   -41 |
   10 |    47   116   -19    -7   -69   101  1008    26  -653   -80 |
   11 |  6237    17  -128   -66   128   -40  6175   158  5755   -92 |
   13 |  4817    72   -12  -122   -66   -14  -372   100  4654   -57 |
   14 |  2331     4  -109   -14   126   -36   325    46  2397    12 |
   15 |  3309   -71   -96   206   173   240 -2546   -17  2840   -34 |
   16 |  2837  -123   -33    38    77  -104   497   108  3230   -30 |
   17 | -5039   105    -3   229  -112    60 -1548   -17 -5448  -160 |
   18 |  1544  -111   -66   108   190   -42    86    54  1732   -86 |
   19 |  2658  -166  -166  -106   424  1198   686   190  3102  -123 |
   20 |  3183    70   -95  -106   -39   -26  -196   167  3680   -24 |
   21 |  -563   -43     4   -63   194    18  -205    55    58  -205 |
   22 | -2483  -156   -14   107   258  -134 -1498    32 -2286  -176 |
   23 | -1919   -85    -5  -240    -2  -173   272   119 -1617   143 |
   24 |  6042    95    27   122  -200   -81 -5067    -4  3928   -43 |
   25 |  1558     1     8   -32   179  -207  6559   -92   673   -72 |
   26 | -5914    41   -15    33  -127   -81  -200    90 -4996   -31 |
   27 | -1038   100  -160   134   145  -149 -3359   -17 -1020   -76 |
   28 |  9638     5   -86   -71   -17    47  3431   157  9319    15 |
   29 | -3691    43    22  -141  -140  -155 -2816   145 -3661   -43 |
   30 | -2139    -7    21    75    62   -79   759   -45 -2234   -97 |
 -----+-------------------------------------------------------------+
 ALBH |     -     1   -30     -     -     -     -    15     -    37 |
 ALGO |     -     -   -41     X     -     -     -   176     -  -163 |
 ALRT |     -   -25     -     -    77     -     -   -38     -     - |
 AMC2 |     -   -60   163     -     -     -     -  -253     -   118 |
 ARTU |     -     -     -   203   -12     -     -   -96     -     X |
 ASPA |     -   304     -     -   132     -     -  -465     -    39 |
 AUCK |     -    12     -     X     -     -     -     -     -   -17 |
 BAN2 |     -     -   -26     -     -     -     -     -     -    53 |
 BILI |     -     -     -     -   -12     -     -    10     -     X |
 BOGT |     -     -     -     X    19     -     -     -     -   -22 |
 BOR1 |     -   -49     1     -     -     -     -     -     -    67 |
 BRUS |     -     2   -10     -     -     -     -     -     -    17 |
 CAGZ |     -    51     -     -     -     -     -     -     -   -72 |
 CAS1 |     -   -17     -    15   -70     -     -    85     -   -26 |
 CEDU |     -     8     -     X     -     -     -     0     -    -9 |
 CHAT |     -    96     -     -  -126     -     -     -     -    10 |
 COCO |     -    18     -   -43   -53     -     -    27     -    29 |
 CRO1 |     -     -    85   -72    24     -     -    -3     -  -142 |
 DAEJ |     -    19   -48     -     -     -     -     -     -    69 |
 DAV1 |     -   478     -     -  -585     -     -     -     -     - |
 DGAR |     -   -66     -     -     -     -     -    77     -   -16 |
 DRAO |     -    11    -8     -     -     -     -   -52     -    75 |
 DWH1 |     -   152   -91     -     -     -     -     -     -   -34 |
 FAIR |     -     -   -19   -37    62     -     -     -     -     - |
 FORT |     -    64   103  -256   -50     -     -     -     -     X |
 GLPS |     -    29     -     -    54     -     -     -     -  -106 |
 GMAS |     -     -    81     -     -     -     -     -     -  -163 |
 GODE |     -   -55   126   -64     -     -     -     -     -  -127 |
 GOLD |     -   -33     -    24     -     -     -   -32     -    75 |
 GUAM |     -     X     -     X  -132     -     -     X     -   155 |
 HARB |     -   -72     -     -   -38     -     -     -     -   147 |
 HOB2 |     -    28     3   154   -62     -     -   -48     -   -19 |
 HOFN |     -     -     -     -  -172     -     -   -13     -   214 |
 HRAO |     -   -51     -     -   -62     -     -    41     -    88 |
 IISC |     -     -     -   -69    43     -     -     -     -     - |
 JAB1 |     -    76     -     X     -     -     -   -77     -     - |
 JPLM |     -     -   -17     -  -108     -     -     -     -   160 |
 KERG |     -     -   167  -292   -80     -     -     -     -   -28 |
 KGN0 |     -   -90    -3     -     -     -     -     -     -   134 |
 KIRU |     -     -     -     -     -     -     -    81     -  -115 |
 KIT3 |     -     -     -   -77   139     -     -   -75     -     X |
 KOKB |     -   -69    58     -   -56     -     -   -29     -    87 |
 KOSG |     -   -27     -     -     -     -     -     -     -    38 |
 KOUR |     -   111     -  -150   -46     -     -     -     -     8 |
 LHAS |     -     -     -     -     -     -     -  -114     -   162 |
 LPGS |     -    45   157  -448     -     -     -     -     -   -49 |
 MAD2 |     -     -    -3     -     -     -     -     -     -     6 |
 MAG0 |     -   -34     -     -     -     -     -    34     -     - |
 MANA |     -     -     -     -     -     -     -  -139     -   197 |
 MAS1 |     -     -     5   -21   -33     -     -    50     -   -27 |
 MATE |     -     -     -  -315     -     -     -     -     -   232 |
 MAW1 |     -   124     -     -  -133     -     -     -     -   -24 |
 MBAR |     -    -3     -     -   -95     -     -    33     -    68 |
 MCM4 |     -   361   -24     -  -404     -     -     -     -     - |
 MDO1 |     -     -  -132     -     -     -     -     -     -   265 |
 MEDI |     -     -     0     -     -     -     -     -     -     1 |
 METS |     -  -122    46     -     -     -     -     -     -    81 |
 MIZU |     -     -   -34    11     -     -     -     -     -    60 |
 NLIB |     -     -   121     -     -     -     -   -99     -  -103 |
 NNOR |     -     -    66  -244     -     -     -     -     -    48 |
 NPLD |     -  -133    50     -     -     -     -     -     -    91 |
 NRC1 |     -   166    -1     -  -101     -     -     -     -  -119 |
 NRIL |     -     -     -     -    47     -     -   -39     -     X |
 NTUS |     -   -68     -   204     -     -     -  -111     -   105 |
 NYA1 |     -    33     -     -   -34     -     -     -     -    -7 |
 ONSA |     -  -123    -1   242     -     -     -     -     -     - |
 PDEL |     -   -20     -     -    24     -     -     -     -     - |
 PERT |     -     -    51     X   114     -     -  -118     -   -69 |
 PIE1 |     -     -  -102    57     -     -     -     -     -   169 |
 PIMO |     -     -     -   615     -     -     -     -     -  -453 |
 POL2 |     -    10     -     -     -     -     -     -     -   -15 |
 POTS |     -    18     -     -   -22     -     -     -     -     X |
 PRDS |     -   -69     8     -     -     -     -     -     -    83 |
 PTBB |     -   -69    30     -     -     -     -     -     -    39 |
 QAQ1 |     -     -    -4     -     -     -     -     -     -     9 |
 REYK |     -  -108     -     -     -     -     -     -     -   155 |
 RIOG |     -   -65    94     -   -61     -     -     -     -   -24 |
 SCH2 |     -     -    44     -     -     -     -  -108     -    64 |
 SFER |     -  -116    82     -     -     -     -     -     -     - |
 SPT0 |     -  -173    74     -     -     -     -     -     -   100 |
 STJO |     -    82    -9     -   -79     -     -     -     -    -6 |
 STR1 |     -     -   -21     -     -     -     -     -     -    42 |
 SUTH |     -   -62     -     -     -     -     -     -     -    88 |
 THTI |     -     -   117     8  -204     -     -     -     -    -4 |
 THU3 |     -   -27   121     -     -     -     -     -     -  -203 |
 TIDB |     -   -21   -72   237     -     -     -     -     -     X |
 TIXI |     -    31     -     -     -     -     -   -31     -     X |
 TLSE |     -     -   -33     -     -     -     -     -     -    67 |
 TOW2 |     -    31     -     -  -147     -     -    89     -     X |
 TRO1 |     -     X     -     -    42     -     -     -     -   -49 |
 TSKB |     -  -107   -26   212    21     -     -     -     -    24 |
 TWTF |     -  -118     7     -     -     -     -     -     -   156 |
 UNSA |     -     -     -   210  -127     -     -     -     -    -6 |
 URUM |     -    73     -     -     -     -     -     -     -  -105 |
 USN3 |     -    14     -     -     -     -     -   -46     -    44 |
 USNO |     -    13    50     -     -     -     -     -     -  -119 |
 USUD |     -     -    42  -113     -     -     -     -     -     X |
 VILL |     -     -     -   -71     -     -     -     -     -    53 |
 WHIT |     -   -53     -     -     -     -     -     -     -    76 |
 WILL |     -   -22    14     -     -     -     -     -     -     3 |
 WTZR |     -   -29   117   -77     -     -     -   -56     -   -57 |
 WUHN |     -     -   -21     -   198     -     -     -     -  -190 |
 YAR2 |     -  -171    69     -     -     -     -     -     -   107 |
 YEBE |     -     -    33     -     -     -     -   -85     -    54 |
 YELL |     -     -   -25     X     X     -     -     -     -    50 |
 YSSK |     -     5     -     -     -     -     -    -6     -     - |
 ZIMM |     -   -58     -     -     -     -     -     -     -    84 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6851    46    38    64    40    57  6527    31  4944    64 |  288   3.88
    2 |  4282    54    29    51    56    78  1573    37  3782    57 |  288   0.84
    3 |  3475    61    21    89    35    45  3323    35  2942    76 |  288   2.36
    5 |  5957    45    31    39    31    69  9168    32  4040    49 |  288   2.06
    6 |  1027    34    28    73    36   109  6673    28  1184    47 |  288   1.23
    7 |   492    34    37    97    25    60   710    37   584    69 |  288   0.44
    8 |  2839    64    75    59   150   157  3098    69  2647   106 |  288   2.31
    9 |  4768   160    75   127    77   248  9295    52  4066    52 |  288   3.09
   10 |  3187    52    31    70    21    73  2688    38  2610    43 |  288   1.75
   11 |  2181    50    31    65    31    55  3340    73  1637    78 |  288   0.39
   13 |   573    44    44   168    30    66   332    44   445    61 |  288   0.20
   14 |   508    41    57    61    32    48   609    48   415    82 |  288   0.18
   15 |  3861    40    33    67    30    55  2496    88  4305    47 |  288   3.56
   16 |   960    26    35    73    22    58   423    44   645   100 |  288   0.34
   17 |  4024    68    19    41    35    36  1269    43  3760    41 |  288   1.49
   18 |   903    52    52    99    21    58   499    38   733    70 |  288   0.45
   19 |   460    59    47   137    24    47   498    35   561    94 |  288   0.25
   20 |   543    41    22    62    24    41   260    69   556    85 |  288   0.25
   21 |   906    59    16    60    39    68   322    40   893    86 |  288   0.35
   22 |  1015    67    49    59    39    84   643    40   775    69 |  288   0.21
   23 |   572    57    19   112    35    53   454    38   698    87 |  288   0.22
   24 |  3586    55    28    55    27    37  4620    57  4901    61 |  288   3.13
   25 |  2640    68    30    71    41    55  2910    52  2409    56 |  288   1.42
   26 |  1168    56    39    76    27    49   565    35   933   118 |  288   0.60
   27 |  1413    99    87    95    78   159  1281   128  1293    42 |  288   0.97
   28 |  2322    45    31    61    43    48  1545    38  2303    65 |  288   0.28
   29 |  1568    67    32   116    39   199  1487    30  1258   114 |  288   0.66
   30 |  1082    31    28    72    32    47   566    21   790    52 |  288   0.49
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    35    16     -     -     -     -    22     -    36 |  288   0.05
 ALGO |     -     -    11     X     -     -     -    16     -    21 |  288   0.03
 ALRT |     -    16     -     -    13     -     -    14     -     - |  288   6.37
 AMC2 |     -    22    31     -     -     -     -    28     -    29 |  288   0.03
 ARTU |     -     -     -    33    42     -     -    46     -     X |  263  10.75
 ASPA |     -    34     -     -    30     -     -    26     -    19 |  216    >>>
 AUCK |     -    22     -     X     -     -     -     -     -    32 |  264  11.19
 BAN2 |     -     -    23     -     -     -     -     -     -    46 |  198  14.96
 BILI |     -     -     -     -    23     -     -    19     -     X |  282   6.44
 BOGT |     -     -     -     X   134     -     -     -     -   157 |  278  27.79
 BOR1 |     -    35    21     -     -     -     -     -     -    22 |  288   0.31
 BRUS |     -    23    16     -     -     -     -     -     -    14 |  288   0.05
 CAGZ |     -    16     -     -     -     -     -     -     -    23 |  144   0.33
 CAS1 |     -    34     -    52    29     -     -    21     -    57 |  288   5.98
 CEDU |     -    36     -     X     -     -     -    38     -    48 |  287  12.74
 CHAT |     -    47     -     -    37     -     -     -     -    63 |  239   9.76
 COCO |     -    25     -    51    41     -     -    33     -    46 |  288   9.10
 CRO1 |     -     -    56   104   111     -     -    70     -    72 |  285  43.88
 DAEJ |     -    27    29     -     -     -     -     -     -    49 |  287    >>>
 DAV1 |     -     8     -     -    10     -     -     -     -     - |   81   2.22
 DGAR |     -    25     -     -     -     -     -    24     -    41 |  288  18.64
 DRAO |     -    45    15     -     -     -     -    18     -    60 |  288   0.07
 DWH1 |     -    31    29     -     -     -     -     -     -    43 |  288   0.54
 FAIR |     -     -    30    69    71     -     -     -     -     - |  248   0.25
 FORT |     -    33    37    79    56     -     -     -     -     X |  288   0.08
 GLPS |     -    78     -     -    80     -     -     -     -    33 |  288  29.69
 GMAS |     -     -    13     -     -     -     -     -     -    26 |  288   1.58
 GODE |     -    61    41    26     -     -     -     -     -    15 |  288   0.21
 GOLD |     -    72     -    65     -     -     -    25     -    53 |  288  14.59
 GUAM |     -     X     -     X    98     -     -     X     -   115 |  220  14.50
 HARB |     -    71     -     -    66     -     -     -     -    36 |  287  31.06
 HOB2 |     -    33    15    84    35     -     -    26     -    29 |  288   0.06
 HOFN |     -     -     -     -   157     -     -    86     -   105 |  270    >>>
 HRAO |     -    24     -     -    26     -     -    26     -    33 |  288   0.26
 IISC |     -     -     -    24    15     -     -     -     -     - |  288  29.03
 JAB1 |     -    29     -     X     -     -     -    29     -     - |  264  21.11
 JPLM |     -     -    39     -    35     -     -     -     -    46 |  288   4.39
 KERG |     -     -    41    73    43     -     -     -     -    92 |  288   2.28
 KGN0 |     -    22    16     -     -     -     -     -     -    26 |  287   0.43
 KIRU |     -     -     -     -     -     -     -    33     -    46 |  273 240.68
 KIT3 |     -     -     -    30    16     -     -    12     -     X |  288  11.12
 KOKB |     -    46    18     -    27     -     -    27     -    32 |  288   0.10
 KOSG |     -    35     -     -     -     -     -     -     -    50 |  288  35.42
 KOUR |     -    40     -    53    40     -     -     -     -    35 |  288   1.12
 LHAS |     -     -     -     -     -     -     -    26     -    37 |  247  16.58
 LPGS |     -    31    29    59     -     -     -     -     -    46 |  288  19.17
 MAD2 |     -     -    11     -     -     -     -     -     -    23 |  288   0.04
 MAG0 |     -    28     -     -     -     -     -    28     -     - |  287   6.13
 MANA |     -     -     -     -     -     -     -    24     -    34 |  250    >>>
 MAS1 |     -     -    20    72    26     -     -    38     -    43 |  288   2.84
 MATE |     -     -     -    53     -     -     -     -     -    39 |  288   0.20
 MAW1 |     -    78     -     -    80     -     -     -     -   216 |  286   6.94
 MBAR |     -    46     -     -    34     -     -    34     -    67 |  288  13.61
 MCM4 |     -    59    67     -    43     -     -     -     -     - |  288  14.81
 MDO1 |     -     -    15     -     -     -     -     -     -    31 |  288  15.63
 MEDI |     -     -     7     -     -     -     -     -     -    14 |  288   0.07
 METS |     -    16    12     -     -     -     -     -     -    18 |  287  14.96
 MIZU |     -     -    17    35     -     -     -     -     -    21 |  288   0.52
 NLIB |     -     -    30     -     -     -     -    67     -    40 |  288 646.98
 NNOR |     -     -    19    55     -     -     -     -     -    30 |  286  13.05
 NPLD |     -    35    23     -     -     -     -     -     -    19 |  287   0.03
 NRC1 |     -    16     8     -    18     -     -     -     -    28 |  288   0.01
 NRIL |     -     -     -     -    54     -     -    44     -     X |  181  11.29
 NTUS |     -    30     -    51     -     -     -    56     -    48 |  288   9.40
 NYA1 |     -    24     -     -    28     -     -     -     -    59 |  288   0.30
 ONSA |     -    62    65    63     -     -     -     -     -     - |  288   0.05
 PDEL |     -    10     -     -    12     -     -     -     -     - |  288  51.83
 PERT |     -     -    15     X    34     -     -    20     -    44 |  288   2.52
 PIE1 |     -     -    51    50     -     -     -     -     -    93 |  288   1.38
 PIMO |     -     -     -    45     -     -     -     -     -    33 |   98  25.48
 POL2 |     -    19     -     -     -     -     -     -     -    27 |  288  11.83
 POTS |     -    15     -     -    18     -     -     -     -     X |  287  15.57
 PRDS |     -    22    25     -     -     -     -     -     -    36 |  288   2.00
 PTBB |     -    32    25     -     -     -     -     -     -    33 |  288   0.25
 QAQ1 |     -     -    29     -     -     -     -     -     -    59 |  281   7.96
 REYK |     -    10     -     -     -     -     -     -     -    14 |   78   5.85
 RIOG |     -    24    18     -    21     -     -     -     -    19 |  288   9.27
 SCH2 |     -     -    30     -     -     -     -    62     -    52 |  270 111.95
 SFER |     -    38    27     -     -     -     -     -     -     - |  287   0.44
 SPT0 |     -    28    17     -     -     -     -     -     -    20 |  288   0.03
 STJO |     -    31    21     -    57     -     -     -     -    31 |  288   0.05
 STR1 |     -     -    14     -     -     -     -     -     -    27 |  288   0.77
 SUTH |     -    34     -     -     -     -     -     -     -    48 |  288  10.11
 THTI |     -     -    25    78    50     -     -     -     -    38 |  288  12.96
 THU3 |     -    26    17     -     -     -     -     -     -    31 |  288   7.19
 TIDB |     -    17    22    58     -     -     -     -     -     X |  288   0.08
 TIXI |     -    84     -     -     -     -     -    84     -     X |  272   6.84
 TLSE |     -     -    10     -     -     -     -     -     -    19 |  288   0.32
 TOW2 |     -    28     -     -    25     -     -    33     -     X |  288  15.71
 TRO1 |     -     X     -     -    77     -     -     -     -    90 |  255   9.28
 TSKB |     -    35    16    49    17     -     -     -     -    38 |  288   1.61
 TWTF |     -    32    34     -     -     -     -     -     -    39 |  288   0.05
 UNSA |     -     -     -    41    29     -     -     -     -    45 |  288  19.29
 URUM |     -    37     -     -     -     -     -     -     -    52 |  288  30.06
 USN3 |     -    26     -     -     -     -     -    28     -    17 |  288   0.02
 USNO |     -    14    19     -     -     -     -     -     -    35 |  288   0.02
 USUD |     -     -    17    45     -     -     -     -     -     X |  288  12.30
 VILL |     -     -     -    86     -     -     -     -     -    64 |  276    >>>
 WHIT |     -    46     -     -     -     -     -     -     -    66 |  244  27.53
 WILL |     -    26    24     -     -     -     -     -     -    24 |  288  15.48
 WTZR |     -    40    17    38     -     -     -    26     -    46 |  275  35.27
 WUHN |     -     -    44     -    31     -     -     -     -    99 |  287  14.12
 YAR2 |     -    29    19     -     -     -     -     -     -    34 |  288   7.63
 YEBE |     -     -    22     -     -     -     -    58     -    60 |  288  35.51
 YELL |     -     -    10     X     X     -     -     -     -    19 |  283   0.07
 YSSK |     -    22     -     -     -     -     -    22     -     - |  287   8.15
 ZIMM |     -    26     -     -     -     -     -     -     -    37 |  288    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  2840    46    33    72    52    92  3497    45  2486    59 |


 BEST CLOCK FIT: NRC1   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.94   | 3.66e-14  5.84e-15  2.39e-15 |
 ALGO |   288     1     0   287    9.91   | 3.35e-14  6.25e-15  1.58e-15 |
 NPLD |   287     0     0   286    8.96   | 3.99e-14  8.59e-15  2.90e-15 |
 ALBH |   288     0     0   288    7.88   | 4.36e-14  1.18e-14  3.70e-15 |
 SPT0 |   288     0     0   288    7.07   | 4.40e-14  6.24e-15  2.45e-15 |
 NRC1 |   288     1     0   287    6.40   | 2.37e-14  6.54e-15  1.20e-15 |
 USNO |   288     0     0   288    6.28   | 3.56e-14  6.10e-15  1.80e-15 |
 ONSA |   288     0     0   288    6.05   | 6.40e-14  1.17e-14  5.33e-15 |
 BRUS |   288     0     0   288    5.71   | 4.28e-14  9.37e-15  2.86e-15 |
 MAD2 |   288     1     0   287    5.43   | 3.69e-14  1.11e-14  3.32e-15 |
 USN3 |   288     0     0   288    4.70   | 6.30e-14  9.06e-15  1.85e-15 |
 STJO |   288     0     0   288    3.99   | 7.18e-14  1.69e-14  3.50e-15 |
 NLIB |   288     1     0   287    2.82   | 3.84e-14  6.30e-15  2.97e-15 |
 WTZR |   275     0     0   274    2.12   | 3.76e-14  1.38e-14  4.62e-15 |
 TWTF |   288     0     0   288    2.05   | 4.26e-14  1.02e-14  3.58e-15 |
 HOB2 |   288     0     0   288    1.50   | 4.00e-14  9.56e-15  6.00e-15 |
 FORT |   288     0     0   288    1.34   | 1.02e-13  2.93e-14  4.94e-15 |
 MEDI |   288     0     2    71    1.32   | 4.20e-14  7.56e-15  5.84e-15 |
 DRAO |   288     0     0   288    1.20   | 7.02e-14  2.43e-14  5.17e-15 |
 PIE1 |   288     3     0   285    0.86   | 4.09e-14  7.08e-15  1.18e-15 |
 GODE |   288     0     0   288    0.76   | 4.21e-14  9.65e-15  1.24e-14 |
 MATE |   288     0     0   288    0.69   | 1.06e-13  1.77e-14  1.69e-14 |
 YELL |   283     1     0   280    0.56   | 4.95e-14  9.69e-15  2.26e-15 |
 FAIR |   248     0     0   246    0.30   | 2.00e-13  5.47e-14         - |
 TIDB |   288     1     3   101    0.29   | 2.24e-13  2.14e-14  8.62e-15 |
 HRAO |   288     0     0   288    0.20   | 9.86e-14  2.91e-14  3.04e-14 |
 G02  |   288     0     2   177    0.20   | 4.53e-13  5.10e-14  4.77e-14 |
 PTBB |   288     0     0   143    0.15   | 2.48e-13  5.96e-14  2.71e-14 |
 G13  |   288     0     1    89    0.13   | 4.91e-13  5.71e-14  1.77e-14 |
 MIZU |   288     0     0   288    0.10   | 3.56e-13  1.06e-13  4.97e-14 |
 G23  |   288     0     1   144    0.10   | 5.68e-13  7.85e-14  1.18e-14 |
 TLSE |   288     0     0   287    0.09   | 3.95e-13  9.24e-14  3.52e-14 |
 G07  |   288     0     0   288    0.09   | 3.03e-13  8.00e-14  5.30e-14 |
 KGN0 |   287     0     0   286    0.08   | 3.57e-13  1.19e-13  4.23e-14 |
 G06  |   288     0     0   288    0.08   | 4.62e-13  1.37e-13  6.83e-14 |
 G30  |   288     0     0   288    0.08   | 3.29e-13  9.35e-14  6.16e-14 |
 NYA1 |   288     0     0   288    0.08   | 3.89e-14  2.90e-14  2.14e-14 |
 SFER |   287     0     0   286    0.08   | 3.89e-13  1.19e-13  3.65e-14 |
 BOR1 |   288     0     0   288    0.06   | 4.50e-13  1.14e-13  2.64e-14 |
 G29  |   288     0     0   288    0.05   | 4.09e-13  1.42e-13  8.01e-14 |
 DWH1 |   288     0     0   288    0.05   | 4.83e-13  1.37e-13  5.63e-14 |
 G16  |   288     0     2    67    0.05   | 4.95e-13  5.63e-14  4.17e-14 |
 G26  |   288     0     0   288    0.05   | 3.46e-13  1.19e-13  7.22e-14 |
 G27  |   288     0     0   288    0.04   | 3.57e-13  1.06e-13  1.04e-13 |
 CAGZ |   144     0     0   144    0.03   | 4.41e-13  9.85e-14         - |
 G17  |   288     0     0   288    0.02   | 5.24e-13  1.72e-13  1.31e-13 |
 STR1 |   288     0     0   288    0.02   | 6.91e-13  1.76e-13  6.97e-14 |
 TSKB |   288     0     0   288    0.01   | 9.91e-13  3.08e-13  1.29e-13 |
 G05  |   288     0     0   288    0.01   | 1.40e-12  4.34e-13  2.08e-13 |
 KERG |   288     0     0   288    0.01   | 1.12e-12  3.62e-13  2.24e-13 |
 KOUR |   288     0     0   288    0.01   | 1.52e-12  5.33e-13  8.97e-14 |
 PRDS |   288     0     0   288    0.00   | 1.37e-12  3.65e-13  1.97e-13 |
 G03  |   288     0     0   288    0.00   | 1.27e-12  3.77e-13  2.71e-13 |
 G10  |   288     0     0   288    0.00   | 1.14e-12  3.57e-13  1.46e-13 |
 YEBE |   288     3     3     1    0.00   | 2.15e-13  1.81e-14  1.18e-14 |
 GMAS |   288     0     0   143    0.00   | 1.12e-12  4.52e-13  1.47e-13 |
 GPST |   288     0     0     0    0.00   | 1.63e-14  4.72e-15  7.46e-16 |
 REYK |    78     0     0     0    0.00   |        -         -         - |
 MANA |   250     0     0     0    0.00   |        -         -         - |
 TRO1 |   255     0     0     0    0.00   |        -         -         - |
 HOFN |   270     0     0     0    0.00   |        -         -         - |
 NRIL |   181     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   272     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 JAB1 |   264     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   239     0     0     0    0.00   |        -         -         - |
 CEDU |   287     0     0     0    0.00   |        -         -         - |
 BILI |   282     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 5.61e-13  6.35e-14  2.53e-14 |
 G25  |   288     0     0     0    0.00   | 1.40e-12  4.14e-13  1.34e-13 |
 G24  |   288     0     0     0    0.00   | 1.34e-12  4.32e-13  3.89e-13 |
 G22  |   288     0     5     0    0.00   | 7.34e-13  8.48e-14  1.58e-14 |
 G21  |   288     0     6     0    0.00   | 9.63e-13  1.07e-13  2.83e-14 |
 G20  |   288     0     5     0    0.00   | 6.00e-13  7.94e-14  2.04e-14 |
 G19  |   288     0     4     0    0.00   | 5.89e-13  6.26e-14  2.74e-14 |
 G18  |   288     2     6     0    0.00   | 1.48e-12  1.68e-13  4.40e-14 |
 G15  |   288     0     0     0    0.00   | 1.56e-12  6.33e-13  3.73e-13 |
 G14  |   288     0     6     0    0.00   | 5.65e-13  6.04e-14  1.52e-14 |
 G11  |   288     2     3     0    0.00   | 5.98e-13  1.04e-13  4.28e-14 |
 G09  |   288     0     0     0    0.00   | 1.38e-12  5.53e-13  3.31e-13 |
 G08  |   288     0     0     0    0.00   | 1.37e-12  3.75e-13  1.31e-13 |
 G01  |   288     0     0     0    0.00   | 1.48e-12  7.55e-13  4.15e-13 |
 ZIMM |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   244     0     2     0    0.00   | 6.70e-13  1.32e-12         - |
 VILL |   276     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.94e-13  3.39e-13  9.59e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   270     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   281     0     0     0    0.00   |        -         -         - |
 POTS |   287     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |    98     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 2.06e-12  4.85e-13  2.35e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   286     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     2     0     0    0.00   | 7.19e-13  7.08e-13  1.39e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   286     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.96e-12  5.83e-13  2.40e-13 |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   247     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KOKB |   288     0     0     0    0.00   | 5.58e-14  2.01e-14  7.35e-15 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   273     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.29e-13  2.50e-13  4.38e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   220     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |    81     0     0     0    0.00   | 3.19e-13  1.08e-12         - |
 CRO1 |   285     2     0     0    0.00   |        -         -         - |
 COCO |   288     0     1     0    0.00   | 2.34e-13  9.19e-13  1.08e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   278     0     0     0    0.00   |        -         -         - |
 BAN2 |   198     0     0     0    0.00   |        -         -         - |
 ASPA |   216     0     0     0    0.00   |        -         -         - |
 ARTU |   263     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.85e-17  3.42e-16  2.06e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      AMC2      PIE1 |
------------------------------------------+------------------------------+
