
 GPS week: 1305   Day: 5   MJD: 53384                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2779     13    -0.01     0.29     2.50     0.00      0
 cod |   288     0  28213    277    -0.31     0.43     0.04    21.75      0
 emr |   288     0  24370      1  2784.90    55.39     0.05    18.28      0
 esa |   288     0  18472   1394  2784.08    55.57     0.07    10.24      0
 gfz |   288     0  20699    337    -0.05    -0.09     0.04    20.07      0
 iga |    96     0   2779     30     0.02     0.02     0.09     0.00      0
 igu |    96     0   2779      0     0.02     0.04     2.10     0.00      0
 jpl |   288     0  17034     19    -8.30     3.51     0.06    14.23      0
 ngs |    96     0   2779      2     0.02     0.07     2.59     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33906   3499  2784.59    55.53     0.06    15.42      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  -578    23   -89    79   -28   -72   -98    24 -2459     -    36 |
    2 |  1318    48    22  -125    23    -4  -514    27   993     -   -66 |
    3 | -3328   -51   -65     1    39   -37  -842    42 -3329     -    58 |
    4 |  -676   118   -64    15    22    94   278   -28  -561     -  -104 |
    5 | -7438     1   -94    30    48    10   416    79 -6650     -   -46 |
    6 | -3787     1   -86   139   122  -260 -5057   -51 -3266     -  -104 |
    7 | -2081    53   -83   -64    65   170 -1999    85 -1963     -   -97 |
    8 |  2457   -18  -210   215   138    40   852    84  2443     -  -128 |
    9 | -7245     X   -27     X   -88  -369  5762   163 -6996     -   -26 |
   10 | -9255    33   -33  -130   114    65 -8241    43 -9134     -  -111 |
   11 |  4300    86  -134   -54    29   170    83   140  4677     -   -92 |
   13 |  4582   173   -19   -43   -97    69 -1648     -  4709     -   -67 |
   14 |  6638    80    27  -153  -107  -171  1703    22  6330     -    76 |
   15 | -6117   -45    12    63   -34   144 -4651    -6 -5818     -    57 |
   16 |  5901   -75   -27    18    25   -96  1499    65  5620     -    32 |
   17 | -2625    46  -158   106    63    28  1208    35 -2548     -   -68 |
   18 |  3945   -19    79  -175    41  -190  -472   -26  3941     -    20 |
   19 |  4847  -127  -171  -121   226  1065  1843   330  4975     -  -175 |
   20 |  5036   -17  -129    17    35   -42   692   191  5023     -   -56 |
   21 |  4808   -19   135  -146    -3   -59  1633   -17  4642     -   -16 |
   22 | -2496   -86   291   -42   -18  -127  -582   -66 -2203     -  -111 |
   23 |   912    -7     3  -443    46   -85  -870   157   953     -    95 |
   24 | -4099   112  -160   118    21   115  1155   -35 -3617     -   -42 |
   25 |    97    42   -11    -4    34  -308  6999    -6   353     -   -85 |
   26 | -2672    63   -29  -217    81  -113  -959    71 -2471     -   -82 |
   27 |  1371    68  -192    62    48   -63  -117   110  1607     -   -78 |
   28 |  9928    64  -164   -31   178   302  4037    21  9048     -  -126 |
   29 | -1908    44   -99   -59    83  -249  -874    54 -2121     -   -62 |
   30 | -2384    21   -14   110    12  -111  -928   -42 -2627     -   -63 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -   -33     -     -     -     -    16     -     -    24 |
 ALGO |     -     -  -231   546     -     -     -   -70     -     -   -24 |
 ALRT |     -   -44     -     -    48     -     -     -     -     -     - |
 AMC2 |     -   -77   208     -     -     -     -  -213     -     -    58 |
 ARTU |     -     -     -   -17    16     -     -   -11     -     -     X |
 ASPA |     -   225     -     -   -47     -     -  -321     -     -    22 |
 AUCK |     -    37     -     X     -     -     -     -     -     -   -52 |
 BAHR |     -     -   157     -     7     -     -     -     -     -  -195 |
 BILI |     -    53     -     -   -58     -     -     -     -     -     X |
 BOGT |     -    68     -  -104    66     -     -     -     -     -  -112 |
 BOR1 |     -   -28    62     -     -     -     -     -     -     -   -33 |
 BRUS |     -   -81    97     -     -     -     -     -     -     -     X |
 CAGZ |     -    93     -     -     -     -     -     -     -     -  -131 |
 CAS1 |     -   -27     -    96   -41     -     -    13     -     -    16 |
 CEDU |     -     -     -  -295     -     -     -    -5     -     -   200 |
 COCO |     -   -48     -  -128   142     -     -  -115     -     -    74 |
 CRO1 |     -     -    78  -127   -21     -     -   113     -     -   -87 |
 DAEJ |     -    41   -41     -     -     -     -     -     -     -    -9 |
 DAKA |     -    25     -     -    49     -     -  -106     -     -     - |
 DAV1 |     -  -383     -     -   415     -     -     -     -     -     - |
 DGAR |     -     -     -     -     -     -     -   -84     -     -    77 |
 DRAO |     -     -   -70     -     -     -     -    44     -     -    42 |
 DWH1 |     -   188   -61     -     -     -     -     -     -     -  -192 |
 FAIR |     -   -53    98   -88    13     -     -     -     -     -     - |
 FORT |     -     -   -39    81    -6     -     -     -     -     -     X |
 GLPS |     -    32     -     -   -35     -     -     -     -     -     X |
 GODE |     -   -56    75   -29     -     -     -     -     -     -    10 |
 GOLD |     -    42     -     6     -     -     -   -68     -     -     X |
 GRAZ |     -     -   124     -     -     -     -     -     -     -  -147 |
 GUAM |     -    12     -  -227    86     -     -  -138     -     -   150 |
 HARB |     -   -63     -     -     -     -     -     -     -     -    88 |
 HLFX |     -     -   145     -     -     -     -  -186     -     -     X |
 HOB2 |     -     2   145     -  -116     -     -     -     -     -   -24 |
 HOFN |     -     -     -     -  -114     -     -     -     -     -   148 |
 HRAO |     -   -60     -     -   -58     -     -    64     -     -   100 |
 IENG |     -   -47    56     -     -     -     -     -     -     -     - |
 IISC |     -    56     -  -123     2     -     -     -     -     -     - |
 INVK |     -    24     -     -     -     -     -   -37     -     -     X |
 ISPA |     -   -47     -     -   -32     -     -   -67     -     -   168 |
 JPLM |     -     -    70     -  -218     -     -    53     -     -   151 |
 KERG |     -     -    73     X  -148     -     -     -     -     -   107 |
 KGN0 |     -   -48   -45     -     -     -     -     -     -     -   122 |
 KIRU |     -   -65     -     -     -     -     -   133     -     -   -30 |
 KOKB |     -  -106   186     -  -119     -     -     2     -     -    81 |
 KOSG |     -   -64     -     -     -     -     -     -     -     -    90 |
 KOUR |     -     -     -  -233    84     -     -     -     -     -    45 |
 LPGS |     -  -127    38   116     X     -     -     -     -     -    47 |
 MAD2 |     -     -   -59     -     -     -     -     -     -     -    70 |
 MADR |     -     -     -     -     -     -     -    20     -     -   -18 |
 MALI |     -   114     -   -78     -     -     -     -     -     -  -108 |
 MAS1 |     -   -62    15     3   -18     -     -     -     -     -    90 |
 MAW1 |     -     -     -     -   -92     -     -     -     -     -   120 |
 MBAR |     -     2     -     -   -15     -     -    19     -     -    -2 |
 MCM4 |     -   559   -35     -  -574     -     -     -     -     -     - |
 MDO1 |     -    37  -118     -     -     -     -     -     -     -    87 |
 METS |     -   -68    25     -     -     -     -     -     -     -    67 |
 MIZU |     -     -  -169   260     -     -     -     -     -     -    29 |
 MKEA |     -    73     -   -19     -     -     -   -97     -     -     X |
 NISU |     -    78     -     -   -84     -     -     -     -     -     - |
 NLIB |     -     -    56     -     -     -     -   -47     -     -   -23 |
 NNOR |     -     -   -26   -53     -     -     -     -     -     -    65 |
 NPLD |     -   -84    88     -     -     -     -  -120     -     -   124 |
 NRC1 |     -     -     9     -    24     -     -     -     -     -   -41 |
 NRIL |     -   -11     -     -     4     -     -     9     -     -     X |
 NTUS |     -   -92     -   -93     -     -     -     -     -     -   192 |
 NYA1 |     -    66     -     -  -129     -     -     -     -     -    75 |
 OHI2 |     -   183     -    41   -69     -     -     -     -     -  -194 |
 ONSA |     -   -37    94    29   -60     -     -     -     -     -     - |
 PDEL |     -   -29     -     -    31     -     -     -     -     -     - |
 PERT |     -     -   -34     X    56     -     -   -41     -     -     5 |
 PIE1 |     -     -   -87   186     -     -     -     -     -     -   -21 |
 PIMO |     -     -     -   620     -     -     -     -     -     -  -411 |
 POL2 |     -   100     -     -     -     -     -  -177     -     -    23 |
 POTS |     -    13     -     -   -14     -     -     -     -     -     X |
 PRDS |     -     -   -40     -     -     -     -     -     -     -    47 |
 PTBB |     -   -32    37     -     -     -     -     -     -     -     1 |
 QAQ1 |     -     -   -11     -     -     -     -     -     -     -    13 |
 REYK |     -   -46     -     -     -     -     -     -     -     -    64 |
 SANT |     -   -31     -     X    33     -     -     -     -     -     - |
 SCH2 |     -     -   -31     -     -     -     -     -     -     -    37 |
 SPT0 |     -  -170   121     -     -     -     -     -     -     -    96 |
 STR1 |     -     -   -36     -     -     -     -     -     -     -    43 |
 SUTH |     -  -119     -     -     -     -     -     -     -     -   168 |
 THTI |     -     -    72  -128     -     -     -     -     -     -     - |
 THU3 |     -   -40   174     -     -     -     -     -     -     -  -149 |
 TIDB |     -   -52   -55   326     -     -     -     -     -     -   -79 |
 TIXI |     -   -15     -    32     -     -     -     -     -     -     - |
 TLSE |     -     -   -58     -     -     -     -     -     -     -    69 |
 TOW2 |     -    46     -     -   -61     -     -     -     -     -    15 |
 TRO1 |     -     4     -     -   106     -     -     -     -     -  -167 |
 TSKB |     -   -45    60  -264    47     -     -     -     -     -   107 |
 TWTF |     -   -94    -5     -     -     -     -     -     -     -   138 |
 USN3 |     -    10     -     -     -     -     -   -49     -     -    31 |
 USNO |     -   -63    73     -     -     -     -     -     -     -     1 |
 USUD |     -  -112    -9   101     -     -     -   110     -     -     X |
 WHIT |     -     5     -     -     -     -     -     -     -     -    -8 |
 WILL |     -   -32    88     -     -     -     -     -     -     -   -60 |
 WROC |     -     -   130     -     -     -     -  -167     -     -     - |
 WTZR |     -  -108   148   194     -     -     -     -     -     -  -151 |
 WUHN |     -     -   -69     -    52     -     -     -     -     -    14 |
 YAR2 |     -   -84    72     -     -     -     -     -     -     -    33 |
 YEBE |     -     -   -79     -     -     -     -     -     -     -    94 |
 YELL |     -   -53    26   339  -136     -     -     -     -     -    -3 |
 ZIMM |     -    31     -     -     -     -     -     -     -     -   -43 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6004    45    82    71    23    49  5183    43  7060     -    54 |  288   5.93
    2 |  1326    43    22    46    29    77   573    54  1287     -    95 |  288   0.27
    3 |  1770    46    30    75    42    42  1819    29  1801     -   101 |  288   1.61
    4 |  1082    43    41    74    17    37  1117    66  1163     -    70 |  288   0.62
    5 |  2054    33    90   167    50    27  1846    41  2660     -    61 |  288   2.38
    6 |  2270    17    44    28    26    46  3134    38  2339     -    35 |  288   1.36
    7 |   923    48   125    65    69    41  1251    40   894     -    62 |  288   0.63
    8 |  2262   120    47   150    94   117  2067   155  2219     -    76 |  288   2.21
    9 |  5783     X    61     X   111   231  3576    53  5638     -    83 |  275   3.58
   10 |  3195    66    44    43    18    45  3529    31  2969     -    53 |  288   2.15
   11 |  1069    46    53    67    56    56   393    55  1032     -    87 |  288   0.42
   13 |   720    38    49    66    43    58   772     -   646     -    84 |  288   0.22
   14 |  1646    41    88    54    32    80  1118    49  1571     -   109 |  288   0.26
   15 |  4025    54    50    60    28    33  1955   131  4050     -    41 |  288   2.26
   16 |  1527    44    17    73    39    67   849    29  1299     -    59 |  288   0.25
   17 |  1385    50    30   103    18   118  1696    54  1295     -    76 |  288   1.27
   18 |   800    46    73    48    33    71   461    41   642     -    85 |  288   0.48
   19 |   656    36    30   126    33    43   656    36   588     -   108 |  288   0.17
   20 |   940    52    28    39    26    98   678    31   874     -    49 |  288   0.27
   21 |  1447    50    38    35    35    54  1137    31  1074     -    51 |  288   0.31
   22 |   522    67    52    83    29   195   414    54   463     -    59 |  288   0.23
   23 |   870    56    35    52    25   104   735    56   902     -    50 |  288   0.26
   24 |  4956    43    42    30    19    80  3256    68  4649     -    61 |  288   3.24
   25 |  3655    70    50    90    39    67  4544    51  4218     -    58 |  288   2.44
   26 |  1134    52    56    73    24    68  1385    34  1033     -    49 |  288   0.79
   27 |  1929    89    83    77    74   118   661   182  1900     -   118 |  288   0.78
   28 |  3104    44   104    90    52    95  2100    38  2917     -    55 |  288   0.18
   29 |  1649    98    69    95    88   129  1506   124  1324     -    80 |  288   0.76
   30 |  1527    26    28    23    24    55   751    26  1595     -    41 |  288   0.69
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    60     -     -     -     -    86     -     -    51 |  283   0.06
 ALGO |     -     -    23    43     -     -     -    23     -     -    25 |  288   0.02
 ALRT |     -    18     -     -    20     -     -     -     -     -     - |  288   6.93
 AMC2 |     -    30    28     -     -     -     -    29     -     -    69 |  288   0.05
 ARTU |     -     -     -    51    27     -     -    40     -     -     X |  211   7.65
 ASPA |     -    35     -     -    27     -     -    42     -     -    23 |  264    >>>
 AUCK |     -    32     -     X     -     -     -     -     -     -    45 |  264   8.68
 BAHR |     -     -    26     -    22     -     -     -     -     -    47 |  288   0.55
 BILI |     -    39     -     -    42     -     -     -     -     -     X |  287   7.46
 BOGT |     -    37     -    48    33     -     -     -     -     -    99 |  288  20.36
 BOR1 |     -    20    29     -     -     -     -     -     -     -    16 |  288   0.39
 BRUS |     -    14    17     -     -     -     -     -     -     -     X |  288   0.03
 CAGZ |     -    18     -     -     -     -     -     -     -     -    25 |  264   0.32
 CAS1 |     -    30     -    30    30     -     -    47     -     -    54 |  288   7.64
 CEDU |     -     -     -    39     -     -     -    28     -     -    16 |  288  11.34
 COCO |     -    28     -    39    36     -     -    33     -     -    65 |  288  11.10
 CRO1 |     -     -    67   104    75     -     -    33     -     -    76 |  287  16.75
 DAEJ |     -    26    33     -     -     -     -     -     -     -    20 |  287    >>>
 DAKA |     -    44     -     -    75     -     -    79     -     -     - |  252  19.24
 DAV1 |     -    79     -     -    86     -     -     -     -     -     - |  208  12.21
 DGAR |     -     -     -     -     -     -     -    32     -     -    29 |  288  16.88
 DRAO |     -     -    44     -     -     -     -    34     -     -    77 |  288   0.06
 DWH1 |     -    64    48     -     -     -     -     -     -     -    72 |  288   0.64
 FAIR |     -    21    23    48    31     -     -     -     -     -     - |  288   0.15
 FORT |     -     -    43    64    27     -     -     -     -     -     X |  281   0.14
 GLPS |     -    24     -     -    26     -     -     -     -     -     X |  288  20.62
 GODE |     -    36    42    61     -     -     -     -     -     -    21 |  288   0.12
 GOLD |     -    10     -    37     -     -     -    31     -     -     X |  288  10.63
 GRAZ |     -     -    14     -     -     -     -     -     -     -    16 |  288    >>>
 GUAM |     -    60     -    96    57     -     -    55     -     -    30 |  272  14.94
 HARB |     -    25     -     -     -     -     -     -     -     -    35 |  287  30.93
 HLFX |     -     -    25     -     -     -     -    33     -     -     X |  288  14.01
 HOB2 |     -    36    42     -    41     -     -     -     -     -    26 |  288   0.05
 HOFN |     -     -     -     -    21     -     -     -     -     -    28 |  287    >>>
 HRAO |     -    35     -     -    59     -     -    47     -     -    49 |  288   0.23
 IENG |     -    24    29     -     -     -     -     -     -     -     - |  288   0.59
 IISC |     -    21     -   210    92     -     -     -     -     -     - |  288  22.34
 INVK |     -    28     -     -     -     -     -    43     -     -     X |  288   7.47
 ISPA |     -    38     -     -    28     -     -    50     -     -    73 |  288  16.11
 JPLM |     -     -    50     -    12     -     -    25     -     -    39 |  288  16.69
 KERG |     -     -    28     X    56     -     -     -     -     -    78 |  288   1.14
 KGN0 |     -    28    30     -     -     -     -     -     -     -    19 |  287   0.40
 KIRU |     -    22     -     -     -     -     -    37     -     -    15 |  288   7.24
 KOKB |     -    33    22     -    35     -     -    34     -     -    40 |  288   0.08
 KOSG |     -    44     -     -     -     -     -     -     -     -    62 |  288  22.38
 KOUR |     -     -     -    67    28     -     -     -     -     -    24 |  288   2.37
 LPGS |     -    42    37    79     X     -     -     -     -     -    73 |  288  39.72
 MAD2 |     -     -    32     -     -     -     -     -     -     -    38 |  286   0.06
 MADR |     -     -     -     -     -     -     -    11     -     -    10 |  288   8.31
 MALI |     -    26     -    68     -     -     -     -     -     -    43 |  287  17.62
 MAS1 |     -    34    27    43    27     -     -     -     -     -    97 |  288   2.73
 MAW1 |     -     -     -     -    45     -     -     -     -     -    58 |  288   8.80
 MBAR |     -   104     -     -    38     -     -    87     -     -   105 |  288  13.82
 MCM4 |     -    29    30     -    21     -     -     -     -     -     - |  288  27.57
 MDO1 |     -    40    27     -     -     -     -     -     -     -    52 |  288  14.65
 METS |     -    16    19     -     -     -     -     -     -     -    23 |  287   7.17
 MIZU |     -     -    32    69     -     -     -     -     -     -    20 |  288   0.41
 MKEA |     -    33     -    51     -     -     -    43     -     -     X |  288  17.08
 NISU |     -    26     -     -    28     -     -     -     -     -     - |  288   0.05
 NLIB |     -     -    46     -     -     -     -    59     -     -    99 |  288   0.07
 NNOR |     -     -    49    66     -     -     -     -     -     -    22 |  288  14.28
 NPLD |     -    28    32     -     -     -     -    26     -     -    20 |  287   0.11
 NRC1 |     -     -    24     -    31     -     -     -     -     -    24 |  288   0.03
 NRIL |     -    33     -     -    39     -     -    42     -     -     X |  272  10.35
 NTUS |     -    42     -    38     -     -     -     -     -     -    45 |  288   8.53
 NYA1 |     -    66     -     -    52     -     -     -     -     -    30 |  288  36.86
 OHI2 |     -    53     -    63    23     -     -     -     -     -    80 |  286 196.86
 ONSA |     -    47   145    59    59     -     -     -     -     -     - |  288   0.04
 PDEL |     -    30     -     -    32     -     -     -     -     -     - |  288  55.55
 PERT |     -     -    63     X    57     -     -   104     -     -    88 |  285   3.68
 PIE1 |     -     -    50    25     -     -     -     -     -     -    54 |  288   0.05
 PIMO |     -     -     -    75     -     -     -     -     -     -    50 |  209  22.50
 POL2 |     -    21     -     -     -     -     -    36     -     -    18 |  288   9.92
 POTS |     -    15     -     -    16     -     -     -     -     -     X |  288  23.82
 PRDS |     -     -    42     -     -     -     -     -     -     -    50 |  288   2.04
 PTBB |     -    28    40     -     -     -     -     -     -     -    25 |  288   0.41
 QAQ1 |     -     -    29     -     -     -     -     -     -     -    34 |  274   5.82
 REYK |     -    14     -     -     -     -     -     -     -     -    19 |  287 126.04
 SANT |     -    24     -     X    26     -     -     -     -     -     - |  278  12.32
 SCH2 |     -     -    13     -     -     -     -     -     -     -    16 |  288  27.88
 SPT0 |     -    18    28     -     -     -     -     -     -     -    21 |  288   0.04
 STR1 |     -     -    26     -     -     -     -     -     -     -    31 |  288   0.95
 SUTH |     -    32     -     -     -     -     -     -     -     -    45 |  288  13.33
 THTI |     -     -    60   107     -     -     -     -     -     -     - |  276    >>>
 THU3 |     -    14    12     -     -     -     -     -     -     -    17 |  288   5.83
 TIDB |     -    20    33    35     -     -     -     -     -     -    27 |  288   0.07
 TIXI |     -    22     -    46     -     -     -     -     -     -     - |  287    >>>
 TLSE |     -     -    13     -     -     -     -     -     -     -    16 |  287   0.50
 TOW2 |     -    34     -     -    50     -     -     -     -     -    45 |  288  11.36
 TRO1 |     -    16     -     -    15     -     -     -     -     -    18 |  288   9.10
 TSKB |     -    38    26    33    44     -     -     -     -     -    56 |  288   0.85
 TWTF |     -    39    62     -     -     -     -     -     -     -    27 |  288   0.08
 USN3 |     -    20     -     -     -     -     -    26     -     -    34 |  288   0.04
 USNO |     -    32    35     -     -     -     -     -     -     -    69 |  288   0.06
 USUD |     -    29    41    27     -     -     -    22     -     -     X |  288  10.52
 WHIT |     -    26     -     -     -     -     -     -     -     -    37 |  288   2.16
 WILL |     -    21    47     -     -     -     -     -     -     -    45 |  288  51.98
 WROC |     -     -    14     -     -     -     -    18     -     -     - |  288  11.65
 WTZR |     -    28    23    33     -     -     -     -     -     -    62 |  288   0.05
 WUHN |     -     -    26     -    53     -     -     -     -     -    62 |  287  14.83
 YAR2 |     -    28    48     -     -     -     -     -     -     -    27 |  288  12.24
 YEBE |     -     -    32     -     -     -     -     -     -     -    38 |  284    >>>
 YELL |     -    52    33    28    51     -     -     -     -     -    66 |  288   0.03
 ZIMM |     -    19     -     -     -     -     -     -     -     -    27 |  288    >>>
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2500    42    48    73    45    89  2098    58  2593     -    56 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.95   | 3.29e-14  6.51e-15  3.87e-15 |
 ALGO |   288     1     0   287    9.92   | 4.07e-14  8.05e-15  2.28e-15 |
 NPLD |   287     0     0   286    9.88   | 3.23e-14  7.18e-15  6.61e-15 |
 ALBH |   283     0     0   282    7.52   | 3.93e-14  1.02e-14  2.54e-15 |
 BRUS |   288     0     0   288    7.27   | 3.35e-14  4.93e-15  1.82e-15 |
 USNO |   288     0     0   288    5.89   | 9.54e-14  2.40e-14  3.42e-15 |
 SPT0 |   288     0     0   288    5.46   | 3.81e-14  9.08e-15  2.30e-15 |
 NISU |   288     0     0   288    5.35   | 5.43e-14  8.79e-15  5.60e-15 |
 NRC1 |   288     0     0   288    4.86   | 4.20e-14  1.03e-14  3.12e-15 |
 MAD2 |   286     0     0   285    4.55   | 4.08e-14  7.11e-15  6.91e-15 |
 ONSA |   288     0     0   288    4.11   | 3.85e-14  7.64e-15  4.72e-15 |
 HOB2 |   288     0     0   288    3.52   | 4.90e-14  1.70e-14  3.77e-15 |
 DRAO |   288     0     0   288    3.19   | 1.35e-13  1.89e-14  3.61e-15 |
 YELL |   288     0     0   288    2.77   | 4.01e-14  6.97e-15  2.80e-15 |
 NLIB |   288     1     0   287    2.58   | 1.12e-13  1.18e-14  5.00e-15 |
 WTZR |   288     0     0   288    2.45   | 5.86e-14  1.60e-14  3.89e-15 |
 TWTF |   288     0     0   288    2.38   | 4.21e-14  8.27e-15  6.73e-15 |
 USN3 |   288     0     0   288    1.73   | 8.65e-14  1.83e-14  3.31e-15 |
 FORT |   281     0     0   279    1.52   | 6.51e-14  1.30e-14  9.07e-15 |
 GODE |   288     0     0   288    1.20   | 5.27e-14  2.09e-14  1.05e-14 |
 PIE1 |   288     0     0   288    0.72   | 3.71e-14  7.23e-15  4.35e-15 |
 FAIR |   288     0     0   288    0.35   | 1.41e-13  3.96e-14  9.79e-15 |
 YEBE |   284     0     3    73    0.33   | 2.20e-13  1.40e-14  9.17e-15 |
 PTBB |   288     0     0   288    0.33   | 2.47e-13  6.82e-14  2.90e-14 |
 NYA1 |   288     1     0   169    0.17   | 3.57e-14  3.82e-14  2.66e-14 |
 TIDB |   288     0     2    56    0.17   | 2.22e-13  2.36e-14  5.99e-15 |
 G22  |   288     0     2   199    0.15   | 5.98e-13  5.82e-14  2.04e-14 |
 HRAO |   288     0     0   288    0.13   | 1.12e-13  2.40e-14  1.57e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.85e-13  1.07e-13  3.60e-14 |
 BAHR |   288     0     0   288    0.11   | 3.57e-13  9.86e-14  3.36e-14 |
 MIZU |   288     0     0   288    0.11   | 3.63e-13  1.05e-13  3.48e-14 |
 G28  |   288     0     1    97    0.10   | 5.19e-13  5.88e-14  1.19e-14 |
 KOKB |   288     0     0   288    0.09   | 7.40e-14  1.88e-14  5.27e-15 |
 CAGZ |   264     0     0   264    0.09   | 5.62e-13  1.12e-13  2.74e-14 |
 G07  |   288     0     0   288    0.08   | 2.70e-13  9.88e-14  6.45e-14 |
 G04  |   288     0     0   288    0.07   | 4.81e-13  1.26e-13  6.63e-14 |
 G30  |   288     0     0   288    0.07   | 3.28e-13  1.11e-13  6.53e-14 |
 BOR1 |   288     0     0   288    0.07   | 4.74e-13  1.01e-13  4.54e-14 |
 G06  |   288     0     0   288    0.07   | 4.13e-13  1.14e-13  9.29e-14 |
 G16  |   288     0     3    56    0.06   | 4.97e-13  5.17e-14  2.18e-14 |
 DWH1 |   288     0     0   288    0.06   | 4.38e-13  1.60e-13  5.48e-14 |
 G14  |   288     0     3    67    0.06   | 5.95e-13  6.38e-14  2.76e-14 |
 G11  |   288     0     2    92    0.05   | 6.21e-13  6.00e-14  4.59e-14 |
 G27  |   288     0     0   288    0.05   | 3.34e-13  1.12e-13  9.00e-14 |
 TLSE |   287     0     0   142    0.05   | 4.14e-13  1.21e-13  3.70e-14 |
 G26  |   288     0     0   288    0.04   | 3.94e-13  1.07e-13  9.01e-14 |
 IENG |   288     0     0   288    0.04   | 5.18e-13  1.69e-13  4.48e-14 |
 G23  |   288     0     2    42    0.04   | 4.77e-13  6.60e-14  2.12e-14 |
 G29  |   288     0     0   288    0.03   | 3.93e-13  1.29e-13  7.31e-14 |
 G17  |   288     0     0   288    0.03   | 5.42e-13  1.55e-13  1.30e-13 |
 STR1 |   288     0     0   288    0.02   | 6.30e-13  1.87e-13  1.10e-13 |
 TSKB |   288     0     0   288    0.02   | 9.20e-13  3.31e-13  8.05e-14 |
 G24  |   288     0     0   288    0.01   | 1.27e-12  3.92e-13  2.71e-13 |
 G05  |   288     0     0   288    0.01   | 1.25e-12  3.77e-13  2.89e-13 |
 G10  |   288     0     0   288    0.01   | 1.19e-12  3.54e-13  2.79e-13 |
 KOUR |   288     0     0   288    0.01   | 1.48e-12  4.97e-13  1.76e-13 |
 KERG |   288     0     0   143    0.00   | 1.20e-12  3.76e-13  9.95e-14 |
 PRDS |   288     0     0   288    0.00   | 1.62e-12  3.66e-13  1.47e-13 |
 G13  |   288     0     3     2    0.00   | 4.78e-13  5.81e-14  2.32e-14 |
 GPST |   288     0     0     0    0.00   | 2.59e-14  4.98e-15  1.27e-15 |
 GUAM |   272     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 SANT |   278     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G25  |   288     0     0     0    0.00   | 1.40e-12  4.52e-13  2.39e-13 |
 G21  |   288     1     6     0    0.00   | 8.69e-13  1.29e-13  4.15e-14 |
 G20  |   288     0     6     0    0.00   | 6.00e-13  7.33e-14  2.81e-14 |
 G19  |   288     0     5     0    0.00   | 5.94e-13  6.69e-14  1.57e-14 |
 G18  |   288     0     6     0    0.00   | 1.57e-12  1.35e-13  3.35e-14 |
 G15  |   288     0     0     0    0.00   | 1.48e-12  5.65e-13  2.91e-13 |
 G09  |   275     0     0     0    0.00   | 1.32e-12  5.94e-13  2.69e-13 |
 G08  |   288     0     0     0    0.00   | 1.34e-12  5.19e-13  2.71e-13 |
 G03  |   288     0     0     0    0.00   | 1.25e-12  4.06e-13  1.25e-13 |
 G02  |   288     0     6     0    0.00   | 5.17e-13  5.39e-14  1.92e-14 |
 G01  |   288     0     0     0    0.00   | 1.69e-12  6.20e-13  7.02e-13 |
 ZIMM |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     2     0     0    0.00   |        -         -         - |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.29e-13  3.05e-13  1.90e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     1     1     0    0.00   | 4.14e-13  2.56e-13  7.94e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REYK |   287     2     0     0    0.00   |        -         -         - |
 QAQ1 |   274     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   209     0     0     0    0.00   |        -         -         - |
 PERT |   285     0     0     0    0.00   | 1.95e-12  5.12e-13  3.41e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   286     1     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   272     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.80e-12  5.06e-13  2.40e-13 |
 MALI |   287     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   | 7.69e-13  6.61e-13  1.34e-12 |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.72e-13  5.70e-13  1.66e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     1     0     0    0.00   |        -         -         - |
 HLFX |   288     0     0     0    0.00   | 2.79e-13  1.78e-13  9.12e-13 |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   208     0     0     0    0.00   | 2.86e-13  8.96e-13         - |
 DAKA |   252     0     0     0    0.00   |        -         -         - |
 CRO1 |   287     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.08e-13  5.71e-13  1.16e-12 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   264     0     0     0    0.00   |        -         -         - |
 ARTU |   211     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.84e-17  2.20e-16  1.32e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NPLD      BRUS      BRUS |
------------------------------------------+------------------------------+
