
 GPS week: 1304   Day: 1   MJD: 53373                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2688      0     0.01    -0.03     3.22     0.00      0
 cod |   288     0  26937     93    -0.33     0.13     0.05    16.04      0
 emr |   288     0  22590      0  2222.53    53.71     0.03    23.71      0
 esa |   288     0  18493    460  6231.30    62.88     0.07     8.46      0
 gfz |   288     0  20451    892    -0.38     0.42     0.03    22.80      0
 iga |    96     0   2688     15     0.00     0.01     0.10     0.00      0
 igu |    96     0   2688      0     0.01    -0.04     2.85     0.00      0
 jpl |   288     0  17377     69    -3.24     2.64     0.05    13.32      0
 ngs |    96     0   2688      0     0.02    -0.04     2.86     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33836   3017  2222.61    53.71     0.05    15.67      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  -323   -10   -77   -38    27    36  2828    16  -370     -    93 |
    3 |   839  -120   -54     7   135    74  5574   -87  1824     -    77 |
    4 |  -816   116   -16    42    -2   -33  1819   175  -759     -  -266 |
    5 |   220   -39   -46    17    94     5 11340    40 -1061     -   -71 |
    6 |  1463    -1  -110   -22   166  -139 -6650  -109   -26     -    31 |
    7 | -2152    86   -74    16    68   124 -1681    70 -2043     -  -144 |
    8 | -3071    50   -28   114    52    66   577     5 -3346     -  -150 |
    9 | -5301    57   -91   116    34  -219-10470   139 -4577     -  -139 |
   10 | -4868    88    13     8     1   120 -5130     1 -2567     -  -117 |
   11 |  3585    70   -80    85   -34   111   776   163  4221     -   -86 |
   13 |  3580   105    62   170  -211     8  1463   153  4025     -  -116 |
   14 |  4843   -54   -84   -32    23   -39  3148    95  4465     -    86 |
   15 | -4133  -136   135    61     X   131 -7306   -67 -3761     -   -36 |
   16 |  5292  -160  -171    16   115   -38  1683   127  4990     -   150 |
   17 |  1192    52    35   250  -139    -5  4352    60    12     -   -80 |
   18 |  5140   -35  -103    95    21    -9  1311    76  4846     -    45 |
   19 |  4677   -99  -347    41   278   726  3565   102  4843     -   113 |
   20 |  4977   -41  -180   -44   148    -4   955   129  4895     -    13 |
   21 |  4770   -17   -50    79    10    90  1253    41  4371     -     2 |
   22 |  2205   -29    85   101  -138   -35  -717    64   734     -    -7 |
   23 |   559   -12  -156    66    24  -126  -686    85   546     -   106 |
   24 |  4783    57    33    50    28  -151  2854    38  2233     -  -213 |
   25 | -9799  -114   -12   -24   115  -318 -3985   -62 -9014     -    32 |
   26 | -3750    87    14   -60   -30   -75  -681   105 -3487     -  -130 |
   27 | -5414    56    16     9    29  -273 -1529    -1 -4477     -  -129 |
   28 | -4571    84   -46    62   -11    81 -3136    54 -2729     -   -81 |
   29 | -4503    45   -18    41   -49   -80  -562   151 -4040     -   -98 |
   30 |   580   -94   -31   106    67   -37  -965    20   255     -   -28 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -   -18     -     -     -     -    84     -     -   -44 |
 ALGO |     -   -50    16   261     -     -     -   -11     -     -  -104 |
 ALRT |     -   -39     -     -    27     -     -     -     -     -     - |
 AMC2 |     -   -56   134     -     -     -     -  -244     -     -    65 |
 AREQ |     -   -33    22   349   -35     -     -  -192     -     -    26 |
 ARTU |     -   228     -   128  -129     -     -  -135     -     -     X |
 ASPA |     -     -     -     -   -11     -     -  -240     -     -   208 |
 AUCK |     -     -     -   233     -     -     -     -     -     -  -126 |
 BOGT |     -    13     -   -34    23     -     -     -     -     -   -28 |
 BOR1 |     -     2    -2     -     -     -     -     -     -     -     0 |
 BRUS |     -   -64    18     -     -     -     -     -     -     -    37 |
 CAS1 |     -   -52     -    74     4     -     -     -     -     -     7 |
 CEDU |     -     -     -  -589     -     -     -     -     -     -   318 |
 CHAT |     -   -11     -     -     4     -     -     -     -     -     6 |
 COCO |     -    -2     -  -209    -5     -     -     -     -     -   121 |
 CRO1 |     -    73    50    43   -92     -     -    34     -     -   -66 |
 DAEJ |     -     -   -46     -     -     -     -     -     -     -    69 |
 DAV1 |     -     -     -     -     X     -     -   206     -     -  -175 |
 DGAR |     -   -44     -     -     -     -     -    53     -     -     X |
 DRAO |     -   -77   -49   559     -     -     -   -44     -     -  -111 |
 DWH1 |     -   137   -17     -     -     -     -     -     -     -  -115 |
 FLIN |     -    75     -     -     -     -     -   -90     -     -     - |
 GLPS |     -   -18     -   -12    11     -     -     -     -     -     9 |
 GODE |     -     -    50   254     -     -     -   -18     -     -  -197 |
 GOL2 |     -     -     -     -     -     -     -    -3     -     -     3 |
 GOLD |     -    32     -  -165     -     -     -    45     -     -     X |
 GRAZ |     -     -    16     -     -     -     -     -     -     -   -24 |
 HARB |     -   -20     -     -     -     -     -     -     -     -    21 |
 HERS |     -   -78    53     -     -     -     -     -     -     -     X |
 HLFX |     -     -   167     -     -     -     -  -298     -     -     X |
 HOB2 |     -    35   156  -239     -     -     -     -     -     -  -142 |
 HOFN |     -     -     -     -  -157     -     -     -     -     -   228 |
 HOLM |     -   137     -     -     -     -     -  -165     -     -     - |
 HRAO |     -     -     -     -  -102     -     -   116     -     -    51 |
 IISC |     -   -93     -  -133   114     -     -     -     -     -     - |
 ISPA |     -   -68     -     -   117     -     -  -189     -     -    59 |
 JPLM |     -     -    21     -     -     -     -   -16     -     -   -21 |
 KERG |     -     -   -30  -159    21     -     -     -     -     -   101 |
 KGN0 |     -   -18    -9     -     -     -     -     -     -     -    33 |
 KIRU |     -     0     -     -     -     -     -     -     -     -    -1 |
 KOSG |     -   -79     -     -     -     -     -     -     -     -    80 |
 KOUR |     -   203     -  -423   -26     -     -     -     -     -    59 |
 MAC1 |     -  -105     -    31    18     -     -     -     -     -    64 |
 MAD2 |     -     -   -45     -     -     -     -     -     -     -    68 |
 MADR |     -     -     -     -     -     -     -    17     -     -   -14 |
 MALI |     -    83     -  -158     -     -     -     -     -     -     X |
 MAS1 |     -     -    33    -1   -58     -     -     -     -     -    36 |
 MATE |     -   235     -  -572     -     -     -     -     -     -    64 |
 MAW1 |     -     -     -     -   -51     -     -     -     -     -    75 |
 MBAR |     -  -108     -     -   -57     -     -    46     -     -   155 |
 MCM4 |     -   159  -107     -     X     -     -     -     -     -     - |
 MDO1 |     -     -   -52     -     -     -     -     -     -     -    78 |
 MEDI |     -     -   -27     -     -     -     -     -     -     -    41 |
 MKEA |     -     -     -    53  -102     -     -    47     -     -    81 |
 MSKU |     -   -31     -     -    22     -     -     -     -     -     - |
 NANO |     -   148     -     -     -     -     -  -178     -     -     - |
 NISU |     -    -5    39     -   -37     -     -     -     -     -     - |
 NKLG |     -     -     -     -   -95     -     -     -     -     -   138 |
 NLIB |     -     -    76     -     -     -     -   -10     -     -  -107 |
 NNOR |     -     -    13   -22     -     -     -     -     -     -    -7 |
 NOT1 |     -   -43     -     -     -     -     -     -     -     -    44 |
 NPLD |     -  -111    58     -     -     -     -     -     -     -    25 |
 NRC1 |     -     -    -5     -   -62     -     -     -     -     -    97 |
 NSSP |     -   -24     -     -     -     -     -     -     -     -    24 |
 NTUS |     -   -47     -  -130    -3     -     -     -     -     -   121 |
 NYA1 |     -   110     -     -  -109     -     -     -     -     -    47 |
 OHI2 |     -   143     -    49    13     -     -     -     -     -  -192 |
 ONSA |     -   -90    66    88   -46     -     -     -     -     -     X |
 PDEL |     -   -20     -     -    14     -     -     -     -     -     - |
 PERT |     -     -    17  -508   139     -     -     -     -     -    46 |
 PIE1 |     -   -85    46   -62     -     -     -     -     -     -    51 |
 POL2 |     -    77     -     -     -     -     -   -93     -     -     X |
 PRDS |     -     -     9     -     -     -     -     -     -     -   -13 |
 PTBB |     -    17     6     -     -     -     -     -     -     -   -26 |
 QAQ1 |     -   -98    79     -     -     -     -     -     -     -   -18 |
 REYK |     -    -5     -     -     -     -     -     -     -     -     6 |
 SANT |     -     -     -   -21     8     -     -     -     -     -     X |
 SCH2 |     -    39    19     -     -     -     -  -116     -     -    30 |
 SHAO |     -     -     -   -98     -     -     -     -     -     -    53 |
 SPT0 |     -  -118    72     -     -     -     -     -     -     -    12 |
 STJO |     -     -    46     -   -66     -     -    31     -     -     X |
 THTI |     -     -    77    98     8     -     -     -     -     -  -180 |
 THU3 |     -   -25   108     -     -     -     -     -     -     -  -138 |
 TID1 |     -     -     -     -     -     -     -    32     -     -   -27 |
 TIDB |     -    65   -21    23     -     -     -     -     -     -   -46 |
 TIXI |     -    39     -   -31   -16     -     -     -     -     -     X |
 TLSE |     -     -    19     -     -     -     -   -78     -     -    38 |
 TOW2 |     -    32     -     -   -28     -     -     -     -     -     8 |
 TRO1 |     -   116     -     -   -58     -     -     -     -     -   -34 |
 TSKB |     -   -56   -53    68    43     -     -     -     -     -    40 |
 TWTF |     -  -170    41     -     -     -     -     -     -     -   112 |
 USN3 |     -   -32     -     -     -     -     -   -13     -     -    44 |
 USNO |     -   -98    51     -     -     -     -     -     -     -    23 |
 USUD |     -     -   -84    23    74     -     -    85     -     -   -65 |
 VILL |     -    73     -  -379   -45     -     -     -     -     -   195 |
 WHIT |     -    50     -     -   -26     -     -  -106     -     -    78 |
 WILL |     -   -23    88     -     -     -     -     -     -     -  -110 |
 WROC |     -     -    89     -     -     -     -  -159     -     -     - |
 WTZR |     -   -82   141   -39     -     -     -     -     -     -  -108 |
 YAR2 |     -   -59    70     -     -     -     -     -     -     -   -45 |
 YEBE |     -     -   -19     -     -     -     -     -     -     -    29 |
 YELL |     -   -60    12     X   -72     -     -     -     -     -   148 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6721    54    39    42    24   105  4176    56  6984     -    49 |  288   6.22
    3 |  5337    29    23    57    50    95  4614   112  4154     -    83 |  288   1.97
    4 |   925   127    69   160    52   152   991    54   872     -    74 |  288   0.93
    5 |  4997    40    18    34    24   122  8191    77  3630     -    36 |  288   1.46
    6 |  3021    32    18    49    17    33  4830    33  2293     -    41 |  288   1.61
    7 |   762    28    16    50    25    27   686    57   630     -    80 |  288   0.69
    8 |  4094    77    33    54    38    29  2701    43  3997     -    37 |  288   2.92
    9 |  2767   135    58    93    58   174  3627    76  2451     -    95 |  288   1.83
   10 |  7219    58    26   100    22   111  3275    42  6162     -    62 |  288   3.48
   11 |  1323    60    45    74    35    48   557    56  1158     -    92 |  288   0.32
   13 |   945    50    38    46    25    85  1257    32   824     -    55 |  288   0.20
   14 |   650    47    24    49    16    52  1413    33   812     -    55 |  288   0.18
   15 |  2754   119    48   110     X   134  3281    49  3036     -   112 |  288   2.81
   16 |   655    48    64    39    35    37   601    66   970     -    87 |  288   0.39
   17 |  3220   122    40   169    52   101  3102    86  3071     -    54 |  288   1.48
   18 |  1009    46    21    76    23    78   540    41   780     -    55 |  288   0.37
   19 |   870    41    34    50    31    83  1223    88   683     -    66 |  288   0.28
   20 |   479    58    26    49    54   122   639    64   395     -    59 |  288   0.28
   21 |  1015    49   101    39    33    48   552    58   758     -   117 |  288   0.33
   22 |  3268    65    55   104    26    49  1214    48  1952     -    79 |  288   0.31
   23 |   635    56    22    35    28    85   545    43   567     -    45 |  288   0.23
   24 |  7540   126    50   164    79   256  5676    49  5960     -    88 |  288   3.80
   25 |  1554   149    64   134    59   121  1727    58  2484     -    54 |  288   1.33
   26 |   892    42    29    82    16    86   673    95   986     -   100 |  288   0.86
   27 |   758   145    75    92    73   111   484    40  1367     -    69 |  288   0.93
   28 |  2879    34    51    30    44    41  1655    38  3352     -    63 |  288   0.30
   29 |  1318    40    26    76    21    56   472    58  1141     -    83 |  288   1.15
   30 |  1041    44    20    36    21    44   716    50   765     -    43 |  288   0.64
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    11     -     -     -     -    22     -     -    16 |  288   0.05
 ALGO |     -    23    14    22     -     -     -    16     -     -    10 |  288   0.02
 ALRT |     -    25     -     -    17     -     -     -     -     -     - |  288   6.14
 AMC2 |     -    23    17     -     -     -     -    30     -     -    29 |  285   0.03
 AREQ |     -    54    41    61    32     -     -    42     -     -    25 |  288  12.06
 ARTU |     -    32     -   118    68     -     -    40     -     -     X |  270  11.23
 ASPA |     -     -     -     -    47     -     -    62     -     -    37 |  288    >>>
 AUCK |     -     -     -    99     -     -     -     -     -     -    53 |  163   9.58
 BOGT |     -    20     -    37    19     -     -     -     -     -    28 |  288  17.48
 BOR1 |     -    35    21     -     -     -     -     -     -     -    13 |  288   0.77
 BRUS |     -    25    24     -     -     -     -     -     -     -    19 |  288   0.04
 CAS1 |     -    27     -    59    16     -     -     -     -     -    37 |  288   6.58
 CEDU |     -     -     -    42     -     -     -     -     -     -    23 |  104  11.67
 CHAT |     -    35     -     -    32     -     -     -     -     -    46 |  287  11.37
 COCO |     -    35     -    53    26     -     -     -     -     -    38 |  288  10.83
 CRO1 |     -    52    26    45    56     -     -    30     -     -    47 |  288  16.53
 DAEJ |     -     -    13     -     -     -     -     -     -     -    20 |  287    >>>
 DAV1 |     -     -     -     -     X     -     -    62     -     -    53 |  283  27.80
 DGAR |     -    32     -     -     -     -     -    38     -     -     X |  287  17.79
 DRAO |     -    50    21    26     -     -     -    34     -     -    18 |  288   0.06
 DWH1 |     -    23    12     -     -     -     -     -     -     -    19 |  288   0.65
 FLIN |     -    27     -     -     -     -     -    32     -     -     - |  288  11.73
 GLPS |     -    34     -    36    34     -     -     -     -     -    19 |  288  23.44
 GODE |     -     -    16    38     -     -     -    17     -     -    10 |  288   0.10
 GOL2 |     -     -     -     -     -     -     -    75     -     -    63 |  261 872.88
 GOLD |     -    48     -   139     -     -     -    37     -     -     X |  267  11.86
 GRAZ |     -     -    10     -     -     -     -     -     -     -    15 |  288    >>>
 HARB |     -    36     -     -     -     -     -     -     -     -    37 |  287  27.02
 HERS |     -    24    16     -     -     -     -     -     -     -     X |  241  10.72
 HLFX |     -     -    10     -     -     -     -    18     -     -     X |  288  12.60
 HOB2 |     -    26    35    69     -     -     -     -     -     -    56 |  288   0.04
 HOFN |     -     -     -     -    17     -     -     -     -     -    24 |  287    >>>
 HOLM |     -    78     -     -     -     -     -    94     -     -     - |  287   7.35
 HRAO |     -     -     -     -    51     -     -    35     -     -    84 |  281    >>>
 IISC |     -    33     -    33    20     -     -     -     -     -     - |  288  27.18
 ISPA |     -    26     -     -    28     -     -    49     -     -    38 |  288  16.11
 JPLM |     -     -    19     -     -     -     -    31     -     -    17 |  288   7.78
 KERG |     -     -    37    84    40     -     -     -     -     -    23 |  288   2.36
 KGN0 |     -    27    17     -     -     -     -     -     -     -    17 |  287   0.73
 KIRU |     -    10     -     -     -     -     -     -     -     -    10 |  288   6.77
 KOSG |     -    22     -     -     -     -     -     -     -     -    22 |  288 125.83
 KOUR |     -    34     -    41    36     -     -     -     -     -    26 |  288   2.39
 MAC1 |     -    29     -    48    14     -     -     -     -     -    32 |  288  22.65
 MAD2 |     -     -     8     -     -     -     -     -     -     -    12 |  288   0.07
 MADR |     -     -     -     -     -     -     -    25     -     -    21 |  284  10.89
 MALI |     -    29     -    55     -     -     -     -     -     -     X |  288  20.32
 MAS1 |     -     -    28    61    19     -     -     -     -     -    26 |  287   3.25
 MATE |     -    22     -    27     -     -     -     -     -     -    24 |  288   0.14
 MAW1 |     -     -     -     -    20     -     -     -     -     -    29 |  287  10.08
 MBAR |     -    70     -     -    41     -     -   145     -     -    49 |  288  16.47
 MCM4 |     -    79    53     -     X     -     -     -     -     -     - |  286    >>>
 MDO1 |     -     -    46     -     -     -     -     -     -     -    70 |  275 322.79
 MEDI |     -     -     6     -     -     -     -     -     -     -     9 |  288   0.08
 MKEA |     -     -     -   119    29     -     -    66     -     -    45 |  288  19.91
 MSKU |     -    20     -     -    14     -     -     -     -     -     - |  288  12.63
 NANO |     -    26     -     -     -     -     -    31     -     -     - |  288  46.89
 NISU |     -    20    14     -    15     -     -     -     -     -     - |  288   0.04
 NKLG |     -     -     -     -    36     -     -     -     -     -    53 |  287    >>>
 NLIB |     -     -    16     -     -     -     -    17     -     -    29 |  288   0.04
 NNOR |     -     -    29    92     -     -     -     -     -     -    57 |  287  13.62
 NOT1 |     -    18     -     -     -     -     -     -     -     -    18 |  288   0.14
 NPLD |     -    36    39     -     -     -     -     -     -     -    28 |  287   0.04
 NRC1 |     -     -    12     -    17     -     -     -     -     -    19 |  288   0.02
 NSSP |     -    28     -     -     -     -     -     -     -     -    28 |  288  10.53
 NTUS |     -    23     -    44    32     -     -     -     -     -    36 |  288  10.30
 NYA1 |     -    15     -     -    21     -     -     -     -     -    34 |  288   0.07
 OHI2 |     -    25     -   135    34     -     -     -     -     -   100 |  288   7.84
 ONSA |     -    14    21    45    24     -     -     -     -     -     X |  288   0.08
 PDEL |     -    21     -     -    15     -     -     -     -     -     - |  288  57.14
 PERT |     -     -    25    63    26     -     -     -     -     -    35 |  285   2.16
 PIE1 |     -    17    13    35     -     -     -     -     -     -    18 |  288   0.05
 POL2 |     -    21     -     -     -     -     -    26     -     -     X |  288  12.89
 PRDS |     -     -     9     -     -     -     -     -     -     -    14 |  288   1.85
 PTBB |     -    12    19     -     -     -     -     -     -     -    31 |  288   0.31
 QAQ1 |     -    23    19     -     -     -     -     -     -     -    10 |  288   8.52
 REYK |     -    12     -     -     -     -     -     -     -     -    12 |  288   8.26
 SANT |     -     -     -    64    24     -     -     -     -     -     X |  142   4.86
 SCH2 |     -    17    13     -     -     -     -    10     -     -    14 |  288  74.35
 SHAO |     -     -     -    56     -     -     -     -     -     -    30 |  288  19.11
 SPT0 |     -    24    24     -     -     -     -     -     -     -    25 |  288   0.05
 STJO |     -     -    13     -    15     -     -    10     -     -     X |  288   0.08
 THTI |     -     -    22    28    26     -     -     -     -     -    54 |  288  21.84
 THU3 |     -    30    18     -     -     -     -     -     -     -    11 |  288   7.46
 TID1 |     -     -     -     -     -     -     -    24     -     -    20 |  287   0.13
 TIDB |     -    26    29    60     -     -     -     -     -     -    50 |  288   0.14
 TIXI |     -    28     -    38    20     -     -     -     -     -     X |  278   6.99
 TLSE |     -     -    19     -     -     -     -    27     -     -    17 |  287   0.56
 TOW2 |     -    25     -     -    20     -     -     -     -     -    22 |  288   9.08
 TRO1 |     -    22     -     -    10     -     -     -     -     -    21 |  288  10.29
 TSKB |     -    45    29    60    25     -     -     -     -     -    25 |  288   1.03
 TWTF |     -    52    31     -     -     -     -     -     -     -    24 |  288   0.07
 USN3 |     -    26     -     -     -     -     -    24     -     -    14 |  288   0.04
 USNO |     -    29    20     -     -     -     -     -     -     -    11 |  288   0.03
 USUD |     -     -    45   109    21     -     -    57     -     -    28 |  288   8.90
 VILL |     -    19     -    28    15     -     -     -     -     -    16 |  288   5.93
 WHIT |     -    52     -     -    24     -     -    40     -     -    32 |  288   2.28
 WILL |     -    28    22     -     -     -     -     -     -     -    16 |  288  38.05
 WROC |     -     -    18     -     -     -     -    31     -     -     - |  288  15.57
 WTZR |     -    26    26    30     -     -     -     -     -     -    22 |  288   0.05
 YAR2 |     -    46    24     -     -     -     -     -     -     -    51 |  288   5.58
 YEBE |     -     -    14     -     -     -     -     -     -     -    21 |  288   0.06
 YELL |     -    41    21     X    31     -     -     -     -     -    52 |  288   0.05
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3218    51    33    75    34   100  2851    54  2860     -    47 |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   285     0     0   284    9.79   | 3.52e-14  5.96e-15  1.43e-15 |
 NRC1 |   288     1     0   287    9.31   | 5.33e-14  7.40e-15  2.62e-15 |
 USNO |   288     0     0   288    8.01   | 3.35e-14  6.53e-15  1.86e-15 |
 BRUS |   288     0     0   288    7.27   | 4.00e-14  5.83e-15  1.83e-15 |
 ALGO |   288     1     0   287    6.84   | 3.26e-14  6.18e-15  2.78e-15 |
 NPLD |   287     0     0   286    6.23   | 3.87e-14  7.98e-15  1.62e-15 |
 ALBH |   288     0     0   288    5.16   | 3.80e-14  9.67e-15  4.64e-15 |
 MAD2 |   288     0     0   287    4.84   | 4.48e-14  8.17e-15  4.84e-15 |
 ONSA |   288     0     0   288    4.32   | 4.21e-14  9.43e-15  5.85e-15 |
 SPT0 |   288     0     0   288    3.66   | 4.08e-14  7.19e-15  4.21e-15 |
 NISU |   288     0     0   288    3.23   | 5.05e-14  6.96e-15  2.86e-15 |
 YELL |   288     1     0   287    3.04   | 4.24e-14  8.49e-15  4.04e-15 |
 USN3 |   288     0     0   288    2.97   | 8.13e-14  1.14e-14  2.89e-15 |
 TWTF |   288     0     0   288    2.97   | 4.23e-14  8.57e-15  7.46e-15 |
 WTZR |   288     0     0   288    2.80   | 3.82e-14  9.27e-15  3.67e-15 |
 STJO |   288     0     0   288    2.55   | 7.57e-14  9.81e-15  3.87e-15 |
 NLIB |   288     0     0   288    2.49   | 3.65e-14  7.72e-15  1.84e-15 |
 MEDI |   288     1     0   287    2.40   | 4.11e-14  9.21e-15  6.79e-15 |
 MATE |   288     0     0   288    2.07   | 5.21e-14  1.20e-14  1.10e-14 |
 NYA1 |   288     0     0   288    2.04   | 2.75e-14  5.97e-15  5.69e-15 |
 PIE1 |   288     1     0   287    1.86   | 4.23e-14  8.05e-15  4.70e-15 |
 HOB2 |   288     0     0   288    1.29   | 4.26e-14  9.14e-15  4.10e-15 |
 DRAO |   288     0     0   288    0.89   | 6.13e-14  1.51e-14  4.00e-15 |
 GODE |   288     0     0   288    0.70   | 4.21e-14  8.75e-15  1.06e-14 |
 TIDB |   288     0     0   200    0.67   | 2.11e-13  3.02e-14  8.81e-15 |
 GOL2 |   261     2     0   126    0.57   | 1.34e-13  3.96e-14         - |
 NOT1 |   288     0     0   143    0.54   | 3.84e-14  1.94e-14  1.25e-14 |
 TID1 |   287     0     0   141    0.49   | 6.39e-14  1.41e-14  6.45e-15 |
 PTBB |   288     0     0   288    0.17   | 2.96e-13  6.61e-14  3.71e-14 |
 KGN0 |   287     0     0   286    0.08   | 3.98e-13  1.23e-13  8.89e-14 |
 G26  |   288     0     0   288    0.08   | 3.90e-13  1.01e-13  7.09e-14 |
 TLSE |   287     0     0   286    0.08   | 4.30e-13  1.19e-13  4.46e-14 |
 G07  |   288     0     0   288    0.06   | 2.69e-13  8.74e-14  7.69e-14 |
 G23  |   288     0     6    33    0.05   | 4.82e-13  5.25e-14  2.01e-14 |
 G30  |   288     0     0   288    0.05   | 3.04e-13  1.00e-13  6.73e-14 |
 G22  |   288     0     5    53    0.05   | 6.68e-13  6.77e-14  2.76e-14 |
 G06  |   288     0     0   288    0.04   | 4.04e-13  1.16e-13  1.03e-13 |
 DWH1 |   288     0     0   288    0.04   | 5.31e-13  1.47e-13  7.49e-14 |
 G04  |   288     0     0   288    0.04   | 4.94e-13  1.29e-13  8.98e-14 |
 G16  |   288     0     3    49    0.04   | 5.09e-13  5.09e-14  4.69e-14 |
 BOR1 |   288     0     0   288    0.03   | 4.29e-13  1.67e-13  7.12e-14 |
 G27  |   288     0     0   288    0.03   | 3.58e-13  1.13e-13  1.27e-13 |
 G11  |   288     0     4    35    0.02   | 6.63e-13  6.61e-14  3.49e-14 |
 HRAO |   281     3     1   258    0.02   | 7.56e-13  7.76e-13  2.23e-13 |
 G29  |   288     0     0   288    0.02   | 4.36e-13  1.33e-13  1.50e-13 |
 G17  |   288     0     0   288    0.02   | 3.81e-13  1.13e-13  1.33e-13 |
 TSKB |   288     0     0   288    0.01   | 1.06e-12  3.24e-13  9.16e-14 |
 G13  |   288     0     4    14    0.01   | 5.25e-13  5.45e-14  1.65e-14 |
 G25  |   288     0     0   288    0.01   | 1.39e-12  3.69e-13  1.04e-13 |
 G05  |   288     0     0   288    0.01   | 1.52e-12  4.80e-13  9.14e-14 |
 KERG |   288     0     0   288    0.00   | 1.16e-12  3.87e-13  1.98e-13 |
 G08  |   288     0     0   288    0.00   | 1.33e-12  4.25e-13  3.19e-13 |
 KOUR |   288     0     0   288    0.00   | 1.44e-12  3.49e-13  1.67e-13 |
 PERT |   285     0     0   284    0.00   | 1.71e-12  5.03e-13  2.58e-13 |
 PRDS |   288     0     0   143    0.00   | 1.58e-12  3.78e-13  1.72e-13 |
 HLFX |   288     0     0   288    0.00   | 1.97e-13  1.43e-13  7.56e-13 |
 GPST |   288     0     0     0    0.00   | 2.00e-14  3.84e-15  2.04e-15 |
 CEDU |   104     0     0     0    0.00   |        -         -         - |
 SANT |   142     0     0     0    0.00   |        -         -         - |
 TIXI |   278     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   163     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.24e-13  8.18e-14  3.27e-14 |
 G24  |   288     0     0     0    0.00   | 1.32e-12  5.35e-13  3.04e-13 |
 G21  |   288     0     6     0    0.00   | 8.85e-13  1.17e-13  2.79e-14 |
 G20  |   288     0     6     0    0.00   | 6.36e-13  7.20e-14  2.66e-14 |
 G19  |   288     0     6     0    0.00   | 7.31e-13  7.33e-14  2.79e-14 |
 G18  |   288     0     6     0    0.00   | 1.53e-12  1.41e-13  2.70e-14 |
 G15  |   288     0     0     0    0.00   | 1.40e-12  5.72e-13  2.30e-13 |
 G14  |   288     0     6     0    0.00   | 5.96e-13  7.08e-14  1.51e-14 |
 G10  |   288     0     0     0    0.00   | 1.17e-12  3.56e-13  3.48e-13 |
 G09  |   288     0     0     0    0.00   | 1.30e-12  5.21e-13  1.49e-13 |
 G03  |   288     0     0     0    0.00   | 1.35e-12  4.58e-13  2.27e-13 |
 G01  |   288     0     0     0    0.00   | 1.58e-12  6.47e-13  7.81e-13 |
 YEBE |   288     2     3     0    0.00   | 1.91e-13  1.05e-14  8.81e-15 |
 YAR2 |   288     0     0     0    0.00   | 8.64e-13  1.30e-12  3.64e-13 |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.44e-13  2.54e-13  1.93e-13 |
 VILL |   288     0     0     0    0.00   | 1.13e-12  8.34e-13  4.50e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.93e-13  3.23e-13  1.47e-12 |
 SHAO |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   287     0     0     0    0.00   |        -         -         - |
 NANO |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   275     0     0     0    0.00   |        -         -         - |
 MCM4 |   286     0     1     0    0.00   | 6.08e-13  3.75e-13  6.45e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   287     0     0     0    0.00   |        -         -         - |
 MAS1 |   287     0     0     0    0.00   | 1.91e-12  5.80e-13  2.77e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   284     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 7.36e-13  3.09e-13  5.90e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   287     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   267     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 DAV1 |   283     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.38e-13  7.27e-13  1.01e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   270     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.43e-17  2.91e-16  1.75e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      BRUS      AMC2 |
------------------------------------------+------------------------------+
