
 GPS week: 1303   Day: 0   MJD: 53365                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2865     32    -0.23     0.52     2.92     0.00      0
 cod |   288     0  28379    326     1.31    -1.89     0.05    18.25      0
 emr |   288     0  12887      1  1812.72    51.34     0.05    18.55      0
 esa |   288     0  19526   2232  1811.85    51.25     0.07     9.81      0
 gfz |   288     0  21565    274    -0.01     0.00     0.04    19.40      0
 iga |    96     0   2773     61     1.19    -1.68     0.08     0.00      0
 igu |    96     0   2865     76     1.01    -4.44     2.90     0.00      0
 jpl |   288     0  17764     48    -4.01    -0.28     0.05    17.33      0
 ngs |    96     0   2865     21     0.33    -0.15     2.74     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33284   3190  1812.61    51.34     0.05    16.65      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  1714    67   -87     3   -11    63 -6889    65  1198     -   -33 |
    2 |  1043   -52   -30   124   -46   -48  -679    92   904     -   -26 |
    3 |  2359  -131    63   -44   -15   -49  2915    80  2411     -    33 |
    4 | -1368    97   -20    89   -82  -109 -1386    70 -1163     -  -120 |
    5 | -5662  -106   -18   288    35    93  -135   -24 -4549     -   -48 |
    6 | -4547     8    -9   -10    12   -75 18152    26 -4046     -   -35 |
    7 |  1512    33   -82  -214   171    56  -143    38  1393     -   -58 |
    8 | -8230   -62   -27   -57   160    46-12869   -74 -7821     -    23 |
    9 |  -494    -7   -98    56    23  -206 -5399    72  -794     -   -18 |
   10 | -1656   -78    -7    69    73    65 -1041    30 -1476     -   -64 |
   11 |  6339    90   -38     5   -49   -86  4826    43  6035     -   -48 |
   13 |  2834    93    54    29    -5   -52  1544   -87  2676     -   -87 |
   14 |  5382   -20    55   215   -17     4   453   -10  5146     -  -135 |
   15 |  2034     X    21     X   -51   240  7229    51  1192     -   -18 |
   16 |  7446   -74     6   -64   -95   -30   473   195  7399     -    20 |
   17 | -4124   -98   -34     X   137    66  5864    48 -3981     -   -88 |
   18 |  2981   -14    43  -267   -48   -36    36   136  2907     -    40 |
   19 |  4624   -20  -216   -18   145  1042  1280   119  4683     -   -20 |
   20 |  3532    54     -  -280   147   -74  1442    30  3564     -   -96 |
   21 |  5638    -3    84  -130   -58   -53  -410   124  5525     -   -77 |
   22 | -3954   -12   180  -163  -132  -179 -1507    95 -3605     -   -35 |
   23 | -2695    18     3   -27    12  -105 -1233    34 -2519     -   -57 |
   24 |  4269     -    22     X     -     -  7197     1  4156     -   -27 |
   25 | -8884   -98    -8   214     6  -125 -6732    25 -8927     -   -42 |
   26 | -4327   -43   -46    65    45  -149 -1929    64 -4506     -   -58 |
   27 |  1294   -71     6    71   114    -4 -1560   -45  1205     -   -57 |
   28 |  3281    -1    76  -188   146    57 10561   -52  3100     -   -92 |
   29 | -3029   -68   -24   -15    94   -99 -3830    51 -3179     -   -50 |
   30 | -2185   -54    83   214   -39     8 -1631   -60 -2214     -   -51 |
   31 | -6411    11   -74  -222   152  -114   634   102 -5441     -   -83 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    45     -     -     -     -     -   -17     -     -   -32 |
 ALGO |     -   -93   -52     X     -     -     -   136     -     -    20 |
 AMC2 |     -    23     -     -     -     -     -  -172     -     -   154 |
 AREQ |     -   -38   100     -   -11     -     -  -107     -     -    55 |
 ARTU |     -   191     -   178  -127     -     -  -159     -     -     X |
 ASPA |     -     -     -     -    35     -     -  -233     -     -   181 |
 AUCK |     -   -37     -     X     -     -     -     -     -     -    41 |
 BILI |     -    81     -     -   -76     -     -     -     -     -     X |
 BJFS |     -  -127     -     -     -     -     -     -     -     -   139 |
 BOGT |     -    70     -    68   -39     -     -     -     -     -   -72 |
 BOR1 |     -    32     -     -     -     -     -     -     -     -   -35 |
 BREW |     -     -     -     -     -     -     -  -177     -     -   185 |
 BRUS |     -   -66     -     -     -     -     -     -     -     -    73 |
 CAGZ |     -   124     -     -     -     -     -     -     -     -  -136 |
 CAS1 |     -     6     -   -32   -62     -     -     -     -     -    84 |
 CEDU |     -     -     -   -13     -     -     -     -     -     -     8 |
 CHAT |     -     0     -     -   -67     -     -     -     -     -    79 |
 COCO |     -   114     -    -4  -105     -     -     -     -     -     - |
 CRO1 |     -     -    25   122   -23     -     -     1     -     -   -73 |
 DAV1 |     -    34     -     -   -27     -     -     -     -     -    -6 |
 DGAR |     -   -44     -     -     -     -     -    47     -     -     X |
 DRAO |     -   -64  -155   444     -     -     -    27     -     -   -47 |
 DUBO |     -    84     -     -     -     -     -   -88     -     -     - |
 DWH1 |     -   106     -     -     -     -     -     -     -     -  -117 |
 FLIN |     -    75     -     -     -     -     -   -79     -     -     - |
 GLPS |     -    -7     -     -   -39     -     -     -     -     -    53 |
 GODE |     -     -     -   184     -     -     -     -     -     -  -108 |
 GOLD |     -  -130     -   173     -     -     -   -36     -     -    94 |
 GUAM |     -    81     -  -317    24     -     -  -106     -     -   180 |
 HARB |     -     9     -     -     -     -     -  -136     -     -   131 |
 HOB2 |     -    72     -     9     -     -     -  -108     -     -    28 |
 HOFN |     -     -     -     -  -147     -     -     -     -     -   171 |
 HRAO |     -     -     -     -     -     -     -   -10     -     -    10 |
 IISC |     -    68     -  -187    31     -     -     -     -     -     - |
 INVK |     -   -21     -     -     -     -     -    22     -     -     X |
 ISPA |     -   -66     -     -    29     -     -   -62     -     -   103 |
 JPLM |     -     -     -     -  -150     -     -   120     -     -    50 |
 KERG |     -   -39   -63   100    97     -     -     -     -     -   -59 |
 KGN0 |     -   -41     -     -     -     -     -     -     -     -    45 |
 KIT3 |     -     -     -   -31    29     -     -   -15     -     -     X |
 KOUR |     -     -     -   -60    15     -     -     -     -     -    18 |
 LPGS |     -    18   127  -469     -     -     -     -     -     -   114 |
 MAC1 |     -    19     -   -54     9     -     -     -     -     -     X |
 MADR |     -     -     -     -     -     -     -    71     -     -   -74 |
 MALI |     -    53     -     9    15     -     -     -     -     -   -80 |
 MAS1 |     -     -     1    10   -71     -     -    51     -     -    23 |
 MATE |     -   115     -  -382     -     -     -     -     -     -    99 |
 MBAR |     -     9     -     -    10     -     -  -121     -     -   105 |
 MCM4 |     -   227  -223     -     X     -     -     -     -     -     - |
 MDO1 |     -     -   -25     -     -     -     -     -     -     -    28 |
 MEDI |     -    21     -     -     -     -     -     -     -     -   -23 |
 METS |     -   -81     -     -     -     -     -     -     -     -    89 |
 MIZU |     -     -     -   271     -     -     -     -     -     -  -159 |
 NISU |     -   -26     -     -    24     -     -     -     -     -     - |
 NKLG |     -     -     -  -158   -29     -     -     -     -     -   126 |
 NLIB |     -     -     -     -     -     -     -     8     -     -    -9 |
 NNOR |     -     -     -   -97     -     -     -     -     -     -    57 |
 NPLD |     -   -71     -     -     -     -     -     -     -     -    78 |
 NRC1 |     -   154    -2     -   -98     -     -     -     -     -   -52 |
 NRIL |     -    40     -     -    32     -     -   -79     -     -     X |
 NTUS |     -   -10     -    18     -     -     -     -     -     -     - |
 NYA1 |     -    92     -     -   -85     -     -     -     -     -    -1 |
 ONSA |     -     -     -   -19    10     -     -     -     -     -     - |
 PERT |     -     -    35  -206    54     -     -   -11     -     -    31 |
 PETP |     -    38     -     -   -36     -     -     -     -     -     X |
 PIE1 |     -     -     -    48     -     -     -     -     -     -   -28 |
 PIMO |     -     -     -   588     -     -     -     -     -     -  -346 |
 POL2 |     -    19     -     -     -     -     -     -     -     -   -21 |
 POTS |     -   -83     -     -    78     -     -     -     -     -     X |
 PRDS |     -     6     -     -     -     -     -     -     -     -    -6 |
 PTBB |     -    -7     -     -     -     -     -     -     -     -     8 |
 RIOG |     -   -35     -     -   -24     -     -     -     -     -    66 |
 SANT |     -   118     -     X  -111     -     -     -     -     -     - |
 SCH2 |     -    19     -     -     -     -     -  -138     -     -   122 |
 SEY1 |     -     -     -     -   434     -     -     -     -     -  -506 |
 STJO |     -    35    24     -  -100     -     -    18     -     -    32 |
 SUTH |     -  -120     -     -     -     -     -     -     -     -   131 |
 THTI |     -     -   198     8  -115     -     -     -     -     -   -92 |
 THU3 |     -   -10     -     -   129     -     -     -     -     -  -139 |
 TIDB |     -   -86     -   182     -     -     -     -     -     -   -13 |
 TLSE |     -     -     -     -     -     -     -    24     -     -   -25 |
 TOW2 |     -    10     -     -   -10     -     -     -     -     -     X |
 TRO1 |     -    73     -     -   -37     -     -     -     -     -   -35 |
 TSKB |     -   -93    17    57    37     -     -     -     -     -     7 |
 TWTF |     -   -59     -     -     -     -     -     -     -     -    64 |
 UNSA |     -     -     -   -37    33     -     -     -     -     -   -17 |
 URUM |     -   -13     -     -     -     -     -     -     -     -    14 |
 USN3 |     -   -55     -     -     -     -     -    28     -     -    31 |
 USNO |     -   -78    48     -     -     -     -     -     -     -    31 |
 USUD |     -  -102     -   123     -     -     -    38     -     -     X |
 VILL |     -   -21     -     X   -87     -     -     -     -     -   124 |
 WHIT |     -   -16     -     -   -24     -     -     -     -     -    45 |
 WILL |     -     5     -     -     -     -     -     -     -     -    -6 |
 WTZR |     -     7     -   -35     -     -     -     -     -     -    13 |
 WUHN |     -     -     -     -     9     -     -     -     -     -   -11 |
 YELL |     -   -21    57     X   -45     -     -     -     -     -    12 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  7279    54    58   112    22    69  5062    55  7228     -    73 |  288   4.44
    2 |   609    74    37    52    33    67   691    45   600     -    73 |  277   0.55
    3 |  2384   125    36    77    47    67  2071   105  2482     -    73 |  288   1.89
    4 |  1756   156    35   135    87   153   976    66  2012     -   137 |  288   0.85
    5 |  4780    20    53    29    21    51  2717    72  3795     -    23 |  288   2.45
    6 |  2048    36    41    38    27    29  8809    30  2475     -    42 |  288   2.66
    7 |   982    24    33    35    38    51   710    39  1073     -    78 |  288   0.55
    8 |  4882    72    37   123    35    62  5763    38  4132     -    74 |  288   1.95
    9 |  2634    57    45    64    30    71  3060    35  2543     -    62 |  288   1.73
   10 |  3404    47    45    63    39    42  3195    36  3337     -    39 |  288   2.58
   11 |  1381    60    32    41    77   132  2715    27  1182     -    85 |  288   0.43
   13 |  1047    48    51   120    37    58  1159    93  1003     -    39 |  288   0.20
   14 |   644    46    35    85    23    45   522    48   697     -    45 |  288   0.19
   15 |  6430     X    67     X   152   144  3740    68  5442     -   101 |  276   4.50
   16 |  1300    39    63    45    38    57   789    93  1138     -    70 |  288   0.22
   17 |  2210   188    75     X   113   213  5433    75  1894     -   133 |  278   1.45
   18 |   726    46    33    46    54    29   616    34   691     -    69 |  288   0.40
   19 |   460    52    67   119    79    52   677    57   490     -   103 |  288   0.26
   20 |   554    42     -    47    29    63   928    52   504     -    42 |  288   0.24
   21 |   643    76    45    57    79    65   609    51   672     -    80 |  288   0.30
   22 |  1857    50    86    44    32    32   895    52  1707     -    59 |  288   0.31
   23 |  1208    58    53   144    25    89   595    47  1231     -    45 |  288   0.26
   24 |  3602     -    55     X     -     -  3681    92  3636     -   137 |  276   3.14
   25 |  5333    49    40    85    22    57  3905    33  5300     -    50 |  288   2.03
   26 |  1502    48    42   102    48    71  1133    51  1390     -    52 |  288   0.62
   27 |   859    77    37    65    35    34  1091    47   828     -    37 |  288   0.74
   28 |  2743    46    42    58    49   100  6939    96  2826     -   130 |  288   0.49
   29 |   858    56    47    54    32    65  1164    69   827     -    66 |  288   0.76
   30 |   910    27    58    37    33    50  1166    68   877     -    54 |  288   1.01
   31 |  3897    30    27    49    55    38  1619    26  3576     -    72 |  288   1.59
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    16     -     -     -     -     -    11     -     -    16 |  288   0.04
 ALGO |     -    26    16     X     -     -     -    20     -     -    13 |  288   0.02
 AMC2 |     -    14     -     -     -     -     -    16     -     -    15 |  288   0.03
 AREQ |     -    27    19     -    23     -     -    33     -     -    52 |  288  16.37
 ARTU |     -    54     -    33    15     -     -    50     -     -     X |  288  10.38
 ASPA |     -     -     -     -    25     -     -    35     -     -    38 |  288    >>>
 AUCK |     -   115     -     X     -     -     -     -     -     -   126 |  239  10.76
 BILI |     -    30     -     -    28     -     -     -     -     -     X |  287   7.34
 BJFS |     -    34     -     -     -     -     -     -     -     -    37 |  287   9.40
 BOGT |     -    23     -    73    28     -     -     -     -     -    49 |  288  18.87
 BOR1 |     -    17     -     -     -     -     -     -     -     -    19 |  286   0.45
 BREW |     -     -     -     -     -     -     -     6     -     -     7 |  288   0.03
 BRUS |     -    15     -     -     -     -     -     -     -     -    17 |  288   0.05
 CAGZ |     -    15     -     -     -     -     -     -     -     -    17 |  288   0.47
 CAS1 |     -    33     -    79    28     -     -     -     -     -    48 |  288   6.64
 CEDU |     -     -     -    74     -     -     -     -     -     -    44 |  258  12.09
 CHAT |     -    51     -     -    42     -     -     -     -     -    58 |  287  11.98
 COCO |     -    17     -    72    29     -     -     -     -     -     - |  288   9.01
 CRO1 |     -     -    46    98    41     -     -    34     -     -    24 |  288  16.45
 DAV1 |     -    30     -     -    24     -     -     -     -     -    18 |  288  13.58
 DGAR |     -    48     -     -     -     -     -    51     -     -     X |  285  16.70
 DRAO |     -    65    40    32     -     -     -    14     -     -    28 |  288   0.06
 DUBO |     -    13     -     -     -     -     -    14     -     -     - |  288  79.27
 DWH1 |     -    33     -     -     -     -     -     -     -     -    36 |  288   1.10
 FLIN |     -    16     -     -     -     -     -    17     -     -     - |  288  11.80
 GLPS |     -    21     -     -    17     -     -     -     -     -    16 |  288  23.25
 GODE |     -     -     -    25     -     -     -     -     -     -    15 |  288   0.09
 GOLD |     -    43     -   163     -     -     -    57     -     -    34 |  287  10.81
 GUAM |     -    23     -    51    37     -     -    38     -     -    25 |  288  18.23
 HARB |     -    55     -     -     -     -     -    51     -     -    28 |  287  27.05
 HOB2 |     -    37     -    92     -     -     -    47     -     -    37 |  288   0.04
 HOFN |     -     -     -     -    30     -     -     -     -     -    35 |  287    >>>
 HRAO |     -     -     -     -     -     -     -    26     -     -    27 |  288   0.26
 IISC |     -    24     -    49    20     -     -     -     -     -     - |  288  23.65
 INVK |     -    41     -     -     -     -     -    43     -     -     X |  288   7.89
 ISPA |     -    25     -     -    31     -     -    43     -     -    44 |  288  12.55
 JPLM |     -     -     -     -    15     -     -    14     -     -    12 |  288   8.10
 KERG |     -    40    44    39    19     -     -     -     -     -    27 |  288   1.15
 KGN0 |     -    19     -     -     -     -     -     -     -     -    21 |  287   0.35
 KIT3 |     -     -     -    22    18     -     -    26     -     -     X |  288  12.77
 KOUR |     -     -     -    48    26     -     -     -     -     -    33 |  288   2.04
 LPGS |     -    41    27   104     -     -     -     -     -     -    30 |  288  29.83
 MAC1 |     -    25     -    63    44     -     -     -     -     -     X |  288  17.47
 MADR |     -     -     -     -     -     -     -    15     -     -    15 |  288   9.77
 MALI |     -    38     -    77    64     -     -     -     -     -    28 |  288  17.37
 MAS1 |     -     -    31    32    20     -     -    32     -     -    30 |  288   1.30
 MATE |     -    15     -    40     -     -     -     -     -     -    29 |  288   0.07
 MBAR |     -    87     -     -    97     -     -    87     -     -    87 |  288  14.97
 MCM4 |     -    83    82     -     X     -     -     -     -     -     - |  274    >>>
 MDO1 |     -     -    10     -     -     -     -     -     -     -    11 |  288  12.32
 MEDI |     -    19     -     -     -     -     -     -     -     -    20 |  288   0.13
 METS |     -     7     -     -     -     -     -     -     -     -     8 |  287   7.98
 MIZU |     -     -     -    82     -     -     -     -     -     -    48 |  288   0.45
 NISU |     -    17     -     -    16     -     -     -     -     -     - |  288   0.02
 NKLG |     -     -     -    57    50     -     -     -     -     -    40 |  287    >>>
 NLIB |     -     -     -     -     -     -     -    20     -     -    21 |  288 366.91
 NNOR |     -     -     -    37     -     -     -     -     -     -    22 |  288  16.35
 NPLD |     -    15     -     -     -     -     -     -     -     -    16 |  287   0.02
 NRC1 |     -    17    14     -    18     -     -     -     -     -    10 |  288   0.03
 NRIL |     -    23     -     -    16     -     -    21     -     -     X |  288   9.06
 NTUS |     -    18     -    34     -     -     -     -     -     -     - |  288  10.53
 NYA1 |     -    17     -     -    10     -     -     -     -     -    14 |  288   0.11
 ONSA |     -     -     -    22    11     -     -     -     -     -     - |  216   0.03
 PERT |     -     -    36    79    34     -     -    30     -     -    39 |  288   2.35
 PETP |     -    27     -     -    26     -     -     -     -     -     X |  287   7.38
 PIE1 |     -     -     -    25     -     -     -     -     -     -    15 |  288   0.04
 PIMO |     -     -     -    31     -     -     -     -     -     -    18 |  187  23.28
 POL2 |     -    16     -     -     -     -     -     -     -     -    17 |  288  10.88
 POTS |     -    13     -     -    12     -     -     -     -     -     X |  283  14.27
 PRDS |     -     9     -     -     -     -     -     -     -     -    10 |  288   1.31
 PTBB |     -    20     -     -     -     -     -     -     -     -    22 |  288   0.32
 RIOG |     -    64     -     -    95     -     -     -     -     -    55 |  286  11.51
 SANT |     -    53     -     X    50     -     -     -     -     -     - |  288   6.03
 SCH2 |     -    26     -     -     -     -     -    20     -     -    12 |  288  41.94
 SEY1 |     -     -     -     -    18     -     -     -     -     -    21 |  147   9.41
 STJO |     -    32    22     -    40     -     -    26     -     -    17 |  288   0.05
 SUTH |     -    22     -     -     -     -     -     -     -     -    25 |  288  13.58
 THTI |     -     -    42   109    45     -     -     -     -     -    45 |  288  10.81
 THU3 |     -    26     -     -    11     -     -     -     -     -    22 |  288   6.85
 TIDB |     -    25     -    70     -     -     -     -     -     -    33 |  288   0.05
 TLSE |     -     -     -     -     -     -     -    31     -     -    32 |  286   0.44
 TOW2 |     -    27     -     -    26     -     -     -     -     -     X |  288  12.10
 TRO1 |     -    13     -     -    13     -     -     -     -     -    22 |  288   9.82
 TSKB |     -    24    46    72    16     -     -     -     -     -    17 |  288   1.31
 TWTF |     -    29     -     -     -     -     -     -     -     -    32 |  288   0.08
 UNSA |     -     -     -    95    39     -     -     -     -     -    47 |  287  18.94
 URUM |     -    17     -     -     -     -     -     -     -     -    19 |  288  19.10
 USN3 |     -    19     -     -     -     -     -    27     -     -    15 |  288   0.04
 USNO |     -    19    12     -     -     -     -     -     -     -    14 |  288   0.03
 USUD |     -    19     -    75     -     -     -    39     -     -     X |  288   8.56
 VILL |     -    22     -     X    20     -     -     -     -     -    30 |  288   2.17
 WHIT |     -    17     -     -    12     -     -     -     -     -    18 |  288  12.25
 WILL |     -     8     -     -     -     -     -     -     -     -     9 |  288  37.73
 WTZR |     -    16     -    24     -     -     -     -     -     -    22 |  288   0.04
 WUHN |     -     -     -     -    32     -     -     -     -     -    37 |  287  15.11
 YELL |     -    57    54     X    17     -     -     -     -     -    17 |  288   0.05
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2924    47    46    73    44    78  2896    49  2743     -    49 |


 BEST CLOCK FIT: NPLD   287   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288   10.36   | 3.14e-14  6.26e-15  1.56e-15 |
 BRUS |   288     0     0   288   10.36   | 3.45e-14  5.73e-15  2.80e-15 |
 NPLD |   287     0     0   286   10.29   | 3.17e-14  6.24e-15  1.41e-15 |
 NRC1 |   288     0     0   288    9.56   | 2.52e-14  5.58e-15  2.41e-15 |
 AMC2 |   288     0     0   288    7.78   | 3.43e-14  5.56e-15  1.67e-15 |
 NISU |   288     0     0   288    7.20   | 4.74e-14  7.18e-15  1.33e-15 |
 ONSA |   216     0     0   216    6.90   | 4.18e-14  8.73e-15         - |
 ALBH |   288     0     0   288    6.29   | 3.80e-14  1.21e-14  2.87e-15 |
 WTZR |   288     0     0   288    4.93   | 3.94e-14  1.50e-14  3.00e-15 |
 NLIB |   288     2     0   286    4.41   | 3.59e-14  4.79e-15  3.11e-15 |
 ALGO |   288     0     0   288    3.54   | 3.18e-14  6.16e-15  2.60e-15 |
 HOB2 |   288     0     0   288    3.24   | 5.12e-14  1.65e-14  3.80e-15 |
 USN3 |   288     0     0   288    2.68   | 7.22e-14  9.90e-15  2.38e-15 |
 YELL |   288     1     0   287    1.88   | 3.45e-14  7.60e-15  3.15e-15 |
 PIE1 |   288     1     0   287    1.82   | 6.76e-14  1.06e-14  3.42e-15 |
 DRAO |   288     0     0   288    1.78   | 6.32e-14  1.97e-14  4.66e-15 |
 TIDB |   288     0     0   288    1.31   | 2.01e-13  2.01e-14  4.99e-15 |
 MATE |   288     0     0   288    1.29   | 6.54e-14  1.24e-14  6.01e-15 |
 BREW |   288     0     0   288    0.81   | 3.19e-14  6.33e-15  2.07e-15 |
 GODE |   288     0     0   288    0.69   | 3.76e-14  6.96e-15  5.69e-15 |
 MEDI |   288     1     0   287    0.57   | 3.30e-14  1.09e-14  9.06e-15 |
 TWTF |   288     0     0   288    0.48   | 4.37e-14  9.43e-15  7.37e-15 |
 G23  |   288     0     3   111    0.18   | 5.09e-13  6.42e-14  1.69e-14 |
 G07  |   288     0     0   288    0.16   | 2.96e-13  7.56e-14  6.10e-14 |
 G13  |   288     0     3    67    0.16   | 5.20e-13  6.01e-14  1.45e-14 |
 PTBB |   288     0     1   132    0.13   | 2.94e-13  7.95e-14  3.96e-14 |
 HRAO |   288     0     0   288    0.13   | 1.10e-13  2.73e-14  3.13e-14 |
 MIZU |   288     0     0   288    0.11   | 3.62e-13  9.72e-14  5.19e-14 |
 KGN0 |   287     0     0   286    0.10   | 4.21e-13  1.05e-13  3.47e-14 |
 TLSE |   286     0     0   285    0.10   | 4.04e-13  9.83e-14  3.32e-14 |
 NYA1 |   288     0     0   143    0.08   | 2.63e-14  7.12e-15  7.03e-15 |
 G28  |   288     0     5    75    0.08   | 7.88e-13  7.81e-14  3.77e-14 |
 CAGZ |   288     0     1   277    0.08   | 5.81e-13  1.03e-13  5.31e-14 |
 G26  |   288     0     0   288    0.07   | 3.53e-13  1.13e-13  6.65e-14 |
 DWH1 |   288     0     0   288    0.06   | 4.93e-13  1.40e-13  9.36e-14 |
 BOR1 |   286     0     0   284    0.06   | 4.16e-13  1.37e-13  4.70e-14 |
 G30  |   288     0     0   288    0.06   | 3.18e-13  7.75e-14  1.11e-13 |
 G17  |   278     0     0   276    0.05   | 4.91e-13  1.25e-13  1.45e-13 |
 G27  |   288     0     0   288    0.04   | 3.33e-13  9.20e-14  9.29e-14 |
 G29  |   288     0     0   288    0.04   | 3.96e-13  1.25e-13  1.00e-13 |
 G31  |   288     0     0   288    0.02   | 2.08e-13  1.49e-13  1.79e-13 |
 G04  |   288     0     0   288    0.02   | 4.42e-13  1.56e-13  9.56e-14 |
 TSKB |   288     0     0   288    0.02   | 1.04e-12  1.95e-13  1.21e-13 |
 STJO |   288     0     0   288    0.01   | 8.11e-14  1.03e-14  5.28e-15 |
 G08  |   288     0     0   288    0.01   | 1.34e-12  3.69e-13  1.11e-13 |
 G06  |   288     0     1   145    0.01   | 5.46e-13  1.76e-13  2.00e-13 |
 KOUR |   288     0     0   287    0.01   | 1.35e-12  4.12e-13  1.71e-13 |
 G03  |   288     0     0   288    0.01   | 1.33e-12  4.41e-13  2.04e-13 |
 G09  |   288     0     0   288    0.01   | 1.26e-12  3.96e-13  1.45e-13 |
 KERG |   288     0     0   288    0.01   | 1.31e-12  3.28e-13  1.18e-13 |
 G05  |   288     0     0   288    0.01   | 1.41e-12  5.08e-13  2.91e-13 |
 MAS1 |   288     0     0   288    0.01   | 1.84e-12  5.37e-13  8.88e-14 |
 PRDS |   288     0     0   288    0.00   | 1.33e-12  3.73e-13  1.31e-13 |
 WHIT |   288     0     1   119    0.00   | 4.94e-13  2.86e-13  7.26e-13 |
 GPST |   288     0     0     0    0.00   | 2.17e-14  3.96e-15  1.03e-15 |
 PIMO |   187     0     0     0    0.00   |        -         -         - |
 CEDU |   258     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 UNSA |   287     0     0     0    0.00   |        -         -         - |
 RIOG |   286     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   239     0     0     0    0.00   |        -         -         - |
 G25  |   288     0     0     0    0.00   | 1.52e-12  4.23e-13  2.12e-13 |
 G24  |   276     0     0     0    0.00   | 1.34e-12  5.03e-13  1.38e-13 |
 G22  |   288     1     6     0    0.00   | 6.81e-13  8.11e-14  2.96e-14 |
 G21  |   288     1     6     0    0.00   | 1.06e-12  1.51e-13  6.30e-14 |
 G20  |   288     0     6     0    0.00   | 6.83e-13  8.23e-14  1.68e-14 |
 G19  |   288     1     5     0    0.00   | 7.84e-13  8.60e-14  3.71e-14 |
 G18  |   288     2     6     0    0.00   | 1.71e-12  1.86e-13  7.61e-14 |
 G16  |   288     0     5     0    0.00   | 4.50e-13  5.19e-14  2.27e-14 |
 G15  |   276     0     0     0    0.00   | 1.64e-12  5.35e-13  3.86e-13 |
 G14  |   288     1     6     0    0.00   | 6.69e-13  8.12e-14  2.81e-14 |
 G11  |   288     0     3     0    0.00   | 6.70e-13  6.40e-14  5.46e-14 |
 G10  |   288     0     0     0    0.00   | 1.28e-12  3.83e-13  2.01e-13 |
 G02  |   277     0     4     0    0.00   | 6.05e-13  6.31e-14  3.59e-14 |
 G01  |   288     0     0     0    0.00   | 1.49e-12  7.37e-13  5.03e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.10e-12  5.42e-13  2.21e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.89e-13  2.32e-13  7.55e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   147     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 POTS |   283     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.89e-12  4.65e-13  2.28e-13 |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     2     1     0    0.00   | 7.83e-13  9.59e-13  7.77e-13 |
 MCM4 |   274     0     1     0    0.00   | 6.95e-13  4.04e-13  1.96e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.74e-13  3.35e-13  7.50e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   287     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DUBO |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   285     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.74e-13  8.03e-13  1.07e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     2     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.19e-17  2.63e-16  1.58e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      NLIB      NISU |
------------------------------------------+------------------------------+
