
 GPS week: 1300   Day: 6   MJD: 53350                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      0     0.00     0.01     2.88     0.00      0
 cod |   288     0  27309    231    -0.10     0.29     0.05    15.81      0
 emr |   288     0  24287    324  1046.64    51.99     0.04    20.89      0
 esa |   288     0  18805   3467  1045.02    52.07     0.07     8.52      0
 gfz |   288     0  20270    289    -0.17     0.74     0.03    22.38      0
 iga |    96     0   2688      3    -0.02     0.03     0.07     0.00      0
 igu |    96     0   2688      0    -0.01     0.01     3.06     0.00      0
 jpl |   288     0  19158    359    -3.61     1.31     0.04    18.82      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  34018   3034  1046.73    51.93     0.05    13.58      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -8610    10   -97    48    41  -152 -9411    81     -   -74 |
    2 |  2957    60   -19     -  -151  -136   791    86     -    79 |
    3 |  2271   -64  -106  -100   107    58 -2052    83     -     9 |
    4 |  2645    53   -21    71    27  -221 -2619   -25     -   -81 |
    5 |  2737    43    56    81   -36    -8  7829   -76     -   -23 |
    6 | -1269   -59  -106   -75   215  -114-12290   -84     -    41 |
    7 | -2851   114   -12  -561    32   149  -419   107     -    33 |
    8 |  1636    41   -90   -75   129   -44  7728   -23     -   -44 |
    9 |  -420    43   -27    68   -17  -125 -1918    12     -   -40 |
   10 |-13587    55     6   -46    49    82 -5267    -7     -  -114 |
   11 |  -186    58   -99   -67    49     9  -582   114     -  -109 |
   13 |  4267   185  -157    27   154    41  1953    58     -  -319 |
   14 |  5518    84   -60    67  -131   -74  2018   120     -    -5 |
   15 | -7244  -209    47   317    -4   151 -9206    27     -   -50 |
   16 |  5236  -138  -246   193    41    47   580   235     -    25 |
   17 | -5568    18    32   147   -35    46  6738     8     -  -121 |
   18 |  3731   -36   -92   368    69   -43  1982   -74     -   -59 |
   19 |  4405    79  -231   -76   -35  1180  3819   222     -    62 |
   20 |  4158   103  -132   -19  -140   108  1127   207     -    40 |
   21 |  7459   -67   -32  -509   192    44  6107    56     -    34 |
   22 | -3737   -66   -20   -86    51   -84  2757    31     -    34 |
   23 |   332    75  -291    81    72  -140   279   169     -   -39 |
   24 |  2538    23    21   -23    20  -160  9025   -10     -   -86 |
   25 | -5489   -45   -69   148    -4  -152 -8811    16     -    51 |
   26 | -1152    62   -17   186   -30  -199  -684    -9     -  -110 |
   27 |  -104    34   -54  -142   176  -225  -468   -70     -   -59 |
   28 |  3367    94    15  -451    91    71  2032     X     -     X |
   29 | -1479    88    56     X   -58     -     -    57     -  -175 |
   30 | -1558   -36   -14   210    93   -72 -1037  -157     -    -4 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -40     -     -     -     -    19     -    35 |
 ALGO |     -    28    41     X     -     -     -   -24     -   -64 |
 ALRT |     -   -44     -     -    31     -     -     -     -     - |
 AMC2 |     -    11    58     -     -     -     -  -190     -   161 |
 AREQ |     -    26   135     -   -82     -     -   -27     -   -66 |
 ARTU |     -   295     -   132   -98     -     -  -167     -     X |
 ASPA |     -     -     -     -   122     -     -  -241     -   106 |
 AUCK |     -   -34     -     X     -     -     -     -     -    39 |
 BAHR |     -     -  -119     -   147     -     -     -     -   -58 |
 BAN2 |     -     -     2     -     -     -     -     -     -    -4 |
 BOGT |     -   -13     -   -22    21     -     -     -     -    -6 |
 BOR1 |     -   -53     1     -     -     -     -     -     -    59 |
 BREW |     -     -   -30     -     -     -     -     -     -    46 |
 BRUS |     -   -72    35     -     -     -     -     -     -    30 |
 CAGZ |     -    82     -     -     -     -     -     -     -   -95 |
 CAS1 |     -     0     -    84   -26     -     -     -     -   -10 |
 CEDU |     -   -12     -     X     -     -     -    16     -    -9 |
 CHUR |     -    90   -76     -     -     -     -   -35     -    60 |
 COCO |     -   -34     -   170   -58     -     -    -4     -    35 |
 CRO1 |     -     -    -3    63   -51     -     -    67     -   -44 |
 DAEJ |     -  -240   145     -     -     -     -     -     -    57 |
 DAV1 |     -   111     -     -   -41     -     -   -68     -    32 |
 DGAR |     -   -50     -     -     -     -     -    42     -     X |
 DRAO |     -     -    48     -     -     -     -     1     -   -75 |
 DWH1 |     -   133   -54     -     -     -     -     -     -   -82 |
 FAIR |     -     -   -31    67     4     -     -     -     -     - |
 GLPS |     -    48     -     -   -17     -     -     -     -   -28 |
 GODE |     -  -113   102    37     -     -     -     -     -   -49 |
 GOL2 |     -     -    23     -     -     -     -   -43     -    25 |
 GOLD |     -  -120     -     X  -139     -     -   337     -     X |
 GUAM |     -   127     -     X   119     -     -  -345     -   135 |
 HOB2 |     -   -60   165     X     -     -     -   -13     -  -165 |
 HOFN |     -     -     -     -  -161     -     -     -     -   265 |
 HRAO |     -   -92     -     -     -     -     -    28     -    67 |
 IENG |     -  -109    83     -     -     -     -     -     -     - |
 INVK |     -    41     -     -     -     -     -   -34     -     X |
 ISPA |     -    26     -     -    31     -     -   -72     -    20 |
 JPLM |     -     -   -38     -     -     -     -    16     -    37 |
 KARR |     -  -201     -     -     -     -     -   169     -     - |
 KERG |     -   -17    11  -108    86     -     -     -     -   -72 |
 KGN0 |     -    -4    21     -     -     -     -     -     -   -27 |
 KIRU |     -     9     -     -     -     -     -  -115     -   150 |
 KIT3 |     -     -     -   -19    39     -     -  -104     -    92 |
 KOKB |     -     -     -     -    74     -     -     -     -  -121 |
 KOSG |     -   -61     -     -     -     -     -     -     -    71 |
 KOUR |     -    56     -  -351   -11     -     -     -     -   174 |
 LPGS |     -   -62    21   115     -     -     -     -     -   -32 |
 MAC1 |     -    28     -   124   -56     -     -     -     -   -18 |
 MADR |     -     -     -     -     -     -     -    -7     -    10 |
 MAS1 |     -   -77   179  -221   -95     -     -    78     -     3 |
 MATE |     -     -     -  -199    -2     -     -     -     -   128 |
 MAW1 |     -    89     -     -  -104     -     -     -     -    68 |
 MBAR |     -   -35     -     -     1     -     -   -72     -   140 |
 MCM4 |     -   293  -222     -     X     -     -     -     -     - |
 MEDI |     -     -     5     -     -     -     -     -     -    -8 |
 MIZU |     -     -    12     X     -     -     -     -     -   -19 |
 MKEA |     -    71     -    56     -     -     -     0     -  -117 |
 NKLG |     -     -     -  -172     -     -     -     -     -   108 |
 NLIB |     -     -   -35     -     -     -     -    82     -   -60 |
 NNOR |     -     -   106  -314     -     -     -     -     -    33 |
 NPLD |     -  -133    51     -     -     -     -     -     -    77 |
 NRC1 |     -    43    31     -   -66     -     -     -     -    11 |
 NRIL |     -    22     -     -     6     -     -   -23     -     X |
 NTUS |     -  -140     -   -54   -15     -     -     -     -   221 |
 OHI2 |     -   210     -    -9   -45     -     -     -     -  -163 |
 ONSA |     -     -   108    55  -119     -     -     -     -     - |
 PERT |     -   -31    13     X    29     -     -    13     -   -49 |
 PIE1 |     -     -  -138    88     -     -     -     -     -   163 |
 POL2 |     -    15     -     -     -     -     -     -     -   -17 |
 POTS |     -    -2     -     -     1     -     -     -     -     X |
 PRDS |     -     -   -24     -     -     -     -     -     -    37 |
 PTBB |     -   -78    65     -     -     -     -     -     -    -9 |
 QAQ1 |     -   -88    -4     -     -     -     -     -     -   108 |
 REYK |     -   -34     -     -     -     -     -     -     -    40 |
 RIOG |     -   -42     6     -    75     -     -     -     -   -84 |
 SANT |     -     X     -     X  -181     -     -     -     -   299 |
 SCH2 |     -     -    68     -     -     -     -  -126     -    70 |
 SFER |     -    -6     4     -     -     -     -     -     -     - |
 SPT0 |     -  -118    65     -     -     -     -     -     -    38 |
 STJO |     -     -    21     -   -54     -     -    41     -     X |
 STR1 |     -     -   104     -     -     -     -     -     -  -160 |
 SUTM |     -     -   213     -  -138     -     -   -73     -     - |
 THTI |     -     -   219    16  -171     -     -     -     -   -64 |
 THU3 |     -    27    91     -     -     -     -     -     -  -172 |
 TLSE |     -     -     3     -     -     -     -     -     -    -4 |
 TOW2 |     -     8     -   -11    35     -     -    -8     -   -48 |
 TRO1 |     -   145     -     -   -12     -     -     -     -  -161 |
 TSKB |     -   -99   -62   514   -16     -     -     -     -   -85 |
 TWTF |     -   -90    44     -     -     -     -     -     -    37 |
 UNSA |     -     -     -   -52    -3     -     -     -     -    39 |
 USN3 |     -   -25     -     -     -     -     -    -3     -    33 |
 USNO |     -   -36    21     -     -     -     -     -     -     9 |
 USUD |     -     -   -24   155     -     -     -   -44     -     X |
 VILL |     -   -57     -     X     -     -     -     -     -    66 |
 WHIT |     -   -13     -     -     -     -     -     -     -    16 |
 WILL |     -    25    20     -     -     -     -     -     -   -61 |
 WROC |     -     -   158     -     -     -     -  -175     -     - |
 WTZR |     -  -153   142    27     -     -     -     -     -   -57 |
 YEBE |     -     -    14     -     -     -     -     -     -   -21 |
 YELL |     -    34     X     X   -24     -     -     -     -     X |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6314    70    28    50    24    58  5242    25     -    44 |  288   5.39
    2 |  2855    63    24     -    28    67  1298    37     -    56 |  288   0.41
    3 |  2730    67    27    81    35    52  1287    29     -    51 |  288   1.47
    4 |  2468   140    55   152    54   127  1610    37     -    58 |  288   0.84
    5 |  4443    32    32    52    29    33  5668    16     -    55 |  288   1.53
    6 |   761    48    27    57    18    52  7038    56     -    37 |  288   1.51
    7 |  1792    42    44    47    38    38   655    84     -    72 |  288   0.75
    8 |  4010    40    27    47    24    62  2558    32     -    40 |  288   1.75
    9 |  3530    38    41    50    20    49  2447    17     -    62 |  288   1.55
   10 |  4754    34    28    47    20    39  4322    58     -    78 |  288   1.82
   11 |  1454    36    62    73    69    54   474    67     -    84 |  288   0.47
   13 |   877    59    35   117    29    65  1320    37     -    83 |  288   0.41
   14 |   884    68    37    50    33    85  1059    34     -    42 |  288   0.23
   15 |  6674   121   103    85    95   100  3468    91     -   132 |  288   2.92
   16 |   654    22    30    51    29    23   659    27     -    44 |  288   0.21
   17 |  2439    52    32    55    28    68  4694    32     -    81 |  288   1.47
   18 |   568    47    48    37    28    51   921    23     -    54 |  288   0.36
   19 |   926    49    28    55    47    74  1610    43     -    73 |  288   0.20
   20 |   571    62    29    25    22   104   660    40     -    63 |  288   0.23
   21 |  2055    86    66    86    52    74  3518    76     -    55 |  288   0.30
   22 |  3239    51    39    38    26    50  3255    34     -    25 |  288   1.88
   23 |  1722    84    28    76    21   133   436    39     -    66 |  288   0.32
   24 |  4289    79    46    47    23    65  4385    48     -   134 |  288   4.05
   25 |  2830    43    30    43    29    38  5748    18     -    35 |  288   1.66
   26 |   770    76    36    49    36   103   437    27     -    71 |  288   0.63
   27 |  1304    50    23    40    23    61   591    38     -    97 |  288   0.81
   28 |   817    26    15    36    30    43   868     X     -     X |  288   0.55
   29 |   851    60    31     X    48     -     -    24     -    88 |  288   0.80
   30 |  1600    24    26    51    23    56   809    20     -    42 |  288   0.64
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    31     -     -     -     -    39     -    43 |  288   0.05
 ALGO |     -    28    22     X     -     -     -    11     -    13 |  288   0.02
 ALRT |     -    21     -     -    15     -     -     -     -     - |  288  11.72
 AMC2 |     -    29    41     -     -     -     -    26     -    26 |  288   0.03
 AREQ |     -    40    43     -    31     -     -    31     -    22 |  288  15.12
 ARTU |     -    36     -    38    41     -     -    44     -     X |  288  10.71
 ASPA |     -     -     -     -    26     -     -    24     -    29 |  288    >>>
 AUCK |     -   113     -     X     -     -     -     -     -   132 |  264  11.61
 BAHR |     -     -    38     -    36     -     -     -     -    24 |  288   0.74
 BAN2 |     -     -    21     -     -     -     -     -     -    32 |  288  16.68
 BOGT |     -    25     -    36    22     -     -     -     -    22 |  288  18.59
 BOR1 |     -    16    26     -     -     -     -     -     -    30 |  288   0.45
 BREW |     -     -    22     -     -     -     -     -     -    33 |  288   0.04
 BRUS |     -    16    28     -     -     -     -     -     -    43 |  288   0.02
 CAGZ |     -    40     -     -     -     -     -     -     -    47 |  276   0.48
 CAS1 |     -    29     -    97    19     -     -     -     -    52 |  288   8.23
 CEDU |     -    23     -     X     -     -     -    14     -    25 |  288  10.75
 CHUR |     -    30    42     -     -     -     -    34     -    35 |  288   0.05
 COCO |     -    28     -   125    27     -     -    49     -    43 |  288   9.37
 CRO1 |     -     -    19    78    36     -     -    34     -    41 |  288  14.79
 DAEJ |     -    32    38     -     -     -     -     -     -    41 |  287   2.43
 DAV1 |     -    26     -     -    23     -     -    33     -    22 |  288  14.37
 DGAR |     -    42     -     -     -     -     -    35     -     X |  288  14.03
 DRAO |     -     -    18     -     -     -     -    25     -    21 |  288   0.06
 DWH1 |     -    55    31     -     -     -     -     -     -    33 |  288   1.21
 FAIR |     -     -    25    68    22     -     -     -     -     - |  288   0.49
 GLPS |     -    25     -     -    21     -     -     -     -    16 |  288  20.32
 GODE |     -    59    36    23     -     -     -     -     -    26 |  288   0.06
 GOL2 |     -     -    37     -     -     -     -    73     -   124 |  286   0.18
 GOLD |     -    27     -     X    19     -     -    35     -     X |  284   8.46
 GUAM |     -    33     -     X    36     -     -    50     -    36 |  288  18.22
 HOB2 |     -    29    19     X     -     -     -    22     -    21 |  286   0.05
 HOFN |     -     -     -     -    37     -     -     -     -    60 |  272    >>>
 HRAO |     -    33     -     -     -     -     -    28     -    43 |  288   0.17
 IENG |     -    19    14     -     -     -     -     -     -     - |  288   1.19
 INVK |     -    64     -     -     -     -     -    54     -     X |  279   7.79
 ISPA |     -    22     -     -    27     -     -    43     -    66 |  288  14.70
 JPLM |     -     -    51     -     -     -     -    31     -    37 |  288   6.41
 KARR |     -    29     -     -     -     -     -    24     -     - |  288  11.64
 KERG |     -    33    35   112    25     -     -     -     -    33 |  288   1.67
 KGN0 |     -    29    41     -     -     -     -     -     -    51 |  287   0.72
 KIRU |     -    55     -     -     -     -     -    37     -    25 |  284   6.17
 KIT3 |     -     -     -    24    25     -     -    23     -    26 |  288  12.74
 KOKB |     -     -     -     -    13     -     -     -     -    21 |  121   0.05
 KOSG |     -    14     -     -     -     -     -     -     -    17 |  286  29.18
 KOUR |     -    50     -    27    41     -     -     -     -    23 |  288   1.50
 LPGS |     -    22    28    58     -     -     -     -     -    31 |  288  27.50
 MAC1 |     -    33     -    55    35     -     -     -     -    53 |  288  16.52
 MADR |     -     -     -     -     -     -     -     9     -    12 |  276  11.35
 MAS1 |     -    24    40    40    30     -     -    35     -    31 |  288   1.67
 MATE |     -     -     -    46    11     -     -     -     -    37 |  288   0.06
 MAW1 |     -    27     -     -    20     -     -     -     -    54 |  288   9.12
 MBAR |     -    62     -     -    37     -     -    33     -    65 |  288  12.77
 MCM4 |     -    20    15     -     X     -     -     -     -     - |  288   2.77
 MEDI |     -     -    21     -     -     -     -     -     -    32 |  288   0.10
 MIZU |     -     -    36     X     -     -     -     -     -    55 |  287   0.45
 MKEA |     -    21     -    91     -     -     -    17     -    28 |  288  19.83
 NKLG |     -     -     -    66     -     -     -     -     -    42 |  287    >>>
 NLIB |     -     -    33     -     -     -     -    40     -    29 |  288   0.04
 NNOR |     -     -    19    54     -     -     -     -     -    34 |  288  15.82
 NPLD |     -    25    23     -     -     -     -     -     -    45 |  287   0.04
 NRC1 |     -    35    21     -    17     -     -     -     -    15 |  288   0.04
 NRIL |     -    18     -     -    56     -     -    67     -     X |  278  10.59
 NTUS |     -    22     -    38    16     -     -     -     -    32 |  288  10.36
 OHI2 |     -    40     -   107    34     -     -     -     -   100 |  288   7.24
 ONSA |     -     -    58    53    40     -     -     -     -     - |  288   0.05
 PERT |     -    28    43     X    30     -     -    27     -    34 |  288   3.91
 PIE1 |     -     -    61    77     -     -     -     -     -    84 |  244   1.26
 POL2 |     -    15     -     -     -     -     -     -     -    17 |  288  11.61
 POTS |     -    23     -     -    16     -     -     -     -     X |  288  15.50
 PRDS |     -     -    20     -     -     -     -     -     -    31 |  288   1.30
 PTBB |     -    21    31     -     -     -     -     -     -    49 |  288   0.26
 QAQ1 |     -    32    26     -     -     -     -     -     -    30 |  288   6.63
 REYK |     -    21     -     -     -     -     -     -     -    25 |  256   7.65
 RIOG |     -    30    42     -    45     -     -     -     -    45 |  288  12.77
 SANT |     -     X     -     X    24     -     -     -     -    40 |  223   8.50
 SCH2 |     -     -    21     -     -     -     -    21     -    11 |  288  24.43
 SFER |     -    18    13     -     -     -     -     -     -     - |  244   0.36
 SPT0 |     -    25    20     -     -     -     -     -     -    42 |  288   0.03
 STJO |     -     -    18     -    23     -     -    28     -     X |  288   1.98
 STR1 |     -     -    19     -     -     -     -     -     -    30 |  288   0.92
 SUTM |     -     -    23     -    27     -     -    22     -     - |  288  11.25
 THTI |     -     -    58    58    74     -     -     -     -    42 |  276  12.84
 THU3 |     -    14    12     -     -     -     -     -     -    19 |  288   7.27
 TLSE |     -     -    18     -     -     -     -     -     -    28 |  287   0.45
 TOW2 |     -    37     -    82    43     -     -    36     -    38 |  288   9.28
 TRO1 |     -    26     -     -    17     -     -     -     -    32 |  288   9.00
 TSKB |     -    21    24    72    15     -     -     -     -    38 |  288   0.82
 TWTF |     -    53    26     -     -     -     -     -     -    68 |  288   0.58
 UNSA |     -     -     -   172    49     -     -     -     -    59 |  254  17.18
 USN3 |     -    20     -     -     -     -     -    14     -    15 |  288   0.03
 USNO |     -    37    16     -     -     -     -     -     -    36 |  288   0.02
 USUD |     -     -    56    64     -     -     -    61     -     X |  288   9.60
 VILL |     -    30     -     X     -     -     -     -     -    35 |  288   4.27
 WHIT |     -    29     -     -     -     -     -     -     -    33 |  288   2.89
 WILL |     -    50    52     -     -     -     -     -     -    26 |  288 110.98
 WROC |     -     -    45     -     -     -     -    50     -     - |  288  24.61
 WTZR |     -    22    32    61     -     -     -     -     -    21 |  288   0.02
 YEBE |     -     -    26     -     -     -     -     -     -    40 |  288   0.06
 YELL |     -    22     X     X    15     -     -     -     -     X |  284   0.05
 -----+-------------------------------------------------------------+--------------
 TOT  |  2878    45    35    69    34    70  3063    40     -    51 |


 BEST CLOCK FIT: BRUS   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.96   | 3.40e-14  4.57e-15  1.69e-15 |
 AMC2 |   288     0     0   288    9.96   | 3.73e-14  7.15e-15  2.62e-15 |
 ALGO |   288     1     0   287    9.93   | 3.01e-14  7.45e-15  2.07e-15 |
 SPT0 |   288     0     0   288    9.47   | 3.86e-14  1.01e-14  1.89e-15 |
 BREW |   288     0     0   288    8.80   | 4.31e-14  8.23e-15  2.67e-15 |
 ALBH |   288     0     0   288    8.05   | 4.27e-14  9.76e-15  6.01e-15 |
 ONSA |   288     0     0   288    7.24   | 6.07e-14  1.11e-14  4.13e-15 |
 USNO |   288     0     0   288    6.88   | 4.40e-14  7.22e-15  2.15e-15 |
 NPLD |   287     0     0   142    4.92   | 3.22e-14  5.36e-15  2.72e-15 |
 YEBE |   288     0     0   288    3.62   | 4.74e-14  8.92e-15  5.97e-15 |
 CHUR |   288     0     0   288    3.13   | 4.77e-14  9.97e-15  3.71e-15 |
 USN3 |   288     0     0   288    2.90   | 7.85e-14  1.05e-14  1.92e-15 |
 NLIB |   288     0     0   288    2.63   | 3.87e-14  6.50e-15  4.18e-15 |
 WTZR |   288     0     0   252    2.29   | 3.69e-14  7.35e-15  2.19e-15 |
 DRAO |   288     0     0   288    1.46   | 6.92e-14  1.76e-14  6.27e-15 |
 GOL2 |   286     1     0   284    1.40   | 3.20e-14  6.29e-15  3.22e-15 |
 HOB2 |   286     0     0   284    1.19   | 4.31e-14  1.03e-14  4.09e-15 |
 MATE |   288     0     0   288    1.15   | 4.77e-14  9.72e-15  5.78e-15 |
 PIE1 |   244     1     0   241    1.11   | 6.02e-14  1.70e-14         - |
 YELL |   284     1     0   282    0.74   | 2.91e-14  5.62e-15  3.92e-15 |
 MEDI |   288     0     0   288    0.72   | 4.47e-14  9.49e-15  9.49e-15 |
 GODE |   288     0     0   288    0.39   | 3.50e-14  9.63e-15  4.41e-15 |
 NRC1 |   288     0     0   143    0.38   | 2.83e-14  7.96e-15  2.06e-15 |
 PTBB |   288     0     0   288    0.19   | 2.52e-13  5.85e-14  2.37e-14 |
 KOKB |   121     0     0   121    0.17   | 4.96e-14  1.05e-14         - |
 MIZU |   287     0     0   287    0.10   | 3.50e-13  1.37e-13  3.40e-14 |
 G16  |   288     0     5    79    0.10   | 5.00e-13  5.01e-14  2.17e-14 |
 G06  |   288     0     0   288    0.09   | 4.59e-13  1.01e-13  9.22e-14 |
 G26  |   288     0     0   288    0.08   | 3.52e-13  1.17e-13  6.24e-14 |
 SFER |   244     0     0   241    0.08   | 3.71e-13  1.08e-13         - |
 TLSE |   287     0     0   286    0.07   | 4.86e-13  1.47e-13  3.71e-14 |
 KGN0 |   287     0     0   286    0.07   | 3.90e-13  1.04e-13  5.53e-14 |
 G30  |   288     0     0   288    0.07   | 3.35e-13  1.10e-13  7.32e-14 |
 G23  |   288     0     1    67    0.06   | 5.05e-13  5.79e-14  3.39e-14 |
 BAHR |   288     0     0   288    0.06   | 4.58e-13  1.07e-13  5.45e-14 |
 TWTF |   288     0     0   288    0.06   | 4.28e-13  9.19e-14  4.06e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.47e-13  1.10e-13  2.92e-14 |
 G27  |   288     0     0   288    0.05   | 3.38e-13  9.71e-14  9.87e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.35e-13  1.53e-13  8.64e-14 |
 HRAO |   288     0     0   252    0.04   | 1.18e-13  2.35e-14  2.07e-14 |
 IENG |   288     0     0   288    0.04   | 5.25e-13  1.60e-13  8.86e-14 |
 G07  |   288     0     0   288    0.03   | 3.06e-13  9.80e-14  1.03e-13 |
 FAIR |   288     0     0   288    0.03   | 3.74e-13  9.53e-14  4.40e-14 |
 CAGZ |   276     0     0   131    0.03   | 5.40e-13  1.31e-13  5.00e-14 |
 G17  |   288     0     0   288    0.02   | 3.84e-13  1.14e-13  1.56e-13 |
 G29  |   288     0     0   143    0.02   | 4.32e-13  1.25e-13  8.72e-14 |
 G02  |   288     0     2    50    0.02   | 5.44e-13  7.00e-14  3.65e-14 |
 G04  |   288     0     0   288    0.02   | 4.13e-13  1.47e-13  1.02e-13 |
 STR1 |   288     0     0   143    0.01   | 6.69e-13  2.12e-13  1.01e-13 |
 G22  |   288     0     2    95    0.01   | 7.82e-13  1.02e-13  1.42e-13 |
 TSKB |   288     0     0   288    0.01   | 1.00e-12  2.42e-13  5.93e-14 |
 G08  |   288     0     0   288    0.01   | 1.47e-12  4.03e-13  1.71e-13 |
 WHIT |   288     0     0   288    0.01   | 5.34e-13  1.80e-13  1.66e-13 |
 G09  |   288     0     0   288    0.01   | 1.40e-12  4.93e-13  1.33e-13 |
 KOUR |   288     0     0   288    0.01   | 1.36e-12  4.64e-13  1.36e-13 |
 G03  |   288     0     0   288    0.01   | 1.28e-12  3.20e-13  1.63e-13 |
 DAEJ |   287     0     0   286    0.01   | 1.37e-12  3.80e-13  1.96e-13 |
 PRDS |   288     0     0   288    0.01   | 1.59e-12  4.20e-13  1.58e-13 |
 G25  |   288     0     0   288    0.01   | 1.47e-12  3.33e-13  1.26e-13 |
 G10  |   288     0     0   288    0.01   | 1.08e-12  3.88e-13  1.83e-13 |
 G05  |   288     0     0   288    0.01   | 1.30e-12  4.57e-13  1.11e-13 |
 KERG |   288     0     0   288    0.01   | 1.20e-12  4.16e-13  1.81e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.79e-12  3.73e-13  1.74e-13 |
 PERT |   288     0     0   288    0.00   | 1.70e-12  4.98e-13  3.52e-13 |
 G11  |   288     0     2     3    0.00   | 7.07e-13  8.34e-14  5.88e-14 |
 STJO |   288     0     1    56    0.00   | 5.31e-13  1.39e-13  1.30e-13 |
 GPST |   288     0     0     0    0.00   | 2.43e-14  5.26e-15  1.06e-15 |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 HOFN |   272     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 7.77e-13  8.24e-14  5.01e-14 |
 G24  |   288     0     0     0    0.00   | 1.37e-12  4.40e-13  2.70e-13 |
 G21  |   288     0     6     0    0.00   | 1.11e-12  1.31e-13  2.41e-14 |
 G20  |   288     0     6     0    0.00   | 6.04e-13  7.11e-14  1.92e-14 |
 G19  |   288     1     5     0    0.00   | 6.52e-13  7.01e-14  1.89e-14 |
 G18  |   288     0     6     0    0.00   | 1.36e-12  1.27e-13  3.52e-14 |
 G15  |   288     0     0     0    0.00   | 1.60e-12  6.35e-13  2.15e-13 |
 G14  |   288     0     6     0    0.00   | 5.99e-13  6.09e-14  2.28e-14 |
 G13  |   288     2     6     0    0.00   | 7.48e-13  1.99e-13  2.82e-14 |
 G01  |   288     0     0     0    0.00   | 1.47e-12  8.65e-13  6.03e-13 |
 WROC |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.05e-12  8.03e-13  2.98e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   254     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     0     0     0    0.00   | 4.20e-13  2.47e-13  8.38e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 6.25e-13  4.58e-13  1.59e-12 |
 SANT |   223     0     1     0    0.00   | 1.92e-12  7.55e-13         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   256     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   278     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.58e-13  2.40e-13  3.02e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   276     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   286     0     1     0    0.00   | 7.35e-13  6.43e-13  1.68e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   284     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.08e-13  2.46e-13  6.42e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   279     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   284     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.26e-13  6.97e-13  7.13e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     2     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.15e-17  2.58e-16  1.55e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      BRUS      BRUS |
------------------------------------------+------------------------------+
