
 GPS week: 1298   Day: 5   MJD: 53335                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2872      0     0.08    -0.05     2.71     0.00      0
 cod |   288     0  28699    579     0.16     0.17     0.04    21.66      0
 emr |   288     0  23798      0   312.96    45.58     0.04    20.20      0
 esa |   288     0  19183   1052   312.27    45.58     0.06    12.41      0
 gfz |   288     0  21469     32     0.07    -0.15     0.04    23.82      0
 iga |    96     0   2872      7     0.07    -0.07     0.11     0.00      0
 igu |    96     0   2684      0     0.07    -0.04     2.92     0.00      0
 ngs |    96     0   2872      0     0.08    -0.05     2.63     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  34689   2929   312.86    45.61     0.04    21.91      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  6917   134   -54  -123    20  -173  5122  5907     -   -31 |
    2 |  2165  -138     -     -   125  -121 -8902  1752     -     - |
    3 |  1689     7  -165    57   128  -113  2641  1547     -   -26 |
    4 |   986    89  -140    11    56    19  1001   718     -   -26 |
    5 |  4926   -57   -78   238    88   210  5040  4721     -  -102 |
    6 | -4914  -103  -165   308   105    44-11323 -4611     -   -35 |
    7 | -3430    91    63  -130   -81   126  2619 -3526     -    13 |
    8 |   152    44    46   -34    42   -78   315  -392     -  -113 |
    9 | -3269   -64   -51   238    25  -168  3555 -2316     -   -51 |
   10 | -5394    56   -50   221   -88   253  4457 -4614     -   -38 |
   11 |  1194   112   -55   -67    33   -29   350  1321     -   -56 |
   13 |  2446   257  -133   -81    34  -343  1966  2512     -  -126 |
   14 |  2016    36   -84   -43    43    11  -536  2145     -    22 |
   15 | -2287  -196   178   271   -50   229 -5210 -2178     -   -69 |
   16 |  4851     2  -234    43   189     5 -1395  4765     -   -16 |
   17 | -1449   -91    24   245   -10   187  2226 -2287     -   -60 |
   18 |  2214   -37   -20    95    85   -57 -1718  2384     -   -91 |
   19 |  3193   214  -189    38    13   928  1599  3434     -   -73 |
   20 |  3492    95  -123  -231    99  -188  1597  3681     -    44 |
   21 | -2204  -103   167   182     2    23 -1820 -1821     -  -158 |
   22 | -4532     0    44  -125    44  -204 -2255 -4420     -   -18 |
   23 | -1057   150  -236   -89   114  -112   983 -1053     -     0 |
   24 | -4590    39   -73    28   -25    55     - -4008     -    39 |
   25 |  -296   -56   -40    19    90  -183-10324  -779     -   -16 |
   26 | -1672     X    76   -53   -21  -233 -1929 -1810     -   -18 |
   27 |  4487    74  -178   -45    93  -178  3108  4017     -    16 |
   28 |  1765   111   -61  -125    44   206  9235  2130     -   -31 |
   29 | -3375     X   126   -28   -54  -205     - -3243     -   -44 |
   30 | -6001   -75    55    91    31    12 -5530 -5748     -   -62 |
   31 |  1748   135  -130  -214    24    60  5048  1532     -    82 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -39     -     -     -     -     -     -    36 |
 ALGO |     -     -  -192   547     -     -     -     -     -  -133 |
 AMC2 |     -   -98    -1     -     -     -     -     -     -    97 |
 AREQ |     -    84   -40     -   -59     -     -     -     -    20 |
 ARTU |     -   134     -    18  -131     -     -     -     -     X |
 ASPA |     -     -     -     -    39     -     -     -     -   -43 |
 AUCK |     -    11     -     X     -     -     -     -     -   -11 |
 BOGT |     -    48     -    29     -     -     -     -     -   -64 |
 BREW |     -     -   -45     -     -     -     -     -     -    42 |
 BRMU |     -     -     -     -    62     -     -     -     -   -67 |
 BRUS |     -   -45    52     -     -     -     -     -     -    -3 |
 CAS1 |     -     4     -    94  -142     -     -     -     -   116 |
 CEDU |     -     -     -   175     -     -     -     -     -   -99 |
 CHAT |     -    80     -     -     8     -     -     -     -   -88 |
 CHUR |     -     -   167     -     -     -     -     -     -  -154 |
 COCO |     -    92     -  -208   -91     -     -     -     -   126 |
 CRO1 |     -     -    33    -9    38     -     -     -     -   -67 |
 DAEJ |     -    51   -55     -     -     -     -     -     -     X |
 DAV1 |     -    56     -     -    23     -     -     -     -   -80 |
 DGAR |     -   -25     -     -     -     -     -     -     -    24 |
 DRAO |     -    63  -115   122     -     -     -     -     -   -25 |
 DWH1 |     -   201   -95     -     -     -     -     -     -  -111 |
 FORT |     -     -   150   -58   -98     -     -     -     -     - |
 GLPS |     -    49     -     -   -28     -     -     -     -   -18 |
 GODE |     -   -73   144  -201     -     -     -     -     -    52 |
 GOLD |     -   -27     -     X     -     -     -     -     -    27 |
 GRAZ |     -     -    63     -     -     -     -     -     -   -58 |
 GUAM |     -    92     -  -249    48     -     -     -     -    -2 |
 HOB2 |     -  -122   169   -55     -     -     -     -     -    -4 |
 HOFN |     -     -     -     -  -136     -     -     -     -   148 |
 IENG |     -  -105   112     -     -     -     -     -     -     - |
 IISC |     -   -12     -  -102    64     -     -     -     -     - |
 ISPA |     -   102     -     -   -83     -     -     -     -   -10 |
 JPLM |     -     -    -2     -  -140     -     -     -     -   154 |
 KERG |     -   -38   -57  -149    64     -     -     -     -   104 |
 KGN0 |     -   -65    33     -     -     -     -     -     -    34 |
 KIRU |     -   -86     -     -     -     -     -     -     -    85 |
 KIT3 |     -     -     -   -12     6     -     -     -     -     X |
 KOKB |     -     -   -26     -    25     -     -     -     -    -3 |
 KOSG |     -   -51     -     -     -     -     -     -     -    50 |
 KOUR |     -     -     -  -153    37     -     -     -     -    47 |
 LPGS |     -   -55    13   -25     -     -     -     -     -    56 |
 MAC1 |     -   -68     -    54    34     -     -     -     -     X |
 MAS1 |     -    -5     5   -27     -     -     -     -     -    15 |
 MATE |     -   129     -  -478     -     -     -     -     -   143 |
 MBAR |     -     6     -     -  -129     -     -     -     -   134 |
 MCM4 |     -   169  -272     -    77     -     -     -     -     - |
 MDO1 |     -     -   -36     -  -177     -     -     -     -   225 |
 MEDI |     -   -28    17     -     -     -     -     -     -    13 |
 METS |     -   -36    20     -     -     -     -     -     -    16 |
 MIZU |     -     -     -   189     -     -     -     -     -  -107 |
 NKLG |     -   169     -  -124   -95     -     -     -     -    12 |
 NLIB |     -     -   -13     -     -     -     -     -     -    12 |
 NNOR |     -     -    64   182     -     -     -     -     -  -162 |
 NPLD |     -  -124   104     -     -     -     -     -     -    27 |
 NRC1 |     -    38    30     -   -77     -     -     -     -    19 |
 NRIL |     -     1     -     -    -1     -     -     -     -     X |
 NTUS |     -  -109     -     5   -32     -     -     -     -   139 |
 NYA1 |     -    85     -     -  -142     -     -     -     -    71 |
 OHI2 |     -   101     -    44    35     -     -     -     -  -163 |
 ONSA |     -   -53   125    31   -69     -     -     -     -     - |
 PDEL |     -  -132     -     -    68     -     -     -     -    56 |
 PERT |     -   -75   125     X    87     -     -     -     -  -135 |
 PETP |     -    48     -     -   -44     -     -     -     -     X |
 PIE1 |     -     -    65  -519     -     -     -     -     -   234 |
 POL2 |     -   -16     -     -     -     -     -     -     -    16 |
 POTS |     -     2     -     -    -2     -     -     -     -     X |
 PRDS |     -     -   -30     -     -     -     -     -     -    28 |
 PTBB |     -   -39    67     -     -     -     -     -     -   -23 |
 QAQ1 |     -   -86   -29     -     -     -     -     -     -   112 |
 RIOG |     -    65    76     -  -169     -     -     -     -    50 |
 SANT |     -    27     -   177   -76     -     -     -     -   -29 |
 SCH2 |     -   -82    19     -     -     -     -     -     -    63 |
 SFER |     -  -121   130     -     -     -     -     -     -     - |
 SPT0 |     -  -129   161     -     -     -     -     -     -   -19 |
 STJO |     -     -   -42     -     -     -     -     -     -    39 |
 STR1 |     -     -    51     -     -     -     -     -     -   -47 |
 SUTH |     -   -84     -     -     -     -     -     -     -    83 |
 THU3 |     -  -122    94     -   140     -     -     -     -  -118 |
 TIDB |     -   -33    47   -23     -     -     -     -     -     2 |
 TIXI |     -    20     -   -56    11     -     -     -     -     X |
 TLSE |     -  -178    97     -     -     -     -     -     -    86 |
 TOW2 |     -    53     -   -48   -23     -     -     -     -     X |
 TRO1 |     -    78     -     -   -49     -     -     -     -   -24 |
 TWTF |     -   -61   -12     -     -     -     -     -     -    71 |
 UNSA |     -     -     -  -232     0     -     -     -     -   115 |
 URUM |     -   -44     -     -     -     -     -     -     -    44 |
 USN3 |     -   -30     -     -     -     -     -     -     -    29 |
 USNO |     -   -47    19     -     -     -     -     -     -    29 |
 USUD |     -     -   -28    46     -     -     -     -     -     X |
 WHIT |     -   -82     -     -   -40     -     -     -     -   125 |
 WILL |     -   101    24     -     -     -     -     -     -  -122 |
 WTZR |     -  -115   207   -54     -     -     -     -     -   -46 |
 WUHN |     -     -   111     -    82     -     -     -     -  -191 |
 YAKT |     -   -64     -     -     -     -     -     -     -    63 |
 YAR2 |     -     -    62     -     -     -     -     -     -   -57 |
 YEBE |     -     -    54     -     -     -     -     -     -   -50 |
 YELL |     -   -79   -77   276   -96     -     -     -     -    99 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4123   159    71    93    85   120  6076  5464     -    75 |  288   4.85
    2 |  1924    28     -     -    25   129  5365  1812     -     - |  288   0.81
    3 |  2420    50    39    42    62    49  2107  2464     -    27 |  288   2.42
    4 |   941    51    22    46    21    54   965  1122     -    42 |  288   0.82
    5 |  3618    16    30    56    15    35  3964  3357     -    43 |  288   2.56
    6 |  1380    39    40    26    24    53  6201  1282     -    31 |  288   1.39
    7 |   861    65    24    34    31    47   606   852     -    61 |  288   0.63
    8 |  3366    31    28    36    31    36  1757  2775     -    45 |  288   1.63
    9 |  6473    34    37    83    22    67  4562  5682     -    44 |  288   1.81
   10 |  4267    28    33    56    42    97  3375  4240     -    54 |  288   2.31
   11 |  1027    43    74    36    25    75   311  1176     -    51 |  288   0.33
   13 |   662    65    32   143   129   382   486   666     -    59 |  288   0.37
   14 |   539    76    46    56    34    94   796   544     -    74 |  288   0.26
   15 |  3764    57    41    63    36    69  4941  3862     -    76 |  288   3.40
   16 |  1035    26    41    53    31    31   524  1080     -    56 |  288   0.27
   17 |  5119    38    24    37    22    85  1844  4598     -    40 |  288   0.88
   18 |   709    34    47    65    35    68   366   796     -    50 |  288   0.35
   19 |  1112    80    30    49    51    97   712  1089     -    57 |  288   0.31
   20 |   788    40    27    31    37    91   413   782     -    54 |  288   0.20
   21 |  2289    53    55    35    55    43   926  1847     -    44 |  288   0.62
   22 |  1947    44    61    35    21    67   809  1775     -    59 |  288   0.38
   23 |   574    68    50    88    49   147   923   613     -    99 |  288   0.28
   24 |  5110    59    42    43    24    78     -  4903     -    56 |  288   2.84
   25 |  2733    56    34    59    31    53  3452  2558     -    29 |  288   2.25
   26 |  1610     X    45   122    40   118  1155  1453     -    46 |  277   0.87
   27 |  1737    37    29    29    25    66   748  1835     -    27 |  288   0.96
   28 |  3106    34    22    40    45    70  4845  2751     -    50 |  288   0.94
   29 |   664     X    56    97    33   301     -   643     -    53 |  278   0.87
   30 |  1442    24    29    66    18    41  3078  1378     -    32 |  288   0.55
   31 |  1417    58    20    31    24    21  1119  1641     -    55 |  288   1.29
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    25     -     -     -     -     -     -    23 |  288   0.04
 ALGO |     -     -     8    17     -     -     -     -     -     9 |  288   0.05
 AMC2 |     -    34    40     -     -     -     -     -     -    12 |  288   0.04
 AREQ |     -    28    45     -    25     -     -     -     -    57 |  288  18.86
 ARTU |     -    24     -    36    35     -     -     -     -     X |  288  13.25
 ASPA |     -     -     -     -    18     -     -     -     -    19 |  288    >>>
 AUCK |     -    63     -     X     -     -     -     -     -    62 |  264  14.62
 BOGT |     -    18     -    40     -     -     -     -     -    14 |  288  24.91
 BREW |     -     -    29     -     -     -     -     -     -    27 |  288   0.08
 BRMU |     -     -     -     -    53     -     -     -     -    57 |  288    >>>
 BRUS |     -    32    32     -     -     -     -     -     -    16 |  288   0.03
 CAS1 |     -    23     -   114    19     -     -     -     -    69 |  288   7.40
 CEDU |     -     -     -    50     -     -     -     -     -    28 |  282  13.58
 CHAT |     -    43     -     -    29     -     -     -     -    56 |  287  13.00
 CHUR |     -     -    31     -     -     -     -     -     -    29 |  286   0.05
 COCO |     -    40     -    97    52     -     -     -     -    20 |  288  16.19
 CRO1 |     -     -    16    36    34     -     -     -     -    29 |  288  15.25
 DAEJ |     -    50    53     -     -     -     -     -     -     X |  287   2.08
 DAV1 |     -    29     -     -    53     -     -     -     -    51 |  288  13.02
 DGAR |     -    36     -     -     -     -     -     -     -    36 |  286  19.52
 DRAO |     -    22    13    55     -     -     -     -     -    16 |  288   0.09
 DWH1 |     -    32    47     -     -     -     -     -     -    21 |  288   0.54
 FORT |     -     -    54    95    38     -     -     -     -     - |  276   0.11
 GLPS |     -    16     -     -    18     -     -     -     -    14 |  288  25.84
 GODE |     -    42    42    27     -     -     -     -     -    11 |  288   0.21
 GOLD |     -    50     -     X     -     -     -     -     -    49 |  288  13.36
 GRAZ |     -     -    19     -     -     -     -     -     -    18 |  288    >>>
 GUAM |     -    41     -    78    48     -     -     -     -    31 |  288  20.58
 HOB2 |     -    27    47    55     -     -     -     -     -    38 |  288   0.06
 HOFN |     -     -     -     -    20     -     -     -     -    22 |  287    >>>
 IENG |     -    26    28     -     -     -     -     -     -     - |  288   0.49
 IISC |     -    38     -    38    31     -     -     -     -     - |  288  26.84
 ISPA |     -    24     -     -    34     -     -     -     -    42 |  288  19.15
 JPLM |     -     -    61     -    40     -     -     -     -    19 |  288  14.73
 KERG |     -    36    25    62    42     -     -     -     -    37 |  288   1.26
 KGN0 |     -    45    52     -     -     -     -     -     -    34 |  287   0.49
 KIRU |     -     9     -     -     -     -     -     -     -     9 |  288   6.90
 KIT3 |     -     -     -    28    15     -     -     -     -     X |  284  16.25
 KOKB |     -     -    26     -    20     -     -     -     -    30 |  288   0.06
 KOSG |     -    22     -     -     -     -     -     -     -    22 |  288  25.24
 KOUR |     -     -     -    48    49     -     -     -     -    36 |  287   1.96
 LPGS |     -    36    44    49     -     -     -     -     -    47 |  288  29.15
 MAC1 |     -    20     -    52    27     -     -     -     -     X |  288  16.68
 MAS1 |     -    20    14    31     -     -     -     -     -    12 |  287   2.62
 MATE |     -    35     -    85     -     -     -     -     -    45 |  288   0.26
 MBAR |     -    29     -     -    36     -     -     -     -    45 |  288  14.33
 MCM4 |     -    31    24     -    16     -     -     -     -     - |  288  23.53
 MDO1 |     -     -    18     -    15     -     -     -     -    11 |  288  12.94
 MEDI |     -    24    18     -     -     -     -     -     -    26 |  288   0.06
 METS |     -    26    25     -     -     -     -     -     -    12 |  287  11.40
 MIZU |     -     -     -    63     -     -     -     -     -    36 |  280   0.36
 NKLG |     -    45     -   109    42     -     -     -     -    54 |  275    >>>
 NLIB |     -     -    29     -     -     -     -     -     -    27 |  288   0.05
 NNOR |     -     -    19    54     -     -     -     -     -    23 |  288  17.54
 NPLD |     -    24    27     -     -     -     -     -     -    23 |  287   0.03
 NRC1 |     -    43    20     -    17     -     -     -     -    22 |  288   0.07
 NRIL |     -    12     -     -    11     -     -     -     -     X |  288  10.74
 NTUS |     -    28     -    82    39     -     -     -     -    54 |  288   9.50
 NYA1 |     -    35     -     -    17     -     -     -     -    34 |  288   0.03
 OHI2 |     -    75     -    60    20     -     -     -     -    85 |  288  10.25
 ONSA |     -    54   123    90    42     -     -     -     -     - |  288   0.07
 PDEL |     -    21     -     -    32     -     -     -     -    35 |  288  58.44
 PERT |     -    39    55     X    42     -     -     -     -    31 |  288   2.84
 PETP |     -    22     -     -    20     -     -     -     -     X |  287  10.98
 PIE1 |     -     -    35    36     -     -     -     -     -    23 |  288   0.04
 POL2 |     -    19     -     -     -     -     -     -     -    19 |  288  13.39
 POTS |     -    23     -     -    21     -     -     -     -     X |  288  13.72
 PRDS |     -     -    26     -     -     -     -     -     -    24 |  288   2.32
 PTBB |     -    26    27     -     -     -     -     -     -    36 |  288   0.36
 QAQ1 |     -    16    26     -     -     -     -     -     -    13 |  288   6.28
 RIOG |     -    68    51     -    21     -     -     -     -    32 |  288  10.06
 SANT |     -    22     -    34    20     -     -     -     -    31 |  288  14.12
 SCH2 |     -    15    19     -     -     -     -     -     -    10 |  288  18.56
 SFER |     -    26    28     -     -     -     -     -     -     - |  284   0.86
 SPT0 |     -    89   153     -     -     -     -     -     -    56 |  288   0.05
 STJO |     -     -     7     -     -     -     -     -     -     6 |  288   0.11
 STR1 |     -     -    38     -     -     -     -     -     -    35 |  288   0.54
 SUTH |     -    26     -     -     -     -     -     -     -    25 |  288  19.08
 THU3 |     -    27    33     -    20     -     -     -     -    23 |  288  12.23
 TIDB |     -    29    44    47     -     -     -     -     -    19 |  288   0.06
 TIXI |     -    24     -    19    24     -     -     -     -     X |  287   7.39
 TLSE |     -    71    32     -     -     -     -     -     -    60 |  287   1.01
 TOW2 |     -    37     -    77    36     -     -     -     -     X |  288   9.53
 TRO1 |     -    16     -     -    16     -     -     -     -    28 |  288   8.75
 TWTF |     -    31    60     -     -     -     -     -     -    49 |  288   0.53
 UNSA |     -     -     -   117    64     -     -     -     -    47 |  272    >>>
 URUM |     -    37     -     -     -     -     -     -     -    37 |  288  17.51
 USN3 |     -    22     -     -     -     -     -     -     -    22 |  288   0.05
 USNO |     -    19    10     -     -     -     -     -     -    14 |  288   0.03
 USUD |     -     -    54    89     -     -     -     -     -     X |  288  10.76
 WHIT |     -    18     -     -    11     -     -     -     -    18 |  288   1.13
 WILL |     -    49    73     -     -     -     -     -     -    21 |  288  73.46
 WTZR |     -    31    31    55     -     -     -     -     -    32 |  288   0.05
 WUHN |     -     -    85     -    60     -     -     -     -    86 |  287  14.65
 YAKT |     -    13     -     -     -     -     -     -     -    13 |  288   0.92
 YAR2 |     -     -    31     -     -     -     -     -     -    29 |  259   7.53
 YEBE |     -     -    19     -     -     -     -     -     -    17 |  288   0.08
 YELL |     -    27    56    64    66     -     -     -     -    66 |  288   0.06
 -----+-------------------------------------------------------------+--------------
 TOT  |  2715    42    44    64    38   114  2921  2631     -    41 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ALBH |   288     0     0   288    9.96   | 4.26e-14  7.60e-15  3.13e-15 |
 USNO |   288     0     0   288    9.96   | 3.28e-14  5.14e-15  1.91e-15 |
 BRUS |   288     0     0   288    9.96   | 3.74e-14  8.46e-15  2.08e-15 |
 AMC2 |   288     0     0   288    8.90   | 3.34e-14  7.06e-15  2.99e-15 |
 BREW |   288     0     0   288    7.09   | 4.42e-14  7.69e-15  4.02e-15 |
 USN3 |   288     0     0   288    6.77   | 7.40e-14  9.88e-15  3.89e-15 |
 NLIB |   288     0     0   288    4.98   | 3.62e-14  6.95e-15  2.39e-15 |
 ONSA |   288     0     0   288    4.30   | 5.68e-14  1.01e-14  6.61e-15 |
 ALGO |   288     1     0   287    4.12   | 2.80e-14  5.14e-15  3.16e-15 |
 KOKB |   288     0     0   288    3.74   | 4.78e-14  1.15e-14  4.59e-15 |
 DRAO |   288     0     0   288    3.70   | 6.33e-14  1.93e-14  6.10e-15 |
 YELL |   288     1     0   287    3.55   | 2.63e-14  5.16e-15  3.18e-15 |
 SPT0 |   288     0     0   143    2.92   | 4.63e-14  1.15e-14  4.21e-15 |
 NYA1 |   288     0     0   288    2.90   | 2.62e-14  7.24e-15  2.45e-15 |
 NPLD |   287     0     0   286    2.65   | 4.01e-14  1.32e-14  2.33e-15 |
 HOB2 |   288     0     0   288    2.51   | 3.80e-14  1.35e-14  4.48e-15 |
 NRC1 |   288     1     0   287    2.35   | 2.61e-14  5.56e-15  3.58e-15 |
 FORT |   276     0     0   276    2.11   | 8.95e-14  2.94e-14  8.31e-15 |
 TIDB |   288     0     0   239    1.55   | 1.90e-13  1.75e-14  6.09e-15 |
 STJO |   288     0     0   288    1.18   | 5.21e-14  1.17e-14  9.57e-15 |
 PIE1 |   288     1     0   287    0.92   | 4.09e-14  9.38e-15  2.94e-15 |
 MATE |   288     0     0   288    0.55   | 8.29e-14  1.58e-14  2.47e-14 |
 MEDI |   288     0     0   143    0.46   | 3.38e-14  6.94e-15  6.14e-15 |
 CHUR |   286     0     0   285    0.42   | 4.81e-14  9.68e-15  4.26e-15 |
 GODE |   288     0     0   288    0.38   | 3.15e-14  1.08e-14  1.63e-14 |
 G23  |   288     0     0   288    0.37   | 4.90e-13  6.29e-14  2.84e-14 |
 G16  |   288     0     0   288    0.26   | 4.69e-13  5.64e-14  2.71e-14 |
 G07  |   288     0     0   288    0.13   | 2.93e-13  1.03e-13  7.89e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.46e-13  1.22e-13  4.42e-14 |
 G30  |   288     0     0   288    0.10   | 3.52e-13  7.57e-14  4.80e-14 |
 TWTF |   288     0     0   288    0.10   | 3.86e-13  1.00e-13  4.23e-14 |
 G19  |   288     0     3   142    0.09   | 6.66e-13  8.34e-14  2.94e-14 |
 G27  |   288     0     0   288    0.08   | 3.14e-13  1.03e-13  1.07e-13 |
 PTBB |   288     0     0   143    0.08   | 3.72e-13  7.54e-14  2.64e-14 |
 YAKT |   288     0     0   288    0.07   | 4.01e-13  1.26e-13  6.80e-14 |
 G26  |   277     0     0   275    0.07   | 3.40e-13  1.21e-13  8.45e-14 |
 DWH1 |   288     0     0   288    0.07   | 5.19e-13  1.54e-13  5.55e-14 |
 TLSE |   287     0     1   248    0.06   | 5.62e-13  1.92e-13  6.44e-14 |
 G14  |   288     0     4    49    0.06   | 6.47e-13  7.26e-14  2.39e-14 |
 MIZU |   280     0     0   135    0.06   | 4.13e-13  8.61e-14  3.65e-14 |
 G29  |   278     0     0   276    0.05   | 3.85e-13  1.38e-13  5.99e-14 |
 SFER |   284     0     0   129    0.05   | 3.85e-13  1.25e-13  5.59e-14 |
 G06  |   288     0     0   288    0.05   | 4.17e-13  1.44e-13  1.07e-13 |
 IENG |   288     0     0   143    0.04   | 5.14e-13  1.14e-13  5.38e-14 |
 G04  |   288     0     0   288    0.03   | 4.39e-13  1.62e-13  8.23e-14 |
 G31  |   288     0     0   288    0.03   | 2.22e-13  1.80e-13  1.51e-13 |
 G17  |   288     0     0   288    0.03   | 7.74e-13  1.83e-13  1.03e-13 |
 STR1 |   288     0     0   143    0.02   | 6.56e-13  1.67e-13  4.53e-14 |
 KERG |   288     0     0   288    0.01   | 1.31e-12  3.47e-13  9.54e-14 |
 G08  |   288     0     0   288    0.01   | 1.48e-12  4.65e-13  1.77e-13 |
 WTZR |   288     0     1   145    0.01   | 4.63e-14  1.40e-14  3.51e-15 |
 KOUR |   287     0     0   287    0.01   | 1.56e-12  4.51e-13  1.75e-13 |
 G25  |   288     0     0   288    0.01   | 1.50e-12  4.99e-13  2.84e-13 |
 G10  |   288     0     0   288    0.01   | 1.11e-12  4.11e-13  2.53e-13 |
 PERT |   288     0     0   288    0.01   | 1.85e-12  5.45e-13  2.49e-13 |
 DAEJ |   287     0     0   135    0.00   | 1.54e-12  4.15e-13  2.11e-13 |
 PRDS |   288     0     0   143    0.00   | 1.53e-12  4.41e-13  1.49e-13 |
 WHIT |   288     0     0   288    0.00   | 5.34e-13  2.22e-13  1.05e-13 |
 GPST |   288     0     0     0    0.00   | 2.09e-14  4.49e-15  1.67e-15 |
 YAR2 |   259     0     0     0    0.00   |        -         -         - |
 CEDU |   282     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   275     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     5     0    0.00   | 5.76e-13  8.20e-14  5.13e-14 |
 G24  |   288     0     0     0    0.00   | 1.30e-12  4.58e-13  3.23e-13 |
 G22  |   288     0     6     0    0.00   | 1.05e-12  9.51e-14  2.77e-14 |
 G21  |   288     0     6     0    0.00   | 8.09e-13  1.01e-13  4.21e-14 |
 G20  |   288     0     6     0    0.00   | 6.23e-13  7.03e-14  1.46e-14 |
 G18  |   288     0     6     0    0.00   | 1.39e-12  1.26e-13  3.48e-14 |
 G15  |   288     0     0     0    0.00   | 1.40e-12  6.94e-13  3.66e-13 |
 G13  |   288     0     4     0    0.00   | 6.49e-13  1.30e-13  4.13e-14 |
 G11  |   288     0     5     0    0.00   | 6.49e-13  6.98e-14  3.77e-14 |
 G09  |   288     0     0     0    0.00   | 1.23e-12  5.20e-13  1.60e-13 |
 G05  |   288     0     0     0    0.00   | 1.44e-12  4.47e-13  2.09e-13 |
 G03  |   288     0     0     0    0.00   | 1.29e-12  4.65e-13  2.52e-13 |
 G02  |   288     0     6     0    0.00   | 5.78e-13  7.03e-14  4.51e-14 |
 G01  |   288     0     0     0    0.00   | 1.59e-12  8.82e-13  5.20e-13 |
 YEBE |   288     0     2     0    0.00   | 1.29e-13  1.01e-14  7.68e-15 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   272     2     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 5.90e-13  3.99e-13  1.11e-12 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     2     0    0.00   | 8.01e-13  1.07e-12  1.20e-12 |
 MCM4 |   288     0     0     0    0.00   | 6.01e-13  3.86e-13  1.60e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   287     0     0     0    0.00   | 1.83e-12  4.87e-13  2.26e-13 |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   284     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.52e-13  4.18e-13  1.28e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   286     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     2     0    0.00   | 2.96e-13  1.62e-12  1.71e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.88e-17  2.25e-16  1.35e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      USNO      USNO |
------------------------------------------+------------------------------+
