
 GPS week: 1296   Day: 6   MJD: 53322                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2780      0     0.00     0.03     2.49     0.00      0
 cod |   288     0  24828    467    -0.11     0.08     0.05    14.50      0
 emr |   288     0  21772      0   206.45    43.92     0.03    29.29      0
 esa |   288     0  18174    964   205.92    43.93     0.08     8.42      0
 gfz |   288     0  19162      3     0.24    -0.28     0.04    22.13      0
 iga |    96     0   2780      0     0.01     0.00     0.11     0.00      0
 igu |    96     0   2780      0     0.01     0.01     2.28     0.00      0
 jpl |   288     0  17108    392    -2.00     0.05     0.05    13.71      0
 ngs |    96     0   2780      1    -0.02     0.06     2.36     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  29304   8166   206.36    43.96     0.06    11.95      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  1470  -106  -129   205    88   112 -9982   120   454     -   -17 |
    3 | -2369  -104    43   104   -20  -112 -7088     0 -1868     -   -15 |
    4 | -2203   -78   -76   320    67  -126   338   -48 -2299     -   -15 |
    5 |  4377    17   -78    47    73   256 -4257   -52  3285     -    61 |
    6 |  -562    22   -40   141    81   -36 -2478  -183  -871     -    31 |
    7 |  -599   -64    58  -128   -54   142  2252    16  -656     -   109 |
    8 | -6706  -110    79   -16     5   -12 -4520   -83 -5833     -    37 |
    9 |  6662   -24   -25   -40    80  -119 -7198   -23  5810     -    -5 |
   10 | -5005    17   -38  -148    33   154  -669    50 -4706     -    59 |
   11 |  2868    10   -63   -26   -58  -110  2140   218  2826     -    20 |
   13 |  2867    46  -132   180   129  -204   675    -7  2819     -   -80 |
   14 |  -846    40   -74    98   -46    93  3710   234  -146     -  -120 |
   15 |  2006    -1    95    25  -162   328  1319     3  1805     -    48 |
   16 |  4638    21   -96    32   -20    90  3777   188  4656     -     9 |
   17 |   345    99   -64   -24    -1   264  -354    43  -225     -     6 |
   18 |  4099    82   -96  -112    20    57  3196    84  4252     -    80 |
   19 |  2948   -48  -257   187   193  -112  1848   165  3082     -    28 |
   20 |  4994  -156  -118   324    72   283   765   112  4851     -   -11 |
   21 |   405   231    50  -433   -85   -78  2345   106   649     -   -62 |
   22 | -3788    80    11   -19   -32  -231  2181    57 -3437     -  -117 |
   23 | -1385    98   -79    24   -11   -85  1618   117 -1446     -   -58 |
   24 | -5599    36   -46   248   -19    76 -2116   -46 -5288     -   -17 |
   25 |  -947   -50   -55   263    13   -39  2049    51  -748     -   -73 |
   26 | -2212    23   -29  -170    84  -413  3872    10 -2071     -   -25 |
   27 |   794  -119   -63    22    95  -143  3447    31   667     -    73 |
   28 |  2329   130   -43   -47   -63   136 -1526     X  2271     -    96 |
   29 | -2720    46    78     X   -88  -405  3601   -40 -2318     -   -36 |
   30 | -5113   -99   -51   299    82   160   716   -75 -4862     -   -45 |
   31 |  -877    14   -44  -179    19    53   476    90  -766     -    78 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   158   -97     -     -     -     -    40     -     -     X |
 ALGO |     -     -   -94   474     -     -     -   -31     -     -   -68 |
 AMC2 |     -   -41    88     -     -     -     -  -210     -     -    74 |
 ARTU |     -   124     -   188   -43     -     -   -68     -     -  -124 |
 AUCK |     -   -16     -     X     -     -     -     -     -     -    19 |
 BAHR |     -   -12   -20     -    99     -     -     -     -     -  -119 |
 BILI |     -    18     -     -   -58     -     -     -     -     -    84 |
 BOGT |     -  -233     -   -15   142     -     -     -     -     -    30 |
 BOR1 |     -     9    -4     -     -     -     -     -     -     -     X |
 BREW |     -     -    35     -     -     -     -   -74     -     -     X |
 BRUS |     -   -34    17     -     -     -     -     -     -     -     X |
 CAS1 |     -    23     -  -131   -27     -     -     -     -     -   114 |
 CEDU |     -     4     -    -6     -     -     -     -     -     -     X |
 CHUR |     -   373   -48     -     -     -     -   -82     -     -  -133 |
 COCO |     -    83     -  -100   -49     -     -     -     -     -    61 |
 CRO1 |     -   166    58   -39   -71     -     -   -32     -     -  -148 |
 DAV1 |     -   144     -     -   -27     -     -     -     -     -  -126 |
 DGAR |     -   -50     -     -     -     -     -    53     -     -     X |
 DRAO |     -    47   -60     -     -     -     -    79     -     -     0 |
 DWH1 |     -   245  -121     -     -     -     -     -     -     -     X |
 FAIR |     -     -    73   -66   -71     -     -     -     -     -     - |
 GLPS |     -    82     -     -   -53     -     -     -     -     -     - |
 GMAS |     -     -   107     -     -     -     -     -     -     -  -263 |
 GODE |     -    76   153  -290     -     -     -  -183     -     -   -55 |
 GOL2 |     -     -    14     -     -     -     -   -31     -     -     X |
 GOLD |     -     -     -  -301     -     -     -   185     -     -     X |
 GRAZ |     -     -    43     -     -     -     -     -     -     -  -107 |
 GUAM |     -     -     -  -343    25     -     -    -1     -     -   198 |
 GUAT |     -   168     -     -  -110     -     -     -     -     -     X |
 HLFX |     -     -   168     -     -     -     -  -359     -     -     X |
 HOB2 |     -   -72   178  -566     -     -     -     -     -     -     X |
 HRAO |     -   -70     -     -   -66     -     -    69     -     -   117 |
 IENG |     -  -121    60     -     -     -     -     -     -     -     - |
 IISC |     -     -     -  -158    60     -     -     -     -     -     - |
 INVK |     -   -21     -     -     -     -     -   -34     -     -    65 |
 ISPA |     -     -     -     -    96     -     -  -286     -     -   150 |
 JPLM |     -     -   -39     -   -97     -     -   273     -     -     X |
 KGN0 |     -   -54    27     -     -     -     -     -     -     -     X |
 KOKB |     -     -    50     -   -40     -     -   -56     -     -    15 |
 KOUR |     -   183     -  -330    -2     -     -     -     -     -     - |
 MAC1 |     -     7     -    55    -5     -     -     -     -     -   -39 |
 MAS1 |     -     -     7    26   -31     -     -    41     -     -   -26 |
 MATE |     -     -     -  -317   -19     -     -     -     -     -   258 |
 MBAR |     -   -75     -     -  -104     -     -   105     -     -   150 |
 MCM4 |     -    30  -308     -   389     -     -     -     -     -     - |
 MDO1 |     -    37    -7     -   -15     -     -     -     -     -     X |
 MKEA |     -    33     -   202     -     -     -     6     -     -  -188 |
 MONP |     -    -9     -     -     -     -     -   -12     -     -    25 |
 NKLG |     -   259     -     X  -170     -     -     -     -     -     - |
 NLIB |     -     -     -     -     -     -     -    27     -     -   -30 |
 NNOR |     -     -    73    -7     -     -     -  -152     -     -     X |
 NPLD |     -  -192    95     -     -     -     -     -     -     -     X |
 NRC1 |     -     -    59     -   -29     -     -     -     -     -   -92 |
 NRIL |     -     -     -     -   -81     -     -    12     -     -   135 |
 NTUS |     -   -11     -   136     -     -     -     -     -     -   -82 |
 OHI2 |     -   112     -    46     4     -     -     -     -     -  -176 |
 ONSA |     -     -    76    34  -112     -     -     -     -     -     - |
 PERT |     -     -     -   104     -     -     -     -     -     -   -74 |
 PIE1 |     -     -   110  -382     -     -     -     -     -     -     X |
 PTBB |     -    30   -15     -     -     -     -     -     -     -     X |
 QAQ1 |     -  -115    57     -     -     -     -     -     -     -     X |
 REUN |     -     -     -     -   -27     -     -     -     -     -    50 |
 RIOG |     -     3   -17     -    20     -     -     -     -     -     - |
 SANT |     -     X     -    31   -10     -     -     -     -     -    -3 |
 SCH2 |     -     -    78     -     -     -     -  -168     -     -     X |
 SFER |     -  -109    54     -     -     -     -     -     -     -     - |
 SHAO |     -  -155     -   267     -     -     -     -     -     -     X |
 SPT0 |     -  -146    72     -     -     -     -     -     -     -     - |
 STJO |     -    58    25     -     -     -     -   -44     -     -   -82 |
 SUTH |     -  -177     -     -     -     -     -     -     -     -   215 |
 TIDB |     -  -123    52    33     -     -     -     -     -     -     X |
 TOW2 |     -   -95     -     -    62     -     -     -     -     -     X |
 TRO1 |     -   133     -     -   -29     -     -     -     -     -  -109 |
 TSKB |     -   -69    -1    -8     -     -     -     -     -     -    92 |
 TWTF |     -   -92    46     -     -     -     -     -     -     -     X |
 UNSA |     -     -     -    22    -8     -     -     -     -     -     - |
 USN3 |     -    61     -     -     -     -     -   -64     -     -     X |
 USNO |     -   -45    40     -     -     -     -     -     -     -   -44 |
 USUD |     -     -   -34    31     -     -     -   -14     -     -    78 |
 VILL |     -     -     -    83   -32     -     -     -     -     -     X |
 WHIT |     -  -134     -     -     -     -     -   -12     -     -   176 |
 WILL |     -    -5     3     -     -     -     -     -     -     -     X |
 WTZR |     -  -115   138  -182     -     -     -     -     -     -   -78 |
 WUHN |     -     -   -15     -    81     -     -     -     -     -  -113 |
 YAR2 |     -  -143    71     -     -     -     -     -     -     -     X |
 YELL |     -   -71    28    65   -73     -     -     -     -     -   105 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5962   115    55    76   109    93  4389   126  5518     -   107 |  288   4.37
    3 |  2530    76    35    55    20    71  2075    45  1882     -   109 |  288   1.61
    4 |  1273    42    16    65    33    49  1127    59  1240     -    44 |  288   0.67
    5 |  5313    34    23    37    26    72  6336    54  5054     -    93 |  288   1.81
    6 |  1912    78    21    73    53    75  2363   146  2014     -    36 |  288   1.68
    7 |  1049    62    31    54    31    58  1193    42  1095     -    55 |  288   0.90
    8 |  4493    53    21    26    30    36  1966    70  3814     -    33 |  288   1.43
    9 |  3842    42    18    51    18    80  4791    32  3733     -    61 |  288   1.63
   10 |  3169    47    28    87    20    41  1964    42  2997     -    45 |  288   2.36
   11 |   986    47    34    52    24    52  1152    32  1021     -    47 |  288   0.42
   13 |   635    93    29    62    50   182   759    61   696     -    34 |  288   0.19
   14 |  1813    96    43   104    18    66  1671    49  1701     -    92 |  288   0.37
   15 |  3036    70    29    67    27    58  2116    67  3175     -    65 |  288   2.30
   16 |   803    24    26   116    55    30  2104    36   765     -    32 |  288   0.36
   17 |  2371    45    23    76    21    48  1435    56  2583     -    57 |  288   1.14
   18 |  1554    55    31    87    40    87  2040    38  1539     -    50 |  288   0.35
   19 |  1013    62    42   133    24   314  1108    61  1120     -    90 |  288   0.29
   20 |   501    57    34    59    33    93   338    68   542     -    78 |  288   0.24
   21 |  1278    66    32    87    31    58  1121    66  1270     -    60 |  288   0.25
   22 |  1918    56    30    64    30    61  1291    37  2019     -    36 |  288   0.31
   23 |   436    68    24    39    27   149  1074    57   497     -    80 |  288   0.37
   24 |  3203    39    30    68    20    24  2281    60  2544     -    36 |  288   2.67
   25 |  1544    44    33    39    31    55  2083    33  1683     -    50 |  288   1.52
   26 |  1664   106    34   110    34   202  1944    49  1763     -    42 |  288   1.04
   27 |   956    55    20    42    32    56  1167    28   886     -    36 |  288   0.94
   28 |  1731    35    29    59    30   108  1725     X  1736     -    82 |  288   0.76
   29 |  2566    84    32     X    37   189  2337    63  2682     -   108 |  280   0.62
   30 |  1886    35    25    44    26    97   873   110  1744     -    52 |  288   0.73
   31 |  1370    60    28    55    21    47  1037    56  1412     -    29 |  288   0.67
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    36    32     -     -     -     -    38     -     -     X |  288   0.14
 ALGO |     -     -     7    25     -     -     -    18     -     -    15 |  288   0.03
 AMC2 |     -    47    34     -     -     -     -    32     -     -    26 |  288   0.05
 ARTU |     -    49     -    42    52     -     -    47     -     -    41 |  280   9.82
 AUCK |     -    45     -     X     -     -     -     -     -     -    55 |  264  13.55
 BAHR |     -    37    34     -    19     -     -     -     -     -    45 |  288   0.49
 BILI |     -    17     -     -    13     -     -     -     -     -    18 |  287   7.15
 BOGT |     -    20     -    60    27     -     -     -     -     -    48 |  288  26.39
 BOR1 |     -    40    20     -     -     -     -     -     -     -     X |  288   0.72
 BREW |     -     -    20     -     -     -     -    43     -     -     X |  288   0.08
 BRUS |     -    23    11     -     -     -     -     -     -     -     X |  288   0.03
 CAS1 |     -    30     -   129    31     -     -     -     -     -    58 |  288   6.85
 CEDU |     -    99     -   170     -     -     -     -     -     -     X |  260  13.22
 CHUR |     -    28    17     -     -     -     -    50     -     -    38 |  288   0.06
 COCO |     -    20     -   101    30     -     -     -     -     -    34 |  288   7.24
 CRO1 |     -    40    20    51    19     -     -    43     -     -    33 |  288  14.37
 DAV1 |     -    22     -     -    19     -     -     -     -     -    31 |  288  12.48
 DGAR |     -    15     -     -     -     -     -    16     -     -     X |  287  21.81
 DRAO |     -    12     6     -     -     -     -    20     -     -    22 |  288   0.07
 DWH1 |     -    49    24     -     -     -     -     -     -     -     X |  288   0.64
 FAIR |     -     -    32    87    25     -     -     -     -     -     - |  288   0.31
 GLPS |     -    19     -     -    12     -     -     -     -     -     - |  287  27.48
 GMAS |     -     -    15     -     -     -     -     -     -     -    36 |  288   1.82
 GODE |     -    37    25    61     -     -     -    22     -     -    27 |  288   0.13
 GOL2 |     -     -    23     -     -     -     -    49     -     -     X |  284 199.97
 GOLD |     -     -     -    66     -     -     -    40     -     -     X |  175   8.49
 GRAZ |     -     -    16     -     -     -     -     -     -     -    39 |  288    >>>
 GUAM |     -     -     -    64    56     -     -    58     -     -   120 |  288  19.67
 GUAT |     -    20     -     -    13     -     -     -     -     -     X |  284    >>>
 HLFX |     -     -    25     -     -     -     -    54     -     -     X |  288   8.70
 HOB2 |     -    26    25    71     -     -     -     -     -     -     X |  288   0.04
 HRAO |     -    57     -     -    69     -     -    69     -     -    85 |  286    >>>
 IENG |     -    33    16     -     -     -     -     -     -     -     - |  288   0.47
 IISC |     -     -     -    57    22     -     -     -     -     -     - |  288  26.55
 INVK |     -    13     -     -     -     -     -    37     -     -    53 |  288   7.50
 ISPA |     -     -     -     -    18     -     -    27     -     -    25 |  288  19.87
 JPLM |     -     -    59     -    71     -     -    30     -     -     X |  288    >>>
 KGN0 |     -    30    15     -     -     -     -     -     -     -     X |  287   0.49
 KOKB |     -     -    26     -    46     -     -    47     -     -    28 |  288   0.11
 KOUR |     -    35     -    68    28     -     -     -     -     -     - |  285   2.11
 MAC1 |     -    47     -    90    51     -     -     -     -     -    35 |  288  15.21
 MAS1 |     -     -    23   104    39     -     -    24     -     -    89 |  286   1.69
 MATE |     -     -     -    32    18     -     -     -     -     -    29 |  288   0.04
 MBAR |     -    72     -     -    48     -     -    34     -     -    68 |  288  17.63
 MCM4 |     -    22    16     -    22     -     -     -     -     -     - |  288  23.89
 MDO1 |     -    22    10     -    19     -     -     -     -     -     X |  288  10.96
 MKEA |     -    23     -   107     -     -     -    43     -     -    23 |  288  23.33
 MONP |     -    14     -     -     -     -     -    16     -     -    21 |  287  10.48
 NKLG |     -    26     -     X    17     -     -     -     -     -     - |  276    >>>
 NLIB |     -     -     -     -     -     -     -    14     -     -    16 |  288   0.07
 NNOR |     -     -    26    71     -     -     -    56     -     -     X |  288  13.94
 NPLD |     -    32    16     -     -     -     -     -     -     -     X |  287   0.04
 NRC1 |     -     -     8     -    14     -     -     -     -     -    16 |  288   0.04
 NRIL |     -     -     -     -    15     -     -    29     -     -    17 |  288   8.22
 NTUS |     -    45     -    60     -     -     -     -     -     -    84 |  288   9.33
 OHI2 |     -    40     -    90    38     -     -     -     -     -   104 |  288   8.33
 ONSA |     -     -    28    50    20     -     -     -     -     -     - |  288   0.02
 PERT |     -     -     -   110     -     -     -     -     -     -    77 |  252    >>>
 PIE1 |     -     -    24    83     -     -     -     -     -     -     X |  288   0.14
 PTBB |     -    19     9     -     -     -     -     -     -     -     X |  288   0.25
 QAQ1 |     -    18     9     -     -     -     -     -     -     -     X |  288   6.22
 REUN |     -     -     -     -    26     -     -     -     -     -    48 |  288  17.50
 RIOG |     -    36    20     -    23     -     -     -     -     -     - |  285  10.23
 SANT |     -     X     -   117    17     -     -     -     -     -    88 |  288   9.17
 SCH2 |     -     -    13     -     -     -     -    27     -     -     X |  288  16.30
 SFER |     -    31    15     -     -     -     -     -     -     -     - |  285   0.54
 SHAO |     -    23     -    39     -     -     -     -     -     -     X |  288  17.78
 SPT0 |     -    26    13     -     -     -     -     -     -     -     - |  284   0.03
 STJO |     -    16     6     -     -     -     -    23     -     -    20 |  288   0.12
 SUTH |     -    33     -     -     -     -     -     -     -     -    40 |  288  15.02
 TIDB |     -    28    22    63     -     -     -     -     -     -     X |  288   0.19
 TOW2 |     -    69     -     -    45     -     -     -     -     -     X |  288   8.62
 TRO1 |     -    30     -     -    21     -     -     -     -     -    40 |  288   8.75
 TSKB |     -    14    20    57     -     -     -     -     -     -    32 |  288   1.31
 TWTF |     -    36    18     -     -     -     -     -     -     -     X |  288   0.59
 UNSA |     -     -     -    42    16     -     -     -     -     -     - |  285  19.24
 USN3 |     -    22     -     -     -     -     -    23     -     -     X |  288   0.04
 USNO |     -   138    48     -     -     -     -     -     -     -   122 |  247   0.13
 USUD |     -     -    34    51     -     -     -    39     -     -    29 |  288  10.46
 VILL |     -     -     -    34    13     -     -     -     -     -     X |  288  13.71
 WHIT |     -    12     -     -     -     -     -    25     -     -    28 |  288   1.51
 WILL |     -    59    29     -     -     -     -     -     -     -     X |  288 101.79
 WTZR |     -    41    46    88     -     -     -     -     -     -    46 |  288   0.06
 WUHN |     -     -    37     -    52     -     -     -     -     -    25 |  287  17.16
 YAR2 |     -    33    16     -     -     -     -     -     -     -     X |  288  11.07
 YELL |     -   141    29    55    50     -     -     -     -     -    32 |  287   0.03
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2493    51    27    75    35   107  2284    52  2362     -    57 |


 BEST CLOCK FIT: ONSA   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   10.41   | 4.77e-14  9.44e-15  3.27e-15 |
 AMC2 |   288     0     0   288   10.41   | 3.81e-14  7.18e-15  1.74e-15 |
 NPLD |   287     0     0   286   10.30   | 3.78e-14  5.90e-15  3.52e-15 |
 USNO |   247     0     0   239    8.63   | 5.12e-14  9.85e-15         - |
 NLIB |   288     0     0   288    8.59   | 3.31e-14  4.88e-15  3.64e-15 |
 BREW |   288     0     0   288    7.64   | 3.91e-14  6.40e-15  2.67e-15 |
 SPT0 |   284     0     0   283    6.18   | 4.63e-14  6.44e-15  2.54e-15 |
 ALBH |   288     0     0   288    5.37   | 3.73e-14  1.06e-14  6.02e-15 |
 WTZR |   288     0     0   288    4.39   | 4.96e-14  1.08e-14  6.30e-15 |
 KOKB |   288     0     0   288    3.87   | 5.09e-14  1.75e-14  4.00e-15 |
 ONSA |   288     0     0   288    3.51   | 3.97e-14  7.80e-15  4.05e-15 |
 YELL |   287     0     0   286    2.58   | 2.91e-14  5.53e-15  2.14e-15 |
 DRAO |   288     0     0   288    2.55   | 6.86e-14  1.93e-14  7.24e-15 |
 ALGO |   288     0     0   288    2.41   | 2.94e-14  6.16e-15  4.80e-15 |
 USN3 |   288     0     2   161    2.18   | 8.30e-14  1.15e-14  2.83e-15 |
 MATE |   288     0     0   288    1.95   | 6.87e-14  1.75e-14  4.05e-15 |
 GOL2 |   284     1     0   281    1.84   | 3.72e-14  8.27e-15  5.22e-15 |
 NRC1 |   288     0     0   288    1.38   | 6.84e-14  1.02e-14  1.51e-15 |
 TIDB |   288     1     0   287    1.13   | 1.85e-13  2.04e-14  8.23e-15 |
 PIE1 |   288     0     0   288    1.09   | 4.31e-14  8.25e-15  6.12e-15 |
 HOB2 |   288     0     0   288    1.00   | 6.38e-14  1.20e-14  3.06e-15 |
 CHUR |   288     0     0   288    0.75   | 5.32e-14  1.53e-14  4.66e-15 |
 STJO |   288     0     0   143    0.23   | 3.03e-14  7.65e-15  9.30e-15 |
 GODE |   288     0     0   288    0.22   | 3.41e-14  9.86e-15  9.19e-15 |
 PTBB |   288     1     0   287    0.14   | 3.64e-13  7.15e-14  2.42e-14 |
 G16  |   288     1     0   287    0.14   | 4.94e-13  5.48e-14  4.52e-14 |
 KGN0 |   287     0     0   286    0.11   | 3.64e-13  1.09e-13  4.43e-14 |
 G23  |   288     1     0   287    0.10   | 5.12e-13  1.55e-13  2.39e-14 |
 SFER |   285     0     0   283    0.09   | 3.95e-13  1.21e-13  4.20e-14 |
 G29  |   280     1     0   277    0.09   | 4.17e-13  1.08e-13  5.51e-14 |
 TWTF |   288     1     0   287    0.08   | 3.81e-13  1.18e-13  4.59e-14 |
 G30  |   288     1     0   287    0.08   | 3.34e-13  1.01e-13  9.40e-14 |
 G19  |   288     1     0   195    0.07   | 6.19e-13  8.73e-14  2.25e-14 |
 BOR1 |   288     1     0   287    0.06   | 4.60e-13  1.26e-13  6.31e-14 |
 G27  |   288     1     0   287    0.05   | 3.26e-13  9.98e-14  8.53e-14 |
 DWH1 |   288     1     0   287    0.05   | 4.86e-13  1.43e-13  5.74e-14 |
 G04  |   288     1     0   287    0.05   | 4.45e-13  1.26e-13  8.24e-14 |
 G06  |   288     1     0   287    0.05   | 4.40e-13  1.52e-13  1.13e-13 |
 IENG |   288     1     0   287    0.04   | 5.08e-13  1.59e-13  3.59e-14 |
 G07  |   288     1     0   287    0.04   | 2.91e-13  9.13e-14  1.24e-13 |
 BAHR |   288     1     0   287    0.03   | 6.42e-13  1.36e-13  4.16e-14 |
 G13  |   288     1     4    26    0.03   | 5.66e-13  6.04e-14  1.52e-14 |
 G31  |   288     1     0   287    0.03   | 2.16e-13  1.35e-13  4.68e-14 |
 G17  |   288     1     0   287    0.02   | 6.11e-13  1.70e-13  1.50e-13 |
 G26  |   288     1     0   287    0.02   | 3.42e-13  1.32e-13  9.72e-14 |
 TSKB |   288     1     0   287    0.01   | 1.02e-12  2.80e-13  1.07e-13 |
 FAIR |   288     1     0   287    0.01   | 3.90e-13  1.03e-13  2.21e-14 |
 G05  |   288     1     0   287    0.01   | 1.38e-12  5.24e-13  1.20e-13 |
 G24  |   288     1     0   287    0.01   | 1.30e-12  3.88e-13  3.25e-13 |
 KOUR |   285     0     0   282    0.01   | 1.40e-12  4.72e-13  2.65e-13 |
 G10  |   288     1     0   287    0.00   | 1.30e-12  4.18e-13  2.99e-13 |
 G15  |   288     1     0   287    0.00   | 1.58e-12  6.30e-13  2.73e-13 |
 MAS1 |   286     1     0   284    0.00   | 1.87e-12  3.84e-13  1.35e-13 |
 WHIT |   288     1     0   287    0.00   | 5.01e-13  2.44e-13  9.84e-14 |
 GMAS |   288     0     0   143    0.00   | 1.03e-12  4.07e-13  1.37e-13 |
 G08  |   288     1     2    56    0.00   | 1.30e-12  4.54e-13  1.66e-13 |
 GPST |   288     0     0     0    0.00   | 2.43e-14  5.43e-15  3.05e-15 |
 GOLD |   175     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   276     1     0     0    0.00   |        -         -         - |
 MONP |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.72e-13  7.98e-14  4.84e-14 |
 G25  |   288     1     0     0    0.00   | 1.44e-12  4.37e-13  1.15e-13 |
 G22  |   288     1     6     0    0.00   | 6.10e-13  6.73e-14  1.71e-14 |
 G21  |   288     1     6     0    0.00   | 7.66e-13  9.71e-14  1.94e-14 |
 G20  |   288     1     6     0    0.00   | 6.93e-13  7.34e-14  2.18e-14 |
 G18  |   288     2     6     0    0.00   | 1.07e-12  1.40e-13  5.81e-14 |
 G14  |   288     1     4     0    0.00   | 6.20e-13  6.29e-14  2.21e-14 |
 G11  |   288     1     6     0    0.00   | 8.75e-13  8.03e-14  5.14e-14 |
 G09  |   288     1     0     0    0.00   | 1.44e-12  4.60e-13  1.63e-13 |
 G03  |   288     1     0     0    0.00   | 1.39e-12  3.89e-13  1.00e-13 |
 G01  |   288     1     0     0    0.00   | 1.63e-12  7.57e-13  4.91e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   285     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SHAO |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     1     0     0    0.00   | 6.73e-13  4.33e-13  1.03e-12 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   285     0     0     0    0.00   |        -         -         - |
 REUN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   252     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   | 7.51e-13  7.56e-13  6.82e-13 |
 MCM4 |   288     1     1     0    0.00   | 6.59e-13  5.20e-13  1.35e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     2     1     0    0.00   | 5.98e-13  4.55e-13  1.08e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HRAO |   286     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     0     0    0.00   | 1.76e-13  1.40e-13  5.87e-13 |
 GUAT |   284     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   287     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     1     0     0    0.00   | 3.22e-13  1.33e-12  7.37e-13 |
 CEDU |   260     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   280     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.19e-17  2.63e-16  1.58e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      NLIB      NRC1 |
------------------------------------------+------------------------------+
