
 GPS week: 1296   Day: 3   MJD: 53319                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2780      0     0.01    -0.01     3.26     0.00      0
 cod |   288     0  27909    595     0.07    -0.20     0.06    21.10      0
 emr |   288     0  23931     68     7.81     1.91     0.07    14.37      0
 esa |   288     0  19613   1205  3189.26    53.85     0.09    10.95      0
 gfz |   288     0  20209    272    -0.42     0.55     0.05    23.11      0
 iga |    96     0   2682     18     0.00    -0.02     0.15     0.00      0
 igu |    96     0   2688      0    -0.03     0.01     3.44     0.00      0
 jpl |   288     0  17009    643    -4.98     1.22     0.08    12.29      0
 ngs |    96     0   2780      0     0.00    -0.01     3.19     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  36462   2153     7.63     2.02     0.06    18.18      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  7826    95  -186   -14    62   -36  5473    97  5198     -  -104 |
    3 | -3722  -104   -41   143    77  -215  -947    68 -3047     -   -73 |
    4 | -2592   -78    20    99    35  -511  -122     5 -2183     -   -33 |
    5 |  2385    -2   -21   -78    59   400 13519    60  2338     -   -48 |
    6 | -3717   -83  -136   183   119  -536-15866   -43 -3527     -   -29 |
    7 | -2072   -64   208  -119    35   432 -3222    69 -2381     -  -106 |
    8 | -1414   -63    14    17    19    98 -4573    39 -1862     -     3 |
    9 |  -853  -141   -62   450    39  -618  4803   -67 -1209     -   -60 |
   10 | -3729    51  -130  -106    59   578  1501    24 -3722     -    16 |
   11 |  4226    37    21    16   -39  -298  2128    85  4272     -   -76 |
   13 |  6063    87  -118   132   -23  -484   963     X  5944     -   -59 |
   14 | -3485     5   -21   -55   -41   -70  -126   179 -2385     -   -26 |
   15 |  2513   -88   -61   514    38   402  7295     1  1906     -  -188 |
   16 |  3676   -11  -150   211   -40   -18    92   296  3784     -  -145 |
   17 | -1232     7   153  -126    58   256  4176    27 -1727     -  -145 |
   18 |  3565    15  -190    88   117   -36   808    -8  3712     -   -63 |
   19 |  4027    75  -164    80    30  2743  3123   162  4172     -  -151 |
   20 |  4639    80   -88    74   -47   418  1005   109  4594     -   -81 |
   21 |  5795    30   -19    38     7   341  1513   121  5307     -  -133 |
   22 | -5199   107    14  -249    47  -448 -2415   129 -4758     -  -131 |
   23 |  -714    84  -180   150     1  -102  -902     X  -936     -   -47 |
   24 | -5408    21    87    18    38  -371 -8249   -62 -4383     -  -112 |
   25 |  1382    68   -73   -35    36  -677  1607    98   779     -  -112 |
   26 | -2481    27   -65    38    49  -517  1006     3 -2359     -   -76 |
   27 |   484   -34    -6    76   -21  -284  -965   112   478     -   -51 |
   28 | -1149     3   -42  -104   -61   200  3023   212  -515     -    27 |
   29 | -2331     -   101     X     X     -     -   -17 -1733     -   -69 |
   30 | -4569   -43   -14    10   105  -330 -7382    23 -3983     -   -94 |
   31 | -2027   -31   -57   -95   140   285 -7268    10 -1841     -   -44 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -  -146     -     -     -     -    22     -     -   100 |
 ALRT |     -   -45     -     -    41     -     -     -     -     -     - |
 AMC2 |     -   -39     -     -     -     -     -  -280     -     -   234 |
 ARTU |     -     -     -   112   -42     -     -   -21     -     -     X |
 AUCK |     -    -8     -     X     -     -     -     -     -     -     9 |
 BAHR |     -   -12   -61     -   158     -     -     -     -     -  -139 |
 BILI |     -   320     -     -  -292     -     -     -     -     -     X |
 BJFS |     -     -     -     -  -104     -     -     -     -     -   132 |
 BOGT |     -  -100     -   -40   122     -     -     -     -     -   -18 |
 BOR1 |     -   -33   -10     -     -     -     -     -     -     -    45 |
 BREW |     -     -  -144     -     -     -     -     -     -     -   114 |
 BRMU |     -     -     -     -    64     -     -     -     -     -   -81 |
 BRUS |     -    12    21     -     -     -     -   -61     -     -    10 |
 CAGZ |     -   136     -     -     -     -     -     -     -     -  -158 |
 CAS1 |     -   -20     -    79    39     -     -     -     -     -   -73 |
 CEDU |     -     -     -   400     -     -     -     -     -     -  -241 |
 CHAT |     -     6     -     -     -     -     -     -     -     -    -7 |
 CHUR |     -     -    24     -     -     -     -   -33     -     -     6 |
 COCO |     -     5     -   136   -33     -     -     -     -     -   -45 |
 CRO1 |     -     -     3   -45    26     -     -    13     -     -   -17 |
 DAV1 |     -    17     -     -    -1     -     -     -     -     -   -18 |
 DGAR |     -  -137     -     -     -     -     -   132     -     -    70 |
 DRAO |     -     X   -68   119     -     -     -   -54     -     -    18 |
 DWH1 |     -   123  -169     -     -     -     -     -     -     -    -9 |
 FAIR |     -     -    29   -39     -     -     -     -     -     -     - |
 FORT |     -     -  -100    60    36     -     -     -     -     -     - |
 GLPS |     -    38     -     -   -48     -     -     -     -     -    16 |
 GMAS |     -     -   170     -     -     -     -  -199     -     -     X |
 GODE |     -     -    76  -283     -     -     -     -     -     -   109 |
 GODZ |     -     -     -     -     -     -     -  -189     -     -   127 |
 GOL2 |     -     -     -     -     -     -     -  -146     -     -    99 |
 GOLD |     -    41     -   -77     -     -     -  -126     -     -    84 |
 GRAZ |     -     -    58     -     -     -     -     -     -     -   -46 |
 GUAM |     -     -     -  -399   185     -     -  -263     -     -   184 |
 GUAT |     -   249     -     -  -182     -     -     -     -     -   -57 |
 HLFX |     -     -    99     -     -     -     -  -115     -     -     X |
 HOB2 |     -  -106   161     -     -     -     -     -     -     -    -4 |
 HOFN |     -     -     -     -   -67     -     -     -     -     -    85 |
 HRAO |     -   -39     -     -   -73     -     -    91     -     -    77 |
 IENG |     -   -75   110     -     -     -     -     -     -     -     - |
 IISC |     -   -12     -   -28    24     -     -     -     -     -     - |
 INVK |     -    27     -     -     -     -     -   -46     -     -     X |
 ISPA |     -   -41     -     -    61     -     -   -65     -     -    14 |
 JAB1 |     -     0     -     1     -     -     -     -     -     -     - |
 JPLM |     -     -  -235     -     -     -     -    73     -     -   136 |
 KERG |     -     -  -114   -41   240     -     -     -     -     -  -204 |
 KGN0 |     -    -6    19     -     -     -     -     -     -     -    -8 |
 KIRU |     -   -84     -     -     -     -     -     -     -     -    98 |
 KIT3 |     -     -     -   -45     -     -     -     -     -     -    27 |
 KOKB |     -     -   -12     -   -22     -     -   -70     -     -    82 |
 KOSG |     -   -10     -     -     -     -     -     -     -     -    12 |
 KOUR |     -   196     -  -398   -76     -     -     -     -     -   114 |
 KUNM |     -     -     -     -     -     -     -    17     -     -   -12 |
 LPGS |     -    73    51  -372     -     -     -     -     -     -   100 |
 MAC1 |     -    36     -    51   -78     -     -     -     -     -    31 |
 MADR |     -     -     -     -     -     -     -   147     -     -  -100 |
 MAS1 |     -     -    63  -243     -     -     -     -     -     -    96 |
 MATE |     -    86     -  -544     -     -     -     -     -     -   224 |
 MBAR |     -   -58     -     -   -17     -     -   -57     -     -   120 |
 MCM4 |     -   411   126     -  -451     -     -     -     -     -     - |
 MDO1 |     -     -   -85     -  -131     -     -     -     -     -   234 |
 MEDI |     -     -   -47     -     -     -     -     -     -     -    37 |
 METS |     -  -115   110     -     -     -     -     -     -     -    46 |
 MIZU |     -     -   -66     X     -     -     -    11     -     -    42 |
 MKEA |     -     -     -  -200     -     -     -     -     -     -   121 |
 MONP |     -    -4     -     -     -     -     -     -     -     -     5 |
 MSKU |     -    33     -     -   -30     -     -     -     -     -     - |
 NKLG |     -     -     -     0     -     -     -     -     -     -     0 |
 NLIB |     -     -   -29     -     -     -     -     -     -     -    23 |
 NNOR |     -     -   153    -8     -     -     -     -     -     -  -116 |
 NPLD |     -   -71    75     -     -     -     -     -     -     -    23 |
 NRC1 |     -     -   -80     -    11     -     -     -     -     -    50 |
 NRIL |     -     -     -     -   -87     -     -   164     -     -     X |
 NSSP |     -   -33     -     -     -     -     -    22     -     -    23 |
 NTUS |     -   -72     -   108     -     -     -     -     -     -    18 |
 NYA1 |     -   136     -     -  -104     -     -     -     -     -   -24 |
 OHI2 |     -    33     -   135   -19     -     -     -     -     -   -96 |
 ONSA |     -   -49    56    24     -     -     -     -     -     -     - |
 PERT |     -   -57   -10  -168   171     -     -     -     -     -   -43 |
 PETP |     -    32     -     -   -29     -     -     -     -     -     - |
 PIE1 |     -  -130     5   -32     -     -     -     -     -     -   164 |
 PIMO |     -     -     -   620     -     -     -     -     -     -  -374 |
 POL2 |     -     8     -     -     -     -     -   -95     -     -    55 |
 POTS |     -    38     -     -   -26     -     -     -     -     -   -11 |
 PRDS |     -     -  -158     -     -     -     -     -     -     -   125 |
 PTBB |     -   -23    33     -     -     -     -     -     -     -     1 |
 RESO |     -    20     -     -     -     -     -   -34     -     -     - |
 REUN |     -     -     -     -  -179     -     -     -     -     -   228 |
 RIOG |     -    96    67     -  -182     -     -     -     -     -    66 |
 SANT |     -   -88     -   240   -34     -     -     -     -     -     - |
 SCH2 |     -     -   -53     -     -     -     -     -     -     -    42 |
 SFER |     -   -32    46     -     -     -     -     -     -     -     - |
 SPT0 |     -  -109   149     -     -     -     -     -     -     -    10 |
 STJO |     -    21   -32     -     -     -     -     -     -     -     X |
 STR1 |     -     -    75     -     -     -     -     -     -     -   -59 |
 THTI |     -     -    61    57   -35     -     -     -     -     -   -39 |
 THU3 |     -    64   144     -     -     -     -     -     -     -  -188 |
 TIDB |     -  -164    49   245     -     -     -     -     -     -     2 |
 TLSE |     -     -     0     -     -     -     -     -     -     -     0 |
 TRO1 |     -   -20     -     -   112     -     -     -     -     -  -150 |
 TSKB |     -   -55    71    32     -     -     -     -     -     -    -4 |
 TWTF |     -  -177   209     -     -     -     -   -81     -     -    96 |
 URUM |     -    47     -     -   -56     -     -     -     -     -    16 |
 USN3 |     -     8     -     -     -     -     -   -64     -     -    34 |
 USNO |     -    53   -93     -     -     -     -     -     -     -     9 |
 USUD |     -     -   -40    52     -     -     -     -     -     -     X |
 VILL |     -     -     -   -49   -84     -     -     -     -     -   136 |
 WHIT |     -   -26     -     -     -     -     -  -230     -     -   181 |
 WILL |     -   -99    86     -     -     -     -     -     -     -    35 |
 WTZR |     -    29   184  -130     -     -     -     -     -     -  -100 |
 WUHN |     -  -224   188     -   225     -     -     -     -     -  -175 |
 YAR2 |     -   -39   157     -     -     -     -     -     -     -   -79 |
 YEBE |     -     -    -7     -     -     -     -     -     -     -     5 |
 YELL |     -     X   -31     X  -124     -     -     -     -     -   179 |
 ZAMB |     -   156     -     -     -     -     -  -267     -     -     - |
 ZWEN |     -     -     -  -428     -     -     -     -     -     -   258 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  7323    93   119    98    95    89  6421   141  7825     -    67 |  288   4.72
    3 |  3700    39    58   134    49   179  1988    67  2882     -    62 |  288   1.69
    4 |  2015    56   101    46    30   308   807    58  1818     -    43 |  288   0.62
    5 |  5695    20    84    62    28    87  8348    40  5588     -    48 |  288   1.62
    6 |  1272   142   102   180    63    62  9392    67  1119     -    84 |  288   1.30
    7 |  2254   110   144   116    94   127  2201   128  1953     -   155 |  288   0.67
    8 |  2893    49    71    44    40    78  2426    92  2496     -    97 |  288   1.37
    9 |  4134    47   141    69    21   127  1603    49  3935     -    80 |  288   2.10
   10 |  3698    33   131    52    45    78  2666    45  3650     -    50 |  288   2.85
   11 |   962    60    57    40    24   153  1297   104   866     -    21 |  288   0.35
   13 |   470    62    49   108    32   103   514     X   482     -    80 |  288   0.27
   14 |  4098    65    59   101    41   140  1046   134  3768     -    56 |  288   0.35
   15 |  2520    57   122    39    22    84  4168    76  3179     -   129 |  288   2.89
   16 |   449    42   117    66    71    82   606    51   601     -    62 |  288   0.33
   17 |  4727    68   152    91    58    96  2940    25  4511     -    68 |  288   0.91
   18 |   427    35    62    53    35   136   716   125   445     -    37 |  288   0.35
   19 |   747    45   125   172    35   274  1110   123   667     -    80 |  288   0.40
   20 |   597    60    46    40    22   264   779    98   608     -    43 |  288   0.25
   21 |  2295    58    85    70    24   222   728   100  2267     -    86 |  288   0.34
   22 |  1790    42   145    66    37   150  1187   116  1698     -    71 |  288   0.40
   23 |   961    47    35    84    36   111   793     X   844     -    60 |  288   0.42
   24 |  4934    44    63    70    32   171  3273    41  4763     -    40 |  288   3.33
   25 |  6602    53    81    69    29    76  4869    77  6751     -    44 |  288   3.11
   26 |  2534   101   143   159    88   256  1815    70  2399     -   126 |  288   0.95
   27 |  1067    53    68    78    25    81   774   143  1229     -    66 |  288   0.42
   28 |  2971    64   124   149    40   110  2143    92  2396     -    50 |  288   0.66
   29 |  2340     -   120     X     X     -     -   148  2672     -    57 |  276   1.06
   30 |  2895    27    78    76    38    95  5144    23  2496     -    71 |  288   1.00
   31 |  2437    99    97   110   124   155  2708   100  2057     -    80 |  288   1.04
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    24     -     -     -     -    43     -     -    25 |  287   0.07
 ALRT |     -    17     -     -    15     -     -     -     -     -     - |  288   5.45
 AMC2 |     -    25     -     -     -     -     -    37     -     -    32 |  269   0.04
 ARTU |     -     -     -    27    24     -     -    40     -     -     X |  288  11.62
 AUCK |     -    26     -     X     -     -     -     -     -     -    30 |  264  14.34
 BAHR |     -    59    49     -    34     -     -     -     -     -    28 |  288   0.68
 BILI |     -   209     -     -   191     -     -     -     -     -     X |  176   8.29
 BJFS |     -     -     -     -    27     -     -     -     -     -    34 |  287  15.04
 BOGT |     -    39     -    66    72     -     -     -     -     -   115 |  281  25.18
 BOR1 |     -    27    29     -     -     -     -     -     -     -    21 |  288   0.85
 BREW |     -     -    16     -     -     -     -     -     -     -    13 |  288   0.08
 BRMU |     -     -     -     -    17     -     -     -     -     -    21 |  288    >>>
 BRUS |     -    25    50     -     -     -     -    63     -     -    34 |  288   0.05
 CAGZ |     -    14     -     -     -     -     -     -     -     -    16 |  288    >>>
 CAS1 |     -    36     -    70    16     -     -     -     -     -    74 |  288   7.64
 CEDU |     -     -     -    59     -     -     -     -     -     -    36 |  288  12.93
 CHAT |     -    24     -     -     -     -     -     -     -     -    28 |  287  11.65
 CHUR |     -     -    47     -     -     -     -   128     -     -    62 |  265   0.21
 COCO |     -    31     -    51    28     -     -     -     -     -    58 |  288   5.56
 CRO1 |     -     -    35    70    26     -     -    46     -     -    44 |  288  20.87
 DAV1 |     -    53     -     -    35     -     -     -     -     -   101 |  288  13.28
 DGAR |     -    19     -     -     -     -     -    70     -     -    40 |  288  10.33
 DRAO |     -     X    51    30     -     -     -    45     -     -    52 |  288   0.08
 DWH1 |     -    29    27     -     -     -     -     -     -     -    21 |  288   0.79
 FAIR |     -     -    76   100     -     -     -     -     -     -     - |  194   0.89
 FORT |     -     -    65    83    54     -     -     -     -     -     - |  288   0.15
 GLPS |     -    44     -     -    15     -     -     -     -     -    42 |  288  26.33
 GMAS |     -     -    37     -     -     -     -    43     -     -     X |  288   2.63
 GODE |     -     -    30    83     -     -     -     -     -     -    33 |  288   0.36
 GODZ |     -     -     -     -     -     -     -    31     -     -    21 |  288  13.48
 GOL2 |     -     -     -     -     -     -     -    31     -     -    21 |  288 446.17
 GOLD |     -    37     -    91     -     -     -    48     -     -    44 |  288   9.22
 GRAZ |     -     -    15     -     -     -     -     -     -     -    12 |  284    >>>
 GUAM |     -     -     -    80    33     -     -   121     -     -    77 |  288  25.17
 GUAT |     -    46     -     -    23     -     -     -     -     -    33 |  288    >>>
 HLFX |     -     -    34     -     -     -     -    40     -     -     X |  288   3.42
 HOB2 |     -    46    47     -     -     -     -     -     -     -    59 |  288   0.06
 HOFN |     -     -     -     -    89     -     -     -     -     -   113 |  229    >>>
 HRAO |     -    28     -     -    34     -     -    57     -     -    53 |  288   0.87
 IENG |     -    21    31     -     -     -     -     -     -     -     - |  288   1.20
 IISC |     -    43     -    91    23     -     -     -     -     -     - |  288  22.69
 INVK |     -    45     -     -     -     -     -    76     -     -     X |  276   5.86
 ISPA |     -    26     -     -    32     -     -   114     -     -    41 |  288  24.62
 JAB1 |     -    24     -    47     -     -     -     -     -     -     - |  286  12.40
 JPLM |     -     -    23     -     -     -     -    26     -     -    16 |  288  15.52
 KERG |     -     -   138   207   111     -     -     -     -     -   139 |  288   1.77
 KGN0 |     -    66    87     -     -     -     -     -     -     -    34 |  259   0.52
 KIRU |     -    55     -     -     -     -     -     -     -     -    64 |  263   5.60
 KIT3 |     -     -     -   103     -     -     -     -     -     -    62 |  155  11.80
 KOKB |     -     -   106     -    98     -     -    75     -     -    33 |  282   0.14
 KOSG |     -    35     -     -     -     -     -     -     -     -    41 |  288  94.23
 KOUR |     -    25     -    45    29     -     -     -     -     -    56 |  288   2.79
 KUNM |     -     -     -     -     -     -     -    50     -     -    34 |  288  23.37
 LPGS |     -    32    88    60     -     -     -     -     -     -    73 |  288  27.88
 MAC1 |     -    51     -   128    43     -     -     -     -     -    72 |  288  12.36
 MADR |     -     -     -     -     -     -     -   139     -     -    94 |  288  24.98
 MAS1 |     -     -    37    34     -     -     -     -     -     -    36 |  288   1.52
 MATE |     -    30     -    33     -     -     -     -     -     -    26 |  288   0.11
 MBAR |     -    71     -     -    57     -     -   132     -     -    47 |  288  22.01
 MCM4 |     -    21    31     -    20     -     -     -     -     -     - |  288  41.38
 MDO1 |     -     -    52     -    54     -     -     -     -     -    55 |  223 934.05
 MEDI |     -     -    18     -     -     -     -     -     -     -    14 |  288   0.12
 METS |     -    34    28     -     -     -     -     -     -     -    24 |  287   9.36
 MIZU |     -     -    64     X     -     -     -   105     -     -    35 |  257   0.97
 MKEA |     -     -     -   172     -     -     -     -     -     -   104 |  278  17.61
 MONP |     -    14     -     -     -     -     -     -     -     -    16 |  287   9.60
 MSKU |     -    43     -     -    40     -     -     -     -     -     - |  287  23.38
 NKLG |     -     -     -    61     -     -     -     -     -     -    37 |  287 317.27
 NLIB |     -     -    25     -     -     -     -     -     -     -    20 |  288   0.05
 NNOR |     -     -    62    68     -     -     -     -     -     -    37 |  288  16.24
 NPLD |     -    29    42     -     -     -     -     -     -     -    24 |  287   0.04
 NRC1 |     -     -    29     -    54     -     -     -     -     -    53 |  288   0.03
 NRIL |     -     -     -     -    44     -     -    83     -     -     X |  268   9.40
 NSSP |     -    21     -     -     -     -     -    59     -     -    35 |  288  12.97
 NTUS |     -    22     -    33     -     -     -     -     -     -    25 |  288  35.94
 NYA1 |     -    43     -     -    35     -     -     -     -     -    91 |  288   0.07
 OHI2 |     -    40     -   102    45     -     -     -     -     -    90 |  288   7.91
 ONSA |     -    30    39    38     -     -     -     -     -     -     - |  288   0.07
 PERT |     -    31    40    71    27     -     -     -     -     -    34 |  288   2.33
 PETP |     -    36     -     -    32     -     -     -     -     -     - |  287  11.20
 PIE1 |     -    48    37    30     -     -     -     -     -     -    40 |  286   0.88
 PIMO |     -     -     -   122     -     -     -     -     -     -    73 |  133  22.44
 POL2 |     -    27     -     -     -     -     -    35     -     -    41 |  288  17.41
 POTS |     -    42     -     -    29     -     -     -     -     -    67 |  288  17.91
 PRDS |     -     -    63     -     -     -     -     -     -     -    50 |  272   1.59
 PTBB |     -    26    39     -     -     -     -     -     -     -    21 |  288   0.30
 RESO |     -    12     -     -     -     -     -    21     -     -     - |  288   6.59
 REUN |     -     -     -     -    18     -     -     -     -     -    23 |  288   9.23
 RIOG |     -    27    61     -    37     -     -     -     -     -    31 |  216  15.87
 SANT |     -    18     -    74    29     -     -     -     -     -     - |  288  12.16
 SCH2 |     -     -    38     -     -     -     -     -     -     -    30 |  214   5.61
 SFER |     -    29    42     -     -     -     -     -     -     -     - |  285   0.24
 SPT0 |     -    34    71     -     -     -     -     -     -     -    43 |  288   0.06
 STJO |     -    35    51     -     -     -     -     -     -     -     X |  286 478.55
 STR1 |     -     -    47     -     -     -     -     -     -     -    37 |  288   0.51
 THTI |     -     -    81    76    21     -     -     -     -     -    27 |  288   6.62
 THU3 |     -    41    36     -     -     -     -     -     -     -    32 |  288   6.91
 TIDB |     -    28    33    57     -     -     -     -     -     -    27 |  288   0.12
 TLSE |     -     -    20     -     -     -     -     -     -     -    16 |  287   0.54
 TRO1 |     -    40     -     -    26     -     -     -     -     -    77 |  280   8.27
 TSKB |     -   169   131    93     -     -     -     -     -     -   119 |  285   1.06
 TWTF |     -    50    54     -     -     -     -    44     -     -    29 |  288   0.41
 URUM |     -    61     -     -    45     -     -     -     -     -   122 |  287  17.97
 USN3 |     -    41     -     -     -     -     -    27     -     -    58 |  288   0.05
 USNO |     -    94    83     -     -     -     -     -     -     -    55 |  213   0.15
 USUD |     -     -    76   100     -     -     -     -     -     -     X |  248  11.84
 VILL |     -     -     -    35    15     -     -     -     -     -    17 |  288  23.42
 WHIT |     -   191     -     -     -     -     -    91     -     -   212 |  240   1.73
 WILL |     -    44    66     -     -     -     -     -     -     -    69 |  276 123.81
 WTZR |     -    41    41    28     -     -     -     -     -     -    43 |  288   0.08
 WUHN |     -    58    38     -    29     -     -     -     -     -    57 |  287  18.47
 YAR2 |     -    20    42     -     -     -     -     -     -     -    39 |  288 141.39
 YEBE |     -     -    23     -     -     -     -     -     -     -    18 |  285 912.32
 YELL |     -     X    70     X    91     -     -     -     -     -    87 |  264   0.09
 ZAMB |     -    39     -     -     -     -     -    67     -     -     - |  246  15.52
 ZWEN |     -     -     -    49     -     -     -     -     -     -    29 |  288  16.53
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3259    56    74    87    51   152  3442    83  3194     -    62 |


 BEST CLOCK FIT: NRC1   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.98   | 3.57e-14  6.31e-15  3.00e-15 |
 NPLD |   287     0     0   286    9.91   | 3.01e-14  5.17e-15  1.14e-15 |
 AMC2 |   269     0     0   268    9.29   | 3.90e-14  8.06e-15  2.36e-15 |
 ALBH |   287     0     0   286    7.66   | 3.85e-14  7.86e-15  8.29e-15 |
 BREW |   288     1     0   287    7.53   | 6.68e-14  1.54e-14  4.79e-15 |
 USNO |   213     0     0   204    7.07   | 3.47e-14  6.65e-15         - |
 ONSA |   288     0     0   288    5.76   | 3.75e-14  9.54e-15  3.85e-15 |
 SPT0 |   288     0     0   288    5.40   | 3.91e-14  9.52e-15  3.58e-15 |
 NLIB |   288     0     0   288    5.13   | 5.35e-14  1.44e-14  4.26e-15 |
 WTZR |   288     0     0   288    4.25   | 5.63e-14  1.28e-14  8.24e-15 |
 USN3 |   288     0     0   288    4.04   | 8.34e-14  9.98e-15  2.56e-15 |
 KOKB |   282     0     0   280    3.51   | 5.72e-14  9.66e-15  5.96e-15 |
 HOB2 |   288     1     0   287    2.79   | 4.75e-14  1.24e-14  5.92e-15 |
 DRAO |   288     0     0   288    2.64   | 8.66e-14  2.34e-14  7.42e-15 |
 MATE |   288     0     0   288    2.32   | 4.03e-14  1.16e-14  1.01e-14 |
 PIE1 |   286     2     0   283    1.65   | 3.74e-14  8.37e-15  5.04e-15 |
 FORT |   288     0     0   288    1.62   | 7.87e-14  1.87e-14  1.40e-14 |
 YELL |   264     1     0   257    1.60   | 4.13e-14  1.08e-14  4.36e-15 |
 NYA1 |   288     1     0   287    1.48   | 3.28e-14  8.80e-15  4.36e-15 |
 TIDB |   288     1     0   287    1.23   | 1.89e-13  2.81e-14  8.22e-15 |
 NRC1 |   288     0     0   288    1.11   | 4.92e-14  1.09e-14  4.95e-15 |
 GOL2 |   288     2     0   286    1.03   | 3.55e-14  6.66e-15  3.66e-15 |
 CHUR |   265     0     0   258    0.98   | 8.76e-14  1.41e-14  8.86e-15 |
 MEDI |   288     0     0   288    0.27   | 4.51e-14  9.36e-15  8.70e-15 |
 PTBB |   288     0     0   287    0.18   | 3.71e-13  7.14e-14  3.65e-14 |
 G13  |   288     1     1   188    0.15   | 5.65e-13  5.95e-14  2.54e-14 |
 YEBE |   285     0     0   143    0.14   | 1.83e-13  1.81e-14  5.43e-15 |
 G16  |   288     1     0   185    0.11   | 4.94e-13  5.58e-14  3.73e-14 |
 G27  |   288     1     0   287    0.10   | 3.41e-13  1.21e-13  3.82e-14 |
 GODE |   288     0     0   288    0.10   | 3.37e-14  1.26e-14  2.84e-14 |
 TWTF |   288     1     0   287    0.08   | 3.89e-13  1.21e-13  4.78e-14 |
 KGN0 |   259     0     0   257    0.06   | 3.82e-13  9.30e-14  4.30e-14 |
 G28  |   288     1     4   109    0.06   | 6.10e-13  7.32e-14  3.72e-14 |
 G23  |   288     1     1   143    0.06   | 5.02e-13  1.57e-13  2.61e-14 |
 G30  |   288     1     0   287    0.05   | 3.35e-13  1.06e-13  1.08e-13 |
 HRAO |   288     1     0   287    0.05   | 1.25e-13  3.51e-14  9.69e-14 |
 SFER |   285     0     0   140    0.05   | 3.59e-13  8.69e-14  2.16e-14 |
 G04  |   288     1     0   287    0.05   | 4.07e-13  9.70e-14  8.16e-14 |
 BOR1 |   288     1     0   287    0.04   | 4.86e-13  1.33e-13  5.96e-14 |
 MIZU |   257     0     0   123    0.04   | 3.46e-13  1.18e-13         - |
 G07  |   288     1     0   287    0.04   | 2.60e-13  1.12e-13  6.59e-14 |
 TLSE |   287     0     0   140    0.04   | 4.31e-13  1.10e-13  6.01e-14 |
 G26  |   288     1     0   287    0.04   | 3.69e-13  1.15e-13  1.03e-13 |
 G17  |   288     1     0   287    0.04   | 6.52e-13  1.48e-13  1.14e-13 |
 G19  |   288     1     1   114    0.03   | 6.22e-13  9.45e-14  2.03e-14 |
 G31  |   288     1     0   287    0.03   | 2.17e-13  1.49e-13  9.25e-14 |
 DWH1 |   288     0     0   143    0.03   | 5.14e-13  1.86e-13  6.12e-14 |
 G29  |   276     1     0   273    0.03   | 4.13e-13  1.36e-13  8.51e-14 |
 G06  |   288     1     0   287    0.03   | 4.44e-13  1.72e-13  1.00e-13 |
 IENG |   288     0     0   143    0.02   | 5.55e-13  1.64e-13  8.59e-14 |
 BAHR |   288     1     0   207    0.02   | 6.34e-13  1.28e-13  7.80e-14 |
 STR1 |   288     0     0   143    0.02   | 6.87e-13  1.76e-13  5.36e-14 |
 FAIR |   194     0     0    85    0.01   | 2.56e-13  7.44e-14         - |
 TSKB |   285     1     0   282    0.01   | 1.09e-12  3.52e-13  8.04e-14 |
 G08  |   288     1     0   287    0.01   | 1.39e-12  3.63e-13  1.13e-13 |
 G03  |   288     1     0   287    0.01   | 1.46e-12  3.98e-13  1.90e-13 |
 G10  |   288     1     0   287    0.01   | 1.21e-12  3.96e-13  1.78e-13 |
 GMAS |   288     1     0   287    0.01   | 1.21e-12  4.45e-13  2.35e-13 |
 G09  |   288     1     0   287    0.01   | 1.36e-12  4.15e-13  2.27e-13 |
 KERG |   288     1     0   287    0.01   | 1.29e-12  4.65e-13  1.80e-13 |
 KOUR |   288     1     0   287    0.01   | 1.57e-12  4.83e-13  2.03e-13 |
 PERT |   288     1     0   287    0.00   | 2.00e-12  3.89e-13  2.44e-13 |
 PRDS |   272     0     0   143    0.00   | 1.39e-12  3.79e-13  1.60e-13 |
 WHIT |   240     1     0   233    0.00   | 5.13e-13  2.13e-13         - |
 G05  |   288     1     1   143    0.00   | 1.25e-12  3.85e-13  1.58e-13 |
 GPST |   288     0     0     0    0.00   | 3.56e-14  7.53e-15  3.16e-15 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     0     0     0    0.00   |        -         -         - |
 MONP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   229     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   176     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G25  |   288     1     0     0    0.00   | 1.45e-12  5.37e-13  2.24e-13 |
 G24  |   288     1     0     0    0.00   | 1.35e-12  4.21e-13  4.49e-13 |
 G22  |   288     1     6     0    0.00   | 9.27e-13  8.34e-14  3.41e-14 |
 G21  |   288     2     6     0    0.00   | 8.36e-13  1.02e-13  2.88e-14 |
 G20  |   288     1     6     0    0.00   | 6.20e-13  6.54e-14  1.80e-14 |
 G18  |   288     1     6     0    0.00   | 1.22e-12  1.08e-13  3.40e-14 |
 G15  |   288     1     0     0    0.00   | 1.51e-12  6.05e-13  3.45e-13 |
 G14  |   288     1     3     0    0.00   | 6.44e-13  7.09e-14  2.54e-14 |
 G11  |   288     1     6     0    0.00   | 8.12e-13  7.64e-14  4.87e-14 |
 G01  |   288     1     0     0    0.00   | 1.49e-12  8.06e-13  4.48e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   246     1     0     0    0.00   |        -         -         - |
 YAR2 |   288     2     0     0    0.00   |        -         -         - |
 WILL |   276     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   248     0     0     0    0.00   |        -         -         - |
 URUM |   287     1     0     0    0.00   |        -         -         - |
 TRO1 |   280     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     1     0     0    0.00   | 3.40e-13  1.77e-13  4.53e-13 |
 STJO |   286     0     0     0    0.00   |        -         -         - |
 SCH2 |   214     0     1     0    0.00   | 6.39e-13  8.12e-13         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   216     0     0     0    0.00   |        -         -         - |
 REUN |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   133     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     2     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   268     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   287     0     0     0    0.00   |        -         -         - |
 MKEA |   278     0     0     0    0.00   |        -         -         - |
 MDO1 |   223     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     1     0     0    0.00   | 1.87e-12  5.44e-13  1.59e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   155     0     0     0    0.00   |        -         -         - |
 KIRU |   263     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     1     0    0.00   | 5.61e-13  3.96e-13  1.42e-12 |
 JAB1 |   286     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   276     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     0     0    0.00   | 1.96e-13  1.40e-13  3.74e-13 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   284     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GODZ |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     1     0     0    0.00   | 3.49e-13  1.08e-12  4.39e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     2     0     0    0.00   |        -         -         - |
 CAGZ |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   281     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.95e-17  2.34e-16  1.41e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NPLD      NPLD      NPLD |
------------------------------------------+------------------------------+
