
 GPS week: 1296   Day: 2   MJD: 53318                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2780      3     0.05    -0.13     2.74     0.00      0
 cod |   288     0  25440      8    -0.20     0.04     0.07    17.60      0
 emr |   288     0  13168    288    -3.77     1.38     0.05    22.63      0
 esa |   288     0  17865    995  3137.46    53.23     0.09    10.83      0
 iga |    96     2   2687    161    85.89    71.26     5.20     0.00      0
 igu |    96     0   2780      0     0.00    -0.05     3.23     0.00      0
 jpl |   288     0  18682      1    -5.51     1.41     0.05    25.87      0
 ngs |    96     0   2780      3     0.05    -0.13     2.64     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  30706    690     6.15     2.10     0.05    23.06      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -3801    26   -85   124 -7344  -666    -9 -3102     -    13 |
    3 | -8416  -125   -19    99  1190 -9830    96 -7477     -   -42 |
    4 | -1068    61   -78    80 -1169 -1933    19 -1473     -   -30 |
    5 | -4377    39   -17   123   258  -678    40 -4181     -  -119 |
    6 |  3161  -156    68    68 -4641-11732    38  2383     -   -15 |
    7 |    80     0   124   161  6080  1290   -99  -113     -   -91 |
    8 |  2156    11   174  -166  3079  8888   -19  2020     -   -82 |
    9 |   776    -7    15   -28  2158   439   -10   348     -    15 |
   10 | -4036    62   -25  -122  7551   640    21 -3694     -    12 |
   11 |  3771   -30    64  -120   828  1059    83  3691     -   -78 |
   13 |  4639   102   -78   216 -3667  2161    21  4436     -  -129 |
   14 |  6251   -31    19  -295    24  4501   155  5658     -   -30 |
   15 | -9158  -119    89   125-10528 -2532    53 -8143     -  -119 |
   16 |  3339  -102     X   -15  -140  2019   175  3289     -  -114 |
   17 |  1678   -11    65   126-13709 10712   -25  1561     -   -89 |
   18 |  4934   -81   -74    -3    45  1918     7  4972     -   131 |
   19 |  3370    60   -27   -71  7753   113   119  3352     -  -122 |
   20 |  4026    43  -169    -5   100  1179    92  3866     -    33 |
   21 |  4283  -117   -14   124   149  5149    85  4084     -   -53 |
   22 | -6127  -111   -99   137  1388 -1028    99 -5447     -     6 |
   23 |   713   120  -163   106  -978  -429    62   635     -   -52 |
   24 |  1549    37    -3    37-11036  6330   -46  1279     -     9 |
   25 | -1623   -45    67  -147  -542  6267    56 -2157     -   -25 |
   26 | -3822    50   -70   202  1651 -1136   -44 -3549     -   -22 |
   27 | -1639    42    71  -117 -1288 -2087    19 -1672     -   -69 |
   28 |  1164    35   -65  -205  5300 -8528   119  1165     -    -1 |
   29 | -2146    16    55     X     -  -814    -9 -2348     -   -58 |
   30 |  3372    31  -142    36 -7961 -3060    93  3144     -    -7 |
   31 | -3289    18   -68   106  7832 -8289    52 -2745     -   -59 |
 -----+-------------------------------------------------------------+
 ALBH |     -   100   -56     -     -     -    62     -     -   -93 |
 AMC2 |     -   -61   193     -     -     -  -230     -     -   118 |
 AREQ |     -     -    24     -     -     -    69     -     -  -104 |
 AUCK |     -   -68     -     X     -     -     -     -     -    52 |
 BAHR |     -    23    29     -     -     -     -     -     -   -47 |
 BOGT |     -  -114     -   -34     -     -     -     -     -   100 |
 BOR1 |     -   186    77     -     -     -     -     -     -  -225 |
 BREW |     -     -    36     -     -     -     -     -     -   -35 |
 BRUS |     -    12     -     -     -     -   -68     -     -    69 |
 CAGZ |     -    16     -     -     -     -     -     -     -   -12 |
 CAS1 |     -  -143     -    75     -     -     -     -     -    76 |
 CEDU |     -     -     -     X     -     -   134     -     -  -150 |
 CHAT |     -   -53     -     -     -     -     -     -     -    40 |
 CHUR |     -   196     -     -     -     -   -31     -     -  -122 |
 COCO |     -   -29     -   -17     -     -     -     -     -    31 |
 CRO1 |     -     -    39   -31     -     -   -33     -     -    14 |
 DAV1 |     -    15     -     -     -     -    48     -     -   -66 |
 DGAR |     -  -114     -     -     -     -     1     -     -    88 |
 DRAO |     -    -6   -84   240     -     -    68     -     -  -104 |
 DWH1 |     -    27     -     -     -     -     -     -     -   -21 |
 FORT |     -    39     -   -64     -     -     -     -     -     - |
 GLPS |     -    19     -    48     -     -     -     -     -   -37 |
 GMAS |     -     -   227     -     -     -  -283     -     -    98 |
 GODE |     -   186     -   -30     -     -   -49     -     -   -75 |
 GODZ |     -     -     -     -     -     -   -65     -     -    73 |
 GOL2 |     -     -     -     -     -     -   -41     -     -    46 |
 GOLD |     -    48     -  -151     -     -    -3     -     -    32 |
 GUAM |     -   147     -  -316     -     -  -149     -     -   210 |
 GUAT |     -  -126     -     -     -     -     -     -     -    96 |
 HERS |     -  -324     -     -     -     -     -     -     -   247 |
 HOB2 |     -    72     -     -     -     -     -     -     -   -55 |
 HRAO |     -     -     -     -     -     -   -30     -     -    34 |
 IISC |     -   138     -  -224     -     -     -     -     -     - |
 INVK |     -   124     -     -     -     -   -85     -     -     - |
 ISPA |     -   115     -     -     -     -   -39     -     -   -45 |
 JPLM |     -     -     -     -     -     -    77     -     -   -86 |
 KERG |     -     -     -   -18     -     -     -     -     -     9 |
 KGN0 |     -    35     -     -     -     -     -     -     -   -27 |
 KIRU |     -  -147     -   167     -     -   -76     -     -   119 |
 KOKB |     -   -76    62     -     -     -     -     -     -    -3 |
 KOSG |     -   -68     -     -     -     -     -     -     -    52 |
 KOUR |     -   151     -  -403     -     -     -     -     -    84 |
 KUNM |     -     -     -     -     -     -   -42     -     -    47 |
 MAC1 |     -  -173     -    23     -     -     -     -     -   132 |
 MADR |     -     -     -     -     -     -   -27     -     -    30 |
 MAS1 |     -     -     -  -540     -     -   163     -     -    55 |
 MATE |     -     -     -   -85     -     -     -     -     -    40 |
 MBAR |     -  -105     -     -     -     -   -65     -     -   156 |
 MCM4 |     -   185  -143     -     -     -     -     -     -     - |
 MDO1 |     -     -   -33     -     -     -     -     -     -    32 |
 MEDI |     -    60     -     -     -     -     -     -     -   -46 |
 METS |     -  -109     -     -     -     -     -     -     -    83 |
 MKEA |     -     -     -   -82     -     -   -24     -     -    67 |
 NKLG |     -   -39     -     -     -     -     -     -     -    30 |
 NLIB |     -     -     -     -     -     -   113     -     -  -127 |
 NNOR |     -     -     -   300     -     -  -121     -     -    -5 |
 NPLD |     -   -62     -     -     -     -     -     -     -    47 |
 NRC1 |     -   107   -43     -     -     -     -     -     -   -41 |
 NSSP |     -   -62     -     -     -     -   -58     -     -   115 |
 NYA1 |     -    76     -     -     -     -     -     -     -   -58 |
 ONSA |     -  -120     -   195     -     -     -     -     -     - |
 PERT |     -     -   106  -363     -     -     -     -     -    46 |
 PIE1 |     -     -     -  -258     -     -     -     -     -   121 |
 POL2 |     -    48     -     -     -     -  -130     -     -   112 |
 PTBB |     -   -16     -     -     -     -     -     -     -    13 |
 RESO |     -    49     -     -     -     -   -34     -     -     - |
 SANT |     -   -62     -   226     -     -     -     -     -   -61 |
 SHAO |     -     -     -   180     -     -     -     -     -   -85 |
 SPT0 |     -  -129     -     -     -     -     -     -     -    98 |
 STJO |     -     -   -58     -     -     -     -     -     -    57 |
 SUTH |     -  -131     -     -     -     -     -     -     -   100 |
 THTI |     -     -    68  -106     -     -     -     -     -   -19 |
 THU3 |     -    52     -     -     -     -     -     -     -   -40 |
 TID1 |     -     -     -     -     -     -   -68     -     -    76 |
 TIDB |     -   -69     -   131     -     -     -     -     -    -9 |
 TIXI |     -    68     -  -110     -     -     -     -     -     - |
 TRO1 |     -   174     -     -     -     -     -     -     -  -133 |
 TSKB |     -   -46     -    57     -     -     -     -     -     9 |
 TWTF |     -   -30     -     -     -     -  -105     -     -   145 |
 USN3 |     -   -36     -     -     -     -     9     -     -    18 |
 USNO |     -    15   -22     -     -     -     -     -     -    10 |
 USUD |     -     -     -    89     -     -   -37     -     -     X |
 VILL |     -     -     -   -43     -     -     -     -     -    20 |
 WHIT |     -   -21     -     -     -     -   -65     -     -    91 |
 WILL |     -   -38     -     -     -     -     -     -     -    29 |
 WTZR |     -   -13     -  -124     -     -     -     -     -    70 |
 YAR2 |     -   -58     -     -     -     -     -     -     -    45 |
 YELL |     -     -  -135   812     -     -     -     -     -  -192 |
 ZAMB |     -   247     -     -     -     -  -168     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5388   124    75   149  6734  5651    97  4645     -    58 |  288   6.28
    3 |  3103   133    56    86  1985  2306    29  2456     -    85 |  288   2.16
    4 |  2194    57    45    66   665  1784    46  2056     -    41 |  288   0.87
    5 |  2118    41    29    74   645  1297    55  1760     -    56 |  288   1.27
    6 |  3767   175    84   154  3865  8884    37  3791     -    78 |  288   1.81
    7 |  1283   128    73   119  6807   681    83  1383     -    56 |  288   0.59
    8 |  3417    59    55    76  3657  4908    43  3375     -    63 |  288   2.05
    9 |  3981    61    25    61  3034  1680    31  3863     -    65 |  288   1.81
   10 |  2383    44    23    68  7776  1760    20  2184     -    20 |  288   1.91
   11 |   547    46    44    56  1693   625    39   713     -    37 |  288   0.53
   13 |   901    65    48   120  2927  1555    79  1119     -    37 |  288   0.25
   14 |  4454    61    89    92   599  1268    49  4266     -    90 |  288   0.29
   15 |  5724   118    55    44 10332  2080    30  5732     -    86 |  288   2.43
   16 |   705    39     X    47   654  1266    49   978     -    38 |  288   0.33
   17 |  2399    45    33    72 13382  6817    38  2438     -    35 |  288   1.79
   18 |   765    56    61    86   723   737    59   952     -    88 |  288   0.32
   19 |   453    53    28   115  6103   630    81   459     -    39 |  288   0.28
   20 |   413    51    45    57   704   571    58   453     -    43 |  288   0.23
   21 |  1532    67    40    59   662  2819    41  1449     -    43 |  288   0.32
   22 |  2746    49    74    87  2233   941    52  2640     -    70 |  288   0.31
   23 |   699    50    58    57   546   723    40   644     -    36 |  288   0.41
   24 |  3117    47    46    81 10330  2887    44  3240     -    37 |  288   2.66
   25 |  2668    60    27    87   623  4382    71  2898     -    49 |  288   2.27
   26 |   637   158   112   147  3071  1250    29   891     -    68 |  288   0.89
   27 |   966    50    36   101   549  1184    43   888     -    51 |  288   0.56
   28 |  3489    34    64   136  5723  6419    84  3430     -    58 |  288   0.62
   29 |  2677   113   103     X     -   947    70  2530     -   110 |  276   1.04
   30 |  2634    42    21    60  7445  1684    57  2635     -    37 |  288   0.53
   31 |  2831   157    92   156  8358  3400    75  2548     -    49 |  288   1.46
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    56    49     -     -     -    25     -     -    27 |  288   0.04
 AMC2 |     -    46    26     -     -     -    13     -     -    24 |  288   0.06
 AREQ |     -     -    31     -     -     -    56     -     -    73 |  288  20.64
 AUCK |     -    51     -     X     -     -     -     -     -    39 |  257  12.08
 BAHR |     -    64    38     -     -     -     -     -     -    27 |  288   1.76
 BOGT |     -    76     -    84     -     -     -     -     -    47 |  288  30.64
 BOR1 |     -    47    25     -     -     -     -     -     -    23 |  288   0.56
 BREW |     -     -    13     -     -     -     -     -     -    12 |  280   0.06
 BRUS |     -    24     -     -     -     -    29     -     -    20 |  288   0.05
 CAGZ |     -    26     -     -     -     -     -     -     -    20 |  280    >>>
 CAS1 |     -    54     -   100     -     -     -     -     -    81 |  282   8.28
 CEDU |     -     -     -     X     -     -    35     -     -    39 |  280  12.09
 CHAT |     -    26     -     -     -     -     -     -     -    20 |  280  10.63
 CHUR |     -    77     -     -     -     -    76     -     -    96 |  285   0.14
 COCO |     -    32     -    89     -     -     -     -     -    53 |  288  13.68
 CRO1 |     -     -    59   112     -     -    54     -     -    50 |  258  20.31
 DAV1 |     -    83     -     -     -     -    50     -     -    37 |  288  14.25
 DGAR |     -    31     -     -     -     -    30     -     -    25 |  288  25.67
 DRAO |     -    40    53    47     -     -    26     -     -    47 |  287  47.44
 DWH1 |     -    23     -     -     -     -     -     -     -    17 |  161   0.27
 FORT |     -    31     -    51     -     -     -     -     -     - |  272   0.17
 GLPS |     -    28     -    57     -     -     -     -     -    22 |  288  32.05
 GMAS |     -     -    23     -     -     -    26     -     -    14 |  288   1.42
 GODE |     -   116     -    83     -     -    87     -     -    33 |  288   0.34
 GODZ |     -     -     -     -     -     -    48     -     -    54 |  280  12.89
 GOL2 |     -     -     -     -     -     -    16     -     -    18 |  280   0.07
 GOLD |     -    92     -   172     -     -    26     -     -    26 |  288  10.29
 GUAM |     -    45     -    87     -     -    28     -     -    51 |  288  22.92
 GUAT |     -    44     -     -     -     -     -     -     -    34 |  280    >>>
 HERS |     -    20     -     -     -     -     -     -     -    15 |  255   7.08
 HOB2 |     -    24     -     -     -     -     -     -     -    18 |  281   0.11
 HRAO |     -     -     -     -     -     -    33     -     -    37 |  279   0.69
 IISC |     -    44     -    71     -     -     -     -     -     - |  286  34.58
 INVK |     -   116     -     -     -     -    79     -     -     - |  194   7.37
 ISPA |     -    30     -     -     -     -    51     -     -    67 |  288  29.84
 JPLM |     -     -     -     -     -     -    16     -     -    18 |  280    >>>
 KERG |     -     -     -    37     -     -     -     -     -    17 |  273   1.93
 KGN0 |     -    28     -     -     -     -     -     -     -    21 |  279   0.54
 KIRU |     -    99     -    77     -     -    66     -     -    44 |  280   8.80
 KOKB |     -    36    16     -     -     -     -     -     -    26 |  288   0.08
 KOSG |     -    47     -     -     -     -     -     -     -    36 |  281 130.31
 KOUR |     -    33     -    56     -     -     -     -     -    33 |  282   1.16
 KUNM |     -     -     -     -     -     -    38     -     -    42 |  279  31.91
 MAC1 |     -    72     -   151     -     -     -     -     -   120 |  283  13.90
 MADR |     -     -     -     -     -     -    16     -     -    18 |  280  17.72
 MAS1 |     -     -     -    97     -     -    32     -     -    66 |  286   1.53
 MATE |     -     -     -    79     -     -     -     -     -    37 |  281   0.08
 MBAR |     -    75     -     -     -     -    56     -     -    77 |  288  22.61
 MCM4 |     -    97    76     -     -     -     -     -     -     - |  247   6.51
 MDO1 |     -     -    59     -     -     -     -     -     -    58 |  249 187.83
 MEDI |     -    15     -     -     -     -     -     -     -    12 |  280   0.13
 METS |     -   113     -     -     -     -     -     -     -    86 |  276  10.12
 MKEA |     -     -     -    64     -     -    22     -     -    28 |  288  38.20
 NKLG |     -    68     -     -     -     -     -     -     -    52 |  278    >>>
 NLIB |     -     -     -     -     -     -    17     -     -    19 |  281   0.07
 NNOR |     -     -     -    83     -     -    28     -     -    37 |  288  16.31
 NPLD |     -    36     -     -     -     -     -     -     -    27 |  279   0.06
 NRC1 |     -   135    54     -     -     -     -     -     -    52 |  288   0.05
 NSSP |     -    25     -     -     -     -    23     -     -    15 |  288  12.97
 NYA1 |     -    56     -     -     -     -     -     -     -    43 |  278   0.06
 ONSA |     -    65     -   106     -     -     -     -     -     - |  288   0.09
 PERT |     -     -    66    81     -     -     -     -     -    67 |  269   2.27
 PIE1 |     -     -     -   121     -     -     -     -     -    57 |  280   0.70
 POL2 |     -    36     -     -     -     -    26     -     -    11 |  288  13.10
 PTBB |     -    30     -     -     -     -     -     -     -    23 |  279   0.35
 RESO |     -    39     -     -     -     -    26     -     -     - |  288   6.13
 SANT |     -   148     -    95     -     -     -     -     -   137 |  288  14.07
 SHAO |     -     -     -    87     -     -     -     -     -    41 |  280  14.84
 SPT0 |     -    42     -     -     -     -     -     -     -    32 |  280   0.11
 STJO |     -     -    36     -     -     -     -     -     -    35 |  274    >>>
 SUTH |     -    16     -     -     -     -     -     -     -    12 |  281  17.75
 THTI |     -     -    22   127     -     -     -     -     -    57 |  276   4.96
 THU3 |     -    95     -     -     -     -     -     -     -    72 |  280   6.44
 TID1 |     -     -     -     -     -     -    35     -     -    39 |  280   0.09
 TIDB |     -    31     -    38     -     -     -     -     -    25 |  288   0.08
 TIXI |     -    93     -   152     -     -     -     -     -     - |  255   8.50
 TRO1 |     -    78     -     -     -     -     -     -     -    59 |  248   8.35
 TSKB |     -    33     -    98     -     -     -     -     -    51 |  288   1.30
 TWTF |     -    48     -     -     -     -    28     -     -    40 |  288   0.75
 USN3 |     -   128     -     -     -     -    20     -     -   104 |  287   0.06
 USNO |     -    51    39     -     -     -     -     -     -    33 |  226   0.05
 USUD |     -     -     -    87     -     -    36     -     -     X |  288  11.82
 VILL |     -     -     -    49     -     -     -     -     -    23 |  280  18.77
 WHIT |     -   126     -     -     -     -    64     -     -    40 |  254   3.29
 WILL |     -   139     -     -     -     -     -     -     -   106 |  278 162.36
 WTZR |     -    13     -    62     -     -     -     -     -    32 |  288   0.09
 YAR2 |     -    22     -     -     -     -     -     -     -    17 |  280   4.96
 YELL |     -     -    47   160     -     -     -     -     -    36 |  253   0.14
 ZAMB |     -    47     -     -     -     -    32     -     -     - |  285  12.84
 -----+-------------------------------------------------------------+--------------
 TOT  |  2741    73    54    95  5204  3233    48  2641     -    52 |


 BEST CLOCK FIT: ALBH   288   0.04 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.98   | 3.91e-14  5.30e-15  1.38e-15 |
 AMC2 |   288     0     0   288    9.98   | 3.77e-14  5.35e-15  1.59e-15 |
 USNO |   226     0     0   220    7.45   | 4.03e-14  6.99e-15         - |
 ALBH |   288     0     0   288    7.28   | 3.86e-14  1.05e-14  3.86e-15 |
 BREW |   280     0     0   279    7.05   | 4.20e-14  7.89e-15  2.69e-15 |
 NLIB |   281     0     0   280    5.89   | 3.88e-14  7.71e-15  1.97e-15 |
 SPT0 |   280     0     0   279    5.66   | 4.63e-14  1.02e-14  4.29e-15 |
 ONSA |   288     0     0   288    5.50   | 4.30e-14  1.27e-14  6.41e-15 |
 KOKB |   288     0     0   288    4.79   | 4.82e-14  1.38e-14  3.93e-15 |
 WTZR |   288     0     0   288    4.55   | 3.91e-14  7.80e-15  3.57e-15 |
 NPLD |   279     0     0   131    4.54   | 3.35e-14  6.93e-15  2.21e-15 |
 USN3 |   287     0     0   286    4.44   | 9.88e-14  1.26e-14  4.49e-15 |
 HOB2 |   281     0     0   280    4.35   | 3.74e-14  9.69e-15  8.70e-15 |
 MATE |   281     0     0   280    2.29   | 4.83e-14  1.09e-14  9.07e-15 |
 FORT |   272     0     0   260    2.03   | 7.68e-14  2.61e-14  1.40e-14 |
 DRAO |   287     1     0   285    2.02   | 6.04e-14  1.73e-14  4.54e-15 |
 PIE1 |   280     1     0   277    1.99   | 5.36e-14  1.51e-14  4.51e-15 |
 YELL |   253     1     0   247    1.89   | 5.27e-14  1.01e-14         - |
 NRC1 |   288     1     0   287    1.64   | 2.65e-14  6.64e-15  2.40e-15 |
 TIDB |   288     0     0   288    1.53   | 1.82e-13  1.65e-14  4.57e-15 |
 CHUR |   285     0     0   284    1.05   | 7.46e-14  2.05e-14  8.79e-15 |
 GOL2 |   280     0     0   279    0.87   | 3.37e-14  6.89e-15  2.68e-15 |
 NYA1 |   278     0     0   134    0.81   | 2.95e-14  8.00e-15  3.17e-15 |
 TID1 |   280     0     0   279    0.60   | 5.16e-14  1.19e-14  2.69e-15 |
 MEDI |   280     0     0   279    0.27   | 3.94e-14  9.30e-15  5.52e-15 |
 PTBB |   279     1     0   277    0.19   | 3.77e-13  8.07e-14  4.03e-14 |
 GODE |   288     1     0   287    0.11   | 4.76e-14  1.59e-14  2.42e-14 |
 G16  |   288     1     3   134    0.11   | 5.34e-13  5.60e-14  3.25e-14 |
 G26  |   288     1     0   287    0.10   | 3.57e-13  9.70e-14  7.30e-14 |
 HRAO |   279     1     0   276    0.09   | 1.31e-13  4.58e-14  9.55e-14 |
 TWTF |   288     1     0   287    0.09   | 4.16e-13  1.09e-13  4.49e-14 |
 G30  |   288     1     0   287    0.09   | 3.29e-13  1.05e-13  2.91e-14 |
 G07  |   288     1     0   287    0.08   | 2.91e-13  8.30e-14  6.22e-14 |
 G29  |   276     1     0   273    0.08   | 4.00e-13  1.20e-13  8.34e-14 |
 G13  |   288     1     2    61    0.07   | 5.36e-13  6.05e-14  1.90e-14 |
 KGN0 |   279     0     0   277    0.07   | 3.59e-13  9.63e-14  6.06e-14 |
 G27  |   288     1     0   287    0.07   | 3.44e-13  1.06e-13  6.28e-14 |
 G04  |   288     1     0   287    0.06   | 4.46e-13  1.31e-13  7.62e-14 |
 G19  |   288     1     2   101    0.06   | 5.99e-13  8.60e-14  2.59e-14 |
 G14  |   288     1     3    57    0.06   | 6.00e-13  6.77e-14  2.32e-14 |
 BOR1 |   288     1     0   287    0.05   | 4.47e-13  1.16e-13  6.02e-14 |
 DWH1 |   161     1     0   160    0.04   | 5.10e-13  1.23e-13         - |
 G06  |   288     1     0   287    0.03   | 5.29e-13  1.84e-13  1.02e-13 |
 G17  |   288     1     0   287    0.02   | 6.55e-13  1.85e-13  1.91e-13 |
 G31  |   288     1     0   287    0.02   | 2.34e-13  1.31e-13  1.88e-13 |
 TSKB |   288     1     0   287    0.02   | 8.82e-13  2.50e-13  1.56e-13 |
 G10  |   288     1     0   287    0.01   | 1.36e-12  3.35e-13  2.20e-13 |
 G05  |   288     1     3   123    0.01   | 1.29e-12  3.29e-13  1.42e-13 |
 GMAS |   288     1     0   287    0.01   | 1.16e-12  2.91e-13  1.72e-13 |
 KOUR |   282     0     0   281    0.01   | 1.40e-12  4.79e-13  7.32e-14 |
 KERG |   273     0     0   271    0.01   | 1.13e-12  4.54e-13  1.87e-13 |
 G03  |   288     1     0   287    0.01   | 1.28e-12  4.42e-13  1.93e-13 |
 G25  |   288     1     0   287    0.01   | 1.44e-12  4.67e-13  3.01e-13 |
 G09  |   288     1     0   165    0.00   | 1.34e-12  3.95e-13  2.44e-13 |
 G08  |   288     1     1   143    0.00   | 1.23e-12  4.51e-13  2.11e-13 |
 WHIT |   254     1     0   251    0.00   | 5.20e-13  2.11e-13         - |
 THTI |   276     0     0   274    0.00   | 4.04e-13  1.62e-13  3.50e-13 |
 GPST |   288     0     0     0    0.00   | 4.09e-14  1.12e-14  5.64e-15 |
 INVK |   194     0     0     0    0.00   |        -         -         - |
 TIXI |   255     0     0     0    0.00   |        -         -         - |
 NKLG |   278     1     0     0    0.00   |        -         -         - |
 METS |   276     0     0     0    0.00   |        -         -         - |
 HERS |   255     0     0     0    0.00   |        -         -         - |
 CHAT |   280     0     0     0    0.00   |        -         -         - |
 AUCK |   257     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     3     0    0.00   | 6.15e-13  6.39e-14  5.95e-14 |
 G24  |   288     1     0     0    0.00   | 1.24e-12  4.49e-13  2.88e-13 |
 G23  |   288     1     5     0    0.00   | 5.45e-13  1.03e-13  2.33e-14 |
 G22  |   288     1     6     0    0.00   | 7.57e-13  7.79e-14  1.73e-14 |
 G21  |   288     1     6     0    0.00   | 8.51e-13  1.13e-13  2.37e-14 |
 G20  |   288     1     6     0    0.00   | 6.55e-13  6.33e-14  1.78e-14 |
 G18  |   288     1     6     0    0.00   | 1.15e-12  1.11e-13  3.81e-14 |
 G15  |   288     1     0     0    0.00   | 1.59e-12  5.01e-13  2.35e-13 |
 G11  |   288     1     6     0    0.00   | 7.15e-13  7.59e-14  6.79e-14 |
 G01  |   288     1     0     0    0.00   | 1.58e-12  8.43e-13  5.08e-13 |
 ZAMB |   285     0     0     0    0.00   |        -         -         - |
 YAR2 |   280     0     2     0    0.00   | 1.29e-12  1.23e-12  3.49e-13 |
 WILL |   278     0     0     0    0.00   |        -         -         - |
 VILL |   280     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   248     0     0     0    0.00   |        -         -         - |
 THU3 |   280     0     0     0    0.00   |        -         -         - |
 SUTH |   281     0     0     0    0.00   |        -         -         - |
 STJO |   274     0     0     0    0.00   |        -         -         - |
 SHAO |   280     0     0     0    0.00   |        -         -         - |
 SANT |   288     1     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   269     1     0     0    0.00   | 1.84e-12  5.60e-13  2.53e-13 |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   249     0     0     0    0.00   |        -         -         - |
 MCM4 |   247     1     1     0    0.00   | 6.99e-13  4.58e-13         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   286     1     0     0    0.00   | 1.92e-12  5.74e-13  1.68e-13 |
 MADR |   280     0     0     0    0.00   |        -         -         - |
 MAC1 |   283     0     0     0    0.00   |        -         -         - |
 KUNM |   279     0     0     0    0.00   |        -         -         - |
 KOSG |   281     1     1     0    0.00   | 7.19e-13  1.28e-12  7.23e-12 |
 KIRU |   280     0     0     0    0.00   |        -         -         - |
 JPLM |   280     2     0     0    0.00   | 5.70e-13  2.27e-13  5.11e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   286     0     0     0    0.00   |        -         -         - |
 GUAT |   280     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GODZ |   280     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   258     1     0     0    0.00   |        -         -         - |
 COCO |   288     1     2     0    0.00   | 3.68e-13  1.47e-12  1.47e-12 |
 CEDU |   280     0     0     0    0.00   |        -         -         - |
 CAS1 |   282     0     0     0    0.00   |        -         -         - |
 CAGZ |   280     1     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAHR |   288     1     4     0    0.00   | 6.65e-13  5.71e-13  1.96e-13 |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.83e-17  2.20e-16  1.32e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      BRUS      BRUS |
------------------------------------------+------------------------------+
