
 GPS week: 1296   Day: 1   MJD: 53317                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784     10     0.43    -0.28     3.69     0.00      0
 cod |   288     0  24131    291     0.34     0.11     0.06    19.90      0
 emr |   288     0  22791    175    -3.80     0.14     0.05    24.40      0
 esa |   288     0  18734    792  3085.67    51.51     0.08    13.64      0
 iga |    96     0   2778     10     0.50    -0.06     0.12     0.00      0
 igu |    96     0   2784     48     0.75    -2.79     3.65     0.00      0
 jpl |   288     0  18270      0    -5.54    -0.03     0.05    22.90      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  30056   4572  2594.87    42.30     0.06    19.16      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------+
    1 | -7455   -40  -104   247  -183 -7496    37     -   -52 |
    3 | -1078  -134  -121   169  -162  -123   149     -    -4 |
    4 |  -830   100   -68    63  -144   217   -51     -    -1 |
    5 | -1581   -14    -1     7   297  9578    42     -   -48 |
    6 |  2198   -30  -103    49  -267-12600    49     -    83 |
    7 | -2844    60    -5    16   277 -3195   -23     -   -52 |
    8 | -4937     3   109  -186    98 -6039   -33     -    35 |
    9 | -2295    37   -11   -46  -132 -2491    35     -   -41 |
   10 |  -703    16    27   -18   132 -1065    -7     -   -37 |
   11 |  4727    62   -98   -95    22  1111   142     -   -49 |
   13 |  2634    68  -193   269  -131  1383    31     -   -64 |
   14 | 19588   -16   -85  -127   118 17956   191     -   -15 |
   15 | -7240  -181   128   175   459 -4562   -17     -   -94 |
   16 |  3574   -57   -70    -3   -87  1593   157     -   -43 |
   17 |   760    10   138    20   236  8105   -75     -  -131 |
   18 |  4074    66  -177    14   140  2562    69     -    77 |
   19 |  4759    85    17  -240  -101  3754   106     -   -78 |
   20 |  4143    81  -121  -104   166  2425   132     -   -16 |
   21 |  4835    -6  -131    76   280   278    94     -     7 |
   22 | -8036    22  -257   150   -57 -2444   204     -   -56 |
   23 |  -868   110  -173    47   -60   -15   109     -   -70 |
   24 | -3103    21   -31   112   -93  -615   -30     -   -32 |
   25 | -4760   -31   -59   -36  -255 -2544   127     -   -23 |
   26 | -3342    33   -94   260  -362 -2787   -41     -   -71 |
   27 | -1687    -7   -16    32  -137 -3199    -2     -    10 |
   28 |  7598    38   -93  -146   259 10396   128     -    36 |
   29 | -2107   -28    96   261  -398 -2911   -94     -  -204 |
   30 | -3238   -18   -72    -9    20  1513   120     -   -32 |
   31 |  -586    59   -57   -40   132   345    58     -   -37 |
 -----+-------------------------------------------------------+
 ALBH |     -    25   -33     -     -     -    19     -   -13 |
 ALGO |     -    44    44  -171     -     -     1     -    20 |
 AMC2 |     -     -   142     -     -     -  -255     -   147 |
 AREQ |     -    22    58     -     -     -    32     -  -196 |
 ARTU |     -   101     -    23     -     -  -101     -     X |
 AUCK |     -    -8     -     X     -     -     -     -     8 |
 BAHR |     -    24    16     -     -     -     -     -   -54 |
 BOGT |     -   132     -   -64     -     -     -     -   -98 |
 BOR1 |     -   -55    -6     -     -     -     -     -    97 |
 BREW |     -     -   -36     -     -     -     -     -    46 |
 BRUS |     -     9    50     -     -     -   -51     -   -19 |
 CAGZ |     -   225     -     -     -     -     -     -  -234 |
 CAS1 |     -  -113     -    34     -     -     -     -   111 |
 CEDU |     -  -156     -   235     -     -   142     -  -271 |
 CHAT |     -   -82     -     -     -     -     -     -    86 |
 CHUR |     -     -   113     -     -     -  -121     -     X |
 COCO |     -    42     -  -141     -     -     -     -    67 |
 CRO1 |     -     -    92  -202     -     -    30     -   -11 |
 DAV1 |     -     0     -     -     -     -    18     -   -25 |
 DGAR |     -   -55     -     -     -     -   -22     -   103 |
 DRAO |     -     -   -50     -     -     -    36     -    23 |
 DWH1 |     -   172     X     -     -     -     -     -  -179 |
 FAIR |     -     -   -52    92     -     -     -     -     - |
 FORT |     -   217   -79  -128     -     -     -     -     - |
 GLPS |     -    12     -     -     -     -     -     -   -13 |
 GMAS |     -     -   288     -     -     -  -307     -     X |
 GODE |     -   -21    94  -272     -     -     -     -   114 |
 GODZ |     -     -     -     -     -     -  -192     -   229 |
 GOL2 |     -     -    21     -     -     -     5     -   -41 |
 GOLD |     -     -     -  -190     -     -    81     -    48 |
 GUAM |     -   -14     -  -229     -     -  -175     -   459 |
 GUAT |     -  -226     -     -     -     -     -     -   235 |
 HERS |     -     -  -247     -     -     -     -     -   315 |
 HLFX |     -     -   221     -     -     -  -236     -     X |
 HOB2 |     -  -359   161     -     -     -     -     -   129 |
 HRAO |     -   -91     -     -     -     -    -9     -   125 |
 IENG |     -   -59    48     -     -     -     -     -     - |
 IISC |     -    48     -   -70     -     -     -     -     - |
 INVK |     -   -17     -     -     -     -    15     -     X |
 ISPA |     -    17     -     -     -     -   -22     -    10 |
 JPLM |     -     -    12     -     -     -   -31     -    43 |
 KERG |     -     -   -38     X     -     -     -     -    49 |
 KGN0 |     -    -1    10     -     -     -     -     -   -17 |
 KIRU |     -    12     -     -     -     -     -     -   -13 |
 KOKB |     -     -   119     -     -     -   -93     -   -49 |
 KOSG |     -   -70     -     -     -     -     -     -    72 |
 KOUR |     -   277     -  -564     -     -     -     -   172 |
 KUNM |     -     -     -     -     -     -  -156     -   186 |
 LPGS |     -     -  -211   573     -     -     -     -  -166 |
 MAC1 |     -     X     -  -117     -     -     -     -    83 |
 MADR |     -     -     -     -     -     -    21     -   -25 |
 MAS1 |     -     -   234  -480     -     -     -     -    52 |
 MATE |     -   100     -  -251     -     -     -     -   114 |
 MAW1 |     -    52     -     -     -     -     -     -   -54 |
 MBAR |     -   -92     -     -     -     -     3     -   110 |
 MCM4 |     -   166  -136     -     -     -     -     -     - |
 MDO1 |     -     -    -8     -     -     -     -     -    10 |
 MEDI |     -     -    -9     -     -     -     -     -    11 |
 METS |     -    73    26     -     -     -     -     -  -152 |
 MIZU |     -     -   -32     X     -     -   150     -  -209 |
 MKEA |     -    71     -    56     -     -   -19     -   -87 |
 MONP |     -    19     -     -     -     -     -     -   -20 |
 NKLG |     -    90     -     -     -     -     -     -   -93 |
 NLIB |     -     -   -16     -     -     -    57     -   -55 |
 NNOR |     -     -   149   130     -     -   -98     -  -250 |
 NRC1 |     -     -    -1     -     -     -     -     -     2 |
 NSSP |     -     -     -     -     -     -   -12     -    14 |
 NTUS |     -  -108     -    12     -     -     -     -   124 |
 OHI2 |     -    67     -   145     -     -     -     -  -207 |
 ONSA |     -   -78   -23   154     -     -     -     -     - |
 PERT |     -     -   277  -504     -     -     -     -     7 |
 PIE1 |     -     -  -142   255     -     -     -     -     X |
 PIMO |     -     -     -   698     -     -     -     -  -497 |
 POL2 |     -    76     -     -     -     -   -81     -    23 |
 POTS |     -   -89     -     -     -     -     -     -    92 |
 PTBB |     -    44   -28     -     -     -     -     -   -15 |
 QAQ1 |     -     -    -8     -     -     -     -     -    10 |
 SANT |     -   -79     -   116     -     -     -     -     - |
 SCH2 |     -     -    55     -     -     -   -72     -    18 |
 SFER |     -     7    -6     -     -     -     -     -     - |
 SPT0 |     -   -74    43     -     -     -     -     -    33 |
 STJO |     -     -    13     -     -     -   -14     -     X |
 STR1 |     -     -    10     -     -     -     -     -   -13 |
 SUWN |     -     -   183     -     -     -     -     -  -233 |
 THTI |     -     -     -    21     -     -     -     -   -15 |
 THU3 |     -    19    54     -     -     -     -     -  -107 |
 TID1 |     -     -     -     -     -     -    14     -   -17 |
 TIDB |     -     -    -1   133     -     -     -     -  -112 |
 TLSE |     -     -   -18     -     -     -     -     -    23 |
 TRO1 |     -     4     -     -     -     -     -     -    -4 |
 TSKB |     -  -110    22    55     -     -     -     -    56 |
 TWTF |     -   -45   118     -     -     -  -142     -   100 |
 UNSA |     -     -     -  -139     -     -     -     -    99 |
 USN3 |     -     4     -     -     -     -    42     -   -83 |
 USNO |     -    20    -9     -     -     -     -     -   -12 |
 USUD |     -     -   -66   119     -     -     -     -     X |
 VILL |     -     -     -   -71     -     -     -     -    51 |
 WHIT |     -   -40     -     -     -     -   -65     -   134 |
 WILL |     -    94     -     -     -     -     -     -   -97 |
 WTZR |     -   -20   163  -215     -     -     -     -   -40 |
 YAR2 |     -   -40   356     -     -     -     -     -  -621 |
 YEBE |     -     -    30     -     -     -     -     -   -38 |
 YELL |     -  -234  -227   638     -     -     -     -    73 |
 ZWEN |     -     -     -  -385     -     -     -     -   274 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 10750   129    99   139   193  9578    56     -    66 |  288   5.30
    3 |  2616    85   106   111   124  1705    62     -    96 |  288   1.96
    4 |  2058    46    35    81    65  1308    31     -    60 |  288   0.77
    5 |  1312    34    41    43    83  4554    34     -    55 |  288   1.25
    6 |  2017   164   101   190   139  8105   101     -    81 |  288   0.99
    7 |  1362   120    66   123   209  1303   101     -    37 |  288   0.78
    8 |  2767    38    23    49    45  2363    40     -    47 |  288   1.42
    9 |  5464    55    31    47   114  3425    46     -    72 |  288   3.21
   10 |  2904    50    51   123    65  2063    33     -    80 |  288   2.29
   11 |  1002    52    33    28   113   861    29     -    74 |  288   0.34
   13 |   723    52    42    76    74   814    45     -    75 |  288   0.18
   14 |  9865    58    38    43    98 10788    37     -    85 |  288   1.03
   15 |  4946    53    57    26   111  2434    48     -    87 |  288   1.98
   16 |  1506    44    36    53   102   879    41     -    85 |  288   0.37
   17 |  2554    35    61    92    70  5109    40     -    57 |  288   1.08
   18 |   739    42    43    31    50  1321    26     -    42 |  288   0.34
   19 |  1311    77    40    77   157   912    74     -    62 |  288   0.38
   20 |   738    54    48    43   102  1166    54     -    57 |  288   0.25
   21 |  2082    52    26    45   162   678    22     -    71 |  288   0.30
   22 |  2927    78    40    95   103  1611    30     -    57 |  288   0.33
   23 |   693    45    25    94    60   597    65     -    70 |  288   0.25
   24 |  2409    33    35   105   140  3039    28     -    69 |  288   2.45
   25 |  2416    46    39    57    63  2162    33     -    84 |  288   1.90
   26 |   573   115    64    78    98  1099    64     -    64 |  288   0.57
   27 |  1804    44    25    27    77  1789    44     -    85 |  288   0.60
   28 |  5673    38    30   102    63  7068    41     -    38 |  288   1.18
   29 |  2438   134    52   125   116  1830    66     -    83 |  288   0.80
   30 |  4914    23    29    53    53  2018    32     -    48 |  288   0.68
   31 |  1625   127    71   147   225  1854    90     -    62 |  288   1.40
 -----+-------------------------------------------------------+--------------
 ALBH |     -    61    46     -     -     -    67     -    28 |  275   0.05
 ALGO |     -    69     8   116     -     -    48     -    46 |  288   0.14
 AMC2 |     -     -    12     -     -     -    22     -    26 |  288   0.04
 AREQ |     -    25    19     -     -     -    24     -    29 |  279  17.58
 ARTU |     -    21     -    34     -     -    33     -     X |  288  12.18
 AUCK |     -    26     -     X     -     -     -     -    27 |  223  22.60
 BAHR |     -    49    47     -     -     -     -     -    32 |  288   0.78
 BOGT |     -    63     -   101     -     -     -     -    59 |  227  17.40
 BOR1 |     -    66   104     -     -     -     -     -   125 |  288   0.63
 BREW |     -     -    14     -     -     -     -     -    17 |  190   0.05
 BRUS |     -    36    31     -     -     -    31     -    27 |  288   0.04
 CAGZ |     -    23     -     -     -     -     -     -    23 |  190    >>>
 CAS1 |     -    38     -    50     -     -     -     -    20 |  288   7.55
 CEDU |     -    55     -    99     -     -    31     -    28 |  288  13.54
 CHAT |     -    24     -     -     -     -     -     -    25 |  237  15.60
 CHUR |     -     -    38     -     -     -    41     -     X |  243   0.18
 COCO |     -    32     -    65     -     -     -     -    45 |  288   7.71
 CRO1 |     -     -    24    73     -     -    18     -    49 |  288  22.76
 DAV1 |     -    41     -     -     -     -    40     -    43 |  288  13.22
 DGAR |     -    32     -     -     -     -    28     -    50 |  288  12.93
 DRAO |     -     -    71     -     -     -    86     -    54 |  259 105.73
 DWH1 |     -    23     X     -     -     -     -     -    24 |  175   0.43
 FAIR |     -     -    59   106     -     -     -     -     - |  243   0.91
 FORT |     -    63    79    98     -     -     -     -     - |  288   0.09
 GLPS |     -    22     -     -     -     -     -     -    23 |  190  10.78
 GMAS |     -     -    26     -     -     -    28     -     X |  288   1.45
 GODE |     -    35    40    46     -     -     -     -    31 |  288   0.15
 GODZ |     -     -     -     -     -     -    18     -    22 |  190  10.95
 GOL2 |     -     -    27     -     -     -    41     -    38 |  237   0.22
 GOLD |     -     -     -    72     -     -    51     -    34 |  239   9.94
 GUAM |     -    78     -    83     -     -    81     -   235 |  288  22.28
 GUAT |     -    35     -     -     -     -     -     -    36 |  209    >>>
 HERS |     -     -    59     -     -     -     -     -    75 |  160  13.48
 HLFX |     -     -    44     -     -     -    46     -     X |  283  13.41
 HOB2 |     -    28    57     -     -     -     -     -    71 |  252   0.32
 HRAO |     -    38     -     -     -     -    29     -    37 |  288   0.65
 IENG |     -    42    34     -     -     -     -     -     - |  288   0.80
 IISC |     -    22     -    32     -     -     -     -     - |  287  23.35
 INVK |     -    73     -     -     -     -    63     -     X |  276   8.96
 ISPA |     -    75     -     -     -     -    84     -    54 |  240  27.00
 JPLM |     -     -    36     -     -     -    48     -    29 |  288    >>>
 KERG |     -     -    23     X     -     -     -     -    29 |  213   1.66
 KGN0 |     -    50    43     -     -     -     -     -    31 |  287   0.35
 KIRU |     -    28     -     -     -     -     -     -    29 |  190   6.67
 KOKB |     -     -    34     -     -     -    36     -    78 |  288   0.05
 KOSG |     -    17     -     -     -     -     -     -    18 |  242    >>>
 KOUR |     -    48     -    53     -     -     -     -    54 |  284   2.20
 KUNM |     -     -     -     -     -     -    24     -    29 |  240  22.82
 LPGS |     -     -    34    70     -     -     -     -    73 |  288  27.75
 MAC1 |     -     X     -    67     -     -     -     -    48 |  218  14.24
 MADR |     -     -     -     -     -     -    20     -    24 |  190  13.85
 MAS1 |     -     -    38    73     -     -     -     -    38 |  288   3.95
 MATE |     -    30     -    31     -     -     -     -    42 |  288   0.05
 MAW1 |     -    72     -     -     -     -     -     -    75 |  113  20.69
 MBAR |     -    29     -     -     -     -    38     -    37 |  288  21.22
 MCM4 |     -    23    19     -     -     -     -     -     - |  288   5.63
 MDO1 |     -     -    48     -     -     -     -     -    61 |  178 138.32
 MEDI |     -     -    18     -     -     -     -     -    23 |  166   0.10
 METS |     -    91    77     -     -     -     -     -    20 |  265   9.57
 MIZU |     -     -    24     X     -     -    24     -    21 |  288   0.39
 MKEA |     -    48     -    73     -     -    46     -    33 |  288  31.22
 MONP |     -    30     -     -     -     -     -     -    32 |  238  16.22
 NKLG |     -    88     -     -     -     -     -     -    91 |  241    >>>
 NLIB |     -     -    71     -     -     -   108     -    61 |  285   0.25
 NNOR |     -     -    26    62     -     -    29     -    18 |  288  14.82
 NRC1 |     -     -    17     -     -     -     -     -    21 |  210   0.08
 NSSP |     -     -     -     -     -     -    31     -    38 |  241  10.03
 NTUS |     -    21     -    45     -     -     -     -    30 |  288   9.78
 OHI2 |     -    33     -    83     -     -     -     -    68 |  288   6.93
 ONSA |     -    32    26    38     -     -     -     -     - |  288   0.07
 PERT |     -     -    36    67     -     -     -     -    28 |  288   2.37
 PIE1 |     -     -    26    46     -     -     -     -     X |  242   1.67
 PIMO |     -     -     -    79     -     -     -     -    56 |  189  29.90
 POL2 |     -    39     -     -     -     -    24     -    48 |  288  15.91
 POTS |     -   102     -     -     -     -     -     -   106 |  215  18.94
 PTBB |     -    19    19     -     -     -     -     -    35 |  288   0.40
 QAQ1 |     -     -    16     -     -     -     -     -    20 |  192   6.75
 SANT |     -    26     -    38     -     -     -     -     - |  239  10.90
 SCH2 |     -     -    16     -     -     -    14     -    20 |  180  16.99
 SFER |     -    31    25     -     -     -     -     -     - |  285   0.55
 SPT0 |     -    81    59     -     -     -     -     -    30 |  286   0.04
 STJO |     -     -    74     -     -     -    79     -     X |  188    >>>
 STR1 |     -     -    58     -     -     -     -     -    74 |  235   1.15
 SUWN |     -     -    16     -     -     -     -     -    21 |  190   1.13
 THTI |     -     -     -    55     -     -     -     -    39 |  230   7.10
 THU3 |     -    25    25     -     -     -     -     -    41 |  288   7.23
 TID1 |     -     -     -     -     -     -    22     -    27 |  190   0.02
 TIDB |     -     -    33    39     -     -     -     -    62 |  288   0.09
 TLSE |     -     -    19     -     -     -     -     -    25 |  190   0.64
 TRO1 |     -    76     -     -     -     -     -     -    79 |  191   8.94
 TSKB |     -    33    41    45     -     -     -     -    28 |  288   1.06
 TWTF |     -    43    38     -     -     -    17     -    41 |  288   0.53
 UNSA |     -     -     -    91     -     -     -     -    65 |  235  14.48
 USN3 |     -    44     -     -     -     -    42     -    16 |  287   0.04
 USNO |     -    65    35     -     -     -     -     -    62 |  229   0.46
 USUD |     -     -    28    50     -     -     -     -     X |  288  21.53
 VILL |     -     -     -    30     -     -     -     -    22 |  190    >>>
 WHIT |     -   108     -     -     -     -    85     -    36 |  258   2.37
 WILL |     -    51     -     -     -     -     -     -    53 |  183 109.66
 WTZR |     -    24    42    62     -     -     -     -    23 |  288   0.09
 YAR2 |     -    23    22     -     -     -     -     -    44 |  287  10.07
 YEBE |     -     -    41     -     -     -     -     -    53 |  175    >>>
 YELL |     -    79    70    82     -     -     -     -    91 |  288   0.07
 ZWEN |     -     -     -    71     -     -     -     -    51 |  218  16.82
 -----+-------------------------------------------------------+--------------
 TOT  |  3694    60    47    78   115  3653    50     -    58 |


 BEST CLOCK FIT: SPT0   286   0.04 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   10.42   | 3.80e-14  6.06e-15  1.85e-15 |
 AMC2 |   288     0     0   288   10.42   | 4.49e-14  8.04e-15  1.93e-15 |
 ALBH |   275     0     0   272    9.28   | 3.94e-14  9.23e-15  1.97e-15 |
 USNO |   229     0     0   223    8.01   | 5.54e-14  1.08e-14         - |
 SPT0 |   286     0     0   285    7.79   | 4.16e-14  7.53e-15  1.91e-15 |
 ONSA |   288     0     0   288    7.29   | 4.20e-14  7.95e-15  4.35e-15 |
 NLIB |   285     0     0   283    6.56   | 8.56e-14  1.03e-14  4.54e-15 |
 WTZR |   288     0     0   288    6.10   | 4.18e-14  1.06e-14  7.16e-15 |
 USN3 |   287     0     0   286    6.09   | 8.54e-14  1.08e-14  1.95e-15 |
 KOKB |   288     0     0   288    4.53   | 6.78e-14  1.24e-14  2.09e-15 |
 MATE |   288     1     0   287    3.76   | 4.68e-14  1.06e-14  5.18e-15 |
 HOB2 |   252     0     0   248    2.56   | 3.71e-14  1.01e-14         - |
 NRC1 |   210     0     0   208    2.21   | 9.95e-14  1.74e-14         - |
 YELL |   288     0     0   288    2.19   | 8.13e-14  1.85e-14  6.24e-15 |
 PIE1 |   242     0     0   239    1.87   | 8.30e-14  1.85e-14         - |
 ALGO |   288     3     0   285    1.78   | 2.87e-13  3.54e-14  7.96e-15 |
 TIDB |   288     0     0   288    1.54   | 1.93e-13  2.60e-14  6.52e-15 |
 DRAO |   259     1     0   252    1.52   | 6.99e-14  2.34e-14         - |
 FORT |   288     0     0   143    1.12   | 1.16e-13  1.70e-14  5.28e-15 |
 BREW |   190     0     0    45    1.10   | 4.80e-14  9.63e-15         - |
 CHUR |   243     0     0   237    0.93   | 7.21e-14  1.47e-14         - |
 GOL2 |   237     1     0   235    0.78   | 3.97e-14  1.15e-14         - |
 PTBB |   288     1     0   287    0.22   | 3.61e-13  7.68e-14  2.69e-14 |
 G16  |   288     1     0   287    0.20   | 5.25e-13  5.71e-14  3.81e-14 |
 MIZU |   288     0     0   287    0.13   | 3.28e-13  1.15e-13  3.80e-14 |
 HRAO |   288     1     0   287    0.12   | 1.36e-13  6.20e-14  8.39e-14 |
 SFER |   285     0     0   283    0.12   | 3.81e-13  1.24e-13  4.33e-14 |
 GODE |   288     0     0   288    0.11   | 4.49e-14  1.10e-14  1.01e-14 |
 G19  |   288     1     0   287    0.11   | 6.75e-13  8.40e-14  2.22e-14 |
 G30  |   288     1     0   287    0.10   | 3.77e-13  1.07e-13  4.49e-14 |
 TID1 |   190     0     0    45    0.09   | 5.02e-14  7.64e-15         - |
 G23  |   288     1     2    98    0.09   | 5.29e-13  7.90e-14  1.94e-14 |
 KGN0 |   287     0     0   286    0.09   | 3.44e-13  9.21e-14  4.52e-14 |
 G26  |   288     1     0   287    0.08   | 3.84e-13  1.19e-13  5.77e-14 |
 G04  |   288     1     0   287    0.07   | 4.89e-13  1.50e-13  6.93e-14 |
 G27  |   288     1     0   287    0.07   | 3.33e-13  1.07e-13  7.45e-14 |
 IENG |   288     1     0   287    0.06   | 5.38e-13  1.84e-13  5.28e-14 |
 G07  |   288     1     0   287    0.06   | 2.78e-13  9.38e-14  9.96e-14 |
 BOR1 |   288     1     0   287    0.05   | 4.44e-13  1.38e-13  5.38e-14 |
 TWTF |   288     0     0   143    0.05   | 3.89e-13  1.18e-13  4.49e-14 |
 MEDI |   166     0     0    22    0.04   | 4.54e-14  8.17e-15         - |
 G29  |   288     1     0   287    0.04   | 3.84e-13  1.14e-13  9.72e-14 |
 G06  |   288     1     0   287    0.03   | 4.56e-13  1.58e-13  1.09e-13 |
 STR1 |   235     0     0   229    0.03   | 6.28e-13  1.95e-13         - |
 G17  |   288     1     0   287    0.02   | 8.22e-13  2.12e-13  1.27e-13 |
 G31  |   288     1     0   287    0.02   | 2.21e-13  1.58e-13  1.75e-13 |
 G08  |   288     1     1   244    0.02   | 1.32e-12  3.63e-13  8.73e-14 |
 G09  |   288     1     1   266    0.01   | 1.39e-12  4.02e-13  2.73e-13 |
 TSKB |   288     1     0   287    0.01   | 1.02e-12  2.90e-13  7.56e-14 |
 TLSE |   190     0     0    45    0.01   | 4.25e-13  1.21e-13         - |
 G05  |   288     1     0   287    0.01   | 1.38e-12  3.96e-13  8.02e-14 |
 GMAS |   288     1     0   287    0.01   | 1.19e-12  3.61e-13  1.31e-13 |
 G15  |   288     1     0   287    0.01   | 1.59e-12  4.99e-13  1.73e-13 |
 G10  |   288     1     0   287    0.01   | 1.22e-12  3.53e-13  2.45e-13 |
 DWH1 |   175     0     0    29    0.01   | 4.60e-13  1.34e-13         - |
 G14  |   288     1     2    15    0.01   | 6.69e-13  7.90e-14  6.86e-14 |
 G24  |   288     1     0   287    0.01   | 1.27e-12  4.48e-13  2.85e-13 |
 KERG |   213     0     0   208    0.01   | 1.07e-12  3.62e-13         - |
 G03  |   288     1     0   287    0.01   | 1.35e-12  4.11e-13  2.14e-13 |
 PERT |   288     1     0   287    0.00   | 1.92e-12  4.01e-13  1.39e-13 |
 KOUR |   284     0     0   143    0.00   | 1.39e-12  3.92e-13  1.51e-13 |
 WHIT |   258     0     0   249    0.00   | 5.67e-13  1.67e-13         - |
 SUWN |   190     0     0    45    0.00   | 1.02e-12  2.67e-13         - |
 GPST |   288     0     0     0    0.00   | 5.23e-14  1.25e-14  2.77e-15 |
 YEBE |   175     1     2     0    0.00   | 2.32e-13  7.57e-14         - |
 WILL |   183     0     0     0    0.00   |        -         -         - |
 VILL |   190     0     0     0    0.00   |        -         -         - |
 PIMO |   189     0     0     0    0.00   |        -         -         - |
 MDO1 |   178     0     2     0    0.00   | 7.69e-13  1.35e-12         - |
 MAW1 |   113     0     0     0    0.00   |        -         -         - |
 MADR |   190     0     0     0    0.00   |        -         -         - |
 KIRU |   190     0     0     0    0.00   |        -         -         - |
 HERS |   160     0     0     0    0.00   |        -         -         - |
 GODZ |   190     0     0     0    0.00   |        -         -         - |
 GLPS |   190     0     0     0    0.00   |        -         -         - |
 CAGZ |   190     0     0     0    0.00   |        -         -         - |
 SANT |   239     0     0     0    0.00   |        -         -         - |
 GOLD |   239     0     0     0    0.00   |        -         -         - |
 GUAT |   209     2     0     0    0.00   |        -         -         - |
 BOGT |   227     0     0     0    0.00   |        -         -         - |
 SCH2 |   180     0     1     0    0.00   | 6.43e-13  4.51e-13         - |
 QAQ1 |   192     0     0     0    0.00   |        -         -         - |
 METS |   265     0     0     0    0.00   |        -         -         - |
 UNSA |   235     0     0     0    0.00   |        -         -         - |
 AREQ |   279     0     0     0    0.00   |        -         -         - |
 ZWEN |   218     0     0     0    0.00   |        -         -         - |
 TRO1 |   191     0     0     0    0.00   |        -         -         - |
 THTI |   230     0     0     0    0.00   | 4.08e-13  1.99e-13         - |
 POTS |   215     0     0     0    0.00   |        -         -         - |
 NSSP |   241     0     0     0    0.00   |        -         -         - |
 NKLG |   241     1     0     0    0.00   |        -         -         - |
 MONP |   238     0     0     0    0.00   |        -         -         - |
 MAC1 |   218     0     0     0    0.00   |        -         -         - |
 KUNM |   240     0     0     0    0.00   |        -         -         - |
 KOSG |   242     1     2     0    0.00   | 7.10e-13  1.02e-12         - |
 CHAT |   237     0     0     0    0.00   |        -         -         - |
 AUCK |   223     0     0     0    0.00   |        -         -         - |
 STJO |   188     0     0     0    0.00   |        -         -         - |
 HLFX |   283     0     1     0    0.00   | 2.12e-13  3.73e-13  1.13e-12 |
 FAIR |   243     0     4     0    0.00   | 6.56e-13  1.83e-13         - |
 G28  |   288     1     5     0    0.00   | 5.89e-13  7.06e-14  8.24e-14 |
 G25  |   288     1     1     0    0.00   | 1.42e-12  4.78e-13  2.09e-13 |
 G22  |   288     1     6     0    0.00   | 8.78e-13  1.02e-13  2.37e-14 |
 G21  |   288     1     6     0    0.00   | 8.87e-13  9.97e-14  2.74e-14 |
 G20  |   288     1     6     0    0.00   | 5.81e-13  8.22e-14  2.12e-14 |
 G18  |   288     1     6     0    0.00   | 1.12e-12  9.97e-14  2.42e-14 |
 G13  |   288     1     5     0    0.00   | 5.73e-13  6.38e-14  1.74e-14 |
 G11  |   288     1     6     0    0.00   | 8.07e-13  7.38e-14  3.62e-14 |
 G01  |   288     1     0     0    0.00   | 1.51e-12  7.87e-13  5.45e-13 |
 YAR2 |   287     1     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.55e-13  3.47e-13  4.81e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.95e-12  5.78e-13  2.78e-13 |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     2     0     0    0.00   | 5.69e-13  2.92e-13  7.16e-13 |
 ISPA |   240     0     0     0    0.00   |        -         -         - |
 INVK |   276     0     0     0    0.00   |        -         -         - |
 IISC |   287     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     1     2     0    0.00   | 3.70e-13  1.27e-12  8.10e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BAHR |   288     1     6     0    0.00   | 6.96e-13  1.50e-13  9.37e-14 |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.71e-17  2.05e-16  1.23e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     HOB2      BRUS      BRUS |
------------------------------------------+------------------------------+
