
 GPS week: 1294   Day: 0   MJD: 53302                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      0    -0.02    -0.01     2.62     0.00      0
 cod |   288     0  26615    303     0.05     0.01     0.05    15.84      0
 emr |   288     0  22595    310  1997.01    38.05     0.05    13.92      0
 esa |   288     0  18763    738  1996.61    37.95     0.06    10.76      0
 gfz |   288     0  20593    289     0.02    -0.11     0.04    21.94      0
 iga |    96     0   2784      0    -0.02    -0.01     0.23     0.00      0
 igu |    96     0   2784      0    -0.02    -0.12     3.53     0.00      0
 jpl |   288     0  19742     37    -6.15    -0.98     0.03    23.34      0
 ngs |    96     0   2784      0    -0.02    -0.01     2.27     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  34801   3757  1997.02    38.11     0.05    14.19      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  1576   -21    24    64     6   -24  6474    48   667     -  -136 |
    3 |   235   -36   -79   198    -7  -285 -7524    92    84     -  -174 |
    4 | -3397    39   -78  -274   162  -214   345     3 -3387     -   -14 |
    5 |  1757     3  -185   342    36   237 -7678   -62   -31     -   -35 |
    6 | -1628   -19   -81   434   -57  -228-12404   -26 -1576     -   -58 |
    7 | -2492   -12    26   -60    -2   -82  -568    -2 -2592     -    48 |
    8 | -1842   -15   131  -240   207    11  1099   -53 -1141     -  -163 |
    9 | -3085     7  -132   236    59   -95 11115   -82 -1386     -   -14 |
   10 | -4499   166  -179  -109    15   399 -4347     3 -4537     -    45 |
   11 |  -328   -25   -13  -203    66  -131   191   103   762     -   -78 |
   13 |  2836    98  -162   -25    89  -219   -18    84  2869     -  -207 |
   14 |  4547   -85    58    73  -119   162  1272   147  4355     -   -74 |
   15 |  3555  -134   221   124  -123   148 10379    62  1896     -   -73 |
   16 |  4275   -17  -178    24   -53  -168  2024   223  4083     -  -110 |
   17 |  -341    90    29   -30    27   263  5951   -82 -1360     -   -14 |
   18 |  2960   -35     X   186    -8   -18  1483    25  3114     -  -131 |
   19 |  5778   116  -153   115   -33  1212  2116   127  5759     -  -226 |
   20 |  4845    58   -32   -68   -60    32  1165    81  4695     -   -21 |
   21 |  3252   -91   -21   180   -65   197  1772    80  3414     -   -46 |
   22 | -5743    -5   -22  -186    13  -182   377   129 -4667     -   -64 |
   23 | -2119   143  -175  -123    22   -87   402    86 -2073     -   -71 |
   24 | -3305    45   -75     X    48  -397  5266   -34 -3424     -     4 |
   25 |  1305   -95   140   267   -77  -281 -5411     7  1049     -  -126 |
   26 | -1676     8   -32   209    70    76   179   -65 -1341     -  -138 |
   27 |  -982    62    86  -221   177  -285  1422   -31  -660     -  -209 |
   28 |  4308     8   -73  -310    76    59  4738    62  4864     -    75 |
   29 |  1214    69  -135   288   -35  -199 -2175   -38   285     -   -47 |
   30 | -2537   -32  -134   217    26    93   415     - -2097     -   -37 |
   31 | -8470    24  -148  -192   134     5-18063    19 -7622     -    30 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    35   -18     -     -     -     -   -44     -     -    50 |
 ALGO |     -     -   -24   448  -166     -     -    14     -     -   -83 |
 ALRT |     -   -36     -     -    26     -     -     -     -     -     - |
 AMC2 |     -   -99   280     -     -     -     -  -208     -     -   178 |
 AREQ |     -     -   101     -   -82     -     -     5     -     -    21 |
 ARTU |     -   174     -   121   -75     -     -  -103     -     -     X |
 ASC1 |     -     X     -     -    39     -     -     -     -     -   -60 |
 AUCK |     -   -28     -     X     -     -     -     -     -     -    32 |
 BILI |     -    80     -     -   -24     -     -   -32     -     -     X |
 BOGT |     -   -42     -   -74     9     -     -     -     -     -    90 |
 BOR1 |     -    28   -38     -     -     -     -     -     -     -     5 |
 BREW |     -     -   -19     -     -     -     -     -     -     -    19 |
 BRUS |     -     3   -25     -     -     -     -   -50     -     -   104 |
 CAGZ |     -    87     -     -     -     -     -     -     -     -   -98 |
 CEDU |     -     -     -    64     -     -     -    49     -     -  -130 |
 CHAT |     -   -62     -     -    47     -     -     -     -     -    -3 |
 CHUR |     -   -24    28     -     -     -     -     -     -     -     X |
 COCO |     -    42     -   -24  -137     -     -    74     -     -    61 |
 CRO1 |     -   214    20   -73   -29     -     -   -95     -     -     X |
 DARW |     -     -    38     -     -     -     -   -23     -     -     X |
 DAV1 |     -    91     -     -   -34     -     -    17     -     -   -77 |
 DGAR |     -   -76     -     -     -     -     -    -4     -     -    90 |
 DRAO |     -     -   -23     -     -     -     -    18     -     -    -6 |
 FAIR |     -   -43    50   128  -100     -     -    34     -     -     - |
 GLPS |     -   124     -   -22  -120     -     -     -     -     -    67 |
 GODE |     -     -   109    -9     -     -     -     -     -     -  -100 |
 GOLD |     -    84     -  -115     -     -     -   -51     -     -    61 |
 GRAZ |     -     -   -11     -     -     -     -     -     -     -    11 |
 GUAM |     -     -     -  -288     -     -     -    43     -     -   148 |
 HERS |     -  -198  -238     -     -     -     -     -     -     -   434 |
 HOB2 |     -  -154   246     -     -     -     -   -51     -     -    16 |
 HOFN |     -     -     -     -    17     -     -   -16     -     -     - |
 HRAO |     -   -72     -     -     -     -     -   -24     -     -   121 |
 IISC |     -     -     -  -145    71     -     -     -     -     -     - |
 ISPA |     -    25     -     -   -32     -     -    15     -     -    -3 |
 JPLM |     -     -   -53     -     -     -     -     -     -     -    52 |
 KERG |     -     -  -113     1   115     -     -     -     -     -   -70 |
 KGN0 |     -    33  -107     -     -     -     -     -     -     -    68 |
 KIRU |     -     7     -     -     -     -     -   -42     -     -    62 |
 KOKB |     -   -79   147     -   -79     -     -     -     -     -    65 |
 KOSG |     -   -93     -     -     -     -     -     -     -     -   104 |
 KOUR |     -   108     -  -281     8     -     -     -     -     -    80 |
 KUNM |     -     -     -     -     -     -     -   -67     -     -   110 |
 LAE1 |     -     -     -     -    91     -     -     -     -     -  -141 |
 LPGS |     -   -38   121  -308     X     -     -     -     -     -   155 |
 MAC1 |     -  -151     -   140    90     -     -     -     -     -   -77 |
 MADR |     -     -     -     -     -     -     -   -67     -     -   111 |
 MAG0 |     -     6     -     -     -     -     -    -4     -     -     - |
 MAS1 |     -     -    85  -401    55     -     -    96     -     -   -24 |
 MAW1 |     -   176     -     -  -129     -     -     -     -     -     3 |
 MBAR |     -   -98     -     -   -13     -     -    78     -     -     X |
 MCM4 |     -    89  -196     -    60     -     -     -     -     -     - |
 MDO1 |     -     -   -23     -   -71     -     -     -     -     -   133 |
 MEDI |     -     -   -32     -     -     -     -     -     -     -    31 |
 MIZU |     -     -   -71  -113     -     -     -   -39     -     -   220 |
 MKEA |     -    51     -   -31     -     -     -   -21     -     -     X |
 MONP |     -    40     -     -     -     -     -     -     -     -   -45 |
 NKLG |     -     -     -   -56     -     -     -     -     -     -    43 |
 NLIB |     -     -    42     -     -     -     -    12     -     -   -62 |
 NNOR |     -     -   136    73     -     -     -  -136     -     -    35 |
 NPLD |     -   -84     -     -     -     -     -     -     -     -    94 |
 NRIL |     -    64     -     -   -43     -     -    -1     -     -     X |
 NTUS |     -  -163     -     1    40     -     -     -     -     -   119 |
 NYA1 |     -   107     -     -   -73     -     -     -     -     -    -8 |
 OHI2 |     -    61     -    49   -71     -     -   104     -     -  -167 |
 ONSA |     -   -11    24   -14     -     -     -     -     -     -     - |
 PDEL |     -    10     -     -    -7     -     -     -     -     -     - |
 PERT |     -     -    31   -57    99     -     -     -     -     -  -141 |
 PETP |     -    33     -     -   -24     -     -     -     -     -     - |
 PIE1 |     -     -    90  -179     -     -     -     -     -     -    37 |
 PIMO |     -     -     -    47   -23     -     -     -     -     -     X |
 POL2 |     -     -     -     -     -     -     -   -45     -     -    74 |
 POTS |     -  -116     -     -    30     -     -     -     -     -    83 |
 PRDS |     -   -24    41     -     -     -     -     -     -     -   -14 |
 PTBB |     -    19   -53     -     -     -     -     -     -     -    30 |
 QAQ1 |     -  -127   116     -     -     -     -     -     -     -    28 |
 REYK |     -    16     -     -     -     -     -     -     -     -   -18 |
 SCH2 |     -     -   120     -     -     -     -   -58     -     -   -23 |
 SFER |     -   -49    55     -     -     -     -     -     -     -     - |
 SOFI |     -     -     -     -     -     -     -   -42     -     -    69 |
 SPT0 |     -   -77    -5     -     -     -     -     -     -     -    90 |
 STJO |     -    60    25     -   -49     -     -    -9     -     -     X |
 STR1 |     -     -    68     -     -     -     -     -     -     -   -66 |
 SUTM |     -     -   113     -    78     -     -  -141     -     -     X |
 THTI |     -     -    83   -72    20     -     -     -     -     -   -58 |
 TID1 |     -     -     -     -     -     -     -   -46     -     -    76 |
 TIDB |     -   -74   115    -3     -     -     -     -     -     -   -27 |
 TIXI |     -    62     -   -37     -     -     -   -25     -     -     X |
 TLSE |     -     -   -31     -     -     -     -     -     -     -    30 |
 TRO1 |     -    94     -     -     0     -     -     -     -     -  -105 |
 TSKB |     -     6   -26  -173    39     -     -     -     -     -    91 |
 URUM |     -   -47     -     -     -     -     -     -     -     -    52 |
 USN3 |     -     -     -     -     -     -     -   -32     -     -    53 |
 USUD |     -     -  -114   148     -     -     -     -     -     -     X |
 VILL |     -     -     -    -9     -     -     -     -     -     -     6 |
 WHIT |     -    -9     -     -     -     -     -     -     -     -    10 |
 WILL |     -    -2    88     -     -     -     -     -     -     -   -85 |
 WTZR |     -     -    20    -3     -     -     -     -     -     -   -18 |
 YAKT |     -   -60     -     -     -     -     -     -     -     -    67 |
 YAR2 |     -   -93   162     -     -     -     -     -     -     -   -56 |
 YEBE |     -     -   -45     -     -     -     -     -     -     -    44 |
 YELL |     -  -100    20   254   -92     -     -     -     -     -    41 |
 ZWEN |     -   -38     -   136   -30     -     -     -     -     -   -14 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5450    50    46    30    25    37  3350    34  5270     -    71 |  288   3.61
    3 |  2646   146    73   145    82   142  5756    37  2610     -    65 |  288   2.05
    4 |   901    54    47    59    36    68   787    25  1009     -    73 |  288   0.61
    5 |  6150    29    25    76    40    55  4538    22  3934     -    33 |  288   2.12
    6 |  1045   141    84   122    54   232  6441    39  1042     -    65 |  288   1.67
    7 |   983   111   105    90    76   338   689   128  1021     -    49 |  288   0.76
    8 |  2548    63    27    40    31    63  2005    22  2313     -    54 |  288   1.63
    9 |  5496    28    41    64    30    69  7399    23  4752     -    54 |  288   1.76
   10 |  1793    54    44    34    28    53  3038    32  2057     -    58 |  288   1.76
   11 |  1853    39    78    68    41    80   449    23  1457     -    48 |  288   0.39
   13 |   563    47    40    57    53    80   559    26   718     -    70 |  288   0.37
   14 |   559    46    38    33    23   128   505    24   438     -    74 |  288   0.26
   15 |  4377    33    41    33    16    56  7365    18  4002     -    57 |  288   1.98
   16 |   538    37    82    45    25    57  1118    45   761     -    45 |  288   0.41
   17 |  3377    31    39    82    32    64  2925    32  2388     -    56 |  288   0.69
   18 |   611    50     X    50    31    80   602    37   558     -    51 |  288   0.37
   19 |   758    56    49    73    26   836  1367    20   787     -    35 |  288   0.36
   20 |   383    68    79    30    32   103   687    39   667     -   114 |  288   0.21
   21 |   534    57   126    38    28    92  1118    21   552     -    86 |  288   0.26
   22 |  2274    69   108    45    29   148   491    47  1609     -    74 |  288   0.59
   23 |   428    41    58    58    34   111   248    26   339     -   102 |  288   0.23
   24 |  2047    48    82     X    53   664  2409    43  2137     -    73 |  288   1.38
   25 |  1878    26    46    31    31    41  3397    22  1861     -    28 |  288   1.95
   26 |  1100    42    42    88    26   120   389    20   862     -    51 |  288   0.52
   27 |  1757    90    36    78    23    67   703    19  1591     -    57 |  288   0.44
   28 |  3654    48    95    40    33    75  3579    25  2884     -   129 |  288   0.63
   29 |   735    44    45    65    35   213  1215    21  1819     -    55 |  288   0.65
   30 |  2367    27    28    70    22   124   889     -  2146     -    62 |  288   0.90
   31 |  3196    63    63    54    25    74  9305    24  2987     -    41 |  288   1.14
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    23    14     -     -     -     -    15     -     -    30 |  288   0.04
 ALGO |     -     -    19    40    34     -     -    19     -     -    22 |  288   0.04
 ALRT |     -    19     -     -    14     -     -     -     -     -     - |  287   7.17
 AMC2 |     -    21    15     -     -     -     -    19     -     -    29 |  288   0.03
 AREQ |     -     -    48     -    22     -     -    21     -     -    28 |  287  18.18
 ARTU |     -    41     -    31    22     -     -    24     -     -     X |  288  11.95
 ASC1 |     -     X     -     -    21     -     -     -     -     -    32 |  244    >>>
 AUCK |     -    19     -     X     -     -     -     -     -     -    21 |  264  13.28
 BILI |     -    13     -     -     8     -     -    12     -     -     X |  287  10.83
 BOGT |     -    29     -    32    27     -     -     -     -     -    21 |  288  28.98
 BOR1 |     -    20    23     -     -     -     -     -     -     -     9 |  288   0.50
 BREW |     -     -    19     -     -     -     -     -     -     -    18 |  288   0.03
 BRUS |     -    18    21     -     -     -     -    27     -     -    40 |  288   0.04
 CAGZ |     -    33     -     -     -     -     -     -     -     -    37 |  288    >>>
 CEDU |     -     -     -    34     -     -     -    15     -     -    26 |  288  16.23
 CHAT |     -    34     -     -    42     -     -     -     -     -    37 |  287  11.08
 CHUR |     -    11    12     -     -     -     -     -     -     -     X |  288   0.05
 COCO |     -    25     -    65    19     -     -    22     -     -    30 |  288  11.95
 CRO1 |     -    60    23    52    24     -     -    31     -     -     X |  288  20.36
 DARW |     -     -    28     -     -     -     -    17     -     -     X |  288  14.90
 DAV1 |     -    49     -     -    60     -     -    21     -     -   120 |  288  12.50
 DGAR |     -    33     -     -     -     -     -    26     -     -    30 |  288  23.29
 DRAO |     -     -    15     -     -     -     -    13     -     -    29 |  288   0.05
 FAIR |     -    18    39    35    14     -     -    13     -     -     - |  288   0.64
 GLPS |     -    27     -    26    16     -     -     -     -     -    33 |  288  27.61
 GODE |     -     -    16    40     -     -     -     -     -     -    32 |  288   0.19
 GOLD |     -    22     -    27     -     -     -    22     -     -    19 |  284  14.53
 GRAZ |     -     -    19     -     -     -     -     -     -     -    19 |  288    >>>
 GUAM |     -     -     -   108     -     -     -    58     -     -    47 |  288  19.03
 HERS |     -    35    23     -     -     -     -     -     -     -    33 |  264   8.20
 HOB2 |     -    24    23     -     -     -     -    16     -     -    34 |  288   0.13
 HOFN |     -     -     -     -    14     -     -    13     -     -     - |  282    >>>
 HRAO |     -    25     -     -     -     -     -    41     -     -    58 |  288   0.48
 IISC |     -     -     -    50    24     -     -     -     -     -     - |  288  26.69
 ISPA |     -    28     -     -    31     -     -    45     -     -    42 |  288  21.65
 JPLM |     -     -    25     -     -     -     -     -     -     -    24 |  288  12.59
 KERG |     -     -   121    83    54     -     -     -     -     -    62 |  287   1.03
 KGN0 |     -    24    37     -     -     -     -     -     -     -    49 |  287   0.57
 KIRU |     -    18     -     -     -     -     -    19     -     -    25 |  287  11.56
 KOKB |     -    36    22     -    22     -     -     -     -     -    27 |  288   0.04
 KOSG |     -    23     -     -     -     -     -     -     -     -    26 |  288   8.48
 KOUR |     -    30     -    36    31     -     -     -     -     -    47 |  288   1.77
 KUNM |     -     -     -     -     -     -     -    13     -     -    22 |  288  17.57
 LAE1 |     -     -     -     -    35     -     -     -     -     -    54 |  287  19.58
 LPGS |     -    57    46    48     X     -     -     -     -     -    63 |  288  30.73
 MAC1 |     -    28     -    76    55     -     -     -     -     -    67 |  288  15.12
 MADR |     -     -     -     -     -     -     -     9     -     -    15 |  288  18.42
 MAG0 |     -    24     -     -     -     -     -    16     -     -     - |  287  11.47
 MAS1 |     -     -    26    49    26     -     -    23     -     -    24 |  288   1.58
 MAW1 |     -    20     -     -    24     -     -     -     -     -    26 |  288  28.40
 MBAR |     -    99     -     -    96     -     -   141     -     -     X |  288  22.77
 MCM4 |     -    55    89     -    73     -     -     -     -     -     - |  288  36.83
 MDO1 |     -     -    45     -    23     -     -     -     -     -    56 |  288   4.81
 MEDI |     -     -    11     -     -     -     -     -     -     -    10 |  288   0.05
 MIZU |     -     -    43    69     -     -     -    36     -     -    34 |  288   0.36
 MKEA |     -    21     -    33     -     -     -    20     -     -     X |  288  29.36
 MONP |     -    19     -     -     -     -     -     -     -     -    22 |  287  14.20
 NKLG |     -     -     -    77     -     -     -     -     -     -    59 |  287    >>>
 NLIB |     -     -    19     -     -     -     -    16     -     -    41 |  288   0.05
 NNOR |     -     -    31    47     -     -     -    29     -     -    22 |  288  14.84
 NPLD |     -   106     -     -     -     -     -     -     -     -   118 |  287   0.08
 NRIL |     -    49     -     -    20     -     -    22     -     -     X |  288  10.69
 NTUS |     -    50     -    46    34     -     -     -     -     -    62 |  288   9.12
 NYA1 |     -    23     -     -    11     -     -     -     -     -    32 |  288   0.06
 OHI2 |     -    33     -    82    22     -     -    27     -     -   105 |  288   6.60
 ONSA |     -    22    33    56     -     -     -     -     -     -     - |  288   0.04
 PDEL |     -    35     -     -    25     -     -     -     -     -     - |  288  55.96
 PERT |     -     -    39    90    25     -     -     -     -     -    28 |  288   1.77
 PETP |     -    25     -     -    18     -     -     -     -     -     - |  287  15.03
 PIE1 |     -     -    20    36     -     -     -     -     -     -    38 |  285   2.44
 PIMO |     -     -     -    98    48     -     -     -     -     -     X |  263  20.35
 POL2 |     -     -     -     -     -     -     -    14     -     -    23 |  223   8.52
 POTS |     -    23     -     -    25     -     -     -     -     -    19 |  287  14.11
 PRDS |     -    19    20     -     -     -     -     -     -     -    19 |  288   1.78
 PTBB |     -    33    26     -     -     -     -     -     -     -    20 |  288   0.50
 QAQ1 |     -    11    19     -     -     -     -     -     -     -    16 |  288  11.23
 REYK |     -    28     -     -     -     -     -     -     -     -    31 |  288   7.80
 SCH2 |     -     -    20     -     -     -     -    17     -     -    20 |  288  45.01
 SFER |     -    27    31     -     -     -     -     -     -     -     - |  283  83.33
 SOFI |     -     -     -     -     -     -     -    14     -     -    23 |  288  40.90
 SPT0 |     -    58   112     -     -     -     -     -     -     -    48 |  288   0.04
 STJO |     -    39    19     -    13     -     -    22     -     -     X |  288   0.03
 STR1 |     -     -    17     -     -     -     -     -     -     -    17 |  287   1.15
 SUTM |     -     -    43     -    20     -     -    33     -     -     X |  288  11.24
 THTI |     -     -    31    37    19     -     -     -     -     -    39 |  288   5.37
 TID1 |     -     -     -     -     -     -     -    11     -     -    18 |  287   0.08
 TIDB |     -    23    22    44     -     -     -     -     -     -    20 |  288   0.08
 TIXI |     -   102     -   126     -     -     -    32     -     -     X |  287   8.44
 TLSE |     -     -    77     -     -     -     -     -     -     -    75 |  287   0.57
 TRO1 |     -    40     -     -    39     -     -     -     -     -    97 |  288   9.27
 TSKB |     -    29    49    60    33     -     -     -     -     -    73 |  288   2.07
 URUM |     -    36     -     -     -     -     -     -     -     -    40 |  288  25.09
 USN3 |     -     -     -     -     -     -     -    13     -     -    21 |  288   0.02
 USUD |     -     -    26    34     -     -     -     -     -     -     X |  288  13.29
 VILL |     -     -     -    53     -     -     -     -     -     -    40 |  245  17.41
 WHIT |     -    34     -     -     -     -     -     -     -     -    38 |  288   1.83
 WILL |     -    26    32     -     -     -     -     -     -     -    22 |  288 100.66
 WTZR |     -     -    68    48     -     -     -     -     -     -    68 |  258 139.16
 YAKT |     -    10     -     -     -     -     -     -     -     -    11 |  288   0.83
 YAR2 |     -    33    41     -     -     -     -     -     -     -    24 |  288  10.65
 YEBE |     -     -    35     -     -     -     -     -     -     -    35 |  288   0.09
 YELL |     -    26    22    22    13     -     -     -     -     -    37 |  288   0.02
 ZWEN |     -    20     -    27    22     -     -     -     -     -    26 |  288  21.99
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2617    47    51    62    36   229  3526    34  2273     -    51 |


 BEST CLOCK FIT: YELL   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BREW |   288     0     0   288   10.35   | 3.60e-14  6.61e-15  1.67e-15 |
 AMC2 |   288     0     0   288   10.35   | 3.52e-14  6.79e-15  1.20e-15 |
 ALBH |   288     0     0   288    8.74   | 3.52e-14  8.57e-15  2.15e-15 |
 SPT0 |   288     0     0   288    7.73   | 3.64e-14  1.13e-14  3.61e-15 |
 CHUR |   288     0     0   288    7.61   | 4.03e-14  1.01e-14  4.00e-15 |
 BRUS |   288     0     0   288    7.48   | 4.62e-14  1.31e-14  2.83e-15 |
 NPLD |   287     1     0   285    7.04   | 6.07e-14  1.73e-14  2.50e-15 |
 NLIB |   288     0     0   288    6.57   | 3.45e-14  7.20e-15  2.45e-15 |
 ALGO |   288     0     0   288    5.67   | 3.49e-14  1.30e-14  4.97e-15 |
 ONSA |   288     0     0   288    4.96   | 4.85e-14  9.04e-15  2.73e-15 |
 YELL |   288     0     0   288    4.53   | 2.17e-14  4.59e-15  1.58e-15 |
 USN3 |   288     0     1   143    3.24   | 8.21e-14  1.20e-14  3.10e-15 |
 KOKB |   288     0     0   288    2.44   | 5.41e-14  1.18e-14  3.96e-15 |
 DRAO |   288     0     0   288    2.17   | 6.92e-14  1.67e-14  4.72e-15 |
 STJO |   288     0     0   288    1.77   | 2.82e-14  6.40e-15  3.57e-15 |
 PIE1 |   285     1     0   281    1.35   | 7.03e-14  1.61e-14  6.30e-15 |
 NYA1 |   288     0     0   143    1.31   | 2.66e-14  7.28e-15  4.41e-15 |
 WTZR |   258     0     0   140    1.27   | 8.26e-14  2.66e-14         - |
 HOB2 |   288     0     0   143    0.95   | 4.95e-14  9.72e-15  6.48e-15 |
 TIDB |   288     0     1   142    0.80   | 1.82e-13  1.58e-14  4.63e-15 |
 GODE |   288     0     0   288    0.69   | 4.13e-14  1.09e-14  1.11e-14 |
 MEDI |   288     0     0   288    0.57   | 4.33e-14  9.20e-15  4.41e-15 |
 YEBE |   288     0     2    89    0.54   | 1.17e-13  2.10e-14  1.08e-14 |
 TID1 |   287     0     1   108    0.32   | 4.93e-14  7.86e-15  3.79e-15 |
 G16  |   288     0     0   288    0.16   | 5.05e-13  6.10e-14  4.73e-14 |
 FAIR |   288     0     1   227    0.15   | 1.95e-13  5.69e-14  4.39e-14 |
 MIZU |   288     0     0   288    0.10   | 3.69e-13  9.22e-14  3.72e-14 |
 SFER |   283     0     0   279    0.10   | 3.84e-13  1.10e-13  3.88e-14 |
 HRAO |   288     0     0   143    0.09   | 1.21e-13  3.69e-14  3.21e-14 |
 G26  |   288     0     0   288    0.09   | 3.62e-13  9.09e-14  4.88e-14 |
 TLSE |   287     0     0   286    0.08   | 4.94e-13  1.50e-13  5.26e-14 |
 G27  |   288     0     0   288    0.06   | 3.56e-13  1.03e-13  2.74e-14 |
 KGN0 |   287     0     0   286    0.06   | 3.53e-13  1.03e-13  4.66e-14 |
 BOR1 |   288     0     0   288    0.06   | 4.46e-13  1.34e-13  3.45e-14 |
 G29  |   288     0     0   288    0.06   | 4.13e-13  1.25e-13  7.04e-14 |
 G31  |   288     0     0   288    0.06   | 2.43e-13  1.16e-13  1.09e-13 |
 PTBB |   288     0     2    96    0.06   | 3.77e-13  8.34e-14  4.01e-14 |
 G04  |   288     0     0   288    0.05   | 4.04e-13  1.41e-13  4.20e-14 |
 G17  |   288     0     0   288    0.05   | 3.73e-13  1.06e-13  9.20e-14 |
 G30  |   288     0     0   288    0.04   | 3.72e-13  1.40e-13  1.10e-13 |
 G07  |   288     0     0   288    0.04   | 2.93e-13  1.03e-13  9.89e-14 |
 G19  |   288     0     2   130    0.04   | 6.25e-13  8.92e-14  2.79e-14 |
 G06  |   288     0     0   288    0.04   | 4.55e-13  1.44e-13  1.11e-13 |
 STR1 |   287     0     0   287    0.03   | 7.09e-13  1.58e-13  7.11e-14 |
 YAKT |   288     0     0   288    0.02   | 4.50e-13  1.28e-13  1.08e-13 |
 G13  |   288     3     3    44    0.02   | 6.08e-13  1.81e-13  7.89e-14 |
 TSKB |   288     0     0   288    0.02   | 9.82e-13  2.33e-13  1.45e-13 |
 G08  |   288     0     0   288    0.01   | 1.39e-12  4.12e-13  1.13e-13 |
 G24  |   288     0     1   144    0.01   | 1.37e-12  3.71e-13  1.47e-13 |
 PRDS |   288     0     0   288    0.01   | 1.41e-12  3.02e-13  1.52e-13 |
 KERG |   287     0     0   286    0.01   | 1.24e-12  3.65e-13  9.03e-14 |
 G10  |   288     0     0   288    0.01   | 1.17e-12  4.80e-13  1.78e-13 |
 KOUR |   288     0     0   288    0.01   | 1.47e-12  4.04e-13  1.12e-13 |
 G09  |   288     0     0   226    0.01   | 1.43e-12  4.05e-13  2.09e-13 |
 G05  |   288     0     0   288    0.01   | 1.28e-12  3.70e-13  2.20e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.90e-12  5.92e-13  1.30e-13 |
 G25  |   288     0     1   143    0.00   | 1.46e-12  4.19e-13  2.03e-13 |
 WHIT |   288     0     0   288    0.00   | 5.54e-13  1.61e-13  1.13e-13 |
 GPST |   288     0     0     0    0.00   | 2.48e-14  6.89e-15  1.80e-15 |
 ASC1 |   244     0     0     0    0.00   |        -         -         - |
 PIMO |   263     0     0     0    0.00   |        -         -         - |
 HOFN |   282     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 MONP |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 6.91e-13  6.49e-14  4.11e-14 |
 G23  |   288     0     4     0    0.00   | 4.93e-13  5.35e-14  1.54e-14 |
 G22  |   288     1     6     0    0.00   | 1.32e-12  1.91e-13  8.18e-14 |
 G21  |   288     0     6     0    0.00   | 9.35e-13  1.18e-13  2.42e-14 |
 G20  |   288     0     4     0    0.00   | 6.35e-13  7.67e-14  1.79e-14 |
 G18  |   288     1     6     0    0.00   | 1.49e-12  1.39e-13  3.67e-14 |
 G15  |   288     0     0     0    0.00   | 1.52e-12  6.60e-13  1.67e-13 |
 G14  |   288     0     6     0    0.00   | 6.32e-13  6.72e-14  2.67e-14 |
 G11  |   288     0     6     0    0.00   | 9.22e-13  8.45e-14  5.02e-14 |
 G03  |   288     0     0     0    0.00   | 1.37e-12  4.13e-13  1.97e-13 |
 G01  |   288     0     0     0    0.00   | 1.55e-12  7.45e-13  3.57e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   245     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     2     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.77e-13  2.03e-13  5.23e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SOFI |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   287     0     0     0    0.00   |        -         -         - |
 POL2 |   223     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.76e-12  4.82e-13  1.68e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     2     0    0.00   | 6.95e-13  1.07e-12  4.47e-13 |
 MCM4 |   288     0     1     0    0.00   | 6.25e-13  4.13e-13  2.33e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.80e-13  6.30e-13  7.15e-13 |
 KIRU |   287     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.56e-13  4.11e-13  1.25e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   284     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   287     0     0     0    0.00   |        -         -         - |
 ALRT |   287     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.21e-17  2.66e-16  1.59e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      YELL      AMC2 |
------------------------------------------+------------------------------+
