
 GPS week: 1287   Day: 0   MJD: 53253                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2784     24    -0.60     0.96     2.58     0.00
 cod |   288     0  23767      3    -0.27     0.15     0.04    23.34
 emr |   288     0  13203   1032   318.31    30.43     0.07    10.14
 esa |   288     0  17590    590   317.47    30.24     0.06    12.70
 gfz |   288     0  20515     52    -0.23     0.31     0.03    27.91
 iga |    96     0   2784      9    -0.08     0.12     0.06     0.00
 igu |    96     0   2688      0    -0.07     0.16     2.72     0.00
 jpl |   288     0  16895    950     0.12     0.07     0.07    11.16
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26964   6322    36.80     1.72     0.06    14.76

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -7789  -136   -76    -6    57     5 -7873   173     -    33 |
    3 |   241    43  -129  -169    86   -74  4105   135     -   -99 |
    4 | -1329    85    -8   -50     2  -200    44    51     -  -129 |
    5 | -2267  -111    59    27   104   252  2838  -112     -     0 |
    6 |  1943   -27    13   170    10  -166-12350  -201     -    21 |
    7 | -4385    19   -84  -151   102   202 -2906  -166     -    77 |
    8 | -7068    50   -18    15     1   129  -656     X     -   -82 |
    9 |  4838  -112    29   -27   173   -55  5560  -226     -    24 |
   10 |  -763    86   -36   -78    56    59 -3293   -67     -  -110 |
   11 |  7992   -42   -47   -60   -82   -93    26   338     -    51 |
   13 |  1885    55  -137    43  -107   -20  -467   326     -   -88 |
   14 |  4255  -104     7    45   -18   -59  -831   134     -    55 |
   15 | -5555   -45   -60   170   -35    77 -7663    -2     -    33 |
   16 |  7195    23   -50   -58   -44   -37  1116   237     -   -50 |
   17 |  -193    41    67  -108   116   322  8217  -265     -   -37 |
   18 |  5613   -86   -53     9   122  -106  1921     5     -   -61 |
   19 |  2890    23    30   -56   -36   789   258   434     -  -255 |
   20 |  5961   -49  -156   -46   121   -67   755   221     -  -163 |
   21 |  3037   -10   127    67  -150   -39  2292   -66     -   225 |
   22 | -2691   -44    19   -65    14   -83  3501    24     -    80 |
   23 |   914  -104   -55   -70    94   -49 -1079   332     -  -167 |
   24 | -4934    98    71   -85   -40   -28  3773  -157     -    65 |
   25 | -5174   -37    -4    75     9  -278 -3279     X     -   -20 |
   26 | -3775   -35     X    55    72   -87   687  -147     -   -16 |
   27 | -2331    63   -79   -63    44  -121  1537   170     -  -203 |
   28 |  1407    54    -8   153  -248    38  4938   259     -    49 |
   29 |   986   -22     X   130   -64   -55     -   -31     -    67 |
   30 | -1412   -91    42    69    75  -294 -1200   -65     -   -32 |
   31 | -1438    16   -93    43   -28    39    30    64     -     7 |
 -----+-------------------------------------------------------------+
 ALBH |     -     5     -     -     -     -     -   -10     -     X |
 ALGO |     -   -19    44     X     -     -     -     -     -     - |
 ALRT |     -     9     -     -    -7     -     -     -     -     - |
 ARTU |     -    67     -    73   -70     -     -   -48     -     X |
 ASPA |     -     -     -     -    23     -     -     -     -   -43 |
 AUCK |     -     -     -     X   -69     -     -     -     -   131 |
 BAHR |     -   -28    88     -    11     -     -    -2     -   -35 |
 BOGT |     -   -27     -   269  -100     -     -     -     -     X |
 BOR1 |     -    69     -     -     -     -     -  -144     -     X |
 BRUS |     -    21     -     -     -     -     -   -45     -     X |
 CAS1 |     -   -24     -   129     -     -     -     -     -   -73 |
 CEDU |     -     -     -   466     -     -     -     -     -  -401 |
 CHAT |     -   -17     -     -   -64     -     -     -     -   146 |
 COCO |     -    93     -  -205     -     -     -     -     -    30 |
 CRO1 |     -     -    36   -66   -70     -     -   113     -    79 |
 DAV1 |     -    73     -     -     -     -     -     -     -  -116 |
 DGAR |     -   -24     -     -    -8     -     -    72     -     X |
 DRAO |     -    28   -88     -     -     -     -    62     -   -31 |
 DWH1 |     -   148     X     -     -     -     -  -310     -     X |
 FAIR |     -     -     -   142  -131     -     -   166     -     - |
 FLIN |     -    11     -     -     -     -     -   -23     -     - |
 FORT |     -     -     -   -90   213     -     -     -     -  -305 |
 GLPS |     -    81     -     -   -68     -     -     -     -     - |
 GODE |     -    66     -  -157     -     -     -    41     -     X |
 GOLD |     -     -     -   -24     -     -     -    28     -     X |
 GUAM |     -   130     -  -470    96     -     -  -274     -   224 |
 GUAT |     -    89     -     -  -124     -     -     -     -    95 |
 HOB2 |     -    22     -     -     -     -     -     -     -   -35 |
 IISC |     -     -     -   -62    28     -     -     -     -     - |
 ISPA |     -   -13     -     -    75     -     -   -67     -   -70 |
 KERG |     -  -109     6    14   122     -     -     -     -   -94 |
 KOKB |     -   -36     -     -   -23     -     -   -23     -   119 |
 KOSG |     -   -87     -     -     -     -     -     -     -   138 |
 LAE1 |     -     -     -     -    39     -     -     -     -   -74 |
 LPGS |     -     -     -    56     -     -     -     -     -   -48 |
 MAC1 |     -   -14     -    25     -     -     -     -     -     - |
 MAG0 |     -    14     -     -     -     -     -   -28     -     - |
 MALI |     -     -     -    21     -     -     -     -     -   -18 |
 MAS1 |     -    25     -   -45   -10     -     -     -     -    18 |
 MATE |     -    29     -     -   -24     -     -     -     -     0 |
 MBAR |     -    -1     -     -   -47     -     -     X     -    91 |
 MDO1 |     -     -  -126     -   -74     -     -    86     -   162 |
 MIZU |     -     -     -   168     -     -     -  -192     -     X |
 MKEA |     -    41     -   -62     -     -     -    -8     -    -5 |
 NKLG |     -     -     -     -   -58     -     -     -     -   109 |
 NLIB |     -     -     -     -     -     -     -    41     -   -31 |
 NRC1 |     -    45   -15     -   -66     -     -     -     -    64 |
 NRIL |     -    24     -     -   -18     -     -    -4     -     X |
 NYA1 |     -    57     -     -   -47     -     -     -     -     X |
 NYAL |     -     -    -5     -     -     -     -     -     -     3 |
 ONSA |     -   -14     -    25     -     -     -     -     -     - |
 PDEL |     -   -32     -     -    27     -     -     -     -     X |
 PERT |     -     -     -    91     -     -     -     -     -   -79 |
 PETP |     -    51     -     -   -43     -     -     -     -     X |
 POL2 |     -    47     -     -     -     -     -   -99     -     X |
 POTS |     -   -60     -     -   -42     -     -     -     -   174 |
 RIOG |     -   -12   119     -   -74     -     -     -     -    77 |
 SANT |     -   -52     -   113    -8     -     -     -     -     - |
 SCUB |     -    42     -     -     -     -     -   -88     -     - |
 SEY1 |     -    75     -     -   -62     -     -     -     -     X |
 STJO |     -    24   -55     -     -     -     -     -     -     X |
 SUTM |     -     -     -     -    90     -     -  -225     -     X |
 THTI |     -     -  -118   133    39     -     -     -     -  -108 |
 TIDB |     -    84   101   -78   -71     -     -     -     -     X |
 TIXI |     -   -60     -    11    67     -     -   -56     -     X |
 TRO1 |     -     4     -     -    -4     -     -     -     -     - |
 TSKB |     -  -148    61  -106   175     -     -     -     -   -48 |
 TWTF |     -   -62   448     -     -     -     -  -264     -     X |
 UNSA |     -     -     -   -53   -46     -     -   -73     -   187 |
 URUM |     -   -47     -     -     -     -     -     -     -    75 |
 USNO |     -   -29    65     -     -     -     -     -     -     0 |
 USUD |     -     -     -    77     -     -     -     -     -   -66 |
 VILL |     -     -     -  -157     -     -     -     -     -   135 |
 WHIT |     -  -122     -     -     -     -     -     -     -   193 |
 WUHN |     -     -     -     -    89     -     -     -     -  -168 |
 YAKT |     -    34     -     -     -     -     -   -70     -     X |
 YELL |     -   -74    44    12   -37     -     -     -     -   139 |
 ZWEN |     -     -     -   -46    15     -     -     -     -    12 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3874    32    95    27    22    38  4708    76     -    40 |  288   3.78
    3 |  2432    32    55    69    14    55  2842    78     -    50 |  288   2.21
    4 |  1926    40    86    42    24    43  1085    58     -   107 |  288   0.78
    5 |  2410    74   139    62    66    84  1666    77     -   131 |  288   1.88
    6 |  2439    47    66    44    15    54  7666   100     -    58 |  288   0.84
    7 |  1232    24    61    50    39    30  2051    57     -    54 |  288   0.70
    8 |  2024    33    41    30    23    35  1890     X     -    42 |  288   2.07
    9 |  5421    42    95    46    32    51  5004    58     -    64 |  288   2.70
   10 |  3188   128   102   126   109    68  2306   109     -    89 |  288   2.42
   11 |  3033    35    99    79    33    50   635    74     -    98 |  288   0.52
   13 |   977    35    93    45    51    48   543    32     -    98 |  288   0.27
   14 |  1217    48    48    38    33    41   754    84     -    90 |  288   0.24
   15 |  4958    44    35    43    29    21  5197   137     -    59 |  288   2.76
   16 |  1217    64    59    36    30    32   747    89     -    46 |  288   0.40
   17 |   943    37   101    41    17    56  4572    47     -    52 |  288   0.89
   18 |   507    56   132   129    26    86   832   144     -    72 |  288   0.42
   19 |   926    32    42   117    19   133  1122    73     -    86 |  288   0.22
   20 |  1004    23    52    82    22    78   464   131     -    94 |  288   0.34
   21 |   943    37    75    64    35    82   865    47     -    71 |  288   0.31
   22 |   998    58    66    55    29    58  1578    79     -    85 |  288   0.38
   23 |   690    29    50    28    29    74  1063    54     -    46 |  288   0.31
   24 |  2283    36    82    25    19    70  2784    46     -    41 |  288   2.19
   25 |  5566    37    54    26    31    70  1710     X     -    45 |  288   1.77
   26 |  1598    36     X    57    30    33  1390    31     -    34 |  288   0.65
   27 |   829    46    51    36    41    47   940   119     -    42 |  288   0.65
   28 |  1069    68    95   120    35    81  2353    93     -    56 |  288   0.48
   29 |  2014    38     X    45    35   109     -    39     -   102 |  288   0.79
   30 |  3470   126    88   129   112    53   632    94     -    92 |  288   0.61
   31 |  3911    25    58    95    41    29  1608    74     -    45 |  288   1.32
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    18     -     -     -     -     -    38     -     X |  288   0.04
 ALGO |     -    26    61     X     -     -     -     -     -     - |  288   0.05
 ALRT |     -    11     -     -     9     -     -     -     -     - |  288   5.61
 ARTU |     -    39     -    24    24     -     -    59     -     X |  288  12.41
 ASPA |     -     -     -     -    16     -     -     -     -    30 |  288    >>>
 AUCK |     -     -     -     X    29     -     -     -     -    55 |  264  11.34
 BAHR |     -    32    51     -    35     -     -    68     -    44 |  288   1.20
 BOGT |     -    23     -    28    16     -     -     -     -     X |  288  22.02
 BOR1 |     -    26     -     -     -     -     -    53     -     X |  264   0.48
 BRUS |     -    14     -     -     -     -     -    30     -     X |  288   0.04
 CAS1 |     -    27     -    30     -     -     -     -     -    24 |  288   7.76
 CEDU |     -     -     -    20     -     -     -     -     -    17 |  178  24.37
 CHAT |     -    27     -     -    30     -     -     -     -    79 |  287  11.70
 COCO |     -    36     -    68     -     -     -     -     -    51 |  288   9.91
 CRO1 |     -     -    64   118    19     -     -   126     -    28 |  281  23.23
 DAV1 |     -    42     -     -     -     -     -     -     -    66 |  288  16.10
 DGAR |     -    30     -     -    24     -     -    78     -     X |  288  17.50
 DRAO |     -    11    27     -     -     -     -    20     -    28 |  288   0.61
 DWH1 |     -    11     X     -     -     -     -    22     -     X |  288   0.61
 FAIR |     -     -     -    39    46     -     -    79     -     - |  284   0.25
 FLIN |     -    10     -     -     -     -     -    20     -     - |  288   8.26
 FORT |     -     -     -    61    38     -     -     -     -    82 |  279   0.33
 GLPS |     -    36     -     -    30     -     -     -     -     - |  266  17.78
 GODE |     -    30     -    57     -     -     -    30     -     X |  287   0.06
 GOLD |     -     -     -    43     -     -     -    48     -     X |  283  13.96
 GUAM |     -    36     -    66    30     -     -    23     -    53 |  288  13.32
 GUAT |     -    20     -     -    16     -     -     -     -    24 |  288    >>>
 HOB2 |     -    15     -     -     -     -     -     -     -    24 |  288   0.04
 IISC |     -     -     -    84    38     -     -     -     -     - |  251  15.54
 ISPA |     -    28     -     -    24     -     -    38     -    42 |  288  12.50
 KERG |     -    40    48    58    37     -     -     -     -    42 |  288   0.95
 KOKB |     -    27     -     -    43     -     -    71     -    36 |  288   0.05
 KOSG |     -    20     -     -     -     -     -     -     -    31 |  288  17.47
 LAE1 |     -     -     -     -    13     -     -     -     -    24 |  287  13.19
 LPGS |     -     -     -    51     -     -     -     -     -    44 |  288  22.21
 MAC1 |     -    21     -    39     -     -     -     -     -     - |  288  12.23
 MAG0 |     -    12     -     -     -     -     -    25     -     - |  287   8.37
 MALI |     -     -     -    37     -     -     -     -     -    32 |  288  19.63
 MAS1 |     -    20     -    32    22     -     -     -     -    27 |  285   3.37
 MATE |     -    22     -     -    22     -     -     -     -    36 |  288   0.08
 MBAR |     -    53     -     -    27     -     -     X     -   113 |  288  20.78
 MDO1 |     -     -    52     -    18     -     -    34     -    32 |  288  10.43
 MIZU |     -     -     -    30     -     -     -    35     -     X |  288   0.51
 MKEA |     -    15     -    54     -     -     -    20     -    42 |  288  22.91
 NKLG |     -     -     -     -    16     -     -     -     -    31 |  287    >>>
 NLIB |     -     -     -     -     -     -     -    25     -    19 |  288   0.05
 NRC1 |     -    47    66     -    21     -     -     -     -    32 |  288   0.02
 NRIL |     -    16     -     -    18     -     -    30     -     X |  288  10.60
 NYA1 |     -    25     -     -    21     -     -     -     -     X |  288   0.07
 NYAL |     -     -    34     -     -     -     -     -     -    23 |  288   0.06
 ONSA |     -    14     -    26     -     -     -     -     -     - |  287   0.05
 PDEL |     -    17     -     -    15     -     -     -     -     X |  288  56.01
 PERT |     -     -     -    22     -     -     -     -     -    19 |  239   1.66
 PETP |     -    28     -     -    24     -     -     -     -     X |  287  10.40
 POL2 |     -    22     -     -     -     -     -    46     -     X |  288   8.93
 POTS |     -    35     -     -    20     -     -     -     -    35 |  288  34.04
 RIOG |     -    18    34     -    20     -     -     -     -    42 |  287  12.80
 SANT |     -    33     -    58    19     -     -     -     -     - |  288   8.22
 SCUB |     -    16     -     -     -     -     -    33     -     - |  286  17.02
 SEY1 |     -    25     -     -    21     -     -     -     -     X |  284  18.72
 STJO |     -    26    59     -     -     -     -     -     -     X |  288   0.07
 SUTM |     -     -     -     -    11     -     -    27     -     X |  288  10.64
 THTI |     -     -    37    46    15     -     -     -     -    22 |  288   2.95
 TIDB |     -    17    50    32    16     -     -     -     -     X |  288   0.04
 TIXI |     -    34     -    43    16     -     -    24     -     X |  286   7.14
 TRO1 |     -    24     -     -    20     -     -     -     -     - |  287   7.94
 TSKB |     -    24    79    49    37     -     -     -     -    47 |  288   0.67
 TWTF |     -    19    72     -     -     -     -    43     -     X |  288   0.46
 UNSA |     -     -     -    36    26     -     -    47     -    61 |  276  18.05
 URUM |     -    23     -     -     -     -     -     -     -    36 |  288  16.48
 USNO |     -    29    59     -     -     -     -     -     -    29 |  288   0.05
 USUD |     -     -     -    51     -     -     -     -     -    44 |  288   9.76
 VILL |     -     -     -    51     -     -     -     -     -    44 |  288  20.24
 WHIT |     -    18     -     -     -     -     -     -     -    28 |  288   4.60
 WUHN |     -     -     -     -    16     -     -     -     -    30 |  287  16.59
 YAKT |     -    18     -     -     -     -     -    37     -     X |  288   0.56
 YELL |     -    29   116    60    43     -     -     -     -    81 |  288   0.04
 ZWEN |     -     -     -    24    16     -     -     -     -    33 |  288  13.38
 -----+-------------------------------------------------------------+--------------
 TOT  |  2576    38    72    61    33    63  2720    67     -    57 |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   13.83   | 3.39e-14  6.38e-15  1.74e-15 |
 USNO |   288     0     0   288   13.07   | 4.30e-14  1.12e-14  2.46e-15 |
 ALBH |   288     0     0   288   11.72   | 3.53e-14  9.26e-15  3.36e-15 |
 YELL |   288     1     0   287    9.54   | 3.27e-14  6.49e-15  2.27e-15 |
 NYAL |   288     0     0   288    8.03   | 3.62e-14  6.69e-15  2.84e-15 |
 ALGO |   288     0     0   288    7.17   | 2.48e-14  9.11e-15  4.50e-15 |
 NRC1 |   288     0     0   288    5.67   | 2.44e-14  8.42e-15  2.64e-15 |
 NYA1 |   288     0     0   288    4.52   | 3.00e-14  6.31e-15  3.20e-15 |
 HOB2 |   288     0     0   143    4.52   | 3.73e-14  9.35e-15  3.91e-15 |
 MATE |   288     0     0   288    3.75   | 5.47e-14  1.40e-14  8.03e-15 |
 KOKB |   288     0     0   288    3.41   | 7.69e-14  2.25e-14  3.98e-15 |
 STJO |   288     1     0   287    3.06   | 4.40e-14  9.23e-15  5.05e-15 |
 NLIB |   288     0     0   288    2.83   | 5.96e-14  1.44e-14  2.18e-15 |
 GODE |   287     0     0   286    2.41   | 5.59e-14  1.39e-14  6.48e-15 |
 ONSA |   287     0     0   142    2.30   | 3.33e-14  8.07e-15  4.30e-15 |
 TIDB |   288     0     1   183    1.70   | 1.64e-13  1.58e-14  2.58e-15 |
 FORT |   279     0     0   276    0.54   | 7.91e-14  1.78e-14  1.42e-14 |
 FAIR |   284     1     0   282    0.31   | 3.84e-14  8.77e-15  2.59e-14 |
 MIZU |   288     1     0   287    0.18   | 3.38e-13  8.59e-14  5.75e-14 |
 G28  |   288     1     1   144    0.14   | 6.28e-13  6.97e-14  4.18e-14 |
 TWTF |   288     1     0   287    0.13   | 3.66e-13  1.21e-13  4.61e-14 |
 G27  |   288     1     0   287    0.12   | 3.64e-13  1.25e-13  6.78e-14 |
 G16  |   288     1     0   287    0.12   | 4.76e-13  7.52e-14  4.56e-14 |
 G04  |   288     1     0   287    0.11   | 4.48e-13  1.10e-13  6.57e-14 |
 YAKT |   288     1     0   287    0.09   | 4.53e-13  1.35e-13  5.03e-14 |
 G07  |   288     1     0   287    0.08   | 2.78e-13  8.12e-14  7.98e-14 |
 BOR1 |   264     0     0   240    0.08   | 4.56e-13  1.59e-13         - |
 DWH1 |   288     1     0   287    0.08   | 4.84e-13  1.16e-13  7.44e-14 |
 DRAO |   288     1     0   287    0.08   | 8.96e-14  4.58e-14  4.16e-14 |
 G06  |   288     1     0   287    0.08   | 5.45e-13  2.10e-13  5.73e-14 |
 G30  |   288     1     0   287    0.07   | 3.54e-13  1.12e-13  7.05e-14 |
 G17  |   288     1     0   287    0.07   | 3.66e-13  1.01e-13  1.06e-13 |
 G26  |   288     1     0   287    0.05   | 3.50e-13  1.27e-13  4.03e-14 |
 G29  |   288     1     0   287    0.05   | 4.24e-13  1.20e-13  9.18e-14 |
 G31  |   288     1     0   287    0.02   | 2.18e-13  1.71e-13  1.23e-13 |
 TSKB |   288     1     0   287    0.02   | 1.05e-12  2.79e-13  6.09e-14 |
 BAHR |   288     1     0   287    0.02   | 6.01e-13  2.16e-13  9.96e-14 |
 KERG |   288     1     0   287    0.01   | 1.05e-12  3.67e-13  7.05e-14 |
 G25  |   288     1     0   287    0.01   | 1.42e-12  3.53e-13  1.48e-13 |
 G24  |   288     1     0   287    0.01   | 1.44e-12  4.06e-13  2.82e-13 |
 G08  |   288     1     0   287    0.01   | 1.36e-12  4.66e-13  1.89e-13 |
 WHIT |   288     0     1   143    0.00   | 5.10e-13  2.85e-13  3.50e-13 |
 MAS1 |   285     0     0   284    0.00   | 1.90e-12  6.10e-13  3.39e-13 |
 GPST |   288     0     0     0    0.00   | 2.40e-14  5.53e-15  2.07e-15 |
 CEDU |   178     0     0     0    0.00   |        -         -         - |
 PERT |   239     0     0     0    0.00   | 1.93e-12  5.14e-13         - |
 UNSA |   276     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 SCUB |   286     0     0     0    0.00   |        -         -         - |
 RIOG |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G23  |   288     1     6     0    0.00   | 5.15e-13  5.79e-14  2.23e-14 |
 G22  |   288     1     5     0    0.00   | 9.70e-13  9.95e-14  2.77e-14 |
 G21  |   288     2     6     0    0.00   | 9.16e-13  1.20e-13  3.23e-14 |
 G20  |   288     1     6     0    0.00   | 8.04e-13  9.88e-14  2.96e-14 |
 G19  |   288     2     5     0    0.00   | 6.27e-13  8.79e-14  3.16e-14 |
 G18  |   288     1     6     0    0.00   | 1.29e-12  1.09e-13  4.66e-14 |
 G15  |   288     1     0     0    0.00   | 1.55e-12  5.24e-13  3.60e-13 |
 G14  |   288     1     5     0    0.00   | 5.95e-13  6.07e-14  2.40e-14 |
 G13  |   288     2     6     0    0.00   | 6.29e-13  1.29e-13  3.63e-14 |
 G11  |   288     1     6     0    0.00   | 7.82e-13  7.28e-14  3.71e-14 |
 G10  |   288     1     0     0    0.00   | 1.16e-12  4.68e-13  2.11e-13 |
 G09  |   288     1     0     0    0.00   | 1.38e-12  4.37e-13  2.64e-13 |
 G05  |   288     1     0     0    0.00   | 1.28e-12  4.81e-13  1.99e-13 |
 G03  |   288     1     0     0    0.00   | 1.30e-12  4.19e-13  2.38e-13 |
 G01  |   288     1     0     0    0.00   | 1.60e-12  6.44e-13  4.33e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     1     1     0    0.00   | 1.20e-12  7.46e-13  1.46e-12 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 THTI |   288     1     0     0    0.00   | 3.64e-13  1.65e-13  2.37e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   284     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     1     1     0    0.00   | 7.21e-13  6.68e-13  9.11e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     1     2     0    0.00   | 8.28e-13  6.33e-13  1.47e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   251     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   283     0     0     0    0.00   |        -         -         - |
 GLPS |   266     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   281     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.66e-13  7.14e-13  9.31e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.39e-17  2.87e-16  1.73e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      NYA1      BRUS |
------------------------------------------+------------------------------+
