
 GPS week: 1285   Day: 4   MJD: 53243                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2784      0    -0.01     0.00     2.38     0.00
 cod |   288     0  24493      4    -0.37    -0.05     0.04    17.64
 emr |   288     0  21506     75    21.27    30.42     0.04    16.92
 esa |   288     0  18926   1270   294.52    34.42     0.06     9.70
 gfz |   288     0  20246      0    -0.08     0.21     0.03    23.04
 iga |    96     0   2784      1    -0.02     0.00     0.07     0.00
 igu |    96     0   2784      0    -0.01     0.06     3.05     0.00
 jpl |   288     0  19167     56    -0.10    -1.85     0.04    16.42
 ngs |    96     0   2784      0    -0.01    -0.01     2.27     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30739   7415    -0.35    -1.84     0.04    16.27

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -3891   -53    -5   -22  -119   -20 -1923   130 -4086     -   114 |
    3 |  8217   -77   -82  -102    97  -116  7040   130  6679     -   -49 |
    4 | -3636    53    47  -167     0  -196   102    49 -4112     -   -73 |
    5 |  1184  -103   -64    23   118    75 11499     2   383     -    -1 |
    6 | -6910   -40  -305   134   223  -122-12687   -38 -5812     -     3 |
    7 |  -195   -57    24   -72    89    43  1100    27  -468     -   -74 |
    8 | -2274   -26    -1    58    31    32 -5423   -14 -2660     -   -36 |
    9 | -3613     0  -133   135   131   -70 -7592   -73 -3944     -   -54 |
   10 | -3979     6    30   186    36   -73  3452   -14 -4516     -  -176 |
   11 |  7365    27     8   -88  -177   -94  3961   203  6763     -    60 |
   13 |  3907   166    71    47  -244    38 -1204    73  4097     -    -9 |
   14 |  4783    97  -142    -9   -70   -25  2209   107  5201     -    41 |
   15 | -7050   -41  -118     0    44   179 -9576    88 -5716     -    16 |
   16 |  5603   -64  -129  -117    97   -69  1898   151  5467     -   -17 |
   17 | -3348    25   -29    35    87    57  7413   -59 -2971     -   -82 |
   18 |  4104   -23  -188   193   110   -34  2546    45  4086     -   -64 |
   19 |  3162    25    60   213    -7   963  1191    42  3348     -  -250 |
   20 |  2732    12     7   162  -180   -79  1286   155  2870     -   -28 |
   21 |  5918    74  -160  -110   -17   115 -1052   135  6038     -    40 |
   22 | -4060   -51  -121  -265    89    60     0   127 -3263     -    94 |
   23 |  1087   153   -49   -74   -68  -149   255    33   534     -    -8 |
   24 | -2886    18    22  -132   108  -120 -5586   -78 -2925     -   -39 |
   25 | -2358    40  -132    -5     3  -148 -4908    89  -831     -     2 |
   26 | -1774    -9   -48    81   173   -27   701  -136 -1897     -   -96 |
   27 | -4682    40    31  -115    79  -164   366   -19 -4206     -  -101 |
   28 |  4517    -8    38  -202   -84    68  4072    98  4376     -   110 |
   29 |  2210    75   -30     X    42   -71  1841   -66  1531     -   -43 |
   30 |  1912     4  -188   -21   150   -62  1943    46  1699     -   -55 |
   31 | -6043    -7   -17   115    42    12 -2923    14 -5662     -  -117 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    11     -     -     -     -   -11     -     -     X |
 ALGO |     -   -56   -14   -84     -     -     -   124     -     -     - |
 ALRT |     -    -6     -     -     5     -     -     -     -     -     - |
 AMC2 |     -  -138   163     -     -     -     -  -197     -     -   178 |
 AREQ |     -    19   -11     -    52     -     -  -145     -     -    45 |
 ARTU |     -    41     -    42   -46     -     -    -5     -     -     X |
 ASPA |     -     -     -     -    34     -     -     -     -     -   -48 |
 AUCK |     -   -60     -     X     -     -     -     -     -     -    65 |
 BAHR |     -    27    43     -   -47     -     -    29     -     -   -36 |
 BOGT |     -    47     -   135     -     -     -     -     -     -  -132 |
 BOR1 |     -   -70    73     -     -     -     -     -     -     -     X |
 BRMU |     -     -     -     -    67     -     -     -     -     -   -94 |
 BRUS |     -   -32   125     -     -     -     -   -94     -     -     X |
 CAS1 |     -    39     -    57   -63     -     -     -     -     -    13 |
 CEDU |     -   -41     -   282     -     -     -     -     -     -  -124 |
 CHAT |     -     -     -     -   -43     -     -     -     -     -    61 |
 CHUR |     -     -    35     -     -     -     -   -36     -     -     X |
 COCO |     -    43     -    21   -42     -     -     -     -     -     0 |
 CRO1 |     -   -78    34   -89    50     -     -   -41     -     -    69 |
 DAV1 |     -    42     -     -   -20     -     -     -     -     -   -17 |
 DGAR |     -   -22     -     -     -     -     -    24     -     -     X |
 DRAO |     -     -   -53     -     -     -     -    60     -     -    -5 |
 DWH1 |     -   200    38     -     -     -     -  -254     -     -     X |
 FAIR |     -     -   -68   424  -156     -     -    38     -     -     - |
 FORT |     -   313   -63  -216     3     -     -     -     -     -  -118 |
 GLPS |     -   -47     -    91    -4     -     -     -     -     -     - |
 GODE |     -     -    43    25     -     -     -   -30     -     -   -29 |
 GOL2 |     -     -    52     -     -     -     -   -81     -     -    27 |
 GOLD |     -     -     -   -42     -     -     -   -19     -     -    45 |
 GUAM |     -  -111     -   -35    -5     -     -   -13     -     -   161 |
 GUAT |     -   115     -     -   -67     -     -     -     -     -   -28 |
 HLFX |     -     -   155     -     -     -     -  -160     -     -     X |
 HOB2 |     -  -100    41     -     -     -     -     -     -     -    66 |
 HOFN |     -     -     -     -   -22     -     -    31     -     -     - |
 HRAO |     -   -60     -     -     -     -     -    14     -     -    51 |
 IENG |     -  -107   111     -     -     -     -     -     -     -     - |
 IISC |     -     -     -  -183    77     -     -     -     -     -     - |
 IRKT |     -     -   -42    73     -     -     -     -     -     -     - |
 JPLM |     -     -    75     -  -125     -     -     -     -     -   100 |
 KERG |     -     -   -58    65    38     -     -     -     -     -   -32 |
 KGN0 |     -   -52    54     -     -     -     -     -     -     -     X |
 KIRU |     -    12     -     -     -     -     -   -13     -     -     X |
 KOKB |     -     -    41     -  -132     -     -     -     -     -   144 |
 KOUR |     -     -     -  -125    53     -     -     -     -     -     - |
 LAE1 |     -    66     -     -     -     -     -     -     -     -   -71 |
 LAMA |     -    21     -     -     -     -     -   -23     -     -     - |
 LHAS |     -     -     -     -    52     -     -   -72     -     -     X |
 MAC1 |     -   -66     -    39   -68     -     -     -     -     -   144 |
 MALI |     -   109     -  -155     -     -     -     -     -     -   -25 |
 MAS1 |     -     8     -  -237     0     -     -   109     -     -    23 |
 MAW1 |     -   157     -     -   -77     -     -     -     -     -   -60 |
 MBAR |     -     7     -     -   -78     -     -    -3     -     -   141 |
 METS |     -   -60    62     -     -     -     -     -     -     -     X |
 MIZU |     -     -  -110   191     -     -     -     -     -     -     X |
 MKEA |     -     -     -    36     -     -     -   -60     -     -    39 |
 NKLG |     -    50     -     -  -112     -     -     -     -     -   105 |
 NLIB |     -   -35    -8     -     -     -     -    57     -     -   -11 |
 NNOR |     -     -    88    76     -     -     -  -187     -     -    53 |
 NPLD |     -   -99   103     -     -     -     -     -     -     -     X |
 NRC1 |     -     -    18     -  -103     -     -     -     -     -   126 |
 NRIL |     -    34     -     -    11     -     -   -52     -     -     X |
 NTUS |     -   -91     -   -95     -     -     -     -     -     -   155 |
 NYA1 |     -   199     -     -  -152     -     -     -     -     -     X |
 NYAL |     -     -     6     -     -     -     -     -     -     -    -7 |
 ONSA |     -     -     5    -8     -     -     -     -     -     -     - |
 OPMT |     -  -121   126     -     -     -     -     -     -     -     - |
 PDEL |     -   -38     -     -    29     -     -     -     -     -     - |
 PERT |     -     -   -12  -387   223     -     -     -     -     -   -72 |
 PETP |     -     -     -     -   -27     -     -    38     -     -     X |
 PIE1 |     -     -     -   320     -     -     -     -     -     -  -191 |
 POTS |     -    57     -     -   -44     -     -     -     -     -     X |
 PTBB |     -  -104   108     -     -     -     -     -     -     -     X |
 RESO |     -     6     -     -     -     -     -    -6     -     -     - |
 SCH2 |     -     -    11     -     -     -     -   -11     -     -     X |
 SCUB |     -   200     -     -     -     -     -  -215     -     -     - |
 SPT0 |     -   -93    97     -     -     -     -     -     -     -     X |
 STJO |     -     -   -27     -     -     -     -    28     -     -     X |
 STR1 |     -     -   -51     -     -     -     -     -     -     -    53 |
 SUTH |     -   -70     -     -     -     -     -     -     -     -    76 |
 THTI |     -     -   -26   240    -9     -     -     -     -     -  -104 |
 TIDB |     -     -   -79   101     -     -     -     -     -     -    22 |
 TRO1 |     -    63     -     -   -70     -     -     -     -     -    31 |
 TSKB |     -  -151    89   -33    75     -     -     -     -     -   -16 |
 ULAB |     -     -     -     -   -27     -     -    38     -     -     - |
 UNSA |     -     -     -   -69   -62     -     -   -43     -     -   172 |
 URUM |     -   -21     -     -     -     -     -     -     -     -    23 |
 USUD |     -     -   -18   189     -     -     -   -93     -     -     X |
 VILL |     -    -5     -     X     -     -     -     -     -     -     5 |
 WHIT |     -   -31     -     -     -     -     -     -     -     -    33 |
 WILL |     -   -52    54     -     -     -     -     -     -     -     X |
 WTZR |     -   -82   253  -180     -     -     -     -     -     -   -66 |
 YAKT |     -     8     -     -     -     -     -    -9     -     -     X |
 YAR2 |     -     -    48     -     -     -     -     -     -     -   -50 |
 YELL |     -    -2    86     X   -61     -     -     -     -     -     X |
 ZWEN |     -     -     -  -290   113     -     -     -     -     -    13 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6977    44    29    24    19    40  6322    32  7060     -    69 |  288   4.21
    3 |  2926    42    78    56    29    65  1667    40  1579     -    56 |  288   1.76
    4 |  1906    37    44    56    48    77   904    31  1769     -    75 |  288   0.95
    5 |  2875    64    69   111    23    79  7845    27  2701     -    76 |  288   2.11
    6 |  2270    28    34    42    28    36  7681    69  1839     -    47 |  288   2.49
    7 |   830    36    26    42    25    26   819    39   598     -    53 |  288   0.59
    8 |  1904    40    34    76    27    54  2423    50  1905     -    41 |  288   1.53
    9 |  2204    45    43    45    25    47  3999    30  2251     -    29 |  288   2.15
   10 |  3390   130   110   145    80   200  2099    82  3009     -    63 |  288   2.83
   11 |  1183    50    31    53    16    33  2326    19   678     -    37 |  288   0.43
   13 |   611    44    24   128    37    75   338    46   468     -    80 |  288   0.28
   14 |  1936    45    43    31    31    46  1598    36  1737     -    54 |  288   0.25
   15 |  2871    41    28    39    28    57  4278    37  4414     -    59 |  288   2.61
   16 |   470    51    52    43    42    46  1450    41   479     -    46 |  288   0.36
   17 |  1782    38    43    51    29    48  4378    75  1737     -    42 |  288   0.50
   18 |   622    86    74   106    34    67  1395    44   648     -    42 |  288   0.40
   19 |   577    28    26    44    33    91   329    27   624     -    74 |  288   0.31
   20 |   622    63    26    48    25    84   732    36   580     -    47 |  288   0.28
   21 |  2459    55    78    83    26   106  1077    27  2147     -    45 |  288   0.92
   22 |  2178    72    53    62    33    76   443   119  2173     -    78 |  288   0.38
   23 |   648    42    43    94    31    49   191    36   696     -    55 |  288   0.34
   24 |  2381    39    37    37    21    95  2684    57  2317     -    29 |  288   2.47
   25 |  4911    38    39    32    22    77  2306    42  3372     -    34 |  288   2.29
   26 |   859    37    66    46    35    44   822    35   878     -    59 |  288   0.89
   27 |  1671    43    67    50    35    32   834    43  1117     -    87 |  288   0.71
   28 |  1044    57    21    62    30   105  2363    21   944     -    71 |  288   0.44
   29 |  1342    38    52     X    50    36  1304    38  1180     -    61 |  288   0.76
   30 |  1530    67    29    40    35    54  1662    41  1694     -    45 |  288   0.93
   31 |  1874    37    38    47    23    38  2613    23  2262     -    48 |  288   1.06
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    43     -     -     -     -    45     -     -     X |  288   0.05
 ALGO |     -    22    25    45     -     -     -    13     -     -     - |  288   0.09
 ALRT |     -    18     -     -    14     -     -     -     -     -     - |  288   6.85
 AMC2 |     -    19    31     -     -     -     -    16     -     -    15 |  288   0.02
 AREQ |     -   115    68     -    50     -     -   145     -     -   117 |  237  14.85
 ARTU |     -    32     -    57    29     -     -    30     -     -     X |  288  14.15
 ASPA |     -     -     -     -    19     -     -     -     -     -    27 |  276    >>>
 AUCK |     -    31     -     X     -     -     -     -     -     -    33 |  264  12.65
 BAHR |     -    34    31     -    18     -     -    41     -     -    30 |  288   1.73
 BOGT |     -    43     -    37     -     -     -     -     -     -    43 |  288  20.11
 BOR1 |     -    20    21     -     -     -     -     -     -     -     X |  287   0.62
 BRMU |     -     -     -     -    21     -     -     -     -     -    30 |  288    >>>
 BRUS |     -    23    46     -     -     -     -    26     -     -     X |  288   0.05
 CAS1 |     -    17     -    98    25     -     -     -     -     -    52 |  288   7.63
 CEDU |     -    13     -    37     -     -     -     -     -     -    21 |  288  22.16
 CHAT |     -     -     -     -    56     -     -     -     -     -    80 |  287    >>>
 CHUR |     -     -    21     -     -     -     -    21     -     -     X |  287  19.93
 COCO |     -    25     -    32    15     -     -     -     -     -    18 |  288   5.75
 CRO1 |     -    57    64    55    76     -     -    51     -     -    60 |  279  22.65
 DAV1 |     -    22     -     -    23     -     -     -     -     -    35 |  288  14.68
 DGAR |     -    33     -     -     -     -     -    35     -     -     X |  288  18.38
 DRAO |     -     -    12     -     -     -     -    16     -     -    19 |  288   0.45
 DWH1 |     -    37    55     -     -     -     -    23     -     -     X |  288   0.41
 FAIR |     -     -    23    21    23     -     -    26     -     -     - |  288   0.06
 FORT |     -    74    55    85    31     -     -     -     -     -    53 |  288   0.15
 GLPS |     -    37     -    35    24     -     -     -     -     -     - |  288  18.12
 GODE |     -     -    25    40     -     -     -    20     -     -    24 |  288   0.07
 GOL2 |     -     -    32     -     -     -     -    51     -     -    26 |  286   0.44
 GOLD |     -     -     -    43     -     -     -    35     -     -    34 |  288  14.93
 GUAM |     -    39     -    67    24     -     -    22     -     -    33 |  288  15.60
 GUAT |     -    34     -     -    27     -     -     -     -     -    30 |  276    >>>
 HLFX |     -     -    40     -     -     -     -    42     -     -     X |  288  10.74
 HOB2 |     -    20    23     -     -     -     -     -     -     -    27 |  288   0.09
 HOFN |     -     -     -     -    11     -     -    15     -     -     - |  288    >>>
 HRAO |     -    52     -     -     -     -     -    86     -     -    45 |  288   1.31
 IENG |     -    30    31     -     -     -     -     -     -     -     - |  288   0.97
 IISC |     -     -     -    34    14     -     -     -     -     -     - |  288  17.46
 IRKT |     -     -    40    70     -     -     -     -     -     -     - |  288   0.32
 JPLM |     -     -    31     -    20     -     -     -     -     -    17 |  288   1.86
 KERG |     -     -    27    90    27     -     -     -     -     -    24 |  288   1.93
 KGN0 |     -    22    23     -     -     -     -     -     -     -     X |  287   0.62
 KIRU |     -    16     -     -     -     -     -    17     -     -     X |  285   7.59
 KOKB |     -     -    39     -    29     -     -     -     -     -    21 |  288   0.07
 KOUR |     -     -     -    53    22     -     -     -     -     -     - |  288   2.58
 LAE1 |     -    21     -     -     -     -     -     -     -     -    23 |  261  12.38
 LAMA |     -    13     -     -     -     -     -    14     -     -     - |  287  13.34
 LHAS |     -     -     -     -    21     -     -    30     -     -     X |  288  14.78
 MAC1 |     -    39     -    58    36     -     -     -     -     -    26 |  288  12.68
 MALI |     -    42     -    44     -     -     -     -     -     -    49 |  288  18.22
 MAS1 |     -    33     -    48    32     -     -    29     -     -    28 |  288   2.40
 MAW1 |     -    21     -     -    13     -     -     -     -     -    19 |  288  21.05
 MBAR |     -    69     -     -    59     -     -    72     -     -   109 |  288  20.39
 METS |     -    23    24     -     -     -     -     -     -     -     X |  287  12.39
 MIZU |     -     -    53    92     -     -     -     -     -     -     X |  288   0.42
 MKEA |     -     -     -    56     -     -     -    21     -     -    30 |  288  23.34
 NKLG |     -    48     -     -    30     -     -     -     -     -    22 |  287    >>>
 NLIB |     -    24    35     -     -     -     -    17     -     -    13 |  288   0.07
 NNOR |     -     -    20    62     -     -     -    39     -     -    26 |  288  13.94
 NPLD |     -    26    27     -     -     -     -     -     -     -     X |  287   0.08
 NRC1 |     -     -    19     -    21     -     -     -     -     -    20 |  288   0.04
 NRIL |     -    53     -     -    79     -     -    67     -     -     X |  288  10.13
 NTUS |     -    25     -    38     -     -     -     -     -     -    19 |  288   9.42
 NYA1 |     -    19     -     -    15     -     -     -     -     -     X |  288   0.04
 NYAL |     -     -    15     -     -     -     -     -     -     -    16 |  288   0.03
 ONSA |     -     -    62   109     -     -     -     -     -     -     - |  282   0.05
 OPMT |     -    46    48     -     -     -     -     -     -     -     - |  287   0.02
 PDEL |     -    34     -     -    26     -     -     -     -     -     - |  288  53.22
 PERT |     -     -    25    64    28     -     -     -     -     -    18 |  288   2.21
 PETP |     -     -     -     -    14     -     -    19     -     -     X |  287  10.25
 PIE1 |     -     -     -    19     -     -     -     -     -     -    11 |  245   0.06
 POTS |     -    84     -     -    64     -     -     -     -     -     X |  267 169.94
 PTBB |     -    25    26     -     -     -     -     -     -     -     X |  288   0.32
 RESO |     -    14     -     -     -     -     -    15     -     -     - |  288   7.16
 SCH2 |     -     -    23     -     -     -     -    24     -     -     X |  288   8.24
 SCUB |     -    26     -     -     -     -     -    28     -     -     - |  286  17.26
 SPT0 |     -    24    25     -     -     -     -     -     -     -     X |  286   0.04
 STJO |     -     -    18     -     -     -     -    18     -     -     X |  288   0.08
 STR1 |     -     -    29     -     -     -     -     -     -     -    30 |  288   0.95
 SUTH |     -    24     -     -     -     -     -     -     -     -    26 |  288   9.99
 THTI |     -     -    41    76    19     -     -     -     -     -    24 |  288   4.85
 TIDB |     -     -    20    80     -     -     -     -     -     -    31 |  288   0.06
 TRO1 |     -    16     -     -    20     -     -     -     -     -    18 |  288   7.54
 TSKB |     -    23    39    95    46     -     -     -     -     -    30 |  288   1.25
 ULAB |     -     -     -     -    15     -     -    21     -     -     - |  252  14.00
 UNSA |     -     -     -    65    21     -     -    42     -     -    28 |  288  17.71
 URUM |     -    16     -     -     -     -     -     -     -     -    17 |  288  12.90
 USUD |     -     -    16    65     -     -     -    31     -     -     X |  288   8.33
 VILL |     -    20     -     X     -     -     -     -     -     -    22 |  288   7.84
 WHIT |     -    25     -     -     -     -     -     -     -     -    27 |  288   1.23
 WILL |     -    30    31     -     -     -     -     -     -     -     X |  288 158.76
 WTZR |     -    20    31    55     -     -     -     -     -     -    25 |  288   0.05
 YAKT |     -    16     -     -     -     -     -    17     -     -     X |  288   0.38
 YAR2 |     -     -    21     -     -     -     -     -     -     -    22 |  288   7.58
 YELL |     -    33    20     X    24     -     -     -     -     -     X |  288   0.02
 ZWEN |     -     -     -    54    14     -     -     -     -     -    19 |  288  12.61
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2384    42    41    64    33    73  3055    43  2267     -    45 |


 BEST CLOCK FIT: OPMT   287   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 YELL |   288     0     0   288   11.33   | 3.00e-14  5.89e-15  1.22e-15 |
 AMC2 |   288     0     0   288   11.33   | 3.12e-14  6.00e-15  1.06e-15 |
 NRC1 |   288     0     0   288   10.85   | 3.12e-14  9.73e-15  1.90e-15 |
 SPT0 |   286     1     0   283    8.96   | 3.58e-14  6.99e-15  2.30e-15 |
 NPLD |   287     0     0   286    7.44   | 4.44e-14  8.40e-15  4.07e-15 |
 ALBH |   288     1     0   287    7.35   | 4.17e-14  9.18e-15  4.29e-15 |
 BRUS |   288     0     0   288    7.04   | 4.63e-14  1.13e-14  3.33e-15 |
 WTZR |   288     0     0   288    5.09   | 4.25e-14  1.35e-14  3.19e-15 |
 OPMT |   287     0     0   131    4.93   | 4.46e-14  7.30e-15  2.19e-15 |
 NLIB |   288     0     0   288    4.45   | 4.40e-14  1.39e-14  5.61e-15 |
 GOL2 |   286     2     0   282    3.70   | 3.66e-14  7.05e-15  2.41e-15 |
 KOKB |   288     0     0   288    3.16   | 5.89e-14  1.48e-14  3.91e-15 |
 ONSA |   282     0     0   281    2.75   | 3.94e-14  8.07e-15  4.60e-15 |
 STJO |   288     1     0   287    2.02   | 3.67e-14  6.56e-15  4.47e-15 |
 TIDB |   288     0     0   288    1.87   | 1.55e-13  1.67e-14  3.81e-15 |
 NYAL |   288     0     0   288    1.74   | 4.27e-14  6.72e-15  2.15e-15 |
 GODE |   288     0     0   288    1.11   | 4.84e-14  1.13e-14  3.34e-15 |
 HOB2 |   288     0     0   143    0.82   | 4.33e-14  1.02e-14  1.13e-14 |
 NYA1 |   288     0     0   288    0.78   | 2.91e-14  6.91e-15  2.63e-15 |
 FORT |   288     1     0   287    0.78   | 7.25e-14  2.44e-14  1.85e-14 |
 PIE1 |   245     0     0   226    0.72   | 8.15e-14  1.78e-14         - |
 DRAO |   288     1     0   287    0.25   | 9.43e-14  3.79e-14  3.25e-14 |
 PTBB |   288     1     0   287    0.24   | 3.04e-13  6.92e-14  2.04e-14 |
 IRKT |   288     0     0   143    0.19   | 4.87e-14  2.41e-14  2.77e-14 |
 G16  |   288     1     0   287    0.11   | 4.76e-13  8.01e-14  3.92e-14 |
 KGN0 |   287     0     0   286    0.10   | 3.70e-13  1.08e-13  8.40e-14 |
 MIZU |   288     1     0   287    0.10   | 3.28e-13  7.52e-14  4.47e-14 |
 G07  |   288     1     0   287    0.10   | 2.93e-13  9.79e-14  6.85e-14 |
 G17  |   288     1     0   287    0.08   | 3.66e-13  1.31e-13  5.77e-14 |
 BOR1 |   287     1     0   285    0.07   | 5.05e-13  1.30e-13  5.48e-14 |
 G27  |   288     1     0   287    0.06   | 3.28e-13  1.08e-13  8.91e-14 |
 DWH1 |   288     1     0   287    0.05   | 4.88e-13  1.29e-13  4.60e-14 |
 FAIR |   288     0     0   288    0.05   | 4.12e-14  9.86e-15  4.81e-15 |
 G04  |   288     1     0   287    0.05   | 4.81e-13  1.29e-13  9.33e-14 |
 IENG |   288     1     0   287    0.04   | 5.49e-13  1.78e-13  9.49e-14 |
 G26  |   288     1     0   287    0.04   | 3.53e-13  1.21e-13  6.78e-14 |
 G31  |   288     1     0   287    0.04   | 2.17e-13  1.29e-13  6.60e-14 |
 G30  |   288     1     0   287    0.04   | 3.42e-13  1.23e-13  1.04e-13 |
 G06  |   288     1     0   287    0.03   | 5.59e-13  1.75e-13  1.70e-13 |
 G29  |   288     1     0   287    0.03   | 4.19e-13  1.50e-13  9.01e-14 |
 HRAO |   288     1     0   287    0.02   | 1.36e-13  1.32e-13  1.42e-13 |
 STR1 |   288     0     0   143    0.02   | 6.57e-13  2.01e-13  7.53e-14 |
 BAHR |   288     1     0   287    0.02   | 5.34e-13  1.56e-13  1.71e-13 |
 G08  |   288     1     0   287    0.01   | 1.42e-12  4.42e-13  1.69e-13 |
 TSKB |   288     1     0   287    0.01   | 9.49e-13  3.81e-13  1.14e-13 |
 G03  |   288     1     0   287    0.01   | 1.28e-12  4.21e-13  1.49e-13 |
 KERG |   288     1     0   287    0.01   | 1.26e-12  4.68e-13  1.86e-13 |
 YAKT |   288     1     0   287    0.01   | 4.80e-13  1.07e-13  3.01e-14 |
 G09  |   288     1     0   287    0.01   | 1.34e-12  4.15e-13  1.19e-13 |
 KOUR |   288     0     0   143    0.00   | 1.37e-12  4.47e-13  1.99e-13 |
 WHIT |   288     1     0   287    0.00   | 4.97e-13  1.90e-13  1.23e-13 |
 GPST |   288     0     0     0    0.00   | 1.82e-14  3.27e-15  1.52e-15 |
 ULAB |   252     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAMA |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   261     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.33e-13  6.90e-14  4.14e-14 |
 G25  |   288     1     0     0    0.00   | 1.43e-12  5.68e-13  2.04e-13 |
 G24  |   288     1     0     0    0.00   | 1.32e-12  3.70e-13  2.96e-13 |
 G23  |   288     1     6     0    0.00   | 4.97e-13  6.19e-14  3.04e-14 |
 G22  |   288     1     4     0    0.00   | 9.48e-13  1.14e-13  2.48e-14 |
 G21  |   288     2     6     0    0.00   | 8.41e-13  1.34e-13  5.30e-14 |
 G20  |   288     1     6     0    0.00   | 7.25e-13  8.92e-14  1.82e-14 |
 G19  |   288     2     6     0    0.00   | 6.08e-13  8.84e-14  3.81e-14 |
 G18  |   288     1     6     0    0.00   | 1.21e-12  1.08e-13  4.68e-14 |
 G15  |   288     1     0     0    0.00   | 1.67e-12  4.89e-13  2.60e-13 |
 G14  |   288     1     5     0    0.00   | 5.93e-13  6.97e-14  2.85e-14 |
 G13  |   288     1     6     0    0.00   | 6.86e-13  1.02e-13  2.37e-14 |
 G11  |   288     1     6     0    0.00   | 7.60e-13  7.21e-14  5.31e-14 |
 G10  |   288     1     0     0    0.00   | 1.12e-12  4.02e-13  3.34e-13 |
 G05  |   288     1     0     0    0.00   | 1.42e-12  3.91e-13  2.74e-13 |
 G01  |   288     1     0     0    0.00   | 1.52e-12  6.92e-13  4.64e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 9.49e-13  1.32e-12  5.47e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     1     0    0.00   | 1.11e-12  8.68e-13  4.50e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     1     0     0    0.00   | 4.27e-13  2.18e-13  4.15e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   286     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     1     0     0    0.00   | 5.61e-13  5.62e-13  5.55e-13 |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   267     1     0     0    0.00   |        -         -         - |
 PERT |   288     1     0     0    0.00   | 1.93e-12  5.98e-13  2.72e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     2     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.94e-12  6.20e-13  1.64e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   285     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     0     0    0.00   | 5.54e-13  1.74e-13  2.20e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     1     1     0    0.00   | 1.99e-13  2.68e-13  1.07e-12 |
 GUAT |   276     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   279     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     2     0    0.00   | 4.25e-13  1.83e-12  4.25e-13 |
 CHUR |   287     1     1     0    0.00   | 1.11e-12  5.09e-13  1.47e-12 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   276     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   237     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALGO |   288     0     1     0    0.00   | 3.84e-14  1.24e-14  6.70e-15 |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.01e-17  2.41e-16  1.44e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      YELL      AMC2 |
------------------------------------------+------------------------------+
