
 GPS week: 1275   Day: 0   MJD: 53169                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2686      0     0.09    -0.08     2.89     0.00
 cod |   288     0  26289    108     0.13    -0.66     0.06    12.14
 emr |   288     0  15695      0  4612.33    29.08     0.03    24.45
 esa |   288     0  19297   1052  4611.93    28.93     0.07     8.16
 gfz |   288     0  20787    293    -0.28     0.20     0.04    18.20
 iga |    96     0   2686      9     0.01    -0.03     0.10     0.00
 igu |    96     0   2686      0     0.03     0.01     3.32     0.00
 jpl |   288     0  16729     56    -4.30     0.47     0.04    19.94
 ngs |    96     0   2686      0     0.05    -0.05     2.92     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  28625    249    49.24     1.24     0.04    17.11

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  9710    26   -15    48   -42   -75 22702    13  7605     -    16 |
    3 | -6938   -46    67   203   -65  -114 -1064   118 -6517     -  -161 |
    4 |  -437    71   -68   -13   200   -48 -1741   -99  -511     -   -95 |
    5 | -2189    -1     4   -18    82   116  1387    22 -1859     -   -96 |
    6 | -2351    57  -124   168   112  -146-14876    78 -2401     -  -103 |
    7 | -3400    -2   -22  -129    51   -38 -1536    27 -3281     -    27 |
    8 | -5175   -44   -76    47   121   -15 -5055   -64 -4537     -    28 |
    9 | -5604    -2   -62    58   115  -113 -4258    67 -5605     -  -107 |
   10 |  -397    53    53   -15  -133    75  3083    46  -598     -    10 |
   11 |  3975   -86    15     X    32   -27   275     -  3817     -     8 |
   13 |  3463   157  -121  -112   144   -56  -954     0  3644     -   -32 |
   14 |   881   125   -37   125  -112    45  -230   207  1200     -  -114 |
   15 |  5497   -22    -6   189     8    38  6561    46  3926     -   -96 |
   16 |  3312    23    16   302  -199   -18   174   160  3556     -   -57 |
   17 |  1010   -26   -47  -138   111   101  4734   -38  1040     -    54 |
   18 |  3549   157   -13   -60   -20   -22   674   184  3594     -  -130 |
   19 |  3135    37   284   116  -224  1062   678   155  3330     -  -349 |
   20 |  3686   -21    33    52   -72    60   553   166  3778     -   -84 |
   21 |  7081     8   -19   -20  -105    90  -386   153  6909     -    40 |
   22 | -4973    37   -46    -1   103  -145 -3036   142 -4514     -  -144 |
   24 | -4898    56   -73   123   -51  -151 -7228   -15 -5027     -    65 |
   25 |   256   100   -51    31   114   -83  6234   161   814     -  -238 |
   26 | -1796   191   -74     X    84   -95  -634    80 -1777     -  -155 |
   27 | -2799   -65   -51    20   157  -125 -1378   -29 -2627     -   -41 |
   28 |  1467  -107   -38  -110    90   -61  3718   -67  1578     -   132 |
   29 | -2390    67  -159    58   173  -213  -971    30 -2447     -   -40 |
   30 | -1343     9  -125   111   225   -12   675    73  -987     -  -171 |
   31 | -2365  -101    14    69   157    38 -8106   -33 -2135     -  -132 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    46     -     -     -     -    -4     -     -   -61 |
 ALGO |     -     -   -93   406  -125     -     -    62     -     -     - |
 AMC2 |     -  -184   106     -     -     -     -  -130     -     -   130 |
 ARTU |     -    45     -   102   -34     -     -   -39     -     -     - |
 ASC1 |     -  -130     -     -   -98     -     -     -     -     -   195 |
 AUCK |     -   -18     -     X    39     -     -     -     -     -   -29 |
 BAN2 |     -     -   -55     -     -     -     -     -     -     -    78 |
 BOGT |     -    59     -  -116    90     -     -  -100     -     -     1 |
 BOR1 |     -    62    -8     -     -     -     -     -     -     -   -33 |
 BREW |     -     -    57     -     -     -     -     -     -     -   -81 |
 BRUS |     -    19    67     -     -     -     -   -75     -     -   -23 |
 CAS1 |     -    40     -     2   -73     -     -    42     -     -     - |
 CEDU |     -   110     -    26     -     -     -   -78     -     -     - |
 CHAT |     -     -     -   -20    13     -     -     -     -     -    -5 |
 CHUR |     -    93   122     -     -     -     -     -     -     -  -241 |
 COCO |     -     4     -   -48     -     -     -   -10     -     -    31 |
 CRO1 |     -     -    12   -22   -58     -     -    31     -     -    19 |
 DARW |     -     -    88  -191     -     -     -   -30     -     -     - |
 DAV1 |     -    65     -     -    26     -     -    65     -     -  -149 |
 DGAR |     -  -118     -     -    13     -     -   -15     -     -    88 |
 DRAO |     -   -24   -72    12     -     -     -   119     -     -   -24 |
 DWH1 |     -   259    97     -     -     -     -  -204     -     -   -85 |
 FAIR |     -    35     2     7     6     -     -    -7     -     -   -29 |
 GODE |     -  -112    93   -10     -     -     -     -     -     -   -49 |
 GOL2 |     -     -    52     -     -     -     -     -     -     -   -75 |
 GOLD |     -    63     -  -259     -     -     -    -1     -     -    80 |
 GUAM |     -   150     -  -539   166     -     -  -314     -     -   306 |
 GUAT |     -  -190     -     -     -     -     -     -     -     -   135 |
 HERS |     -     -  -193     -     -     -     -     -     -     -   276 |
 HOB2 |     -   -57    -6   203     -     -     -    31     -     -   -84 |
 HOFN |     -     -     -     -   -95     -     -    86     -     -     - |
 HRAO |     -   -91     -     -  -165     -     -    16     -     -   221 |
 IISC |     -     -     -   -32     -     -     -     -     -     -    15 |
 ISPA |     -    97     -     -    38     -     -   -49     -     -   -52 |
 JPLM |     -     -   109     -  -104     -     -     -     -     -   -46 |
 KGN0 |     -    11    38     -     -     -     -     -     -     -   -62 |
 KOKB |     -  -173   131     -     -     -     -     -     -     -   -64 |
 KOSG |     -   -11     -     -     -     -     -     -     -     -     8 |
 LHAS |     -     -     -     -    24     -     -   -52     -     -    35 |
 LPGS |     -    26    13  -178     X     -     -     -     -     -    37 |
 MAC1 |     -   -30     -     -    -2     -     -     -     -     -    24 |
 MADR |     -     -     -     -     -     -     -   -49     -     -    57 |
 MATE |     -    67     -  -188     -     -     -     -     -     -    42 |
 MAW1 |     -     3     -     -    84     -     -     -     -     -   -91 |
 MBAR |     -   -38     -     -   -13     -     -    35     -     -     - |
 MCM4 |     -   121     -     -   -81     -     -     -     -     -     - |
 MDO1 |     -    23    43     -   -56     -     -     -     -     -   -18 |
 METS |     -   -95     -     -     -     -     -     -     -     -    67 |
 MIZU |     -     -   -91  -106     -     -     -     -     -     -   181 |
 MKEA |     -    45     -  -137  -119     -     -   -12     -     -   174 |
 NLIB |     -     -     -     -     -     -     -    33     -     -   -38 |
 NPLD |     -    32     -     -     -     -     -     -     -     -   -23 |
 NRC1 |     -     -    16     -  -146     -     -    -9     -     -   143 |
 NRIL |     -    17     -   249   -62     -     -   -56     -     -     - |
 NTUS |     -  -214     -   129   -29     -     -     -     -     -   121 |
 NYA1 |     -    78     -     -   -73     -     -     -     -     -    22 |
 NYAL |     -     -     -    93     -     -     -     -     -     -   -44 |
 OHI2 |     -    55     -    29   -72     -     -    21     -     -     - |
 ONSA |     -   -65     -    97     -     -     -     -     -     -     - |
 PDEL |     -   -55     -     -    36     -     -     1     -     -     - |
 PETP |     -     -     -   175  -103     -     -    23     -     -     - |
 PIE1 |     -     -     -  -348     -     -     -   128     -     -    17 |
 PIMO |     -     -     -  -128    57     -     -     -     -     -     X |
 POTS |     -    16     -   -25    51     -     -     -     -     -   -54 |
 RIOG |     -    20    77     -   -80     -     -     -     -     -   -39 |
 SANT |     -    68     -  -541    69     -     -     -     -     -   136 |
 SCH2 |     -   -48     -     -     -     -     -   -89     -     -   137 |
 SCUB |     -    22     -     -     -     -     -   -14     -     -     - |
 SFER |     -  -217     -     -     -     -     -     -     -     -   154 |
 SOFI |     -     -     -     -     -     -     -    33     -     -   -39 |
 STJO |     -     -   -24     -     -     -     -   -51     -     -    94 |
 SUTM |     -     -     -     -  -112     -     -   102     -     -     - |
 THU3 |     -    46     -     -   -13     -     -     -     -     -   -19 |
 TID1 |     -     -     -     -     -     -     -    40     -     -   -46 |
 TIDB |     -    46     -    29     -     -     -     -     -     -   -46 |
 TOW2 |     -    15     -   -42   -12     -     -    19     -     -     - |
 TRO1 |     -   -77     -     -   -19     -     -     -     -     -    75 |
 TWTF |     -   -54     -     -     -     -     -     -     -     -    38 |
 URUM |     -   -39     -     -   -60     -     -     -     -     -    92 |
 USN1 |     -   270     -     -     -     -     -  -388     -     -   261 |
 USNO |     -  -129     -     -     -     -     -     -     -     -    92 |
 USUD |     -     -     -  -130     -     -     -    70     -     -   -20 |
 WHIT |     -   -36     -     -     -     -     -     -     -     -    25 |
 WSRT |     -    -3     -   236     -     -     -     -     -     -  -111 |
 WTZR |     -   -13     -   -55     -     -     -     -     -     -    35 |
 YAKT |     -   -82     -   -41     -     -     -     -     -     -    78 |
 YAR2 |     -  -142     -   301     -     -     -   -31     -     -    -7 |
 YELL |     -    -6    61    68   -41     -     -     -     -     -   -71 |
 YKRO |     -  -256     -     -   171     -     -     -     -     -     - |
 YSSK |     -   -21     -     -   -85     -     -    90     -     -     - |
 ZAMB |     -     -     -     -    57     -     -   -52     -     -     - |
 ZWEN |     -     -     -  -331   -22     -     -     -     -     -   181 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6599   114    35   152    89    69  8520    63  6728     -    44 |  288   5.28
    3 |  2981    66    33    33    30    49  1774    44  3048     -    53 |  288   1.56
    4 |  1177   121    39   111    20    93  1252    49  1295     -    66 |  288   0.85
    5 |  4349    45    36    51    37    76  3804    37  4090     -    79 |  288   2.16
    6 |  1711    67    33    73    27    62  9378    36  1616     -    22 |  288   1.58
    7 |   970    47    22   129    27    77   758    25  1041     -    58 |  288   0.76
    8 |  4557    36    20    56    21    49  3194    32  5099     -    25 |  288   2.77
    9 |  3085    53    25    39    29    52  3634    34  3039     -    62 |  288   1.25
   10 |  1719    68    30    49    33    80  1768    32  1865     -    28 |  288   1.61
   11 |  1374    98    26     X    28   124   409     -  1156     -    86 |  288   0.37
   13 |  1327    68    20    62    40    78   912    23  1235     -    57 |  288   0.54
   14 |   729    66    18    60    49    70   267    37   868     -    51 |  288   0.23
   15 |  6694   101    38   163    40   152  4257    48  6924     -    56 |  288   3.25
   16 |   549    37    25    48    17    49   403    36   602     -    41 |  288   0.15
   17 |  1759   139    37   129    84   160  3222    96  1735     -    50 |  288   0.88
   18 |   754    49    39    43    31    60   472    37   689     -    35 |  288   0.53
   19 |   684    99    27   171    55   151   867    70   619     -    36 |  288   0.35
   20 |   672    45    34    66    23   100   860    40   626     -    81 |  288   0.35
   21 |   944    69    20    64    32    72   505    33   903     -    51 |  288   0.31
   22 |  1314    43    37    60    20    82  1516    40  1268     -    63 |  288   0.26
   24 |  5611   107    31   110    60   133  5712    61  5518     -    41 |  288   1.79
   25 |  4747    42    31    43    23    43  3493    36  4628     -    76 |  288   2.15
   26 |   887   175    21     X    35   208  1107    28   883     -    64 |  282   0.60
   27 |  1586    41    37    44    16    54   382    43  1507     -    70 |  288   0.64
   28 |  1672    33    35    49    22    52  3913    31  1708     -    28 |  288   0.97
   29 |  1300   151    39   139    41   132   684    43  1100     -    47 |  287   0.61
   30 |  1566    31    23    51    31   101   518    25  1486     -    31 |  288   0.61
   31 |  2465    45    38    64    17    58  2820    34  2314     -    29 |  288   1.23
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    42     -     -     -     -    52     -     -    13 |  288   0.19
 ALGO |     -     -    16    56    48     -     -    25     -     -     - |  288   0.03
 AMC2 |     -    39    17     -     -     -     -    28     -     -    19 |  288   0.04
 ARTU |     -    61     -    46    27     -     -    39     -     -     - |  284  10.97
 ASC1 |     -    49     -     -    20     -     -     -     -     -    39 |  288    >>>
 AUCK |     -    50     -     X    26     -     -     -     -     -    54 |  264  12.06
 BAN2 |     -     -    32     -     -     -     -     -     -     -    45 |  287  17.02
 BOGT |     -    64     -    29    32     -     -    18     -     -    23 |  288   8.69
 BOR1 |     -    27    28     -     -     -     -     -     -     -    40 |  288   0.74
 BREW |     -     -    15     -     -     -     -     -     -     -    21 |  288   0.03
 BRUS |     -    41    29     -     -     -     -    32     -     -    58 |  288   0.02
 CAS1 |     -    40     -   114    18     -     -    32     -     -     - |  288   7.44
 CEDU |     -    32     -    46     -     -     -    18     -     -     - |  288  12.29
 CHAT |     -     -     -    57    28     -     -     -     -     -    48 |  287  12.49
 CHUR |     -    13    15     -     -     -     -     -     -     -    21 |  288  15.83
 COCO |     -    70     -    53     -     -     -    16     -     -    26 |  288   9.26
 CRO1 |     -     -    74    83    80     -     -    89     -     -    95 |  278  17.11
 DARW |     -     -    27    55     -     -     -    25     -     -     - |  288   3.13
 DAV1 |     -    14     -     -    31     -     -    27     -     -    26 |  288  17.59
 DGAR |     -    84     -     -    39     -     -    32     -     -    90 |  288  13.11
 DRAO |     -    42    12    32     -     -     -    25     -     -    10 |  288   0.09
 DWH1 |     -    35    48     -     -     -     -    38     -     -    23 |  288   0.58
 FAIR |     -    28    23    44    25     -     -    28     -     -    22 |  288   0.05
 GODE |     -    33    13    65     -     -     -     -     -     -    21 |  288   0.03
 GOL2 |     -     -    38     -     -     -     -     -     -     -    54 |  282   0.26
 GOLD |     -    31     -    40     -     -     -    40     -     -    15 |  230  11.17
 GUAM |     -    36     -    66    25     -     -    25     -     -    23 |  288  11.79
 GUAT |     -    14     -     -     -     -     -     -     -     -    10 |  281    >>>
 HERS |     -     -    28     -     -     -     -     -     -     -    40 |  241  24.01
 HOB2 |     -    20    31    76     -     -     -    34     -     -    45 |  288   0.08
 HOFN |     -     -     -     -    24     -     -    22     -     -     - |  288    >>>
 HRAO |     -    54     -     -    17     -     -    67     -     -    58 |  288   0.82
 IISC |     -     -     -    30     -     -     -     -     -     -    14 |  164  11.05
 ISPA |     -    51     -     -    44     -     -    37     -     -    25 |  288  10.48
 JPLM |     -     -    19     -    18     -     -     -     -     -    20 |  288    >>>
 KGN0 |     -    64    32     -     -     -     -     -     -     -    18 |  287   0.43
 KOKB |     -    42    32     -     -     -     -     -     -     -    22 |  288   0.05
 KOSG |     -    39     -     -     -     -     -     -     -     -    28 |  288  14.51
 LHAS |     -     -     -     -    29     -     -    23     -     -    21 |  288  10.31
 LPGS |     -    51    19    41     X     -     -     -     -     -    35 |  288 156.03
 MAC1 |     -    49     -     -    48     -     -     -     -     -    29 |  288  12.34
 MADR |     -     -     -     -     -     -     -    30     -     -    34 |  288  12.45
 MATE |     -    31     -    28     -     -     -     -     -     -    28 |  288   0.06
 MAW1 |     -    20     -     -    24     -     -     -     -     -    24 |  288  30.99
 MBAR |     -    49     -     -    32     -     -    44     -     -     - |  288  21.14
 MCM4 |     -    23     -     -    15     -     -     -     -     -     - |  285  10.97
 MDO1 |     -    20    12     -    19     -     -     -     -     -     7 |  288  27.39
 METS |     -    42     -     -     -     -     -     -     -     -    30 |  287  10.72
 MIZU |     -     -    14    28     -     -     -     -     -     -    25 |  288   0.89
 MKEA |     -    25     -    84    43     -     -    38     -     -    23 |  288  22.33
 NLIB |     -     -     -     -     -     -     -    11     -     -    13 |  288   0.04
 NPLD |     -    36     -     -     -     -     -     -     -     -    25 |  287   0.04
 NRC1 |     -     -    13     -    43     -     -    24     -     -    14 |  288   0.02
 NRIL |     -    45     -    43    26     -     -    26     -     -     - |  288   9.72
 NTUS |     -    32     -    33    20     -     -     -     -     -    28 |  288   9.04
 NYA1 |     -    16     -     -    41     -     -     -     -     -    38 |  288   0.03
 NYAL |     -     -     -    16     -     -     -     -     -     -     8 |  288   0.04
 OHI2 |     -    41     -   111    30     -     -    39     -     -     - |  288   6.53
 ONSA |     -    19     -    28     -     -     -     -     -     -     - |  288   0.06
 PDEL |     -    38     -     -    24     -     -    17     -     -     - |  288  50.93
 PETP |     -     -     -    78    30     -     -    13     -     -     - |  287  10.71
 PIE1 |     -     -     -    46     -     -     -    60     -     -    83 |  288  49.38
 PIMO |     -     -     -   115    51     -     -     -     -     -     X |  244  14.26
 POTS |     -    24     -    23    44     -     -     -     -     -    51 |  288  24.80
 RIOG |     -    54    22     -    47     -     -     -     -     -    30 |  286   9.58
 SANT |     -    51     -    54    44     -     -     -     -     -    21 |  288   6.49
 SCH2 |     -    53     -     -     -     -     -    48     -     -    23 |  283  47.28
 SCUB |     -    30     -     -     -     -     -    18     -     -     - |  287  12.24
 SFER |     -    48     -     -     -     -     -     -     -     -    34 |  280  74.02
 SOFI |     -     -     -     -     -     -     -    35     -     -    41 |  288  48.71
 STJO |     -     -    12     -     -     -     -    14     -     -    15 |  288   0.06
 SUTM |     -     -     -     -    34     -     -    31     -     -     - |  288   3.94
 THU3 |     -    20     -     -    21     -     -     -     -     -    26 |  288   7.99
 TID1 |     -     -     -     -     -     -     -    31     -     -    36 |  288   0.07
 TIDB |     -    54     -    79     -     -     -     -     -     -    21 |  288   0.09
 TOW2 |     -    32     -    40    43     -     -    37     -     -     - |  288   9.24
 TRO1 |     -    30     -     -    86     -     -     -     -     -    76 |  288   8.59
 TWTF |     -    34     -     -     -     -     -     -     -     -    24 |  288   0.50
 URUM |     -    33     -     -    21     -     -     -     -     -    23 |  288  21.48
 USN1 |     -    25     -     -     -     -     -    13     -     -    17 |  288   0.04
 USNO |     -    26     -     -     -     -     -     -     -     -    18 |  259   0.03
 USUD |     -     -     -    57     -     -     -    24     -     -    25 |  288  11.40
 WHIT |     -    25     -     -     -     -     -     -     -     -    18 |  288   4.27
 WSRT |     -    26     -    48     -     -     -     -     -     -    34 |  288   0.04
 WTZR |     -    32     -    46     -     -     -     -     -     -    36 |  288   0.05
 YAKT |     -    35     -    75     -     -     -     -     -     -    24 |  275    >>>
 YAR2 |     -    37     -    40     -     -     -    18     -     -    18 |  288  32.90
 YELL |     -    30    13    27    24     -     -     -     -     -    10 |  288   0.02
 YKRO |     -    14     -     -     9     -     -     -     -     -     - |  276 269.93
 YSSK |     -    58     -     -    40     -     -    17     -     -     - |  287   9.47
 ZAMB |     -     -     -     -    24     -     -    22     -     -     - |  288  10.09
 ZWEN |     -     -     -    39    32     -     -     -     -     -    28 |  288  16.90
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2893    56    30    72    37    97  3317    36  2917     -    41 |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BREW |   288     0     0   288    9.92   | 3.75e-14  7.13e-15  1.46e-15 |
 ALGO |   288     0     0   288    9.29   | 3.05e-14  1.27e-14  2.84e-15 |
 AMC2 |   288     0     0   288    8.80   | 3.42e-14  7.08e-15  3.38e-15 |
 NPLD |   287     0     0   286    6.59   | 4.03e-14  6.85e-15  4.37e-15 |
 BRUS |   288     0     0   288    6.58   | 4.36e-14  6.20e-15  1.94e-15 |
 PIE1 |   288     1     0   287    5.58   | 4.00e-14  5.74e-15  3.53e-15 |
 USNO |   259     0     0   259    5.27   | 3.68e-14  1.02e-14  2.09e-15 |
 YELL |   288     0     0   288    4.93   | 3.07e-14  5.07e-15  1.24e-15 |
 USN1 |   288     0     0   288    4.29   | 5.63e-14  1.41e-14  2.55e-15 |
 WSRT |   288     0     0   288    3.90   | 2.67e-14  7.68e-15  2.86e-15 |
 ONSA |   288     0     0   288    3.70   | 4.21e-14  1.17e-14  4.58e-15 |
 FAIR |   288     0     0   288    3.28   | 4.89e-14  1.20e-14  4.19e-15 |
 GODE |   288     0     0   288    3.09   | 4.53e-14  1.23e-14  3.64e-15 |
 NYAL |   288     1     0   287    3.07   | 3.71e-14  9.21e-15  3.73e-15 |
 WTZR |   288     0     0   288    2.81   | 3.70e-14  2.85e-14  3.84e-15 |
 DRAO |   288     0     0   288    2.37   | 6.95e-14  2.02e-14  8.28e-15 |
 HOB2 |   288     0     0   288    2.16   | 6.44e-14  2.19e-14  6.25e-15 |
 STJO |   288     0     0   288    2.07   | 3.18e-14  6.66e-15  5.32e-15 |
 TID1 |   288     0     0   288    2.06   | 5.67e-14  1.14e-14  5.01e-15 |
 KOKB |   288     0     0   288    1.72   | 7.62e-14  1.82e-14  3.30e-15 |
 NYA1 |   288     0     0   288    1.50   | 3.02e-14  8.68e-15  3.12e-15 |
 GOL2 |   282     0     0   279    1.49   | 3.60e-14  8.04e-15  6.11e-15 |
 NRC1 |   288     0     0   288    1.14   | 4.17e-14  1.17e-14  2.44e-15 |
 MATE |   288     0     0   288    1.02   | 3.89e-14  1.31e-14  5.08e-15 |
 NLIB |   288     0     0   288    1.00   | 5.46e-14  1.77e-14  3.80e-15 |
 ALBH |   288     0     0   288    0.78   | 5.22e-14  2.19e-14  1.02e-14 |
 TIDB |   288     0     0   288    0.53   | 1.60e-13  1.76e-14  6.46e-15 |
 G19  |   288     0     0   184    0.11   | 6.14e-13  6.67e-14  2.97e-14 |
 G30  |   288     0     4    91    0.11   | 3.48e-13  8.96e-14  4.54e-14 |
 MIZU |   288     0     0   288    0.11   | 3.52e-13  9.20e-14  5.51e-14 |
 TWTF |   288     0     0   288    0.09   | 3.71e-13  1.18e-13  3.24e-14 |
 G26  |   282     0     0   281    0.08   | 3.47e-13  1.17e-13  5.14e-14 |
 SFER |   280     0     0   275    0.08   | 3.91e-13  1.01e-13  4.29e-14 |
 KGN0 |   287     0     0   286    0.07   | 3.24e-13  8.02e-14  3.31e-14 |
 BOR1 |   288     0     0   288    0.06   | 5.02e-13  1.42e-13  6.07e-14 |
 DWH1 |   288     0     0   288    0.05   | 5.21e-13  1.28e-13  5.78e-14 |
 G27  |   288     0     0   288    0.05   | 3.33e-13  8.82e-14  6.40e-14 |
 G29  |   287     0     0   286    0.04   | 4.18e-13  1.42e-13  6.69e-14 |
 G07  |   288     0     0   288    0.04   | 2.75e-13  8.45e-14  1.03e-13 |
 G06  |   288     0     0   288    0.03   | 4.93e-13  1.59e-13  1.50e-13 |
 G31  |   288     0     0   288    0.03   | 2.24e-13  1.97e-13  8.96e-14 |
 G04  |   288     0     0   288    0.03   | 4.20e-13  1.23e-13  8.80e-14 |
 G17  |   288     0     0   288    0.02   | 4.78e-13  1.30e-13  8.46e-14 |
 HRAO |   288     0     0   288    0.01   | 1.17e-13  3.31e-14  8.64e-14 |
 G13  |   288     0     3    15    0.01   | 4.93e-13  6.26e-14  5.02e-14 |
 G05  |   288     0     0   288    0.01   | 1.36e-12  3.67e-13  2.31e-13 |
 G09  |   288     0     0   288    0.01   | 1.33e-12  4.05e-13  5.63e-14 |
 G08  |   288     0     0   288    0.01   | 1.25e-12  3.90e-13  1.88e-13 |
 G24  |   288     0     0   288    0.01   | 1.37e-12  4.74e-13  1.94e-13 |
 G25  |   288     0     0   288    0.01   | 1.42e-12  4.19e-13  2.45e-13 |
 G15  |   288     0     0   288    0.00   | 1.66e-12  5.39e-13  2.90e-13 |
 G10  |   288     0     0   288    0.00   | 1.29e-12  4.26e-13  1.81e-13 |
 YAKT |   275     1     0   174    0.00   | 5.19e-13  4.91e-13  3.71e-13 |
 SUTM |   288     0     0   288    0.00   | 6.40e-13  2.00e-13  2.66e-13 |
 GPST |   288     0     0     0    0.00   | 2.39e-14  7.00e-15  1.26e-15 |
 GOLD |   230     0     0     0    0.00   |        -         -         - |
 RIOG |   286     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 SCUB |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 IISC |   164     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.63e-13  7.78e-14  7.97e-14 |
 G22  |   288     2     6     0    0.00   | 5.46e-13  6.14e-14  4.06e-14 |
 G21  |   288     1     6     0    0.00   | 1.11e-12  1.35e-13  3.59e-14 |
 G20  |   288     0     6     0    0.00   | 6.14e-13  7.03e-14  2.44e-14 |
 G18  |   288     3     6     0    0.00   | 1.38e-12  1.87e-13  4.90e-14 |
 G16  |   288     0     6     0    0.00   | 4.45e-13  5.34e-14  1.64e-14 |
 G14  |   288     0     6     0    0.00   | 5.32e-13  6.50e-14  1.41e-14 |
 G11  |   288     0     6     0    0.00   | 7.31e-13  6.97e-14  3.35e-14 |
 G03  |   288     0     0     0    0.00   | 1.16e-12  4.56e-13  1.32e-13 |
 G01  |   288     0     0     0    0.00   | 1.42e-12  8.26e-13  3.19e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   288     0     0     0    0.00   |        -         -         - |
 YKRO |   276     3     0     0    0.00   |        -         -         - |
 YAR2 |   288     2     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.91e-13  5.39e-13  4.58e-13 |
 USUD |   288     1     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SOFI |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   283     2     1     0    0.00   | 6.84e-13  7.53e-13  3.08e-12 |
 SANT |   288     0     1     0    0.00   | 1.98e-12  6.95e-13  4.94e-13 |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   244     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   285     0     0     0    0.00   | 6.01e-13  3.03e-13  7.67e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.91e-13  5.81e-13  8.94e-13 |
 JPLM |   288     1     0     0    0.00   | 5.67e-13  3.13e-13  7.62e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   281     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.26e-13  3.42e-13  2.49e-13 |
 CRO1 |   278     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   287     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.38e-17  2.85e-16  1.71e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      YELL      YELL |
------------------------------------------+------------------------------+
