
 GPS week: 1274   Day: 5   MJD: 53167                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2522      7    -0.03    -0.07     2.29     0.00
 cod |   288     0  25787    725     0.06    -0.91     0.05    14.74
 emr |   288     0  15556      0  4554.78    30.87     0.03    26.30
 gfz |   288     0  19723     67    -0.21     0.16     0.04    19.35
 iga |    96     0   2522     12     0.06    -0.31     0.09     0.00
 igu |    96     0   2430      6    -0.07     0.25     2.91     0.00
 jpl |   288     0  16744    618    -2.62     0.62     0.03    26.05
 ngs |    96     0   2522      0     0.09    -0.17     2.36     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29541   1264  4554.72    30.88     0.05    13.55

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4134   -12  -157   254  -134  5198     -  3530     -   -46 |
    3 | -7023    82   -59    81   -86 -2595     - -5209     -   -91 |
    4 |  2114     X  -103   187  -122  1549   -32  1247     -   -11 |
    5 | -4667   -23   -21   123   101 -2047     - -3937     -  -110 |
    6 | -7337   178     6  -104  -118-15249     - -5932     -   -56 |
    7 |  -452   -48    23     3     9 -2555     - -1270     -     4 |
    8 | -6748   -34   -94    72    61-13009    48 -5479     -    36 |
    9 | -3153   -86    -8    84  -143  1073    80 -2931     -  -147 |
   10 |  1711   -18     7     7   118   552     -   545     -    -4 |
   11 |  4274   -30   -93   105   -24   786     -  4176     -    71 |
   13 |  3887    65  -124   125   -87  1296   -56  3991     -   107 |
   14 |  2680   126    14  -143   -11  1081   117  2742     -  -167 |
   15 | -6506    70    39   -80   338   782     - -6069     -   -23 |
   16 |  4483    98    13   -80    23   650     -  4636     -   -18 |
   17 |  1144   -32   -80   189   152  7488     -  -114     -   -82 |
   18 |  4965   124    37   -31    43  2608     -  4637     -  -163 |
   19 |  4179   135    38   -36   985  2479     -  4127     -  -182 |
   20 |  5420    29   -47    22    72  2092    82  5182     -  -111 |
   21 |  5681   -30   -19  -150   103  1721   239  5843     -  -132 |
   22 | -3604    -8     2   -71   -80 -2392   116 -3254     -   -93 |
   24 | -4637   -35   -33    46    33     -    16 -4699     -     X |
   25 |  1639   204   -73   -15  -213  8179   105  1435     -  -236 |
   26 |  -194     X    31    61  -218  2274     -  -342     -  -142 |
   27 |   625   -17   -93    88  -136 -2513   -18  -515     -   118 |
   28 |  6561  -108  -104    46   -17  4631    83  5704     -   114 |
   29 | -4675  -142    -5    84  -139 -4552    55 -4033     -   -70 |
   30 |  -746   -36   -84    84  -198    85   123  -425     -  -129 |
   31 | -4856    14   -70    87   -68  -526     - -4962     -    -2 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -    13     -     -     -    36     -     -   -94 |
 ALGO |     -     -   -53     -     -     -    63     -     -   -17 |
 AMC2 |     -  -165   172     -     -     -  -128     -     -    91 |
 ARTU |     -    82     -   -49     -     -   -10     -     -     - |
 ASC1 |     -    91     -  -105     -     -     -     -     -    51 |
 AUCK |     -    15     -     -     -     -     -     -     -   -16 |
 BAHR |     -   -29    33   -38     -     -     -     -     -    22 |
 BAN2 |     -     -    15     -     -     -     -     -     -   -29 |
 BOGT |     -    81     -   -62     -     -     X     -     -     X |
 BOR1 |     -    82   -46     -     -     -     -     -     -     X |
 BREW |     -     -    46     -     -     -     -     -     -   -89 |
 BRMU |     -     -     -    40     -     -     -     -     -   -57 |
 BRUS |     -    83    -5     -     -     -     -     -     -   -80 |
 CAS1 |     -    15     -   -84     -     -   108     -     -  -104 |
 CEDU |     -   -52     -     -     -     -    22     -     -    17 |
 CHAT |     -     -     -   -40     -     -     -     -     -    58 |
 CHUR |     -    53   105     -     -     -     -     -     -  -261 |
 COCO |     -   -21     -     -     -     -    12     -     -     - |
 CRO1 |     -     -    15     2     -     -   -10     -     -   -12 |
 DARW |     -     -    82     -     -     -   -83     -     -     - |
 DAV1 |     -     8     -   -30     -     -    18     -     -     - |
 DGAR |     -  -102     -   -46     -     -    55     -     -    71 |
 DRAO |     -   -32    -7     -     -     -    60     -     -   -67 |
 DWH1 |     -   264   143     -     -     -  -215     -     -  -152 |
 FAIR |     -     -   120  -123     -     -   -26     -     -    -8 |
 GMAS |     -     -   223     -     -     -  -225     -     -     X |
 GODE |     -  -133    91     -     -     -     -     -     -   -33 |
 GOL2 |     -     -    31     -     -     -     -     -     -   -61 |
 GOLD |     -    20     -     -     -     -   -63     -     -    99 |
 GUAM |     -     -     -   -14     -     -   -21     -     -    57 |
 GUAT |     -     0     -   -30     -     -     -     -     -    43 |
 HERS |     -     -  -155     -     -     -     -     -     -   300 |
 HOB2 |     -   -34    34     -     -     -     -     -     -   -29 |
 HOFN |     -     -     -   -49     -     -    37     -     -     - |
 HRAO |     -  -140     -     -     -     -   -21     -     -   193 |
 IISC |     -    -2     -     7     -     -     -     -     -    -8 |
 ISPA |     -    36     -    84     -     -     6     -     -  -171 |
 JPLM |     -     -     -  -153     -     -     -     -     -   219 |
 KGN0 |     -    42     -     -     -     -     -     -     -   -46 |
 KIRU |     -    25     -     -     -     -     -     -     -   -27 |
 KOKB |     -   -95     -     -     -     -     9     -     -    87 |
 KOSG |     -   -43     -     -     -     -     -     -     -    47 |
 KUNM |     -     -     -     -     -     -    17     -     -   -34 |
 LAE1 |     -    41     -   -42     -     -     -     -     -    16 |
 LHAS |     -   -38     -   -46     -     -    18     -     -    73 |
 LPGS |     -     -  -107   528     -     -  -254     -     -   -63 |
 MAC1 |     -  -132     -   -45     -     -   108     -     -     - |
 MADR |     -     -     -     -     -     -   -44     -     -    84 |
 MAS1 |     -     -     0     -     -     -     -     -     -    -1 |
 MATE |     -    16     -   -15     -     -     -     -     -     5 |
 MAW1 |     -    13     -   -10     -     -     -     -     -     - |
 MBAR |     -   -23     -   -97     -     -    53     -     -    61 |
 MCM4 |     -   271     -  -206     -     -     -     -     -     - |
 MDO1 |     -    46    26   -51     -     -     -     -     -   -29 |
 METS |     -   178     -     -     -     -     -     -     -  -194 |
 MIZU |     -     -   -60     -     -     -    -6     -     -   128 |
 MKEA |     -     -     -  -188     -     -     -     -     -   269 |
 NLIB |     -     -     -     -     -     -    98     -     -  -188 |
 NPLD |     -   -24     -     -     -     -    19     -     -   -10 |
 NRC1 |     -     -    65   -31     -     -  -114     -     -   138 |
 NSSP |     -     8     -     -     -     -     1     -     -   -11 |
 NTUS |     -  -160     -    70     -     -     -     -     -    74 |
 OHI2 |     -    27     -   -79     -     -    43     -     -     - |
 PERT |     -   -74     -   142     -     -     -     -     -  -122 |
 POTS |     -     9     -     3     -     -     -     -     -   -13 |
 PTBB |     -    23     -     -     -     -     -     -     -   -25 |
 REYK |     -   -76     -     -     -     -     -     -     -    82 |
 RIOG |     -     5    44   -73     -     -     -     -     -    13 |
 SANT |     -  -484     -   -38     -     -     -     -     -   521 |
 SCH2 |     -     -     -     -     -     -   -56     -     -   108 |
 SCUB |     -    32     -     -     -     -   -18     -     -     - |
 SFER |     -   -46     -     -     -     -     -     -     -    50 |
 SPT0 |     -   -57     -     -     -     -     -     -     -    62 |
 STJO |     -     -   -15     -     -     -   -17     -     -    62 |
 SUTM |     -     -     -  -151     -     -   112     -     -     - |
 THU3 |     -    -9     -   -82     -     -     -     -     -   127 |
 TID1 |     -     -     -     -     -     -    -6     -     -    12 |
 TIXI |     -    59     -   -70     -     -    19     -     -     - |
 TOW2 |     -   -10     -     -     -     -     6     -     -     - |
 TRO1 |     -  -119     -    64     -     -     -     -     -    38 |
 TWTF |     -   -60     -     -     -     -   -66     -     -   192 |
 URUM |     -     0     -     -     -     -     -     -     -     0 |
 USN1 |     -   444     -     -     -     -  -251     -     -     - |
 USNO |     -   -90    83     -     -     -     -     -     -   -63 |
 USUD |     -     -     -     9     -     -     -     -     -   -13 |
 WHIT |     -   -19     -     -     -     -     -     -     -    21 |
 WSRT |     -    23     -     -     -     -     -     -     -   -25 |
 WTZR |     -   -22     -     -     -     -     -     -     -    24 |
 YAR2 |     -   -31     -     -     -     -    -6     -     -    46 |
 YELL |     -   -50    85   -57     -     -     -     -     -   -29 |
 YKRO |     -  -324     -   247     -     -     -     -     -     - |
 ZAMB |     -     7     -   139     -     -  -127     -     -     - |
 ZWEN |     -     -     -  -181     -     -     X     -     -   259 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5219   118    63    96    94  3584     -  5394     -    81 |  250   4.03
    3 |  3970    43    30    35    40  1958     -  5250     -    86 |  255   2.76
    4 |  1223     X    42    32   115   909    29  1590     -    60 |  276   0.89
    5 |  2371    37    15    16    61  1486     -  2152     -    71 |  255   1.27
    6 |  2647    32    25    30    42  9854     -  2551     -    48 |  255   1.47
    7 |  1440    60    45    45    67  1575     -   922     -    92 |  255   0.66
    8 |  3777    44    33    43    32  4249    33  4268     -    67 |  288   2.63
    9 |  1936    45    29    43    73  3145    44  2073     -    78 |  288   1.98
   10 |  2977    47    40    39    96  1246     -  2768     -    66 |  255   1.83
   11 |   992    71    24    38    64   653     -  1079     -    82 |  255   0.27
   13 |  1282    74    28    31    60  1291    26   946     -   125 |  288   0.43
   14 |   928    68    42    61    66   812    19   782     -    61 |  288   0.16
   15 |  2140   127    45    30   121  2302     -  2514     -    73 |  253   1.96
   16 |   525    26    21    38    64   432     -   598     -    75 |  255   0.21
   17 |  3573    55    37    30    87  3384     -  3194     -    70 |  255   1.17
   18 |   817    90    22    29    48  1161     -   725     -    98 |  255   0.52
   19 |   846    45    24    30   131   692     -   763     -   101 |  255   0.53
   20 |  1039    54    30    31    60   989    21   758     -    53 |  288   0.21
   21 |  1848    81    26    34    59  1059    33  1696     -    95 |  288   0.28
   22 |  1648    81    49    33    39  1541    56  1574     -    68 |  288   0.44
   24 |  2618   116    31    44   181     -    32  2717     -     X |  277   2.30
   25 |  2678    39    31    55    32  6104    29  2512     -    46 |  288   1.39
   26 |  1080     X    35    46   262  1048     -  1007     -    76 |  249   0.66
   27 |  3055    53    19    35    40  2621    28  2608     -    99 |  288   1.25
   28 |  2109    29    26    28    43  3101    24  1832     -    99 |  288   0.44
   29 |  1276   121    63    86   131  1968    29  1333     -    88 |  288   0.54
   30 |  1838    21    22    33    37  1044    30  1635     -    76 |  288   0.71
   31 |  1754    37    28    29    36  2035     -  1748     -    32 |  255   1.47
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    22     -     -     -    30     -     -    21 |  288   0.17
 ALGO |     -     -     9     -     -     -    10     -     -    10 |  288   0.02
 AMC2 |     -    37    13     -     -     -    27     -     -    27 |  288   0.02
 ARTU |     -    46     -    48     -     -    37     -     -     - |  288  11.14
 ASC1 |     -    40     -    29     -     -     -     -     -    32 |  288    >>>
 AUCK |     -    37     -     -     -     -     -     -     -    40 |  264  10.53
 BAHR |     -    55    14    28     -     -     -     -     -    26 |  288   0.81
 BAN2 |     -     -    52     -     -     -     -     -     -   101 |  282  21.54
 BOGT |     -    38     -    29     -     -     X     -     -     X |  287  11.06
 BOR1 |     -    31    17     -     -     -     -     -     -     X |  285    >>>
 BREW |     -     -    10     -     -     -     -     -     -    19 |  288   0.03
 BRMU |     -     -     -    23     -     -     -     -     -    33 |  288    >>>
 BRUS |     -    24    10     -     -     -     -     -     -    25 |  288   0.05
 CAS1 |     -    16     -    28     -     -    21     -     -    24 |  288   8.67
 CEDU |     -    58     -     -     -     -    38     -     -    37 |  288  12.07
 CHAT |     -     -     -    20     -     -     -     -     -    28 |  287  11.60
 CHUR |     -    14     7     -     -     -     -     -     -    16 |  288  53.57
 COCO |     -    37     -     -     -     -    21     -     -     - |  283   8.45
 CRO1 |     -     -    15    27     -     -    20     -     -    26 |  287  18.77
 DARW |     -     -    20     -     -     -    20     -     -     - |  288   2.70
 DAV1 |     -    15     -    21     -     -    19     -     -     - |  288  15.75
 DGAR |     -    34     -    22     -     -    24     -     -    42 |  288  17.20
 DRAO |     -    37    10     -     -     -    16     -     -    33 |  288   0.14
 DWH1 |     -    42    33     -     -     -    31     -     -    26 |  288   0.73
 FAIR |     -     -    14    22     -     -    19     -     -    15 |  288   0.10
 GMAS |     -     -    23     -     -     -    24     -     -     X |  288   2.27
 GODE |     -    35    16     -     -     -     -     -     -    14 |  288   0.10
 GOL2 |     -     -    26     -     -     -     -     -     -    51 |  286   0.04
 GOLD |     -    85     -     -     -     -    36     -     -    30 |  288  16.94
 GUAM |     -     -     -    52     -     -    57     -     -   100 |  288  10.98
 GUAT |     -    20     -    17     -     -     -     -     -    17 |  288    >>>
 HERS |     -     -    18     -     -     -     -     -     -    36 |  241  12.44
 HOB2 |     -    26    18     -     -     -     -     -     -    18 |  288   0.11
 HOFN |     -     -     -    25     -     -    19     -     -     - |  288    >>>
 HRAO |     -    22     -     -     -     -    49     -     -    84 |  288   1.09
 IISC |     -    27     -    27     -     -     -     -     -    45 |  288  19.33
 ISPA |     -    24     -    37     -     -    34     -     -    32 |  288  11.29
 JPLM |     -     -     -    20     -     -     -     -     -    29 |  288   8.98
 KGN0 |     -    37     -     -     -     -     -     -     -    40 |  282   0.52
 KIRU |     -    10     -     -     -     -     -     -     -    11 |  288  10.17
 KOKB |     -    43     -     -     -     -    26     -     -    41 |  288   0.08
 KOSG |     -    31     -     -     -     -     -     -     -    33 |  288  67.66
 KUNM |     -     -     -     -     -     -    14     -     -    28 |  288  38.76
 LAE1 |     -    32     -    34     -     -     -     -     -    34 |  287  10.71
 LHAS |     -    48     -    23     -     -    27     -     -    25 |  288  11.05
 LPGS |     -     -    21    15     -     -    23     -     -    41 |  288 205.44
 MAC1 |     -    41     -    27     -     -    36     -     -     - |  278  13.16
 MADR |     -     -     -     -     -     -    14     -     -    27 |  288  12.27
 MAS1 |     -     -    10     -     -     -     -     -     -    20 |  288   2.12
 MATE |     -    26     -    24     -     -     -     -     -    19 |  288   0.13
 MAW1 |     -    21     -    16     -     -     -     -     -     - |  288  31.23
 MBAR |     -    48     -    21     -     -    43     -     -    47 |  288  21.69
 MCM4 |     -    17     -    13     -     -     -     -     -     - |  268  45.19
 MDO1 |     -    27    14    16     -     -     -     -     -    32 |  288  12.09
 METS |     -    18     -     -     -     -     -     -     -    20 |  285  11.17
 MIZU |     -     -    14     -     -     -    17     -     -    17 |  288   0.37
 MKEA |     -     -     -    45     -     -     -     -     -    65 |  288  24.50
 NLIB |     -     -     -     -     -     -     9     -     -    18 |  283   0.04
 NPLD |     -    46     -     -     -     -    28     -     -    19 |  287   0.05
 NRC1 |     -     -     7    15     -     -    11     -     -    12 |  288   0.03
 NSSP |     -    43     -     -     -     -    32     -     -    23 |  288   9.75
 NTUS |     -    39     -    23     -     -     -     -     -    29 |  288   9.61
 OHI2 |     -    26     -    29     -     -    23     -     -     - |  288   6.93
 PERT |     -    38     -    35     -     -     -     -     -    21 |  288   3.36
 POTS |     -    29     -    33     -     -     -     -     -    23 |  288  23.09
 PTBB |     -    41     -     -     -     -     -     -     -    44 |  288   0.35
 REYK |     -    19     -     -     -     -     -     -     -    21 |  288   6.98
 RIOG |     -    23    21    30     -     -     -     -     -    41 |  288  11.10
 SANT |     -    33     -    50     -     -     -     -     -    74 |  216   4.06
 SCH2 |     -     -     -     -     -     -     6     -     -    11 |  288 133.29
 SCUB |     -    25     -     -     -     -    14     -     -     - |  288  13.77
 SFER |     -    23     -     -     -     -     -     -     -    25 |  282   0.37
 SPT0 |     -    24     -     -     -     -     -     -     -    26 |  288   0.06
 STJO |     -     -    10     -     -     -    12     -     -    12 |  288   0.06
 SUTM |     -     -     -    20     -     -    15     -     -     - |  288   2.54
 THU3 |     -     8     -    18     -     -     -     -     -    25 |  288   8.77
 TID1 |     -     -     -     -     -     -    11     -     -    22 |  288   0.05
 TIXI |     -    40     -    22     -     -    12     -     -     - |  287   7.50
 TOW2 |     -    19     -     -     -     -    11     -     -     - |  288   8.98
 TRO1 |     -    82     -    95     -     -     -     -     -    52 |  288   9.50
 TWTF |     -    54     -     -     -     -    38     -     -    41 |  288   0.49
 URUM |     -    21     -     -     -     -     -     -     -    23 |  288  11.31
 USN1 |     -    21     -     -     -     -    12     -     -     - |  288   0.03
 USNO |     -    24    11     -     -     -     -     -     -    15 |  288   0.05
 USUD |     -     -     -    21     -     -     -     -     -    31 |  288  11.11
 WHIT |     -    30     -     -     -     -     -     -     -    33 |  288   6.70
 WSRT |     -    11     -     -     -     -     -     -     -    12 |  288   0.05
 WTZR |     -    21     -     -     -     -     -     -     -    22 |  286   0.07
 YAR2 |     -    22     -     -     -     -    18     -     -    27 |  288  28.07
 YELL |     -    27    15    12     -     -     -     -     -    17 |  288   0.02
 YKRO |     -    30     -    23     -     -     -     -     -     - |  274  33.35
 ZAMB |     -    48     -    21     -     -    35     -     -     - |  260  22.89
 ZWEN |     -     -     -    39     -     -     X     -     -    55 |  288  16.38
 -----+-------------------------------------------------------------+--------------
 TOT  |  2294    46    28    36    91  2906    28  2359     -    50 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ALGO |   288     0     0   288   10.79   | 2.99e-14  6.07e-15  2.55e-15 |
 BREW |   288     0     0   288   10.35   | 4.57e-14  6.81e-15  2.41e-15 |
 AMC2 |   288     0     0   288    9.26   | 3.89e-14  5.95e-15  1.48e-15 |
 USNO |   288     0     0   288    7.92   | 4.03e-14  6.48e-15  2.35e-15 |
 NPLD |   287     0     0   286    6.76   | 5.52e-14  1.26e-14  6.54e-15 |
 WSRT |   288     0     0   288    6.71   | 3.74e-14  1.03e-14  2.40e-15 |
 BRUS |   288     0     0   288    6.34   | 5.28e-14  1.69e-14  3.78e-15 |
 YELL |   288     0     0   288    5.27   | 3.17e-14  5.13e-15  2.22e-15 |
 SPT0 |   288     0     0   288    4.79   | 4.11e-14  9.25e-15  4.45e-15 |
 USN1 |   288     0     0   288    4.10   | 7.38e-14  9.70e-15  3.10e-15 |
 GODE |   288     0     0   288    3.60   | 4.91e-14  6.66e-15  6.03e-15 |
 FAIR |   288     0     0   288    3.55   | 5.13e-14  1.51e-14  7.88e-15 |
 WTZR |   286     0     0   285    3.20   | 4.37e-14  3.19e-14  5.11e-15 |
 DRAO |   288     0     0   288    2.20   | 7.00e-14  1.93e-14  1.10e-14 |
 STJO |   288     0     0   288    2.20   | 3.53e-14  6.52e-15  3.78e-15 |
 KOKB |   288     0     0   288    2.13   | 7.70e-14  2.22e-14  7.81e-15 |
 HOB2 |   288     1     0   287    2.09   | 4.65e-14  9.00e-15  5.72e-15 |
 GOL2 |   286     0     0   285    1.95   | 4.51e-14  9.48e-15  2.20e-15 |
 MATE |   288     0     0   288    1.47   | 3.74e-14  1.53e-14  1.21e-14 |
 ALBH |   288     0     0   288    1.40   | 4.91e-14  1.43e-14  1.90e-14 |
 NRC1 |   288     0     0   288    1.22   | 3.52e-14  7.85e-15  1.90e-15 |
 TID1 |   288     0     0   143    0.76   | 5.99e-14  8.15e-15  4.61e-15 |
 NLIB |   283     0     0   282    0.66   | 6.43e-14  1.42e-14  2.54e-15 |
 PTBB |   288     0     0   288    0.19   | 3.14e-13  8.19e-14  2.58e-14 |
 G16  |   255     0     2    96    0.12   | 4.75e-13  6.82e-14         - |
 MIZU |   288     0     0   287    0.11   | 3.15e-13  9.54e-14  4.39e-14 |
 SFER |   282     0     0   276    0.09   | 3.95e-13  1.22e-13  4.11e-14 |
 G30  |   288     0     0   288    0.09   | 3.39e-13  9.86e-14  4.69e-14 |
 TWTF |   288     0     0   288    0.08   | 3.90e-13  1.31e-13  3.17e-14 |
 G13  |   288     0     0   157    0.08   | 5.39e-13  6.79e-14  3.80e-14 |
 BOR1 |   285     0     0   283    0.07   | 4.44e-13  1.40e-13  8.40e-14 |
 G29  |   288     0     0   288    0.07   | 4.09e-13  1.17e-13  6.32e-14 |
 KGN0 |   282     0     0   280    0.07   | 3.29e-13  9.48e-14  4.37e-14 |
 G26  |   249     0     0   222    0.05   | 3.69e-13  1.23e-13         - |
 DWH1 |   288     0     0   288    0.05   | 4.89e-13  1.30e-13  7.84e-14 |
 G07  |   255     0     0   224    0.04   | 2.90e-13  8.63e-14         - |
 G27  |   288     0     0   288    0.04   | 3.43e-13  1.11e-13  1.13e-13 |
 G17  |   255     0     0   224    0.03   | 3.96e-13  1.45e-13         - |
 G04  |   276     0     0   274    0.02   | 4.58e-13  1.73e-13  1.01e-13 |
 G06  |   255     0     0   224    0.02   | 5.09e-13  1.55e-13         - |
 HRAO |   288     0     0   288    0.01   | 1.27e-13  4.03e-14  1.17e-13 |
 BAHR |   288     0     0   143    0.01   | 3.52e-13  8.12e-14  7.34e-14 |
 G31  |   255     0     0   224    0.01   | 2.50e-13  1.85e-13         - |
 G25  |   288     0     0   288    0.01   | 1.22e-12  4.04e-13  1.43e-13 |
 G09  |   288     0     0   288    0.01   | 1.38e-12  5.52e-13  2.21e-13 |
 G11  |   255     0     5     6    0.01   | 7.33e-13  7.00e-14         - |
 G05  |   255     0     0   224    0.01   | 1.57e-12  4.73e-13         - |
 G08  |   288     0     0   288    0.01   | 1.31e-12  4.47e-13  1.78e-13 |
 GMAS |   288     0     0   288    0.00   | 1.12e-12  3.25e-13  1.48e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.92e-12  4.26e-13  2.25e-13 |
 G10  |   255     0     0   224    0.00   | 1.28e-12  3.68e-13         - |
 G15  |   253     0     0   224    0.00   | 1.59e-12  6.01e-13         - |
 G24  |   277     0     0   177    0.00   | 1.34e-12  5.35e-13  2.04e-13 |
 G19  |   255     0     2     5    0.00   | 6.04e-13  7.01e-14         - |
 SUTM |   288     0     0   239    0.00   | 6.65e-13  1.67e-13  1.52e-13 |
 GPST |   288     0     0     0    0.00   | 2.24e-14  4.45e-15  1.64e-15 |
 MAC1 |   278     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 METS |   285     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     4     0    0.00   | 6.26e-13  7.31e-14  3.88e-14 |
 G22  |   288     0     5     0    0.00   | 5.43e-13  5.27e-14  2.57e-14 |
 G21  |   288     2     6     0    0.00   | 9.37e-13  1.52e-13  5.25e-14 |
 G20  |   288     0     5     0    0.00   | 6.02e-13  6.15e-14  2.06e-14 |
 G18  |   255     0     6     0    0.00   | 1.43e-12  1.33e-13         - |
 G14  |   288     0     5     0    0.00   | 5.69e-13  5.90e-14  1.20e-14 |
 G03  |   255     0     0     0    0.00   | 1.26e-12  5.31e-13         - |
 G01  |   250     0     0     0    0.00   | 1.59e-12  7.91e-13         - |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   260     1     0     0    0.00   |        -         -         - |
 YKRO |   274     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     1     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.05e-13  3.75e-13  7.56e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   216     0     0     0    0.00   | 2.18e-12  5.93e-13         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.88e-12  4.41e-13  2.36e-13 |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     2     0    0.00   | 8.23e-13  7.69e-13  1.19e-12 |
 MCM4 |   268     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     2     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.89e-13  3.39e-13  1.08e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.30e-13  5.03e-13  2.64e-13 |
 CRO1 |   287     0     0     0    0.00   |        -         -         - |
 COCO |   283     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   287     0     0     0    0.00   |        -         -         - |
 BAN2 |   282     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.42e-17  2.90e-16  1.74e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      YELL      AMC2 |
------------------------------------------+------------------------------+
