
 GPS week: 1270   Day: 2   MJD: 53136                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2685      0     0.01    -0.04     2.85     0.00
 cod |   288     0  27652     51    -0.06     0.07     0.04    16.71
 emr |   288     0  25943    666  3713.33    25.06     0.04    21.26
 esa |   288     0  18978    670  3712.43    25.01     0.06    10.12
 gfz |   288     0  21141     31     0.04    -0.10     0.04    18.78
 iga |    96     0   2685     19    -0.03     0.09     0.26     0.00
 igu |    96     0   2589      0    -0.01    -0.04     2.95     0.00
 jpl |   288     0  16914      1     0.75    -2.03     0.03    22.85
 ngs |    96     0   2685      0     0.00    -0.01     2.65     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     3  35801   2167    29.67    12.19     0.07    10.27

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  1297   -28   -89   129   154    88 -1891   -88  2080     -   -19 |
    3 | -3281    43   -59   150   130    63  1412   -80 -2898     -  -204 |
    4 | -2456   -41  -189   241    37  -115  2260    90 -2278     -   120 |
    5 | -5953    17   -95    90    44   202  4754   147 -4276     -   -60 |
    6 | -1531    14  -179   223     7  -560 -8307    49 -1571     -     2 |
    7 | -2328   128  -103    66   -59   -58  1116   198 -2258     -   -18 |
    8 | -8883    53     X    54  -124  -131   -36    35 -7128     -    23 |
    9 |  6173   -10   -55   -89   115   100  4432    81  4450     -   -25 |
   10 | -1689   -28   120    27  -157  -156 -2068   113 -1510     -    12 |
   11 |  2970   -27  -163    85   133    17  -474   -51  2946     -    84 |
   13 |  5950    73  -134    53    39   -43  -798   -28  5711     -   101 |
   14 |  5015   109   -31    33  -117   -13  1014   112  4683     -  -146 |
   15 | -4262   -44    42    -9    30   128  -399   -23 -4220     -   -20 |
   16 |  3572   112   -41    20  -105   -22   255    84  3589     -   -82 |
   17 | -3184   -81    -3    -2   141   235  4117    43 -3075     -  -144 |
   18 |  3874    39   -17    53   -21    20  -268    88  4012     -   -77 |
   19 |  5447   -88   208  -461   185  1087 -1232   -86  4932     -     X |
   20 |  3983   -16  -132   102    70   183   339   119  4278     -    28 |
   21 |  6204    23    15   132  -124    79 -1383    18  5643     -    22 |
   22 |  7256   -16    -2     0   -25   433 11285     6  4108     -    64 |
   24 | -5914   -12   -43   -99     1  -617     -   121 -5600     -   -27 |
   25 | -4002    62    -8  -183    36  -123  -630    74 -2671     -     X |
   26 |  2043    27   -64   -40    63   -59 -1373    90   950     -   -23 |
   27 | -4162    -7  -125   184     3  -341 -2875   139 -4055     -  -171 |
   28 |  2629    20  -132   104   -65    80  3459    47  2682     -   173 |
   29 | -4563    -1    45   -22   -65  -551 -4422    92 -3805     -    16 |
   30 |  -460    80   -76   -18   -14   -27 -3122    80 -1093     -   -81 |
   31 | -3828    94     6   -65    22   -24 -5095   -53 -3704     -  -134 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    -8     -     -     -     -    15     -     -   -18 |
 ALGO |     -     -   -23     X     -     -     -    12     -     -    22 |
 ALRT |     -   -54     -     -    48     -     -     -     -     -     - |
 AMC2 |     -  -102   119     -     -     -     -   -76     -     -    90 |
 ARTU |     -    34     -    87   -35     -     -   -35     -     -     - |
 ASC1 |     -   -90     -     -    43     -     -     -     -     -    74 |
 ASPA |     -     -     -     -    32     -     -     -     -     -   -59 |
 AUCK |     -     5     -     -     -     -     -     -     -     -    -8 |
 BAN2 |     -     -   -83     -     -     -     -     -     -     -   173 |
 BILI |     -    49     -     -   -40     -     -    -3     -     -     - |
 BOGT |     -     -     -   146   -11     -     -   -56     -     -     X |
 BOR1 |     -    -5     4     -     -     -     -     -     -     -     X |
 BREW |     -     -     3     -     -     -     -     -     -     -    -6 |
 BRMU |     -     -     -     -   -86     -     -     -     -     -   158 |
 BRUS |     -    81    -4     -     -     -     -   -73     -     -    39 |
 CAS1 |     -    65     -    86  -104     -     -    81     -     -  -183 |
 CEDU |     -   -56     -   182     -     -     -   -10     -     -   -67 |
 CHAT |     -   -15     -     -   -24     -     -     -     -     -    68 |
 CHUR |     -     -   106     -     -     -     -     -     -     -  -219 |
 COCO |     -   -57     -  -142   202     -     -     -     -     -  -139 |
 CRO1 |     -     -   -21    19    52     -     -   -50     -     -    43 |
 DAKA |     -     9     -     -    -8     -     -     -     -     -     - |
 DARW |     -    91    23     -     -     -     -   -88     -     -     - |
 DAV1 |     -    69     -     -   -79     -     -    60     -     -  -101 |
 DRAO |     -    33   -86     -     -     -     -    76     -     -   -47 |
 DWH1 |     -   169    52     -     -     -     -  -167     -     -    -6 |
 FAIR |     -     -   -40   297  -150     -     -    43     -     -   -33 |
 FORT |     -   485  -258     -   136     -     -     -     -     -  -315 |
 GMAS |     -     -   129     -     -     -     -  -120     -     -     X |
 GODE |     -   -88    76    54     -     -     -     -     -     -   -67 |
 GOL2 |     -     -    -2     -     -     -     -     -     -     -     5 |
 GOLD |     -    35     -  -238     -     -     -    33     -     -    76 |
 GRAZ |     -     -    41     -     -     -     -     -     -     -   -85 |
 GUAM |     -     -     -  -369   249     -     -   -76     -     -    76 |
 GUAT |     -    15     -     -   -14     -     -     -     -     -     X |
 HERS |     -     -  -199     -     -     -     -     -     -     -   413 |
 HOB2 |     -   -52   107     -     -     -     -     -     -     -  -138 |
 HOFN |     -     -     -     -   -56     -     -    46     -     -     - |
 HRAO |     -     -     -     -     -     -     -   -69     -     -   155 |
 IENG |     -  -133   105     -     -     -     -     -     -     -     - |
 IISC |     -     -     -   -62    20     -     -     -     -     -    24 |
 ISPA |     -    26     -     -    49     -     -   -59     -     -     - |
 JAB1 |     -    48     -   -79     -     -     -     -     -     -     - |
 JPLM |     -     -    27     -     -     -     -     -     -     -   -55 |
 KARR |     -    40     -    14     -     -     -   -35     -     -     - |
 KERG |     -   144    56  -197   -37     -     -     -     -     -   -88 |
 KGN0 |     -   -58    57     -     -     -     -     -     -     -   -24 |
 KIRU |     -   -31     -    -2     -     -     -     -     -     -    53 |
 KIT3 |     -     -     -    26   -99     -     -    83     -     -   -29 |
 KOKB |     -     -     -     -    31     -     -     -     -     -   -57 |
 KOSG |     -   -66     -     -     -     -     -     -     -     -   107 |
 KOUR |     -    39     -  -309     -     -     -     -     -     -   245 |
 KUNM |     -     -     -     -     -     -     -   -42     -     -    94 |
 LAE1 |     -   -38     -     -   -88     -     -   159     -     -  -132 |
 LHAS |     -     -     -  -150     9     -     -    13     -     -    98 |
 LPGS |     -   -17    32  -139     -     -     -     -     -     -    98 |
 MAC1 |     -  -108     -   151   -51     -     -   126     -     -  -162 |
 MADR |     -     -     -     -     -     -     -   -62     -     -   138 |
 MAG0 |     -   -72     -     -     -     -     -    53     -     -     - |
 MAS1 |     -     -    88  -237     0     -     -     -     -     -    50 |
 MAW1 |     -   179     -   -84   -58     -     -     -     -     -   -93 |
 MCM4 |     -   356  -218     -   -57     -     -     -     -     -     - |
 MDO1 |     -    38   -29     -     3     -     -     -     -     -    -8 |
 MEDI |     -     -     9     -     -     -     -     -     -     -   -18 |
 METS |     -   -51    36     -     -     -     -     -     -     -     8 |
 MIZU |     -     -   176  -555     -     -     -     -     -     -   172 |
 MKEA |     -     -     -   -76     -     -     -   -20     -     -   120 |
 NLIB |     -     -   -80     -     -     -     -   112     -     -   -84 |
 NNOR |     -     -   -85   212     -     -     -     -     -     -   -35 |
 NPLD |     -   -90    62     -     -     -     -     -     -     -    17 |
 NRC1 |     -     5    -3     -    16     -     -   -78     -     -   143 |
 NRIL |     -    35     -     -   -63     -     -    26     -     -     - |
 NSSP |     -     -     -     -     -     -     -    48     -     -  -108 |
 NYA1 |     -    98     -     -   -79     -     -     -     -     -   -15 |
 NYAL |     -     -    35     -     -     -     -     -     -     -   -72 |
 ONSA |     -  -107     1   173     -     -     -     -     -     -     - |
 PDEL |     -    90     -     -  -147     -     -    54     -     -     - |
 PERT |     -     -    33  -126    64     -     -     -     -     -   -62 |
 PETP |     -  -113     -     -   100     -     -     -     -     -     - |
 PIE1 |     -     -    29   -73     -     -     -    44     -     -   -87 |
 POTS |     -   -21     -     -    14     -     -     -     -     -    10 |
 PRDS |     -     -    36     -     -     -     -     -     -     -   -74 |
 PTBB |     -  -104    77     -     -     -     -     -     -     -    10 |
 QAQ1 |     -   -97    12     -     -     -     -     -     -     -   135 |
 RIOG |     -     0    86     -   -75     -     -     -     -     -   -42 |
 SANT |     -  -104     -   378  -121     -     -     -     -     -    18 |
 SCH2 |     -     -   -11     -     -     -     -     -     -     -    23 |
 SEY1 |     -     -     -     -   223     -     -     -     -     -  -408 |
 SFER |     -   -25   -42     -     -     -     -     -     -     -   127 |
 SOFI |     -     -     -     -     -     -     -    30     -     -   -68 |
 SPT0 |     -  -173    78     -     -     -     -     -     -     -   120 |
 STJO |     -     -   -45     -     -     -     -   -38     -     -   179 |
 STR1 |     -     -     2     -     -     -     -     -     -     -    -4 |
 SUTM |     -     -   159     -    74     -     -  -209     -     -     - |
 THTI |     -     -    55  -110     6     -     -     -     -     -   -16 |
 THU3 |     -   -55   -12     -     -     -     -     -     -     -   116 |
 TID1 |     -     -     -     -     -     -     -    -1     -     -     3 |
 TIDB |     -   -17   -92   200     -     -     -     -     -     -    21 |
 TIXI |     -   -21     -     -     -     -     -    15     -     -     - |
 TLSE |     -  -100    16     -     -     -     -     -     -     -   131 |
 TOW2 |     -   -14     -     -     -     -     -    10     -     -     - |
 TRO1 |     -   -32     X     -  -139     -     -     -     -     -   310 |
 TSKB |     -  -102    97     -     -     -     -     -     -     -   -35 |
 UNSA |     -     -     -   -35     -     -     -    18     -     -    -6 |
 URUM |     -     4     -     -     -     -     -     -     -     -    -6 |
 USN1 |     -   163   206     -     -     -     -  -339     -     -    69 |
 USNO |     -  -118    78     -     -     -     -     -     -     -    30 |
 USUD |     -     -   -46   100     -     -     -    53     -     -  -123 |
 VILL |     -   -24     -     X     -     -     -     -     -     -    40 |
 WES2 |     -     -   -10     -     -     -     -     -     -     -    22 |
 WHIT |     -   -37     -     -     -     -     -     -     -     -    60 |
 WSRT |     -    -4     -     -     -     -     -     -     -     -     7 |
 WTZR |     -  -131   174   -52     -     -     -     -     -     -   -98 |
 WUHN |     -     -    91     -   124     -     -     -     -     -  -418 |
 YAR2 |     -  -117    64     -     -     -     -     -     -     -    58 |
 YELL |     -   -11    20    60   -20     -     -     -     -     -   -48 |
 ZWEN |     -     -     -    28  -204     -     -     -     -     -   349 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5787    56    48    59    35   324  5536    33  6331     -    62 |  288   5.62
    3 |  4083    88    47    65    31   364  3931    26  4109     -   100 |  288   3.24
    4 |   878    46    24    65    28    82  1084    59  1099     -    79 |  288   0.51
    5 |  5418    30    29    47    38   119  3511    31  4325     -    58 |  288   1.38
    6 |  1117   123    92    85    95   489  3557    87  1090     -   118 |  288   1.91
    7 |  1044    95    94   105   108   143   904    41  1269     -   157 |  282   0.81
    8 |  5101    38     X    93    55   247  3420    61  3354     -    88 |  288   2.29
    9 |  2188    22    17    82    28   197  1905    59  3631     -    92 |  288   1.65
   10 |  3277    49    34    82    33   283  3180    34  3376     -    47 |  288   2.87
   11 |   865    35    36    51    48    82   562    28   789     -   139 |  288   0.27
   13 |   572    59    43    48    53    62   873    36   653     -   140 |  288   0.28
   14 |   739    74    66   109    48   134   621    51   721     -    65 |  288   0.19
   15 |  4165    52    21    31    21   352  2959    19  4090     -    75 |  288   3.95
   16 |   523    48    91    70    32    72   470    43   432     -   103 |  288   0.20
   17 |  1233    67    31    69    52   244  1693    46  1117     -   101 |  287   0.93
   18 |   705    61    56    54    24    75   610    29   517     -    68 |  288   0.34
   19 |  1388    76    40    54    27   232  1255    37   917     -     X |  288   0.53
   20 |  1247    28    34    55    28   117   481    30  1154     -    94 |  288   0.32
   21 |  1253    48    26    63    22   114   842    19   916     -   125 |  288   0.50
   22 |  5469    79    83    51    33   410  8740    26  4242     -    51 |  288   0.79
   24 |  3584    43    22    97    27   721     -    42  3630     -    60 |  288   2.24
   25 |  3868    51    59    55    34   149  2316    50  2681     -     X |  288   1.62
   26 |  1571    65    24    55    26    93   599    31  1509     -    92 |  288   0.36
   27 |   835    35    27    39    43   197  1226    21  1078     -    79 |  288   0.46
   28 |   918    37    28    47    39   124  2201    63   843     -    56 |  288   0.74
   29 |  2268    60    35   101    35   360  2475    34  1997     -    78 |  288   0.62
   30 |  1927    34    23    61    43    38  1282    35  1808     -   127 |  288   0.80
   31 |  2959    88    48    47    60   204  5053    40  3156     -   135 |  288   2.42
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    20     -     -     -     -    21     -     -    25 |  288   0.13
 ALGO |     -     -    15     X     -     -     -    15     -     -    42 |  288   0.04
 ALRT |     -    12     -     -    11     -     -     -     -     -     - |  288   6.84
 AMC2 |     -    35    29     -     -     -     -    26     -     -    34 |  288   0.03
 ARTU |     -    29     -    22    16     -     -    30     -     -     - |  288  10.44
 ASC1 |     -    45     -     -    32     -     -     -     -     -    64 |  287    >>>
 ASPA |     -     -     -     -    38     -     -     -     -     -    69 |  283    >>>
 AUCK |     -    20     -     -     -     -     -     -     -     -    33 |  262  11.96
 BAN2 |     -     -    64     -     -     -     -     -     -     -   132 |  284  15.18
 BILI |     -    18     -     -    15     -     -    13     -     -     - |  287   8.94
 BOGT |     -     -     -   115   123     -     -    55     -     -     X |  288  13.83
 BOR1 |     -    46    36     -     -     -     -     -     -     -     X |  285  20.23
 BREW |     -     -     8     -     -     -     -     -     -     -    17 |  285   0.08
 BRMU |     -     -     -     -    14     -     -     -     -     -    25 |  285    >>>
 BRUS |     -    35    30     -     -     -     -    23     -     -    29 |  288   0.03
 CAS1 |     -    33     -    61    20     -     -    39     -     -    88 |  288   7.85
 CEDU |     -    20     -    29     -     -     -    35     -     -    83 |  288  11.43
 CHAT |     -    30     -     -    24     -     -     -     -     -    59 |  287  11.84
 CHUR |     -     -    11     -     -     -     -     -     -     -    24 |  282   3.08
 COCO |     -    67     -   140    62     -     -     -     -     -    53 |  288   8.39
 CRO1 |     -     -    19    32    23     -     -    26     -     -    89 |  288  19.03
 DAKA |     -    22     -     -    19     -     -     -     -     -     - |  262  21.51
 DARW |     -    22    30     -     -     -     -    24     -     -     - |  288   4.66
 DAV1 |     -    30     -     -    24     -     -    38     -     -    91 |  288  19.37
 DRAO |     -    28    13     -     -     -     -    20     -     -    32 |  288   0.07
 DWH1 |     -    27    26     -     -     -     -    43     -     -    39 |  288   0.76
 FAIR |     -     -    14    42    16     -     -    17     -     -    51 |  288   0.06
 FORT |     -    49    22     -    39     -     -     -     -     -    55 |  288   0.13
 GMAS |     -     -    16     -     -     -     -    15     -     -     X |  288   1.52
 GODE |     -    22    18    32     -     -     -     -     -     -    38 |  288   0.20
 GOL2 |     -     -    75     -     -     -     -     -     -     -   155 |  253   0.12
 GOLD |     -    44     -    33     -     -     -    40     -     -    20 |  288  17.39
 GRAZ |     -     -    17     -     -     -     -     -     -     -    34 |  283    >>>
 GUAM |     -     -     -    52    30     -     -    30     -     -    70 |  288  11.83
 GUAT |     -    31     -     -    28     -     -     -     -     -     X |  278    >>>
 HERS |     -     -    14     -     -     -     -     -     -     -    29 |  237   7.71
 HOB2 |     -    25    17     -     -     -     -     -     -     -    33 |  288   0.15
 HOFN |     -     -     -     -    21     -     -    17     -     -     - |  288    >>>
 HRAO |     -     -     -     -     -     -     -    34     -     -    75 |  285   0.71
 IENG |     -    40    31     -     -     -     -     -     -     -     - |  288   0.39
 IISC |     -     -     -    60    35     -     -     -     -     -    67 |  288  19.12
 ISPA |     -    22     -     -    25     -     -    20     -     -     - |  288  19.50
 JAB1 |     -    24     -    40     -     -     -     -     -     -     - |  288  11.36
 JPLM |     -     -     8     -     -     -     -     -     -     -    16 |  240  11.38
 KARR |     -    25     -    38     -     -     -    19     -     -     - |  288  12.28
 KERG |     -    35    39    83    31     -     -     -     -     -    51 |  288   2.11
 KGN0 |     -    30    24     -     -     -     -     -     -     -    28 |  287   0.42
 KIRU |     -    13     -    21     -     -     -     -     -     -    21 |  288   9.14
 KIT3 |     -     -     -    40    19     -     -    28     -     -    27 |  288  23.05
 KOKB |     -     -     -     -    65     -     -     -     -     -   118 |  285   0.10
 KOSG |     -    15     -     -     -     -     -     -     -     -    25 |  285  23.40
 KOUR |     -    45     -    57     -     -     -     -     -     -    46 |  288   3.32
 KUNM |     -     -     -     -     -     -     -    31     -     -    69 |  285  23.59
 LAE1 |     -    40     -     -    34     -     -    31     -     -    51 |  287  13.87
 LHAS |     -     -     -    91    24     -     -    32     -     -    59 |  288    >>>
 LPGS |     -    26    25    34     -     -     -     -     -     -    73 |  288  65.92
 MAC1 |     -    36     -    34    30     -     -    37     -     -    98 |  288  12.22
 MADR |     -     -     -     -     -     -     -    23     -     -    51 |  264  13.18
 MAG0 |     -    20     -     -     -     -     -    14     -     -     - |  286   8.86
 MAS1 |     -     -    19    54    28     -     -     -     -     -    20 |  288   2.51
 MAW1 |     -    19     -    45    24     -     -     -     -     -    73 |  275  32.66
 MCM4 |     -    25    18     -    22     -     -     -     -     -     - |  274  17.14
 MDO1 |     -    32    16     -    21     -     -     -     -     -    21 |  288  17.02
 MEDI |     -     -    16     -     -     -     -     -     -     -    32 |  285    >>>
 METS |     -    32    28     -     -     -     -     -     -     -    30 |  287   7.84
 MIZU |     -     -    36   111     -     -     -     -     -     -    52 |  288   0.33
 MKEA |     -     -     -    46     -     -     -    46     -     -    71 |  288  26.96
 NLIB |     -     -    19     -     -     -     -    29     -     -    35 |  288   0.05
 NNOR |     -     -    23    50     -     -     -     -     -     -    74 |  288  11.48
 NPLD |     -    34    29     -     -     -     -     -     -     -    14 |  287   0.05
 NRC1 |     -    35    22     -    39     -     -    22     -     -    47 |  288   0.04
 NRIL |     -    37     -     -    46     -     -    57     -     -     - |  284   9.00
 NSSP |     -     -     -     -     -     -     -    14     -     -    32 |  285  10.46
 NYA1 |     -    15     -     -    12     -     -     -     -     -    26 |  288   0.05
 NYAL |     -     -    12     -     -     -     -     -     -     -    24 |  285   0.07
 ONSA |     -    34    26    24     -     -     -     -     -     -     - |  288   0.07
 PDEL |     -    26     -     -    18     -     -    23     -     -     - |  288  55.51
 PERT |     -     -    28    52    20     -     -     -     -     -    33 |  288   3.01
 PETP |     -    30     -     -    27     -     -     -     -     -     - |  287  10.02
 PIE1 |     -     -    26    27     -     -     -    37     -     -    29 |  288   0.08
 POTS |     -    14     -     -    10     -     -     -     -     -    22 |  288  21.41
 PRDS |     -     -     9     -     -     -     -     -     -     -    19 |  285   1.62
 PTBB |     -    47    23     -     -     -     -     -     -     -    46 |  288   0.32
 QAQ1 |     -    31    28     -     -     -     -     -     -     -    27 |  288  24.63
 RIOG |     -    41    23     -    29     -     -     -     -     -    58 |  288  10.74
 SANT |     -    63     -   126    16     -     -     -     -     -    69 |  288   8.68
 SCH2 |     -     -    24     -     -     -     -     -     -     -    50 |  285 282.52
 SEY1 |     -     -     -     -    40     -     -     -     -     -    73 |  285 269.31
 SFER |     -   115    61     -     -     -     -     -     -     -    71 |  285 531.32
 SOFI |     -     -     -     -     -     -     -    12     -     -    26 |  285 129.52
 SPT0 |     -    34    28     -     -     -     -     -     -     -    24 |  288   0.07
 STJO |     -     -    20     -     -     -     -    20     -     -    67 |  288   0.06
 STR1 |     -     -    22     -     -     -     -     -     -     -    46 |  285   0.73
 SUTM |     -     -    37     -    47     -     -    44     -     -     - |  288   2.31
 THTI |     -     -    30    42    31     -     -     -     -     -    62 |  288   3.44
 THU3 |     -    11    16     -     -     -     -     -     -     -    39 |  288   7.16
 TID1 |     -     -     -     -     -     -     -    28     -     -    63 |  285   0.05
 TIDB |     -    24    18    55     -     -     -     -     -     -    62 |  288   0.07
 TIXI |     -    12     -     -     -     -     -     9     -     -     - |  287   7.37
 TLSE |     -    29    30     -     -     -     -     -     -     -    26 |  287   0.70
 TOW2 |     -    19     -     -     -     -     -    14     -     -     - |  288  12.68
 TRO1 |     -    21     X     -    26     -     -     -     -     -    42 |  287   8.67
 TSKB |     -    55    38     -     -     -     -     -     -     -    29 |  288   1.03
 UNSA |     -     -     -    37     -     -     -    26     -     -    41 |  288  25.91
 URUM |     -    33     -     -     -     -     -     -     -     -    54 |  285  17.95
 USN1 |     -    77    31     -     -     -     -    24     -     -   128 |  288   0.08
 USNO |     -    23    22     -     -     -     -     -     -     -    44 |  288   0.03
 USUD |     -     -    30    32     -     -     -    41     -     -    41 |  288  12.33
 VILL |     -    15     -     X     -     -     -     -     -     -    25 |  285   3.02
 WES2 |     -     -    20     -     -     -     -     -     -     -    41 |  285   0.09
 WHIT |     -    27     -     -     -     -     -     -     -     -    44 |  285   5.17
 WSRT |     -    15     -     -     -     -     -     -     -     -    24 |  285   0.03
 WTZR |     -    27    23    21     -     -     -     -     -     -    30 |  288   0.07
 WUHN |     -     -    34     -    60     -     -     -     -     -    51 |  287  17.38
 YAR2 |     -    21    20     -     -     -     -     -     -     -    40 |  288   3.63
 YELL |     -    38    21    44    29     -     -     -     -     -    61 |  288   0.05
 ZWEN |     -     -     -    46    17     -     -     -     -     -    47 |  288  13.70
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2851    44    35    64    39   256  2945    34  2648     -    66 |


 BEST CLOCK FIT: WSRT   285   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.94   | 3.71e-14  6.95e-15  1.51e-15 |
 NPLD |   287     0     0   286    9.87   | 4.46e-14  6.12e-15  2.91e-15 |
 BREW |   285     0     0   284    8.76   | 4.13e-14  9.37e-15  4.27e-15 |
 AMC2 |   288     0     0   288    8.42   | 4.35e-14  1.00e-14  1.89e-15 |
 TID1 |   285     0     0   284    6.51   | 5.55e-14  1.14e-14  2.18e-15 |
 USNO |   288     0     0   288    6.48   | 4.24e-14  7.80e-15  2.25e-15 |
 ALBH |   288     0     0   288    5.93   | 4.49e-14  7.02e-15  7.99e-15 |
 PIE1 |   288     0     0   288    5.19   | 4.88e-14  8.84e-15  4.02e-15 |
 SPT0 |   288     0     0   288    4.63   | 4.13e-14  8.49e-15  7.87e-15 |
 NRC1 |   288     0     0   288    4.08   | 3.61e-14  1.26e-14  2.67e-15 |
 YELL |   288     0     0   288    3.61   | 3.43e-14  5.17e-15  1.33e-15 |
 USN1 |   288     0     0   288    3.14   | 9.54e-14  2.00e-14  7.12e-15 |
 ALGO |   288     0     0   288    2.92   | 4.06e-14  9.82e-15  5.78e-15 |
 ONSA |   288     0     0   143    2.91   | 3.49e-14  9.11e-15  6.72e-15 |
 NLIB |   288     0     0   288    2.01   | 4.58e-14  1.16e-14  3.88e-15 |
 WSRT |   285     0     0   139    1.99   | 2.81e-14  7.79e-15  2.72e-15 |
 WES2 |   285     0     0   284    1.59   | 4.75e-14  1.29e-14  4.73e-15 |
 KOKB |   285     0     0   284    1.58   | 5.92e-14  1.53e-14  4.82e-15 |
 WTZR |   288     0     0   288    1.54   | 3.70e-14  3.05e-14  5.15e-15 |
 DRAO |   288     0     0   288    1.40   | 7.02e-14  1.78e-14  8.48e-15 |
 HOB2 |   288     0     0   288    1.28   | 7.13e-14  1.39e-14  8.58e-15 |
 FAIR |   288     0     0   288    1.15   | 5.10e-14  8.21e-15  2.65e-15 |
 NYAL |   285     0     0   284    0.91   | 3.65e-14  7.01e-15  3.35e-15 |
 GOL2 |   253     1     0   142    0.89   | 5.09e-14  1.18e-14         - |
 NYA1 |   288     0     0   288    0.71   | 2.72e-14  7.07e-15  3.43e-15 |
 TIDB |   288     0     2   125    0.71   | 1.81e-13  1.81e-14  4.27e-15 |
 GODE |   288     0     0   288    0.39   | 4.70e-14  1.28e-14  1.10e-14 |
 FORT |   288     0     0   288    0.23   | 7.78e-14  2.20e-14  1.07e-14 |
 PTBB |   288     0     0   288    0.14   | 3.35e-13  8.28e-14  3.03e-14 |
 G27  |   288     0     0   288    0.12   | 3.29e-13  1.10e-13  3.82e-14 |
 G26  |   288     0     0   288    0.11   | 3.46e-13  9.87e-14  3.64e-14 |
 MIZU |   288     0     0   288    0.09   | 3.64e-13  1.07e-13  3.20e-14 |
 SFER |   285     1     0   282    0.08   | 4.29e-13  1.30e-13  8.39e-14 |
 G13  |   288     0     1   132    0.07   | 5.51e-13  6.55e-14  2.03e-14 |
 KGN0 |   287     0     0   286    0.07   | 3.45e-13  8.65e-14  2.92e-14 |
 G04  |   288     0     0   288    0.06   | 4.81e-13  1.25e-13  6.59e-14 |
 G30  |   288     0     0   288    0.05   | 3.26e-13  1.03e-13  1.05e-13 |
 IENG |   288     0     0   288    0.05   | 5.36e-13  1.26e-13  3.06e-14 |
 TLSE |   287     0     0   286    0.05   | 4.13e-13  9.97e-14  5.29e-14 |
 G19  |   288     0     0   288    0.04   | 5.84e-13  9.41e-14  4.11e-14 |
 DWH1 |   288     0     0   288    0.04   | 4.67e-13  1.37e-13  5.11e-14 |
 G29  |   288     0     0   288    0.04   | 3.85e-13  1.18e-13  7.39e-14 |
 HRAO |   285     0     0   284    0.03   | 1.05e-13  3.76e-14  7.64e-14 |
 G07  |   282     0     0   281    0.03   | 3.55e-13  1.04e-13  1.04e-13 |
 G17  |   287     0     0   286    0.03   | 4.61e-13  1.12e-13  1.25e-13 |
 BOR1 |   285     0     0   143    0.02   | 4.42e-13  1.40e-13  2.70e-14 |
 G06  |   288     0     0   288    0.02   | 4.75e-13  1.68e-13  1.59e-13 |
 STR1 |   285     0     0   284    0.02   | 6.86e-13  1.92e-13  7.95e-14 |
 TSKB |   288     0     0   288    0.01   | 1.01e-12  2.64e-13  1.17e-13 |
 G22  |   288     0     0   191    0.01   | 5.61e-13  1.09e-13  4.76e-14 |
 GMAS |   288     0     0   288    0.01   | 8.30e-13  3.25e-13  1.03e-13 |
 G31  |   288     0     0   288    0.01   | 2.39e-13  1.65e-13  3.04e-13 |
 KERG |   288     0     0   288    0.01   | 1.72e-12  4.06e-13  1.88e-13 |
 KOUR |   288     0     0   288    0.01   | 1.35e-12  3.85e-13  3.43e-13 |
 PRDS |   285     0     0   284    0.01   | 1.59e-12  3.66e-13  6.76e-14 |
 G08  |   288     0     1   143    0.01   | 1.25e-12  4.03e-13  1.57e-13 |
 G24  |   288     0     0   288    0.00   | 1.37e-12  3.62e-13  2.97e-13 |
 G25  |   288     0     0   288    0.00   | 1.42e-12  4.37e-13  1.34e-13 |
 G09  |   288     0     0   288    0.00   | 1.37e-12  4.76e-13  1.40e-13 |
 G05  |   288     0     0   288    0.00   | 1.32e-12  4.08e-13  9.56e-14 |
 SUTM |   288     0     0   143    0.00   | 6.55e-13  2.27e-13  1.69e-13 |
 GPST |   288     0     0     0    0.00   | 2.49e-14  6.87e-15  3.30e-15 |
 MCM4 |   274     0     1     0    0.00   | 5.94e-13  4.18e-13  1.12e-12 |
 BAN2 |   284     0     0     0    0.00   |        -         -         - |
 WHIT |   285     0     0     0    0.00   | 4.80e-13  3.59e-13  5.48e-13 |
 VILL |   285     0     0     0    0.00   | 1.09e-12  1.25e-12  1.97e-13 |
 URUM |   285     0     0     0    0.00   |        -         -         - |
 SOFI |   285     0     0     0    0.00   |        -         -         - |
 SEY1 |   285     2     0     0    0.00   |        -         -         - |
 SCH2 |   285     0     0     0    0.00   |        -         -         - |
 NSSP |   285     0     0     0    0.00   |        -         -         - |
 MEDI |   285     0     0     0    0.00   |        -         -         - |
 MADR |   264     0     0     0    0.00   |        -         -         - |
 KUNM |   285     0     0     0    0.00   |        -         -         - |
 KOSG |   285     0     2     0    0.00   | 7.28e-13  4.97e-13  1.38e-12 |
 JPLM |   240     0     1     0    0.00   | 5.88e-13  4.29e-13         - |
 HERS |   237     0     0     0    0.00   |        -         -         - |
 GRAZ |   283     0     0     0    0.00   |        -         -         - |
 CHUR |   282     0     0     0    0.00   |        -         -         - |
 BRMU |   285     0     0     0    0.00   |        -         -         - |
 AUCK |   262     0     0     0    0.00   |        -         -         - |
 ASPA |   283     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   286     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 DAKA |   262     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.38e-13  6.22e-14  5.30e-14 |
 G21  |   288     2     6     0    0.00   | 9.91e-13  1.46e-13  3.41e-14 |
 G20  |   288     0     6     0    0.00   | 5.63e-13  6.44e-14  2.33e-14 |
 G18  |   288     0     6     0    0.00   | 1.50e-12  1.31e-13  2.93e-14 |
 G16  |   288     0     4     0    0.00   | 4.96e-13  5.56e-14  2.31e-14 |
 G15  |   288     0     0     0    0.00   | 1.52e-12  5.21e-13  4.69e-13 |
 G14  |   288     0     5     0    0.00   | 6.28e-13  7.95e-14  1.50e-14 |
 G11  |   288     0     6     0    0.00   | 7.10e-13  7.41e-14  2.94e-14 |
 G10  |   288     0     0     0    0.00   | 1.18e-12  4.31e-13  2.10e-13 |
 G03  |   288     0     0     0    0.00   | 1.28e-12  4.75e-13  3.71e-13 |
 G01  |   288     0     0     0    0.00   | 1.64e-12  8.10e-13  6.77e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 1.06e-12  1.33e-12  3.43e-13 |
 USUD |   288     1     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.15e-13  1.72e-13  2.80e-13 |
 STJO |   288     0     0     0    0.00   | 3.53e-14  1.11e-14  4.64e-15 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.99e-12  5.46e-13  2.67e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   284     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 6.51e-13  8.05e-13  1.03e-12 |
 MAW1 |   275     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.96e-12  5.79e-13  1.83e-13 |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   278     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.42e-13  5.18e-13  3.15e-13 |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   288     1     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.48e-17  2.97e-16  1.79e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      YELL      YELL |
------------------------------------------+------------------------------+
