
 GPS week: 1270   Day: 0   MJD: 53134                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683     67     0.25    -0.83     3.59     0.00
 cod |   288     0  26731    510     0.19    -2.34     0.05    14.44
 emr |   288     0  26339    444  3660.89    27.13     0.04    20.32
 esa |   288     0  19056   1225  3660.72    27.14     0.07     8.98
 gfz |   288     0  21036     63     0.55    -1.04     0.04    21.17
 iga |    96     0   2592      4    -0.15    -3.03     0.23     0.00
 igu |    96     0   2683      0    -0.18    -3.00     3.81     0.00
 jpl |   288     0  17483      2     1.24    -0.25     0.04    22.09
 ngs |    96     0   2592     58     0.58    -2.12     3.23     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  35254   1022 -2207.91   -32.59     0.06    13.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  4049   -26  -120   -87    76   387 13397   -35  2664     -   195 |
    3 | -7340    88    23   -88    63  -429 -2556   -39 -4866     -  -123 |
    4 |   525    25  -166   115    54    41  -912    91   146     -    21 |
    5 | -1982    41   -66    84    15   -57 -8711    91 -3654     -   -70 |
    6 |-10048   -23   -15   124   -16  -725-13006    60 -7425     -   -86 |
    7 |  1056    19  -141    51   132   -58   420   124   516     -  -105 |
    8 |-27280    42  -107   128     7  -188-12292   -61-16665     -    54 |
    9 | -2369   -21  -116   140   114  -135 -3346    93 -1890     -  -122 |
   10 | -2010   -44    16     5    25   336 10861    83  -731     -   -61 |
   11 |  1478    52  -177    24    29   -63  1198    51  1822     -   131 |
   13 |  5785    28  -199    54   135   -97   736   -72  5722     -   111 |
   14 |  3828    75    -6   138   -61   -31  1735    76  3462     -  -161 |
   15 | -4831     9   -60    75    22   686 12912    18 -3027     -   -27 |
   16 |  5340    37   -49    -7   -48  -104   150   129  5222     -   -37 |
   17 |  1279   -49    -8    38    11   151  3171   145   381     -  -152 |
   18 |  3474   109   -62   187   -24    28  1828    59  3806     -  -142 |
   19 |  4321   -80   131  -367   247  1082  1264   -88  4108     -  -161 |
   20 |  5502   -26   -81   -31    35  -171   456   116  5070     -    63 |
   21 |   388    98   -33   286  -141    65  1119    51   934     -   -52 |
   22 | -3265    32  -155    90    14  -112  -391    61 -2809     -    47 |
   24 |  3433   -70   -38   109    65  -121 -7348    50  3732     -  -106 |
   25 | -4491    87   -23   -15     8  -230 -6499    93 -4959     -  -109 |
   26 |  2073    35   -72     6    62    -9 -1487    41  1708     -   -51 |
   27 | -1408   -31  -148   -51   119  -217   756    52 -1403     -    44 |
   28 |  3472    10   -96   -11    16   140  5279     7  3574     -   112 |
   29 |  6437    34    68     X   -76     - -1399   -23     -     -     X |
   30 | -1805    69   -52   196   -47   -40   225    86 -1694     -  -163 |
   31 | -4354   121    38  -120   -29  -163  2361    38 -3768     -   -85 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   -15   -26     -     -     -     -    33     -     -     2 |
 ALGO |     -     -   -70   113     -     -     -    50     -     -   -54 |
 ALRT |     -   -28     -     -    19     -     -     -     -     -     - |
 AMC2 |     -   -86    64     -     -     -     -  -102     -     -   168 |
 ARTU |     -    64     -   112   -35     -     -   -53     -     -     - |
 ASC1 |     -   -83     -     -  -155     -     -     -     -     -   431 |
 ASPA |     -     -     -     -   165     -     -    -2     -     -  -265 |
 AUCK |     -   -58     -     X     -     -     -     -     -     -    65 |
 BAHR |     -   -42   118     -  -109     -     -     -     -     -    41 |
 BAN2 |     -     -    25     -     -     -     -     -     -     -   -39 |
 BOGT |     -   -82     -     X   212     -     -   -91     -     -  -125 |
 BOR1 |     -    32    26     -     -     -     -     -     -     -   -75 |
 BREW |     -     -    85     -     -     -     -     -     -     -  -133 |
 BRMU |     -     -     -     -   -22     -     -     -     -     -    36 |
 BRUS |     -    37    53     -     -     -     -   -73     -     -     0 |
 CAS1 |     -   106     -   -72   -69     -     -    43     -     -   -29 |
 CEDU |     -   -15     -    42     -     -     -    19     -     -   -45 |
 CHAT |     -    16     -     -     2     -     -     -     -     -   -21 |
 CHUR |     -     -   135     -     -     -     -     6     -     -  -194 |
 COCO |     -   -35     -   -80   196     -     -   -53     -     -  -135 |
 CRO1 |     -   -98   -55   186    90     -     -   -36     -     -   -21 |
 DAEJ |     -   -17    12     -     -     -     -     -     -     -     X |
 DAKA |     -    56     -     -   -38     -     -     -     -     -     - |
 DARW |     -    70    66     -     -     -     -  -106     -     -     - |
 DAV1 |     -    39     -     -   -61     -     -     -     -     -    55 |
 DRAO |     -     -   -64     -     -     -     -   113     -     -   -93 |
 DWH1 |     -    47  -140     -     -     -     -    64     -     -    24 |
 FAIR |     -     -   -15   213  -205     -     -    47     -     -   130 |
 FORT |     -   345  -205     -    25     -     -     -     -     -    -3 |
 GMAS |     -     -   108     -     -     -     -  -100     -     -     X |
 GODE |     -  -117    63    43     -     -     -     -     -     -     2 |
 GOL2 |     -     -    33     -     -     -     -     -     -     -   -52 |
 GOLD |     -     -     -   -20     -     -     -     4     -     -     5 |
 GUAM |     -     -     -  -424   127     -     -   -78     -     -   218 |
 GUAT |     -     -     -     -   -19     -     -     -     -     -    31 |
 HERS |     -     -  -209     -     -     -     -     -     -     -   326 |
 HOB2 |     -   -60    63     -     -     -     -    33     -     -   -88 |
 HOFN |     -     -     -     -   -84     -     -    81     -     -     - |
 HRAO |     -     -     -     -     -     -     -   -41     -     -    71 |
 IENG |     -  -111    79     -     -     -     -     -     -     -     - |
 IISC |     -   -81     -   -60    79     -     -     -     -     -     3 |
 ISPA |     -    26     -     -   -27     -     -     9     -     -     - |
 JAB1 |     -   -26     -    41     -     -     -     -     -     -     - |
 JPLM |     -     -    44     -     -     -     -     -     -     -   -69 |
 KARR |     -    75     -  -120     -     -     -     -     -     -     - |
 KERG |     -    81   -20  -107   -32     -     -     -     -     -    68 |
 KGN0 |     -   -46    37     -     -     -     -     -     -     -    -8 |
 KIRU |     -     4     -   136     -     -     -   -29     -     -   -49 |
 KIT3 |     -     -     -  -105    65     -     -   -20     -     -     1 |
 KOKB |     -   -20     -     -   -21     -     -     -     -     -    56 |
 KOUR |     -   -66     -    97   -35     -     -     -     -     -    63 |
 KUNM |     -     -     -     -     -     -     -    60     -     -  -102 |
 LAE1 |     -     -     -     -  -115     -     -   149     -     -   -66 |
 LPGS |     -     X    87  -180     -     -     -   -67     -     -   102 |
 MAC1 |     -    49     -    50   -66     -     -     -     -     -    19 |
 MAG0 |     -   -74     -     -     -     -     -    48     -     -     - |
 MAS1 |     -     -    53    58   -58     -     -     -     -     -   -30 |
 MAW1 |     -    79     -  -113    93     -     -   -75     -     -   -41 |
 MCM4 |     -   616    28     -  -322     -     -     -     -     -     - |
 MDO1 |     -    33   -51     -   -16     -     -     -     -     -    68 |
 MEDI |     -     -    45     -     -     -     -     -     -     -   -71 |
 METS |     -   -41    30     -     -     -     -     -     -     -    -2 |
 MIZU |     -     -     8     X     -     -     -     -     -     -   -12 |
 MKEA |     -    36     -   -74     -     -     -   -25     -     -    54 |
 NLIB |     -    35   -45     -     -     -     -    88     -     -  -143 |
 NNOR |     -     -  -127   126     -     -     -    47     -     -    32 |
 NPLD |     -   -55    58     -     -     -     -     -     -     -   -29 |
 NRC1 |     -     3    19     -   -30     -     -   -51     -     -   102 |
 NRIL |     -     -     -     -   -10     -     -    10     -     -     - |
 NTUS |     -  -185     -     -     -     -     -     -     -     -   206 |
 NYA1 |     -    84     -     -   -52     -     -     -     -     -    -8 |
 NYAL |     -     -    42     -     -     -     -     -     -     -   -66 |
 ONSA |     -     -    14   -31     -     -     -     -     -     -     - |
 PDEL |     -     -     -     -  -104     -     -   100     -     -     - |
 PERT |     -     -   -55  -307   259     -     -     -     -     -  -130 |
 PIE1 |     -     -    63  -161     -     -     -    29     -     -   -36 |
 POTS |     -    -1     -     -    14     -     -     -     -     -   -21 |
 PRDS |     -     -   -21     -     -     -     -     -     -     -    33 |
 PTBB |     -   -22    66     -     -     -     -     -     -     -   -78 |
 QAQ1 |     -     -   -15     -     -     -     -     -     -     -    23 |
 RESO |     -     9     -     -     -     -     -    -6     -     -     - |
 RIOG |     -   -43    97     -   -17     -     -     -     -     -   -77 |
 SANT |     -     -     -    36   -51     -     -     -     -     -    58 |
 SCH2 |     -     -   -71     -     -     -     -     -     -     -   111 |
 SEY1 |     -     -     -     -     2     -     -     -     -     -    -3 |
 SFER |     -   -54    10     -     -     -     -     -     -     -    44 |
 SPT0 |     -  -151    73     -     -     -     -     -     -     -    53 |
 STJO |     -     -   -15     -     -     -     -  -113     -     -   215 |
 STR1 |     -     -    -9     -     -     -     -     -     -     -    14 |
 SUTH |     -   -66     -     -     -     -     -     -     -     -    73 |
 SUTM |     -     -   175     -  -144     -     -   -23     -     -     - |
 THTI |     -     -   169  -140  -106     -     -   -30     -     -    57 |
 THU3 |     -   -38     -     -     -     -     -     -     -     -    43 |
 TID1 |     -     -     -     -     -     -     -   -30     -     -    51 |
 TIDB |     -     -   -57    55     -     -     -     -     -     -    52 |
 TIXI |     -   -13     -     -     -     -     -     9     -     -     - |
 TLSE |     -     -    29     -     -     -     -     -     -     -   -46 |
 TOW2 |     -   -17     -     -     -     -     -    11     -     -     - |
 TRO1 |     -  -106     X     -   -20     -     -     -     -     -   149 |
 TSKB |     -  -142    84     -     5     -     -     -     -     -    18 |
 TWTF |     -   -82    58     -     -     -     -   -38     -     -    64 |
 UNSA |     -     -     -  -111     -     -     -     -     -     -    77 |
 URUM |     -   -61     -     -     -     -     -     -     -     -    68 |
 USN1 |     -   126   291     -     -     -     -  -415     -     -   114 |
 USNO |     -   -97    78     -     -     -     -     -     -     -   -15 |
 USUD |     -     -    19   -42     -     -     -    38     -     -   -65 |
 VILL |     -     5     -   -12     -     -     -     -     -     -     2 |
 WES2 |     -     -    11     -     -     -     -     -     -     -   -17 |
 WTZR |     -  -158   201   -92     -     -     -     -     -     -   -76 |
 WUHN |     -     -    31     -    27     -     -     -     -     -   -93 |
 YAR2 |     -    84    33  -218     -     -     -     -     -     -     6 |
 YEBE |     -     -    56     -     -     -     -     -     -     -   -87 |
 YELL |     -   -50    57    -9   -53     -     -     -     -     -    60 |
 ZWEN |     -     -     -    17   -88     -     -     -     -     -   131 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  7517    54    36    46    35   427  5814    42  7189     -    45 |  288   4.97
    3 |  4456   114    43    92   133   163  2905    35  3719     -    95 |  288   2.70
    4 |  1265    48    25    64    23   127   754    27  1295     -    55 |  288   0.64
    5 |  7343    36    28    38    21   139  6062    24  7292     -    44 |  288   2.40
    6 |  3632   164    57   122    56   654  8162    60  2816     -    43 |  288   1.46
    7 |  2238   142    62   102    50   204   869    42  1860     -    85 |  288   0.82
    8 |  4602    66    90    99    24   170  6017    35 10503     -   100 |  288   1.72
    9 |  2431    23    35    51    17    70  2551    27  2338     -    42 |  288   1.21
   10 |  5045    75    23    70    25   410  7919    33  3895     -    50 |  288   2.83
   11 |   955    48    48    50    41   136   924    41   941     -    96 |  288   0.34
   13 |   699    66    39    46    33    72   521    23   690     -    41 |  288   0.30
   14 |  1195    60    43    75    21    58  1191    21  1056     -    82 |  288   0.24
   15 |  7313    69   137    50    51   494 10626    73  6470     -    61 |  287   3.03
   16 |   721    39    41    79    34    54   489    24   465     -    77 |  288   0.24
   17 |  2509    46    50    95    23   124  1254    22  1928     -    92 |  288   0.66
   18 |  1059    52    48    59    38    81   939    18   824     -    53 |  288   0.39
   19 |  1360    84    46   106    34   200   485    60  1377     -    67 |  288   0.46
   20 |  1893    56    44    41    33    57   438    24  1850     -    81 |  288   0.23
   21 |  1195    60    40    48    40   108   695    36  1144     -   125 |  288   0.26
   22 |  1631    51    53    59    30   124   528    20  1671     -    68 |  288   0.33
   24 |  3175    44    37    64    40   296  3672    37  3219     -    87 |  288   2.65
   25 |  3868    31    25    46    30   134  2861    30  3275     -    94 |  288   2.00
   26 |   995    78    30    42    17   110  1192    30   799     -    85 |  288   0.64
   27 |   905    40    17    46    28   184   839    23   537     -    89 |  288   0.38
   28 |  1190    38    26    61    42    81  2152    27   960     -    45 |  288   0.90
   29 |  8099    61    81     X    71     -  2635    89     -     -     X |  273   1.26
   30 |   778    63    26    45    29    65   687    28  1034     -   101 |  288   0.85
   31 |  1245    77    39   107    36   120  1590    29  1127     -    50 |  288   1.23
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    23    42     -     -     -     -    17     -     -    52 |  288   0.08
 ALGO |     -     -    15    26     -     -     -    17     -     -    34 |  288   0.02
 ALRT |     -    27     -     -    19     -     -     -     -     -     - |  288  12.45
 AMC2 |     -    32    22     -     -     -     -    20     -     -    40 |  288   0.03
 ARTU |     -    28     -    39    20     -     -    29     -     -     - |  288  13.33
 ASC1 |     -    26     -     -    29     -     -     -     -     -    45 |  287    >>>
 ASPA |     -     -     -     -    32     -     -    34     -     -    62 |  276    >>>
 AUCK |     -    33     -     X     -     -     -     -     -     -    37 |  264  17.14
 BAHR |     -    19    24     -    30     -     -     -     -     -    24 |  288   2.56
 BAN2 |     -     -    28     -     -     -     -     -     -     -    44 |  288  16.87
 BOGT |     -    66     -     X    73     -     -    79     -     -    81 |  280  12.85
 BOR1 |     -    29    16     -     -     -     -     -     -     -    20 |  288   0.72
 BREW |     -     -    78     -     -     -     -     -     -     -   121 |  237   0.05
 BRMU |     -     -     -     -    22     -     -     -     -     -    35 |  288    >>>
 BRUS |     -    41    27     -     -     -     -    29     -     -    21 |  288   0.03
 CAS1 |     -    26     -    95    17     -     -    21     -     -    67 |  288   8.92
 CEDU |     -    54     -   108     -     -     -    31     -     -    65 |  288  10.44
 CHAT |     -    20     -     -    19     -     -     -     -     -    19 |  287  11.05
 CHUR |     -     -    20     -     -     -     -    23     -     -    46 |  286   8.62
 COCO |     -    19     -    67    43     -     -    33     -     -    59 |  288  10.21
 CRO1 |     -    21    18    41    27     -     -    27     -     -    71 |  288  15.94
 DAEJ |     -    74    53     -     -     -     -     -     -     -     X |  281   3.11
 DAKA |     -    21     -     -    14     -     -     -     -     -     - |  264  22.47
 DARW |     -    39    41     -     -     -     -    37     -     -     - |  288   4.96
 DAV1 |     -    28     -     -    36     -     -     -     -     -    44 |  288  13.36
 DRAO |     -     -    22     -     -     -     -    13     -     -    32 |  288   0.12
 DWH1 |     -    48    26     -     -     -     -    17     -     -    25 |  285   0.85
 FAIR |     -     -    18    24    23     -     -    20     -     -    38 |  288   0.06
 FORT |     -    88    64     -    37     -     -     -     -     -    33 |  288   0.10
 GMAS |     -     -    28     -     -     -     -    26     -     -     X |  288   1.52
 GODE |     -    44    29    33     -     -     -     -     -     -    30 |  288   0.14
 GOL2 |     -     -    67     -     -     -     -     -     -     -   105 |  262   0.11
 GOLD |     -     -     -    34     -     -     -    26     -     -    36 |  288  16.68
 GUAM |     -     -     -    57    34     -     -    41     -     -    41 |  288  12.69
 GUAT |     -     -     -     -    36     -     -     -     -     -    59 |  288    >>>
 HERS |     -     -    13     -     -     -     -     -     -     -    20 |  241  20.14
 HOB2 |     -    58    25     -     -     -     -    48     -     -    46 |  288   0.13
 HOFN |     -     -     -     -    16     -     -    16     -     -     - |  288    >>>
 HRAO |     -     -     -     -     -     -     -    76     -     -   129 |  284   0.63
 IENG |     -    39    28     -     -     -     -     -     -     -     - |  288   0.71
 IISC |     -    30     -    55    27     -     -     -     -     -    61 |  288  22.94
 ISPA |     -    28     -     -    23     -     -    18     -     -     - |  288  14.64
 JAB1 |     -    50     -    81     -     -     -     -     -     -     - |  288  19.45
 JPLM |     -     -    38     -     -     -     -     -     -     -    60 |  288   5.61
 KARR |     -    35     -    57     -     -     -     -     -     -     - |  288  10.95
 KERG |     -    45    19    74    22     -     -     -     -     -    90 |  288   1.39
 KGN0 |     -    41    23     -     -     -     -     -     -     -    30 |  287   0.43
 KIRU |     -    33     -    29     -     -     -    23     -     -    25 |  288  12.27
 KIT3 |     -     -     -    43    24     -     -    30     -     -    27 |  288  24.86
 KOKB |     -    37     -     -    32     -     -     -     -     -    37 |  288   0.07
 KOUR |     -    42     -    40    34     -     -     -     -     -    22 |  288   2.17
 KUNM |     -     -     -     -     -     -     -    15     -     -    26 |  288  28.44
 LAE1 |     -     -     -     -    35     -     -    27     -     -    47 |  287  13.53
 LPGS |     -     X    50    78     -     -     -    48     -     -    43 |  288  96.74
 MAC1 |     -    42     -   142    28     -     -     -     -     -    33 |  288  11.62
 MAG0 |     -    39     -     -     -     -     -    26     -     -     - |  287   9.54
 MAS1 |     -     -    25    32    20     -     -     -     -     -    33 |  288   2.92
 MAW1 |     -    29     -   151    69     -     -    59     -     -    60 |  287 210.00
 MCM4 |     -    69    30     -    27     -     -     -     -     -     - |  288  11.56
 MDO1 |     -    33    17     -    25     -     -     -     -     -    61 |  288   6.76
 MEDI |     -     -    10     -     -     -     -     -     -     -    15 |  288    >>>
 METS |     -    23    16     -     -     -     -     -     -     -    22 |  287  10.96
 MIZU |     -     -    16     X     -     -     -     -     -     -    24 |  288   0.46
 MKEA |     -    37     -    54     -     -     -    36     -     -    37 |  288  26.18
 NLIB |     -   104    41     -     -     -     -   100     -     -    43 |  288 909.53
 NNOR |     -     -    35    77     -     -     -    25     -     -    28 |  288  13.50
 NPLD |     -    40    28     -     -     -     -     -     -     -    24 |  287   0.03
 NRC1 |     -    19    22     -    22     -     -    14     -     -    43 |  288   0.06
 NRIL |     -     -     -     -    16     -     -    15     -     -     - |  288  10.54
 NTUS |     -    27     -     -     -     -     -     -     -     -    30 |  288  10.45
 NYA1 |     -    17     -     -    19     -     -     -     -     -    42 |  288   0.08
 NYAL |     -     -    22     -     -     -     -     -     -     -    34 |  288   0.09
 ONSA |     -     -     9    21     -     -     -     -     -     -     - |  168   0.04
 PDEL |     -     -     -     -    20     -     -    19     -     -     - |  288  53.92
 PERT |     -     -    32   113    52     -     -     -     -     -    66 |  288   1.95
 PIE1 |     -     -    38    46     -     -     -    22     -     -    42 |  287   0.04
 POTS |     -    16     -     -    17     -     -     -     -     -    30 |  288  24.67
 PRDS |     -     -    30     -     -     -     -     -     -     -    47 |  288   1.55
 PTBB |     -    42    21     -     -     -     -     -     -     -    63 |  288   0.55
 QAQ1 |     -     -     8     -     -     -     -     -     -     -    12 |  288   8.01
 RESO |     -    19     -     -     -     -     -    12     -     -     - |  288   6.70
 RIOG |     -    61    22     -    36     -     -     -     -     -    72 |  202  10.90
 SANT |     -     -     -   107    38     -     -     -     -     -    60 |  288   2.75
 SCH2 |     -     -    15     -     -     -     -     -     -     -    23 |  272  41.75
 SEY1 |     -     -     -     -    32     -     -     -     -     -    53 |  232    >>>
 SFER |     -    39    26     -     -     -     -     -     -     -    25 |  286   0.56
 SPT0 |     -    36    17     -     -     -     -     -     -     -    24 |  288   0.02
 STJO |     -     -    14     -     -     -     -    21     -     -    33 |  288   0.40
 STR1 |     -     -    18     -     -     -     -     -     -     -    28 |  288   0.76
 SUTH |     -    54     -     -     -     -     -     -     -     -    60 |  274  12.54
 SUTM |     -     -    38     -    43     -     -    39     -     -     - |  288   1.54
 THTI |     -     -    39    56    19     -     -    31     -     -    48 |  288   5.72
 THU3 |     -    12     -     -     -     -     -     -     -     -    13 |  288   7.31
 TID1 |     -     -     -     -     -     -     -    32     -     -    55 |  288   0.03
 TIDB |     -     -    23    81     -     -     -     -     -     -    59 |  288   0.04
 TIXI |     -    15     -     -     -     -     -    10     -     -     - |  287   7.22
 TLSE |     -     -    13     -     -     -     -     -     -     -    20 |  287   0.47
 TOW2 |     -    44     -     -     -     -     -    29     -     -     - |  288  13.68
 TRO1 |     -    28     X     -    40     -     -     -     -     -    40 |  279   8.87
 TSKB |     -    63    29     -    41     -     -     -     -     -    21 |  288   0.87
 TWTF |     -    33    29     -     -     -     -    21     -     -    62 |  288   0.35
 UNSA |     -     -     -    94     -     -     -     -     -     -    65 |  276  23.94
 URUM |     -    27     -     -     -     -     -     -     -     -    30 |  288  17.32
 USN1 |     -    93    35     -     -     -     -    24     -     -    86 |  287   0.04
 USNO |     -    32    11     -     -     -     -     -     -     -    33 |  288   0.04
 USUD |     -     -    33    41     -     -     -    41     -     -    55 |  288  12.98
 VILL |     -    24     -    25     -     -     -     -     -     -    25 |  288   2.85
 WES2 |     -     -    11     -     -     -     -     -     -     -    17 |  288   0.07
 WTZR |     -    25    22    20     -     -     -     -     -     -    22 |  288   0.07
 WUHN |     -     -    36     -    38     -     -     -     -     -    26 |  287  17.73
 YAR2 |     -    34    16   101     -     -     -     -     -     -    34 |  288   7.16
 YEBE |     -     -    12     -     -     -     -     -     -     -    19 |  287   0.13
 YELL |     -    37    19    34    27     -     -     -     -     -    62 |  288   0.05
 ZWEN |     -     -     -    32    28     -     -     -     -     -    50 |  288  12.44
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3585    52    37    70    37   230  3809    36  3234     -    55 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.97   | 3.93e-14  6.29e-15  2.14e-15 |
 AMC2 |   288     0     0   288    9.97   | 3.59e-14  5.06e-15  1.95e-15 |
 NPLD |   287     0     0   286    9.90   | 3.83e-14  6.63e-15  1.46e-15 |
 BREW |   237     1     0   234    8.01   | 3.86e-14  5.48e-15         - |
 PIE1 |   287     0     0   286    6.59   | 3.51e-14  6.38e-15  2.26e-15 |
 ALGO |   288     0     0   288    6.51   | 3.51e-14  5.40e-15  2.19e-15 |
 USNO |   288     0     0   288    6.37   | 4.89e-14  8.85e-15  2.26e-15 |
 ALBH |   288     0     0   288    6.08   | 3.91e-14  9.07e-15  5.96e-15 |
 YELL |   288     0     0   288    5.60   | 2.97e-14  4.36e-15  2.00e-15 |
 NRC1 |   288     0     0   288    4.52   | 2.79e-14  9.19e-15  5.26e-15 |
 SPT0 |   288     0     0   288    3.50   | 5.47e-14  9.22e-15  2.31e-15 |
 USN1 |   287     0     0   286    3.49   | 7.52e-14  1.62e-14  5.14e-15 |
 ONSA |   168     0     0   168    3.42   | 5.49e-14  9.48e-15         - |
 NLIB |   288     1     0   287    2.39   | 5.16e-14  1.75e-14  3.65e-15 |
 GOL2 |   262     1     0   260    2.03   | 3.79e-14  6.88e-15  5.51e-15 |
 WTZR |   288     0     0   288    1.90   | 3.84e-14  1.64e-14  9.60e-15 |
 KOKB |   288     0     0   288    1.79   | 5.65e-14  1.11e-14  4.91e-15 |
 NYAL |   288     1     0   287    1.17   | 3.90e-14  9.69e-15  5.32e-15 |
 DRAO |   288     0     0   288    1.15   | 7.59e-14  1.93e-14  8.14e-15 |
 NYA1 |   288     0     0   288    1.02   | 2.74e-14  7.03e-15  4.90e-15 |
 HOB2 |   288     0     0   288    0.83   | 3.90e-14  8.75e-15  1.19e-14 |
 FAIR |   288     0     0   288    0.76   | 4.65e-14  8.23e-15  4.54e-15 |
 WES2 |   288     0     0   143    0.61   | 3.95e-14  1.12e-14  6.62e-15 |
 TIDB |   288     0     0   288    0.38   | 1.73e-13  1.58e-14  4.40e-15 |
 TID1 |   288     0     0   288    0.33   | 4.58e-14  8.99e-15  2.60e-15 |
 GODE |   288     0     0   288    0.28   | 4.63e-14  1.13e-14  1.57e-14 |
 FORT |   288     0     0   288    0.18   | 9.03e-14  1.46e-14  6.76e-15 |
 PTBB |   288     0     0   288    0.13   | 3.28e-13  7.76e-14  3.89e-14 |
 G27  |   288     0     0   288    0.12   | 3.23e-13  7.23e-14  3.73e-14 |
 TWTF |   288     0     0   288    0.07   | 4.02e-13  8.93e-14  2.50e-14 |
 MIZU |   288     0     0   288    0.07   | 3.06e-13  9.30e-14  3.47e-14 |
 G19  |   288     0     0   288    0.07   | 6.43e-13  8.79e-14  3.65e-14 |
 G26  |   288     0     0   288    0.06   | 3.36e-13  1.03e-13  7.33e-14 |
 G17  |   288     0     0   288    0.06   | 4.31e-13  9.17e-14  5.38e-14 |
 G29  |   273     0     0   267    0.06   | 3.93e-13  1.38e-13  6.46e-14 |
 SFER |   286     0     0   284    0.05   | 3.95e-13  1.44e-13  5.31e-14 |
 DWH1 |   285     0     0   284    0.05   | 4.99e-13  1.23e-13  4.02e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.53e-13  1.15e-13  6.15e-14 |
 KGN0 |   287     0     0   286    0.05   | 3.16e-13  7.66e-14  3.38e-14 |
 G07  |   288     0     0   288    0.05   | 3.34e-13  1.20e-13  9.38e-14 |
 IENG |   288     0     0   288    0.05   | 5.51e-13  1.42e-13  4.24e-14 |
 G30  |   288     0     0   288    0.05   | 3.18e-13  7.96e-14  1.05e-13 |
 G04  |   288     0     0   288    0.04   | 4.70e-13  1.36e-13  6.12e-14 |
 TLSE |   287     0     0   286    0.03   | 4.19e-13  1.32e-13  4.05e-14 |
 HRAO |   284     0     0   283    0.03   | 1.30e-13  3.60e-14  6.11e-14 |
 STR1 |   288     0     0   288    0.02   | 6.87e-13  2.24e-13  6.58e-14 |
 G31  |   288     0     0   288    0.01   | 2.55e-13  1.56e-13  1.60e-13 |
 G06  |   288     0     0   288    0.01   | 4.51e-13  1.71e-13  1.51e-13 |
 TSKB |   288     0     0   288    0.01   | 1.03e-12  3.24e-13  7.10e-14 |
 GMAS |   288     0     0   288    0.01   | 8.17e-13  4.32e-13  1.43e-13 |
 STJO |   288     0     0   288    0.01   | 3.34e-14  1.06e-14  3.28e-14 |
 G09  |   288     0     0   288    0.01   | 1.32e-12  3.39e-13  9.62e-14 |
 BAHR |   288     0     0   288    0.01   | 3.22e-13  1.46e-13  1.95e-13 |
 G10  |   288     0     0   288    0.01   | 1.21e-12  4.09e-13  1.84e-13 |
 YEBE |   287     0     3     2    0.01   | 1.85e-13  2.81e-14  1.54e-14 |
 KERG |   288     0     0   288    0.01   | 1.47e-12  3.36e-13  1.41e-13 |
 KOUR |   288     0     0   288    0.01   | 1.44e-12  4.37e-13  1.57e-13 |
 G08  |   288     0     0   288    0.00   | 1.29e-12  4.35e-13  1.30e-13 |
 DAEJ |   281     0     0   277    0.00   | 1.52e-12  3.87e-13  3.63e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.67e-12  5.89e-13  2.00e-13 |
 PRDS |   288     0     0   288    0.00   | 1.41e-12  4.16e-13  1.38e-13 |
 SUTM |   288     0     0   288    0.00   | 7.01e-13  1.71e-13  9.21e-14 |
 GPST |   288     0     0     0    0.00   | 1.74e-14  3.35e-15  2.62e-15 |
 SEY1 |   232     2     0     0    0.00   |        -         -         - |
 SCH2 |   272     0     0     0    0.00   |        -         -         - |
 RIOG |   202     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 DAKA |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     1     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.51e-13  7.81e-14  6.16e-14 |
 G25  |   288     0     0     0    0.00   | 1.42e-12  4.51e-13  1.95e-13 |
 G24  |   288     0     0     0    0.00   | 1.34e-12  5.09e-13  2.80e-13 |
 G22  |   288     0     6     0    0.00   | 6.08e-13  6.13e-14  2.32e-14 |
 G21  |   288     1     6     0    0.00   | 9.68e-13  1.20e-13  3.04e-14 |
 G20  |   288     0     6     0    0.00   | 5.94e-13  6.85e-14  2.44e-14 |
 G18  |   288     1     6     0    0.00   | 1.19e-12  1.36e-13  4.00e-14 |
 G16  |   288     0     4     0    0.00   | 5.06e-13  4.90e-14  2.88e-14 |
 G15  |   287     0     0     0    0.00   | 1.46e-12  6.18e-13  3.12e-13 |
 G14  |   288     0     6     0    0.00   | 6.18e-13  7.64e-14  2.27e-14 |
 G13  |   288     0     6     0    0.00   | 5.42e-13  5.85e-14  3.55e-14 |
 G11  |   288     0     4     0    0.00   | 6.16e-13  6.86e-14  4.42e-14 |
 G05  |   288     0     0     0    0.00   | 1.47e-12  4.25e-13  1.97e-13 |
 G03  |   288     0     0     0    0.00   | 1.22e-12  3.94e-13  2.13e-13 |
 G01  |   288     0     0     0    0.00   | 1.58e-12  8.91e-13  5.54e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.09e-12  1.41e-12  2.07e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   276     0     0     0    0.00   |        -         -         - |
 TRO1 |   279     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.16e-13  2.12e-13  4.39e-13 |
 SUTH |   274     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   | 2.10e-12  7.85e-13  2.25e-13 |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.85e-12  5.80e-13  2.18e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   | 6.44e-13  7.87e-13  8.77e-13 |
 MCM4 |   288     0     1     0    0.00   | 5.99e-13  2.03e-13  6.29e-13 |
 MAW1 |   287     1     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     3     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.29e-13  2.78e-13  6.72e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.38e-13  5.74e-13  3.49e-13 |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   286     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   280     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   276     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.45e-17  2.94e-16  1.77e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      YELL      NPLD |
------------------------------------------+------------------------------+
