
 GPS week: 1269   Day: 6   MJD: 53133                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2672     96    -0.18     0.13     3.32     0.00
 cod |   288     0  28357    837    -0.04    -0.27     0.04    16.85
 emr |   288     0  24679    327  3632.72    28.57     0.04    18.20
 gfz |   288     0  20626     33    -0.32     1.04     0.04    18.99
 iga |    96     0   2672     13    -5.40    28.21     0.09     0.00
 igu |    96     0   2480      0    -5.42    28.25     2.81     0.00
 jpl |   288     0  16356    287    -1.64     2.84     0.03    29.87
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  33906   1237   -13.80    16.57     0.04    16.08

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------+
    1 |  -145   -47  -117    96   -81  7282    -2     -    73 |
    3 |-10228     X   -52   136  -123 -9660   -24     -   -99 |
    4 |  -703     3  -169    51    23  1662   146     -   105 |
    5 |  2198   116   -23   -16   198 10791   112     -   -94 |
    6 | -8088     X   -50   -34  -105 -9312    72     -   -29 |
    7 |  2230     X   -39  -115    21 -2992   209     -  -182 |
    8 |     X    69  -140   173   125     -    37     -    33 |
    9 |  -863   -10  -137    72  -140  7540   114     -  -113 |
   10 |-13316    47   -38   -28   -28 -2886   196     -    -3 |
   11 |  4944    51   -28    34  -109  -210   -25     -   -19 |
   13 |  3899     5   -47    28   -93  2582     9     -     X |
   14 |  4989    60   -53    56   -42  -136    50     -   -77 |
   15 | -9034    47   -83    30   151 -9706    20     -     6 |
   16 |  5338   118   -47  -187  -161   618    83     -     9 |
   17 |  1014    41   -25    72   116  5726   152     -  -123 |
   18 |  5489   106  -141    33  -141  -229    51     -   -78 |
   19 |  5544  -181   266   162  1272   400  -140     -  -273 |
   20 |  8548   -23    23    30    49  -730   170     -   -63 |
   21 |  5469    83   -91  -143   -50   -45    89     -    33 |
   22 | -1526    98   -63    -9  -103 -1732   -45     -   -15 |
   24 | -2269   -37  -106    -6  -114     -   121     -   -40 |
   25 |  2204   133    -7    16  -230 -1792    82     -  -163 |
   26 | -2565   -31   -85    64   -18  4658    55     -   -41 |
   27 |   332   -65  -157    70  -136  -673   133     -   -65 |
   28 |  1924    16   -75    32    14 -1995   -33     -    36 |
   29 | -1967   -11   -82    66   -99   644    70     -    16 |
   30 | -1692    98   -60    24   -51  1532    25     -  -104 |
   31 | -2498    91   -57    68   -53 -2377     9     -  -126 |
 -----+-------------------------------------------------------+
 ALBH |     -    34   -75     -     -     -    48     -   -40 |
 ALGO |     -     -   -91     -     -     -    67     -   -22 |
 ALRT |     -   -41     -    37     -     -     -     -     - |
 AMC2 |     -   -92    85     -     -     -  -117     -   217 |
 ARTU |     -   126     -   -29     -     -   -53     -     - |
 ASPA |     -     -     -     -     -     -    33     -   -61 |
 BAHR |     -     -    16    -4     -     -     -     -   -14 |
 BAN2 |     -     -   116     -     -     -     -     -  -131 |
 BILI |     -    34     -   -30     -     -     -     -     - |
 BOGT |     -   -49     -   151     -     -     X     -  -113 |
 BOR1 |     -    75   -69     -     -     -     -     -    -1 |
 BREW |     -     -   -18     -     -     -     -     -    20 |
 BRMU |     -     -     -   -56     -     -     -     -    66 |
 BRUS |     -    48   118     -     -     -   -75     -   -45 |
 CAS1 |     -    93     -   -88     -     -    54     -   -94 |
 CEDU |     -   -59     -     -     -     -    34     -    -1 |
 CHAT |     -   -47     -    42     -     -     -     -     - |
 CHUR |     -     -   155     -     -     -     -     -  -175 |
 COCO |     -    -3     -   127     -     -   -11     -  -125 |
 CRO1 |     -     -  -121   -62     -     -   -70     -   383 |
 DAEJ |     -   -81    75     -     -     -     -     -     X |
 DAKA |     -    13     -   -12     -     -     -     -     - |
 DARW |     -    22   -20     -     -     -     -     -     - |
 DAV1 |     -    90     -   -27     -     -     -     -   -62 |
 DRAO |     -   -84  -146     -     -     -   151     -   -27 |
 DWH1 |     -   199     2     -     -     -  -145     -    58 |
 FAIR |     -   -70   -92  -116     -     -   105     -   116 |
 FORT |     -   154   -20   -41     -     -     -     -   -73 |
 GMAS |     -     -   128     -     -     -   -78     -     X |
 GODE |     -   -76    92     -     -     -     -     -   -25 |
 GOL2 |     -     -   -36     -     -     -     -     -    41 |
 GOLD |     -   -43     -     -     -     -   -16     -    76 |
 GUAM |     -     -     -    16     -     -  -149     -   259 |
 GUAT |     -    12     -  -116     -     -     -     -   124 |
 HERS |     -     -  -240     -     -     -     -     -   271 |
 HOB2 |     -   -80   102     -     -     -    25     -   -78 |
 HOFN |     -     -     -  -106     -     -    67     -     - |
 HRAO |     -     -     -  -140     -     -    25     -   144 |
 IENG |     -  -122   113     -     -     -     -     -     - |
 IISC |     -     -     -   -81     -     -     -     -    95 |
 ISPA |     -    -4     -    82     -     -   -50     -     - |
 JAB1 |     -    -3     -     -     -     -     2     -     - |
 JPLM |     -     -   -85     -     -     -     -     -    97 |
 KERG |     -    63     3   -25     -     -     -     -   -39 |
 KGN0 |     -   -39    68     -     -     -     -     -   -36 |
 KIRU |     -   -45     -     -     -     -    12     -    25 |
 KIT3 |     -     -     -    50     -     -   -15     -   -31 |
 KOKB |     -     -     -   -68     -     -     -     -    81 |
 KOSG |     -   -10     -     -     -     -     -     -    10 |
 KOUR |     -  -136     -    68     -     -   -16     -    90 |
 LPGS |     -   -33   108     -     -     -   -38     -   -20 |
 MAC1 |     -    13     -   -45     -     -     -     -    40 |
 MAS1 |     -     -    36     -     -     -     -     -   -41 |
 MATE |     -    57     -     -     -     -     -     -   -60 |
 MAW1 |     -    80     -    55     -     -   -33     -   -88 |
 MCM4 |     -  -132     -   117     -     -     -     -     - |
 MDO1 |     -    18   -27    10     -     -     -     -     X |
 MEDI |     -     -   -11     -     -     -     -     -    13 |
 METS |     -   -20    20     -     -     -     -     -    -2 |
 MIZU |     -     -    41     -     -     -     -     -   -47 |
 MKEA |     -    93     -     -     -     -   -91     -    73 |
 NLIB |     -     -    13     -     -     -    41     -   -90 |
 NNOR |     -     -   199     -     -     -  -110     -   -22 |
 NPLD |     -   -40    72     -     -     -     -     -   -40 |
 NRC1 |     -   -24    -5    49     -     -   -68     -   100 |
 NRIL |     -    14     -   -50     -     -    24     -     - |
 NTUS |     -  -150     -     -     -     -     -     -   157 |
 NYA1 |     -    75     -   -18     -     -     -     -   -57 |
 NYAL |     -     -   -41     -     -     -     -     -    46 |
 ONSA |     -   -76    71     -     -     -     -     -     - |
 PDEL |     -   124     -  -191     -     -    51     -     - |
 PERT |     -     6   -41   113     -     -     -     -   -94 |
 PETP |     -   -51     -    45     -     -     -     -     - |
 PIE1 |     -     -    55     -     -     -   -16     -   -33 |
 POTS |     -    -5     -   -31     -     -     -     -    41 |
 PRDS |     -   -74    18     -     -     -     -     -    56 |
 PTBB |     -    10    61     -     -     -     -     -   -80 |
 QAQ1 |     -     -   -31     -     -     -     -     -    36 |
 RIOG |     -    25    22   -27     -     -     -     -   -19 |
 SANT |     -     8     -   -71     -     -     -     -    75 |
 SCH2 |     -     -    52     -     -     -     -     -   -58 |
 SFER |     -   -95    25     -     -     -     -     -    80 |
 SOFI |     -     -     -     -     -     -    77     -  -143 |
 SPT0 |     -  -151    43     -     -     -     -     -   110 |
 STJO |     -   -39   -54     -     -     -   -45     -   186 |
 STR1 |     -     -    33     -     -     -     -     -   -37 |
 SUTM |     -     -   137  -135     -     -     2     -     - |
 THTI |     -     -     -     3     -     -   -68     -   122 |
 THU3 |     -   -49    18     -     -     -     -     -    31 |
 TID1 |     -     -     -     -     -     -     9     -   -16 |
 TIDB |     -    89   -44     -     -     -     -     -   -43 |
 TLSE |     -     -    -8     -     -     -     -     -    10 |
 TOW2 |     -    10     -    74     -     -   -53     -     - |
 TRO1 |     -  -141     X    63     -     -     -     -    72 |
 TSKB |     -   -95   135   -37     -     -     -     -    -9 |
 TWTF |     -    67   276     -     -     -   -99     -  -129 |
 URUM |     -    -7     -     -     -     -     -     -     8 |
 USN1 |     -   135   353     -     -     -  -341     -    98 |
 USNO |     -   -81    64     -     -     -     -     -    13 |
 VILL |     -   -33     -     -     -     -     -     -    35 |
 WHIT |     -   -80     -     -     -     -     -     -    84 |
 WSRT |     -     3    17     -     -     -     -     -   -23 |
 WTZR |     -    12     -     -     -     -     -     -   -13 |
 WUHN |     -     -     -   124     -     -     -     -  -146 |
 YAKT |     -     -     -     -     -     -    -5     -     9 |
 YAR2 |     -   -41     -     -     -     -     -     -    43 |
 YELL |     -   -35    30   -40     -     -     -     -    49 |
 ZWEN |     -     -     -  -175     -     -     -     -   207 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  9453    47    33    15    48  2743    32     -    60 |  288   4.62
    3 |  3353     X    37    29   184  3558    34     -    28 |  276   1.72
    4 |  1874    58    29    25    91  1581    49     -    54 |  288   0.69
    5 |  3707    45    39    24    43  5630    37     -    60 |  288   1.67
    6 |  2472     X    61    22   125  5683    26     -    59 |  276   1.52
    7 |  1457     X    49    24   173  1288    34     -    46 |  276   0.75
    8 |     X    85    49    97    78     -    35     -    41 |  288   4.79
    9 |  1445    54    35    59    61  3843    24     -    39 |  288   1.02
   10 |  5485    85    45    29    94  1333    59     -    35 |  288   2.31
   11 |  1000    44    52    31    76   410    35     -    50 |  288   0.36
   13 |  2047    54    82    47    52  1932    29     -     X |  288   0.21
   14 |   918    78    77    35    63   386    37     -    47 |  288   0.21
   15 |  8261    45    33    22    62  8176    21     -    51 |  288   3.61
   16 |   568    48    50    59    45   736    24     -    44 |  288   0.16
   17 |  2519    41    26    36    46  3397    52     -    77 |  288   0.98
   18 |  1379    55    27    29    97   477    34     -    65 |  288   0.45
   19 |   895    51    87    51    94   612    85     -    56 |  288   0.51
   20 |  1596    76    33    30    84   397    58     -    86 |  288   0.22
   21 |  1885    39    38    31    60   540    16     -    56 |  288   0.29
   22 |   644    42    43    29    50   847    28     -    29 |  288   0.35
   24 |  5049    42    26    23   171     -    31     -    45 |  288   2.62
   25 |  2635    30    37    23    35  1814    69     -    68 |  288   1.26
   26 |  2994    58    25    37    32  2897    25     -    87 |  288   0.46
   27 |  1699    33    38    20   142   747    38     -    36 |  288   0.41
   28 |   548    62    40    48    64   814    16     -    33 |  288   0.32
   29 |  1074    67    21    39    36  1067    31     -    84 |  288   0.72
   30 |  1553    47    55    28    67   884    22     -    56 |  288   1.03
   31 |  1643    92    80    46    71  2045    41     -    33 |  278   1.66
 -----+-------------------------------------------------------+--------------
 ALBH |     -    44    43     -     -     -    25     -    29 |  288   0.05
 ALGO |     -     -    21     -     -     -    15     -    20 |  288   0.06
 ALRT |     -    14     -    12     -     -     -     -     - |  288   9.13
 AMC2 |     -    42    33     -     -     -    15     -    27 |  288   0.02
 ARTU |     -    34     -    22     -     -    17     -     - |  288  12.23
 ASPA |     -     -     -     -     -     -    33     -    61 |  281    >>>
 BAHR |     -     -    18    27     -     -     -     -    19 |  288   2.46
 BAN2 |     -     -    37     -     -     -     -     -    42 |  223  19.84
 BILI |     -    29     -    26     -     -     -     -     - |  286   9.14
 BOGT |     -    47     -    87     -     -     X     -   126 |  287  12.37
 BOR1 |     -    21    15     -     -     -     -     -    19 |  288   0.43
 BREW |     -     -    20     -     -     -     -     -    22 |  288   0.04
 BRMU |     -     -     -    45     -     -     -     -    53 |  276    >>>
 BRUS |     -    28    24     -     -     -    19     -    14 |  288   0.02
 CAS1 |     -    21     -    18     -     -    22     -    46 |  288   8.34
 CEDU |     -    33     -     -     -     -    22     -    16 |  288  11.76
 CHAT |     -    24     -    21     -     -     -     -     - |  287  11.34
 CHUR |     -     -    48     -     -     -     -     -    54 |  288   5.73
 COCO |     -    23     -    33     -     -    23     -    48 |  288  10.19
 CRO1 |     -     -    28    42     -     -    21     -    46 |  285  19.50
 DAEJ |     -    26    24     -     -     -     -     -     X |  279   1.55
 DAKA |     -    18     -    16     -     -     -     -     - |  264  20.19
 DARW |     -    25    23     -     -     -     -     -     - |  288   3.76
 DAV1 |     -    16     -    41     -     -     -     -    41 |  288  15.26
 DRAO |     -    51    39     -     -     -    14     -    20 |  288   0.06
 DWH1 |     -    38    44     -     -     -    25     -    25 |  288   0.42
 FAIR |     -    42    33    26     -     -    15     -    30 |  288   0.07
 FORT |     -    52    74    58     -     -     -     -    46 |  288   0.06
 GMAS |     -     -    25     -     -     -    15     -     X |  288   1.02
 GODE |     -    43    54     -     -     -     -     -    30 |  288   0.24
 GOL2 |     -     -    80     -     -     -     -     -    91 |  239 323.23
 GOLD |     -    24     -     -     -     -    27     -    34 |  288  16.55
 GUAM |     -     -     -    44     -     -    24     -    45 |  288  11.73
 GUAT |     -    16     -    23     -     -     -     -    31 |  288    >>>
 HERS |     -     -    27     -     -     -     -     -    30 |  235   9.83
 HOB2 |     -    27    39     -     -     -    38     -    28 |  288   0.12
 HOFN |     -     -     -    16     -     -    10     -     - |  288    >>>
 HRAO |     -     -     -    44     -     -    26     -    75 |  288   0.71
 IENG |     -    23    21     -     -     -     -     -     - |  288   0.61
 IISC |     -     -     -    33     -     -     -     -    39 |  288  21.09
 ISPA |     -    41     -    33     -     -    33     -     - |  288  12.18
 JAB1 |     -    28     -     -     -     -    16     -     - |  286  17.04
 JPLM |     -     -    28     -     -     -     -     -    31 |  288   9.39
 KERG |     -    45    37    43     -     -     -     -    39 |  288   1.93
 KGN0 |     -    43    26     -     -     -     -     -    28 |  287   0.30
 KIRU |     -    29     -     -     -     -    15     -    16 |  288 147.22
 KIT3 |     -     -     -    26     -     -    19     -    21 |  288  24.26
 KOKB |     -     -     -    33     -     -     -     -    39 |  288   0.08
 KOSG |     -    17     -     -     -     -     -     -    18 |  288  48.08
 KOUR |     -    41     -    38     -     -    29     -    49 |  288   2.23
 LPGS |     -    37    36     -     -     -    16     -    19 |  288  76.49
 MAC1 |     -    61     -    48     -     -     -     -    44 |  288  12.04
 MAS1 |     -     -    13     -     -     -     -     -    15 |  288   2.49
 MATE |     -    18     -     -     -     -     -     -    18 |  212   0.04
 MAW1 |     -    32     -   104     -     -    37     -    58 |  287  32.90
 MCM4 |     -    21     -    19     -     -     -     -     - |  242   2.08
 MDO1 |     -    33    39    34     -     -     -     -     X |  287    >>>
 MEDI |     -     -    13     -     -     -     -     -    15 |  288    >>>
 METS |     -    20    18     -     -     -     -     -    18 |  287  10.57
 MIZU |     -     -    11     -     -     -     -     -    13 |  288   0.43
 MKEA |     -    47     -     -     -     -    23     -    51 |  288  23.16
 NLIB |     -     -    25     -     -     -    14     -    31 |  288   0.03
 NNOR |     -     -    25     -     -     -    18     -    32 |  288  11.13
 NPLD |     -    20    24     -     -     -     -     -    25 |  287   0.02
 NRC1 |     -    35    28    25     -     -    11     -    15 |  288   0.02
 NRIL |     -    26     -    14     -     -    11     -     - |  288  10.13
 NTUS |     -    31     -     -     -     -     -     -    33 |  288   9.86
 NYA1 |     -    19     -    14     -     -     -     -    18 |  288   0.11
 NYAL |     -     -    18     -     -     -     -     -    21 |  288   0.12
 ONSA |     -    23    21     -     -     -     -     -     - |  288   0.02
 PDEL |     -    34     -    34     -     -    24     -     - |  288  54.84
 PERT |     -    28    25    29     -     -     -     -    23 |  288   2.66
 PETP |     -    27     -    24     -     -     -     -     - |  287  10.30
 PIE1 |     -     -    31     -     -     -    13     -    28 |  288   0.03
 POTS |     -    24     -    18     -     -     -     -     9 |  288  23.53
 PRDS |     -    33    15     -     -     -     -     -    29 |  288   1.81
 PTBB |     -    51    34     -     -     -     -     -    83 |  288   0.31
 QAQ1 |     -     -    14     -     -     -     -     -    16 |  288  10.01
 RIOG |     -    28    29    42     -     -     -     -    56 |  288  11.33
 SANT |     -    28     -    27     -     -     -     -    41 |  288   2.80
 SCH2 |     -     -    17     -     -     -     -     -    20 |  288 133.42
 SFER |     -    69    24     -     -     -     -     -    79 |  278 559.15
 SOFI |     -     -     -     -     -     -    17     -    31 |  288  96.85
 SPT0 |     -    20    16     -     -     -     -     -    15 |  288   0.04
 STJO |     -    37    22     -     -     -    14     -    24 |  288   0.26
 STR1 |     -     -    21     -     -     -     -     -    24 |  288   0.81
 SUTM |     -     -    32    28     -     -    26     -     - |  288   1.66
 THTI |     -     -     -    88     -     -    38     -    59 |  276   4.93
 THU3 |     -    33    26     -     -     -     -     -    38 |  288   8.74
 TID1 |     -     -     -     -     -     -    14     -    27 |  288   0.06
 TIDB |     -    21    32     -     -     -     -     -    26 |  288   0.07
 TLSE |     -     -    43     -     -     -     -     -    49 |  287   0.91
 TOW2 |     -    19     -    24     -     -    18     -     - |  288  10.85
 TRO1 |     -    37     X    55     -     -     -     -    37 |  285   8.97
 TSKB |     -    72    36    23     -     -     -     -    32 |  288   1.03
 TWTF |     -    37    59     -     -     -    40     -    59 |  284   0.53
 URUM |     -    47     -     -     -     -     -     -    49 |  288  14.93
 USN1 |     -    43    21     -     -     -    40     -    38 |  284   0.09
 USNO |     -    30    20     -     -     -     -     -    20 |  288   0.03
 VILL |     -    21     -     -     -     -     -     -    22 |  288   3.85
 WHIT |     -    32     -     -     -     -     -     -    33 |  288   8.45
 WSRT |     -    21    14     -     -     -     -     -    17 |  288   0.02
 WTZR |     -    16     -     -     -     -     -     -    17 |  288   0.13
 WUHN |     -     -     -    24     -     -     -     -    28 |  287  20.63
 YAKT |     -     -     -     -     -     -     9     -    17 |  288   0.81
 YAR2 |     -    13     -     -     -     -     -     -    14 |  288   6.66
 YELL |     -    51    49    16     -     -     -     -    16 |  288   0.05
 ZWEN |     -     -     -    18     -     -     -     -    21 |  288  14.13
 -----+-------------------------------------------------------+--------------
 TOT  |  3317    42    38    38    89  2812    25     -    43 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.95   | 3.49e-14  6.48e-15  1.62e-15 |
 BREW |   288     0     0   288    9.94   | 4.11e-14  8.14e-15  3.83e-15 |
 NPLD |   287     0     0   286    9.39   | 3.64e-14  5.78e-15  1.82e-15 |
 BRUS |   288     0     0   288    8.31   | 3.71e-14  7.01e-15  1.31e-15 |
 ONSA |   288     0     0   288    6.70   | 3.59e-14  6.66e-15  1.70e-15 |
 ALGO |   288     0     0   288    6.64   | 3.64e-14  7.21e-15  4.05e-15 |
 ALBH |   288     0     0   288    6.01   | 3.80e-14  7.65e-15  3.14e-15 |
 PIE1 |   288     0     0   288    5.76   | 3.62e-14  5.46e-15  2.18e-15 |
 USNO |   288     0     0   288    5.23   | 4.10e-14  1.13e-14  2.44e-15 |
 WSRT |   288     0     0   288    4.73   | 2.61e-14  5.25e-15  2.57e-15 |
 YELL |   288     0     0   288    3.46   | 2.98e-14  4.36e-15  3.32e-15 |
 NRC1 |   288     0     0   288    3.37   | 2.69e-14  7.97e-15  1.79e-15 |
 SPT0 |   288     0     0   288    3.15   | 4.01e-14  7.75e-15  4.53e-15 |
 USN1 |   284     0     0   282    3.13   | 6.86e-14  1.17e-14  1.99e-15 |
 NLIB |   288     0     0   288    2.17   | 5.76e-14  1.17e-14  2.18e-15 |
 NYA1 |   288     0     0   288    2.09   | 2.79e-14  7.99e-15  1.05e-14 |
 WTZR |   288     0     0   288    1.72   | 3.69e-14  1.67e-14  1.01e-14 |
 NYAL |   288     1     0   287    1.56   | 3.33e-14  8.50e-15  1.08e-14 |
 KOKB |   288     0     0   288    1.46   | 7.59e-14  1.64e-14  7.01e-15 |
 DRAO |   288     0     0   288    0.99   | 6.75e-14  1.83e-14  5.94e-15 |
 HOB2 |   288     0     0   288    0.78   | 4.40e-14  9.54e-15  7.70e-15 |
 GOL2 |   239     0     0    90    0.61   | 3.41e-14  5.38e-15         - |
 FAIR |   288     0     0   288    0.61   | 5.44e-14  1.02e-14  5.01e-15 |
 MATE |   212     0     0    67    0.35   | 4.61e-14  1.35e-14         - |
 TIDB |   288     0     0   288    0.29   | 1.78e-13  1.76e-14  4.18e-15 |
 GODE |   288     0     0   288    0.28   | 4.36e-14  1.48e-14  1.42e-14 |
 TID1 |   288     0     0   288    0.26   | 5.31e-14  7.94e-15  3.76e-15 |
 FORT |   288     0     0   288    0.17   | 6.60e-14  1.84e-14  4.29e-15 |
 PTBB |   288     0     0   288    0.11   | 3.13e-13  7.68e-14  3.44e-14 |
 G27  |   288     0     0   288    0.06   | 3.19e-13  1.11e-13  3.16e-14 |
 TWTF |   284     0     0   282    0.06   | 4.28e-13  1.17e-13  3.18e-14 |
 G30  |   288     0     0   288    0.06   | 3.69e-13  9.09e-14  6.97e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.83e-13  1.46e-13  3.69e-14 |
 G26  |   288     0     0   288    0.05   | 3.47e-13  1.16e-13  5.37e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.30e-13  1.15e-13  3.03e-14 |
 IENG |   288     0     0   288    0.04   | 5.52e-13  1.70e-13  5.83e-14 |
 SFER |   278     1     0   272    0.04   | 3.94e-13  1.01e-13  2.98e-14 |
 KGN0 |   287     0     0   286    0.04   | 3.22e-13  1.08e-13  2.56e-14 |
 G07  |   276     0     0   274    0.04   | 2.70e-13  8.96e-14  7.45e-14 |
 G04  |   288     0     0   288    0.04   | 4.65e-13  1.58e-13  7.61e-14 |
 G29  |   288     0     0   288    0.03   | 4.19e-13  1.08e-13  7.30e-14 |
 YAKT |   288     0     0   288    0.03   | 4.17e-13  1.12e-13  6.22e-14 |
 G19  |   288     0     1   143    0.03   | 6.85e-13  9.09e-14  3.13e-14 |
 MIZU |   288     0     0   143    0.03   | 3.38e-13  1.05e-13  3.18e-14 |
 G17  |   288     0     0   288    0.03   | 3.97e-13  1.18e-13  1.24e-13 |
 HRAO |   288     0     0   288    0.02   | 1.22e-13  3.75e-14  6.32e-14 |
 G06  |   276     0     0   274    0.02   | 4.71e-13  1.48e-13  1.41e-13 |
 TLSE |   287     0     0   142    0.01   | 4.30e-13  1.40e-13  7.40e-14 |
 TSKB |   288     0     0   288    0.01   | 9.95e-13  3.03e-13  1.00e-13 |
 G31  |   278     0     0   276    0.01   | 2.31e-13  1.54e-13  1.63e-13 |
 STR1 |   288     0     0   143    0.01   | 7.56e-13  2.53e-13  7.81e-14 |
 BAHR |   288     0     0   143    0.01   | 3.21e-13  1.38e-13  2.26e-13 |
 G05  |   288     0     0   288    0.01   | 1.33e-12  3.81e-13  1.63e-13 |
 STJO |   288     0     0   288    0.01   | 3.70e-14  1.16e-14  1.44e-14 |
 G25  |   288     0     0   288    0.01   | 1.34e-12  4.11e-13  1.43e-13 |
 KERG |   288     0     0   288    0.00   | 1.23e-12  4.44e-13  1.29e-13 |
 G10  |   288     0     0   288    0.00   | 1.13e-12  3.84e-13  2.96e-13 |
 GMAS |   288     0     0   143    0.00   | 8.52e-13  3.82e-13  8.28e-14 |
 G09  |   288     0     2    94    0.00   | 1.36e-12  3.97e-13  7.07e-14 |
 G03  |   276     0     0   274    0.00   | 1.29e-12  4.41e-13  1.67e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.93e-12  6.00e-13  1.84e-13 |
 KOUR |   288     0     0   143    0.00   | 1.41e-12  4.45e-13  1.56e-13 |
 PRDS |   288     0     0   288    0.00   | 1.46e-12  3.87e-13  1.97e-13 |
 DAEJ |   279     0     0   134    0.00   | 1.51e-12  3.91e-13  1.41e-13 |
 SUTM |   288     0     0   288    0.00   | 6.78e-13  1.70e-13  2.01e-13 |
 GPST |   288     0     0     0    0.00   | 1.72e-14  3.83e-15  1.05e-15 |
 MCM4 |   242     0     0     0    0.00   | 5.98e-13  2.05e-13         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   235     0     0     0    0.00   |        -         -         - |
 DAKA |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.82e-13  7.93e-14  4.73e-14 |
 G24  |   288     0     0     0    0.00   | 1.24e-12  4.16e-13  3.60e-13 |
 G22  |   288     0     6     0    0.00   | 5.69e-13  5.72e-14  3.03e-14 |
 G21  |   288     4     6     0    0.00   | 8.79e-13  1.63e-13  4.21e-14 |
 G20  |   288     0     6     0    0.00   | 5.89e-13  7.36e-14  1.92e-14 |
 G18  |   288     2     6     0    0.00   | 1.45e-12  1.66e-13  5.12e-14 |
 G16  |   288     0     6     0    0.00   | 4.88e-13  6.10e-14  1.31e-14 |
 G15  |   288     0     0     0    0.00   | 1.63e-12  6.45e-13  3.81e-13 |
 G14  |   288     0     4     0    0.00   | 5.92e-13  6.95e-14  2.54e-14 |
 G13  |   288     0     5     0    0.00   | 5.14e-13  5.42e-14  1.71e-14 |
 G11  |   288     0     6     0    0.00   | 6.16e-13  6.26e-14  4.68e-14 |
 G08  |   288     0     2     0    0.00   | 1.51e-12  4.10e-13  3.07e-13 |
 G01  |   288     0     0     0    0.00   | 1.31e-12  6.49e-13  5.81e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.49e-13  3.13e-13  5.46e-13 |
 VILL |   288     0     0     0    0.00   | 1.11e-12  1.20e-12  4.08e-13 |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   285     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     0     0     0    0.00   | 3.60e-13  1.69e-13  3.59e-13 |
 SOFI |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   | 2.00e-12  6.60e-13  2.40e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.74e-12  6.02e-13  2.54e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   287     1     0     0    0.00   | 6.95e-13  9.13e-13  2.97e-13 |
 MAW1 |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   | 7.12e-13  7.68e-13  2.63e-12 |
 KIT3 |   288     1     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.96e-13  3.01e-13  8.86e-13 |
 JAB1 |   286     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.41e-13  5.42e-13  2.27e-13 |
 CRO1 |   285     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   276     0     0     0    0.00   |        -         -         - |
 BOGT |   287     0     0     0    0.00   |        -         -         - |
 BAN2 |   223     0     0     0    0.00   |        -         -         - |
 ASPA |   281     0     0     0    0.00   |        -         -         - |
 ARTU |   288     1     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.05e-17  2.46e-16  1.47e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      YELL      BRUS |
------------------------------------------+------------------------------+
