
 GPS week: 1267   Day: 2   MJD: 53115                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688     12     0.43    -0.72     2.91     0.00
 cod |   288     0  25733      3     0.46    -0.70     0.04    16.98
 emr |   288     0  18088     16  3138.42    29.15     0.04    17.07
 esa |   288     0  18444   1286   -20.16     4.28     0.07     9.40
 gfz |   288     0  20356      0     0.17     0.15     0.04    18.98
 iga |    96     0   2688      6     0.28    -0.25     0.07     0.00
 igu |    96     0   2688    252   -15.53  -877.98     2.84     0.00
 jpl |   288     0  15217    280    -4.74     1.99     0.03    23.45
 ngs |    96     0   2688      0     0.23    -0.21     2.75     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  17186     45 -1711.88   -29.11     0.05    14.13

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -8770     8   -14    73    44   -81-12833  -119 -2428     -    81 |
    3 |  -615    25   -52   284     5  -110  4209   -40 -1039     -   -68 |
    4 |  1300  -120  -195   151   157   -40  3216   -47   379     -    74 |
    5 |   990    -4  -137   -70    93    59 -4345   181  -758     -  -183 |
    6 |-12760    28  -216   163   118  -131  4625    52 -9736     -  -137 |
    7 | -1778   -93  -157   245    70   -15  -232   -18 -2413     -    71 |
    8 | -8677    21  -100   -31    53   -61 -6896   -40 -7242     -   107 |
    9 |  -401    61  -114     9   161   -84  1011   112 -1243     -  -172 |
   10 |  3432   -46   -11   -23    53    58  3618    68  2191     -     4 |
   11 |  6394   -39     8   150  -162  -102  2697    -7  6405     -   156 |
   13 |  5276    64   -23   117  -146  -109  2833   -12  4454     -    71 |
   14 |  5690   248    83  -245  -191    59     X     X  5262     -    23 |
   15 |  5743   -60   -62   -99   178    87  8610     5  3180     -   -27 |
   16 |  6825    57   -24    11  -178     7  1996   148  6200     -   -31 |
   17 | -2547    67   -60  -202   147    11    93    46 -3488     -   -78 |
   18 |  4889    91   -62  -221   142   -83  1904    82  4498     -   -91 |
   19 |  5600  -279   193   166   151  1045 -1601   102  5185     -  -225 |
   20 |  6413  -121    21   393  -168  -142   842    57  5822     -    -3 |
   21 |   216    19   -51    60  -111    58-10371   122  1360     -   151 |
   22 | -5169   101   -41  -242   127    68   280    83 -4904     -  -208 |
   24 |   125   -42   -62    77    50   -50 -1073    41   605     -     - |
   25 | -2392    78   -52  -134    30  -154  4455    87 -1733     -  -114 |
   26 |  -830   -43  -127   -47   103   -65  4245   110  -747     -   -69 |
   27 |   -97   -67  -133   188   186  -212  1350  -119  -396     -    47 |
   28 |  4521    30    29   -31  -266    93 -1735    77  4228     -   190 |
   29 | -3390    12   -12  -136   -18    75 -4316   111 -2976     -    99 |
   30 |  -431   112  -160   -18   120    11 -1470   112 -1428     -  -105 |
   31 |-10622   -54    34   302   -88  -142  2072  -115 -9238     -   -22 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -     9     -     -     -     -    -7     -     -     - |
 ALGO |     -     -   -40     X     -     -     -    61     -     -   -53 |
 AMC2 |     -   -74   148     -     -     -     -   -54     -     -     - |
 ARTU |     -    91     -    51    32     -     -  -112     -     -     - |
 ASC1 |     -   -33     -     -  -105     -     -     -     -     -   181 |
 AUCK |     -    -3     -     X     -     -     -     -     -     -     3 |
 BAHR |     -   -53   -38     -    67     -     -    13     -     -     - |
 BILI |     -    12     -     -    67     -     -   -63     -     -     - |
 BOR1 |     -    28   -28     -     -     -     -     -     -     -     - |
 BRUS |     -    67    46     -     -     -     -   -82     -     -     - |
 CAS1 |     -    -7     -   147  -124     -     -    64     -     -   -30 |
 CEDU |     -  -163     -   159     -     -     -    54     -     -     - |
 CHAT |     -   -48     -     -    43     -     -     -     -     -     - |
 CHUR |     -   -19    19     -     -     -     -     -     -     -     - |
 COCO |     -   -43     -   132    17     -     -     -     -     -   -60 |
 CRO1 |     -     -    15    79   -79     -     -    28     -     -   -11 |
 DARW |     -     -   138     -     -     -     -  -100     -     -     - |
 DAV1 |     -    53     -     -   -95     -     -    59     -     -   -33 |
 DRAO |     -     4   -93     -     -     -     -    70     -     -    -8 |
 DWH1 |     -   210    93     -     -     -     -  -219     -     -     - |
 FAIR |     -    59   100    78    -6     -     -  -194     -     -    86 |
 FORT |     -   285    64     -  -146     -     -     -     -     -  -109 |
 GLPS |     -     0     -    79   -12     -     -   -22     -     -     - |
 GODE |     -  -140   -20   289     -     -     -     -     -     -     - |
 GOLD |     -   -22     -    -1     -     -     -    16     -     -     - |
 GUAM |     -     -     -  -259    41     -     -   -59     -     -   215 |
 GUAT |     -   164     -     -  -146     -     -     -     -     -     - |
 HOB2 |     -    18   -42     -     -     -     -     -     -     -    29 |
 HOFN |     -     -     -     -   -72     -     -    58     -     -     - |
 HRAO |     -   -43     -     -   -41     -     -    64     -     -     - |
 IENG |     -   -55    54     -     -     -     -     -     -     -     - |
 IISC |     -    16     -    42   -35     -     -     -     -     -     - |
 JAB1 |     -    -1     -     3     -     -     -     -     -     -     - |
 KERG |     -    60     5  -128    19     -     -     -     -     -   -18 |
 KGN0 |     -   -39    39     -     -     -     -     -     -     -     - |
 KIRU |     -    -5     -     0     -     -     -     4     -     -     - |
 KOKB |     -     -   114     -   -17     -     -     -     -     -  -115 |
 KOUR |     -    10     -  -187    83     -     -     -     -     -     - |
 LAE1 |     -   -20     -     -   -27     -     -    36     -     -     - |
 LHAS |     -    15     -  -107    39     -     -     -     -     -     - |
 MAC1 |     -   -96     -    90  -143     -     -   149     -     -     - |
 MALI |     -     -     -  -104     -     -     -     -     -     -    69 |
 MAS1 |     -   -99   221  -154     -     -     -    17     -     -   -74 |
 MATE |     -    34     -     -     -     -     -     -     -     -   -40 |
 MAW1 |     -    67     -     -   -60     -     -     -     -     -     - |
 MCM4 |     -   385     -     -  -262     -     -     -     -     -  -107 |
 MDO1 |     -   -20   -33     -    48     -     -     -     -     -     - |
 METS |     -   -98    97     -     -     -     -     -     -     -     - |
 MIZU |     -     -   206  -373     -     -     -     -     -     -     - |
 MKEA |     -     -     -   -12     -     -     -     5     -     -     - |
 NKLG |     -     -     -   -32   -76     -     -     -     -     -   123 |
 NLIB |     -     -   -53     -     -     -     -   108     -     -  -116 |
 NNOR |     -     -   249    55     -     -     -  -203     -     -     - |
 NRC1 |     -   -26   -33     -    66     -     -   -11     -     -     - |
 NRIL |     -    52     -     -   -53     -     -     6     -     -     - |
 NSSP |     -   -37     -     -     -     -     -    27     -     -     - |
 ONSA |     -   -62   -27   159     -     -     -     -     -     -     - |
 PDEL |     -    71     -     -   -97     -     -    27     -     -     - |
 PERT |     -    20    30  -554   227     -     -     -     -     -   -19 |
 PETP |     -  -131     -     -    15     -     -    83     -     -     - |
 PIE1 |     -    47   106     X     -     -     -   -80     -     -   -52 |
 POTS |     -   -66     -     -    59     -     -     -     -     -     - |
 PTBB |     -   -29    29     -     -     -     -     -     -     -     - |
 RIOG |     -   -44    43   127   -58     -     -     -     -     -    -6 |
 SANT |     -    64     -  -393    52     -     -     -     -     -    73 |
 STJO |     -     -   -11     -     -     -     -     8     -     -     - |
 SUTM |     -     -     -     -    22     -     -   -18     -     -     - |
 THTI |     -     -     -  -332  -159     -     -     -     -     -   267 |
 THU3 |     -   -96    -2     -    43     -     -     -     -     -    59 |
 TRO1 |     -  -115     -     -   103     -     -     -     -     -     - |
 UNSA |     -     -     -   -33     -     -     -    13     -     -     - |
 URUM |     -  -104     -     -     -     -     -     -     -     -   125 |
 USN1 |     -   294     -     -     -     -     -  -213     -     -     - |
 USNO |     -   -63    28     -     -     -     -     -     -     -    42 |
 USUD |     -     -     -     6     -     -     -   -35     -     -    54 |
 VILL |     -   -24     -     X     -     -     -     -     -     -    29 |
 WTZR |     -   -67     -    82     -     -     -     -     -     -    25 |
 WUHN |     -     -     -     -    72     -     -     -     -     -   -97 |
 YAKT |     -   -42     -     -     -     -     -    30     -     -     - |
 YELL |     -   -35    40    60   -33     -     -     -     -     -     - |
 ZAMB |     -   -39     -     -    35     -     -     -     -     -     - |
 ZWEN |     -     -     -   -99    19     -     -     -     -     -    40 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6449    48    31    32    32    56  4439    57  6876     -    31 |  288   4.62
    3 |  2452    71    77   111    45    60  2726    60  2276     -   110 |  288   1.81
    4 |  2160    45    26    38    21    58  2592    22  1604     -    33 |  288   0.70
    5 |  4931    43    25    54    20    70  5068    24  3645     -    47 |  288   1.99
    6 |  5105    65    84   123    67   118 10451    56  3747     -   106 |  288   1.21
    7 |  1346   111    54    78    78   106   706    47  1021     -    79 |  288   0.80
    8 |  5141    49    30    33    38    46  2025    18  5815     -    28 |  288   4.92
    9 |  2624    22    39    45    29    39  2225    49  2305     -    42 |  288   1.53
   10 |  2857    52    27    52    24    33  3816    34  2930     -    25 |  288   2.54
   11 |  2306    32    23    42    36    49  2268    27  1957     -    36 |  288   1.03
   13 |   918    61    30    37    21    66  1060    23   876     -    56 |  288   0.24
   14 |   772    56    53    72    30    99     X     X   762     -    74 |  288   0.23
   15 |  5941    37    75    33    58    47  5270    36  5452     -    72 |  288   3.35
   16 |  1293    52    31   100    18    43   644    68  1114     -    53 |  288   0.32
   17 |  2910    35    29    44    18    57   595    33  2634     -    57 |  288   0.63
   18 |   871    49    38    35    30    61   709    34   756     -    30 |  288   0.36
   19 |   628    59    38    90    39   143  9998    45   864     -    45 |  288   0.62
   20 |   795    54    58    47    24    25   402    28  1193     -    44 |  288   0.33
   21 |  2157    58    24    48    18    57  4037    49  2203     -    99 |  288   0.47
   22 |  2429    49    30    35    36    64   364    35  2150     -    37 |  288   0.35
   24 |  3308    22    30    71    48    48  2126    28  3004     -     - |  288   1.83
   25 |  2370    31    98    66    67    76  2848    37  1943     -    38 |  288   1.02
   26 |  1415    31    22    63    27    56  2168    37  1241     -    59 |  288   0.56
   27 |  1315    43    39    57    36    62  1045    18  1192     -    81 |  288   0.51
   28 |   995    61    60    36    28    30   704    42   890     -    25 |  288   0.50
   29 |  1428    37    26    46    28    33  2530    41  1342     -    35 |  288   0.71
   30 |  2458    47    20    60    34    33  2152    46  1862     -    36 |  288   0.88
   31 |  1798    87   102   130   112   117  2093    77  2511     -   119 |  288   1.34
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    45     -     -     -     -    33     -     -     - |  288   0.15
 ALGO |     -     -    16     X     -     -     -    18     -     -    29 |  288   0.03
 AMC2 |     -    31    17     -     -     -     -    27     -     -     - |  288   0.05
 ARTU |     -    25     -    27    26     -     -    14     -     -     - |  288  12.31
 ASC1 |     -    39     -     -    14     -     -     -     -     -    44 |  288    >>>
 AUCK |     -    28     -     X     -     -     -     -     -     -    33 |  264  14.84
 BAHR |     -    19    21     -    32     -     -    31     -     -     - |  288   0.44
 BILI |     -    34     -     -    18     -     -    19     -     -     - |  286   7.96
 BOR1 |     -    21    21     -     -     -     -     -     -     -     - |  288   0.71
 BRUS |     -    30    28     -     -     -     -    26     -     -     - |  288   0.03
 CAS1 |     -    31     -    54    26     -     -    29     -     -    39 |  288   8.36
 CEDU |     -    24     -    73     -     -     -    29     -     -     - |  288  13.55
 CHAT |     -    22     -     -    20     -     -     -     -     -     - |  287  13.39
 CHUR |     -    25    25     -     -     -     -     -     -     -     - |  288  10.72
 COCO |     -    41     -    66    61     -     -     -     -     -    71 |  288   8.14
 CRO1 |     -     -    24    56    28     -     -    38     -     -    36 |  285  17.59
 DARW |     -     -    36     -     -     -     -    26     -     -     - |  288   3.39
 DAV1 |     -    22     -     -    15     -     -    30     -     -    27 |  288  14.44
 DRAO |     -    27    17     -     -     -     -    22     -     -    19 |  288   0.06
 DWH1 |     -    43    35     -     -     -     -    21     -     -     - |  288   0.41
 FAIR |     -    58    34    28    17     -     -    21     -     -    22 |  288   0.11
 FORT |     -   109    39     -    42     -     -     -     -     -    67 |  288   0.08
 GLPS |     -    18     -    84    36     -     -    18     -     -     - |  288  20.00
 GODE |     -    17    22    40     -     -     -     -     -     -     - |  288   0.52
 GOLD |     -    30     -    41     -     -     -    24     -     -     - |  288  16.89
 GUAM |     -     -     -    68    44     -     -    44     -     -    34 |  288  14.82
 GUAT |     -    26     -     -    23     -     -     -     -     -     - |  282    >>>
 HOB2 |     -    44    37     -     -     -     -     -     -     -    26 |  288   0.07
 HOFN |     -     -     -     -    24     -     -    19     -     -     - |  288    >>>
 HRAO |     -    62     -     -    33     -     -    28     -     -     - |  286    >>>
 IENG |     -    38    37     -     -     -     -     -     -     -     - |  288   0.94
 IISC |     -    31     -    76    25     -     -     -     -     -     - |  288  26.73
 JAB1 |     -    26     -    47     -     -     -     -     -     -     - |  288  16.87
 KERG |     -    49    23    41    54     -     -     -     -     -    26 |  288   1.40
 KGN0 |     -    39    39     -     -     -     -     -     -     -     - |  287   0.32
 KIRU |     -    17     -    27     -     -     -    17     -     -     - |  288   8.40
 KOKB |     -     -    38     -    37     -     -     -     -     -    28 |  288   0.11
 KOUR |     -    36     -    86    33     -     -     -     -     -     - |  288   1.71
 LAE1 |     -    27     -     -    32     -     -    25     -     -     - |  287  12.86
 LHAS |     -    33     -    83    24     -     -     -     -     -     - |  288   8.67
 MAC1 |     -    56     -    91    36     -     -    29     -     -     - |  288  14.06
 MALI |     -     -     -    57     -     -     -     -     -     -    38 |  288  25.30
 MAS1 |     -    30    20    36     -     -     -    32     -     -    26 |  288   1.76
 MATE |     -    17     -     -     -     -     -     -     -     -    20 |  288   0.10
 MAW1 |     -    34     -     -    30     -     -     -     -     -     - |  282  26.91
 MCM4 |     -    38     -     -    22     -     -     -     -     -    24 |  276   4.26
 MDO1 |     -    31    13     -    31     -     -     -     -     -     - |  288  12.72
 METS |     -    18    18     -     -     -     -     -     -     -     - |  287  11.60
 MIZU |     -     -    56   101     -     -     -     -     -     -     - |  288   0.37
 MKEA |     -     -     -    61     -     -     -    24     -     -     - |  288  30.83
 NKLG |     -     -     -    93    24     -     -     -     -     -    45 |  287    >>>
 NLIB |     -     -    52     -     -     -     -    18     -     -    72 |  288 562.16
 NNOR |     -     -    21    77     -     -     -    32     -     -     - |  288  11.99
 NRC1 |     -    27    27     -    33     -     -    16     -     -     - |  288   0.02
 NRIL |     -    28     -     -    20     -     -    15     -     -     - |  279   9.11
 NSSP |     -    46     -     -     -     -     -    33     -     -     - |  288  13.02
 ONSA |     -    33    44    39     -     -     -     -     -     -     - |  288   0.04
 PDEL |     -    42     -     -    48     -     -    30     -     -     - |  288  52.44
 PERT |     -    50    22    60    21     -     -     -     -     -    23 |  288   2.35
 PETP |     -    59     -     -    35     -     -    24     -     -     - |  287  10.20
 PIE1 |     -    42    47     X     -     -     -    29     -     -    27 |  288   0.03
 POTS |     -    30     -     -    27     -     -     -     -     -     - |  288  24.47
 PTBB |     -    25    25     -     -     -     -     -     -     -     - |  287   0.29
 RIOG |     -    35    25    99    39     -     -     -     -     -    44 |  288  14.54
 SANT |     -    73     -   121    44     -     -     -     -     -    46 |  288  49.83
 STJO |     -     -    18     -     -     -     -    13     -     -     - |  288   0.09
 SUTM |     -     -     -     -    20     -     -    16     -     -     - |  288   1.59
 THTI |     -     -     -    79    40     -     -     -     -     -    41 |  288   6.40
 THU3 |     -    11    18     -    27     -     -     -     -     -    30 |  288   8.18
 TRO1 |     -    35     -     -    31     -     -     -     -     -     - |  288   8.89
 UNSA |     -     -     -    73     -     -     -    29     -     -     - |  288  20.41
 URUM |     -    14     -     -     -     -     -     -     -     -    17 |  288  17.08
 USN1 |     -    23     -     -     -     -     -    17     -     -     - |  287   0.04
 USNO |     -    22    27     -     -     -     -     -     -     -    18 |  288   0.05
 USUD |     -     -     -    69     -     -     -    25     -     -    32 |  284  10.09
 VILL |     -    13     -     X     -     -     -     -     -     -    16 |  288   4.08
 WTZR |     -    12     -    29     -     -     -     -     -     -    22 |  288   0.07
 WUHN |     -     -     -     -    31     -     -     -     -     -    42 |  287  15.99
 YAKT |     -    33     -     -     -     -     -    24     -     -     - |  288   0.64
 YELL |     -    38    22    24    17     -     -     -     -     -     - |  288   0.09
 ZAMB |     -    55     -     -    49     -     -     -     -     -     - |  288  12.05
 ZWEN |     -     -     -    60    35     -     -     -     -     -    29 |  288  13.99
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2906    43    40    66    37    68  2836    31  2754     -    49 |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288   13.13   | 3.48e-14  9.66e-15  2.15e-15 |
 BRUS |   288     0     0   288   13.13   | 4.10e-14  6.57e-15  1.67e-15 |
 AMC2 |   288     0     0   288   13.13   | 3.75e-14  8.51e-15  1.95e-15 |
 USNO |   288     0     0   288   12.75   | 3.85e-14  1.04e-14  2.34e-15 |
 NRC1 |   288     0     0   288    6.38   | 3.88e-14  6.93e-15  3.63e-15 |
 PIE1 |   288     0     0   288    6.37   | 3.25e-14  4.98e-15  2.13e-15 |
 ALGO |   288     1     0   287    4.73   | 2.93e-14  6.09e-15  3.43e-15 |
 USN1 |   287     0     0   286    4.57   | 7.77e-14  1.66e-14  3.20e-15 |
 YELL |   288     0     0   288    4.40   | 3.07e-14  5.93e-15  4.92e-15 |
 ALBH |   288     0     0   288    3.38   | 4.64e-14  1.17e-14  1.05e-14 |
 WTZR |   288     0     0   288    3.16   | 3.36e-14  1.47e-14  6.31e-15 |
 NLIB |   288     1     0   287    2.29   | 5.00e-14  1.07e-14  2.02e-15 |
 HOB2 |   288     0     0   288    2.15   | 3.97e-14  1.09e-14  4.92e-15 |
 KOKB |   288     0     0   288    2.03   | 6.05e-14  1.37e-14  5.16e-15 |
 STJO |   288     0     0   288    1.81   | 4.06e-14  1.15e-14  5.62e-15 |
 DRAO |   288     0     0   288    1.60   | 6.31e-14  1.83e-14  2.42e-15 |
 MATE |   288     0     0   143    1.51   | 3.69e-14  1.42e-14  5.67e-15 |
 FAIR |   288     0     0   288    0.81   | 6.03e-14  1.60e-14  6.92e-15 |
 GODE |   288     0     0   288    0.29   | 4.94e-14  4.53e-14  3.48e-14 |
 PTBB |   287     0     0   286    0.25   | 3.34e-13  8.71e-14  1.95e-14 |
 FORT |   288     0     0   143    0.18   | 7.50e-14  2.49e-14  9.17e-15 |
 G17  |   288     0     0   288    0.18   | 3.87e-13  1.31e-13  4.09e-14 |
 MIZU |   288     0     0   288    0.17   | 3.52e-13  9.79e-14  2.92e-14 |
 BAHR |   288     0     0   288    0.17   | 3.44e-13  7.13e-14  3.71e-14 |
 G16  |   288     0     0   288    0.17   | 4.86e-13  6.65e-14  3.54e-14 |
 KGN0 |   287     0     0   286    0.14   | 3.23e-13  1.06e-13  3.00e-14 |
 G26  |   288     0     0   288    0.13   | 3.33e-13  1.19e-13  4.54e-14 |
 G19  |   288     0     0   288    0.11   | 5.73e-13  7.86e-14  3.64e-14 |
 BOR1 |   288     0     0   288    0.08   | 4.74e-13  1.28e-13  7.38e-14 |
 G27  |   288     0     0   288    0.08   | 3.32e-13  1.11e-13  4.05e-14 |
 IENG |   288     0     0   288    0.08   | 5.24e-13  1.50e-13  6.87e-14 |
 DWH1 |   288     0     0   288    0.08   | 4.92e-13  1.76e-13  4.12e-14 |
 G30  |   288     0     0   288    0.07   | 3.27e-13  1.05e-13  1.00e-13 |
 G29  |   288     0     0   288    0.07   | 3.91e-13  1.11e-13  8.10e-14 |
 YAKT |   288     0     0   288    0.07   | 4.75e-13  1.38e-13  4.73e-14 |
 G04  |   288     0     0   288    0.06   | 4.52e-13  1.27e-13  8.10e-14 |
 G11  |   288     0     0   191    0.05   | 6.67e-13  7.78e-14  1.02e-13 |
 G07  |   288     0     0   288    0.05   | 2.85e-13  9.61e-14  1.02e-13 |
 G13  |   288     0     6    23    0.04   | 5.75e-13  6.68e-14  1.88e-14 |
 G06  |   288     0     0   288    0.03   | 4.69e-13  1.59e-13  9.89e-14 |
 G28  |   288     0     5    24    0.03   | 5.61e-13  6.80e-14  3.17e-14 |
 HRAO |   286     0     0   285    0.02   | 1.24e-13  2.71e-14  7.31e-14 |
 G31  |   288     0     0   288    0.02   | 2.35e-13  1.72e-13  1.17e-13 |
 G09  |   288     0     0   288    0.02   | 1.27e-12  4.55e-13  1.44e-13 |
 G05  |   288     0     0   288    0.01   | 1.47e-12  3.72e-13  1.99e-13 |
 G24  |   288     0     0   288    0.01   | 1.23e-12  4.02e-13  2.37e-13 |
 KOUR |   288     0     0   288    0.01   | 1.37e-12  4.32e-13  1.33e-13 |
 G10  |   288     0     0   288    0.01   | 1.16e-12  3.74e-13  2.93e-13 |
 PERT |   288     0     0   288    0.01   | 1.96e-12  7.51e-13  2.59e-13 |
 KERG |   288     0     0   143    0.00   | 1.35e-12  4.04e-13  1.15e-13 |
 G25  |   288     0     6    32    0.00   | 1.59e-12  4.50e-13  8.61e-14 |
 SUTM |   288     0     0   288    0.00   | 6.66e-13  2.20e-13  1.71e-13 |
 MCM4 |   276     0     0   228    0.00   | 6.39e-13  2.28e-13  2.58e-13 |
 GPST |   288     0     0     0    0.00   | 1.78e-14  3.85e-15  2.32e-15 |
 NRIL |   279     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     1     0     0    0.00   |        -         -         - |
 G22  |   288     0     6     0    0.00   | 5.45e-13  6.16e-14  2.30e-14 |
 G21  |   288     0     6     0    0.00   | 8.98e-13  1.02e-13  3.32e-14 |
 G20  |   288     0     6     0    0.00   | 6.69e-13  7.63e-14  2.34e-14 |
 G18  |   288     0     6     0    0.00   | 1.15e-12  1.09e-13  3.78e-14 |
 G15  |   288     0     0     0    0.00   | 1.62e-12  5.47e-13  4.35e-13 |
 G14  |   288     0     5     0    0.00   | 5.61e-13  6.65e-14  2.43e-14 |
 G08  |   288     0     0     0    0.00   | 4.29e-13  3.73e-13  6.25e-13 |
 G03  |   288     0     0     0    0.00   | 1.21e-12  3.92e-13  1.32e-13 |
 G01  |   288     0     0     0    0.00   | 1.68e-12  6.20e-13  3.80e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.12e-12  1.15e-12  4.44e-13 |
 USUD |   284     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.73e-13  1.38e-13  4.17e-13 |
 SANT |   288     1     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 8.06e-13  8.91e-13  1.24e-12 |
 MAW1 |   282     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.73e-12  4.48e-13  1.28e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   282     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.31e-13  4.58e-13  2.65e-13 |
 CRO1 |   285     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.58e-17  3.09e-16  1.84e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      PIE1      BRUS |
------------------------------------------+------------------------------+
