
 GPS week: 1265   Day: 1   MJD: 53100                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0     0.17    -0.44     3.78     0.00
 cod |   288     0  26074     22    -0.05    -0.13     0.05    17.02
 emr |   288     0  22024    272  2744.78    27.21     0.04    21.76
 esa |   288     0  18880    508  2744.21    27.16     0.06    10.98
 gfz |   288     0  21504    289     0.18    -0.73     0.04    17.90
 iga |    96     0   2592      1     0.15    -0.40     0.08     0.00
 igu |    96     0   2688      0     0.15    -0.43     4.13     0.00
 jpl |   288     0  15989      8    -3.81    -0.27     0.05    15.54
 ngs |    96     0   2688      0     0.17    -0.45     3.64     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  34481   1586    10.56    13.11     0.05    16.80

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -3781   -59  -108    46   178   -36  -298  -108 -3752     -   -18 |
    3 |  2837    44    17   146    35    32 15542   -94  2208     -   -95 |
    4 |  3944   -64   -99   144   136   -25  1748    81  3462     -  -118 |
    5 | -5019    89   -58    97  -187    61-14244   216 -5545     -   -75 |
    6 |  -219     2   -19    61   -12    57-12094    28  -325     -   -29 |
    7 | -1910     1   -68    69   -37    16    72   115 -1950     -   -23 |
    8 | -2362   -30   -73    82   116   -74  8377    35 -2234     -   -83 |
    9 | -7293    79   -27    29   132     4 -3579   139 -7105     -  -208 |
   10 | -6563     8   -86   161   181    29 -6348     - -6615     -  -200 |
   11 |  3297    54   -52   327  -137     9   662   -19  3219     -   -53 |
   13 |  3493   177  -130   -60    78    -7  1553   -26  3776     -   -55 |
   14 |  2673   190    14  -103  -263   -33    49   152  2800     -    -1 |
   15 |  -299  -149     6   -25   171    39 -5208    29   -82     -   -23 |
   16 |  2954    72   -62  -115     7  -115  2719    65  3275     -    16 |
   17 | -2453    84   -11  -120   135    37   879   233 -2714     -  -142 |
   18 |  2118    32    13    15   -25    10   812    36  2363     -   -34 |
   19 |  9081  -251     X   262    72   286 -1570   362  8648     -     X |
   20 |  4483   -30   -62   254  -117   -66  1160   279  4483     -  -187 |
   21 |  2363   -81    36   335  -261    87  1699   -12  2505     -    94 |
   22 | -2170   161    45  -215  -194    84 -3333    34 -2631     -    87 |
   24 | -6344     4   -28  -236   298   -15  1749   124 -5488     -  -135 |
   25 |  3472   -12   -50  -134   132  -253  9051    68  3984     -   -39 |
   26 | -2326     6   -53  -107   175    70   726   107 -2289     -  -152 |
   27 |  -421    -5  -157   121   166  -180  -868   127  -357     -  -162 |
   28 |  -524   -58  -106    32    54   171  2376    25    31     -    95 |
   29 |  -587    64     6     X   -20     -  -794    25  -584     -   -52 |
   30 |    66   108    38   -99  -126  -100 -1902    28  -662     -    40 |
   31 |  1490    -6    33   -31   -15   -86  1065   -11  1579     -     X |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -   -25     -     -     -     -   -36     -     -    66 |
 ALGO |     -     -  -142   485     -     -     -    68     -     -  -196 |
 ALIC |     -   -58     -    90     -     -     -     -     -     -     - |
 AMC2 |     -  -182   164     -     -     -     -  -106     -     -    71 |
 ARTU |     -    92     -     7   -23     -     -   -79     -     -     - |
 ASC1 |     -  -230     -     -  -150     -     -     -     -     -   505 |
 ASPA |     -     -     -     -   155     -     -  -243     -     -    54 |
 BAHR |     -   -85    12     -    99     -     -     -     -     -   -35 |
 BILI |     -     -     -     -   308     -     -  -355     -     -     - |
 BOR1 |     -    45    46     -     -     -     -     -     -     -  -105 |
 BREW |     -     -   -28     -     -     -     -     -     -     -    36 |
 BRMU |     -     -     -     -   -11     -     -     -     -     -    11 |
 BRUS |     -    57   -27     -     -     -     -    10     -     -   -32 |
 CAGZ |     -    -6     -     -     -     -     -     -     -     -     6 |
 CAS1 |     -    81     -    49   -69     -     -     -     -     -   -42 |
 CEDU |     -  -179     -   195     -     -     -    24     -     -    33 |
 CHUR |     -    64   130     -     -     -     -     -     -     -  -232 |
 COCO |     -    20     -    73   114     -     -     -     -     -  -189 |
 CRO1 |     -    31    51  -104   -21     -     -    20     -     -   -25 |
 DARW |     -     -    50     -     -     -     -   -70     -     -     - |
 DAV1 |     -   121     -     -   -90     -     -    73     -     -  -102 |
 DRAO |     -     -  -166     -     -     -     -   199     -     -    34 |
 DWH1 |     -   109    48     -     -     -     -  -172     -     -   -14 |
 FAIR |     -     -     1     2  -179     -     -    91     -     -    91 |
 FORT |     -   169     -     -  -239     -     -     -     -     -   109 |
 GLPS |     -    26     -   -42    73     -     -   -82     -     -     - |
 GMAS |     -     -    91     -     -     -     -  -128     -     -     X |
 GODE |     -   -60    81  -231     -     -     -     -     -     -   106 |
 GOLD |     -     -     -  -120     -     -     -    77     -     -     9 |
 GUAM |     -     6     -   -41   103     -     -  -222     -     -   124 |
 GUAT |     -  -107     -     -   -83     -     -     -     -     -   197 |
 HERS |     -     -  -245     -     -     -     -     -     -     -   317 |
 HOB2 |     -   -43    49     -     -     -     -     -     -     -   -19 |
 HOFN |     -     -     -     -   -70     -     -    81     -     -     - |
 HRAO |     -   -74     -     -     -     -     -    12     -     -    63 |
 IENG |     -   -84    65     -     -     -     -     -     -     -     - |
 IISC |     -     -     -   104   -53     -     -     -     -     -   -12 |
 JAB1 |     -    19     -   -29     -     -     -     -     -     -     - |
 JPLM |     -     -   -95     -     -     -     -     -     -     -   122 |
 KERG |     -    35   128   -15  -102     -     -     -     -     -   -84 |
 KGN0 |     -   -37   -28     -     -     -     -     -     -     -    73 |
 KIRU |     -   -41     -     4     -     -     -    17     -     -    24 |
 KIT3 |     -     -     -     -   -52     -     -    60     -     -    -1 |
 KOKB |     -     -   -95     -   -82     -     -     7     -     -   204 |
 KOSG |     -   -20     -     -     -     -     -     -     -     -    21 |
 KOUR |     -     -     -   -45   -15     -     -    11     -     -    34 |
 KUNM |     -     -     -     -     -     -     -  -134     -     -   124 |
 LHAS |     -     -     -  -107     -     -     -     -     -     -    70 |
 LPGS |     -    70   131  -514     X     -     -     -     -     -    98 |
 MAC1 |     -   -28     -    22   -81     -     -    78     -     -    33 |
 MADR |     -     -     -     -     -     -     -   -64     -     -    60 |
 MALI |     -   247     -  -293     -     -     -     -     -     -   -36 |
 MAS1 |     -  -108   235  -111     -     -     -     -     -     -  -123 |
 MAW1 |     -   122     -     -   -21     -     -     -     -     -  -101 |
 MCM4 |     -   367   120     -  -484     -     -     -     -     -     - |
 MDO1 |     -   -73   -61     -    29     -     -     -     -     -   122 |
 MEDI |     -     -     8     -     -     -     -     -     -     -   -10 |
 METS |     -   -20    89     -     -     -     -     -     -     -   -95 |
 MIZU |     -     -   -43     -     -     -     -     -     -     -    56 |
 NKLG |     -  -141     -   -10    60     -     -     -     -     -    68 |
 NLIB |     -     -    39     -     -     -     -   -17     -     -   -35 |
 NNOR |     -     -   105   -62     -     -     -   -64     -     -   -37 |
 NPLD |     -   -53    70     -     -     -     -     -     -     -   -37 |
 NRC1 |     -     -   -13     -    24     -     -   -16     -     -     5 |
 NRIL |     -     -     -     -   -55     -     -    64     -     -     - |
 NSSP |     -  -138     -     -     -     -     -     -     -     -   140 |
 NYA1 |     -     -     -     -  -203     -     -     -     -     -   216 |
 NYAL |     -     -    45     -     -     -     -     -     -     -   -58 |
 ONSA |     -     -   -42    83     -     -     -     -     -     -     - |
 PDEL |     -     -     -     -   -76     -     -    87     -     -     - |
 PERT |     -     -    39  -136   131     -     -     -     -     -  -102 |
 PETP |     -  -104     -     -    57     -     -    49     -     -     - |
 PIE1 |     -     -    54  -200     -     -     -    51     -     -     X |
 PIMO |     -     -     -   153   -94     -     -     -     -     -     X |
 POL2 |     -   -74     -     -     -     -     -     -     -     -    74 |
 POTS |     -    16     -     -    33     -     -     -     -     -   -52 |
 PRDS |     -     -   -46     -     -     -     -     -     -     -    60 |
 PTBB |     -    41    11     -     -     -     -     -     -     -   -56 |
 QAQ1 |     -     -     0     -     -     -     -     -     -     -     1 |
 RBAY |     -     -     -    26     -     -     -     -     -     -   -17 |
 SANT |     -   430     -   -14     3     -     -     -     -     -  -429 |
 SCH2 |     -     -    52     -     -     -     -     -     -     -   -67 |
 SEY1 |     -     -     -     -   260     -     -     -     -     -  -277 |
 SFER |     -  -231    71     -     -     -     -     -     -     -   142 |
 SPT0 |     -   -80    63     -     -     -     -     -     -     -     - |
 STJO |     -   -60   -48     -     -     -     -    36     -     -    90 |
 STR1 |     -     -   -30     -     -     -     -     -     -     -    38 |
 SUTM |     -     -     -     -   -42     -     -    49     -     -     - |
 THTI |     -     -   -10   -58    38     -     -     -     -     -    10 |
 THU3 |     -     8     -     -    42     -     -     -     -     -   -53 |
 TID1 |     -     -     -     -     -     -     -    31     -     -   -29 |
 TIDB |     -    31     -   -42     -     -     -     -     -     -    -4 |
 TOW2 |     -   -62     -     -   100     -     -   -47     -     -     - |
 TRO1 |     -  -100     -     -    65     -     -     -     -     -    33 |
 TSKB |     -   -88    29     -    19     -     -     -     -     -    32 |
 TWTF |     -   -98     -     -     -     -     -   -98     -     -   189 |
 UNSA |     -     -     -   105   126     -     -   -74     -     -  -127 |
 URUM |     -   -52     -     -     -     -     -     -     -     -    53 |
 USN1 |     -   234     -     -     -     -     -  -347     -     -    86 |
 USNO |     -   -63    12     -     -     -     -     -     -     -    47 |
 USUD |     -     -     -   101     -     -     -     -     -     -   -66 |
 VILL |     -    19     -   -13     -     -     -     -     -     -   -11 |
 WHIT |     -   -62     -     -     -     -     -     -     -     -    63 |
 WSRT |     -    41     -     -     -     -     -     -     -     -   -41 |
 WTZR |     -    87     -  -195     -     -     -     -     -     -    39 |
 WUHN |     -     -     -     -  -121     -     -     -     -     -   129 |
 YAKT |     -     -     -     -     -     -     -  -145     -     -   134 |
 YELL |     -     1    46   -46   -18     -     -     -     -     -   -11 |
 ZAMB |     -   -37     -     -    36     -     -     -     -     -     - |
 ZWEN |     -  -105     -   -23   109     -     -     -     -     -     6 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4915    44    31    34    20    51  2652    59  4839     -    58 |  288   4.71
    3 |  5520    69    33   181    60    83  9260    41  4859     -    65 |  288   2.37
    4 |  2139    30    45    48    42    62   855    59  2276     -    88 |  288   0.56
    5 |  6869    62    29    49    30    35  9174    30  6628     -    42 |  288   2.41
    6 |  1655    54    22    34    36    53  7267    87  1741     -    69 |  288   1.18
    7 |  1177    41    18    69    31    78  1215    35  1127     -    29 |  288   0.87
    8 |  8548    41    38    37    31    54  9470    37  8479     -    71 |  288   4.16
    9 |  3628    21    42    36    22    71  3311    70  3651     -    71 |  288   1.48
   10 |  5686   131    86   144    85    77  5066     -  5668     -    47 |  288   1.91
   11 |  1217    28    46    63    41    85   396    76  1254     -    47 |  288   0.41
   13 |   718    49    63    58    24    51   533    75   796     -    37 |  288   0.27
   14 |   924    48    76    86    60    81   658    70   979     -    37 |  288   0.26
   15 |  3422    31    32    31    52    58  3360    68  3382     -    83 |  288   3.55
   16 |   603   101    23    38    54    71  1228    74   695     -    60 |  288   0.32
   17 |  1753    57    34    37    24    54   709    88  1730     -    54 |  288   0.89
   18 |   497    57    58    77    43    94   413    51   711     -    38 |  288   0.33
   19 |  2227    39     X    91    67   162  2196   168  2188     -     X |  288   0.46
   20 |   727    48    20    52    49    60   363    53   708     -    43 |  288   0.29
   21 |  1152    43    26    39    51    62   870    40  1102     -    43 |  288   0.25
   22 |  4443    64    36    75    45   112  2832    39  3974     -    52 |  288   0.34
   24 |  6599    42    35    31    36    88  4627    84  6234     -    36 |  288   2.55
   25 |  7671    34    44    37    30    54  7926    55  7283     -    28 |  288   2.80
   26 |   708    38    25    69    25    61   671    51   668     -    31 |  288   0.65
   27 |  1047    28    45    43    19    43   541    63  1086     -    70 |  288   0.53
   28 |  2610    61    54    77    30   109  2012    43  2914     -    40 |  288   0.79
   29 |   815    53    38     X    35     -  1275    58   858     -    71 |  288   0.54
   30 |  4178    51    22    33    30   126  1731    67  3497     -    32 |  288   0.83
   31 |   802    33    25    67    41    49  1329    61   839     -     X |  288   0.75
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -     9     -     -     -     -    28     -     -    26 |  288   0.10
 ALGO |     -     -     8    21     -     -     -    18     -     -    20 |  288   0.04
 ALIC |     -    18     -    28     -     -     -     -     -     -     - |  288  14.07
 AMC2 |     -    30    25     -     -     -     -    25     -     -    27 |  288   0.05
 ARTU |     -    41     -    40    21     -     -    31     -     -     - |  288   9.92
 ASC1 |     -    73     -     -    50     -     -     -     -     -    71 |  288    >>>
 ASPA |     -     -     -     -    34     -     -    30     -     -    30 |  288    >>>
 BAHR |     -    27    27     -    38     -     -     -     -     -    31 |  288   0.28
 BILI |     -     -     -     -    10     -     -    12     -     -     - |  211   6.63
 BOR1 |     -    35    18     -     -     -     -     -     -     -    25 |  288   0.78
 BREW |     -     -    13     -     -     -     -     -     -     -    17 |  288   0.07
 BRMU |     -     -     -     -    50     -     -     -     -     -    53 |  276    >>>
 BRUS |     -    32    31     -     -     -     -    34     -     -    14 |  288   0.02
 CAGZ |     -    21     -     -     -     -     -     -     -     -    21 |  288   0.52
 CAS1 |     -    67     -    67    30     -     -     -     -     -    32 |  288   7.98
 CEDU |     -    40     -    67     -     -     -    40     -     -    35 |  288  13.15
 CHUR |     -    59    34     -     -     -     -     -     -     -    26 |  288   5.33
 COCO |     -    39     -    63    58     -     -     -     -     -    39 |  288   8.94
 CRO1 |     -    52    25    56    42     -     -    22     -     -    36 |  285  30.81
 DARW |     -     -    15     -     -     -     -    21     -     -     - |  288   5.46
 DAV1 |     -   141     -     -   138     -     -    58     -     -    96 |  288  13.65
 DRAO |     -     -     9     -     -     -     -    31     -     -    25 |  288   0.12
 DWH1 |     -    49    19     -     -     -     -    29     -     -    39 |  288   0.70
 FAIR |     -     -    92    66    24     -     -    44     -     -   117 |  284   0.75
 FORT |     -    49     -     -    26     -     -     -     -     -    53 |  288   0.15
 GLPS |     -    47     -    78    53     -     -    29     -     -     - |  288  28.93
 GMAS |     -     -    12     -     -     -     -    17     -     -     X |  288   2.94
 GODE |     -    27    22    19     -     -     -     -     -     -    35 |  288   0.24
 GOLD |     -     -     -    78     -     -     -    88     -     -   110 |  288  19.50
 GUAM |     -    60     -    94    73     -     -    52     -     -    91 |  288  15.09
 GUAT |     -    26     -     -    19     -     -     -     -     -    22 |  287    >>>
 HERS |     -     -    32     -     -     -     -     -     -     -    42 |  241  16.93
 HOB2 |     -    31    36     -     -     -     -     -     -     -    39 |  288   0.07
 HOFN |     -     -     -     -    51     -     -    59     -     -     - |  268    >>>
 HRAO |     -    43     -     -     -     -     -    37     -     -    28 |  288   0.23
 IENG |     -    27    21     -     -     -     -     -     -     -     - |  288   0.64
 IISC |     -     -     -    36    28     -     -     -     -     -    23 |  288  28.63
 JAB1 |     -    28     -    44     -     -     -     -     -     -     - |  288  20.06
 JPLM |     -     -    29     -     -     -     -     -     -     -    37 |  266    >>>
 KERG |     -    36    39    42    50     -     -     -     -     -    29 |  288   2.28
 KGN0 |     -    60    79     -     -     -     -     -     -     -    48 |  287   0.22
 KIRU |     -    43     -    44     -     -     -    29     -     -    31 |  288  11.68
 KIT3 |     -     -     -     -    31     -     -    37     -     -    28 |  288  18.79
 KOKB |     -     -    30     -    32     -     -    43     -     -    89 |  288   0.06
 KOSG |     -    20     -     -     -     -     -     -     -     -    20 |  288  90.81
 KOUR |     -     -     -    59    38     -     -    26     -     -    32 |  288   1.58
 KUNM |     -     -     -     -     -     -     -    39     -     -    36 |  288  45.71
 LHAS |     -     -     -    48     -     -     -     -     -     -    31 |  255  10.88
 LPGS |     -    38    45   102     X     -     -     -     -     -    35 |  288  41.75
 MAC1 |     -    47     -    67    44     -     -    41     -     -    55 |  287  17.67
 MADR |     -     -     -     -     -     -     -    72     -     -    66 |  288  16.83
 MALI |     -    55     -    56     -     -     -     -     -     -    60 |  288  30.38
 MAS1 |     -    15    15    33     -     -     -     -     -     -    16 |  288   1.80
 MAW1 |     -    33     -     -    38     -     -     -     -     -    30 |  288  33.80
 MCM4 |     -    49    45     -    46     -     -     -     -     -     - |  288   8.75
 MDO1 |     -    34    12     -    28     -     -     -     -     -    31 |  288  16.93
 MEDI |     -     -    10     -     -     -     -     -     -     -    13 |  288    >>>
 METS |     -    23    22     -     -     -     -     -     -     -    12 |  287   9.64
 MIZU |     -     -    58     -     -     -     -     -     -     -    75 |  288   0.50
 NKLG |     -    34     -    69    32     -     -     -     -     -    42 |  287    >>>
 NLIB |     -     -    91     -     -     -     -   167     -     -    83 |  288  42.06
 NNOR |     -     -    34    43     -     -     -    27     -     -    16 |  288  15.55
 NPLD |     -    20    35     -     -     -     -     -     -     -    38 |  287   0.03
 NRC1 |     -     -    10     -    14     -     -    16     -     -    13 |  288   0.04
 NRIL |     -     -     -     -    17     -     -    20     -     -     - |  288   9.73
 NSSP |     -    16     -     -     -     -     -     -     -     -    16 |  288  13.64
 NYA1 |     -     -     -     -    45     -     -     -     -     -    48 |  288   0.07
 NYAL |     -     -    12     -     -     -     -     -     -     -    15 |  288   0.08
 ONSA |     -     -    12    24     -     -     -     -     -     -     - |  288   0.03
 PDEL |     -     -     -     -    23     -     -    27     -     -     - |  288  59.53
 PERT |     -     -    35    45    32     -     -     -     -     -    24 |  288   2.30
 PETP |     -    57     -     -    27     -     -    34     -     -     - |  286   8.12
 PIE1 |     -     -    35    75     -     -     -    41     -     -     X |  287 148.31
 PIMO |     -     -     -    71    44     -     -     -     -     -     X |  268  14.27
 POL2 |     -    13     -     -     -     -     -     -     -     -    14 |  288  13.12
 POTS |     -    24     -     -    24     -     -     -     -     -    11 |  288  22.93
 PRDS |     -     -    17     -     -     -     -     -     -     -    22 |  288   2.61
 PTBB |     -    26    17     -     -     -     -     -     -     -    31 |  288   0.34
 QAQ1 |     -     -    22     -     -     -     -     -     -     -    28 |  282   9.36
 RBAY |     -     -     -    86     -     -     -     -     -     -    56 |  287  63.57
 SANT |     -    40     -    92    33     -     -     -     -     -    31 |  288   2.86
 SCH2 |     -     -    17     -     -     -     -     -     -     -    22 |  288 150.46
 SEY1 |     -     -     -     -    22     -     -     -     -     -    24 |  117  11.93
 SFER |     -    33    28     -     -     -     -     -     -     -    19 |  287   0.44
 SPT0 |     -    19    15     -     -     -     -     -     -     -     - |  288   0.08
 STJO |     -    23    13     -     -     -     -    18     -     -    24 |  288   0.03
 STR1 |     -     -    30     -     -     -     -     -     -     -    39 |  288   0.59
 SUTM |     -     -     -     -    31     -     -    36     -     -     - |  288  12.31
 THTI |     -     -    35    54    43     -     -     -     -     -    47 |  288   3.72
 THU3 |     -    20     -     -    27     -     -     -     -     -    37 |  288   7.53
 TID1 |     -     -     -     -     -     -     -    37     -     -    34 |  288   0.09
 TIDB |     -    48     -    39     -     -     -     -     -     -    32 |  288   0.07
 TOW2 |     -    37     -     -    48     -     -    40     -     -     - |  288  14.84
 TRO1 |     -    20     -     -    36     -     -     -     -     -    33 |  288   8.48
 TSKB |     -    35    28     -    27     -     -     -     -     -    45 |  288   0.83
 TWTF |     -    38     -     -     -     -     -    65     -     -    44 |  288   0.52
 UNSA |     -     -     -    63    51     -     -    31     -     -    91 |  287  20.92
 URUM |     -    23     -     -     -     -     -     -     -     -    23 |  288  22.31
 USN1 |     -    35     -     -     -     -     -    19     -     -    25 |  288   0.04
 USNO |     -    25    17     -     -     -     -     -     -     -    14 |  288   0.04
 USUD |     -     -     -    38     -     -     -     -     -     -    25 |  284  10.95
 VILL |     -    17     -    23     -     -     -     -     -     -    17 |  288   3.86
 WHIT |     -    23     -     -     -     -     -     -     -     -    23 |  288   0.99
 WSRT |     -    22     -     -     -     -     -     -     -     -    22 |  288   0.01
 WTZR |     -    20     -    22     -     -     -     -     -     -    26 |  288   0.09
 WUHN |     -     -     -     -    21     -     -     -     -     -    22 |  287  20.33
 YAKT |     -     -     -     -     -     -     -    37     -     -    34 |  288   0.84
 YELL |     -    41    24    29    37     -     -     -     -     -    39 |  288   0.06
 ZAMB |     -    33     -     -    31     -     -     -     -     -     - |  286   9.94
 ZWEN |     -    13     -    30    19     -     -     -     -     -    15 |  288  18.27
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3776    45    37    62    42    78  4126    48  3637     -    45 |


 BEST CLOCK FIT: WSRT   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288    9.98   | 4.12e-14  8.00e-15  1.75e-15 |
 AMC2 |   288     0     0   288    9.98   | 3.44e-14  6.24e-15  1.93e-15 |
 BRUS |   288     0     0   288    8.86   | 4.57e-14  9.44e-15  2.05e-15 |
 BREW |   288     0     0   288    8.48   | 4.23e-14  6.93e-15  2.97e-15 |
 USNO |   288     1     0   287    8.39   | 4.05e-14  4.83e-15  2.15e-15 |
 NPLD |   287     0     0   286    7.69   | 4.19e-14  8.22e-15  2.43e-15 |
 NRC1 |   288     0     0   288    7.64   | 4.10e-14  5.18e-15  1.63e-15 |
 ALGO |   288     0     0   288    5.38   | 2.93e-14  4.88e-15  4.85e-15 |
 NLIB |   288     1     0   287    4.82   | 4.76e-14  1.17e-14  4.88e-15 |
 STJO |   288     0     0   288    3.86   | 3.68e-14  8.80e-15  3.39e-15 |
 USN1 |   288     0     0   288    3.02   | 7.04e-14  8.55e-15  3.10e-15 |
 WSRT |   288     0     0   288    3.00   | 3.25e-14  1.10e-14  2.74e-15 |
 NYAL |   288     0     0   288    2.14   | 4.35e-14  7.61e-15  4.76e-15 |
 ALBH |   288     0     0   288    1.63   | 4.17e-14  7.74e-15  7.24e-15 |
 PIE1 |   287     2     0   284    1.57   | 5.13e-14  1.00e-14  7.84e-15 |
 DRAO |   288     0     0   288    1.57   | 7.13e-14  1.89e-14  1.05e-14 |
 NYA1 |   288     1     0   287    1.56   | 2.66e-14  6.29e-15  3.72e-15 |
 KOKB |   288     0     0   288    1.34   | 7.28e-14  1.66e-14  4.59e-15 |
 GODE |   288     0     0   288    1.25   | 3.47e-14  7.16e-15  1.62e-14 |
 SPT0 |   288     1     0   287    1.18   | 4.88e-14  9.64e-15  4.40e-15 |
 FAIR |   284     2     0   281    1.00   | 7.22e-14  1.70e-14  5.77e-15 |
 YELL |   288     0     0   288    0.99   | 3.10e-14  6.04e-15  5.32e-15 |
 TIDB |   288     0     0   288    0.91   | 1.70e-13  1.75e-14  6.36e-15 |
 HOB2 |   288     0     0   288    0.73   | 5.92e-14  1.52e-14  6.73e-15 |
 WTZR |   288     0     0   288    0.72   | 4.38e-14  3.26e-14  8.33e-15 |
 TID1 |   288     0     0   143    0.55   | 4.84e-14  8.16e-15  5.83e-15 |
 FORT |   288     0     0   288    0.46   | 7.31e-14  2.37e-14  1.06e-14 |
 PTBB |   288     0     0   288    0.14   | 3.52e-13  9.52e-14  2.94e-14 |
 HRAO |   288     0     0   288    0.13   | 1.16e-13  2.29e-14  2.19e-14 |
 MIZU |   288     0     0   288    0.09   | 3.41e-13  1.04e-13  6.43e-14 |
 BAHR |   288     0     0   288    0.08   | 3.30e-13  9.74e-14  2.68e-14 |
 G16  |   288     0     0   288    0.08   | 5.30e-13  6.62e-14  2.90e-14 |
 SFER |   287     0     0   286    0.07   | 4.13e-13  1.49e-13  4.62e-14 |
 G27  |   288     0     0   288    0.06   | 3.43e-13  1.04e-13  3.92e-14 |
 KGN0 |   287     0     0   136    0.05   | 3.16e-13  8.46e-14  2.34e-14 |
 G26  |   288     0     0   288    0.05   | 3.58e-13  1.10e-13  8.53e-14 |
 G29  |   288     0     0   288    0.05   | 4.19e-13  1.33e-13  4.59e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.93e-13  1.41e-13  6.15e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.11e-13  1.66e-13  4.61e-14 |
 G17  |   288     0     0   288    0.04   | 4.08e-13  1.49e-13  8.90e-14 |
 IENG |   288     0     0   288    0.04   | 5.26e-13  1.70e-13  7.36e-14 |
 G22  |   288     0     3    66    0.04   | 5.74e-13  6.06e-14  3.11e-14 |
 TWTF |   288     0     0   143    0.04   | 4.22e-13  1.14e-13  4.07e-14 |
 G30  |   288     0     0   288    0.04   | 3.37e-13  1.14e-13  8.76e-14 |
 G07  |   288     0     0   288    0.03   | 3.05e-13  8.36e-14  1.05e-13 |
 YAKT |   288     0     0   288    0.03   | 4.28e-13  1.25e-13  7.38e-14 |
 G04  |   288     0     0   288    0.03   | 4.76e-13  1.33e-13  4.76e-14 |
 STR1 |   288     0     0   288    0.02   | 7.27e-13  2.01e-13  5.30e-14 |
 G31  |   288     0     0   288    0.02   | 2.09e-13  1.45e-13  4.30e-14 |
 G28  |   288     0     4    55    0.02   | 6.58e-13  7.96e-14  4.56e-14 |
 G06  |   288     0     0   288    0.01   | 3.98e-13  1.30e-13  1.40e-13 |
 G19  |   288     0     3    49    0.01   | 6.90e-13  8.17e-14  2.97e-14 |
 TSKB |   288     0     0   288    0.01   | 9.95e-13  2.80e-13  6.54e-14 |
 G25  |   288     0     0   288    0.01   | 1.44e-12  4.05e-13  1.87e-13 |
 G09  |   288     0     0   288    0.01   | 1.30e-12  4.27e-13  1.18e-13 |
 G24  |   288     0     0   288    0.01   | 1.28e-12  3.89e-13  2.28e-13 |
 PRDS |   288     0     0   288    0.00   | 1.61e-12  3.28e-13  1.72e-13 |
 GMAS |   288     0     0   288    0.00   | 1.13e-12  3.39e-13  1.85e-13 |
 KERG |   288     0     0   288    0.00   | 1.39e-12  3.92e-13  1.69e-13 |
 G05  |   288     0     0   288    0.00   | 1.24e-12  3.64e-13  3.25e-13 |
 WHIT |   288     0     0   288    0.00   | 4.65e-13  2.05e-13  9.48e-14 |
 KOUR |   288     0     0   143    0.00   | 1.51e-12  4.17e-13  1.23e-13 |
 PERT |   288     0     0   143    0.00   | 1.86e-12  4.69e-13  2.21e-13 |
 MAS1 |   288     0     0   143    0.00   | 1.72e-12  6.15e-13  1.48e-13 |
 THTI |   288     0     0   288    0.00   | 3.60e-13  1.39e-13  3.29e-13 |
 GPST |   288     0     0     0    0.00   | 1.84e-14  5.57e-15  2.62e-15 |
 LHAS |   255     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   286     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 BILI |   211     0     0     0    0.00   |        -         -         - |
 G21  |   288     7     6     0    0.00   | 7.44e-13  1.48e-13  9.25e-14 |
 G20  |   288     1     6     0    0.00   | 8.78e-13  1.07e-13  2.90e-14 |
 G18  |   288     0     6     0    0.00   | 1.05e-12  1.01e-13  3.06e-14 |
 G15  |   288     0     0     0    0.00   | 1.64e-12  4.77e-13  3.48e-13 |
 G14  |   288     0     6     0    0.00   | 6.21e-13  5.93e-14  1.56e-14 |
 G13  |   288     0     6     0    0.00   | 5.52e-13  5.41e-14  1.83e-14 |
 G11  |   288     0     4     0    0.00   | 6.83e-13  5.79e-14  5.19e-14 |
 G10  |   288     0     0     0    0.00   | 1.26e-12  3.91e-13  2.01e-13 |
 G08  |   288     0     0     0    0.00   | 4.13e-13  6.49e-13  3.89e-13 |
 G03  |   288     0     0     0    0.00   | 1.36e-12  4.25e-13  3.00e-13 |
 G01  |   288     0     0     0    0.00   | 1.42e-12  5.77e-13  6.01e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   286     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   284     1     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   287     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   117     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     1     0    0.00   | 2.18e-12  6.17e-13  3.35e-13 |
 RBAY |   287     0     0     0    0.00   |        -         -         - |
 QAQ1 |   282     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   268     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.29e-13  4.46e-13  5.02e-13 |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   287     0     0     0    0.00   |        -         -         - |
 LPGS |   288     1     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.31e-13  1.14e-12  4.95e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 JPLM |   266     0     1     0    0.00   | 5.41e-13  4.58e-13  1.46e-12 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   268     0     0     0    0.00   |        -         -         - |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.83e-13  1.04e-12  3.33e-13 |
 CRO1 |   285     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   288     0     6     0    0.00   | 1.95e-12  1.87e-13  5.51e-14 |
 BRMU |   276     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     1     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.30e-17  2.76e-16  1.66e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      USNO      NRC1 |
------------------------------------------+------------------------------+
