
 GPS week: 1264   Day: 6   MJD: 53098                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2592      0    -0.20     0.38     3.23     0.00
 cod |   288     0  25413     60    -0.21     0.13     0.05    16.96
 emr |   288     0  23956    339    -6.52     1.87     0.04    21.33
 esa |   288     0  17540    901  -515.72    15.42     0.07    10.01
 gfz |   288     0  21068    411     0.04     0.17     0.04    17.86
 iga |    96     0   2688      6    -0.20     0.36     0.08     0.00
 igu |    96     0   2496      0    -0.20     0.38     2.86     0.00
 jpl |   288     0  16719    561    -6.78     1.29     0.04    19.62
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  32877    995   -19.15    13.97     0.05    14.21

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -2171  -141   -39   211   128    -5 -4437   -74     -    17 |
    3 | -5224   -53   -37    44   251   -84 -1793   -32     -  -184 |
    4 | -2052    48   -89   -21    60    20 -3243   135     -    10 |
    5 |  1554   161   -59  -198    44    18  1276    27     -   -58 |
    6 | -5930   141   -94   133    29   -18 -8546    19     -  -159 |
    7 |  -706    34  -132    -6   124  -156     -    14     -     7 |
    8 |   -30    60   -25  -148     5   -25 -3454    50     -    62 |
    9 | -3509    79   -79    66   133  -209 -2206    29     -  -241 |
   10 | -3450   101  -163  -100   226    -5   387    22     -  -121 |
   11 |     -   -45   -95   505  -107  -113  2106   -12     -    -6 |
   13 |  3251    76   -31   181  -157   -61   492   -15     -    26 |
   14 |  1718   212    52  -143  -183    89 -1378    35     -     0 |
   15 | -1063   -88    23    96    -8   120  4929    92     -    10 |
   16 |  5083    -3   -48   122    42  -109  1107   -38     -   -62 |
   17 |  2518    54  -146  -295   318   166  5598    63     -  -122 |
   18 |  1156    68     5    86   -51     9  -774   -10     -   -74 |
   19 |  6165  -419   214     X  -417   592     -   478     -    57 |
   20 |  3355   -77    30   693  -232   -18   332    19     -  -139 |
   21 |  1169    69     5   139  -192    -4  -780    14     -    35 |
   22 |  1589    87     7  -212     1    91  1894   108     -    24 |
   24 | -5306    63  -120   326  -117    16  1259    91     -  -102 |
   25 | -1285    50    20   -35    80  -189  6270   -30     -  -165 |
   26 |   250    42  -177   -41   266   -87 -4430    11     -  -105 |
   27 | -2017    61  -119   168     4   -16 -1983   132     -   -23 |
   28 |  4892    55   -66  -128   -35   -12 -3248    44     -   108 |
   29 | -2421   130   -40   -10   -90    21 -1444    88     -    21 |
   30 |  -687   179   -20   -82   -44    16 -3250    33     -   -71 |
   31 |  3151   -72   -66    10   187   -12 15316   -43     -     X |
 -----+-------------------------------------------------------------+
 ALBH |     -     -    17     -     -     -     -   -31     -    17 |
 ALGO |     -     -  -100  -238     -     -     -   194     -    50 |
 AMC2 |     -  -120   161     -     -     -     -  -125     -    74 |
 ARTU |     -   119     -    47   -22     -     -  -106     -     - |
 ASC1 |     -   -56     -     -    53     -     -     -     -     X |
 ASPA |     -     -     -     -   388     -     -  -190     -  -233 |
 BAHR |     -   -24    17     -     -     -     -     -     -     3 |
 BAN2 |     -     -  -117     -     -     -     -     -     -   176 |
 BILI |     -   105     -     -   -86     -     -   -14     -     - |
 BOR1 |     -   111    83     -     -     -     -     -     -  -257 |
 BREW |     -     -     6     -     -     -     -     -     -    -9 |
 BRMU |     -     -     -     -   -10     -     -     -     -    13 |
 BRUS |     -    29    13     -     -     -     -   -54     -    21 |
 CAGZ |     -    23     -     -     -     -     -     -     -   -27 |
 CAS1 |     -    92     -  -103   -12     -     -     -     -   -23 |
 CEDU |     -  -121     -   395     -     -     -     -     -  -133 |
 CHAT |     -   -72     -   122     -     -     -     -     -     - |
 CHUR |     -     -   125     -     -     -     -     -     -  -188 |
 COCO |     -   -41     -   -93   127     -     -   -62     -    40 |
 CRO1 |     -     -   -22   106    -7     -     -    47     -   -89 |
 DARW |     -     -    65     -     -     -     -   -71     -     - |
 DAV1 |     -    83     -     -  -109     -     -    50     -   -29 |
 DRAO |     -    13   -73   251     -     -     -   111     -  -125 |
 DWH1 |     -   173   153     -     -     -     -  -244     -   -97 |
 FAIR |     -     -    41     X   -56     -     -     X     -     7 |
 FORT |     -   270     -     -  -133     -     -     -     -  -115 |
 GLPS |     -    55     -   227   -76     -     -   -92     -     - |
 GODE |     -   -29    -3   -62     -     -     -    67     -   -11 |
 GOL2 |     -     -    48     -     -     -     -     -     -   -72 |
 GOLD |     -     -     -     X     -     -     -     1     -    -1 |
 GUAM |     -     -     -  -391   233     -     -  -117     -   145 |
 GUAT |     -  -141     -     -    52     -     -     -     -   100 |
 HERS |     -     -  -233     -     -     -     -     -     -   349 |
 HOB2 |     -   -18    -9     -     -     -     -    71     -   -64 |
 HRAO |     -     -     -     -     -     -     -   -31     -    42 |
 IENG |     -   -92    73     -     -     -     -     -     -     - |
 IISC |     -     -     -   -57   -84     -     -     -     -   146 |
 JPLM |     -     -    10     -     -     -     -    20     -   -43 |
 KARR |     -   -49     -     -     -     -     -    42     -     - |
 KERG |     -   -16   183   -71  -148     -     -     -     -    -7 |
 KIT3 |     -     -     -   -17  -109     -     -    47     -    85 |
 KOKB |     -    61   -14     -   -25     -     -   -17     -     3 |
 KOSG |     -   -65     -     -     -     -     -     -     -    77 |
 KOUR |     -    27     -   -46     -     -     -     -     -     - |
 KUNM |     -     -     -     -     -     -     -     7     -   -10 |
 LHAS |     -     -     -  -127     -     -     -     -     -    90 |
 LPGS |     -    55   146  -578     X     -     -     9     -    92 |
 MAC1 |     -   -75     -    39  -105     -     -   101     -    61 |
 MAD2 |     -     -   -12     -     -     -     -     -     -    18 |
 MAS1 |     -     -    27   -58     -     -     -     -     -     - |
 MATE |     -     -     -   -77     -     -     -     -     -    54 |
 MAW1 |     -   135     -     -  -129     -     -     -     -   -25 |
 MCM4 |     -  -123  -226     -   458     -     -     -     -     - |
 MDO1 |     -    30   -25     -    36     -     -     -     -   -44 |
 MEDI |     -     -     1     -     -     -     -     -     -    -1 |
 METS |     -   -57    60     -     -     -     -     -     -   -23 |
 MIZU |     -     -   -45     -     -     -     -     -     -    67 |
 NKLG |     -     -     -  -189  -119     -     -   180     -    35 |
 NLIB |     -     -    21     -     -     -     -    47     -   -96 |
 NNOR |     -     -    16   -34     -     -     -     -     -     - |
 NPLD |     -  -105    93     -     -     -     -     -     -   -14 |
 NRC1 |     -     2    -4     -    12     -     -   -32     -    33 |
 NRIL |     -     -     -     -   -12     -     -    11     -     - |
 NYA1 |     -     -     -     -  -164     -     -     -     -   207 |
 NYAL |     -     -    75     -     -     -     -     X     -  -112 |
 ONSA |     -     4    11    52   -45     -     -     -     -     - |
 PDEL |     -  -351     -     -   105     -     -   208     -     - |
 PERT |     -     -    27   -57     -     -     -     -     -     - |
 PETP |     -   -50     -     -    47     -     -     -     -     - |
 PIE1 |     -     -   201  -139     -     -     -   -91     -   -89 |
 PIMO |     -     -     -   -76    43     -     -     -     -     X |
 POTS |     -   -60     -   -84    46     -     -     -     -    74 |
 PRDS |     -  -127    10     -     -     -     -     -     -   138 |
 PTBB |     -    74   -23     -     -     -     -     -     -   -53 |
 QAQ1 |     -     -   -11     -     -     -     -     -     -    16 |
 RBAY |     -  -139     -     -     -     -     -     -     -   166 |
 REYK |     -     -     -     -     -     -     -     4     -    -6 |
 RIOG |     -    57    22     -   -47     -     -     -     -   -41 |
 SANT |     -   -20     -   107   -39     -     -     -     -    -4 |
 SCH2 |     -   -52    30     -     -     -     -     -     -    15 |
 SEY1 |     -     -     -     -   -38     -     -     -     -    47 |
 SFER |     -  -142    27     -     -     -     -     -     -   129 |
 SPT0 |     -   -56     7     -     -     -     -     -     -    56 |
 STJO |     -   -14   -15     -     -     -     -   -33     -    85 |
 STR1 |     -     -   -21     -     -     -     -     -     -    32 |
 SUTH |     -    -4     -     -     -     -     -     -     -     5 |
 SUTM |     -     -    48     -    -2     -     -   -51     -     - |
 THTI |     -     -   122   -53     1     -     -  -163     -    77 |
 THU3 |     -   -17    62     -  -108     -     -     -     -    63 |
 TID1 |     -     -     -     -     -     -     -   -59     -    82 |
 TIDB |     -     -   -61   108   -51     -     -     -     -    80 |
 TIXI |     -    89     -     -     -     -     -   -77     -     - |
 TLSE |     -     -    20     -     -     -     -     -     -   -30 |
 TOW2 |     -    71     -     -  -138     -     -    64     -     - |
 TRO1 |     -  -138     X     -    29     -     -     -     -   135 |
 TSKB |     -   -58    38     -    27     -     -     -     -   -22 |
 TWTF |     -  -139     4     -     -     -     -     -     -   159 |
 USN1 |     -   297     -     -     -     -     -  -318     -    85 |
 USNO |     -   -22    61     -     -     -     -     -     -   -65 |
 USUD |     -     -     -    38     -     -     -     -     -   -27 |
 WHIT |     -   -95     -     -     -     -     -     -     -   113 |
 WSRT |     -   -99     -     -     -     -     -    74     -    17 |
 WTZR |     -   -44     -    51     -     -     -     2     -    14 |
 WUHN |     -     -     -     -   167     -     -     -     -  -210 |
 YAR2 |     -     -     -     -    18     -     -     -     -   -22 |
 YEBE |     -     -     -     -     -     -     -    -1     -     1 |
 YELL |     -    32   194  -238  -171     -     -     -     -   105 |
 ZAMB |     -   -16     -     -    15     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6755    46    28    53    23    38  2346    19     -    57 |  288   4.09
    3 |  1905    87    31   116   111    60  1281    28     -    70 |  288   1.83
    4 |  1064    37    27    34    64    35  1458    47     -    57 |  288   0.76
    5 |  5183    66    42    39    27    46  4453    33     -    50 |  288   2.20
    6 |  1325    37    32    41    21    29  5819    28     -    60 |  288   1.28
    7 |  1118    55    20    42    29    89     -    57     -    60 |  288   0.81
    8 |  6013    50    41    45    34    92  4220    59     -   120 |  288   3.97
    9 |  4387    26    34    54    24    25  3200    41     -   116 |  288   1.67
   10 |  3333   158    76   175    68    72  2303    68     -    35 |  288   2.13
   11 |     -    53    62   120    38    43  1717    39     -    72 |  288   0.28
   13 |  1119    47    26    46    35    59  1168    30     -    61 |  288   0.24
   14 |  1422    71    84    51    25    53   624    32     -    60 |  288   0.29
   15 |  3162    36    40    42    18    51  4043    62     -    43 |  288   2.51
   16 |   817    53    43   111    54    50   834    66     -    44 |  288   0.34
   17 |  1672    39    25    49    13    59  2618    40     -    34 |  288   0.60
   18 |   855    70    54    48    24   168   479    34     -    62 |  288   0.43
   19 |  1549    62    55     X    62   229     -    53     -    76 |  288   0.72
   20 |   606    50    42    43    35    78   552    48     -    80 |  288   0.27
   21 |  1056    42    35    42    31    57   401    75     -    48 |  288   0.26
   22 |  6888    85    30   104    92    93  4393    43     -   133 |  288   2.35
   24 |  2106    49    19    39    24    28  2239    51     -    42 |  288   1.77
   25 |  4610    38    39    85    23    37  3753    30     -    65 |  288   2.23
   26 |  2944    40    19    91    16    45  2434    29     -    33 |  288   0.55
   27 |   792    46    31    39    29    69   506    69     -    92 |  288   0.60
   28 |  2764    64    82    37    28    55  2658    44     -    74 |  288   0.73
   29 |  1173    51    24    74    13    35   894    30     -    32 |  288   0.65
   30 |  1968    52    28    58    31    66  1750    25     -    70 |  288   0.67
   31 |  4661    45    31    90    37    65  5761    27     -     X |  288   1.99
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    12     -     -     -     -    17     -    18 |  288   0.10
 ALGO |     -     -    15    35     -     -     -    13     -    21 |  288   0.04
 AMC2 |     -    25    18     -     -     -     -    26     -    20 |  288   0.03
 ARTU |     -    23     -    19    18     -     -    16     -     - |  288  10.64
 ASC1 |     -    33     -     -    31     -     -     -     -     X |  285    >>>
 ASPA |     -     -     -     -    40     -     -    74     -    86 |  275    >>>
 BAHR |     -    34    22     -     -     -     -     -     -    16 |  288   0.70
 BAN2 |     -     -    17     -     -     -     -     -     -    25 |  288  18.33
 BILI |     -    26     -     -    23     -     -    40     -     - |  287   6.52
 BOR1 |     -    31    11     -     -     -     -     -     -    30 |  288   0.49
 BREW |     -     -     8     -     -     -     -     -     -    12 |  288   0.03
 BRMU |     -     -     -     -    18     -     -     -     -    23 |  288    >>>
 BRUS |     -    33    15     -     -     -     -    16     -    20 |  288   0.02
 CAGZ |     -    36     -     -     -     -     -     -     -    43 |  287   0.47
 CAS1 |     -    50     -    37    32     -     -     -     -    92 |  288   7.09
 CEDU |     -    19     -    47     -     -     -     -     -    40 |  288  11.79
 CHAT |     -    17     -    29     -     -     -     -     -     - |  287  12.66
 CHUR |     -     -    19     -     -     -     -     -     -    28 |  270  67.01
 COCO |     -    30     -    64    42     -     -    40     -    68 |  288   7.99
 CRO1 |     -     -    49    40    86     -     -    19     -    50 |  285  15.51
 DARW |     -     -    21     -     -     -     -    23     -     - |  288   3.26
 DAV1 |     -    41     -     -    35     -     -    60     -    51 |  280  14.54
 DRAO |     -    31    17    66     -     -     -    20     -    34 |  288   0.13
 DWH1 |     -    45    27     -     -     -     -    32     -    30 |  288   0.42
 FAIR |     -     -    34     X    46     -     -     X     -    20 |  250   0.22
 FORT |     -    52     -     -    25     -     -     -     -    42 |  288   0.13
 GLPS |     -    57     -   130    35     -     -    25     -     - |  288  25.20
 GODE |     -    26    38    75     -     -     -    14     -    29 |  288   0.05
 GOL2 |     -     -    85     -     -     -     -     -     -   127 |  251 160.68
 GOLD |     -     -     -     X     -     -     -    89     -   123 |  254  16.45
 GUAM |     -     -     -    43    51     -     -    56     -    98 |  288  15.97
 GUAT |     -    33     -     -    54     -     -     -     -    84 |  288    >>>
 HERS |     -     -    22     -     -     -     -     -     -    34 |  236  12.69
 HOB2 |     -    29    25     -     -     -     -    55     -    43 |  288   0.06
 HRAO |     -     -     -     -     -     -     -    73     -   101 |  240   0.21
 IENG |     -    20    16     -     -     -     -     -     -     - |  288   0.52
 IISC |     -     -     -    56    19     -     -     -     -    27 |  288  26.19
 JPLM |     -     -    15     -     -     -     -    23     -    19 |  288   5.82
 KARR |     -    41     -     -     -     -     -    35     -     - |  288  16.48
 KERG |     -    34    32   112    42     -     -     -     -    36 |  288   1.28
 KIT3 |     -     -     -    24    21     -     -    20     -    34 |  288  17.29
 KOKB |     -    46    38     -    36     -     -    45     -    20 |  288   0.06
 KOSG |     -    22     -     -     -     -     -     -     -    26 |  288  28.67
 KOUR |     -    17     -    29     -     -     -     -     -     - |  228   1.28
 KUNM |     -     -     -     -     -     -     -    15     -    21 |  286  24.24
 LHAS |     -     -     -    17     -     -     -     -     -    12 |  288  10.11
 LPGS |     -    37    33    71     X     -     -    42     -    43 |  288  40.32
 MAC1 |     -    54     -    39    27     -     -    38     -    30 |  288  16.53
 MAD2 |     -     -    42     -     -     -     -     -     -    63 |  220  14.67
 MAS1 |     -     -    10    22     -     -     -     -     -     - |  228   1.72
 MATE |     -     -     -    14     -     -     -     -     -    10 |  288   0.11
 MAW1 |     -    41     -     -    24     -     -     -     -    67 |  282 183.25
 MCM4 |     -    93    90     -    90     -     -     -     -     - |  274    >>>
 MDO1 |     -    31    14     -    27     -     -     -     -    28 |  288  12.56
 MEDI |     -     -     8     -     -     -     -     -     -    13 |  288    >>>
 METS |     -    20    17     -     -     -     -     -     -    17 |  287   9.77
 MIZU |     -     -    11     -     -     -     -     -     -    16 |  288   0.46
 NKLG |     -     -     -    40    32     -     -    29     -    36 |  287    >>>
 NLIB |     -     -    29     -     -     -     -    35     -    23 |  288 399.02
 NNOR |     -     -    27    57     -     -     -     -     -     - |  228  16.22
 NPLD |     -    28    13     -     -     -     -     -     -    35 |  287   0.03
 NRC1 |     -    19     8     -    15     -     -    23     -    22 |  288   0.01
 NRIL |     -     -     -     -    26     -     -    24     -     - |  260  10.90
 NYA1 |     -     -     -     -    15     -     -     -     -    19 |  287   0.05
 NYAL |     -     -    17     -     -     -     -     X     -    25 |  288   0.05
 ONSA |     -    25    20    25    32     -     -     -     -     - |  288   0.04
 PDEL |     -    31     -     -    24     -     -    16     -     - |  288  55.42
 PERT |     -     -    27    57     -     -     -     -     -     - |  228   1.21
 PETP |     -    36     -     -    34     -     -     -     -     - |  286   8.13
 PIE1 |     -     -    44    57     -     -     -    37     -    49 |  280  37.83
 PIMO |     -     -     -    63    35     -     -     -     -     X |  236  15.91
 POTS |     -    16     -    31    27     -     -     -     -    23 |  288  22.57
 PRDS |     -    29    16     -     -     -     -     -     -    17 |  288   1.74
 PTBB |     -    34    14     -     -     -     -     -     -    33 |  288   0.30
 QAQ1 |     -     -     9     -     -     -     -     -     -    14 |  263   8.85
 RBAY |     -    41     -     -     -     -     -     -     -    49 |  283  81.15
 REYK |     -     -     -     -     -     -     -    24     -    34 |  278   6.38
 RIOG |     -    29    32     -    21     -     -     -     -    60 |  288  16.91
 SANT |     -    79     -   131    85     -     -     -     -   165 |  288   3.51
 SCH2 |     -    40    18     -     -     -     -     -     -    28 |  287  16.79
 SEY1 |     -     -     -     -    27     -     -     -     -    34 |  287  24.56
 SFER |     -    22    12     -     -     -     -     -     -    17 |  287   0.54
 SPT0 |     -    25    13     -     -     -     -     -     -    33 |  288   0.03
 STJO |     -    23    15     -     -     -     -    32     -    49 |  288   9.63
 STR1 |     -     -    27     -     -     -     -     -     -    41 |  288   0.77
 SUTH |     -    28     -     -     -     -     -     -     -    33 |  288  17.50
 SUTM |     -     -    66     -   137     -     -    68     -     - |  284  32.66
 THTI |     -     -    90   136    47     -     -    41     -    45 |  288   3.68
 THU3 |     -    20    19     -    20     -     -     -     -    35 |  288   7.69
 TID1 |     -     -     -     -     -     -     -    38     -    52 |  288   0.12
 TIDB |     -     -    32    43    33     -     -     -     -    49 |  288   0.14
 TIXI |     -    71     -     -     -     -     -    62     -     - |  266   7.65
 TLSE |     -     -    27     -     -     -     -     -     -    41 |  287   0.33
 TOW2 |     -    35     -     -    53     -     -    39     -     - |  288  16.11
 TRO1 |     -    54     X     -    43     -     -     -     -    86 |  287   9.03
 TSKB |     -    50    27     -    32     -     -     -     -    48 |  288   0.95
 TWTF |     -    37    39     -     -     -     -     -     -    43 |  288   0.32
 USN1 |     -    36     -     -     -     -     -    40     -    27 |  288   0.03
 USNO |     -    28    15     -     -     -     -     -     -    20 |  288   0.02
 USUD |     -     -     -    39     -     -     -     -     -    27 |  288  10.27
 WHIT |     -    24     -     -     -     -     -     -     -    28 |  288   2.18
 WSRT |     -    20     -     -     -     -     -    14     -    11 |  288   0.02
 WTZR |     -    21     -    23     -     -     -    16     -    10 |  288   0.10
 WUHN |     -     -     -     -    24     -     -     -     -    30 |  287  18.83
 YAR2 |     -     -     -     -    22     -     -     -     -    28 |  288   6.60
 YEBE |     -     -     -     -     -     -     -     7     -    10 |  288   0.12
 YELL |     -    75    99    83    75     -     -     -     -    87 |  288   0.30
 ZAMB |     -    26     -     -    24     -     -     -     -     - |  287  12.99
 -----+-------------------------------------------------------------+--------------
 TOT  |  3233    46    37    68    44    77  2856    40     -    54 |


 BEST CLOCK FIT: NRC1   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.96   | 3.11e-14  4.46e-15  1.47e-15 |
 ONSA |   288     0     0   288    9.96   | 3.55e-14  9.78e-15  3.15e-15 |
 AMC2 |   288     0     0   288    9.96   | 3.95e-14  5.53e-15  1.44e-15 |
 NPLD |   287     0     0   286    7.57   | 3.86e-14  8.62e-15  3.83e-15 |
 BRUS |   288     0     0   288    7.45   | 4.46e-14  7.39e-15  1.80e-15 |
 BREW |   288     0     0   288    6.83   | 4.62e-14  7.48e-15  1.85e-15 |
 NRC1 |   288     0     0   288    6.55   | 2.83e-14  5.73e-15  1.73e-15 |
 ALGO |   288     0     0   288    4.44   | 2.90e-14  7.26e-15  2.60e-15 |
 NLIB |   288     1     0   287    3.76   | 4.07e-14  8.77e-15  1.95e-15 |
 MAD2 |   220     0     0   218    3.41   | 5.01e-14  9.46e-15         - |
 SPT0 |   288     0     0   288    2.97   | 4.05e-14  8.02e-15  2.73e-15 |
 STJO |   288     1     0   287    2.91   | 4.20e-14  1.05e-14  4.11e-15 |
 USN1 |   288     0     0   288    2.82   | 7.80e-14  1.06e-14  1.95e-15 |
 WSRT |   288     1     0   287    2.75   | 3.02e-14  7.91e-15  3.59e-15 |
 FAIR |   250     0     0   249    2.50   | 5.84e-14  7.76e-15         - |
 GOL2 |   251     1     0   245    2.14   | 6.57e-14  1.75e-14         - |
 KOKB |   288     0     0   288    1.75   | 5.21e-14  1.16e-14  5.69e-15 |
 NYAL |   288     1     0   287    1.61   | 3.91e-14  6.93e-15  3.95e-15 |
 PIE1 |   280     1     0   277    1.57   | 1.72e-13  4.95e-14  2.29e-14 |
 TID1 |   288     0     0   287    1.43   | 5.38e-14  1.59e-14  7.16e-15 |
 TIDB |   288     0     0   288    0.88   | 1.87e-13  2.38e-14  9.05e-15 |
 DRAO |   288     0     0   288    0.84   | 6.33e-14  2.05e-14  1.24e-14 |
 ALBH |   288     0     0   288    0.75   | 4.04e-14  8.82e-15  9.93e-15 |
 YELL |   288     7     0   281    0.74   | 7.54e-14  2.06e-14  6.45e-15 |
 WTZR |   288     0     0   288    0.71   | 3.87e-14  2.77e-14  9.94e-15 |
 NYA1 |   287     1     0   286    0.64   | 3.42e-14  6.67e-15  4.34e-15 |
 GODE |   288     0     0   288    0.62   | 3.29e-14  6.56e-15  3.61e-15 |
 HOB2 |   288     0     0   288    0.51   | 4.77e-14  9.38e-15  5.52e-15 |
 FORT |   288     1     0   287    0.42   | 7.68e-14  2.63e-14  1.20e-14 |
 MATE |   288     0     0   143    0.40   | 5.69e-14  1.02e-14  1.27e-14 |
 PTBB |   288     0     0   288    0.12   | 3.38e-13  6.12e-14  3.20e-14 |
 MIZU |   288     0     0   288    0.08   | 3.30e-13  1.02e-13  3.90e-14 |
 BAHR |   288     0     0   288    0.07   | 3.43e-13  8.46e-14  5.72e-14 |
 G29  |   288     0     0   288    0.07   | 4.23e-13  8.86e-14  6.95e-14 |
 G16  |   288     0     0   288    0.07   | 4.71e-13  6.68e-14  2.43e-14 |
 TWTF |   288     0     0   288    0.06   | 3.97e-13  1.17e-13  2.12e-14 |
 SFER |   287     0     0   286    0.06   | 4.21e-13  1.35e-13  5.39e-14 |
 HRAO |   240     0     0   234    0.06   | 1.68e-13  4.04e-14         - |
 G07  |   288     0     0   288    0.05   | 2.90e-13  7.92e-14  7.99e-14 |
 TLSE |   287     0     0   286    0.05   | 4.15e-13  1.15e-13  2.25e-14 |
 G26  |   288     0     0   288    0.04   | 3.65e-13  1.08e-13  4.32e-14 |
 G17  |   288     0     0   288    0.04   | 3.88e-13  1.27e-13  4.54e-14 |
 G30  |   288     0     0   288    0.04   | 3.37e-13  8.04e-14  7.13e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.53e-13  1.45e-13  5.08e-14 |
 G04  |   288     0     0   288    0.04   | 4.37e-13  1.10e-13  7.47e-14 |
 G27  |   288     0     0   288    0.03   | 3.29e-13  1.03e-13  7.54e-14 |
 DWH1 |   288     0     0   288    0.03   | 4.98e-13  1.12e-13  4.04e-14 |
 IENG |   288     0     0   288    0.03   | 5.10e-13  1.23e-13  5.83e-14 |
 G22  |   288     0     0   288    0.03   | 5.73e-13  9.68e-14  1.62e-13 |
 G06  |   288     0     0   288    0.02   | 3.81e-13  1.15e-13  1.12e-13 |
 STR1 |   288     0     0   288    0.02   | 7.93e-13  2.10e-13  8.18e-14 |
 G19  |   288     0     2   100    0.02   | 7.96e-13  1.04e-13  4.15e-14 |
 G28  |   288     0     4    38    0.02   | 6.79e-13  7.45e-14  4.68e-14 |
 TSKB |   288     0     0   288    0.01   | 9.58e-13  2.74e-13  9.37e-14 |
 G09  |   288     0     0   288    0.01   | 1.29e-12  5.04e-13  1.61e-13 |
 G13  |   288     0     6    11    0.01   | 5.92e-13  6.80e-14  2.26e-14 |
 G25  |   288     0     0   288    0.01   | 1.45e-12  4.14e-13  1.50e-13 |
 G20  |   288     0     3    16    0.01   | 5.66e-13  9.40e-14  2.23e-14 |
 G31  |   288     0     0   288    0.01   | 2.12e-13  1.92e-13  1.66e-13 |
 G05  |   288     0     0   288    0.00   | 1.32e-12  3.87e-13  1.55e-13 |
 KERG |   288     0     0   288    0.00   | 1.18e-12  3.60e-13  1.15e-13 |
 YEBE |   288     0     3     4    0.00   | 1.92e-13  2.20e-14  1.37e-14 |
 G24  |   288     0     0   288    0.00   | 1.33e-12  5.02e-13  1.64e-13 |
 PRDS |   288     0     0   288    0.00   | 1.60e-12  4.08e-13  1.74e-13 |
 KOUR |   228     0     0   228    0.00   | 1.45e-12  4.34e-13         - |
 G03  |   288     0     0   288    0.00   | 1.43e-12  3.87e-13  2.31e-13 |
 WHIT |   288     0     0   288    0.00   | 4.92e-13  1.74e-13  1.85e-13 |
 PERT |   228     0     0   228    0.00   | 1.79e-12  4.85e-13         - |
 MAS1 |   228     0     0   228    0.00   | 1.78e-12  4.93e-13         - |
 GPST |   288     0     0     0    0.00   | 1.71e-14  4.06e-15  1.66e-15 |
 PIMO |   236     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   266     0     0     0    0.00   |        -         -         - |
 PETP |   286     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   236     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G21  |   288     2     6     0    0.00   | 8.67e-13  1.37e-13  3.92e-14 |
 G18  |   288     0     6     0    0.00   | 1.23e-12  1.14e-13  4.46e-14 |
 G15  |   288     0     0     0    0.00   | 1.62e-12  4.98e-13  3.09e-13 |
 G14  |   288     0     5     0    0.00   | 5.83e-13  6.58e-14  2.49e-14 |
 G11  |   288     0     5     0    0.00   | 6.67e-13  6.10e-14  3.46e-14 |
 G10  |   288     0     0     0    0.00   | 1.09e-12  4.35e-13  1.72e-13 |
 G08  |   288     0     0     0    0.00   | 4.16e-13  4.98e-13  3.42e-13 |
 G01  |   288     0     0     0    0.00   | 1.69e-12  5.74e-13  4.33e-13 |
 ZAMB |   287     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 1.01e-12  1.45e-12  4.86e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.64e-13  1.47e-13  3.37e-13 |
 SUTM |   284     1     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   287     0     0     0    0.00   | 6.59e-13  4.79e-13  1.23e-12 |
 SANT |   288     0     0     0    0.00   | 2.02e-12  7.00e-13  3.35e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   278     0     0     0    0.00   |        -         -         - |
 RBAY |   283     0     0     0    0.00   |        -         -         - |
 QAQ1 |   263     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   260     0     0     0    0.00   |        -         -         - |
 NNOR |   228     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     1     3     0    0.00   | 7.72e-13  9.80e-13  1.43e-12 |
 MCM4 |   274     1     1     0    0.00   | 5.88e-13  4.01e-13  1.57e-12 |
 MAW1 |   282     1     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   286     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.09e-13  7.04e-13  1.58e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.20e-13  2.39e-13  5.29e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   254     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   280     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.46e-13  6.64e-13  3.17e-13 |
 CRO1 |   285     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   270     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   287     0     6     0    0.00   | 1.96e-12  1.71e-13  4.51e-14 |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   275     0     0     0    0.00   |        -         -         - |
 ASC1 |   285     1     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.76e-17  2.11e-16  1.27e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      USNO      AMC2 |
------------------------------------------+------------------------------+
