
 GPS week: 1261   Day: 2   MJD: 53073                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2486     31    -0.08     0.07     2.78     0.00
 cod |   288     0  25026    648     0.20    -0.40     0.07    13.66
 emr |   288     0  24527    674   647.11     1.83     0.05    18.58
 esa |   288     0  17605    682  -370.63     2.13     0.08     9.81
 gfz |   288     0  18409    288     0.06     0.12     0.05    18.88
 iga |    96     0   2582      5 -8606.85 -3070.44     0.13     0.00
 igu |    96     0   2582     63-11562.99 45862.64     2.91     0.00
 jpl |   288     0  15924    545    -3.09     1.99     0.04    23.47
 ngs |    96     0   2582     11 -4897.04 -5455.92     2.71     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31944   1291   398.25    14.10     0.06    15.61

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  1053    31  -106   130    75   -56 -9899     3   400     -   -76 |
    3 | -5355    -5     2   178  -109    -2-14324   -29 -4916     -    34 |
    4 | -2054    63  -210   187    60    24  2219    25 -2210     -   -22 |
    5 | -6645  -173  -155   328   168  -111  2856    51 -6815     -  -129 |
    6 |   772    57  -131    31   184  -138  6849    74   902     -  -165 |
    7 | -3092    12   -98   -89   164    47 -2568   -32 -3442     -     0 |
    8 |  3420    28  -152  -104    62   106 -2952    96  2626     -   107 |
    9 | -4839     7  -180    86   223  -179 -6307    85 -4967     -  -167 |
   10 |   -94    15  -103   185   103   -56    86     -  -709     -  -120 |
   11 |     -   104    79   101  -414    62  2165    45  4787     -   235 |
   13 |  6698   247     2    93  -396    91  3874   139  6493     -    49 |
   14 |  5545   126   138   120  -284    57   837    31  5328     -   -20 |
   15 |   666    94   -35   144     1   267    -9  -139   545     -   -76 |
   16 |  5940   -59    99   199   -65   -42    16   -19  5623     -  -108 |
   17 | -5567   -32   -31    47   316    18 -1555   -56 -5865     -  -326 |
   18 |  4925   -35   -14   -13    74    41  1513    39  4764     -   -75 |
   20 |  3605    73   -40    13   -41    81  2252    83  3560     -   -14 |
   21 |  2861    96    21    44  -171   132   678   186  2733     -  -134 |
   22 |  -586    24    80   -68  -216  -104 -2473   201  -731     -   -47 |
   24 | -4133   -17   -71     X   145   -93  3157    61 -3873     -  -100 |
   25 |  -954    36     1   -90   -18  -201  6949    14 -1376     -    31 |
   26 | -1146    77   -96    19    19    27  2242    92  -956     -   -89 |
   27 | -2207   145  -120    73   -25   102  -458     2 -2260     -     X |
   28 |  2420   -28   -69  -109   -55   201 10086    95  2324     -   135 |
   29 | -2575    53   -75  -115   109   -66  1684    31 -2343     -   -29 |
   30 |  -404   -83  -129   260   235  -176 -7628   -86  -724     -  -121 |
   31 |   853   -47    14  -155     9   -22   406    21   732     -    88 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   -61   -76     -     -     -     -    59     -     -    55 |
 ALGO |     -     -   -25  -354     -     -     -   149     -     -    28 |
 ALIC |     -    28     -   -39     -     -     -     -     -     -     - |
 AMC2 |     -  -155   150     -     -     -     -  -125     -     -   145 |
 ARTU |     -    48     -   -36   -71     -     -    44     -     -     - |
 ASC1 |     -  -152     -     -    27     -     -     -     -     -   100 |
 ASPA |     -     -     -     -   172     -     -     -     -     -  -208 |
 AUCK |     -     -     -     X   496     -     -     -     -     -  -600 |
 BAHR |     -     -     7     -   -12     -     -    29     -     -   -38 |
 BAN2 |     -     -   -97     -     -     -     -     -     -     -   116 |
 BILI |     -   111     -     -   -81     -     -     -     -     -     - |
 BOR1 |     -    76   110     -     -     -     -     -     -     -  -220 |
 BREW |     -     -   -31     -     -     -     -     -     -     -    37 |
 BRMU |     -     -     -     -  -125     -     -     -     -     -   152 |
 BRUS |     -    22    47     -     -     -     -   -17     -     -   -49 |
 CAS1 |     -    44     -   -62     -     -     -     -     -     -     - |
 CEDU |     -  -474     -   660     -     -     -     -     -     -     - |
 CHAT |     -  -111     -    38     -     -     -     -     -     -    73 |
 CHUR |     -   175   110     -     -     -     -   -74     -     -  -172 |
 COCO |     -   -27     -    38     -     -     -     -     -     -     - |
 CORD |     -    77     -  -107     -     -     -     -     -     -     - |
 CRO1 |     -     -  -195    33    40     -     -    34     -     -   112 |
 DAKA |     -    72     -     -   -52     -     -     -     -     -     - |
 DRAO |     -   -97  -211   201     -     -     -   156     -     -   -25 |
 DWH1 |     -   258   131     -     -     -     -  -213     -     -   -60 |
 FAIR |     -     -    41   -32  -216     -     -   115     -     -    38 |
 FORT |     -   196   197     -  -250     -     -   -40     -     -   -30 |
 GODE |     -    82    18  -212     -     -     -     -     -     -    40 |
 GOLD |     -   220     X   -47     -     -     -  -109     -     -     X |
 GRAZ |     -     -    95     -     -     -     -     -     -     -  -113 |
 GUAM |     -    77     -  -111    -3     -     -     2     -     -     3 |
 GUAT |     -   -73     -     -   -50     -     -     -     -     -   123 |
 HERS |     -     -  -214     -     -     -     -     -     -     -   255 |
 HOB2 |     -    29    17   -73     -     -     -     -     -     -     - |
 HRAO |     -     -     -     -     -     -     -  -117     -     -   176 |
 IISC |     -   -98     -    33     1     -     -     -     -     -    52 |
 JPLM |     -     -    -2     -     -     -     -     -     -     -     3 |
 KERG |     -     -   -74   228    19     -     -   112     -     -  -163 |
 KGN0 |     -   -75    23     -     -     -     -     -     -     -    39 |
 KIRU |     -     2     -   -11     -     -     -     -     -     -     4 |
 KOSG |     -   -77     -     -     -     -     -     -     -     -    67 |
 KOUR |     -   140     -   -52   -92     -     -     -     -     -    21 |
 LAE1 |     -     -     -     -    55     -     -    31     -     -  -114 |
 LHAS |     -     -     -     -     -     -     -    17     -     -   -25 |
 LPGS |     -   -53  -155    -5     X     -     -    16     -     -   207 |
 MAC1 |     -    66     -   -92     -     -     -     -     -     -     - |
 MAD2 |     -     -   -72     -     -     -     -     X     -     -    85 |
 MAG0 |     -   -20     -     -     -     -     -    11     -     -     - |
 MAS1 |     -     -    24   -81     -     -     -     9     -     -     9 |
 MATE |     -     -     -   125     -     -     -     -     -     -   -79 |
 MCM4 |     -    95     X     -   -69     -     -     -     -     -     - |
 MDO1 |     -     -   -66     -   -56     -     -     -     -     -   147 |
 MEDI |     -     -    15     -     -     -     -     -     -     -   -18 |
 METS |     -  -161    19     -     -     -     -     -     -     -   118 |
 MIZU |     -     -   -69     -     -     -     -     -     -     -    82 |
 MKEA |     -     -     -  -130   -65     -     -    55     -     -    78 |
 NKLG |     -     -     -    99     -     -     -   -27     -     -   -21 |
 NLIB |     -     -    75     -     -     -     -   -24     -     -   -53 |
 NNOR |     -     -   156  -169     -     -     -  -114     -     -    92 |
 NOUM |     -     -     -     -   248     -     -  -200     -     -     - |
 NPLD |     -  -108   120     -     -     -     -     -     -     -   -49 |
 NRC1 |     -     -   -75     -    19     -     -   -27     -     -   106 |
 NRIL |     -     -     -     -   -59     -     -    47     -     -     - |
 NTUS |     -   -90     -     -     -     -     -   -73     -     -   188 |
 NYA1 |     -     X     -     -   170     -     -     -     -     -  -206 |
 NYAL |     -     -  -124     -     -     -     -   292     -     -  -291 |
 ONSA |     -     -    90  -171     -     -     -     -     -     -     - |
 PDEL |     -   -52     -     -    38     -     -     -     -     -     - |
 PERT |     -  -132   177  -206    83     -     -     -     -     -   -67 |
 PIE1 |     -     -   104  -188     -     -     -    -5     -     -     2 |
 POL2 |     -   -33     -     -     -     -     -     -     -     -    29 |
 POTS |     -    32     -     -     1     -     -     -     -     -   -30 |
 PRDS |     -   -16    74     -     -     -     -     -     -     -   -74 |
 PTBB |     -    15    52     -     -     -     -     -     -     -   -75 |
 QAQ1 |     -  -201    78     -     -     -     -     -     -     -    73 |
 REYK |     -     -     -     -     -     -     -     5     -     -    -8 |
 SANT |     -     X     -   -29    15     -     -     -     -     -     X |
 SCH2 |     -    44   -84     -     -     -     -     -     -     -    63 |
 SELE |     -     -     -     -     -     -     -    20     -     -   -30 |
 SEY1 |     -     -     -     -  -126     -     -     X     -     -   152 |
 SFER |     -   -59   -52     -     -     -     -     -     -     -   113 |
 SPT0 |     -  -144   123     -     -     -     -     -     -     -   -21 |
 STJO |     -     -  -140     -     -     -     -    -4     -     -   172 |
 SUTH |     -   -44     -     -     -     -     -     -     -     -    38 |
 SUTM |     -     -   247     -   -41     -     -  -163     -     -     - |
 THTI |     -     -     -    17     -     -     -     -     -     -   -11 |
 THU3 |     -     -    22     -   -22     -     -     -     -     -     X |
 TIXI |     -     1     -     -     -     -     -     0     -     -     - |
 TLSE |     -     -    29     -     -     -     -     -     -     -   -34 |
 TRO1 |     -  -110     X     -    16     -     -     -     -     -    80 |
 TSKB |     -   -87    73     -   -20     -     -     -     -     -    -1 |
 TWTF |     -  -173   -35     -     -     -     -     -     -     -   193 |
 UNSA |     -     -     -  -384   142     -     -   -56     -     -   133 |
 USN1 |     -   182   213     -     -     -     -  -377     -     -   154 |
 USNO |     -   -26     0     -     -     -     -     -     -     -    23 |
 USUD |     -     -   -69   273     -     -     -     -     -     -   -89 |
 VILL |     -    22     -   -33     -     -     -     -     -     -     2 |
 WES2 |     -   153   -72     -     -     -     -     -     -     -   -47 |
 WHIT |     -  -107     -     -     -     -     -     -     -     -    94 |
 WSRT |     -   -35   146     -     -     -     -   -25     -     -  -107 |
 WTZR |     -     7   148     -     -     -     -   -81     -     -   -60 |
 WUHN |     -     -   177     -  -174     -     -     -     -     -     X |
 YEBE |     -     -    81     -     -     -     -   -82     -     -    26 |
 YELL |     -    60    85  -464    20     -     -     -     -     -   113 |
 YSSK |     -   -16     -     -   -24     -     -    29     -     -     - |
 ZWEN |     -    43     -   -16    26     -     -     -     -     -   -59 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6963    53    37    35    25    66  7021    43  7171     -    53 |  288   3.66
    3 |  5390    68    21   103    25   132  5895    38  5015     -    81 |  288   2.88
    4 |   486    50    21    79    34    75   908    33   563     -    58 |  288   0.41
    5 |  2308   136    76   230    98   221  3166    56  2434     -    98 |  288   1.64
    6 |  4139    50    31    54    21   113  5125    27  3976     -    56 |  288   1.25
    7 |  1191    52    26    82    25    47  1439    35  1132     -    52 |  288   0.85
    8 |  4053    62    39    54    36    45  2124    44  4566     -    59 |  288   3.13
    9 |  2868    90    61    60    32    47  2981    66  2907     -   149 |  288   2.54
   10 |  2763   107    50   146    56    99  1712     -  2760     -    70 |  287   2.09
   11 |     -    50    69    62    28    63  1287   125   903     -    88 |  288   0.38
   13 |  1767    63    40    33    34    47  2003    61  1700     -   114 |  288   0.22
   14 |   722    74    40    59    56   112   522    72   796     -    51 |  288   0.26
   15 |  3002    80    19    42    18    93  2148    62  3071     -    57 |  288   2.47
   16 |   663    74    33    99    28   139   342    29   577     -    80 |  288   0.33
   17 |  3693    75    25    99    34    51  1383    44  3442     -    39 |  288   0.64
   18 |   673   127    38   152    30    60   743    38   711     -    80 |  288   0.38
   20 |  1312    93    55    81    53   107  1134    63  1293     -   222 |  288   0.29
   21 |   869    36    66    83    45    87   420    81   889     -    40 |  288   0.35
   22 |   431    70    32    57    37    57  1507    24   499     -    86 |  288   0.46
   24 |  2703    49    45     X    32   382  1617    90  2665     -    89 |  288   2.03
   25 |  2075    67    39    63    23    53  2771    22  1984     -    87 |  288   1.25
   26 |  2855    50    56    56    38    93  1665    29  2703     -    46 |  288   0.53
   27 |  2420    74   120   120    35   219  2148    24  2111     -     X |  260    >>>
   28 |  1530    91    33    74    33    63  5660    49  1398     -    84 |  288   0.55
   29 |  2544    44    42    73    61   145   885    48  2227     -    48 |  288   0.55
   30 |   840   148    62   194    89   121  3611    59   729     -    44 |  288   0.42
   31 |  1896    87    83    70    36    76  2819    70  1957     -    53 |  288   2.11
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    27    30     -     -     -     -    35     -     -    32 |  288   5.50
 ALGO |     -     -    27   125     -     -     -    29     -     -    36 |  288   0.03
 ALIC |     -    39     -    55     -     -     -     -     -     -     - |  288  11.10
 AMC2 |     -    38    14     -     -     -     -    16     -     -    21 |  288   0.02
 ARTU |     -    52     -    63    47     -     -    34     -     -     - |  288   9.68
 ASC1 |     -    46     -     -    41     -     -     -     -     -    38 |  286    >>>
 ASPA |     -     -     -     -    30     -     -     -     -     -    37 |  286    >>>
 AUCK |     -     -     -     X    28     -     -     -     -     -    33 |  208   8.99
 BAHR |     -     -    22     -    92     -     -    41     -     -   171 |  288   0.31
 BAN2 |     -     -    32     -     -     -     -     -     -     -    38 |  276  17.44
 BILI |     -    37     -     -    27     -     -     -     -     -     - |  274    >>>
 BOR1 |     -    33    23     -     -     -     -     -     -     -    28 |  249   0.75
 BREW |     -     -    82     -     -     -     -     -     -     -    97 |  288   0.05
 BRMU |     -     -     -     -    63     -     -     -     -     -    76 |  252    >>>
 BRUS |     -    46    18     -     -     -     -    33     -     -    14 |  288   0.02
 CAS1 |     -    33     -    46     -     -     -     -     -     -     - |  288   7.68
 CEDU |     -    51     -    71     -     -     -     -     -     -     - |  288  23.36
 CHAT |     -    50     -    32     -     -     -     -     -     -    39 |  287   9.26
 CHUR |     -   106   153     -     -     -     -    30     -     -    55 |  288   8.21
 COCO |     -    63     -    88     -     -     -     -     -     -     - |  288   9.37
 CORD |     -    50     -    69     -     -     -     -     -     -     - |  211  31.03
 CRO1 |     -     -    37    59    79     -     -    44     -     -    31 |  288  19.31
 DAKA |     -    16     -     -    11     -     -     -     -     -     - |  264  20.23
 DRAO |     -    41    22    66     -     -     -    30     -     -    23 |  288   0.13
 DWH1 |     -    79    38     -     -     -     -    46     -     -    50 |  288   0.59
 FAIR |     -     -    41   153    66     -     -    40     -     -    88 |  247   1.02
 FORT |     -    51    77     -    36     -     -    42     -     -    64 |  288   0.08
 GODE |     -    52    15    65     -     -     -     -     -     -    21 |  288   0.19
 GOLD |     -    23     X    63     -     -     -    18     -     -     X |  125  15.46
 GRAZ |     -     -    10     -     -     -     -     -     -     -    12 |  286    >>>
 GUAM |     -    71     -    68    37     -     -    33     -     -    27 |  273  12.84
 GUAT |     -    23     -     -    16     -     -     -     -     -    27 |  288    >>>
 HERS |     -     -    18     -     -     -     -     -     -     -    21 |  241  16.89
 HOB2 |     -    95    42    81     -     -     -     -     -     -     - |  288   0.05
 HRAO |     -     -     -     -     -     -     -    37     -     -    56 |  288   0.88
 IISC |     -   153     -    61    38     -     -     -     -     -   104 |  288  27.26
 JPLM |     -     -    22     -     -     -     -     -     -     -    27 |  288   2.76
 KERG |     -     -    31    33    30     -     -    28     -     -    28 |  288   1.87
 KGN0 |     -    78    50     -     -     -     -     -     -     -    28 |  287   0.55
 KIRU |     -    52     -    75     -     -     -     -     -     -    40 |  281   9.72
 KOSG |     -    28     -     -     -     -     -     -     -     -    24 |  288  23.59
 KOUR |     -    89     -    70    28     -     -     -     -     -    65 |  288   2.19
 LAE1 |     -     -     -     -    70     -     -    33     -     -   119 |  287  15.33
 LHAS |     -     -     -     -     -     -     -    67     -     -   101 |  280  22.88
 LPGS |     -    61    57    78     X     -     -    54     -     -    38 |  288 119.57
 MAC1 |     -    35     -    49     -     -     -     -     -     -     - |  252 351.82
 MAD2 |     -     -    98     -     -     -     -     X     -     -   117 |  251 266.21
 MAG0 |     -   108     -     -     -     -     -    63     -     -     - |  284   7.37
 MAS1 |     -     -    19    75     -     -     -    17     -     -    24 |  288   1.39
 MATE |     -     -     -    27     -     -     -     -     -     -    17 |  288   0.15
 MCM4 |     -    17     X     -    13     -     -     -     -     -     - |  288   6.56
 MDO1 |     -     -    17     -    20     -     -     -     -     -    26 |  288   9.13
 MEDI |     -     -    12     -     -     -     -     -     -     -    14 |  288    >>>
 METS |     -    24    18     -     -     -     -     -     -     -    12 |  287   7.93
 MIZU |     -     -    20     -     -     -     -     -     -     -    24 |  288   0.38
 MKEA |     -     -     -    46    41     -     -    24     -     -    26 |  288  24.38
 NKLG |     -     -     -    65     -     -     -    24     -     -    32 |  287    >>>
 NLIB |     -     -    15     -     -     -     -    10     -     -    18 |  288  38.01
 NNOR |     -     -    24    70     -     -     -    26     -     -    42 |  288  14.80
 NOUM |     -     -     -     -    29     -     -    23     -     -     - |  184    >>>
 NPLD |     -    51    44     -     -     -     -     -     -     -    24 |  287   0.02
 NRC1 |     -     -    14     -    12     -     -    12     -     -    17 |  288   0.02
 NRIL |     -     -     -     -    73     -     -    59     -     -     - |  245  15.64
 NTUS |     -    74     -     -     -     -     -    38     -     -    46 |  288   8.78
 NYA1 |     -     X     -     -    29     -     -     -     -     -    35 |  288   0.16
 NYAL |     -     -    14     -     -     -     -    14     -     -    15 |  288   0.17
 ONSA |     -     -    17    32     -     -     -     -     -     -     - |  288   0.03
 PDEL |     -    46     -     -    33     -     -     -     -     -     - |  288  52.94
 PERT |     -    70    25    76    38     -     -     -     -     -    49 |  288   1.32
 PIE1 |     -     -    18    85     -     -     -    25     -     -    21 |  288   0.04
 POL2 |     -    68     -     -     -     -     -     -     -     -    60 |  280  11.80
 POTS |     -    39     -     -    19     -     -     -     -     -    18 |  288  23.04
 PRDS |     -    27    27     -     -     -     -     -     -     -    21 |  288   1.81
 PTBB |     -    26    21     -     -     -     -     -     -     -    27 |  288   0.25
 QAQ1 |     -    43    16     -     -     -     -     -     -     -    48 |  287  10.18
 REYK |     -     -     -     -     -     -     -    46     -     -    68 |  265   6.53
 SANT |     -     X     -    57    30     -     -     -     -     -     X |  256  11.33
 SCH2 |     -    47    20     -     -     -     -     -     -     -    21 |  283 142.84
 SELE |     -     -     -     -     -     -     -    24     -     -    36 |  288  36.47
 SEY1 |     -     -     -     -    26     -     -     X     -     -    31 |  288  21.69
 SFER |     -    28    33     -     -     -     -     -     -     -    29 |  283   0.64
 SPT0 |     -    33    18     -     -     -     -     -     -     -    18 |  288   0.04
 STJO |     -     -    13     -     -     -     -    18     -     -    35 |  288   0.03
 SUTH |     -    53     -     -     -     -     -     -     -     -    47 |  288  14.91
 SUTM |     -     -    46     -    38     -     -    38     -     -     - |  288   3.14
 THTI |     -     -     -    34     -     -     -     -     -     -    21 |  119   1.46
 THU3 |     -     -    70     -    69     -     -     -     -     -     X |  261   7.05
 TIXI |     -    94     -     -     -     -     -    55     -     -     - |  269   8.51
 TLSE |     -     -    13     -     -     -     -     -     -     -    16 |  287   0.48
 TRO1 |     -    69     X     -    39     -     -     -     -     -    98 |  285  48.66
 TSKB |     -   123    24     -    40     -     -     -     -     -    36 |  288   1.63
 TWTF |     -    60    53     -     -     -     -     -     -     -    36 |  288   0.31
 UNSA |     -     -     -    88    35     -     -    39     -     -    57 |  287  16.82
 USN1 |     -    62    84     -     -     -     -    61     -     -    44 |  288   0.06
 USNO |     -    41    13     -     -     -     -     -     -     -    25 |  288   0.03
 USUD |     -     -    15    27     -     -     -     -     -     -    19 |  288 716.63
 VILL |     -    56     -    40     -     -     -     -     -     -    38 |  288   3.04
 WES2 |     -    49    28     -     -     -     -     -     -     -    21 |  288   0.11
 WHIT |     -    15     -     -     -     -     -     -     -     -    13 |  288   3.48
 WSRT |     -    16    25     -     -     -     -    23     -     -    13 |  288   0.03
 WTZR |     -    18    27     -     -     -     -    22     -     -    17 |  288   0.02
 WUHN |     -     -   234     -   230     -     -     -     -     -     X |  261  15.96
 YEBE |     -     -    35     -     -     -     -    24     -     -    14 |  288   0.07
 YELL |     -    23    13    72    18     -     -     -     -     -    41 |  288   0.05
 YSSK |     -    60     -     -    26     -     -    21     -     -     - |  287    >>>
 ZWEN |     -    43     -    26    33     -     -     -     -     -    18 |  288  13.01
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2782    66    51    82    50   125  2909    41  2712     -    58 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.94   | 3.47e-14  5.20e-15  1.32e-15 |
 ONSA |   288     0     0   288    9.58   | 3.88e-14  7.69e-15  2.08e-15 |
 NRC1 |   288     0     0   288    9.52   | 3.03e-14  4.88e-15  1.58e-15 |
 NPLD |   287     0     0   286    9.28   | 3.19e-14  7.32e-15  1.30e-15 |
 ALGO |   288     0     0   288    7.58   | 3.88e-14  7.65e-15  2.17e-15 |
 STJO |   288     0     0   288    6.63   | 3.70e-14  5.44e-15  1.43e-15 |
 WSRT |   288     0     0   288    6.30   | 2.71e-14  6.27e-15  2.51e-15 |
 SPT0 |   288     0     0   288    5.96   | 3.74e-14  5.86e-15  3.68e-15 |
 USNO |   288     0     0   288    5.11   | 3.65e-14  5.21e-15  2.65e-15 |
 BREW |   288     1     0   287    4.60   | 4.53e-14  1.05e-14  4.31e-15 |
 WTZR |   288     0     0   288    3.52   | 3.43e-14  6.63e-15  1.69e-15 |
 BRUS |   288     0     0   288    3.33   | 4.17e-14  6.25e-15  2.51e-15 |
 MAD2 |   251     1     0   249    2.32   | 7.47e-14  2.15e-14         - |
 NLIB |   288     1     0   287    2.09   | 3.88e-14  5.70e-15  4.35e-15 |
 PIE1 |   288     0     0   288    2.07   | 4.41e-14  6.72e-15  4.93e-15 |
 WES2 |   288     0     0   288    2.03   | 3.53e-14  1.60e-14  7.76e-15 |
 USN1 |   288     0     0   288    1.91   | 7.73e-14  2.33e-14  3.95e-15 |
 YELL |   288     0     0   288    1.77   | 2.90e-14  7.09e-15  2.75e-15 |
 DRAO |   288     0     0   288    1.55   | 7.83e-14  2.17e-14  9.06e-15 |
 FAIR |   247     0     0   242    1.06   | 8.42e-14  2.27e-14         - |
 YEBE |   288     0     0   288    0.62   | 9.57e-14  1.79e-14  7.77e-15 |
 HOB2 |   288     0     0   288    0.54   | 5.26e-14  1.77e-14  3.81e-15 |
 NYAL |   288     0     0   288    0.47   | 3.83e-14  8.69e-15  1.01e-14 |
 FORT |   288     0     0   143    0.45   | 8.29e-14  3.65e-14  7.04e-15 |
 GODE |   288     0     0   288    0.27   | 3.62e-14  7.39e-15  1.76e-14 |
 MATE |   288     0     0   143    0.22   | 4.58e-14  1.09e-14  1.33e-14 |
 G20  |   288     0     0   288    0.11   | 5.56e-13  7.81e-14  2.40e-14 |
 NYA1 |   288     0     0   288    0.10   | 3.46e-14  8.92e-15  1.01e-14 |
 KGN0 |   287     0     0   286    0.10   | 3.00e-13  7.30e-14  3.79e-14 |
 PTBB |   288     0     0   288    0.10   | 3.39e-13  6.94e-14  2.62e-14 |
 BAHR |   288     0     0   288    0.09   | 3.49e-13  8.96e-14  2.23e-14 |
 MIZU |   288     0     0   288    0.09   | 3.34e-13  9.29e-14  2.78e-14 |
 G04  |   288     0     0   288    0.08   | 4.51e-13  1.30e-13  3.12e-14 |
 TWTF |   288     0     0   288    0.07   | 3.90e-13  7.92e-14  3.14e-14 |
 G16  |   288     0     0   288    0.06   | 5.33e-13  7.61e-14  3.13e-14 |
 TLSE |   287     0     0   286    0.06   | 4.28e-13  1.15e-13  3.85e-14 |
 G30  |   288     0     0   288    0.06   | 3.35e-13  1.10e-13  2.76e-14 |
 HRAO |   288     0     0   288    0.05   | 1.53e-13  5.30e-14  9.85e-14 |
 SFER |   283     0     0   278    0.05   | 3.96e-13  9.78e-14  6.04e-14 |
 G26  |   288     0     0   288    0.05   | 3.54e-13  1.01e-13  5.67e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.24e-13  1.35e-13  3.72e-14 |
 G29  |   288     0     0   288    0.03   | 3.78e-13  1.29e-13  5.33e-14 |
 G17  |   288     0     0   288    0.03   | 4.60e-13  1.69e-13  7.94e-14 |
 G07  |   288     0     0   288    0.03   | 3.15e-13  1.05e-13  1.15e-13 |
 BOR1 |   249     0     0   112    0.01   | 4.24e-13  1.49e-13         - |
 G31  |   288     0     0   288    0.01   | 2.72e-13  1.50e-13  1.45e-13 |
 G13  |   288     0     3    11    0.01   | 5.51e-13  5.25e-14  2.21e-14 |
 G22  |   288     0     4    43    0.01   | 7.32e-13  8.15e-14  3.30e-14 |
 TSKB |   288     0     0   288    0.01   | 1.06e-12  3.32e-13  1.90e-13 |
 G25  |   288     0     0   288    0.01   | 1.48e-12  4.45e-13  8.36e-14 |
 KERG |   288     0     0   288    0.00   | 1.52e-12  4.70e-13  1.37e-13 |
 G05  |   288     0     0   288    0.00   | 1.38e-12  4.60e-13  1.55e-13 |
 PRDS |   288     0     0   288    0.00   | 1.59e-12  3.48e-13  1.63e-13 |
 KOUR |   288     0     0   288    0.00   | 1.56e-12  5.00e-13  2.54e-13 |
 G06  |   288     0     0   288    0.00   | 1.60e-12  3.76e-13  8.71e-14 |
 G09  |   288     0     0   288    0.00   | 1.32e-12  4.29e-13  3.38e-13 |
 G03  |   288     0     0   288    0.00   | 1.30e-12  4.36e-13  2.27e-13 |
 G10  |   287     0     0   286    0.00   | 1.24e-12  4.15e-13  2.35e-13 |
 WHIT |   288     0     1   248    0.00   | 5.35e-13  2.27e-13  2.13e-13 |
 SUTM |   288     0     0   288    0.00   | 7.10e-13  2.17e-13  1.92e-13 |
 THTI |   119     0     0   118    0.00   | 4.00e-13  1.40e-13         - |
 GPST |   288     0     0     0    0.00   | 1.71e-14  3.34e-15  1.40e-15 |
 GOLD |   125     0     0     0    0.00   |        -         -         - |
 MAC1 |   252     0     0     0    0.00   |        -         -         - |
 AUCK |   208     0     0     0    0.00   |        -         -         - |
 ASC1 |   286     0     0     0    0.00   |        -         -         - |
 YSSK |   287     3     0     0    0.00   |        -         -         - |
 WUHN |   261     0     0     0    0.00   |        -         -         - |
 TIXI |   269     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   284     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 DAKA |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   274     3     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 7.95e-13  8.56e-14  4.87e-14 |
 G27  |   260     0     0     0    0.00   |        -         -         - |
 G24  |   288     0     0     0    0.00   | 1.22e-12  4.59e-13  2.22e-13 |
 G21  |   288     1     6     0    0.00   | 1.03e-12  1.41e-13  3.79e-14 |
 G18  |   288     0     6     0    0.00   | 1.37e-12  1.34e-13  3.26e-14 |
 G15  |   288     0     0     0    0.00   | 1.59e-12  5.46e-13  2.65e-13 |
 G14  |   288     1     6     0    0.00   | 6.37e-13  6.64e-14  3.47e-14 |
 G11  |   288     0     4     0    0.00   | 6.99e-13  7.32e-14  4.49e-14 |
 G08  |   288     0     0     0    0.00   | 4.67e-13  3.33e-13  4.02e-13 |
 G01  |   288     0     0     0    0.00   | 1.76e-12  6.80e-13  4.51e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   | 1.09e-12  6.78e-13  2.66e-13 |
 USUD |   288     3     0     0    0.00   |        -         -         - |
 UNSA |   287     0     0     0    0.00   |        -         -         - |
 TRO1 |   285     1     0     0    0.00   |        -         -         - |
 THU3 |   261     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   283     0     0     0    0.00   |        -         -         - |
 SANT |   256     0     0     0    0.00   |        -         -         - |
 REYK |   265     0     0     0    0.00   |        -         -         - |
 QAQ1 |   287     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   280     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.91e-12  4.97e-13  9.83e-14 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   245     2     0     0    0.00   |        -         -         - |
 NOUM |   184     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     1     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 8.06e-13  1.12e-12  7.59e-13 |
 MCM4 |   288     0     0     0    0.00   | 6.51e-13  2.96e-13  4.71e-13 |
 MAS1 |   288     0     0     0    0.00   | 2.02e-12  4.21e-13  9.48e-14 |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   280     1     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.40e-13  6.40e-13  1.31e-12 |
 KIRU |   281     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.77e-13  2.21e-13  3.51e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   273     0     0     0    0.00   |        -         -         - |
 GRAZ |   286     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 CORD |   211     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   252     0     0     0    0.00   |        -         -         - |
 BAN2 |   276     0     0     0    0.00   |        -         -         - |
 ASPA |   286     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.88e-17  2.26e-16  1.35e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      NRC1      NPLD |
------------------------------------------+------------------------------+
