
 GPS week: 1259   Day: 5   MJD: 53062                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2592      0    -0.04     0.05     2.96     0.00
 cod |   288     0  24768     26     0.16    -0.13     0.04    24.14
 emr |   288     0  12356      0  1748.45    25.98     0.04    26.91
 esa |   288     0  17199   3882  1748.92    29.64     0.10     5.70
 iga |    96     0   2496     44    -0.03     0.07     0.07     0.00
 igu |    96     0   2592      0    -0.02     0.03     2.30     0.00
 jpl |   288     0  16219    187    -7.02     0.35     0.04    26.52
 ngs |    96     0   2592      0    -0.04     0.05     2.79     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  28291    959   257.91    12.93     0.06    16.74

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -3037   -19  -100   -71    18   680    29 -3020     -   187 |
    3 | -1359  -129   127    25   -33   711  -102 -1201     -    57 |
    4 | -1229    16   -66   -84    57   -45   154 -1293     -   -21 |
    5 | -4919    87   -77   -69   106 -6467    74 -4948     -   -42 |
    6 | -6347   146   -71   -74    48 -6870     X -5523     -   -75 |
    7 |   258    19   -23   -41    65 -1776   105   117     -   -58 |
    8 |  6689    52   -26  -126    31   581    70  5716     -   -54 |
    9 |   519   180    -6   -71  -190  2141    14   466     -  -294 |
   10 | -9465    -7    78   -91    60 -5945    18 -9157     -  -101 |
   11 |  4921    -2   -30   -54    27  1843    88  4871     -     X |
   13 |  3263    45  -115  -111   -25  1954    75  3513     -    96 |
   14 |  3727    -4    64   -19  -102  2153     5  3678     -   -96 |
   15 | -4603   -98   100   -52   108 -3363   -96 -5126     -    69 |
   16 |  5289   -62    69  -115   -80  1474    51  5326     -   -30 |
   17 | -3363    99    62   -43   195   373    73 -3431     -  -287 |
   18 |  2551   -20    71     X   -95  1342    31  2701     -  -108 |
   20 |  3939    21  -150     5    68  1849   121  3957     -   116 |
   21 |  4223    12    78  -103    -6   -45    36  4152     -  -143 |
   22 | -5746   -75   114   -49  -240 -2503   -11 -4975     -   -53 |
   24 |  2597    25    57   -94   -29 -2838    54  2289     -  -146 |
   25 | -3349    11   -78  -100  -137  1690    -2 -3471     -   142 |
   26 | -1486   133    -8   -60    53  2178    39 -1740     -  -194 |
   27 |  -843    96   -75   -69   -41 -3892    98  -869     -   -79 |
   28 |  4429     9    12  -114    24  6763    82  5128     -   -68 |
   29 | -3382    84    20     X     -  1830    55 -2880     -  -196 |
   30 |   -45   101   -54   -54    68  2244    91   -79     -  -113 |
   31 |  6856  -105    65   -13   110  4026   -63  5888     -   102 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -19     -     -     -     -    71     -     -   -85 |
 ALGO |     -     -  -143     X     -     -   201     -     -   -88 |
 AMC2 |     -   -36     -     -     -     -   -63     -     -   152 |
 AOML |     -  -176     -     -     -     -   115     -     -    70 |
 AREQ |     -    52     -   -13     -     -   -77     -     -    56 |
 ARTU |     -    33     -  -127     -     -    -6     -     -     - |
 ASC1 |     -   407     -     -     -     -     -     -     -  -586 |
 AUCK |     -     6     -     X     -     -     -     -     -    -9 |
 BAHR |     -   -37    30     -     -     -     0     -     -     4 |
 BRUS |     -    -2     -     -     -     -    10     -     -   -13 |
 CAGZ |     -    17     -     -     -     -     -     -     -   -24 |
 CAS1 |     -    19     -  -164     -     -    17     -     -    -5 |
 CEDU |     -   -25     -     X     -     -     -     -     -    36 |
 CHAT |     -   -47     -  -102     -     -     -     -     -    98 |
 CHUR |     -   161     -     -     -     -     -     -     -  -233 |
 COCO |     -    40     -   -82     -     -   -51     -     -    46 |
 CRO1 |     -     -     -  -133     -     -    26     -     -    -3 |
 DAV1 |     -    11     -     -     -     -    26     -     -   -66 |
 DRAO |     -    70    -4     -     -     -     -     -     -   -94 |
 DWH1 |     -   220     -     -     -     -  -109     -     -  -144 |
 FAIR |     -     -    36   -64     -     -   -15     -     -   -16 |
 GLPS |     -    33     -   -68     -     -   -17     -     -     - |
 GODE |     -     -     -   -98     -     -     -     -     -    33 |
 GOLD |     -  -144     -  -150     -     -   192     -     -     X |
 GUAM |     -     -     -  -114     -     -    58     -     -   -61 |
 GUAT |     -  -102     -     -     -     -     -     -     -   147 |
 HERS |     -  -251     -     -     -     -     -     -     -   361 |
 HOB2 |     -    97     -    22     -     -   -73     -     -   -32 |
 HRAO |     -     -     -     -     -     -   -68     -     -   107 |
 IISC |     -   -67     -  -155     -     -     -     -     -   142 |
 KERG |     -     -    22     X     -     -     -     -     -   -35 |
 KGN0 |     -    -6     -     -     -     -     -     -     -     8 |
 KIRU |     -     2     -     3     -     -     -     -     -    -4 |
 KOKB |     -     -   -25     -     -     -     -     -     -    40 |
 KOSG |     -   -68     -     -     -     -     -     -     -    98 |
 KOUR |     -    29     -  -123     -     -     -     -     -     - |
 LAE1 |     -     -     -     -     -     -    18     -     -   -28 |
 LPGS |     -     -     -     X     -     -    35     -     -   -56 |
 MAC1 |     -   -18     -   -95     -     -    -9     -     -    67 |
 MAG0 |     -   -81     -     -     -     -    74     -     -     - |
 MAS1 |     -     -    63   -85     -     -   -28     -     -   -32 |
 MAW1 |     -    54     -     -     -     -     -     -     -   -78 |
 MCM4 |     -   125  -112     -     -     -     -     -     -     - |
 MDO1 |     -     -   -19     -     -     -     -     -     -    31 |
 METS |     -   -14     -     -     -     -     -     -     -    21 |
 MKEA |     -     -     -   -50     -     -   -29     -     -    61 |
 NNOR |     -     -     -   -48     -     -   -68     -     -   121 |
 NRC1 |     -   -18   -24     -     -     -    21     -     -    31 |
 NRIL |     -    17     -     -     -     -   -15     -     -     - |
 NTUS |     -  -126     -     -     -     -   -13     -     -   201 |
 NYAL |     -     -    38     -     -     -     -     -     -   -61 |
 OHI2 |     -    32     -     -     -     -   -29     -     -     - |
 ONSA |     -    -3     -    14     -     -     -     -     -     - |
 PERT |     -     -     -   -66     -     -     -     -     -    23 |
 PIE1 |     -     -     -  -166     -     -    38     -     -   -13 |
 POL2 |     -   -45     -     -     -     -     -     -     -    65 |
 POTS |     -    -8     -     -     -     -     -     -     -    12 |
 PRDS |     -  -104     -     -     -     -     -     -     -   150 |
 PTBB |     -     6     -     -     -     -     -     -     -    -9 |
 REYK |     -  -136     -     -     -     -    50     -     -   116 |
 RIOG |     -    12     -   -51     -     -     -     -     -     X |
 SPT0 |     -   -44     -     -     -     -     -     -     -    63 |
 STJO |     -   -91    -2     -     -     -    31     -     -    85 |
 SUTH |     -   -19     -     -     -     -     -     -     -    27 |
 TIXI |     -    39     -     -     -     -   -35     -     -     - |
 TOW2 |     -   -45     -     -     -     -    41     -     -     - |
 TRO1 |     -  -134     -     -     -     -   -73     -     -   313 |
 TSKB |     -   -80    75     -     -     -     -     -     -    -5 |
 TWTF |     -   -67     -     -     -     -     -     -     -    96 |
 UNSA |     -     -     -  -144     -     -     -     -     -    49 |
 USN1 |     -   276     -     -     -     -  -353     -     -   160 |
 USNO |     -   -70   102     -     -     -     -     -     -   -63 |
 USUD |     -     -     -   -85     -     -     5     -     -    17 |
 VILL |     -    17     -   -62     -     -     -     -     -    -5 |
 WES2 |     -     -   -26     -     -     -     -     -     -    42 |
 WHIT |     -  -101     -     -     -     -     -     -     -   145 |
 WSRT |     -    17     -     -     -     -    -7     -     -   -12 |
 WTZR |     -    40     -  -142     -     -   -35     -     -    38 |
 WUHN |     -     -     -     -     -     -    -7     -     -    11 |
 YEBE |     -     -     -     -     -     -   -57     -     -    90 |
 YELL |     -    38    94   -31     -     -  -123     -     -    -2 |
 ZWEN |     -   -40     -   -62     -     -     -     -     -    76 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3763    36    49    65    40  3634    25  3793     -    74 |  288   3.13
    3 |  2518    38    30    65    88  2239    45  2610     -   101 |  288   2.09
    4 |   817    30    25    96    55   725    31   932     -    53 |  288   0.81
    5 |  2502    52    28    47    61  3336    38  2447     -    78 |  288   2.05
    6 |  2967    30    36    51    47  2739     X  3261     -    34 |  288   1.35
    7 |  1706    41    34    57    50   547    58  1769     -   131 |  288   0.40
    8 |  5019    30    27    79    55  1639    29  4115     -    37 |  288   2.56
    9 |  2382    50    39    64   238  2198    26  2337     -    94 |  288   2.31
   10 |  3191    54    46   107   100  3106    70  3231     -    77 |  288   1.62
   11 |   925    32    54    53    71   874    62   743     -     X |  288   0.41
   13 |   606    46    46   102    45  1173    23   591     -   119 |  288   0.19
   14 |   441    32    40    92    39   897    45   443     -    40 |  288   0.33
   15 |  5561    52    16    76    73  3784    31  5601     -    76 |  288   3.70
   16 |  1180    68    65    85    37   906    90  1243     -    59 |  288   0.34
   17 |  1977    33    61   101    49   717    35  1951     -   124 |  288   0.77
   18 |   855    65    54     X    80   862    51   911     -    38 |  288   0.38
   20 |  1229    56    36   105    68  1149    47  1209     -    42 |  288   0.35
   21 |   522    29    47    83    64   383    60   503     -    51 |  288   0.36
   22 |  2786    64    52    62    87  1290    38  2385     -    83 |  288   0.60
   24 |  2589    30    19   107    44  1140    16  2503     -    46 |  288   2.23
   25 |  2703    55    29    76    59  3065    20  2494     -    52 |  288   2.54
   26 |  1244    50    31   110    33   983    29  1122     -    58 |  288   0.45
   27 |  1125    30    24    97    89  3023    42  1189     -    44 |  288   1.12
   28 |  5966    51    28    94    77  5041    51  5568     -    50 |  288   0.50
   29 |  3609    99    84     X     -  1552    51  3212     -    88 |  288   0.75
   30 |  1466    42    31    47    89  1820    81  1492     -    70 |  288   0.81
   31 |  6631    33    48    70    77  3807    31  5804     -    82 |  288   2.61
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    38     -     -     -     -    24     -     -    32 |  288   6.26
 ALGO |     -     -    12     X     -     -    25     -     -    32 |  288   0.05
 AMC2 |     -    32     -     -     -     -    31     -     -    26 |  288   0.02
 AOML |     -    17     -     -     -     -    20     -     -    29 |  288  29.06
 AREQ |     -    32     -    79     -     -    52     -     -    94 |  288  13.96
 ARTU |     -    19     -    85     -     -    11     -     -     - |  288  13.07
 ASC1 |     -    93     -     -     -     -     -     -     -   135 |  277    >>>
 AUCK |     -    25     -     X     -     -     -     -     -    36 |  264   9.14
 BAHR |     -    33    26     -     -     -    18     -     -    30 |  288   0.27
 BRUS |     -    16     -     -     -     -    15     -     -    31 |  288   0.02
 CAGZ |     -    73     -     -     -     -     -     -     -   106 |  286   0.55
 CAS1 |     -    41     -   107     -     -    28     -     -    34 |  288   8.06
 CEDU |     -    24     -     X     -     -     -     -     -    34 |  288  27.86
 CHAT |     -    18     -    59     -     -     -     -     -    31 |  287  10.14
 CHUR |     -    14     -     -     -     -     -     -     -    20 |  283   4.42
 COCO |     -    23     -   136     -     -    30     -     -    31 |  288   9.53
 CRO1 |     -     -     -   180     -     -    65     -     -    95 |  288  20.11
 DAV1 |     -    82     -     -     -     -    76     -     -    28 |  288  15.87
 DRAO |     -    45    32     -     -     -     -     -     -    26 |  288   0.06
 DWH1 |     -    44     -     -     -     -    27     -     -    34 |  288   0.84
 FAIR |     -     -    18    64     -     -    20     -     -    17 |  288   0.03
 GLPS |     -    23     -    51     -     -    19     -     -     - |  288  24.90
 GODE |     -     -     -   118     -     -     -     -     -    40 |  280   0.11
 GOLD |     -    35     -   145     -     -    45     -     -     X |  288  15.22
 GUAM |     -     -     -   117     -     -    49     -     -    69 |  282  13.09
 GUAT |     -    15     -     -     -     -     -     -     -    22 |  273    >>>
 HERS |     -    20     -     -     -     -     -     -     -    29 |  264  32.37
 HOB2 |     -    43     -    69     -     -    32     -     -    35 |  288   0.05
 HRAO |     -     -     -     -     -     -    47     -     -    74 |  288   0.53
 IISC |     -   100     -    76     -     -     -     -     -   156 |  288  27.68
 KERG |     -     -    16     X     -     -     -     -     -    25 |  288   1.46
 KGN0 |     -    34     -     -     -     -     -     -     -    49 |  287   0.69
 KIRU |     -    25     -    74     -     -     -     -     -    31 |  288  10.09
 KOKB |     -     -    27     -     -     -     -     -     -    44 |  288   0.06
 KOSG |     -    17     -     -     -     -     -     -     -    25 |  288  24.14
 KOUR |     -    27     -   116     -     -     -     -     -     - |  251   2.06
 LAE1 |     -     -     -     -     -     -    31     -     -    49 |  287  15.06
 LPGS |     -     -     -     X     -     -    52     -     -    82 |  288  51.36
 MAC1 |     -    53     -    80     -     -    36     -     -    32 |  288  12.69
 MAG0 |     -    35     -     -     -     -    31     -     -     - |  287   9.76
 MAS1 |     -     -    22    43     -     -    21     -     -    17 |  288   1.52
 MAW1 |     -    17     -     -     -     -     -     -     -    25 |  288  28.05
 MCM4 |     -    25    22     -     -     -     -     -     -     - |  288  15.47
 MDO1 |     -     -    98     -     -     -     -     -     -   157 |  272  28.03
 METS |     -    12     -     -     -     -     -     -     -    17 |  287   8.61
 MKEA |     -     -     -   137     -     -    29     -     -    34 |  284  19.65
 NNOR |     -     -     -    78     -     -    40     -     -    65 |  288  17.25
 NRC1 |     -    36    16     -     -     -    28     -     -    13 |  288   0.02
 NRIL |     -    15     -     -     -     -    14     -     -     - |  259  12.02
 NTUS |     -    18     -     -     -     -    26     -     -    36 |  288   8.83
 NYAL |     -     -    10     -     -     -     -     -     -    16 |  288   0.07
 OHI2 |     -    24     -     -     -     -    22     -     -     - |  287   7.27
 ONSA |     -    25     -   104     -     -     -     -     -     - |  242   0.05
 PERT |     -     -     -   153     -     -     -     -     -    52 |  274   2.61
 PIE1 |     -     -     -   213     -     -    31     -     -    36 |  288   0.04
 POL2 |     -    17     -     -     -     -     -     -     -    24 |  288  14.48
 POTS |     -    12     -     -     -     -     -     -     -    17 |  286  23.21
 PRDS |     -    23     -     -     -     -     -     -     -    32 |  288   2.42
 PTBB |     -    40     -     -     -     -     -     -     -    58 |  288   0.28
 REYK |     -    16     -     -     -     -    18     -     -    17 |  288   7.94
 RIOG |     -    27     -   116     -     -     -     -     -     X |  242   9.80
 SPT0 |     -    16     -     -     -     -     -     -     -    23 |  288   0.04
 STJO |     -    17    15     -     -     -    24     -     -    21 |  288   0.08
 SUTH |     -    14     -     -     -     -     -     -     -    20 |  288  15.10
 TIXI |     -    15     -     -     -     -    14     -     -     - |  287   8.56
 TOW2 |     -    37     -     -     -     -    34     -     -     - |  288  14.41
 TRO1 |     -    36     -     -     -     -    44     -     -    65 |  286   9.54
 TSKB |     -    35    18     -     -     -     -     -     -    30 |  288   1.25
 TWTF |     -    24     -     -     -     -     -     -     -    35 |  288   0.45
 UNSA |     -     -     -   130     -     -     -     -     -    44 |  273  19.93
 USN1 |     -    42     -     -     -     -    37     -     -    21 |  288   0.03
 USNO |     -    23    22     -     -     -     -     -     -    15 |  288   0.03
 USUD |     -     -     -    80     -     -    16     -     -    29 |  288  14.77
 VILL |     -    19     -    77     -     -     -     -     -    13 |  288   3.13
 WES2 |     -     -     8     -     -     -     -     -     -    12 |  288   3.63
 WHIT |     -    26     -     -     -     -     -     -     -    37 |  286   0.86
 WSRT |     -    15     -     -     -     -    14     -     -    15 |  288   0.04
 WTZR |     -    18     -   130     -     -    14     -     -    19 |  288   0.04
 WUHN |     -     -     -     -     -     -    23     -     -    36 |  286  16.56
 YEBE |     -     -     -     -     -     -    21     -     -    34 |  288   0.09
 YELL |     -    50    43   115     -     -    29     -     -    28 |  288   0.07
 ZWEN |     -    24     -    63     -     -     -     -     -    26 |  288  12.04
 -----+-------------------------------------------------------------+--------------
 TOT  |  2964    40    39    98    74  2295    37  2795     -    57 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

