
 GPS week: 1257   Day: 3   MJD: 53046                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2783      0     0.00    -0.01     3.37     0.00
 cod |   288     0  25655    493    -0.40    -0.04     0.04    19.79
 emr |   288     0  19658    307  1335.37    25.49     0.04    23.92
 esa |   288     0  17962    298  3033.29    15.53     0.06    12.14
 gfz |   288     0  20445     55     0.14    -0.20     0.04    19.03
 iga |    96     0   2783      2     0.00     0.00     0.09     0.00
 igu |    96     0   2687     16     0.12    -0.80     3.07     0.00
 jpl |   288     0  14676      0    -5.13     0.68     0.03    25.12
 ngs |    96     0   2783      0     0.00    -0.01     3.24     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------------+
    1 | -2891    65   -80  -153    81   -30 -8321    74 -2217     - |
    2 | -9510    21  -108    23    41   185 -5438    87 -9614     - |
    3 | -3699    -9   -82    78    20   -28 -1256    66 -3677     - |
    4 |  1238   -82    23    18   -17  -131  2523    94  1136     - |
    5 |  3078     4    54   310  -312   218  2835    64  2282     - |
    6 | -2747   -17  -111   136    82  -137    55   -18 -2706     - |
    7 |   -28   -79   -93   -74   233    89  -877    21  -106     - |
    8 | -4882    33   -28  -146    51  -116 -9701    70 -4865     - |
    9 | -2947     2     1   147  -128   -54 -4312    47 -4212     - |
   10 |  -791   -12   -28   -89   144   -45  2755   -60  -921     - |
   11 |  6724   -48    23   -73    78   148  3019   -16  9363     - |
   13 |  6156    82   -57  -210    52  -150  1253   105  6082     - |
   14 |  4058   178  -109    -1   -64   100   239    25  4121     - |
   15 | -5816    16     7   173  -110   228 -4857   -40 -4890     - |
   16 |  4708   -26  -117   -85   148   171  1750   121  4633     - |
   17 | -1710   -92   -23   -33   173     5  1497    -1 -1984     - |
   18 |  4432    53   -40   128   -96   109  1173    13  4214     - |
   20 |  7079     8  -126    26    52   102  4392   124  6796     - |
   21 |  1321    54    14   144  -144   127  2227   -33  1427     - |
   22 | -1593   145     7    94  -258   -63 -1698    58 -1601     - |
   23 |  1315     2  -111   152   208   -26-11036  -226   661     - |
   24 |  -137   -60    37    91   -20   -97 19285   -33  -445     - |
   25 |  3680    89  -177    34     9   -71 11007   152  3282     - |
   26 | -4147   -28   -64   123     4  -229  6908    42 -3574     - |
   27 | -2742   -66  -123  -232   344  -265 -5936    42 -2608     - |
   28 |  6551    24    24  -235    72    51  6827    33  6283     - |
   29 | -1602    -9   -40    55    -1  -224     -    47 -1566     - |
   30 |   969   -21   -93   211    10   -73 -3338   -10   158     - |
   31 | -6087   -20   -35   -45   158   206 -7618   -97 -5476     - |
 -----+-------------------------------------------------------------+
 ALBH |     -    49   -40     -     -     -     -     0     -     - |
 ALGO |     -    -5    -8    51   -84     -     -    50     -     - |
 AMC2 |     -   -77   168     -     -     -     -   -99     -     - |
 ANKR |     -   -36     -     -     -     -     -    28     -     - |
 AREQ |     -   -27    32   223   -39     -     -   -89     -     - |
 ARTU |     -    24     -   -44   -65     -     -    50     -     - |
 ASC1 |     -   200     -     -  -208     -     -     -     -     - |
 BAHR |     -   -53    12     -    34     -     -     5     -     - |
 BILI |     -    89     -     -   -93     -     -     -     -     - |
 BOGT |     -  -193     -   315     -     -     -     -     -     - |
 BRUS |     -     -    25     -     -     -     -   -24     -     - |
 CAS1 |     -     1     -    19   -57     -     -    34     -     - |
 CEDU |     -  -267     -   434     -     -     -     -     -     - |
 CHAT |     -   -43     -    70     -     -     -     -     -     - |
 COCO |     -    50     -  -140   103     -     -   -50     -     - |
 CORD |     -    19     -     -   127     -     -  -111     -     - |
 CRO1 |     -     -   -21   -58   -59     -     -    87     -     - |
 DARW |     -   -63    52     -     -     -     -     -     -     - |
 DAV1 |     -     3     -     -    -3     -     -     -     -     - |
 DRAO |     -    57   -47     -     -     -     -     -     -     - |
 DWH1 |     -     -    64     -     -     -     -   -61     -     - |
 FAIR |     -     -    29   -53  -165     -     -   117     -     - |
 FORT |     -   317     -     -  -330     -     -     -     -     - |
 GLPS |     -   -16     -   -18    44     -     -   -12     -     - |
 GODE |     -   -40    34    -1     -     -     -     -     -     - |
 GOLD |     -    70     X   190     -     -     -  -147     -     - |
 GUAM |     -   208     -  -460   312     -     -  -179     -     - |
 GUAT |     -   -99     -     -   103     -     -     -     -     - |
 HOB2 |     -    46   181   -20     -     -     -  -199     -     - |
 HRAO |     -     6     -     -   -73     -     -    50     -     - |
 IISC |     -     -     -  -102    65     -     -     -     -     - |
 KERG |     -    10   189   -95  -187     -     -     -     -     - |
 KIRU |     -   -61     -    -8     -     -     -    53     -     - |
 KOKB |     -   -69    45     -    15     -     -     -     -     - |
 KOUR |     -   -37     -    -4    41     -     -     -     -     - |
 LAE1 |     -  -135     -  -187     -     -     -   184     -     - |
 MAC1 |     -    25     -    15   -34     -     -     -     -     - |
 MAG0 |     -   -56     -     -     -     -     -    44     -     - |
 MAS1 |     -    -4     8    15   -67     -     -    38     -     - |
 MAW1 |     -   123     -     -  -128     -     -     -     -     - |
 MCM4 |     -   305  -220     -   -91     -     -     -     -     - |
 MDO1 |     -   -21   -52     -    88     -     -     -     -     - |
 METS |     -   -52    43     -     -     -     -     -     -     - |
 MKEA |     -    50     -    -1   -81     -     -    22     -     - |
 NKLG |     -   -43     -    22    17     -     -    11     -     - |
 NLIB |     -     -   121     -     -     -     -  -115     -     - |
 NNOR |     -     -   112  -221     -     -     -     -     -     - |
 NPLD |     -  -108    90     -     -     -     -     -     -     - |
 NRIL |     -     X     -     -    19     -     -   -14     -     - |
 OHI2 |     -    40     -     -   -25     -     -   -13     -     - |
 ONSA |     -     -   101  -163   -37     -     -     -     -     - |
 PERT |     -     -    78  -193    26     -     -     -     -     - |
 PIE1 |     -     -     6   -12     -     -     -     -     -     - |
 PIMO |     -     -     -   162  -103     -     -     -     -     - |
 POL2 |     -    32     -     -     -     -     -   -25     -     - |
 PRDS |     -   -61    50     -     -     -     -     -     -     - |
 REUN |     -    36     -     -   -37     -     -     -     -     - |
 REYK |     -  -143     -     -     -     -     -   112     -     - |
 RIOG |     -   -31     -    51     -     -     -     -     -     - |
 SANT |     -     -     -  -576   367     -     -     -     -     - |
 SCH2 |     -     9    -7     -     -     -     -     -     -     - |
 STJO |     -   -48   -78     -     -     -     -   112     -     - |
 THU3 |     -    45    29     -   -83     -     -     -     -     - |
 TIDB |     -    14    39     -   -63     -     -     -     -     - |
 TIXI |     -    46     -     -   -48     -     -     -     -     - |
 TSKB |     -   -72    31     -    35     -     -     -     -     - |
 USN1 |     -     -   265     -     -     -     -  -253     -     - |
 USNO |     -   -92    76     -     -     -     -     -     -     - |
 USUD |     -   -13   -90    13     -     -     -    89     -     - |
 VILL |     -   -21     -    68   -22     -     -     -     -     - |
 WSRT |     -   -88    91     -   -51     -     -    22     -     - |
 WTZR |     -   -17    -6   -24     -     -     -    30     -     - |
 YAR2 |     -  -119    98     -     -     -     -     -     -     - |
 YEBE |     -     -    75     -     -     -     -   -71     -     - |
 YELL |     -     X  -180   181   122     -     -   -44     -     - |
 YSSK |     -    95     -     -   -99     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6949    35    39    24    20    89  2646    30  6901     - |  288   4.68
    2 |  3095    40    23    58    51    43  3625    47  3001     - |  288   2.46
    3 |  1610    24    33    59    49   144  1232    30  1710     - |  288   1.24
    4 |  1024    36    34    41    37    84   943    35   999     - |  288   0.73
    5 |  5394    39    26    31    19    52  1697    28  5183     - |  288   2.30
    6 |  5653    18    16    29    30    37  2576    37  5717     - |  288   4.88
    7 |   867    47    37    48    18    91   613    20   911     - |  288   0.55
    8 |  3268    49    39   105    27   124  5101    27  3352     - |  288   3.08
    9 |  8404    54    27    63    27   119  3031    33  7423     - |  288   2.44
   10 |  2272    46    30    64    34    61  2191    27  2588     - |  288   1.89
   11 |  1442    50    37    85    43   125  1537    28  2332     - |  288   0.34
   13 |  1076    63    69    43   168    63  1812    43  1165     - |  288   0.72
   14 |   536    43    33    63    22    69   631    46   561     - |  288   0.27
   15 |  6597    34    26    35    21    68  2919    35  6063     - |  288   2.82
   16 |   800    48    32   123    25    30   787    33   742     - |  288   0.26
   17 |  1687    92    68    56    36   117  1221    39  1526     - |  284   0.89
   18 |   610    47    38    57    21    95   758    32   549     - |  288   0.43
   20 |  1430    50    43    40    23    79  2115    27  1544     - |  288   0.36
   21 |   512    43    29    55    25    82  1073    17   476     - |  288   0.42
   22 |   765    53    39    63    34    82   889    51   811     - |  288   0.38
   23 |  2876    71    46   118    47    83  5796    63  2735     - |  288   1.34
   24 |  2326    41    20    71    30   108  8459    39  2447     - |  288   2.49
   25 |  2846    68    74    34    51    60  4704    37  2658     - |  288   2.32
   26 |  4081    48    24    31    27    50  3162    49  3859     - |  288   0.67
   27 |  1648    45    56    62    29    65  3302    34  1718     - |  288   0.76
   28 |  2015    41    24    50    29   119  2322    27  1741     - |  288   1.03
   29 |  1127    44    50    86    62    68     -    47  1214     - |  288   0.65
   30 |  4059    40    39    36    22    61  3416    51  3359     - |  288   1.19
   31 |  2419    22    33    59    22   140  3880    29  3131     - |  288   1.17
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    23    19     -     -     -     -    13     -     - |  288   5.48
 ALGO |     -    66    23    24    33     -     -    17     -     - |  288   0.03
 AMC2 |     -    45    19     -     -     -     -    31     -     - |  288   0.04
 ANKR |     -    21     -     -     -     -     -    17     -     - |  288  11.49
 AREQ |     -    70    21    61    22     -     -    54     -     - |  288  18.18
 ARTU |     -    49     -    40    40     -     -    24     -     - |  281  13.47
 ASC1 |     -    15     -     -    15     -     -     -     -     - |  284    >>>
 BAHR |     -    27    22     -    24     -     -    26     -     - |  287   0.35
 BILI |     -    49     -     -    51     -     -     -     -     - |  272  10.01
 BOGT |     -    42     -    68     -     -     -     -     -     - |  190  13.58
 BRUS |     -     -    22     -     -     -     -    21     -     - |  288   0.02
 CAS1 |     -    48     -    44    17     -     -    39     -     - |  288   8.52
 CEDU |     -    28     -    45     -     -     -     -     -     - |  288  21.67
 CHAT |     -    46     -    75     -     -     -     -     -     - |  287  10.53
 COCO |     -    26     -    83    32     -     -    27     -     - |  288   8.68
 CORD |     -    38     -     -    31     -     -    38     -     - |  288  11.85
 CRO1 |     -     -    42    48    96     -     -    45     -     - |  286  28.45
 DARW |     -    40    33     -     -     -     -     -     -     - |  288   6.59
 DAV1 |     -    19     -     -    19     -     -     -     -     - |  288  15.70
 DRAO |     -    26    22     -     -     -     -     -     -     - |  288   0.10
 DWH1 |     -     -    19     -     -     -     -    18     -     - |  288   0.70
 FAIR |     -     -    47    67    56     -     -    56     -     - |  248   1.42
 FORT |     -    38     -     -    40     -     -     -     -     - |  259   0.16
 GLPS |     -    15     -    88    28     -     -    32     -     - |  288  25.41
 GODE |     -    22    14    43     -     -     -     -     -     - |  288   0.13
 GOLD |     -    17     X    30     -     -     -    17     -     - |  259  15.93
 GUAM |     -    38     -    97    33     -     -    20     -     - |  288  16.65
 GUAT |     -    30     -     -    31     -     -     -     -     - |  282    >>>
 HOB2 |     -    49    28    32     -     -     -    28     -     - |  288   0.04
 HRAO |     -    40     -     -    40     -     -    21     -     - |  288   0.87
 IISC |     -     -     -    27    17     -     -     -     -     - |  288  32.66
 KERG |     -    26    24    48    33     -     -     -     -     - |  288   1.35
 KIRU |     -    59     -    86     -     -     -    53     -     - |  285   8.95
 KOKB |     -    23    11     -    23     -     -     -     -     - |  288   0.06
 KOUR |     -    40     -    45    32     -     -     -     -     - |  288   2.50
 LAE1 |     -    26     -    53     -     -     -    33     -     - |  286  11.90
 MAC1 |     -    33     -   116    66     -     -     -     -     - |  287  15.68
 MAG0 |     -    32     -     -     -     -     -    26     -     - |  286   9.64
 MAS1 |     -    29    16    31    21     -     -    18     -     - |  286   1.84
 MAW1 |     -    24     -     -    25     -     -     -     -     - |  288  25.85
 MCM4 |     -    75    44     -   108     -     -     -     -     - |  288   5.07
 MDO1 |     -    43    18     -    31     -     -     -     -     - |  288  15.99
 METS |     -    18    15     -     -     -     -     -     -     - |  287   9.15
 MKEA |     -    40     -    32    39     -     -    20     -     - |  288  20.46
 NKLG |     -    22     -    41    30     -     -    33     -     - |  287    >>>
 NLIB |     -     -    36     -     -     -     -    35     -     - |  286 171.06
 NNOR |     -     -    19    37     -     -     -     -     -     - |  288  15.39
 NPLD |     -    40    33     -     -     -     -     -     -     - |  287   0.03
 NRIL |     -     X     -     -    19     -     -    14     -     - |  239  13.67
 OHI2 |     -    39     -     -    23     -     -    21     -     - |  288  24.77
 ONSA |     -     -    15    56    41     -     -     -     -     - |  251    >>>
 PERT |     -     -    31    29    43     -     -     -     -     - |  288   1.61
 PIE1 |     -     -    20    40     -     -     -     -     -     - |  288   0.08
 PIMO |     -     -     -    79    50     -     -     -     -     - |  280  25.16
 POL2 |     -    20     -     -     -     -     -    16     -     - |  288  14.74
 PRDS |     -    23    19     -     -     -     -     -     -     - |  287   2.45
 REUN |     -    22     -     -    23     -     -     -     -     - |  270  26.07
 REYK |     -    24     -     -     -     -     -    19     -     - |  288   8.62
 RIOG |     -    11     -    18     -     -     -     -     -     - |   95   8.31
 SANT |     -     -     -    46    30     -     -     -     -     - |  262   5.49
 SCH2 |     -    16    13     -     -     -     -     -     -     - |  288  90.07
 STJO |     -    39    22     -     -     -     -    13     -     - |  288   0.02
 THU3 |     -    42    83     -    65     -     -     -     -     - |  288  10.68
 TIDB |     -    57    39     -    23     -     -     -     -     - |  288   0.08
 TIXI |     -    13     -     -    13     -     -     -     -     - |  286  10.26
 TSKB |     -    41    32     -    21     -     -     -     -     - |  288   1.39
 USN1 |     -     -    11     -     -     -     -    10     -     - |  288   0.03
 USNO |     -    13    11     -     -     -     -     -     -     - |  288   0.03
 USUD |     -    45    40    36     -     -     -    15     -     - |  288  13.72
 VILL |     -    23     -    44    14     -     -     -     -     - |  288   5.34
 WSRT |     -    22    32     -    25     -     -    25     -     - |  288   0.03
 WTZR |     -    65    17    32     -     -     -    47     -     - |  287   0.13
 YAR2 |     -    38    32     -     -     -     -     -     -     - |  285   8.73
 YEBE |     -     -    20     -     -     -     -    19     -     - |  288   0.11
 YELL |     -     X   106    93    89     -     -   109     -     - |  288   0.11
 YSSK |     -    21     -     -    22     -     -     -     -     - |  287  12.07
 -----+-------------------------------------------------------------+--------------
 TOT  |  3368    41    36    60    43    88  3066    35  3244     - |


 BEST CLOCK FIT: STJO   288   0.02 (ns) 

