
 GPS week: 1257   Day: 0   MJD: 53043                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2784      9    -0.27    -0.46     3.64     0.00
 cod |   288     0  27506    289    -0.02    -0.44     0.04    18.35
 emr |   288     0  21160    291  1265.30    23.07     0.03    22.23
 esa |   288     0  19069   2183     0.96    -0.01     0.07     7.99
 gfz |   288     0  20446    298     0.68    -0.96     0.03    20.60
 iga |    96     0   2784      1    -0.09    -0.95     0.10     0.00
 igu |    96     0   2688      0    -0.08    -0.99     2.65     0.00
 jpl |   288     0  13900    185    -3.82    -2.08     0.05    13.41
 ngs |    96     0   2784      3    -0.21    -0.70     3.56     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31596    548     7.57    11.46     0.04    17.43

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -2438    36   -58   -74    -3     4  7817    72 -2981     -    47 |
    2 |  1137   -88   -19     5     8    78  6534   -15  1305     -   111 |
    3 | -1355   -80    16    45   -90    38 -1073   -35 -1172     -   165 |
    4 | -1016     2     0   108   117   -51  -952    22  -944     -  -195 |
    5 | -4658   -81   -79   130   159   -12 -7651   -72 -4763     -   -32 |
    6 |  5580    47   -38   -84     9   -68  4861   -72  4405     -    53 |
    7 | -1882   -48   -58     9   309   126  -325  -110 -1651     -  -199 |
    8 |  -320   149    20   -80   -59    25  4343   198   150     -  -161 |
    9 | -6048   128   -27  -152    73  -267 -3677    41 -6018     -  -135 |
   10 | -1784   122    21   -96    63   115 -2545    -5 -1774     -  -183 |
   11 |  1648   -31   -48   -91   -12     3 -1396   -54  1872     -   171 |
   13 |  4458   101   -41    77   -33   -25   490   252  4555     -  -142 |
   14 |  7877    60   -43   -19  -187    52  1700    58  7941     -   197 |
   15 |  3937   -63   -57   -21   -21   144 13094   -88  2862     -   210 |
   16 |  3581   -81   -16   -75    32   -36    -4    50  3764     -    83 |
   17 | -2793   -35    42   -49   125   138 -2416   -28 -2606     -  -132 |
   18 |  4505    13   -39   220   -33   161   316   -76  4381     -     7 |
   20 |  6204   -32  -106   193    52    50  1167   176  6210     -   -50 |
   21 |   -95    63    -2   -79   -44   -11  -601    47   435     -     8 |
   22 | -2437    79    35    53  -346    13 -2877   142 -2327     -   199 |
   23 |-25541   105    -1     X  -166    54 -5779   220-22859     -     - |
   24 |  1233   -19    32   119    23    -5     -     X  1260     -   -95 |
   25 | -2386    43  -143  -201   -14  -150 -2298   158 -2873     -   177 |
   26 |  1166   115  -106   -82   181  -226  -461   147  1188     -  -229 |
   27 |   202    50     1   -56    94   -77 -6762   206   -30     -  -220 |
   28 |  7247   145    46     X   -24    35 -4753   153  6943     -  -240 |
   29 | -2803   105   -28   -12    71  -169  -273   126 -2519     -  -200 |
   30 |     7    25   -28   -21   118  -117 -2330   -60   -52     -   -97 |
   31 |  6549   -85   -33   -26    61   179  5850  -128  5182     -   116 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    34   -12     -     -     -     -    -3     -     -   -19 |
 ALGO |     -   -99  -191     X     -     -     -   482     -     -   -23 |
 ALIC |     -    50     -  -114     -     -     -     -     -     -     - |
 AMC2 |     -  -120   106     -     -     -     -  -114     -     -    78 |
 AOML |     -  -221     -     -     -     -     -    98     -     -   158 |
 AREQ |     -    76    26     -   -38     -     -   -65     -     -   -15 |
 ARTU |     -     -     -   105   -51     -     -    16     -     -     - |
 ASC1 |     -   329     -  -471  -221     -     -     -     -     -    83 |
 AUCK |     -  -157     -     X   513     -     -  -294     -     -  -215 |
 BAHR |     -   -25    42    38    -1     -     -     -     -     -   -43 |
 BILI |     -    24     -    90   -56     -     -     -     -     -     - |
 BOGT |     -   130     -     X     -     -     -     -     -     -  -137 |
 BOR1 |     -     -    -1     -     -     -     -     -     -     -     2 |
 BREW |     -     -    13     -     -     -     -     -     -     -   -17 |
 BRMU |     -     -     -     -   -31     -     -     -     -     -    36 |
 BRUS |     -     -    -4     -     -     -     -    22     -     -   -12 |
 CAS1 |     -    74     -     9   -68     -     -     -     -     -    -2 |
 CEDU |     -   -61     -    65     -     -     -     -     -     -    35 |
 CHAT |     -     -     -    52     -     -     -     -     -     -   -24 |
 CHUR |     -   151   126     -     -     -     -   -97     -     -  -244 |
 COCO |     -    47     -  -225     -     -     -     -     -     -    52 |
 CORD |     -    -4     -     -     -     -     -     5     -     -     - |
 CRO1 |     -     -    54   -24    21     -     -    23     -     -  -100 |
 DAKA |     -    46     -     -   -41     -     -     -     -     -     - |
 DAV1 |     -    11     -     -   -30     -     -     -     -     -    24 |
 DRAO |     -    64   -21     -     -     -     -     -     -     -   -40 |
 DWH1 |     -     -   174     -     -     -     -  -160     -     -   -98 |
 FAIR |     -   -69     1   141   -74     -     -   143     -     -   -16 |
 GLPS |     -   -25     -     -    22     -     -     -     -     -     - |
 GODE |     -   -29   -19   103     -     -     -     -     -     -     7 |
 GOL2 |     -     -   135     X     -     -     -  -129     -     -   -74 |
 GUAM |     -   105     -   -90    -6     -     -  -194     -     -    87 |
 HERS |     -  -299  -116     -     -     -     -     -     -     -   449 |
 HOB2 |     -    82     3   -61     -     -     -     -     -     -   -62 |
 HRAO |     -     -     -     -   -94     -     -   -36     -     -   139 |
 IISC |     -     1     -    56   -71     -     -     -     -     -    57 |
 JPLM |     -     -    50     -     -     -     -  -134     -     -    40 |
 KGN0 |     -     -     0     -     -     -     -     -     -     -     0 |
 KIRU |     -   -64     -   143     -     -     -     -     -     -     2 |
 KOKB |     -    40    85     -   -89     -     -   -90     -     -    24 |
 KOSG |     -   -57     -     -     -     -     -     -     -     -    60 |
 KOUR |     -     -     -  -100    72     -     -     -     -     -   -39 |
 LAE1 |     -     -     -     -     -     -     -   -12     -     -     9 |
 MAC1 |     -    -4     -    64   -53     -     -     -     -     -    38 |
 MAD2 |     -     -  -121     -     -     -     -    65     -     -   104 |
 MAG0 |     -   -58     -   134     -     -     -     -     -     -     - |
 MALI |     -   106     -  -105     X     -     -     -     -     -   -64 |
 MAS1 |     -    22    48   -62   -42     -     -     -     -     -    -6 |
 MAW1 |     -   187     -     -  -152     -     -     -     -     -   -14 |
 MCM4 |     -   110  -218     -   138     -     -     -     -     -     - |
 MDO1 |     -     -   -86     -   -66     -     -   144     -     -    77 |
 MEDI |     -     -    15     -     -     -     -     -     -     -   -19 |
 MKEA |     -     0     -   112   -65     -     -   -24     -     -    44 |
 NLIB |     -     -    15     -     -     -     -     -     -     -   -19 |
 NNOR |     -     -    95  -202     -     -     -     -     -     -   -29 |
 NPLD |     -  -138   122     -     -     -     -     -     -     -   -10 |
 NRC1 |     -     -    -9     -    59     -     -   -46     -     -   -23 |
 NRIL |     -    12     -     -   -40     -     -    45     -     -     - |
 NTUS |     -  -131     -     -    55     -     -     -     -     -    73 |
 NYA1 |     -     X     -     -   -81     -     -     -     -     -    95 |
 OHI2 |     -    63     -    58   -78     -     -     -     -     -     - |
 ONSA |     -   -52   105   119   -79     -     -     -     -     -     - |
 PERT |     -     -   117  -477   123     -     -   -28     -     -   -55 |
 PETP |     -   -73     -     -     -     -     -   100     -     -     - |
 PIE1 |     -     -    40     6     -     -     -     -     -     -   -54 |
 PIMO |     -     -     -   -22     8     -     -     -     -     -     X |
 POL2 |     -   -26     -     -     -     -     -   -84     -     -    92 |
 POTS |     -    41     -     -     8     -     -     -     -     -   -53 |
 PRDS |     -   -84    17     -     -     -     -     -     -     -    67 |
 PTBB |     -   -20    42     -     -     -     -     -     -     -   -32 |
 QAQ1 |     -  -147    98     -     -     -     -     -     -     -    29 |
 REYK |     -  -121     -     -     -     -     -     -     -     -   128 |
 RIOG |     -    -7     -   194   -47     -     -     -     -     -   -26 |
 SANT |     -     -     -   193   -24     -     -     -     -     -   -60 |
 SCH2 |     -   -29    37     -     -     -     -   -15     -     -    -5 |
 SFER |     -     -  -122     -     -     -     -     -     -     -   155 |
 SPT0 |     -     -     8     -     -     -     -     -     -     -   -11 |
 STJO |     -   -34   -59     -     -     -     -   164     -     -   -15 |
 STR1 |     -     -   -14     -     -     -     -     -     -     -    17 |
 SUTH |     -   -31     -     -     -     -     -     -     -     -    33 |
 THU3 |     -    18   -12     -    -2     -     -     -     -     -     X |
 TIXI |     -   -24     -   282   -45     -     -   -64     -     -     - |
 TRO1 |     -   -44     X     -    54     -     -     -     -     -   -17 |
 TSKB |     -   -32    65  -138   -11     -     -     -     -     -    26 |
 UNSA |     -     -     -     -   104     -     -     -     -     -  -123 |
 USN1 |     -     -     -     -     -     -     -  -222     -     -   171 |
 USNO |     -   -90    88     -     -     -     -     -     -     -   -17 |
 USUD |     -     -     -     -     -     -     -    29     -     -   -23 |
 VILL |     -   -15     -     X     -     -     -     -     -     -    16 |
 WES2 |     -   -47     -     -     -     -     -     -     -     -    50 |
 WHIT |     -    12     -     -     -     -     -     -     -     -   -12 |
 WSRT |     -    25     -     -     -     -     -     -     -     -   -26 |
 WTZR |     -    11     -    58     -     -     -     -     -     -   -20 |
 YAKT |     -  -225     -   165     -     -     -     -     -     -   161 |
 YAR2 |     -    35     -     -     -     -     -     -     -     -   -37 |
 YELL |     -    24    22   158   -63     -     -   -27     -     -   -31 |
 ZAMB |     -   -23     -     -   120     -     -  -167     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  9728    37    40    67    25    34  4540    48  8573     -    66 |  288   4.53
    2 |  4989    39    28   110    19    40  6258    64  4960     -    41 |  288   2.36
    3 |  2182    22    31   119    40    69  2534    44  2237     -    17 |  288   1.32
    4 |  1233    55    22    61    29    38  1174    86  1364     -    27 |  288   0.97
    5 |  3994    44    29    20    20    53  4046    41  3747     -    28 |  288   1.87
    6 |  6316    64    16   129    20    29  3964    66  5888     -    22 |  288   3.92
    7 |   911    34    16   153    28    42   920    53   829     -    26 |  288   0.47
    8 |  4987    82    54    49    31    62  3963    43  4532     -   161 |  288   2.88
    9 |  3116    72    32    96    39   175  2568    81  3212     -    20 |  288   2.08
   10 |  2462    77    41    60    25    90  1828    72  2450     -    68 |  288   2.02
   11 |  1069    38    41    97    48   120   617    31  1061     -    28 |  288   0.49
   13 |  1534    32    57    53   143    53   840    50  1527     -   102 |  288   0.44
   14 |  2199    38    56   130    33    70  1472    58  2130     -    77 |  288   0.23
   15 |  5488    51    33    99    34    42  4622    48  6062     -    52 |  288   4.09
   16 |   766    39    20    65    49    47   450    51   841     -    41 |  288   0.31
   17 |  1147    70    28    55    32   116  1451    92  1226     -    51 |  288   0.72
   18 |   544    51    55   116    26   114   411    54   600     -    49 |  288   0.40
   20 |   429    47    59    85    21    31   391    50   406     -    29 |  288   0.25
   21 |  1374    54    21    83    22    23   780    44  1489     -    37 |  288   0.54
   22 |   829    67    53    76    35   103  1295    51   848     -    29 |  288   0.37
   23 |  8943    53    48     X    32   193  2151    68  8868     -     - |  286   1.65
   24 |  1977    59    30    94    32   206     -     X  1906     -    66 |  288   2.07
   25 |  3884    57    36    99    24    88  3495    70  4886     -    33 |  288   2.82
   26 |  1705    44    26    46    49    43   610    49  1719     -    88 |  288   0.91
   27 |  1313    52    32    49    28    83  3989    45  1180     -    38 |  288   0.53
   28 |  1351    62    33     X    34    62  1992    39  1376     -    38 |  288   1.20
   29 |  1236    47    30    39    36    79   456    60  1018     -    37 |  288   0.42
   30 |   635    47    48    42    35    47   895    99   673     -    18 |  288   0.67
   31 |  4618    23    34   113    33   188  2227    63  4298     -    23 |  288   2.15
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    48    22     -     -     -     -    17     -     -    40 |  288   6.52
 ALGO |     -    25     9     X     -     -     -    19     -     -    19 |  288   0.06
 ALIC |     -    15     -    34     -     -     -     -     -     -     - |  288   9.71
 AMC2 |     -    31    18     -     -     -     -    15     -     -    21 |  288   0.03
 AOML |     -    25     -     -     -     -     -    18     -     -    26 |  288  22.53
 AREQ |     -    33    26     -    14     -     -    43     -     -    35 |  288  14.21
 ARTU |     -     -     -    35    26     -     -    42     -     -     - |  279  13.04
 ASC1 |     -    23     -    31    24     -     -     -     -     -    19 |  286    >>>
 AUCK |     -    32     -     X    24     -     -    55     -     -    22 |  264   8.86
 BAHR |     -    34    21    40    35     -     -     -     -     -    17 |  288   0.41
 BILI |     -    22     -    21    22     -     -     -     -     -     - |  287   8.69
 BOGT |     -    56     -     X     -     -     -     -     -     -    59 |  288  17.88
 BOR1 |     -     -    19     -     -     -     -     -     -     -    24 |  288   0.57
 BREW |     -     -     9     -     -     -     -     -     -     -    11 |  288   0.06
 BRMU |     -     -     -     -    50     -     -     -     -     -    59 |  278    >>>
 BRUS |     -     -    23     -     -     -     -    32     -     -    10 |  288   0.02
 CAS1 |     -    26     -    27    30     -     -     -     -     -    22 |  288   7.07
 CEDU |     -    24     -    50     -     -     -     -     -     -    35 |  288 344.24
 CHAT |     -     -     -    34     -     -     -     -     -     -    16 |  239   9.73
 CHUR |     -    38    36     -     -     -     -    28     -     -    24 |  288   4.24
 COCO |     -    28     -    81     -     -     -     -     -     -    38 |  287   8.59
 CORD |     -    30     -     -     -     -     -    40     -     -     - |  288  13.77
 CRO1 |     -     -    18    25    15     -     -    45     -     -    13 |  288  15.18
 DAKA |     -    20     -     -    18     -     -     -     -     -     - |  261  13.94
 DAV1 |     -    22     -     -    29     -     -     -     -     -    25 |  288  13.61
 DRAO |     -    20    10     -     -     -     -     -     -     -    15 |  288   0.17
 DWH1 |     -     -    14     -     -     -     -    23     -     -    13 |  288   0.64
 FAIR |     -    23    15    38    22     -     -    19     -     -    13 |  288   0.05
 GLPS |     -    22     -     -    19     -     -     -     -     -     - |  288  21.60
 GODE |     -    40    27    29     -     -     -     -     -     -    14 |  288   0.16
 GOL2 |     -     -    15     X     -     -     -    21     -     -    22 |  288   0.08
 GUAM |     -    24     -    55    38     -     -    33     -     -    17 |  288  14.44
 HERS |     -    81    99     -     -     -     -     -     -     -    54 |  264  16.44
 HOB2 |     -    42    46    47     -     -     -     -     -     -    28 |  288   0.07
 HRAO |     -     -     -     -    44     -     -    61     -     -    64 |  288   0.66
 IISC |     -    21     -    37    32     -     -     -     -     -    21 |  288  30.47
 JPLM |     -     -    15     -     -     -     -    23     -     -    19 |  288  20.34
 KGN0 |     -     -    21     -     -     -     -     -     -     -    27 |  287   0.44
 KIRU |     -    16     -    21     -     -     -     -     -     -    17 |  288   9.85
 KOKB |     -    40    45     -    38     -     -    50     -     -   104 |  288   0.05
 KOSG |     -    18     -     -     -     -     -     -     -     -    19 |  288  71.71
 KOUR |     -     -     -    33    21     -     -     -     -     -    19 |  288   1.79
 LAE1 |     -     -     -     -     -     -     -    35     -     -    27 |  287  11.45
 MAC1 |     -    45     -    44    42     -     -     -     -     -    29 |  288  16.11
 MAD2 |     -     -    28     -     -     -     -   123     -     -    66 |  288   0.06
 MAG0 |     -    15     -    34     -     -     -     -     -     -     - |  286   8.92
 MALI |     -    22     -   110     X     -     -     -     -     -    38 |  288  18.67
 MAS1 |     -    34    13    23    13     -     -     -     -     -    21 |  288   2.01
 MAW1 |     -    36     -     -    33     -     -     -     -     -    62 |  288  27.04
 MCM4 |     -    28    37     -    20     -     -     -     -     -     - |  288  37.78
 MDO1 |     -     -    15     -    13     -     -    17     -     -    25 |  288  19.50
 MEDI |     -     -    12     -     -     -     -     -     -     -    16 |  288    >>>
 MKEA |     -    29     -    43    34     -     -    62     -     -    41 |  288  23.80
 NLIB |     -     -    75     -     -     -     -     -     -     -    96 |  222   9.33
 NNOR |     -     -    32    46     -     -     -     -     -     -    26 |  288  16.87
 NPLD |     -    19    26     -     -     -     -     -     -     -    30 |  287   0.05
 NRC1 |     -     -     7     -    13     -     -    22     -     -    16 |  288   0.03
 NRIL |     -    26     -     -    11     -     -    28     -     -     - |  288  12.42
 NTUS |     -    18     -     -    22     -     -     -     -     -    21 |  288  11.60
 NYA1 |     -     X     -     -    11     -     -     -     -     -    13 |  288   0.06
 OHI2 |     -    37     -    53    41     -     -     -     -     -     - |  288   8.74
 ONSA |     -    34    16    46    25     -     -     -     -     -     - |  288   0.02
 PERT |     -     -    40    63    42     -     -    34     -     -    20 |  288   1.85
 PETP |     -    14     -     -     -     -     -    19     -     -     - |  287   8.67
 PIE1 |     -     -    39    74     -     -     -     -     -     -    22 |  288   0.07
 PIMO |     -     -     -    89    35     -     -     -     -     -     X |  248  24.66
 POL2 |     -    21     -     -     -     -     -    44     -     -    19 |  288  13.46
 POTS |     -    23     -     -    20     -     -     -     -     -    17 |  288  24.32
 PRDS |     -    38    19     -     -     -     -     -     -     -    21 |  288   1.90
 PTBB |     -    24    20     -     -     -     -     -     -     -    42 |  288   0.37
 QAQ1 |     -    16    15     -     -     -     -     -     -     -    11 |  288   8.15
 REYK |     -    17     -     -     -     -     -     -     -     -    18 |  288   9.34
 RIOG |     -    51     -    48    45     -     -     -     -     -    51 |  285   9.38
 SANT |     -     -     -    70    24     -     -     -     -     -    26 |  176   4.92
 SCH2 |     -    27    19     -     -     -     -    20     -     -    21 |  288 142.46
 SFER |     -     -    32     -     -     -     -     -     -     -    41 |  285 557.84
 SPT0 |     -     -    18     -     -     -     -     -     -     -    23 |  288   0.03
 STJO |     -    29    11     -     -     -     -    31     -     -    12 |  288   0.02
 STR1 |     -     -    27     -     -     -     -     -     -     -    34 |  288   8.99
 SUTH |     -    25     -     -     -     -     -     -     -     -    26 |  288  15.71
 THU3 |     -    12    16     -    19     -     -     -     -     -     X |  288   7.77
 TIXI |     -    22     -    18    17     -     -    19     -     -     - |  287   9.87
 TRO1 |     -    19     X     -    36     -     -     -     -     -    26 |  288  10.96
 TSKB |     -    43    35    36    28     -     -     -     -     -    13 |  288   1.34
 UNSA |     -     -     -     -    24     -     -     -     -     -    29 |  288  27.09
 USN1 |     -     -     -     -     -     -     -    76     -     -    59 |  288   0.08
 USNO |     -    18     7     -     -     -     -     -     -     -    17 |  288   0.02
 USUD |     -     -     -     -     -     -     -    16     -     -    12 |  288  10.98
 VILL |     -    33     -     X     -     -     -     -     -     -    35 |  287   4.05
 WES2 |     -    26     -     -     -     -     -     -     -     -    27 |  288   0.04
 WHIT |     -    19     -     -     -     -     -     -     -     -    20 |  288   0.99
 WSRT |     -    15     -     -     -     -     -     -     -     -    16 |  288   0.02
 WTZR |     -    25     -    43     -     -     -     -     -     -    19 |  288   0.03
 YAKT |     -    29     -    35     -     -     -     -     -     -    38 |  288   0.41
 YAR2 |     -    34     -     -     -     -     -     -     -     -    35 |  288   7.95
 YELL |     -    21     9    31    12     -     -    16     -     -    17 |  288   0.03
 ZAMB |     -    38     -     -    38     -     -    89     -     -     - |  288  16.50
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3636    38    33    68    34    95  2650    48  3563     -    40 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

