
 GPS week: 1253   Day: 1   MJD: 53016                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2776      0     0.08    -0.69     3.87     0.00
 cod |   288     0  26360   1168    -0.18     0.14     0.05    15.37
 emr |   288     0  17499      0   613.17    23.91     0.03    26.50
 esa |   288     0  19665   2305     2.19    -1.96     0.08     8.69
 gfz |   288     0  20012    418     0.47    -0.65     0.05    15.77
 iga |    96     0   2584      5     0.11    -0.76     0.15     0.00
 igu |    96     0   2776      0     0.11    -0.76     3.05     0.00
 jpl |   288     0  14335    488    -5.35     0.18     0.05    16.17
 ngs |    96     0   2584      0     0.12    -0.76     3.37     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31124   1481 -3015.30   -23.47     0.05    17.50

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -2327    65    35     X   105   -10 -1058   108 -2339     -  -256 |
    2 | -2830   -50   -35    78  -160   201 -4352    38 -2796     -   192 |
    3 | -1571   -70  -202   106    25    93  7333    28 -2205     -   279 |
    4 |  -831    38     0   -50   170  -165 -3196    60 -1189     -  -191 |
    5 |  1107    73    23     4  -155   102  2865   -27   486     -    51 |
    6 | -4610   -52   -64    62   158   -70  3858  -169 -4857     -    44 |
    7 |  -434   -11    36   -59   230   163 -3132  -124  -920     -  -167 |
    8 |  -857    85    70    52   -79   175 -6388    71 -1593     -  -170 |
    9 |   803    -4   -63    10   209  -264 -3289   -31   -92     -   -80 |
   10 |  4502    72   -73    73   132   222  9036   -38  3594     -   -91 |
   11 |  1243   100    40   -22  -173   117  -170   115  1207     -   -42 |
   13 |  3759    68    61     X   -36    82 -1252   228  3196     -  -220 |
   14 |  2289    70   -13    50  -194     -   458    -5  2047     -   110 |
   15 | -3314     X  -155     X  -177  -279  5314    26 -3534     -   384 |
   16 |  4927   -64   -84    65    55   -53 -1525   100  4378     -    60 |
   17 | -2667     X  -103     X   183   -78 -3133    66 -3145     -   -39 |
   18 |  3611   -42   -81    91   -25  -133  -957   -31  3158     -   152 |
   20 |  5841    96    63   139  -192   250   975   297  5272     -  -213 |
   21 |  4503   -70    -2   165  -273   125   214   104  3992     -   167 |
   22 |  6166   -17   -58   210   156     -  8535     X     -     -  -145 |
   23 |-18367    54  -148  -247   179  -116  9351   155     -     -    95 |
   24 |  1820     7    22  -137    27  -166  2346    44   860     -   -20 |
   25 |  3284  -101   -52    70   186  -249  2435    63  2358     -   -62 |
   26 | -1829   -15     8    94    76   -80   257   141 -2040     -  -186 |
   27 |   130    -7   -10   134   237   -88 -8524   170  -492     -  -321 |
   28 |  3306     8    23  -175   285   128  -332   108  3066     -  -262 |
   29 | -3046     0    -7     X   264  -136 -1125    76 -3369     -  -258 |
   30 |   974   -76   -46   -52   309  -128 -3886  -158   176     -   -46 |
   31 | -5827     1   -65    -1   -78   334-10561    96 -5515     -   126 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    44   -39     -     -     -     -    18     -     -     4 |
 ALGO |     -   -66    31   -81     -     -     -    75     -     -   -17 |
 AMC2 |     -     -    80     -     -     -     -  -175     -     -    41 |
 AOML |     -  -146     -     -     -     -     -    25     -     -   104 |
 ARTU |     -    35     -     -    -2     -     -   -32     -     -     - |
 ASC1 |     -   306     -  -224  -354     -     -     -     -     -    75 |
 AUCK |     -   264     -     X  -669     -     -     -     -     -   325 |
 BAHR |     -    54    55  -133     -     -     -     -     -     -   -65 |
 BILI |     -    47     -     -   -46     -     -     -     -     -     - |
 BOGT |     -     -     -  -249     -     -     -     -     -     -   124 |
 BOR1 |     -     -    -2     -     -     -     -     -     -     -     2 |
 BREW |     -     -   -12     -     -     -     -     -     -     -    18 |
 BRMU |     -     -     -     -   -15     -     -     -     -     -    13 |
 BRUS |     -     -    28     -     -     -     -   -24     -     -   -20 |
 CAS1 |     -    25     -   -21   -26     -     -     -     -     -    12 |
 CEDU |     -   -87     -   -76     -     -     -     -     -     -   114 |
 CHAT |     -   -73     -    -4     -     -     -     -     -     -    65 |
 CHUR |     -    61   137     -     -     -     -   -18     -     -  -245 |
 COCO |     -   165     -  -124    10     -     -     -     -     -   -92 |
 CORD |     -  -173     -     -   169     -     -     -     -     -     - |
 CRO1 |     -  -124    30     -    24     -     -    32     -     -    12 |
 DAV1 |     -    18     -     -   -32     -     -     -     -     -    13 |
 DRAO |     -   -32     6     -     -     -     -     -     -     -    19 |
 DWH1 |     -     -    67     -     -     -     -   -63     -     -   -44 |
 FAIR |     -     -   -65   580  -133     -     -    19     -     -   -88 |
 FLIN |     -    -4     -     -     -     -     -     4     -     -     - |
 FORT |     -    41    48  -170   -28     -     -     X     -     -     5 |
 GLPS |     -   -99     -     -    96     -     -     -     -     -     - |
 GODE |     -  -122    35   209     -     -     -     -     -     -   -49 |
 GOLD |     -     -     -    88     -     -     -   -47     -     -     X |
 GUAM |     -   -30     -  -161   -27     -     -  -122     -     -   244 |
 GUAT |     -     -     -     -   -12     -     -     -     -     -    11 |
 HARB |     -    44     -     -   -43     -     -     -     -     -     X |
 HOB2 |     -    74   121  -163     -     -     -     -     -     -  -168 |
 HRAO |     -     -     -     -   -37     -     -    33     -     -     3 |
 IISC |     -   -71     -   -28   -10     -     -     -     -     -    86 |
 JPLM |     -     -    38     -     -     -     -    14     -     -   -70 |
 KGN0 |     -     -    24     -     -     -     -     -     -     -   -37 |
 KIRU |     -   107     -    98     -     -     -  -170     -     -    15 |
 KOKB |     -     -   115     -     -     -     -  -175     -     -   -12 |
 KOUR |     -    73     -    82    33     -     -  -102     -     -   -40 |
 MAC1 |     -   -85     -     6   -55     -     -     -     -     -   121 |
 MAD2 |     -     -     -     -     -     -     -    78     -     -   -72 |
 MALI |     -   -33     -    58     -     -     -     -     -     -     - |
 MAS1 |     -    11     -   -68    12     -     -     -     -     -    13 |
 MAW1 |     -   120     -     -     -     -     -     -     -     -  -106 |
 MCM4 |     -   109     -     -  -107     -     -     -     -     -     - |
 MDO1 |     -  -143   -27   162   148     -     -     -     -     -   -48 |
 MEDI |     -     -    42     -     -     -     -     -     -     -   -63 |
 METS |     -   -77    70     -     -     -     -     -     -     -   -39 |
 MIZU |     -     -    22     -     -     -     -     -     -     -   -33 |
 MKEA |     -   -21     -   -82     2     -     -   -33     -     -    88 |
 NANO |     -   154     -     -     -     -     -  -146     -     -     - |
 NLIB |     -     -    11     -     -     -     -    48     -     -   -60 |
 NNOR |     -     -    46  -154     -     -     -     -     -     -     7 |
 NOT1 |     -     -    46     -     -     -     -     -     -     -   -70 |
 NRC1 |     -   -79   -58   -48    28     -     -    83     -     -    79 |
 NRIL |     -  -246     -     -     X     -     -   234     -     -     - |
 NSSP |     -   -13     -     -     -     -     -     -     -     -    12 |
 NYA1 |     -     X     -     -  -195     -     -     -     -     -   176 |
 NYAL |     -     -   -17   116     -     -     -     -     -     -   -31 |
 OHI2 |     -    46     -     -   -45     -     -     -     -     -     - |
 ONSA |     -    52     -   139  -127     -     -     -     -     -     - |
 PERT |     -     -     1  -199    76     -     -    44     -     -   -12 |
 PETP |     -   -55     -     -     -     -     -    52     -     -     - |
 PIE1 |     -     -     -   -36     -     -     -     -     -     -    18 |
 PIMO |     -     -     -    -9     5     -     -     -     -     -     X |
 POL2 |     -   -18     -     -     -     -     -     -     -     -    16 |
 POTS |     -   219     -   -29   -73     -     -     -     -     -  -112 |
 PRDS |     -   -59     -     -     -     -     -     -     -     -    52 |
 QAQ1 |     -  -128     -     -     -     -     -     -     -     -   113 |
 RBAY |     -  -215     -     -     X     -     -     -     -     -   188 |
 REYK |     -   -42     -     -     -     -     -     -     -     -    37 |
 RIOG |     -   -89     -   159   -95     -     -     -     -     -    84 |
 SCH2 |     -   -28     -     -     -     -     -    32     -     -    -4 |
 SELE |     -     -     -  -162     -     -     -     -     -     -    80 |
 STJO |     -   -52  -108     -     -     -     -   171     -     -    52 |
 SUTH |     -   -68     -     -     -     -     -     -     -     -    60 |
 THU3 |     -    62     -     -   -60     -     -     -     -     -     X |
 TIDB |     -    37     -    70   -74     -     -     -     -     -     X |
 TIXI |     -   -32     -     -    49     -     -   -17     -     -     - |
 TRO1 |     -   270     -     -     2     -     -     -     -     -  -213 |
 TROM |     -     -     -   155     -     -     -     -     -     -   -77 |
 TSKB |     -   -86    47   -76     -     -     -     -     -     -    42 |
 USN1 |     -     -     -     -     -     -     -  -262     -     -   242 |
 USNO |     -     -    49     -     -     -     -     -     -     -   -74 |
 USUD |     -     -     -   -14     -     -     -    -3     -     -    10 |
 VILL |     -    47     -     X     -     -     -     -     -     -   -41 |
 WILL |     -   -95     -     -     -     -     -     -     -     -    83 |
 WTZR |     -   132     -   -38     -     -     -     -     -     -   -97 |
 WUHN |     -     -    40  -363  -132     -     -    95     -     -   151 |
 YAKT |     -  -144     -     -     -     -     -   -46     -     -   169 |
 YAR2 |     -   -69     -     -     -     -     -     -     -     -    61 |
 YELL |     -     X     -     X   -27     -     -   -31     -     -    53 |
 YSSK |     -    32     -     -   -31     -     -     -     -     -     - |
 ZAMB |     -     -     -     -   193     -     -  -188     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6830    48    27     X    19    50  4030    41  6757     -    66 |  288   5.02
    2 |  2901    53    20    34    33    72  2950    54  2587     -    74 |  288   1.87
    3 |  2054    29    33   127    46   119  2843    41  2093     -    60 |  288   1.82
    4 |  1291   139    51   155    24   231  1776    52  1315     -    44 |  286   0.76
    5 |  3627    27    23    57    19    44  3108    53  3602     -    45 |  288   2.21
    6 |  8957    42    50   111    58   105  3659    64  9199     -    34 |  288   7.78
    7 |  1652    39    29    61    25    29  1989    58  1704     -    55 |  288   0.59
    8 |  4605    68    31    37    27    75  4527    36  4321     -    78 |  288   1.99
    9 |  5241    56    40    60    35    60  2807    31  4908     -    59 |  288   2.42
   10 |  6391    47    32    45    33   154  4964    40  5627     -    75 |  288   2.67
   11 |  1231    59    40   109    27   182   501    75  1583     -    59 |  288   0.38
   13 |   636    63    37     X    24    79   520    45   673     -    33 |  288   0.29
   14 |   971   105    33   124    46     -   467    52   890     -    57 |  288   0.30
   15 |  2822     X    69     X   134   189  2718    89  2802     -    95 |  276   2.83
   16 |   550    46    48   147    54    59   961   135   552     -    65 |  288   0.24
   17 |  1332     X    48     X   139   461  1402    68  1432     -    91 |  276   1.01
   18 |   545    53    33    57    30    85   418    35   554     -    35 |  288   0.36
   20 |   388    48    30    78    34    31   676   114   399     -    51 |  288   0.24
   21 |   616    71    35   136    32   108   402    29   554     -    50 |  288   0.44
   22 |  4500   107    64    86    56     -  5104     X     -     -    88 |  288   0.74
   23 |  9873    86    86    44    29   103  5659    96     -     -    49 |  288   1.37
   24 |  5778   122    93   188    89   153  2761    42  5860     -    82 |  288   3.17
   25 |  3094   142    42    87    78   201  2475    45  2681     -    51 |  288   2.53
   26 |  1899    70    24   172    48    42   676    82  1766     -    79 |  288   0.43
   27 |  1860    63    40   137   180    92  5542    70  1912     -   122 |  288   0.97
   28 |  1322    38    30   107    25    47   591    32  1258     -    95 |  288   0.41
   29 |   937    57    24     X    52   221  1570    62   918     -    60 |  288   0.90
   30 |  1480    32    29    79    31    49  1858    49  1558     -    82 |  288   0.43
   31 |  2416    34    31   108    54   177  5924    76  2820     -    49 |  288   0.63
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    89    21     -     -     -     -    20     -     -    40 |  288   8.81
 ALGO |     -    46    11    30     -     -     -    33     -     -    20 |  288   0.03
 AMC2 |     -     -     9     -     -     -     -    23     -     -    13 |  288   0.02
 AOML |     -    29     -     -     -     -     -    14     -     -    29 |  288  44.76
 ARTU |     -    56     -     -    27     -     -    36     -     -     - |  288  12.70
 ASC1 |     -    40     -    52    30     -     -     -     -     -    44 |  283    >>>
 AUCK |     -    23     -     X    37     -     -     -     -     -    23 |  264   9.19
 BAHR |     -    22    33    50     -     -     -     -     -     -    40 |  288   0.34
 BILI |     -    11     -     -    11     -     -     -     -     -     - |  287   6.96
 BOGT |     -     -     -    45     -     -     -     -     -     -    23 |  102   6.08
 BOR1 |     -     -    13     -     -     -     -     -     -     -    19 |  288   0.50
 BREW |     -     -     6     -     -     -     -     -     -     -    10 |  288   0.04
 BRMU |     -     -     -     -    18     -     -     -     -     -    16 |  288    >>>
 BRUS |     -     -    25     -     -     -     -    31     -     -    14 |  288   0.04
 CAS1 |     -    32     -    48    35     -     -     -     -     -    48 |  288   7.68
 CEDU |     -    32     -    26     -     -     -     -     -     -    20 |  288  16.82
 CHAT |     -    17     -    25     -     -     -     -     -     -    20 |  287  10.83
 CHUR |     -    38    27     -     -     -     -    20     -     -    24 |  288   9.12
 COCO |     -    67     -    64    25     -     -     -     -     -    36 |  288  10.88
 CORD |     -    28     -     -    27     -     -     -     -     -     - |  285  13.33
 CRO1 |     -    78    25     -    42     -     -    28     -     -    36 |  288  21.56
 DAV1 |     -    40     -     -    24     -     -     -     -     -    43 |  288  13.95
 DRAO |     -    34    11     -     -     -     -     -     -     -    19 |  288   0.04
 DWH1 |     -     -    24     -     -     -     -    43     -     -    15 |  288   0.62
 FAIR |     -     -     6    20    16     -     -    14     -     -    15 |  288   0.08
 FLIN |     -    48     -     -     -     -     -    46     -     -     - |  288  10.84
 FORT |     -    43    41    48    51     -     -     X     -     -   103 |  288   0.17
 GLPS |     -    38     -     -    37     -     -     -     -     -     - |  278  18.68
 GODE |     -    70    18    54     -     -     -     -     -     -    29 |  288   0.09
 GOLD |     -     -     -    71     -     -     -    38     -     -     X |  288  15.20
 GUAM |     -    34     -    65    38     -     -    51     -     -    62 |  288  16.27
 GUAT |     -     -     -     -    23     -     -     -     -     -    21 |  288    >>>
 HARB |     -    40     -     -    39     -     -     -     -     -     X |  286  34.77
 HOB2 |     -    56    23    38     -     -     -     -     -     -    18 |  288   0.06
 HRAO |     -     -     -     -    38     -     -    81     -     -    47 |  288   1.09
 IISC |     -    46     -    22    31     -     -     -     -     -    26 |  288  22.92
 JPLM |     -     -    24     -     -     -     -    19     -     -    27 |  288  17.66
 KGN0 |     -     -    22     -     -     -     -     -     -     -    34 |  287   0.32
 KIRU |     -    29     -    36     -     -     -    30     -     -    11 |  288   7.33
 KOKB |     -     -    15     -     -     -     -    20     -     -    33 |  288   0.05
 KOUR |     -    30     -    31    27     -     -    64     -     -    40 |  288   2.63
 MAC1 |     -    24     -    45    27     -     -     -     -     -    31 |  288  17.67
 MAD2 |     -     -     -     -     -     -     -   106     -     -    98 |  288   0.27
 MALI |     -    29     -    52     -     -     -     -     -     -     - |  119  10.12
 MAS1 |     -    38     -    86    54     -     -     -     -     -    60 |  287   2.23
 MAW1 |     -    24     -     -     -     -     -     -     -     -    21 |  145  26.14
 MCM4 |     -    65     -     -    63     -     -     -     -     -     - |  282    >>>
 MDO1 |     -    35    12    26    17     -     -     -     -     -    35 |  288  21.39
 MEDI |     -     -    12     -     -     -     -     -     -     -    18 |  288    >>>
 METS |     -    38    25     -     -     -     -     -     -     -    18 |  287   8.44
 MIZU |     -     -    21     -     -     -     -     -     -     -    32 |  288   0.38
 MKEA |     -    24     -    45    22     -     -    36     -     -    24 |  288  21.64
 NANO |     -    25     -     -     -     -     -    23     -     -     - |  288  44.98
 NLIB |     -     -    14     -     -     -     -    93     -     -    88 |  288   0.07
 NNOR |     -     -    16    64     -     -     -     -     -     -    21 |  288  11.89
 NOT1 |     -     -    10     -     -     -     -     -     -     -    15 |  288    >>>
 NRC1 |     -    36     9    34    17     -     -    30     -     -    18 |  288   0.03
 NRIL |     -    46     -     -     X     -     -    43     -     -     - |  129  13.02
 NSSP |     -    29     -     -     -     -     -     -     -     -    25 |  288   9.05
 NYA1 |     -     X     -     -    15     -     -     -     -     -    13 |  288   0.05
 NYAL |     -     -     8    38     -     -     -     -     -     -    19 |  288   0.05
 OHI2 |     -    24     -     -    23     -     -     -     -     -     - |  288   7.25
 ONSA |     -    22     -    42    23     -     -     -     -     -     - |  288   0.05
 PERT |     -     -    23    63    21     -     -    52     -     -    25 |  288   1.80
 PETP |     -    36     -     -     -     -     -    34     -     -     - |  287   8.52
 PIE1 |     -     -     -    28     -     -     -     -     -     -    14 |  288   0.06
 PIMO |     -     -     -    96    53     -     -     -     -     -     X |  265  18.63
 POL2 |     -    17     -     -     -     -     -     -     -     -    15 |  285  14.50
 POTS |     -    51     -    53    30     -     -     -     -     -    32 |  288  16.35
 PRDS |     -    60     -     -     -     -     -     -     -     -    53 |  288   1.85
 QAQ1 |     -    39     -     -     -     -     -     -     -     -    34 |  287   8.78
 RBAY |     -    64     -     -     X     -     -     -     -     -    56 |  205 132.75
 REYK |     -    20     -     -     -     -     -     -     -     -    17 |  284  13.36
 RIOG |     -    92     -    97    98     -     -     -     -     -    56 |  287  12.30
 SCH2 |     -    47     -     -     -     -     -    31     -     -    18 |  288 105.18
 SELE |     -     -     -    19     -     -     -     -     -     -     9 |  288  25.99
 STJO |     -    32    13     -     -     -     -    32     -     -    17 |  288   0.05
 SUTH |     -    57     -     -     -     -     -     -     -     -    50 |  288  13.16
 THU3 |     -    12     -     -    12     -     -     -     -     -     X |  288   9.56
 TIDB |     -    42     -    30    44     -     -     -     -     -     X |  288   0.15
 TIXI |     -    37     -     -    25     -     -    19     -     -     - |  287   8.19
 TRO1 |     -    59     -     -    46     -     -     -     -     -    48 |  283  11.62
 TROM |     -     -     -    51     -     -     -     -     -     -    26 |  288  13.93
 TSKB |     -    22    26    43     -     -     -     -     -     -    50 |  288   1.10
 USN1 |     -     -     -     -     -     -     -    11     -     -    10 |  287   0.05
 USNO |     -     -    12     -     -     -     -     -     -     -    18 |  288   0.02
 USUD |     -     -     -    44     -     -     -    22     -     -    25 |  288  11.82
 VILL |     -    41     -     X     -     -     -     -     -     -    36 |  288   3.45
 WILL |     -    56     -     -     -     -     -     -     -     -    49 |  288  16.74
 WTZR |     -    36     -    56     -     -     -     -     -     -    40 |  288   0.04
 WUHN |     -     -    27    61    31     -     -    61     -     -    37 |  287  13.59
 YAKT |     -    46     -     -     -     -     -    23     -     -    54 |  288   0.68
 YAR2 |     -    20     -     -     -     -     -     -     -     -    18 |  288   6.20
 YELL |     -     X     -     X    16     -     -    15     -     -    10 |  288   0.02
 YSSK |     -    31     -     -    30     -     -     -     -     -     - |  287   9.46
 ZAMB |     -     -     -     -    65     -     -    63     -     -     - |  288  25.97
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3873    54    33    77    49   147  3051    50  3369     -    47 |


 BEST CLOCK FIT: YELL   288   0.02 (ns) 

