
 GPS week: 1252   Day: 6   MJD: 53014                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2701     23    -0.10    -0.21     4.24     0.00
 cod |   288     0  26235    876    -0.11    -0.19     0.06    17.30
 emr |   288     0  17862    138   568.28    25.83     0.05    21.17
 gfz |   288     0  19864    327     0.32    -0.42     0.05    21.32
 iga |    96     0   2607      0    -0.16    -0.83     0.12     0.00
 igu |    96     0   2605      0    -0.16    -0.86     3.30     0.00
 jpl |   288     0  14668    321    -8.57     1.13     0.06    17.51
 ngs |    96     0   2509      0    -0.15    -0.92     3.60     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30811    986   744.99    15.00     0.04    22.71

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  5290   234    29  -188    81  9103   230  3502     -  -106 |
    2 |  5940  -150  -133    43   228  9746    34  4362     -   183 |
    3 | -9744  -177  -109    89    40-12815  -139 -9293     -   208 |
    4 | -1592   216   -84   118   -34  -268   103 -2198     -  -240 |
    5 |  3741  -588   238   141   172  6637    45  2672     -    93 |
    6 |  2442   -26   -58   146   -62  2539  -174  1917     -    12 |
    7 | -1075   157  -115    93   164 -2195  -135 -1540     -   -41 |
    8 | -4021   122   -15    28   150  -567    71 -4780     -  -129 |
    9 | -1498   -22     1    -9  -151 -5389   -69 -2029     -    48 |
   10 |  3508    52   -24    58    11  6421   -30  2659     -   -58 |
   11 |   781   107  -163   132   274  -801   170   210     -  -106 |
   13 |  7988   271     1  -123    63  2650   319  7574     -  -198 |
   14 |  3175     X     X   191   129   697  -233  2885     -     X |
   15 |  -761     X  -237    67  -317  7270     - -1780     -   144 |
   16 |  4147   407  -226   -38   -85  -994   -42  3723     -   -50 |
   17 | -6667    17    41    92   -71 -2929   140 -6478     -  -180 |
   18 |  3614  -158   -69   123  -126  -391  -198  2979     -   135 |
   20 |  7054   166   -86   -23   276   276   375  6425     -  -151 |
   21 |  8835  -146   -30   127  -136  4959   -84  8049     -    52 |
   22 |  -289    70    79    -1  -394     -     X     -     -  -115 |
   23 |-20424   -28   115  -148   -43  8528     X     -     -    62 |
   24 |   367     -    31    87     - -2817    45   376     -  -129 |
   25 | -5798   -67    88   -79   -77 -6210    62 -6489     -    16 |
   26 | -3663   -53    65    45  -135 -1568    95 -4117     -  -104 |
   27 | -2747   127   -41    50    91 -9161   359 -3140     -  -262 |
   28 |  1504   169   -63   -13    49 -1410   103  1197     -  -102 |
   29 | -3802    58   -21    52  -225 -2952   -19 -4150     -   -68 |
   30 |  2187   -80    30   149    -9 -1212  -125  1218     -   -66 |
   31 | -1468   -75  -154    88   213 -6485   158 -1921     -    65 |
 -----+-------------------------------------------------------------+
 ALBH |     -     2   -21     -     -     -    74     -     -   -39 |
 ALGO |     -     X  -365     -     -     -   563     -     -   -93 |
 AMC2 |     -  -156    75     -     -     -   -95     -     -   122 |
 AOML |     -   -33     -     -     -     -    33     -     -     0 |
 ARTU |     -   -78     -    72     -     -    -5     -     -     - |
 ASC1 |     -  -396     -    91     -     -     -     -     -   217 |
 ASPA |     -     -     -     -     -     -    34     -     -   -26 |
 AUCK |     -   297     -  -650     -     -     -     -     -   384 |
 BAHR |     -     -    26     -     -     -     -     -     -   -25 |
 BILI |     -    87     -   -71     -     -     -     -     -     - |
 BREW |     -     -   -27     -     -     -     -     -     -    25 |
 BRMU |     -     -     -   -15     -     -     -     -     -    14 |
 BRUS |     -     -   -29     -     -     -    36     -     -    -1 |
 CAS1 |     -    38     -   -34     -     -     -     -     -     3 |
 CEDU |     -  -127     -     -     -     -     -     -     -    97 |
 CHAT |     -   -47     -     -     -     -     -     -     -    35 |
 CHUR |     -   271    78     -     -     -   -39     -     -  -213 |
 COCO |     -   -31     -    74     -     -     -     -     -   -46 |
 CORD |     -   -92     -    79     -     -    -5     -     -     - |
 CRO1 |     -     -    77   135     -     -  -225     -     -   -25 |
 DAV1 |     -    14     -   -12     -     -     -     -     -     X |
 DRAO |     -    95    17     -     -     -     -     -     -   -89 |
 FAIR |     -     -   -57    53     -     -    88     -     -   -64 |
 FLIN |     -    26     -     -     -     -   -26     -     -     - |
 FORT |     -   -26   -63   -43     -     -    55     -     -    73 |
 GLPS |     -    -8     -     6     -     -     -     -     -     - |
 GODE |     -     -   123     -     -     -     -     -     -  -115 |
 GUAM |     -     -     -    12     -     -  -222     -     -   159 |
 GUAT |     -     -     -  -114     -     -     -     -     -   107 |
 HOB2 |     -   -77   203     -     -     -     -     -     -  -130 |
 HRAO |     -     -     -    10     -     -   -12     -     -     X |
 IISC |     -    -4     -   -53     -     -     -     -     -    52 |
 JPLM |     -     -    35     -     -     -     -     -     -   -33 |
 KGN0 |     -     -     0     -     -     -     -     -     -     0 |
 KIRU |     -    55     -     -     -     -     -     -     -   -42 |
 KIT3 |     -     -     -    70     -     -    13     -     -   -75 |
 KOKB |     -     -   127   -29     -     -  -119     -     -     1 |
 KOSG |     -   -80     -     -     -     -     -     -     -    61 |
 KOUR |     -   106     -    59     -     -  -154     -     -   -18 |
 LAE1 |     -     -     -     -     -     -    57     -     -   -44 |
 MAC1 |     -  -151     -   -39     -     -     -     -     -   151 |
 MAD2 |     -     -     -     -     -     -   -35     -     -    27 |
 MAS1 |     -     8     -     9     -     -    36     -     -   -43 |
 MAW1 |     -   125     -   -66     -     -     -     -     -   -32 |
 MCM4 |     -   175     -  -142     -     -     -     -     -     - |
 MDO1 |     -  -152     6   -43     -     -   138     -     -    43 |
 MEDI |     -     -     -     -     -     -    91     -     -   -70 |
 METS |     -   -72     -     -     -     -     -     -     -    54 |
 MIZU |     -     -    -8     -     -     -     -     -     -     8 |
 MKEA |     -     2     -   -99     -     -    35     -     -    65 |
 NLIB |     -     -    94     -     -     -    35     -     -  -115 |
 NNOR |     -     -  -146     -     -     -     -     -     -   136 |
 NRC1 |     -    12    35    17     -     -    38     -     -   -87 |
 NRIL |     -    45     -     X     -     -   -44     -     -     - |
 NSSP |     -   -40     -     -     -     -     -     -     -    30 |
 NTUS |     -   -67     -     -     -     -     -     -     -    51 |
 NYA1 |     -   -29     -  -249     -     -     -     -     -   255 |
 OHI2 |     -    38     -   -31     -     -     -     -     -     - |
 ONSA |     -    20     -   -16     -     -     -     -     -     - |
 PERT |     -   -50    57   -44     -     -    22     -     -     9 |
 PETP |     -   -35     -     -     -     -    35     -     -     - |
 PIE1 |     -     -    57     -     -     -     -     -     -   -53 |
 POTS |     -    64     -   -67     -     -     -     -     -    14 |
 PRDS |     -   -31    83     -     -     -     -     -     -   -54 |
 QAQ1 |     -  -116     -     -     -     -     -     -     -    89 |
 RBAY |     -  -230     -  -158     -     -     -     -     -   249 |
 REYK |     -   -72     -     -     -     -     -     -     -    55 |
 RIOG |     -     6     -   -44     -     -     -     -     -    36 |
 SANT |     -     -     -  -555     -     -     -     -     -   521 |
 SCH2 |     -    11    39     -     -     -   -15     -     -   -33 |
 SELE |     -    37     -     -     -     -     -     -     -   -28 |
 SPT0 |     -     -    28     -     -     -     -     -     -   -26 |
 STJO |     -    17    43     -     -     -     -     -     -   -54 |
 STR1 |     -     -    66     -     -     -     -     -     -   -61 |
 SUTH |     -   -65     -     -     -     -     -     -     -    50 |
 THU3 |     -     4     -    -4     -     -     -     -     -     X |
 TIXI |     -    67     -   -59     -     -     5     -     -     - |
 TRO1 |     -    67     -   140     -     -     -     -     -  -182 |
 TWTF |     -     -   -24     -     -     -     -     -     -    23 |
 URUM |     -     1     -     -     -     -     -     -     -    -1 |
 USN1 |     -     -   267     -     -     -  -421     -     -    77 |
 USNO |     -   -48    91     -     -     -     -     -     -   -49 |
 USUD |     -     -   -11     -     -     -    27     -     -   -10 |
 VILL |     -    15     -     -     -     -     -     -     -   -11 |
 WHIT |     -   -67     -     -     -     -     -     -     -    51 |
 WILL |     -   -99    50     -     -     -     -     -     -    29 |
 WSRT |     -    44     -     -     -     -     -     -     -   -33 |
 WTZR |     -    39     -     -     -     -     -     -     -   -30 |
 WUHN |     -    69   -28   259     -     -  -147     -     -  -156 |
 YAKT |     -  -128     -     -     -     -   -45     -     -   132 |
 YELL |     -    43     -   -12     -     -   -57     -     -    22 |
 YSSK |     -    13     -     -     -     -   -12     -     -     - |
 ZAMB |     -   102     -   132     -     -  -259     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7513    52    15    29    68  5579    67  6584     -    27 |  288   5.53
    2 |  5281    23    32    54    63  5468    58  4090     -    68 |  288   2.69
    3 |  2994    65    26    55   117  6055    70  2729     -    39 |  288   1.25
    4 |  1106   157   102    64   195   806    74   958     -    69 |  276   0.67
    5 |  4944    36    65    76   104  4810    44  4353     -   121 |  288   1.92
    6 |  8136    24    53    30    36  3826    54  8182     -    23 |  288   7.72
    7 |   949    40    31    29    82  1094    41   916     -    25 |  288   0.37
    8 |  4200    56    32    15    60  1188    24  4119     -    20 |  288   2.28
    9 |  2435    63    39    38    60  1846    36  2424     -    63 |  288   1.62
   10 |  2104    64    23    22    67  3680    56  2022     -    48 |  288   2.01
   11 |   990    80    44    47    95   574    55   826     -    38 |  288   0.40
   13 |  2152    70    22    23    78  2108    58  2153     -    53 |  288   0.34
   14 |   674     X     X   139    92   272   169   271     -     X |   81   0.14
   15 | 11422     X    96   140   139  2375     -  9743     -    76 |  276   3.73
   16 |   677    49    65    44    61   411    48   576     -    35 |  288   0.21
   17 |  3825   176   127    81   341  1038    69  3432     -    74 |  280   0.73
   18 |   877    57    49    23    69   311    60   624     -    22 |  288   0.34
   20 |  1107    58    24    37    35   667    57   909     -    52 |  288   0.29
   21 |  4944    52    36    32    61  3560    29  4676     -    27 |  288   0.35
   22 |  1442    79    48    75   247     -     X     -     -    38 |  288   1.15
   23 | 10429    93    57    75   171  5987     X     -     -    49 |  288   2.53
   24 |  2741     -    43    74     -  2100   139  2580     -    80 |  276   2.37
   25 |  4093   107   145    76    65  3770    65  3931     -    40 |  288   1.48
   26 |   569    49    31    36    62   920    50   510     -    52 |  288   0.78
   27 |  1305    63    23    20    50  5627    46  1099     -    30 |  288   1.04
   28 |  2130    63    21    32    45  1608    31  1687     -    34 |  288   0.70
   29 |   603    54    46    46   127  1722    78   533     -    82 |  288   0.55
   30 |  1749    35    52    43    53  1232    36  1269     -    41 |  288   0.73
   31 |  1319    63    68    47   180  4857    96  1165     -    73 |  288   1.47
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    24    44     -     -     -    23     -     -    43 |  288   8.95
 ALGO |     -     X    20     -     -     -    15     -     -    27 |  288   0.02
 AMC2 |     -    43    40     -     -     -    51     -     -    33 |  288   0.04
 AOML |     -    42     -     -     -     -    18     -     -    25 |  288  24.83
 ARTU |     -    33     -    20     -     -    33     -     -     - |  265  17.13
 ASC1 |     -    53     -    41     -     -     -     -     -    16 |  285    >>>
 ASPA |     -     -     -     -     -     -    64     -     -    50 |  234    >>>
 AUCK |     -    35     -    27     -     -     -     -     -    21 |  264   9.51
 BAHR |     -     -    72     -     -     -     -     -     -    68 |  288   0.31
 BILI |     -    24     -    20     -     -     -     -     -     - |  287   8.55
 BREW |     -     -    36     -     -     -     -     -     -    34 |  288   0.06
 BRMU |     -     -     -    26     -     -     -     -     -    25 |  288    >>>
 BRUS |     -     -    54     -     -     -    38     -     -    27 |  288   0.03
 CAS1 |     -    37     -    37     -     -     -     -     -    27 |  288   6.91
 CEDU |     -    17     -     -     -     -     -     -     -    13 |  287  22.28
 CHAT |     -    18     -     -     -     -     -     -     -    14 |  287  10.21
 CHUR |     -    76    42     -     -     -    44     -     -    32 |  283  11.18
 COCO |     -    31     -    18     -     -     -     -     -    16 |  288  10.64
 CORD |     -    47     -    27     -     -    47     -     -     - |  288  15.77
 CRO1 |     -     -    36    55     -     -    36     -     -    43 |  288  17.99
 DAV1 |     -    21     -    17     -     -     -     -     -     X |  288  14.92
 DRAO |     -    39    35     -     -     -     -     -     -    26 |  288   0.11
 FAIR |     -     -    39   112     -     -    85     -     -    81 |  286   0.20
 FLIN |     -    72     -     -     -     -    72     -     -     - |  287   7.07
 FORT |     -    36    12    54     -     -    47     -     -    48 |  288   0.08
 GLPS |     -    40     -    33     -     -     -     -     -     - |  263  20.70
 GODE |     -     -    29     -     -     -     -     -     -    27 |  288   0.09
 GUAM |     -     -     -    62     -     -    50     -     -    70 |  288  18.06
 GUAT |     -     -     -    24     -     -     -     -     -    22 |  288    >>>
 HOB2 |     -    28    30     -     -     -     -     -     -    20 |  288   0.08
 HRAO |     -     -     -    46     -     -    56     -     -     X |  288   0.77
 IISC |     -    24     -    18     -     -     -     -     -    13 |  288  20.25
 JPLM |     -     -    57     -     -     -     -     -     -    53 |  288  22.05
 KGN0 |     -     -    22     -     -     -     -     -     -    20 |  287   0.29
 KIRU |     -    26     -     -     -     -     -     -     -    20 |  288   8.99
 KIT3 |     -     -     -    27     -     -    35     -     -    18 |  275    >>>
 KOKB |     -     -    14    31     -     -    44     -     -    22 |  288   0.07
 KOSG |     -    22     -     -     -     -     -     -     -    17 |  288  21.00
 KOUR |     -    48     -    31     -     -    63     -     -    26 |  288   1.74
 LAE1 |     -     -     -     -     -     -    60     -     -    46 |  287  13.59
 MAC1 |     -    55     -    55     -     -     -     -     -    84 |  288  19.94
 MAD2 |     -     -     -     -     -     -    27     -     -    21 |  288   0.04
 MAS1 |     -    36     -    30     -     -    23     -     -    26 |  288   2.89
 MAW1 |     -    43     -    35     -     -     -     -     -    47 |  288  30.70
 MCM4 |     -    24     -    20     -     -     -     -     -     - |  287  88.08
 MDO1 |     -    46    27    30     -     -    26     -     -    40 |  288  19.92
 MEDI |     -     -     -     -     -     -    19     -     -    15 |  264    >>>
 METS |     -    29     -     -     -     -     -     -     -    22 |  287  11.01
 MIZU |     -     -    23     -     -     -     -     -     -    21 |  288   0.31
 MKEA |     -    50     -    78     -     -    39     -     -   116 |  288  18.47
 NLIB |     -     -    21     -     -     -    74     -     -    62 |  286  13.95
 NNOR |     -     -    28     -     -     -     -     -     -    26 |  288  17.65
 NRC1 |     -    37    28    28     -     -    25     -     -    37 |  288   0.02
 NRIL |     -   107     -     X     -     -   106     -     -     - |  257  14.33
 NSSP |     -    53     -     -     -     -     -     -     -    41 |  288   9.39
 NTUS |     -    37     -     -     -     -     -     -     -    29 |  288  11.64
 NYA1 |     -    34     -    14     -     -     -     -     -    20 |  287   0.04
 OHI2 |     -    39     -    31     -     -     -     -     -     - |  288   7.04
 ONSA |     -    24     -    19     -     -     -     -     -     - |  288   0.04
 PERT |     -    37    48    19     -     -    67     -     -    44 |  287   1.50
 PETP |     -    24     -     -     -     -    24     -     -     - |  287   9.50
 PIE1 |     -     -    40     -     -     -     -     -     -    37 |  288   0.08
 POTS |     -    27     -    17     -     -     -     -     -    29 |  288  16.94
 PRDS |     -    46    27     -     -     -     -     -     -    41 |  288   1.55
 QAQ1 |     -    43     -     -     -     -     -     -     -    33 |  286   7.54
 RBAY |     -    55     -    84     -     -     -     -     -    71 |  256 124.37
 REYK |     -    25     -     -     -     -     -     -     -    19 |  282  16.26
 RIOG |     -    49     -    37     -     -     -     -     -    38 |  288  11.07
 SANT |     -     -     -    19     -     -     -     -     -    18 |  174   3.23
 SCH2 |     -    91    27     -     -     -    54     -     -    49 |  286 256.83
 SELE |     -    37     -     -     -     -     -     -     -    28 |  284  31.79
 SPT0 |     -     -    41     -     -     -     -     -     -    38 |  288   0.06
 STJO |     -    27    16     -     -     -     -     -     -    19 |  288   0.02
 STR1 |     -     -    47     -     -     -     -     -     -    43 |  288  12.02
 SUTH |     -    33     -     -     -     -     -     -     -    25 |  288  12.78
 THU3 |     -    22     -    18     -     -     -     -     -     X |  288   8.12
 TIXI |     -    77     -    30     -     -    99     -     -     - |  287  10.43
 TRO1 |     -   138     -    51     -     -     -     -     -    96 |  287  11.44
 TWTF |     -     -    39     -     -     -     -     -     -    37 |  288   0.51
 URUM |     -    56     -     -     -     -     -     -     -    42 |  288  30.39
 USN1 |     -     -    57     -     -     -    43     -     -    27 |  288   0.05
 USNO |     -    29    30     -     -     -     -     -     -    29 |  288   0.04
 USUD |     -     -    20     -     -     -    54     -     -    37 |  288  11.13
 VILL |     -    22     -     -     -     -     -     -     -    17 |  288   4.05
 WHIT |     -    16     -     -     -     -     -     -     -    12 |  288   1.54
 WILL |     -    33    40     -     -     -     -     -     -    21 |  288  49.72
 WSRT |     -    29     -     -     -     -     -     -     -    22 |  288   0.02
 WTZR |     -    31     -     -     -     -     -     -     -    24 |  288   0.06
 WUHN |     -    73    45    33     -     -    30     -     -    15 |  287  19.24
 YAKT |     -    49     -     -     -     -    30     -     -    23 |  288   0.52
 YELL |     -   110     -    76     -     -    55     -     -   101 |  280   0.07
 YSSK |     -    32     -     -     -     -    31     -     -     - |  287  10.41
 ZAMB |     -    65     -    33     -     -    66     -     -     - |  288  27.78
 -----+-------------------------------------------------------------+--------------
 TOT  |  4237    56    48    48   122  3295    55  3602     -    45 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

