
 GPS week: 1242   Day: 6   MJD: 52944                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683      0     0.19    -0.11     4.47     0.00
 cod |   288     0  26857    340    -0.14    -0.17     0.05    17.30
 emr |   288     0  20269      0   527.82     7.64     0.04    22.88
 esa |   288     0  19013   1291    -0.41    -0.03     0.08     8.82
 gfz |   288     0  19699    871     0.39    -0.01     0.04    22.82
 iga |    96     0   2587      7     0.21    -0.16     0.12     0.00
 igu |    96     0   2587      0     0.21    -0.13     3.02     0.00
 jpl |   288     0  14342      3    -6.16    -0.68     0.06    14.89
 ngs |    96     0   2683      0     0.19    -0.11     4.19     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  32373   1058    47.99    12.98     0.06    13.29

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -9478    89     3   142  -253    60-10678   166 -9386     -    50 |
    2 | -3213    -3   -78   180    -8   175 -2527    97 -2233     -    23 |
    3 |  8312   -57  -220    89   249   -82 10974    75  7512     -  -101 |
    4 | -1657   -47   -86  -147   216  -125   726    30 -2005     -   -95 |
    5 |-10544   -24   112   -54   -62   100 -5561    30 -8282     -   -51 |
    6 |  -530    -4    31     2    60  -324  1112  -106   691     -   -43 |
    7 |   883   -49   -38     X   238    -7 -2314  -169   715     -  -103 |
    8 |-14271   110    22   238  -216   250 -9090   -54-13850     -    56 |
    9 |  -377   -22   102   -25  -101   -86  2883   -84  -579     -    53 |
   10 |  -435    81     9   -78    51   101  3614  -123  -733     -   -30 |
   11 |  3439   120  -203   224    33    54  1977    90  3232     -   -19 |
   13 |  6303    18   -63   -29    54  -218  1900   129  5856     -     0 |
   14 |  8512   155   -34   -35   -44   -79  2759   167  7956     -   -61 |
   15 | -2088     0   -79   -82   157   135  3531    -3 -1624     -   -81 |
   16 |  3732    13     6    69  -201    -7  1739   310  3625     -   -45 |
   17 | -6009   -43    55  -166   167   178 -6070   -32 -5535     -  -184 |
   18 |  5084    55   -86   140   -53    19  2169   152  4936     -   -82 |
   20 |  4002   188  -114   190  -125   174  1735   190  4056     -    22 |
   21 |  7263   112  -137   208   -80    49  -546    70  6753     -    82 |
   23 |  2377   -10  -214     X    12     -     -   416  1547     -   -83 |
   24 |   974    -9   128  -147    -9   -47  2201     0   401     -   -96 |
   25 | -1517    10   -87    11    12   -93  2342   171  -970     -   -65 |
   26 |  1743    15   -10    -3    31  -138  -490   -26  1108     -   -50 |
   27 |  -182   -75  -109    63   266   -48 -4160   -29  -596     -  -185 |
   28 |  4905   134   -14    12   -91    34 -4304    75  4240     -    -9 |
   29 | -1248   -36    21   -13     0  -150  6282   -68 -1533     -    25 |
   30 | -3047   -82     2  -179   134  -138  1723   -93 -2940     -     X |
   31 | -2733    25  -169   104    57   223 -1775    30 -2180     -    67 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    32   -25     -     -     -     -    17     -     -   -18 |
 ALGO |     -   -11    14  -121     -     -     -   -16     -     -    89 |
 AMC2 |     -   -59    28     -     -     -     -  -102     -     -   142 |
 AOML |     -     -     -     -     -     -     -    26     -     -   -29 |
 ARTU |     -   -36     -     -   -11     -     -    58     -     -     - |
 ASC1 |     -   204     -  -201   -12     -     -     -     -     -  -110 |
 AUCK |     -  -266     -     X   460     -     -     -     -     -  -279 |
 BAHR |     -    -1   167    23   -33     -     -     -     -     -  -244 |
 BOGT |     -   180     -     -     -     -     -     -     -     -  -235 |
 BOR1 |     -     -    72     -     -     -     -     -     -     -  -124 |
 BREW |     -     -     8     -     -     -     -   -15     -     -     2 |
 BRMU |     -     -     -     -   -20     -     -     -     -     -    34 |
 BRUS |     -    29    -4     -     -     -     -     -     -     -   -32 |
 CAS1 |     -     1     -   -63    16     -     -     -     -     -    15 |
 CEDU |     -   -89     -   131     -     -     -     -     -     -    29 |
 CHAT |     -     2     -   169   -82     -     -     -     -     -    26 |
 CHUR |     -   130     -     -     -     -     -    36     -     -  -210 |
 COCO |     -  -295     -   578     -     -     -     -     -     -     - |
 CORD |     -    27     -     -     -     -     -   -31     -     -     - |
 CRO1 |     -     -    19     -    62     -     -   -99     -     -   -29 |
 DRAO |     -    45   -46     -     -     -     -     -     -     -    21 |
 DWH1 |     -     -    86     -     -     -     -   -85     -     -   -53 |
 FAIR |     -     -     6  -114   -65     -     -    17     -     -   158 |
 GLPS |     -    21     -     -   -16     -     -     -     -     -     - |
 GODE |     -  -174    91   120     -     -     -     -     -     -   -10 |
 GRAZ |     -   -35    30     -     -     -     -     -     -     -    -5 |
 GUAM |     -   -76     -   -27     -     -     -   -11     -     -   133 |
 GUAT |     -   151     -     -  -167     -     -     -     -     -    91 |
 HERS |     -  -145  -141     -     -     -     -     -     -     -   411 |
 HOB2 |     -   -28   124  -165     -     -     -     -     -     -   -68 |
 HRAO |     -     -     -     -   -22     -     -   -21     -     -    61 |
 IISC |     -     2     -   -35    24     -     -     -     -     -   -20 |
 JPLM |     -     -   -20     -     -     -     -    18     -     -    15 |
 KERG |     -    51    37   -78    14     -     -     -     -     -  -103 |
 KGN0 |     -     -    16     -     -     -     -     -     -     -   -27 |
 KIRU |     -     8     -     4     -     -     -   -60     -     -    54 |
 KOKB |     -   -88   102     -   -38     -     -  -138     -     -   159 |
 KOSG |     -   -50     -     -     -     -     -     -     -     -    65 |
 KOUR |     -    84     -  -379   124     -     -   -98     -     -    39 |
 KSTU |     -   -13     -     -    40     -     -     -     -     -   -52 |
 LHAS |     -     -     -  -100     -     -     -     -     -     -    66 |
 LPGS |     -     -     -  -232     X     -     -     -     -     -   154 |
 MAC1 |     -   -25     -   -25   -27     -     -     -     -     -    96 |
 MAD2 |     -     -     -     -     -     -     -   -25     -     -    28 |
 MAS1 |     -     -    24  -108   -26     -     -    94     -     -   -31 |
 MCM4 |     -   198     -     -     X     -     -     -     -     -  -258 |
 MDO1 |     -    28   -38  -185    73     -     -     -     -     -    28 |
 METS |     -   -79    51     -     -     -     -     -     -     -    15 |
 MKEA |     -   -39     -    31    -9     -     -    -9     -     -    54 |
 NANO |     -   169     -     -     -     -     -  -196     -     -     - |
 NKLG |     -     4     -     -  -119     -     -     -     -     -   201 |
 NLIB |     -     -   -66     -     -     -     -    59     -     -    48 |
 NNOR |     -     -    55  -126     -     -     -     -     -     -   -11 |
 NRC1 |     -     0    40  -195    12     -     -   -13     -     -    54 |
 NTUS |     -   -17     -     -     -     -     -     -     -     -    22 |
 NYA1 |     -     X     -     -  -105     -     -     -     -     -   181 |
 NYAL |     -     -   -50   339     -     -     -     -     -     -  -139 |
 ONSA |     -    13    15   157   -85     -     -     -     -     -     - |
 PERT |     -   -20    62    12   -31     -     -    27     -     -   -66 |
 PIMO |     -     -     -   -56    22     -     -     -     -     -     X |
 POTS |     -    89     -   -30   -13     -     -     -     -     -   -74 |
 PRDS |     -   -43     2     -     -     -     -   -13     -     -    67 |
 QAQ1 |     -   -22     -     -     -     -     -     -     -     -    29 |
 REYK |     -   -88     -     -     -     -     -     -     -     -   114 |
 RIOG |     -   -39     -   201   -76     -     -     -     -     -    48 |
 SANT |     -  -174     -   253  -146     -     -   233     -     -    46 |
 SCH2 |     -   -58    41     -     -     -     -   -46     -     -    59 |
 SFER |     -    16   -41     -     -     -     -     -     -     -    49 |
 STJO |     -   -52    54     -     -     -     -   -24     -     -     1 |
 SUTH |     -    16     -     -     -     -     -    60     -     -   -89 |
 THTI |     -     -     -  -107   -82     -     -     -     -     -   213 |
 THU3 |     -    12     -     -    -9     -     -     -     -     -     X |
 TLSE |     -     -    32     -     -     -     -     -     -     -   -55 |
 TRO1 |     -  -112     -     -   -11     -     -     -     -     -   182 |
 TROM |     -     -     -     9     -     -     -     -     -     -    -6 |
 TSKB |     -     6    11   -73    -1     -     -     -     -     -    23 |
 TWTF |     -    25   -11     -     -     -     -     -     -     -   -13 |
 UNSA |     -     -     -     -    -5     -     -     -     -     -     9 |
 URUM |     -    27     -     -   -28     -     -     -     -     -    12 |
 USN1 |     -     -   219     -     -     -     -  -431     -     -   107 |
 USNA |     -     -     -     -     -     -     -    39     -     -   -43 |
 USNO |     -  -144    69     -     -     -     -     -     -     -    69 |
 USUD |     -   -37   -58    50   -13     -     -   128     -     -    -7 |
 VILL |     -    -4     -     X     -     -     -    35     -     -   -34 |
 WES2 |     -     -     8     -     -     -     -     -     -     -   -14 |
 WHIT |     -   -52     -     -     -     -     -     -     -     -    68 |
 WILL |     -   -19     8     -     -     -     -     -     -     -    11 |
 WSRT |     -   -28    75     -     -     -     -     -     -     -   -92 |
 WTZR |     -    -7    48    20     -     -     -     -     -     -   -86 |
 WUHN |     -     -   103   -65     -     -     -   -78     -     -   -48 |
 YAR2 |     -   -22     -     -     -     -     -     -     -     -    29 |
 YELL |     -   -52     -    29     X     -     -    19     -     -    26 |
 ZAMB |     -   135     -     -    55     -     -  -240     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  6656    48    25   181    35   225  6620    92  6583     -   117 |  288   4.56
    2 |  6623    86    51    62    56    72  4272   109  5632     -    48 |  288   3.14
    3 |  2650   138    46   167    56    87  4679    38  2402     -    51 |  284   2.02
    4 |   974    46    24    42    60    70  1035    63   931     -    62 |  288   0.63
    5 |  6857    57    24    38    21    71  5230    26  5874     -    53 |  288   2.14
    6 | 12905   100    36   138    52   206  4512    57 11605     -    47 |  288  10.25
    7 |  1139   154   103     X    96   289   657    82  1165     -   101 |  279   0.80
    8 |  6104    75    33   157    41   128  3852    29  5766     -   112 |  288   2.56
    9 |  2994    45    32    40    21   106  2395    22  2932     -    77 |  288   2.50
   10 |  2506    59    25    75    37    86  1986    93  2519     -    51 |  288   2.05
   11 |   962    62    31    64    52   109   944    66   914     -    80 |  288   0.33
   13 |   858    41    49   178    43    71  1735    48   818     -   112 |  288   0.32
   14 |  2073    56    38   145    45   120  1423    58  1929     -    55 |  288   0.24
   15 |  4022    57    66   106    50   163  2874    69  4253     -   100 |  288   2.20
   16 |   842    60    36    33    87    71  1045    78   850     -    50 |  288   0.37
   17 |  2006    45    22   181    17    53  3262    40  2253     -    53 |  288   1.26
   18 |   470    65    45    52    50    51  1284    68   513     -    44 |  288   0.36
   20 |   968    52    49    49    42    57  1311    41   881     -   120 |  288   0.33
   21 |  1083    31    31    51    39    30   691    68   902     -    84 |  288   0.26
   23 |  8392    62    93     X    61     -     -   115  8441     -    98 |  288   8.06
   24 |  4518    39    30    42    30    91  2709    38  4230     -    53 |  288   2.71
   25 |  4892    45    36    60    51    74  2724    96  4448     -    91 |  288   1.99
   26 |  2423    56    29    53    40   140   766    62  2093     -    63 |  288   0.40
   27 |  1793    26    24    58    22    60  3411    38  1846     -    59 |  288   0.97
   28 |  5856    67    27   121    44    59  3285    59  5767     -    60 |  288   0.39
   29 |  1183    54    22    32    46    84  3420    45  1213     -    57 |  288   0.46
   30 |  1952    46    23    25    37    80  1385    32  1976     -     X |  288   0.56
   31 |  3031    71    85   118    42   227  3084    71  3036     -   213 |  288   1.29
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    19    22     -     -     -     -    26     -     -    36 |  288   9.58
 ALGO |     -    19    21    40     -     -     -    14     -     -    14 |  288   0.02
 AMC2 |     -    13    25     -     -     -     -    29     -     -    34 |  288   0.04
 AOML |     -     -     -     -     -     -     -    22     -     -    24 |  288  22.19
 ARTU |     -    26     -     -    13     -     -    20     -     -     - |  288  12.83
 ASC1 |     -    25     -    30    24     -     -     -     -     -    51 |  280    >>>
 AUCK |     -    51     -     X    60     -     -     -     -     -    61 |  264  17.51
 BAHR |     -    49    39    61    27     -     -     -     -     -    36 |  288   0.32
 BOGT |     -    32     -     -     -     -     -     -     -     -    41 |  201  36.42
 BOR1 |     -     -    11     -     -     -     -     -     -     -    20 |  288   0.67
 BREW |     -     -    25     -     -     -     -    24     -     -    30 |  288   0.04
 BRMU |     -     -     -     -    25     -     -     -     -     -    43 |  252    >>>
 BRUS |     -    22    17     -     -     -     -     -     -     -    24 |  288   0.03
 CAS1 |     -    48     -   112    27     -     -     -     -     -    76 |  288   8.52
 CEDU |     -    38     -    42     -     -     -     -     -     -    39 |  276  15.85
 CHAT |     -    50     -    27    46     -     -     -     -     -    28 |  287  17.60
 CHUR |     -    26     -     -     -     -     -    27     -     -    22 |  287   4.59
 COCO |     -    15     -    29     -     -     -     -     -     -     - |  107  11.87
 CORD |     -   123     -     -     -     -     -   143     -     -     - |  288  22.07
 CRO1 |     -     -    29     -    24     -     -    26     -     -    38 |  288  31.64
 DRAO |     -    31    14     -     -     -     -     -     -     -    22 |  288   0.16
 DWH1 |     -     -    26     -     -     -     -    28     -     -    24 |  288   0.45
 FAIR |     -     -    19    36    22     -     -    44     -     -    55 |  288   0.04
 GLPS |     -    18     -     -    14     -     -     -     -     -     - |  288  35.21
 GODE |     -    23    39    34     -     -     -     -     -     -    80 |  288   0.16
 GRAZ |     -    20    15     -     -     -     -     -     -     -    34 |  287  22.53
 GUAM |     -    41     -    73     -     -     -    67     -     -   138 |  288  28.50
 GUAT |     -    27     -     -    24     -     -     -     -     -    46 |  288    >>>
 HERS |     -    58    49     -     -     -     -     -     -     -    39 |  264  18.52
 HOB2 |     -    26    35    51     -     -     -     -     -     -    47 |  288   0.06
 HRAO |     -     -     -     -    34     -     -    39     -     -    28 |  288  16.43
 IISC |     -    46     -    37    45     -     -     -     -     -   128 |  288  36.55
 JPLM |     -     -    93     -     -     -     -   142     -     -    21 |  275    >>>
 KERG |     -    57    48    48    39     -     -     -     -     -    63 |  287   1.87
 KGN0 |     -     -    20     -     -     -     -     -     -     -    35 |  287   0.35
 KIRU |     -    23     -    37     -     -     -    25     -     -    28 |  288   8.83
 KOKB |     -    26    33     -    19     -     -    41     -     -    38 |  288   0.06
 KOSG |     -    29     -     -     -     -     -     -     -     -    38 |  288 115.29
 KOUR |     -    26     -    41    36     -     -    60     -     -    48 |  288   2.46
 KSTU |     -    59     -     -    18     -     -     -     -     -    69 |  286  11.78
 LHAS |     -     -     -   112     -     -     -     -     -     -    74 |  258  31.09
 LPGS |     -     -     -   142     X     -     -     -     -     -    95 |  286  26.37
 MAC1 |     -    35     -    29    27     -     -     -     -     -    39 |  288  17.10
 MAD2 |     -     -     -     -     -     -     -   103     -     -   116 |  288   0.12
 MAS1 |     -     -    19    40    43     -     -    39     -     -    40 |  288   2.68
 MCM4 |     -    50     -     -     X     -     -     -     -     -    65 |  247    >>>
 MDO1 |     -    55    84    95    37     -     -     -     -     -    58 |  288  25.13
 METS |     -    22    20     -     -     -     -     -     -     -    22 |  287  10.71
 MKEA |     -    56     -    39    29     -     -    28     -     -    40 |  288  48.41
 NANO |     -    18     -     -     -     -     -    21     -     -     - |  288  49.55
 NKLG |     -    34     -     -    36     -     -     -     -     -    50 |  287 265.34
 NLIB |     -     -    19     -     -     -     -    20     -     -    24 |  288   0.05
 NNOR |     -     -    27    40     -     -     -     -     -     -    41 |  288   0.63
 NRC1 |     -    34    32    35    26     -     -    22     -     -    32 |  288   0.02
 NTUS |     -    26     -     -     -     -     -     -     -     -    34 |  288  10.67
 NYA1 |     -     X     -     -    12     -     -     -     -     -    21 |  288   0.05
 NYAL |     -     -    17    35     -     -     -     -     -     -    28 |  288   0.08
 ONSA |     -    30    67    56    32     -     -     -     -     -     - |  288   0.03
 PERT |     -    40    35    31    23     -     -    35     -     -    78 |  288  11.24
 PIMO |     -     -     -   139    54     -     -     -     -     -     X |  288  29.88
 POTS |     -    26     -    40    23     -     -     -     -     -    36 |  288  21.40
 PRDS |     -    21    34     -     -     -     -    22     -     -    74 |  288   2.41
 QAQ1 |     -    28     -     -     -     -     -     -     -     -    37 |  283   7.79
 REYK |     -    25     -     -     -     -     -     -     -     -    33 |  255  10.41
 RIOG |     -    44     -    67    37     -     -     -     -     -    67 |  288  17.78
 SANT |     -    38     -    59    26     -     -    30     -     -    39 |  288   7.18
 SCH2 |     -   103    45     -     -     -     -    59     -     -    38 |  285  65.15
 SFER |     -    28    10     -     -     -     -     -     -     -    34 |  287   0.52
 STJO |     -    12    16     -     -     -     -    14     -     -    33 |  288   0.06
 SUTH |     -    77     -     -     -     -     -    20     -     -   104 |  288  14.59
 THTI |     -     -     -    83    31     -     -     -     -     -    44 |  287   1.36
 THU3 |     -    11     -     -     8     -     -     -     -     -     X |  287   7.21
 TLSE |     -     -    15     -     -     -     -     -     -     -    26 |  243   0.54
 TRO1 |     -    25     -     -    35     -     -     -     -     -    40 |  288  10.68
 TROM |     -     -     -    73     -     -     -     -     -     -    48 |  286  13.99
 TSKB |     -    19    15    49    21     -     -     -     -     -    29 |  288   1.64
 TWTF |     -    27    37     -     -     -     -     -     -     -    44 |  288   0.43
 UNSA |     -     -     -     -    22     -     -     -     -     -    38 |  288  22.37
 URUM |     -    18     -     -    17     -     -     -     -     -    24 |  288  54.93
 USN1 |     -     -    21     -     -     -     -    20     -     -    43 |  288   0.04
 USNA |     -     -     -     -     -     -     -    34     -     -    38 |  286  73.86
 USNO |     -    19    11     -     -     -     -     -     -     -    24 |  288   0.03
 USUD |     -    23    32    66    17     -     -    28     -     -    37 |  288  17.33
 VILL |     -    31     -     X     -     -     -    27     -     -    53 |  288   7.87
 WES2 |     -     -    27     -     -     -     -     -     -     -    46 |  288   0.42
 WHIT |     -    16     -     -     -     -     -     -     -     -    21 |  288   7.88
 WILL |     -    30    32     -     -     -     -     -     -     -    33 |  288  20.95
 WSRT |     -    23    14     -     -     -     -     -     -     -    25 |  288   0.02
 WTZR |     -    41    22    38     -     -     -     -     -     -    24 |  288   0.07
 WUHN |     -     -    29    34     -     -     -    22     -     -    60 |  287  31.62
 YAR2 |     -    31     -     -     -     -     -     -     -     -    41 |  288  15.84
 YELL |     -    63     -   135     X     -     -    58     -     -   133 |  283   0.07
 ZAMB |     -    65     -     -    45     -     -    88     -     -     - |  288  19.72
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4473    50    39    82    39   123  3017    58  4190     -    61 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

