
 GPS week: 1242   Day: 4   MJD: 52942                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2668      0    -0.22     0.21     4.35     0.00
 cod |   288     0  23392    148    -0.28     0.66     0.05    23.09
 emr |   264     0  17758     59 -1493.27   -22.32     0.05    23.51
 gfz |   288     0  18250    251    -0.32    -0.45     0.05    22.53
 iga |    96     0   2576     62    -0.11     0.07     0.11     0.00
 igu |    96     0   2645      8     0.12    -0.48     3.99     0.00
 jpl |   288     0  15285    520     1.95    -0.87     0.06    16.08
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  28761    736    20.43    13.11     0.07    14.79

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------+
    1 |  2007   134   -31  -126     4  5865   -17     -    33 |
    2 |   971   117    27  -187   192  6533    68     -    18 |
    3 | -2499   144    28  -253   -73 -2220   109     -    76 |
    4 |  -518     5  -238   234  -110  1836   143     -  -124 |
    5 | -1762    11    49   -92   156-15922   159     -   -11 |
    6 |  7889   -56   -18   100  -178 25250   -12     -   -31 |
    7 | -2638   -27   -90   153   179  -640    85     -  -101 |
    8 |  5253   -33  -113   226   135  2795  -216     -   -45 |
    9 | -6299   -91   -10   127  -132 -6806   -67     -    -9 |
   10 |   342   -28  -140   231   280  6470     0     -  -112 |
   11 |  2764    81  -210   115    20   297   -16     -     4 |
   13 |  5233   156  -138    40  -179  -914   -53     -   -88 |
   14 |  1775   -18   -72    67   -65   504   203     -   -57 |
   15 | -3281   -85    61    71   138  5645    17     -   -73 |
   16 |  3920  -122    81    56  -166  -376   108     -   -82 |
   17 |  1911   -31   -17   111   113 -8415    93     -  -135 |
   18 |  2889     0  -169    61   -10 -1422   212     -    56 |
   20 |  2313   152   -19  -338   192   858   234     -   144 |
   21 |  1405   104   -87  -167    92  -558    70     -   168 |
   23 |   991   -96   -80    70  -861 -4775   165     -   101 |
   24 | -6849    25    -1    20    38 -2198    24     -   -84 |
   25 | -6382    46    87  -132   -39 -5174   107     -   -38 |
   26 |   -49   -61     7    30  -132  1253    33     -    18 |
   27 |  -561    -7  -110   186  -150 -1122  -115     -   -41 |
   28 |  9747   -37   -77    28    96  1985    53     -    87 |
   29 | -8460     -   -48   219     -   645    23     -  -285 |
   30 | -6127    14   -49    50     4 -5237   -24     -   -12 |
   31 | -4440    63  -156    54    39 -2235    77     -   -15 |
 -----+-------------------------------------------------------+
 ALBH |     -     -   -60     -     -     -    85     -    -3 |
 ALGO |     -  -202   141     -     -     -    61     -     - |
 AMC2 |     -   -70   153     -     -     -  -161     -    66 |
 ANKR |     -   -43     -     -     -     -    62     -     - |
 AOML |     -    78     -     -     -     -  -147     -    65 |
 AREQ |     -    58   -92   -41     -     -    59     -    43 |
 ARTU |     -     -     -   -49     -     -    69     -     - |
 ASC1 |     -    15     -    40     -     -     -     -   -81 |
 AUCK |     -   -16     -    -5     -     -     -     -    32 |
 BAHR |     -    -4    39   -18     -     -    47     -   -72 |
 BOGT |     -  -182     -     -     -     -     -     -   283 |
 BOR1 |     -     -    85     -     -     -     -     -  -135 |
 BREW |     -     -   -19     -     -     -     -     -    31 |
 BRMU |     -     -     -   -35     -     -     -     -    53 |
 BRUS |     -   -17    33     -     -     -   -47     -    28 |
 CHAT |     -   -27     -   -10     -     -     -     -    57 |
 CHUR |     -    82   126     -     -     -     -     -  -292 |
 CRO1 |     -     -    61     -     -     -  -107     -    26 |
 DRAO |     -    75   -79     -     -     -     -     -     4 |
 DWH1 |     -     -    95     -     -     -   -67     -   -66 |
 FAIR |     -     -   -33   -12     -     -    10     -    45 |
 FORT |     -   134   -85   -70     -     -    60     -   -10 |
 GLPS |     -    21     -   -21     -     -     -     -     - |
 GOLD |     -   -53     -     -     -     -    75     -     X |
 GUAM |     -    86     -   -80     -     -  -189     -   193 |
 GUAT |     -     -     -    33     -     -     -     -   -50 |
 HERS |     -  -116  -163     -     -     -     -     -   391 |
 HRAO |     -   -18     -     9     -     -    13     -     - |
 IISC |     -   -28     -    19     -     -     -     -    15 |
 JPLM |     -     -   -27     -     -     -     -     -    43 |
 KERG |     -     -     4    39     -     -     X     -   -66 |
 KGN0 |     -     -   -31     -     -     -     -     -    50 |
 KIRU |     -   -54     -     -     -     -     1     -    82 |
 KOKB |     -     -    -3   -12     -     -  -123     -   156 |
 KOSG |     -   -59     -     -     -     -     -     -    91 |
 KOUR |     -    45     -    24     -     -   -87     -   -11 |
 KSTU |     -   -63     -     -     -     -    47     -    47 |
 KUNM |     -    69     -     -     -     -     -     -  -107 |
 LHAS |     -     -     -  -188     -     -   181     -    90 |
 LPGS |     -  -107     -     -     -     -   128     -    -8 |
 MAD2 |     -     -     -     -     -     -  -102     -   111 |
 MAS1 |     -     -    23   -11     -     -    17     -   -35 |
 MCM4 |     -   304     -  -240     -     -     -     -  -128 |
 MDO1 |     -   -14    67   -43     -     -     -     -   -11 |
 MEDI |     -     -     8     -     -     -     -     -   -12 |
 MKEA |     -    11     -  -179     -     -     -     -   207 |
 NKLG |     -   -86     -    49     -     -   -20     -    77 |
 NLIB |     -     -     -     -     -     -   -31     -    34 |
 NNOR |     -     -   -44     -     -     -     -     -    70 |
 NRC1 |     -   -85   127   -45     -     -    11     -    37 |
 NTUS |     -   -77     -     -     -     -     -     -   121 |
 NYA1 |     -   118     -     X     -     -  -170     -     X |
 NYAL |     -     -   -34     -     -     -     -     -    53 |
 OHI2 |     -    -6     -   -92     -     -   145     -     - |
 ONSA |     -   -26    37    -7     -     -     -     -     - |
 PERT |     -   -16    11   -19     -     -    24     -    12 |
 PETP |     -   -30     -     -     -     -    44     -     - |
 PIE1 |     -     -    90     -     -     -     -     -  -143 |
 POTS |     -    18     -     3     -     -     -     -   -32 |
 PRDS |     -     -    -5     -     -     -     -     -     8 |
 RESO |     -    -4     -     -     -     -     6     -     - |
 REYK |     -    17     -     -     -     -   -41     -    23 |
 RIOG |     -   -20     -    36     -     -     -     -   -22 |
 SANT |     -   -32     -   -65     -     -     -     -   157 |
 SCH2 |     -  -155   132     -     -     -     -     -    50 |
 SFER |     -     -    15     -     -     -     -     -   -24 |
 STJO |     -   -38    39     -     -     -   -33     -    39 |
 SUTH |     -    10     -     -     -     -     -     -   -15 |
 THTI |     -     -     -   -47     -     -   -20     -    94 |
 THU3 |     -   -56     -    -8     -     -     -     -   107 |
 TLSE |     -    -8   107     -     -     -     -     -  -148 |
 TRO1 |     -   -77     -    39     -     -     -     -    84 |
 TSKB |     -   -47   -39    28     -     -     -     -    87 |
 TWTF |     -    -9   -28     -     -     -     -     -    55 |
 URUM |     -     1     -   -34     -     -     -     -    50 |
 USN1 |     -     -   312     -     -     -  -508     -   106 |
 USNO |     -     -     5     -     -     -   -80     -   101 |
 USUD |     -   -76    21     -     -     -   -26     -   117 |
 VILL |     -    21     -     -     -     -     -     -   -33 |
 WES2 |     -     -   110     -     -     -     -     -  -176 |
 WHIT |     -   222     -     -     -     -     -     -  -346 |
 WILL |     -   -14    15     -     -     -     -     -     0 |
 WSRT |     -   -12    59     -     -     -     -     -   -66 |
 WTZR |     -   -20    54     -     -     -     X     -   -55 |
 WUHN |     -     -    28     -     -     -   -99     -    68 |
 YAKT |     -   -86     -     -     -     -     -     -   134 |
 YELL |     -   -26     -   -37     -     -    98     -    -7 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6097    40    27    30    57  2853    52     -    72 |  288   4.19
    2 |  2082    39    38    38    81  3233    41     -    64 |  288   2.17
    3 |  2358    97    36    92   101  1954    89     -    51 |  276   1.58
    4 |  1734    50    32    45    81  1515   129     -    54 |  288   0.68
    5 |  3939    35    29    41    37 10678    41     -    63 |  288   2.34
    6 | 12528    66    72    75   120 13763    60     -    88 |  277  10.74
    7 |  2263    79    55    30    66   544    88     -    98 |  278   0.98
    8 |  8625    55    64    45   133  4749    55     -    90 |  288   5.41
    9 |  2879    26    46    39    92  3183    55     -    52 |  288   1.54
   10 |  4678    70    83    70    79  3402    76     -    64 |  288   2.59
   11 |   685    51    56    42   235   559    91     -    80 |  288   0.35
   13 |  1292    39    22    35    94   659    58     -    91 |  288   0.33
   14 |   582    65    36    31    69   579    54     -    79 |  288   0.29
   15 |  6479    55    52    50   179  3338    54     -    87 |  288   3.77
   16 |   969    42    44    37    84   577    44     -    76 |  288   0.34
   17 |  2141    38    62    21   136  3907    34     -    83 |  288   0.69
   18 |   608    59    60    49    88   813    80     -    91 |  288   0.40
   20 |  1113    51    57    25    97   542    32     -    77 |  288   0.20
   21 |   951    35    33    44    73   599    55     -    74 |  288   0.37
   23 |  8850    74    94    50   218  4435    98     -   101 |  288   9.03
   24 |  3546    40    46    41   137  2437    63     -    83 |  288   2.62
   25 |  2496    44    73    38   162  3054    36     -    87 |  288   1.05
   26 |  1080    40    86    44    92  1063   119     -   108 |  288   0.48
   27 |  1328    36    44    38    83  1586    85     -    97 |  288   0.64
   28 |  3725    54    53    53    88   863   115     -    71 |  288   0.54
   29 |  5283     -   132   113     -  4168    88     -   157 |  276   3.54
   30 |  2521    54    26    46    51  2820    48     -    73 |  288   1.18
   31 |  2648    52    35    43   138  2095    95     -    59 |  278   1.95
 -----+-------------------------------------------------------+--------------
 ALBH |     -     -    35     -     -     -    69     -    74 |  271  12.59
 ALGO |     -    67    49     -     -     -   107     -     - |  233   0.31
 AMC2 |     -    53    34     -     -     -    49     -    91 |  287   0.12
 ANKR |     -    19     -     -     -     -    27     -     - |  288   9.76
 AOML |     -    48     -     -     -     -    58     -    52 |  287  42.48
 AREQ |     -    33    47    44     -     -    81     -    43 |  288  22.30
 ARTU |     -     -     -    25     -     -    35     -     - |  283  10.46
 ASC1 |     -    57     -    84     -     -     -     -    91 |  266    >>>
 AUCK |     -    38     -    42     -     -     -     -    51 |  264  13.71
 BAHR |     -    44    49    53     -     -    66     -    89 |  288   0.62
 BOGT |     -    64     -     -     -     -     -     -    99 |  150  25.32
 BOR1 |     -     -    20     -     -     -     -     -    31 |  263   0.27
 BREW |     -     -    33     -     -     -     -     -    53 |  254   0.09
 BRMU |     -     -     -    24     -     -     -     -    36 |  288    >>>
 BRUS |     -    29    32     -     -     -    33     -    39 |  288   0.14
 CHAT |     -    27     -    39     -     -     -     -    42 |  287  16.86
 CHUR |     -    87    53     -     -     -     -     -    82 |  246   4.54
 CRO1 |     -     -    36     -     -     -    43     -    47 |  270 156.82
 DRAO |     -    34    34     -     -     -     -     -    47 |  277   0.18
 DWH1 |     -     -    42     -     -     -    64     -    82 |  280   0.60
 FAIR |     -     -    48    39     -     -    50     -    74 |  268   0.12
 FORT |     -    34    42    67     -     -    56     -    70 |  288   0.25
 GLPS |     -    19     -    19     -     -     -     -     - |  282  45.19
 GOLD |     -    20     -     -     -     -    29     -     X |  220  33.59
 GUAM |     -    32     -    41     -     -    37     -    74 |  288  29.33
 GUAT |     -     -     -    20     -     -     -     -    31 |  288    >>>
 HERS |     -    39    30     -     -     -     -     -    40 |  264  19.83
 HRAO |     -    26     -    33     -     -    24     -     - |  288  14.13
 IISC |     -    30     -    56     -     -     -     -    64 |  288  28.90
 JPLM |     -     -    58     -     -     -     -     -    92 |  252    >>>
 KERG |     -     -    34    51     -     -     X     -    74 |  221   2.06
 KGN0 |     -     -    22     -     -     -     -     -    34 |  263   0.23
 KIRU |     -    92     -     -     -     -    87     -    77 |  222  11.28
 KOKB |     -     -    31    51     -     -    67     -    76 |  288   0.11
 KOSG |     -    26     -     -     -     -     -     -    41 |  288  16.58
 KOUR |     -    50     -    44     -     -    65     -    39 |  288   3.88
 KSTU |     -    23     -     -     -     -    50     -    71 |  285  12.50
 KUNM |     -    23     -     -     -     -     -     -    36 |  280  39.75
 LHAS |     -     -     -    92     -     -    37     -   119 |  288  13.98
 LPGS |     -    84     -     -     -     -    88     -    61 |  273  27.21
 MAD2 |     -     -     -     -     -     -   116     -   126 |  185   0.79
 MAS1 |     -     -    31    47     -     -    32     -    47 |  283   3.21
 MCM4 |     -    32     -    38     -     -     -     -    96 |  286   9.01
 MDO1 |     -    21    29    25     -     -     -     -    42 |  288  16.55
 MEDI |     -     -    22     -     -     -     -     -    35 |  262   0.10
 MKEA |     -    35     -    16     -     -     -     -    47 |  286  75.28
 NKLG |     -    70     -    77     -     -    48     -    65 |  285    >>>
 NLIB |     -     -     -     -     -     -    40     -    44 |  264  61.34
 NNOR |     -     -    39     -     -     -     -     -    62 |  260   0.64
 NRC1 |     -    49    44    30     -     -    59     -    58 |  288   0.11
 NTUS |     -    20     -     -     -     -     -     -    31 |  286  10.16
 NYA1 |     -    30     -     X     -     -    44     -     X |  209 116.70
 NYAL |     -     -    27     -     -     -     -     -    43 |  248   0.09
 OHI2 |     -    33     -    33     -     -    72     -     - |  288  16.82
 ONSA |     -    41    58    39     -     -     -     -     - |  288   0.12
 PERT |     -    51    46    39     -     -    75     -    81 |  288   8.80
 PETP |     -    36     -     -     -     -    52     -     - |  287  12.08
 PIE1 |     -     -    23     -     -     -     -     -    37 |  263   0.15
 POTS |     -    23     -    31     -     -     -     -    38 |  288  18.53
 PRDS |     -     -    18     -     -     -     -     -    28 |  224   2.61
 RESO |     -    34     -     -     -     -    49     -     - |  233  14.90
 REYK |     -    37     -     -     -     -    59     -    81 |  238  10.65
 RIOG |     -    42     -    49     -     -     -     -   113 |  285  16.19
 SANT |     -    34     -    58     -     -     -     -    92 |  259   7.75
 SCH2 |     -    96    76     -     -     -     -     -   105 |  265 142.83
 SFER |     -     -    81     -     -     -     -     -   128 |  261 280.67
 STJO |     -    66    36     -     -     -    66     -    56 |  276   0.27
 SUTH |     -    30     -     -     -     -     -     -    47 |  286  11.48
 THTI |     -     -     -    45     -     -    43     -    52 |  287   1.06
 THU3 |     -    28     -    29     -     -     -     -    81 |  288  15.13
 TLSE |     -    44    43     -     -     -     -     -    23 |  283   0.38
 TRO1 |     -    33     -    53     -     -     -     -   103 |  287  10.20
 TSKB |     -    23    36    32     -     -     -     -    40 |  288   0.93
 TWTF |     -    40    40     -     -     -     -     -    70 |  288   0.48
 URUM |     -    20     -    31     -     -     -     -    42 |  288  38.91
 USN1 |     -     -    38     -     -     -    58     -    66 |  282   0.09
 USNO |     -     -    60     -     -     -    79     -    75 |  252   0.46
 USUD |     -    34    47     -     -     -    49     -    25 |  288  17.80
 VILL |     -    31     -     -     -     -     -     -    49 |  288  11.30
 WES2 |     -     -    32     -     -     -     -     -    50 |  235   0.14
 WHIT |     -    42     -     -     -     -     -     -    66 |  196   1.79
 WILL |     -    49    42     -     -     -     -     -    65 |  262  29.20
 WSRT |     -    31    23     -     -     -     -     -    36 |  284   0.25
 WTZR |     -    42    24     -     -     -     X     -    48 |  258   0.11
 WUHN |     -     -    39     -     -     -    53     -    55 |  287  20.40
 YAKT |     -    17     -     -     -     -     -     -    27 |  231   1.16
 YELL |     -    33     -    23     -     -    62     -    86 |  269   0.16
 -----+-------------------------------------------------------+--------------
 TOT  |  4350    46    49    47   113  3986    64     -    71 |


 BEST CLOCK FIT: NYAL   248   0.09 (ns) 

