
 GPS week: 1242   Day: 2   MJD: 52940                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2684      0    -0.11     0.31     4.67     0.00
 cod |   288     0  21021      0     0.51    -1.01     0.06    18.67
 emr |   288     0  16956    142   490.95    11.78     0.06    19.63
 esa |   288     0  17780   2822    -0.73    -4.83     0.10     8.23
 gfz |   288     0  17804      0    -0.22     0.45     0.03    34.78
 iga |    96     0   2588      1    -0.10     0.28     0.11     0.00
 igu |    96     0   2588      4    -0.19     0.65     4.18     0.00
 ngs |    96     0   2684      0    -0.11     0.31     4.55     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |    96     0   2670      0    -0.14     0.32     0.06    18.68

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -7991   -34   -52   105    21   -96 -6100 -7994     -     9 |
    2 | -6400    54  -169   161    41   200 -6766 -5775     -   -73 |
    3 |  -553    86    -3    97   -74    -7  5177  -220     -    25 |
    4 |  -174   -59   -65  -165   112  -282  1580  -251     -   -23 |
    5 | -2799   -52     7   -45    31    43  -762 -2743     -    21 |
    6 |  9962   -95     7   -56    59  -280  8761  8819     -    22 |
    7 | -4143    60   -58   -13     7   140 -1977 -4245     -   -29 |
    8 | -3514   192   -20   194  -136   178-16936 -3701     -   -12 |
    9 | -2000   -81   -29  -216   111  -197  5697 -1740     -     2 |
   10 | -2398   -25   -11  -243    87   -14 -4955 -3152     -   -65 |
   11 |  6063    90  -156     X    19    35  4149  5993     -   113 |
   13 |  6649    83    36     9   -79   -37  4417  6764     -    67 |
   14 |  2352   -63   -78     X    67    45  3650  2757     -    61 |
   15 | -7105  -120   -76   -53   138    61 -6739 -6636     -  -104 |
   16 |  3942  -122   -87   268    68   -41  3110  4008     -   -93 |
   17 | -2658    32    52   -61   -27   220  1168 -2416     -   -29 |
   18 |  3277  -159  -119  -147   193   -74  4892  3031     -   -34 |
   20 |  5137   166   -71    97   -85   136  4085  4995     -    69 |
   21 |   675   -48   -59   325   -41   102  -567  1136     -   132 |
   23 | -9537   132    54     X   -96     -     - -8470     -   -18 |
   24 |  4596     9    36     X   -26   -94   -39  4247     -     1 |
   25 | -2114    24    96     X   -68     3  2530 -1942     -     4 |
   26 |   970   -24     6   -91    44   -68  8935  1562     -   -71 |
   27 | -2208   146   -35    74   -67    96 -3879 -2014     -   -50 |
   28 |  7485   119  -212    12    18   125  -971  6956     -   193 |
   29 | -2646   -82   -91  -115   119  -167 -1501 -2534     -    23 |
   30 |  2302  -103   -95   -74   143   -71 -2586  1588     -   -90 |
   31 |  2937   -35  -150     X   111    49 -5354  2052     -   -44 |
 -----+-------------------------------------------------------------+
 AMC2 |     -   -52    50     -     -     -     -     -     -     - |
 AREQ |     -     -   -79     -    45     -     -     -     -     - |
 ARTU |     -   -25     -     -    14     -     -     -     -     - |
 ASC1 |     -   107     -    26   -64     -     -     -     -     - |
 AUCK |     -   899     -     X  -482     -     -     -     -     - |
 BAHR |     -   -25    10    36    -1     -     -     -     -     - |
 CHAT |     -     8     -    92   -26     -     -     -     -     - |
 CHUR |     -   -11    10     -     -     -     -     -     -     - |
 CRO1 |     -   -15    14     -     -     -     -     -     -     - |
 DRAO |     -    -6     5     -     -     -     -     -     -     - |
 FAIR |     -     -    56   -28   -25     -     -     -     -     - |
 FORT |     -     -     X   425  -101     -     -     -     -     - |
 GLPS |     -   -48     -     -    26     -     -     -     -     - |
 GODE |     -  -129    98    58     -     -     -     -     -     - |
 GOLD |     -    43     -   -97     -     -     -     -     -     - |
 GRAZ |     -   -32    30     -     -     -     -     -     -     - |
 GUAM |     -   116     -    18   -66     -     -     -     -     - |
 GUAT |     -   -12     -     -     6     -     -     -     -     - |
 HERS |     -  -111   106     -     -     -     -     -     -     - |
 HOB2 |     -     -   113  -270     -     -     -     -     -     - |
 IISC |     -   -15     -     -     8     -     -     -     -     - |
 KERG |     -   -35   -49   187     2     -     -     -     -     - |
 KOKB |     -    19   -18     -     -     -     -     -     -     - |
 KOUR |     -    15     -    86   -28     -     -     -     -     - |
 LHAS |     -   -55     -   -47    40     -     -     -     -     - |
 LPGS |     -   -31     -    70     -     -     -     -     -     - |
 MAS1 |     -     -    74    41   -52     -     -     -     -     - |
 MCM4 |     -  -100     -     -    54     -     -     -     -     - |
 MDO1 |     -     -    11     X    -6     -     -     -     -     - |
 METS |     -   -40    38     -     -     -     -     -     -     - |
 MKEA |     -   114     -    17   -65     -     -     -     -     - |
 NKLG |     -    14     -     -    -7     -     -     -     -     - |
 NNOR |     -     -    19   -46     -     -     -     -     -     - |
 NRC1 |     -     -    51   -98    -6     -     -     -     -     - |
 NYAL |     -     -   -38    90     -     -     -     -     -     - |
 ONSA |     -    -5    64    -6   -32     -     -     -     -     - |
 PERT |     -    30   -20    90   -26     -     -     -     -     - |
 PIE1 |     -     -    13   -31     -     -     -     -     -     - |
 PIMO |     -     -     -  -100    24     -     -     -     -     - |
 POTS |     -    34     -   -34   -10     -     -     -     -     - |
 RIOG |     -    71     -     X   -38     -     -     -     -     - |
 SANT |     -   -61     -     X    33     -     -     -     -     - |
 SCH2 |     -  -545   519     -     -     -     -     -     -     - |
 SELE |     -    13     -   -30     -     -     -     -     -     - |
 STJO |     -   -81    77     -     -     -     -     -     -     - |
 THTI |     -     -     -  -114    27     -     -     -     -     - |
 THU3 |     -    87     -     -   -47     -     -     -     -     - |
 TIDB |     -   -24     1    93   -10     -     -     -     -     - |
 TIXI |     -    30     -     -   -16     -     -     -     -     - |
 TRO1 |     -  -128     -     -    69     -     -     -     -     - |
 TSKB |     -   -61   -16   -40    51     -     -     -     -     - |
 TWTF |     -   -41    39     -     -     -     -     -     -     - |
 URUM |     -   -85     -     -    46     -     -     -     -     - |
 USUD |     -  -119   113     2     -     -     -     -     -     - |
 VILL |     -   132     -  -299     -     -     -     -     -     - |
 WES2 |     -     -   214     -  -121     -     -     -     -     - |
 WILL |     -    26   -25     -     -     -     -     -     -     - |
 WSRT |     -  -110   105     -     -     -     -     -     -     - |
 WTZR |     -   -66    65    -7     -     -     -     -     -     - |
 YELL |     -     1     -   111   -27     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9818    33    29   110    19    46  6983 10047     -    91 |  288   5.76
    2 |  3347    42    40    67    29    56  5438  4578     -    51 |  288   3.32
    3 |  2677    81    50    76    47   110  3887  2607     -    38 |  288   2.11
    4 |  2104    45    42    78    27   133  1910  2117     -    61 |  288   0.73
    5 |  1871    48    93    62    35    91  1041  1695     -    39 |  288   1.95
    6 | 13289    67    41    43    28    87  9169 12988     -    53 |  288  10.86
    7 |  1722    59    71   185    34   115  1299  1787     -   124 |  288   1.07
    8 |  6187    41    47    90    50    78 12616  6106     -    87 |  288   4.06
    9 |  1953    23    26    55    19    59  3605  1965     -    20 |  288   1.35
   10 |  5175    77   106   107    63   138  2664  4619     -    67 |  288   1.90
   11 |  1771    46    35     X    21   121  3146  1715     -    57 |  288   0.59
   13 |  2568    57    42   154    24   122  3304  2402     -    77 |  288   0.40
   14 |  3641    51    36     X    27    61  2227  3511     -    60 |  288   0.23
   15 |  3596    93    42    89    29    88  3661  3578     -    56 |  288   2.05
   16 |  1253    56    62   100    26    74  2004  1138     -    41 |  288   0.40
   17 |  1604    60    46   175    38   164  1472  1783     -    49 |  288   1.36
   18 |   573    61    44    82    18   115  2137   444     -    38 |  288   0.34
   20 |  1501    57    50    71    28   106  2509  1449     -    42 |  288   0.23
   21 |  1517    46    36    32    25    50   530  2172     -    31 |  288   0.36
   23 | 10619    63    86     X    34     -     -  9400     -    31 |  288   9.68
   24 |  2926    71    53     X    36   155  2340  2668     -    38 |  288   2.86
   25 |  3366    39    30     X    26    49  2891  3628     -    24 |  288   1.72
   26 |  5821    32    83   123    28    75  4799  5166     -    49 |  288   0.85
   27 |   802    39    36    89    31    68  2867  1140     -    34 |  288   1.14
   28 |  3751    81   112    80    20   214  1750  3775     -    96 |  288   0.62
   29 |  1372    29    90   113    41    79   917  1571     -    87 |  288   0.75
   30 |  2346    38    40   167    27    81  1501  2317     -    33 |  288   0.51
   31 |  3550    74    47     X    57   272  3398  3293     -    52 |  278   1.32
 -----+-------------------------------------------------------------+--------------
 AMC2 |     -    30    29     -     -     -     -     -     -     - |  288   0.49
 AREQ |     -     -   140     -    79     -     -     -     -     - |  190  13.96
 ARTU |     -    25     -     -    13     -     -     -     -     - |  268  18.49
 ASC1 |     -    87     -    47    49     -     -     -     -     - |  275    >>>
 AUCK |     -    47     -     X    25     -     -     -     -     - |  264  14.36
 BAHR |     -    55    29    86    32     -     -     -     -     - |  288   0.58
 CHAT |     -    54     -    56    29     -     -     -     -     - |  287  12.57
 CHUR |     -    95    91     -     -     -     -     -     -     - |  281   3.47
 CRO1 |     -    56    54     -     -     -     -     -     -     - |  273  31.65
 DRAO |     -    15    14     -     -     -     -     -     -     - |  288   0.13
 FAIR |     -     -    55    38    26     -     -     -     -     - |  288   0.10
 FORT |     -     -     X   149    35     -     -     -     -     - |  123   0.05
 GLPS |     -    25     -     -    14     -     -     -     -     - |  281  32.06
 GODE |     -    48    45    78     -     -     -     -     -     - |  285   0.38
 GOLD |     -    50     -   114     -     -     -     -     -     - |  287  17.93
 GRAZ |     -    65    61     -     -     -     -     -     -     - |  284  60.80
 GUAM |     -    34     -   107    32     -     -     -     -     - |  288  28.19
 GUAT |     -    36     -     -    19     -     -     -     -     - |  278    >>>
 HERS |     -    61    58     -     -     -     -     -     -     - |  229  18.40
 HOB2 |     -     -    30    71     -     -     -     -     -     - |  288   0.05
 IISC |     -    49     -     -    26     -     -     -     -     - |  219  42.19
 KERG |     -    52    64   107    49     -     -     -     -     - |  287   2.34
 KOKB |     -    27    26     -     -     -     -     -     -     - |  284   0.07
 KOUR |     -    51     -    88    22     -     -     -     -     - |  287   1.73
 LHAS |     -    31     -    62    15     -     -     -     -     - |  288  10.38
 LPGS |     -    98     -   223     -     -     -     -     -     - |  270  22.70
 MAS1 |     -     -    39    55    25     -     -     -     -     - |  287   2.11
 MCM4 |     -    41     -     -    22     -     -     -     -     - |  285 118.73
 MDO1 |     -     -    52     X    29     -     -     -     -     - |  288  36.20
 METS |     -   111   106     -     -     -     -     -     -     - |  287  20.60
 MKEA |     -    36     -   100    38     -     -     -     -     - |  288  43.23
 NKLG |     -    44     -     -    23     -     -     -     -     - |  280 210.49
 NNOR |     -     -    54   128     -     -     -     -     -     - |  288   0.67
 NRC1 |     -     -    23    63    18     -     -     -     -     - |  288   0.07
 NYAL |     -     -    16    39     -     -     -     -     -     - |  288   0.07
 ONSA |     -    26    61   106    23     -     -     -     -     - |  288   0.09
 PERT |     -    46    28    72    38     -     -     -     -     - |  288  13.80
 PIE1 |     -     -    23    55     -     -     -     -     -     - |  288   0.11
 PIMO |     -     -     -   134    32     -     -     -     -     - |  271  28.29
 POTS |     -    25     -    55    13     -     -     -     -     - |  288  16.07
 RIOG |     -    54     -     X    29     -     -     -     -     - |  270  15.26
 SANT |     -    26     -     X    14     -     -     -     -     - |  234   5.45
 SCH2 |     -    19    18     -     -     -     -     -     -     - |  144  99.28
 SELE |     -    87     -   197     -     -     -     -     -     - |  258  50.53
 STJO |     -   119   113     -     -     -     -     -     -     - |  288   0.04
 THTI |     -     -     -    56    13     -     -     -     -     - |  287   7.81
 THU3 |     -    17     -     -     9     -     -     -     -     - |  288   9.78
 TIDB |     -    45    30    54    29     -     -     -     -     - |  288   0.09
 TIXI |     -    24     -     -    13     -     -     -     -     - |  287  10.46
 TRO1 |     -    38     -     -    20     -     -     -     -     - |  287   9.62
 TSKB |     -    45    35   118    44     -     -     -     -     - |  288   0.92
 TWTF |     -    54    51     -     -     -     -     -     -     - |  288   0.30
 URUM |     -    26     -     -    14     -     -     -     -     - |  287  37.64
 USUD |     -    49    52    82     -     -     -     -     -     - |  288  22.31
 VILL |     -    45     -   101     -     -     -     -     -     - |  287   3.19
 WES2 |     -     -    77     -    43     -     -     -     -     - |  223 131.56
 WILL |     -    39    37     -     -     -     -     -     -     - |  288  40.02
 WSRT |     -    32    30     -     -     -     -     -     -     - |  288   0.06
 WTZR |     -    71    26   126     -     -     -     -     -     - |  288   0.08
 YELL |     -    74     -    47    41     -     -     -     -     - |  288   0.04
 -----+-------------------------------------------------------------+--------------
 TOT  |  4672    55    57   101    32   115  4180  4550     -    59 |


 BEST CLOCK FIT: YELL   288   0.04 (ns) 

