
 GPS week: 1225   Day: 0   MJD: 52819                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2666      0    -0.21     0.31     4.30     0.00
 cod |   288     0  23973    364    -0.22     0.25     0.08    14.43
 emr |   288     0  20973    309    76.16     6.12     0.08    13.84
 gfz |   279     0  18858    906    -0.41     3.73     0.07    18.38
 igu |    96     0   2574      0     0.21    -0.14     4.10     0.00
 jpl |   288     0  14318    288    -0.49     3.23     0.04    37.27
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31783    605   710.22    15.77     0.07    16.08

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   sio   usn |
 -----+-------------------------------------------------+
    1 |  6097   -83   -97   152 10846   -90     -    18 |
    2 |  -586  -228  -187    87  6389   151     -   -29 |
    3 |  1326    10    -4    -1  5459   118     -   -45 |
    4 |  1082    90   -88   120   548   -95     -    52 |
    5 |  -721     0   -22   -78 -2378   144     -  -180 |
    6 | -9504    46  -149    36-12873    31     -   -15 |
    7 |  2059   -61  -153   171  -287   104     -   -38 |
    8 |  1032   -28   -99   216 13803    -7     -  -116 |
    9 |   842    46  -101    95 -1140    42     -   -74 |
   10 |   736    65    34    17 -4596   136     -  -152 |
   11 |  3380    29   -22    -1  4675     3     -   -13 |
   13 |  1281   143    68   168 -1097  -167     -   -34 |
   14 |  1299   128   -13  -106   192    67     -   -13 |
   15 |  -610    69   -23   -80  5762    76     -    27 |
   16 |  3169    19   -57   -76  -417   131     -  -144 |
   17 |-13173    27   -47   121     -    39     -   -63 |
   18 |  3246    69   -58   -13   -50    26     -   -49 |
   20 |  4185   -45  -169   133  1126   116     -     X |
   21 |  3808   211    46  -193   -95    60     -   -46 |
   23 |   182    77  -112    89   609    65     -   -94 |
   24 | -7073    -4   -89   -11-10609    40     -    11 |
   25 |  2411    58   -48    40 -1909   -27     -    -1 |
   26 |   578    85    14    42  2610   -67     -    -3 |
   27 |   813  -119   -41   172 -3142   -71     -   -25 |
   28 |  -862   160   -23   -33 -5835    50     -  -186 |
   29 | -1786    -6     X    66  1785   -19     -   -62 |
   30 | -2790    61   -14    41 -3201   -48     -   -73 |
   31 |  -955   -98   -47   103 -5837    50     -   -85 |
 -----+-------------------------------------------------+
 ALBH |     -  -151     -     -     -   -86     -   337 |
 ALGO |     -     -   -57     -     -    53     -   -74 |
 AMC2 |     -  -136   -36     -     -     X     -   154 |
 AOML |     -   -80     -     -     -    37     -   -13 |
 AUCK |     -   -45     -     X     -     -     -    40 |
 BAHR |     -    -7    34    -9     -    31     -   -87 |
 BILI |     -    16     -     6     -    -9     -     - |
 BJFS |     -     -   123  -265     -     -     -   190 |
 BOGT |     -     -     -     -     -     1     -    -2 |
 BOR1 |     -    62   148     -     -     -     -  -183 |
 BREW |     -     -   -28     -     -     -     -    24 |
 BRMU |     -     -     -    45     -     -     -   -52 |
 BRUS |     -     -    65     -     -    21     -  -105 |
 CAS1 |     -    24     -     -     -     -     -   -22 |
 CEDU |     -    73     -     -     -   -25     -    -7 |
 CHAT |     -   -86     -     -     -     -     -    77 |
 CHUR |     -    76   187     -     -     -     -  -183 |
 COCO |     -    69     -  -151     -   -31     -   139 |
 CORD |     -  -152     -   119     -     -     -     - |
 CRO1 |     -   -36   156   157     -  -127     -    19 |
 DAV1 |     -    71     -   -27     -    20     -   -80 |
 DRAO |     -    28   -64     -     -     -     -    30 |
 DWH1 |     -     -   223     -     -     -     -  -192 |
 EISL |     -    84     -   -71     -     1     -     4 |
 FAIR |     -     -   -60   -54     -     2     -   107 |
 GODE |     -  -198   139     -     -     -     -    58 |
 GOLD |     -     X     -     -     -   -74     -   171 |
 GRAZ |     -     -    -5     -     -     -     -     5 |
 GUAM |     -   208     -     -     -  -216     -   314 |
 GUAT |     -     -     -   -51     -   -11     -    80 |
 HERS |     -     -  -246     -     -     -     -   212 |
 HOB2 |     -    24   -93     -     -    82     -  -132 |
 HRAO |     -   -62     -   -91     -    -9     -   179 |
 IISC |     -   -83     -    74     -     -     -    -7 |
 JAB1 |     -    42     -     -     -   -16     -     - |
 JPLM |     -     -    19     -     -     -     -   -16 |
 KERG |     -     -    -9    32     -     -     -   -27 |
 KGN0 |     -     -  -103     -     -     -     -    89 |
 KIRU |     -    -6   -77     -     -     -     -    70 |
 KOKB |     -  -141    21   104     -     -     -    -8 |
 KOSG |     -   -53     -     -     -     -     -    47 |
 KOUR |     -    88     -     X     -   -58     -    57 |
 KSTU |     -     -     -     -     -    17     -   -40 |
 KUNM |     -     -     -     -     -     1     -    -2 |
 LPGS |     -   -52     -     X     -    29     -   -25 |
 MAC1 |     -   -15     -  -147     -     -     -   172 |
 MAS1 |     -   -39    58   -24     -    32     -   -63 |
 MAW1 |     -    37     -    -8     -     -     -   -26 |
 MCM4 |     -   352     -  -210     -     -     -   -79 |
 MDO1 |     -    -7   -19    38     -     -     -   -19 |
 MEDI |     -     -   146     -     -     -     -  -125 |
 METS |     -   -68   -56     -     -     -     -   110 |
 MIZU |     -     -   164     -     -   -68     -    16 |
 MKEA |     -    -7     -   -74     -     1     -    87 |
 NKLG |     -     -     -  -158     -     -     -   180 |
 NLIB |     -     -     9     -     -    24     -   -62 |
 NOT1 |     -     -    -2     -     -     -     -     2 |
 NPLD |     -   -30    92     -     -     -     -   -52 |
 NRC1 |     -   -90   140    99     -   -63     -    -4 |
 NRIL |     -     -     -   -99     -    49     -     - |
 NTUS |     -  -109     -     -     -     -     -    98 |
 NYA1 |     -    33     -   -83     -     -     -    63 |
 NYAL |     -     -    76     -     -     -     -   -65 |
 OHI2 |     -   -30     -  -148     -    82     -     - |
 ONSA |     -     -    52     8     -     -     -   -54 |
 PETP |     -   -43     -     -     -    16     -     - |
 PIE1 |     -     -    80     -     -     -     -   -69 |
 POL2 |     -    40     -     -     -     -     -   -36 |
 POTS |     -     7     -   -14     -     -     -     9 |
 RBAY |     -  -288     -     -     -     -     -   258 |
 SANT |     -   281     -  -136     -     -     -   -56 |
 SCH2 |     -     -    74     -     -     -     -   -64 |
 SFER |     -     -  -187     -     -     -     -   161 |
 STJO |     -     -   102     -     -    -9     -   -67 |
 THTI |     -     -     -    84     -     -     -   -96 |
 THU3 |     -    65     -   -51     -     -     -     - |
 TIDB |     -   -25    32    -5     -     -     -     X |
 TIXI |     -    83     -   -65     -     -     -     - |
 TRO1 |     -     -     -  -134     -     -     -   153 |
 TROM |     -     -     -     -     -    26     -   -59 |
 TSKB |     -    -6   -26     -     -     -     -    27 |
 TWTF |     -     -   -14     -     -     -     -    12 |
 UNSA |     -     -     -    -8     -     -     -     9 |
 URUM |     -   -39     -     -     -     -     -    35 |
 USNO |     -     -   101     -     -     -     -   -87 |
 USUD |     -     -   -64     -     -     -     -    55 |
 WILL |     -    -1    16     -     -     -     -   -13 |
 WSRT |     -   -54   140     -     -     -     -   -72 |
 WTZR |     -  -117   196     0     -     -     -   -65 |
 WUHN |     -     -   -55    35     -     -     -     8 |
 YAKT |     -  -172   146     -     -   -20     -    77 |
 YELL |     -   -17     -     4     -   -18     -    52 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 | 12211   179    55    40 12334    44     -   115 |  280   3.96
    2 |  2553    37    64    27  4176    18     -    44 |  288   2.00
    3 |  2684    74    69    46  3465    39     -    46 |  288   2.81
    4 |  1248   128    65    64   716    35     -    54 |  276   0.79
    5 |   623    73    37    31  1585    28     -    29 |  288   0.37
    6 | 10562    52    85    31 10237    23     -    73 |  288   7.24
    7 |  1705    59   137    53  1097    39     -    80 |  288   0.81
    8 |  4108    60    76    74  6865    69     -    70 |  288   2.49
    9 |  3005    50    58    52  2106    31     -    75 |  288   1.20
   10 |  2978    72    93    60  2470    48     -   122 |  288   2.99
   11 |  1827   105    87    20  2705    43     -    43 |  288   0.31
   13 |  1207    80    53    45   542    32     -    53 |  288   0.25
   14 |  1573    74    49    63   445    85     -    37 |  288   0.21
   15 |  4105   230    41    77  3009    23     -   112 |  277   2.71
   16 |  1863    45    55    25   457    28     -    45 |  288   0.18
   17 |  5349   183   135   158     -   130     -   158 |  275   4.14
   18 |  1299    82    76    79   400    49     -    42 |  288   0.39
   20 |  1505    70    66    32  1000    49     -     X |  288   0.19
   21 |  1353   126    39   127   683    29     -    47 |  288   0.58
   23 |  8899    69    40    75  2925    37     -    83 |  288   8.69
   24 |  3331   131    67    52  5252    47     -    69 |  279   2.19
   25 |  2431    50    83    38  1368    35     -    59 |  288   1.52
   26 |  2990   148    84    43  1990    31     -    62 |  282   0.70
   27 |  1318    35    60    39  2173    39     -    50 |  288   1.25
   28 |  3881    39   111    47  4782    55     -   143 |  288   1.38
   29 |  1994   100     X    64  1354   121     -   109 |  288   0.83
   30 |  1711    71    51    32  1353    37     -    56 |  288   0.40
   31 |  4819    77    82    39  4908    23     -    47 |  288   1.92
 -----+-------------------------------------------------+--------------
 ALBH |     -    75     -     -     -    45     -   169 |  288   0.07
 ALGO |     -     -    28     -     -    15     -    31 |  288   0.03
 AMC2 |     -    42    81     -     -     X     -    44 |  288   0.04
 AOML |     -    21     -     -     -     8     -    16 |  288  58.17
 AUCK |     -    56     -     X     -     -     -    50 |  263  13.01
 BAHR |     -    62    39    34     -    46     -    61 |  288   0.39
 BILI |     -    17     -    40     -    19     -     - |  287   9.56
 BJFS |     -     -   154    35     -     -     -   126 |  287    >>>
 BOGT |     -     -     -     -     -    21     -    49 |  286  11.94
 BOR1 |     -    53   134     -     -     -     -    73 |  287   0.50
 BREW |     -     -    39     -     -     -     -    33 |  286   0.05
 BRMU |     -     -     -    44     -     -     -    50 |  275    >>>
 BRUS |     -     -    90     -     -    27     -    48 |  288   0.05
 CAS1 |     -    98     -     -     -     -     -    88 |  288   8.12
 CEDU |     -    53     -     -     -    21     -    22 |  288  17.51
 CHAT |     -    46     -     -     -     -     -    41 |  284  12.94
 CHUR |     -    66   140     -     -     -     -    52 |  288  12.48
 COCO |     -    71     -    46     -    33     -    33 |  288   9.95
 CORD |     -    62     -    49     -     -     -     - |  274  13.35
 CRO1 |     -    29    32    51     -    15     -    35 |  288  15.52
 DAV1 |     -   155     -   164     -    62     -   154 |  288  17.54
 DRAO |     -    70    65     -     -     -     -    17 |  288   0.10
 DWH1 |     -     -   136     -     -     -     -   117 |  258   0.60
 EISL |     -    68     -    66     -    23     -    37 |  288  20.47
 FAIR |     -     -    55   106     -    23     -    42 |  288   0.07
 GODE |     -    48    83     -     -     -     -    37 |  288   0.11
 GOLD |     -     X     -     -     -    44     -   102 |  286  10.24
 GRAZ |     -     -    30     -     -     -     -    26 |  284  73.88
 GUAM |     -    34     -     -     -    20     -    28 |  288  13.71
 GUAT |     -     -     -    57     -    44     -    53 |  286    >>>
 HERS |     -     -   108     -     -     -     -    93 |  239   9.91
 HOB2 |     -    65    23     -     -    20     -    27 |  288   0.13
 HRAO |     -    32     -    39     -    28     -    37 |  288  17.50
 IISC |     -    32     -    25     -     -     -    23 |  288  18.88
 JAB1 |     -    52     -     -     -    20     -     - |  288   9.46
 JPLM |     -     -    41     -     -     -     -    36 |  286  16.73
 KERG |     -     -    23    18     -     -     -    17 |  287   2.41
 KGN0 |     -     -    81     -     -     -     -    69 |  285   0.34
 KIRU |     -    91   103     -     -     -     -    85 |  288   8.27
 KOKB |     -    42    63    95     -     -     -   110 |  288   0.08
 KOSG |     -    20     -     -     -     -     -    18 |  286  46.96
 KOUR |     -    55     -     X     -    10     -    47 |  288   2.24
 KSTU |     -     -     -     -     -    33     -    77 |  286  13.50
 KUNM |     -     -     -     -     -    18     -    41 |  286  31.62
 LPGS |     -    72     -     X     -    18     -    49 |  288  18.97
 MAC1 |     -    62     -    53     -     -     -    52 |  288  11.29
 MAS1 |     -    47    27    62     -    18     -    24 |  288   1.70
 MAW1 |     -   112     -    69     -     -     -    84 |  288  20.03
 MCM4 |     -   108     -    85     -     -     -   185 |  288  62.01
 MDO1 |     -   148    68   203     -     -     -    92 |  288   7.96
 MEDI |     -     -    62     -     -     -     -    53 |  286    >>>
 METS |     -    38    57     -     -     -     -    29 |  287   0.14
 MIZU |     -     -    91     -     -    20     -    49 |  288   0.69
 MKEA |     -    44     -    40     -    26     -    39 |  288  20.82
 NKLG |     -     -     -    19     -     -     -    21 |  239  98.89
 NLIB |     -     -   182     -     -    65     -    28 |  288   0.07
 NOT1 |     -     -   176     -     -     -     -   152 |  281    >>>
 NPLD |     -    59   120     -     -     -     -    60 |  287   0.07
 NRC1 |     -    67    79   137     -    50     -    30 |  288   0.04
 NRIL |     -     -     -    80     -    40     -     - |  279   9.51
 NTUS |     -    42     -     -     -     -     -    38 |  288   9.40
 NYA1 |     -    53     -   132     -     -     -   114 |  288   0.09
 NYAL |     -     -   125     -     -     -     -   108 |  263   0.11
 OHI2 |     -    86     -    43     -    24     -     - |  288   8.08
 ONSA |     -     -    62    36     -     -     -    35 |  288   0.08
 PETP |     -    68     -     -     -    26     -     - |  287  11.34
 PIE1 |     -     -    79     -     -     -     -    68 |  287   0.07
 POL2 |     -    40     -     -     -     -     -    35 |  287  10.09
 POTS |     -    59     -    29     -     -     -    34 |  288  11.49
 RBAY |     -   225     -     -     -     -     -   202 |  268  47.36
 SANT |     -    67     -    87     -     -     -    92 |  288   5.99
 SCH2 |     -     -    51     -     -     -     -    44 |  263  22.48
 SFER |     -     -   125     -     -     -     -   107 |  285   0.52
 STJO |     -     -    36     -     -    12     -    26 |  288   0.22
 THTI |     -     -     -    19     -     -     -    22 |  278   4.60
 THU3 |     -    52     -    40     -     -     -     - |  278   6.40
 TIDB |     -    43    82    40     -     -     -     X |  278   0.18
 TIXI |     -    28     -    22     -     -     -     - |  277   8.49
 TRO1 |     -     -     -    88     -     -     -   100 |  277  12.70
 TROM |     -     -     -     -     -    14     -    32 |  286  21.55
 TSKB |     -    48    26     -     -     -     -    34 |  288   1.15
 TWTF |     -     -   139     -     -     -     -   120 |  285   0.58
 UNSA |     -     -     -    22     -     -     -    25 |  279  18.70
 URUM |     -    27     -     -     -     -     -    24 |  288  29.53
 USNO |     -     -    39     -     -     -     -    34 |  288   0.05
 USUD |     -     -    60     -     -     -     -    52 |  287  12.07
 WILL |     -    73   108     -     -     -     -    39 |  288  22.83
 WSRT |     -    48    65     -     -     -     -    56 |  288   0.06
 WTZR |     -    39    52    24     -     -     -    34 |  288   0.12
 WUHN |     -     -    92    38     -     -     -    51 |  287  16.39
 YAKT |     -    57    88     -     -    36     -    29 |  288   0.49
 YELL |     -    86     -   106     -    67     -    54 |  288   0.08
 -----+-------------------------------------------------+--------------
 TOT  |  4301    82    84    68  4103    36     -    72 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

