
 GPS week: 1223   Day: 0   MJD: 52805                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2687      0     0.17    -0.21     3.73     0.00
 cod |   288     0  22416     75    -0.59     0.15     0.08    17.50
 emr |   288     0  18208      6  3095.15    37.27     0.07    20.11
 esa |   288     2  17487    579    -1.17     0.35     0.11    10.71
 gfz |   288     0  20312   1103     0.34    -0.59     0.08    15.17
 igu |    96     0   2687     10     0.19    -0.30     1.63     0.00
 jpl |   288     0  13381    234     1.26     0.99     0.04    36.51
 usn |     0     0      0      0     0.10     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   usn |
 -----+-------------------------------------------------+
    1 |  -974   -10  -116   172    55   617    13     - |
    2 |  1025    61   -76    -4     X   630   217     - |
    3 | -6316    60   -75    99     X  -594   -17     - |
    4 | -2525    73   -10  -149    55   459  -200     - |
    5 |  2285    23   -27    69   -56   610   117     - |
    6 | -4538    44   -69    44   -40   485    22     - |
    7 | -1507    16    29  -125    16  -722    92     - |
    8 |   512  -112  -158   -80   -98  -914   215     - |
    9 |  2172   -58    57   -89    48  1172    33     - |
   10 |  -281   113    10     8  -169   458   129     - |
   11 |  1037   -23   -77   -14   151   304   -45     - |
   13 |  3668   181    80    18   228   225  -242     - |
   14 |  3587    28     8   -95    39    99    -7     - |
   15 |  3729   114   -96     -   -17 -1683    92     - |
   16 |  4565    17  -238    -1    38   181   115     - |
   17 | -7958    67   -60  -145     X  2321    45     - |
   18 |  4894    11  -133    16    57   101    42     - |
   20 |  3719  -139  -302   -23    -8   441   260     - |
   21 |  4719    62   -44    72   -83  -629   134     - |
   23 | -1666    38  -133   -72  -216   513   159     - |
   24 | -2762    98    69  -191   -60   948   -73     - |
   25 | -6418    86   -67    42    74  -617   -50     - |
   26 |  -711   154  -104    58   -77 -1146  -179     - |
   27 | -2057     2  -127    -5    35 -1005    60     - |
   28 |  7729     2    80     0    -6   233   -46     - |
   29 | -3276   100   177   137   -75 -1125  -163     - |
   30 |  -775    12   -48    20    61  -347  -168     - |
   31 | -1878    91    14  -114   -65  -993   100     - |
 -----+-------------------------------------------------+
 ALBH |     -     -   -45     -     -     -    25     - |
 ALGO |     -   -75   -27    47     -     -    37     - |
 AOML |     -  -122     -     -     -     -    58     - |
 AREQ |     -    83    35   -31  -118     -    -1     - |
 ARTU |     -     -     -     -  -203     -    84     - |
 ASC1 |     -   156     -     -  -180     -     -     - |
 AUCK |     -  -223     -     X   258     -     -     - |
 BAHR |     -     -    75  -141     -     -     -     - |
 BILI |     -    35     -     -   -40     -     -     - |
 BJFS |     -    -5    88     -  -111     -     -     - |
 BOGT |     -   -16     -   203     -     -   -51     - |
 BRMU |     -  -109     -     -   126     -     -     - |
 BRUS |     -     -    52     -     -     -   -28     - |
 CAS1 |     -     -     -    61   -43     -     -     - |
 CHAT |     -   -88     -     7    96     -     -     - |
 CHUR |     -   -73    63     -     -     -     -     - |
 CORD |     -     5     -     -    -6     -     -     - |
 CRO1 |     -    -7   213     -  -152     -   -51     - |
 DAV1 |     -   -36     -     -    41     -     -     - |
 FAIR |     -     -   -55  -117  -187     -   142     - |
 FORT |     -    62   -53   -78  -127     -    79     - |
 GODE |     -  -158   169   -60     -     -     -     - |
 GOLD |     -     -     -    57     -     -   -17     - |
 GUAM |     -     -     -    99   254     -  -134     - |
 HERS |     -  -129   112     -     -     -     -     - |
 HOB2 |     -    45    50  -168     -     -     -     - |
 HOFN |     -   -75     -     -  -136     -    90     - |
 HRAO |     -     -     -     -   -96     -    40     - |
 IRKT |     -     -    56  -104     -     -     -     - |
 KERG |     -   273   114   -27   520     -  -404     - |
 KOKB |     -   -97   224     -   165     -  -145     - |
 KOUR |     -    98     -  -176    76     -   -22     - |
 KSTU |     -    11     -     -     -     -    -5     - |
 LPGS |     -    64     -  -152     -     -    14     - |
 MAC1 |     -   -90     -   133    12     -     -     - |
 MADR |     -  -102    88     -     -     -     -     - |
 MAG0 |     -   -75     -     -     -     -    36     - |
 MALI |     -   183     -    -7  -202     -     -     - |
 MAS1 |     -   -33    48   -98    27     -     6     - |
 MAW1 |     -    12     -     -   -13     -     -     - |
 MCM4 |     -     -  -477     -   632     -     -     - |
 MDO1 |     -     -    38     -   -51     -     -     - |
 MIZU |     -     -   -55     -     -     -    30     - |
 MKEA |     -    56     -  -131    28     -     -     - |
 NKLG |     -   -87     -     -   -72     -    72     - |
 NLIB |     -   -64    12     -     -     -    27     - |
 NOT1 |     -    71   -62     -     -     -     -     - |
 NRC1 |     -   -24   140   -41   -60     -   -29     - |
 NRIL |     -   -55     -     -  -140     -    78     - |
 NYA1 |     -   102     -     -  -118     -     -     - |
 NYAL |     -     -   -31    59     -     -     -     - |
 OHI2 |     -   131     -     -  -174     -     9     - |
 ONSA |     -  -116   197    24  -145     -     -     - |
 PIE1 |     -     -   106  -199     -     -     -     - |
 PIMO |     -     -     -  -122    86     -     -     - |
 POTS |     -     -     -     2    -1     -     -     - |
 RIOG |     -     -     -   165  -117     -     -     - |
 SANT |     -     -     -   427  -301     -     -     - |
 SCH2 |     -  -155   134     -     -     -     -     - |
 STJO |     -   -45    78     -     -     -   -21     - |
 THTI |     -     -     -    -2   359     -  -149     - |
 THU3 |     -   -44     -     -    50     -     -     - |
 TIDB |     -   -65    14    28    37     -     X     - |
 TIXI |     -     -     -     -   -56     -    23     - |
 TLSE |     -   -77    67     -     -     -     -     - |
 TRO1 |     -    18     -     -   -21     -     -     - |
 TROM |     -     -     -   635     -     -  -186     - |
 TSKB |     -   -28   -14   -64    96     -     -     - |
 USNO |     -   -92    80     -     -     -     -     - |
 USUD |     -    54   -59    23     -     -     -     - |
 WES2 |     -  -162   141     -     -     -     -     - |
 WILL |     -   -31    27     -     -     -     -     - |
 YELL |     -    47     -   -35   -94     -    27     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  6088   124   145   157   160  4144   106     - |  288   5.75
    2 |  3682   114    45   131     X  1929    90     - |  288   3.16
    3 |  1765    99    41    37     X  1397    43     - |  288   1.80
    4 |   631    94    33   234   103   692    65     - |  288   0.49
    5 |   935    41    56    80    43   503    47     - |  288   0.27
    6 |  7935    77    32   116   172  1915    28     - |  288   8.01
    7 |  1462   100    69    80   131   787    58     - |  288   0.68
    8 |  3673    36    73    96   158  1211    35     - |  288   2.39
    9 |  1226    38    53   109    62  1411    37     - |  288   1.28
   10 |  7105    99    67   111   118   885    51     - |  288   2.65
   11 |   940    83    43   166   125   370    36     - |  288   0.30
   13 |   893    54   102   225   119   323   109     - |  288   0.21
   14 |   687    64    67   142    81   315    44     - |  288   0.28
   15 |  5331    52    36     -    47  3929    45     - |  288   4.19
   16 |   710    88   122    65    77   355    52     - |  288   0.20
   17 |  5472    71    54   196     X  2832    52     - |  288   3.30
   18 |   758    78    65   110    70   424    49     - |  288   0.39
   20 |  1007    68    49    69    61   612    44     - |  288   0.25
   21 |  2339    65    41    98   133   985    64     - |  288   0.50
   23 |  8842    84    70   107   183  2306    36     - |  288   7.73
   24 |  2204    92    58   209   124  1704    39     - |  288   2.10
   25 |  6372    86    63   148   105  1437    46     - |  288   2.24
   26 |   600   198   152   127   134   633    97     - |  288   0.67
   27 |  1092    35    67   135   145   992    37     - |  288   0.88
   28 |  1777    43    44    51    27   307    21     - |  288   0.36
   29 |  1051   208    96   155   172  1442    78     - |  286   0.68
   30 |  1501    56    63   142    71  1057    63     - |  288   0.96
   31 |  2838    78    50    82   165  2021    74     - |  288   1.24
 -----+-------------------------------------------------+--------------
 ALBH |     -     -    60     -     -     -    33     - |  285   0.06
 ALGO |     -    28    19    45     -     -    15     - |  288   0.05
 AOML |     -    44     -     -     -     -    21     - |  287  51.35
 AREQ |     -    48    30    62    37     -    22     - |  288  15.24
 ARTU |     -     -     -     -    46     -    19     - |  288   9.60
 ASC1 |     -    61     -     -    71     -     -     - |  280    >>>
 AUCK |     -    25     -     X    29     -     -     - |  264  14.30
 BAHR |     -     -    55   104     -     -     -     - |  283   0.42
 BILI |     -    57     -     -    66     -     -     - |  286  10.30
 BJFS |     -   192   122     -    72     -     -     - |  288    >>>
 BOGT |     -   138     -   154     -     -    28     - |  288  13.97
 BRMU |     -    33     -     -    38     -     -     - |  288    >>>
 BRUS |     -     -    61     -     -     -    34     - |  288   0.07
 CAS1 |     -     -     -    56    40     -     -     - |  286   7.92
 CHAT |     -    59     -    65    42     -     -     - |  287  14.24
 CHUR |     -   104    90     -     -     -     -     - |  283  16.73
 CORD |     -    64     -     -    74     -     -     - |  275  20.49
 CRO1 |     -    41    18     -    27     -    14     - |  288  17.00
 DAV1 |     -    43     -     -    50     -     -     - |  283  16.20
 FAIR |     -     -    22    68    45     -    27     - |  288   0.11
 FORT |     -    41    29    65    57     -    41     - |  288   0.30
 GODE |     -   104   103    58     -     -     -     - |  288   0.07
 GOLD |     -     -     -    85     -     -    25     - |  284  15.72
 GUAM |     -     -     -   114    45     -    32     - |  288  17.00
 HERS |     -    45    39     -     -     -     -     - |  241  10.07
 HOB2 |     -    52    64    56     -     -     -     - |  288   0.11
 HOFN |     -    55     -     -    34     -    22     - |  288    >>>
 HRAO |     -     -     -     -    77     -    32     - |  288  16.18
 IRKT |     -     -    55   104     -     -     -     - |  281   0.29
 KERG |     -    78    34    53    49     -    31     - |  287   1.10
 KOKB |     -    41   114     -    55     -    52     - |  288   0.08
 KOUR |     -    43     -    60    59     -    21     - |  285   1.29
 KSTU |     -    36     -     -     -     -    17     - |  287  12.70
 LPGS |     -    62     -   113     -     -    33     - |  288  18.26
 MAC1 |     -    27     -    70    50     -     -     - |  288  11.92
 MADR |     -    59    51     -     -     -     -     - |  288  11.44
 MAG0 |     -    21     -     -     -     -    10     - |  286  10.76
 MALI |     -    28     -    60    50     -     -     - |  288   1.48
 MAS1 |     -    53    35    56    39     -    26     - |  288   2.88
 MAW1 |     -    50     -     -    58     -     -     - |  288  39.92
 MCM4 |     -     -    27     -    35     -     -     - |  288   5.84
 MDO1 |     -     -    23     -    30     -     -     - |  287 325.83
 MIZU |     -     -    61     -     -     -    33     - |  285   0.95
 MKEA |     -    27     -    54    30     -     -     - |  288  26.46
 NKLG |     -    50     -     -    67     -    19     - |  287 199.22
 NLIB |     -    79   111     -     -     -    31     - |  288 312.75
 NOT1 |     -    91    79     -     -     -     -     - |  288    >>>
 NRC1 |     -    43    15    55    72     -    18     - |  288   0.04
 NRIL |     -    27     -     -   156     -    66     - |  286  10.07
 NYA1 |     -    50     -     -    58     -     -     - |  288   0.10
 NYAL |     -     -    18    33     -     -     -     - |  285   0.11
 OHI2 |     -    95     -     -    46     -    41     - |  288   7.54
 ONSA |     -    51    55    61    32     -     -     - |  288   0.07
 PIE1 |     -     -    47    88     -     -     -     - |  280   0.09
 PIMO |     -     -     -    77    54     -     -     - |  240  19.84
 POTS |     -     -     -    41    29     -     -     - |  286  12.19
 RIOG |     -     -     -    58    41     -     -     - |  285   9.46
 SANT |     -     -     -   144   101     -     -     - |  144   7.73
 SCH2 |     -    46    40     -     -     -     -     - |  272  10.92
 STJO |     -    33    25     -     -     -     9     - |  288   0.12
 THTI |     -     -     -    70    68     -    31     - |  287    >>>
 THU3 |     -    31     -     -    36     -     -     - |  288   8.43
 TIDB |     -    47    70    74    40     -     X     - |  212   0.14
 TIXI |     -     -     -     -    48     -    20     - |  287   8.90
 TLSE |     -   134   117     -     -     -     -     - |  286 160.39
 TRO1 |     -    32     -     -    37     -     -     - |  283  11.65
 TROM |     -     -     -    70     -     -    21     - |  253  23.32
 TSKB |     -    43    25    73    40     -     -     - |  288   1.88
 USNO |     -    34    29     -     -     -     -     - |  288   0.06
 USUD |     -    92   110    78     -     -     -     - |  288  13.84
 WES2 |     -    82    71     -     -     -     -     - |  286   0.11
 WILL |     -    55    48     -     -     -     -     - |  287  39.47
 YELL |     -    46     -    56    55     -    25     - |  288   0.07
 -----+-------------------------------------------------+--------------
 TOT  |  3729    76    67   106    83  1629    38     - |


 BEST CLOCK FIT: NRC1   288   0.04 (ns) 

