
 GPS week: 1217   Day: 1   MJD: 52764                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2779     14     0.75    -1.28     5.36     0.00
 cod |   288     0  25068     18     0.22    -1.17     0.06    16.48
 emr |   288     0  19497     87  1660.98    35.97     0.07    13.36
 esa |   288     0  18893   2209    -0.14    -5.00     0.09     8.51
 gfz |   288     0  20173    537    -0.35     0.21     0.04    28.81
 igu |    96     0   2587      0     1.37    -1.95     4.80     0.00
 jpl |   288     0  13580    451    -0.60     0.00     0.06    14.27
 ngs |    96     0   2779      7     1.07    -1.63     5.21     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30403    298   569.36     2.32     0.05    18.57

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -5520   -81   106    19   -30 -6604  -167 -5821     -    96 |
    2 | -5586    16    18   -13     2  1051   -43 -5723     -    -5 |
    3 | -3662   -60    85   -68    40  7045  -163 -3234     -    16 |
    4 | -1386    -5   -55    26    41  3180   -94 -1247     -     6 |
    5 |  2840    28   -51    30    19  6483   175  3008     -   -96 |
    6 |  1789   -15   -42     X    56 -4259   -44  1887     -   -30 |
    7 | -3184    76   -25    14   -47  3260   166 -3063     -   -52 |
    8 |  2270   -34   -74   -54    57 15988     7   560     -    18 |
    9 | -4290    83  -220    -2   135 -1416   110 -3739     -  -165 |
   10 | -7850   -13   -38   138   -33 -3737   278 -7118     -   -73 |
   11 |  4433    -3   108    73   -15     -  -126  4216     -   -42 |
   13 |  4636    69    31   -84    12  2031  -111  4490     -   -19 |
   14 |  4040   117   -45   106    16  3604    27  3933     -  -154 |
   15 | -2489   -33    11     -    85 -4904     X -3411     -  -112 |
   16 |  4039    12    52   138   -79  1983    32  3917     -    -1 |
   17 | -2718     -  -229     X   180 -3855   318 -2318     -  -243 |
   18 |  3281    40   -77    81   100  2272   -57  3083     -  -152 |
   20 |  4537   -92    48   104    27  2411   225  4333     -  -140 |
   21 | 10862    57    -4   358   -48  6191    52 10825     -  -159 |
   22 | 17068   117    27   -17  -152-13097   197 16835     -    53 |
   23 | -6244    49  -121   201    11-14474   224 -6379     -  -163 |
   24 |  -588    79  -102   142    16  3220    62  -621     -  -111 |
   25 |    98   -41   -13    92    94  4531  -190   720     -   -60 |
   26 | -2106    79  -191    39    87  3566    32 -1956     -   -96 |
   27 | -3613   -88    -2   -88   104 -5998   -17 -3498     -   -36 |
   28 | -3236   155    -2  -154   -44 -8276   121 -2917     -   -46 |
   29 | -1064    88  -183    30   111     -    18 -1098     -  -140 |
   30 |  -577    72  -143   174   103  3378  -157  -903     -  -139 |
   31 | -3228    -8   -10  -227    61 -3788   -59 -3476     -    26 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -126   -23     -     -     -   188     -     -   -17 |
 ALGO |     -  -111    12   234     -     -     -     -     -   -17 |
 AMC2 |     -  -187   125     -     -     -     -     -     -    76 |
 AOML |     -     -     -     -     -     -    44     -     -   -34 |
 ARTU |     -   -16     -     -   -23     -    65     -     -     - |
 ASC1 |     -   134     -  -167   -39     -     X     -     -    19 |
 AUCK |     -     7     -     X     X     -     -     -     -    -6 |
 BAHR |     -    -1   -24    19    19     -    76     -     -   -78 |
 BILI |     -   -50     -     -    29     -     -     -     -     - |
 BJFS |     -     -  -172     -     -     -     -     -     -   123 |
 BOR1 |     -     -    55     -     -     -     -     -     -   -39 |
 CAS1 |     -    52     -   175   -20     -    10     -     -  -112 |
 CEDU |     -     6     -  -191     -     -     -     -     -    83 |
 CHAT |     -    -3     -   304  -102     -     -     -     -    21 |
 CHUR |     -    69   204     -     -     -     -     -     -  -208 |
 CRO1 |     -   173    16     -   -13     -  -121     -     -   -51 |
 DRAO |     -   -33    29     -     -     -     -     -     -     8 |
 EISL |     -    47     -     -     -     -    27     -     -   -62 |
 FAIR |     -     -    49   -46   -80     -    91     -     -    40 |
 FLIN |     -   -14     -     -     -     -    16     -     -     - |
 GODZ |     -   -14    92  -131     -     -     -     -     -     7 |
 GOLD |     -    52     -   -24     -     -  -181     -     -   104 |
 GRAZ |     -   -40    76  -164     -     -     -     -     -    56 |
 GUAM |     -   151     -  -174    -8     -  -240     -     -   143 |
 GUAT |     -     -     -     -   -97     -    72     -     -   100 |
 HERS |     -     -  -374     -     -     -     -     -     -   269 |
 HOB2 |     -   -96   -27   181     -     -     -     -     -    21 |
 HOFN |     -     -     -     -    35     -   -71     -     -     - |
 HRAO |     -     -     -     -   -14     -   -10     -     -    30 |
 IISC |     -    -9     -   195   -82     -     -     -     -    45 |
 JPLM |     -     -    87     -     -     -     -     -     -   -63 |
 KERG |     -     -     3  -313   103     -     -     -     -   -18 |
 KGN0 |     -     -  -108     -     -     -     -     -     -    77 |
 KIRU |     -    48  -107     -     -     -     -     -     -    34 |
 KIT3 |     -     -     -     -   -44     -     -     -     -    67 |
 KOKB |     -   -76    96     -   -74     -     -     -     -   115 |
 KOSG |     -   -64     -     -     -     -     -     -     -    57 |
 KOUR |     -    59     -  -452   116     -   -86     -     -    40 |
 KSTU |     -     -     -     -    29     -  -126     -     -    52 |
 KUNM |     -     -     -     -     -     -  -145     -     -   111 |
 LPGS |     -   -67     -     X     X     -     -     -     -    60 |
 MAC1 |     -   -19     -   117   -66     -   -46     -     -   101 |
 MAG0 |     -   -45     -     -     -     -    52     -     -     - |
 MAS1 |     -    40    73  -339    16     -    90     -     -   -27 |
 MATE |     -     -     -  -324     -     -     -     -     -   148 |
 MCM4 |     -   222     -     -   -80     -     -     -     -   -70 |
 MDO1 |     -     5    80     X    19     -     7     -     -   -97 |
 MEDI |     -   -33    40     -     -     -     -     -     -     1 |
 METS |     -  -152   -16     -     -     -     -     -     -   147 |
 MIZU |     -     -   -11     -     -     -  -227     -     -   184 |
 MKEA |     -     -     -    36   -85     -  -161     -     -   241 |
 NKLG |     -     -     -     -   -28     -     -     -     -    44 |
 NLIB |     -    45     -     X     -     -   -21     -     -   -19 |
 NPLD |     -   -79   144     -     -     -     -     -     -   -34 |
 NRC2 |     -     -   197  -342   -27     -     -     -     -    57 |
 NRIL |     -    -1     -     -     2     -    -2     -     -     - |
 NSSP |     -   -54     -     -     -     -     7     -     -    43 |
 NTUS |     -  -196     -     -     -     -     -     -     -   174 |
 NYA1 |     -   100     -     -   -50     -     -     -     -   -11 |
 NYAL |     -     -    76   -25     -     -     -     -     -   -43 |
 OHI2 |     -    62     -     -   -69     -    67     -     -     - |
 OS0G |     -   -50     2   134    25     -     -     -     -   -57 |
 PERT |     -   -15   162   161   -58     -   -48     -     -   -49 |
 PIE1 |     -     -   218     X     -     -     -     -     -  -157 |
 PIMO |     -   191     -     -  -109     -     -     -     -     X |
 POL2 |     -    -7     -     -     -     -   -44     -     -    40 |
 POTS |     -     7     -   -64     1     -     -     -     -    22 |
 REYK |     -    42     -     -     -     -     -     -     -   -38 |
 RIOG |     -     5     -     X   -47     -     -     -     -    69 |
 SANT |     -   -49     -   164   -53     -    48     -     -    28 |
 SCH2 |     -  -125   101     -     -     -     -     -     -    40 |
 SFER |     -     -  -169     -     -     -     -     -     -   121 |
 STJO |     -     -    71     -     -     -     -     -     -   -51 |
 SUTH |     -   -15     -  -238     -     -     -     -     -   123 |
 THTI |     -     -     -   228    70     -     -     -     -  -213 |
 THU3 |     -   112     -     -   -64     -     -     -     -     - |
 TRO1 |     -  -100     -     -    -7     -     -     -     -    99 |
 TROM |     -     -     -  -168     -     -   371     -     -  -209 |
 TSKB |     -   -72    43   -16     8     -     -     -     -    28 |
 TWTF |     -     -   -72     -     -     -     -     -     -    52 |
 USNO |     -    -7   112     -     -     -     -     -     -   -75 |
 USUD |     -   -43   -58    20     -     -     -     -     -    69 |
 WES2 |     -     -   141     -   -65     -     -     -     -     - |
 WTZR |     -  -105   148   -32     -     -     -     -     -     2 |
 WUHN |     -     -     -   149     -     -   -99     -     -     8 |
 YAKT |     -   -57  -104     -     -     -     -     -     -   125 |
 YAR2 |     -  -132     -     -     -     -     -     -     -   117 |
 YELL |     -    34     -  -100    -2     -     -     -     -    20 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 | 12103    48    19    80    30  8215    38 11197     -    52 |  288   4.35
    2 |  4084    55    47    87    37  4597   104  4089     -    39 |  288   3.03
    3 |  5781   120    84    76    40  5865    65  5606     -    44 |  288   1.62
    4 |  2044    71    59   111    66  2082    37  2130     -    55 |  288   0.64
    5 |  3068    70    35    67    29  2929    39  3043     -    27 |  288   2.80
    6 | 11799   136    65     X    37  6916    46 11709     -    75 |  277  11.79
    7 |  2498   141    49   108    86  2081    70  2584     -    76 |  288   0.66
    8 |  8272    43    27   110    28  7028    24  8058     -    24 |  288   5.75
    9 |  5272    34    43   114    34  2475    52  4944     -    42 |  288   1.91
   10 |  3723    67    38   125    33  2130   126  3689     -    36 |  288   1.43
   11 |   951    85    54   117    43     -    76   807     -   105 |  288   0.27
   13 |  1092    42    25    46    32  1376    27  1156     -    46 |  288   0.37
   14 |   765    46    43    83    38  2083   157   787     -    32 |  288   0.15
   15 |  7254    54    57     -    30  5054     X  7245     -    33 |  288   2.90
   16 |  1013    44    45    93    38  1259   159  1051     -    41 |  288   0.28
   17 |  3262     -   209     X    74  3709   167  3147     -   154 |  285   1.36
   18 |   712    68    38    48    37  1418    98   658     -    26 |  288   0.39
   20 |   846    71    77   132    52  1880    57   760     -   138 |  288   0.25
   21 |  6975    62    66   136    50  5288   117  6920     -    76 |  288   1.10
   22 |  9306    47   116   145    29 11594    95  9121     -    63 |  288   6.92
   23 |  8973    62    48   126    26  8222    59  8909     -    40 |  288   7.09
   24 |  3184    59    62    54    40  3608    29  3121     -    64 |  288   2.15
   25 |  8300    50    39    62    14  6176    36  7640     -    50 |  288   2.58
   26 |  2170    66    60    47    24  1807    55  2080     -    86 |  288   0.62
   27 |  1699    37    37    71    34  3681    30  1605     -    47 |  288   1.14
   28 |  3502    44    46    90    33  4676    63  3494     -    31 |  288   0.58
   29 |  1133    60    35    63    24     -    51  1153     -    62 |  288   0.90
   30 |  1531    59    33    35    29  1540    42  1529     -    40 |  288   0.95
   31 |  1440   132    92   122    80  2485    68  1526     -    68 |  288   1.25
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    28    83     -     -     -    31     -     -    38 |  288   0.06
 ALGO |     -    37    16    34     -     -     -     -     -    36 |  288   0.05
 AMC2 |     -    31    51     -     -     -     -     -     -    27 |  288   0.04
 AOML |     -     -     -     -     -     -    20     -     -    15 |  286  27.64
 ARTU |     -    34     -     -    19     -    52     -     -     - |  284  12.16
 ASC1 |     -    33     -    71    17     -     X     -     -    45 |  285    >>>
 AUCK |     -    37     -     X     X     -     -     -     -    33 |  264  14.40
 BAHR |     -    48    20   106    22     -    46     -     -    38 |  288   0.52
 BILI |     -    22     -     -    13     -     -     -     -     - |  287   9.08
 BJFS |     -     -    75     -     -     -     -     -     -    54 |  286    >>>
 BOR1 |     -     -    92     -     -     -     -     -     -    66 |  285   0.45
 CAS1 |     -   113     -   189    45     -    74     -     -   112 |  288   8.40
 CEDU |     -    33     -    36     -     -     -     -     -    21 |  288  14.62
 CHAT |     -    60     -   103    20     -     -     -     -    29 |  287  14.80
 CHUR |     -    76    70     -     -     -     -     -     -    51 |  288   0.77
 CRO1 |     -    38    34     -    23     -    35     -     -    19 |  288  29.11
 DRAO |     -    27    28     -     -     -     -     -     -    22 |  288   0.07
 EISL |     -    46     -     -     -     -    25     -     -    45 |  288  38.81
 FAIR |     -     -    30    38    14     -    25     -     -    31 |  288   0.08
 FLIN |     -    34     -     -     -     -    39     -     -     - |  288   8.59
 GODZ |     -    30    86    52     -     -     -     -     -    38 |  288   0.16
 GOLD |     -    44     -    84     -     -    60     -     -    15 |  288  19.37
 GRAZ |     -    45    70   125     -     -     -     -     -    40 |  287  94.20
 GUAM |     -    68     -   152    17     -    43     -     -    22 |  288  14.63
 GUAT |     -     -     -     -    28     -    28     -     -    31 |  288    >>>
 HERS |     -     -   138     -     -     -     -     -     -    99 |  239   6.00
 HOB2 |     -    65   103    86     -     -     -     -     -    43 |  288   0.10
 HOFN |     -     -     -     -    11     -    22     -     -     - |  288    >>>
 HRAO |     -     -     -     -    24     -    28     -     -    38 |  288  17.87
 IISC |     -    34     -    60    22     -     -     -     -    66 |  288  26.35
 JPLM |     -     -   108     -     -     -     -     -     -    77 |  280  32.77
 KERG |     -     -    25    73    24     -     -     -     -    67 |  287   1.92
 KGN0 |     -     -    94     -     -     -     -     -     -    68 |  285   0.49
 KIRU |     -    63    65     -     -     -     -     -     -    46 |  287  11.66
 KIT3 |     -     -     -     -    43     -     -     -     -    66 |  250 659.50
 KOKB |     -    63   114     -    34     -     -     -     -    35 |  288   0.07
 KOSG |     -    42     -     -     -     -     -     -     -    37 |  288  49.93
 KOUR |     -    73     -    57    32     -    63     -     -    27 |  288   2.04
 KSTU |     -     -     -     -    89     -    53     -     -   158 |  280  11.86
 KUNM |     -     -     -     -     -     -    19     -     -    15 |  286  50.64
 LPGS |     -    60     -     X     X     -     -     -     -    53 |  262  16.31
 MAC1 |     -    40     -    97    49     -    43     -     -    36 |  288  12.57
 MAG0 |     -    24     -     -     -     -    28     -     -     - |  287   9.92
 MAS1 |     -    25    30    41    20     -    51     -     -    15 |  288   1.69
 MATE |     -     -     -    43     -     -     -     -     -    20 |  209    >>>
 MCM4 |     -    88     -     -    46     -     -     -     -   125 |  287    >>>
 MDO1 |     -    27    35     X    11     -    43     -     -    22 |  288   4.57
 MEDI |     -    45    66     -     -     -     -     -     -    23 |  288   0.22
 METS |     -    50    66     -     -     -     -     -     -    37 |  287   0.79
 MIZU |     -     -    86     -     -     -    38     -     -    42 |  288   0.69
 MKEA |     -     -     -    64    21     -    43     -     -    23 |  288  32.93
 NKLG |     -     -     -     -    37     -     -     -     -    58 |  287 449.26
 NLIB |     -    77     -     X     -     -    94     -     -   110 |  264 246.00
 NPLD |     -    61   107     -     -     -     -     -     -    45 |  287   0.11
 NRC2 |     -     -    21    30    10     -     -     -     -    16 |  288   0.02
 NRIL |     -    52     -     -    49     -    80     -     -     - |  284  10.91
 NSSP |     -    41     -     -     -     -    48     -     -    21 |  288  15.38
 NTUS |     -    38     -     -     -     -     -     -     -    34 |  287  11.41
 NYA1 |     -    33     -     -    28     -     -     -     -    38 |  288   0.08
 NYAL |     -     -    39    53     -     -     -     -     -    17 |  288   0.09
 OHI2 |     -    85     -     -    37     -    51     -     -     - |  288   6.91
 OS0G |     -    53   119   103    39     -     -     -     -    31 |  288   0.26
 PERT |     -    60    95    74    29     -    32     -     -    39 |  288  10.45
 PIE1 |     -     -    42     X     -     -     -     -     -    31 |   86   0.03
 PIMO |     -    60     -     -    34     -     -     -     -     X |  219  20.41
 POL2 |     -    42     -     -     -     -    51     -     -    28 |  288  15.37
 POTS |     -    33     -    78    28     -     -     -     -    46 |  276  11.36
 REYK |     -    24     -     -     -     -     -     -     -    21 |  286  11.26
 RIOG |     -    50     -     X    26     -     -     -     -    60 |  275  14.92
 SANT |     -    64     -   140    38     -    44     -     -    27 |  288   6.46
 SCH2 |     -    23    40     -     -     -     -     -     -    21 |  288  26.61
 SFER |     -     -    76     -     -     -     -     -     -    55 |  283   0.64
 STJO |     -     -    25     -     -     -     -     -     -    18 |  286  21.49
 SUTH |     -    55     -   101     -     -     -     -     -    34 |  288  16.83
 THTI |     -     -     -    74    26     -     -     -     -    31 |  287   0.95
 THU3 |     -    46     -     -    26     -     -     -     -     - |  288  10.17
 TRO1 |     -    49     -     -    25     -     -     -     -    75 |  288  13.10
 TROM |     -     -     -    61     -     -    20     -     -    25 |  288  20.99
 TSKB |     -    61    38    86    21     -     -     -     -    38 |  288   1.17
 TWTF |     -     -    75     -     -     -     -     -     -    54 |  286   0.49
 USNO |     -    32    23     -     -     -     -     -     -    40 |  288   0.05
 USUD |     -    77   123   108     -     -     -     -     -    44 |  288  17.96
 WES2 |     -     -    60     -    28     -     -     -     -     - |  281   0.08
 WTZR |     -    46    86    88     -     -     -     -     -    40 |  288   0.34
 WUHN |     -     -     -   172     -     -   179     -     -    68 |  287  28.39
 YAKT |     -    32    70     -     -     -     -     -     -    31 |  288   1.66
 YAR2 |     -    35     -     -     -     -     -     -     -    31 |  286   5.87
 YELL |     -    55     -    57    17     -     -     -     -    18 |  288   0.04
 -----+-------------------------------------------------------------+--------------
 TOT  |  5358    59    70    93    37  4799    64  5213     -    54 |


 BEST CLOCK FIT: NRC2   288   0.02 (ns) 

