
 GPS week: 1216   Day: 5   MJD: 52761                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2676      0     0.03    -0.18     4.90     0.00
 cod |   288     0  24048    544     0.29    -0.24     0.06    21.60
 emr |   288     0  20039    319  1561.13    33.94     0.07    19.31
 gfz |   288     0  19145    256     0.13    -0.79     0.04    33.49
 igu |    96     0   2292     17     0.31    -1.90     5.81     0.00
 ngs |    96     0   2676      0     0.03    -0.18     4.93     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30237    243   827.07    12.83     0.05    25.61

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 |  -413  -185    14    12  1830   -81     -   130 |
    2 |  2391     X   -95    53  4488  1975     -     2 |
    3 | -2608   -89    19    73 -7026 -3317     -   -32 |
    4 | -7116     7  -160    55 -6200 -6574     -    43 |
    5 |  9493   186   -94   -58 18409  7164     -   -10 |
    6 |   229    36  -106    54 12292   136     -   -21 |
    7 |   367   186   -67   -98   319   386     -    19 |
    8 |  6844   -14   -34    69 28199  5444     -   -53 |
    9 | -4203   152  -164    76  1098 -3985     -  -104 |
   10 | -1778    92   -19    20  -285 -1523     -   -90 |
   13 |  3020   -75  -126   125  -639  3182     -    -5 |
   14 |  7750   107    22   -59    83  7761     -   -29 |
   15 | -9153    22   -50    85-12716 -8900     -   -92 |
   16 |  6608   -35    11    26 -1755  6463     -   -13 |
   17 | -6129     -   -68    98     - -6237     -   -77 |
   18 |  3810    44   -52    95     -  3980     -  -117 |
   20 |  2582    -3    47   -20  -261  3084     -    -7 |
   21 |   388    31   -19    64 -4120  1068     -   -95 |
   22 | -2267   -16    35   -63 -3384 -1949     -    74 |
   23 | -2457   187  -103     2     - -1998     -   -83 |
   24 | -2264   119  -114    49 -3222 -2032     -   -79 |
   25 |  -147    -1    -3    12  -586    60     -   -13 |
   26 | -1169   234  -173    54 -3266 -1063     -  -137 |
   27 | -4292   -96   -65   210-16827 -3961     -  -144 |
   28 |  7370   120   -20   -30  3071  7635     -   -48 |
   29 | -2691   253  -168    -3 -2302 -2479     -   -83 |
   30 | -1719    68   -55    36     - -1900     -   -63 |
   31 | -2597    -8     9    -4 -1573 -2508     -     5 |
 -----+-------------------------------------------------+
 ALBH |     -  -205    15     -     -     -     -   164 |
 ALGO |     -     -   -19     -     -     -     -    14 |
 AMC2 |     -  -152   116     -     -     -     -    45 |
 AOML |     -  -124     -     -     -     -     -   104 |
 ARTU |     -    62     -   -40     -     -     -     - |
 ASC1 |     -   312     -  -126     -     -     -   -98 |
 AUCK |     -    60     -    -2     -     -     -   -48 |
 BAHR |     -   -11     5    -1     -     -     -     6 |
 BILI |     -    16     -   -10     -     -     -     - |
 BJFS |     -     -   -27     -     -     -     -    20 |
 BOR1 |     -     -   165     -     -     -     -  -124 |
 BRMU |     -     -     -    20     -     -     -   -26 |
 BRUS |     -     -    51     -     -     -     -   -39 |
 CAS1 |     -    55     -   -46     -     -     -    15 |
 CEDU |     -   -60     -     -     -     -     -    50 |
 CHAT |     -  -103     -     -     -     -     -    87 |
 CHUR |     -   114     X     -     -     -     -   -96 |
 COCO |     -   -96     -    72     -     -     -   -14 |
 CRO1 |     -    32     8     -     -     -     -   -33 |
 DRAO |     -   -71  -105     -     -     -     -   139 |
 FAIR |     -     -    -6   -67     -     -     -    92 |
 FORT |     -     X   -80    92     -     -     -   -59 |
 GODZ |     -    -3   -47     -     -     -     -    37 |
 GOLD |     -    -1     -     -     -     -     -     1 |
 GRAZ |     -     -   -11     -     -     -     -     8 |
 GUAM |     -     -     -  -108     -     -     -   141 |
 GUAT |     -     -     -    -6     -     -     -     8 |
 HOB2 |     -   -21     4     -     -     -     -    15 |
 HRAO |     -   -27     -   -98     -     -     -   151 |
 IISC |     -    25     -  -118     -     -     -   133 |
 JPLM |     -     -   213     -     -     -     -  -160 |
 KERG |     -    49   -60    32     -     -     -   -37 |
 KIRU |     -     0   137     -     -     -     -  -101 |
 KIT3 |     -     -     -   -22     -     -     -    29 |
 KOKB |     -     -   257   -70     -     -     -   -86 |
 KOSG |     -   -43     -     -     -     -     -    36 |
 KOUR |     -    16     -    10     -     -     -   -27 |
 KSTU |     -     -     -   -30     -     -     -    39 |
 KUNM |     -   -52     -     -     -     -     -    44 |
 LPGS |     -    50     -     X     -     -     -   -43 |
 MAC1 |     -    32     -   -85     -     -     -    85 |
 MAS1 |     -     -    36   -22     -     -     -     1 |
 MAW1 |     -    18     -    45     -     -     -   -74 |
 MCM4 |     -  -166     -   133     -     -     -   -74 |
 MDO1 |     -    71    -4     2     -     -     -   -59 |
 MEDI |     -     -  -111     -     -     -     -    83 |
 METS |     -  -249   170     -     -     -     -    86 |
 MIZU |     -     -    38     -     -     -     -   -29 |
 MKEA |     -   -27     -  -139     -     -     -   205 |
 NKLG |     -    34     -    56     -     -     -  -102 |
 NLIB |     -     -    43     -     -     -     -   -32 |
 NOT1 |     -     -   -64     -     -     -     -    49 |
 NPLD |     -   -66   141     -     -     -     -   -49 |
 NRC2 |     -   -45    49     3     -     -     -    -2 |
 NRIL |     -    18     -   -12     -     -     -     - |
 NSSP |     -   -73     -     -     -     -     -    62 |
 NTUS |     -  -231     -     -     -     -     -   195 |
 NYA1 |     -   152     -   -77     -     -     -   -27 |
 NYAL |     -     -    98     -     -     -     -   -74 |
 OHI2 |     -   127     -   -82     -     -     -     - |
 OS0G |     -   -34   151   -71     -     -     -    10 |
 PERT |     -   -34    83   -38     -     -     -    18 |
 PIE1 |     -     -   142     -     -     -     -  -107 |
 POTS |     -   -31     -    23     -     -     -    -3 |
 RBAY |     -  -509     -     -     -     -     -   429 |
 REYK |     -     3     -     -     -     -     -    -2 |
 RIOG |     -    79     -  -102     -     -     -    66 |
 SCH2 |     -     -    19     -     -     -     -   -15 |
 SFER |     -     -   -30     -     -     -     -    22 |
 STJO |     -     -    -7     -     -     -     -     5 |
 THU3 |     -   -36     -    23     -     -     -     - |
 TIDB |     -   -22    96   -42     -     -     -     X |
 TLSE |     -     -   -20     -     -     -     -    15 |
 TRO1 |     -  -112     -    39     -     -     -    43 |
 TSKB |     -     -     1   -28     -     -     -    36 |
 TWTF |     -     -   -22     -     -     -     -    16 |
 URUM |     -   -39     -     -     -     -     -    33 |
 USNO |     -    34    28     -     -     -     -   -50 |
 USUD |     -   -64    23     -     -     -     -    38 |
 VILL |     -   -29     -     -     -     -     -    24 |
 WSRT |     -   -94   181     -     -     -     -   -56 |
 WTZR |     -  -114   117     -     -     -     -    10 |
 WUHN |     -   -17     -     -     -     -     -    14 |
 YAKT |     -   -39     2     -     -     -     -    31 |
 YAR2 |     -  -100     -     -     -     -     -    84 |
 YELL |     -     -     -   -62     -     -     -    81 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  8382    39    32    33  5167  8676     -    33 |  288   4.15
    2 |  3129     X    95    43  2754  2814     -    42 |  288   2.91
    3 |  8887   121    85    35  5786  8776     -    50 |  280   1.83
    4 |  2778    75    57    28  3169  2434     -    60 |  288   0.46
    5 |  8747    78    51    32 13658  7198     -    51 |  288   3.82
    6 | 10910   123    40    56  8933 12615     -    52 |  277  11.02
    7 |  2110   122    39    80  1522  2243     -    66 |  281   0.80
    8 |  6824    62    26    26 16461  7105     -    44 |  288   5.35
    9 |  2897    90    37    38  2672  2678     -    25 |  288   2.20
   10 |  2218    76    28    57  2669  2249     -   113 |  288   1.84
   13 |  2804    76    27    30  1767  2838     -    56 |  288   0.44
   14 |  1879    54    58    40  1041  2049     -    27 |  288   0.37
   15 |  5292    67   108    26  7899  5203     -   103 |  288   2.79
   16 |  1328    51    48    38  1157  1544     -    69 |  288   0.37
   17 |  6186     -    33    21     -  5286     -    19 |  287   1.40
   18 |  1515    69    38    57     -  1612     -    77 |  288   0.41
   20 |  2276   111    53    31  1851  2179     -    44 |  288   0.20
   21 |  2664    69   102   120  2113  2227     -   113 |  288   0.65
   22 |  5312    80    80    49  4350  5535     -   134 |  288   4.80
   23 |  7876    98    64    44     -  8382     -    98 |  288   7.57
   24 |  3098   103    54    22  4008  2924     -    67 |  288   1.97
   25 |  1550    61    49    23  1332  1683     -    88 |  288   1.14
   26 |   822    45    31    36  1853  1007     -    19 |  288   0.77
   27 |  1653    58    21    25 10029  1466     -    33 |  288   1.24
   28 |  2330    69    39    24  1610  2511     -    46 |  288   0.77
   29 |  1348    59    65    28  2008  1354     -    38 |  288   0.76
   30 |  4076    86    44    35     -  3705     -    38 |  288   1.46
   31 |  5965   103    63    32  2749  5472     -    38 |  278   2.00
 -----+-------------------------------------------------+--------------
 ALBH |     -    39    67     -     -     -     -    41 |  284   0.05
 ALGO |     -     -    14     -     -     -     -    10 |  288   0.06
 AMC2 |     -    39    70     -     -     -     -    35 |  288   0.04
 AOML |     -    29     -     -     -     -     -    24 |  274  25.01
 ARTU |     -    24     -    16     -     -     -     - |  288  13.46
 ASC1 |     -    63     -    36     -     -     -    30 |  285    >>>
 AUCK |     -    40     -    47     -     -     -    68 |  264  15.73
 BAHR |     -    30    23    26     -     -     -    26 |  288   0.21
 BILI |     -   136     -    88     -     -     -     - |  287  11.17
 BJFS |     -     -    57     -     -     -     -    43 |  286    >>>
 BOR1 |     -     -    65     -     -     -     -    49 |  267   0.56
 BRMU |     -     -     -    25     -     -     -    32 |  286    >>>
 BRUS |     -     -    75     -     -     -     -    57 |  278   0.08
 CAS1 |     -    84     -    38     -     -     -   100 |  288   9.35
 CEDU |     -    32     -     -     -     -     -    27 |  276  16.08
 CHAT |     -    34     -     -     -     -     -    29 |  285  17.10
 CHUR |     -    52     X     -     -     -     -    44 |  266   0.76
 COCO |     -    45     -    24     -     -     -    33 |  287  10.32
 CRO1 |     -    51    28     -     -     -     -    35 |  288  27.08
 DRAO |     -    39    36     -     -     -     -    18 |  288   0.06
 FAIR |     -     -    32    17     -     -     -    31 |  288   0.09
 FORT |     -     X    60    42     -     -     -    29 |  288   0.23
 GODZ |     -    59   151     -     -     -     -    71 |  288   0.09
 GOLD |     -    29     -     -     -     -     -    24 |  264  17.28
 GRAZ |     -     -    70     -     -     -     -    53 |  279  66.73
 GUAM |     -     -     -    43     -     -     -    56 |  178  10.80
 GUAT |     -     -     -    29     -     -     -    38 |  286    >>>
 HOB2 |     -    61    91     -     -     -     -    44 |  281   0.08
 HRAO |     -    31     -    19     -     -     -    35 |  288  18.59
 IISC |     -    28     -    30     -     -     -    29 |  288  34.87
 JPLM |     -     -   154     -     -     -     -   116 |  197    >>>
 KERG |     -    45    46    24     -     -     -    32 |  287   1.79
 KIRU |     -    50    56     -     -     -     -    45 |  288  15.43
 KIT3 |     -     -     -    16     -     -     -    20 |  274    >>>
 KOKB |     -     -   124    44     -     -     -    58 |  288   0.11
 KOSG |     -    24     -     -     -     -     -    20 |  286 133.64
 KOUR |     -    46     -    32     -     -     -    22 |  288   1.93
 KSTU |     -     -     -    50     -     -     -    66 |  268  10.79
 KUNM |     -    25     -     -     -     -     -    21 |  280  37.58
 LPGS |     -    87     -     X     -     -     -    74 |  256  17.83
 MAC1 |     -    38     -    19     -     -     -    42 |  288  13.23
 MAS1 |     -     -    64    84     -     -     -    62 |  288   1.98
 MAW1 |     -    26     -    37     -     -     -    52 |  244  25.86
 MCM4 |     -   109     -    27     -     -     -    90 |  252   7.85
 MDO1 |     -    33    24    17     -     -     -    21 |  288   9.15
 MEDI |     -     -   117     -     -     -     -    88 |  273   0.14
 METS |     -    40    96     -     -     -     -    61 |  287   1.82
 MIZU |     -     -    85     -     -     -     -    64 |  249   0.41
 MKEA |     -    43     -    31     -     -     -    20 |  288  36.03
 NKLG |     -    84     -    98     -     -     -    67 |  287 250.51
 NLIB |     -     -    63     -     -     -     -    48 |  174 342.28
 NOT1 |     -     -    75     -     -     -     -    57 |  281    >>>
 NPLD |     -    66   103     -     -     -     -    34 |  287   0.06
 NRC2 |     -    39    26    30     -     -     -    20 |  288   0.03
 NRIL |     -    28     -    18     -     -     -     - |  286   9.68
 NSSP |     -    16     -     -     -     -     -    13 |  284  19.09
 NTUS |     -    21     -     -     -     -     -    18 |  288  10.25
 NYA1 |     -    65     -    15     -     -     -    42 |  288   0.06
 NYAL |     -     -    24     -     -     -     -    18 |  288   0.07
 OHI2 |     -    69     -    45     -     -     -     - |  288   7.17
 OS0G |     -    56    88    36     -     -     -    40 |  288   0.11
 PERT |     -    35   104    36     -     -     -    45 |  288  11.84
 PIE1 |     -     -    74     -     -     -     -    56 |  267   0.05
 POTS |     -    34     -    19     -     -     -    18 |  288  12.87
 RBAY |     -    36     -     -     -     -     -    31 |   82  33.59
 REYK |     -    52     -     -     -     -     -    44 |  275  10.18
 RIOG |     -   106     -    44     -     -     -    54 |  287  16.81
 SCH2 |     -     -    48     -     -     -     -    36 |  259   5.07
 SFER |     -     -    84     -     -     -     -    63 |  277   0.63
 STJO |     -     -    30     -     -     -     -    23 |  286  15.10
 THU3 |     -    35     -    22     -     -     -     - |  287   8.57
 TIDB |     -    35    79    34     -     -     -     X |  221   0.08
 TLSE |     -     -    49     -     -     -     -    37 |  282   0.40
 TRO1 |     -    54     -    15     -     -     -    47 |  288  11.97
 TSKB |     -     -    36    36     -     -     -    37 |  288   0.98
 TWTF |     -     -    86     -     -     -     -    65 |  286   0.29
 URUM |     -    17     -     -     -     -     -    14 |  288  17.36
 USNO |     -    30    27     -     -     -     -    19 |  288   0.03
 USUD |     -    45   107     -     -     -     -    50 |  287  16.96
 VILL |     -    15     -     -     -     -     -    13 |  288   3.38
 WSRT |     -    38    75     -     -     -     -    46 |  288   0.05
 WTZR |     -    30    93     -     -     -     -    50 |  287   0.24
 WUHN |     -    46     -     -     -     -     -    39 |  287  19.04
 YAKT |     -    19    34     -     -     -     -    25 |  288   1.01
 YAR2 |     -    29     -     -     -     -     -    25 |  286   8.02
 YELL |     -     -     -    11     -     -     -    14 |  288   0.02
 -----+-------------------------------------------------+--------------
 TOT  |  4904    62    68    41  5814  4929     -    52 |


 BEST CLOCK FIT: YELL   288   0.02 (ns) 

