
 GPS week: 1216   Day: 4   MJD: 52760                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2670      0     0.15    -0.07     5.47     0.00
 cod |    96     0   2574      0     0.14    -0.05     5.53     0.00
 emr |   288     0  20643    301  1533.81    29.66     0.10    19.56
 esa |   288     0  17691    414     0.24    -0.54     0.61     0.00
 gfz |   288     0  18084    525     0.42    -0.35     0.08    24.95
 igu |    96     0   2574      0     0.17    -0.11     4.78     0.00
 jpl |   288     0  13924    564     3.14    -9.30     0.07    32.49
 ngs |    96     0   2670      0     0.15    -0.07     5.07     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29151    983   820.09     8.99     0.09    23.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  3999  4056  -153   -22   -55  6231    81  2517     -    91 |
    2 | -3608 -3551   -98  -506   105 -2691   159 -3191     -   -61 |
    3 |  3916  3973   -34  -453    -6 12455    67  3874     -    24 |
    4 |  -557  -500    -8    26    73  2555   -80  -663     -    25 |
    5 | -5047 -4991  -114  -122   -86 -8966    87 -4374     -    84 |
    6 | -3547 -3490   -51   193     3 15742    28 -3486     -     5 |
    7 |  -947  -891     2  -211    14 -3178    60  -980     -   -26 |
    8 |-17085-17028   -46  -171   -49-19543     5-14711     -    87 |
    9 | -5603 -5546   -82  -237   -23  3926    94 -5021     -   -20 |
   10 | -1645 -1589   104  -233   -27  1667    49 -1580     -   -68 |
   13 |   358   415   -71    27   104   777   -38   964     -    -6 |
   14 |  7962  8019   -78   272   -29  1031   127  8151     -   -57 |
   15 |  4006  4063   -77     -    22  7348    56  3522     -   -35 |
   16 |  4768  4824     7  -445   -11   -26   215  4960     -   -35 |
   17 |  1530     -   -31    49   164  7812     6  1777     -  -150 |
   18 |  2735  2792    21   255    49  -544   -56  3042     -     X |
   20 |  2911  2968   -49   150    43  1975   202  3160     -   -44 |
   21 |   324   381    39  -621    22 -4624   -29   612     -   -50 |
   22 | -2009 -1952   -89  -475   -79 -4580   192 -2343     -   -73 |
   23 |  3120  3177  -127   640    -9 -3761    51  2730     -    62 |
   24 |   757   814    19    44    15 -1501     6   767     -   -33 |
   25 |   158   215  -158  -197    70 -3596   -61   -89     -    69 |
   26 |  -581  -524   -82  -145   155   224   -63  -400     -   -86 |
   27 |  4894  4950   -26    28    -8 -7005    -5  3991     -    36 |
   28 |  6443  6500    83  -138   -37 -1170   148  6614     -   -58 |
   29 | -2913 -2856   -14  -120    34  -160   -10 -2538     -   -12 |
   30 |  1815  1871   -17   -62    59     -  -109 -1199     -   -29 |
   31 | -6302 -6246   -55  -266   -57   200   103 -6219     -    91 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -  -111     -     -     -   105     -     -   -68 |
 ALGO |     -     -  -113   401     -     -   149     -     -  -115 |
 AMC2 |     -     -    81     -     -     -     -     -     -   -69 |
 AOML |     -     -     -     -     -     -    -2     -     -     3 |
 ARTU |     -     -     -     -   -73     -    56     -     -     - |
 AUCK |     -     -     -   275     X     -    58     -     -   -82 |
 BAHR |     -     -   -38  -183  -164     -    86     -     -    90 |
 BJFS |     -     -   -71     -     -     -     -     -     -    61 |
 BOR1 |     -     -     8     -     -     -     -     -     -    -7 |
 BRMU |     -     -     -     -    33     -     -     -     -   -35 |
 BRUS |     -     -    51     -     -     -    -3     -     -   -38 |
 CAS1 |     -     -     -   122  -137     -    71     -     -    48 |
 CEDU |     -     -     -   -62     -     -   -37     -     -    52 |
 CHUR |     -     -   200     -     -     -     -     -     -  -170 |
 COCO |     -     -     -   175    85     -  -117     -     -    73 |
 CRO1 |     -     -   345     -     -     -   -31     -     -  -249 |
 DAVR |     -     -     -     -   -23     -     -     -     -    25 |
 DRAO |     -     -    21     -     -     -     -     -     -   -18 |
 FAIR |     -     -     X   663   -63     -    48     -     -     X |
 FORT |     -     -    81  -753  -158     -   120     -     -   -68 |
 GODZ |     -     -    90  -722     -     -     -     -     -   -76 |
 GOLD |     -     -     -  -105     -     -  -102     -     -   144 |
 GRAZ |     -     -    11  -854     -     -     -     -     -    -9 |
 GUAM |     -     -     -   130     3     -   -36     -     -    50 |
 GUAT |     -     -     -     -    37     -     -     -     -   -40 |
 HERS |     -     -  -219     -     -     -     -     -     -   187 |
 HOB2 |     -     -     0   962     -     -    18     -     -   -25 |
 HRAO |     -     -     -     -   597     -  -330     -     -  -183 |
 IISC |     -     -     -   193   -15     -     -     -     -    16 |
 JPLM |     -     -    79     -     -     -     -     -     -   -67 |
 KERG |     -     -   155    90   116     -  -309     -     -   178 |
 KGN0 |     -     -    22     -     -     -     -     -     -   -18 |
 KIRU |     -     -   -82     -     -     -     -     -     -    70 |
 KIT3 |     -     -     -  -245   -66     -     -     -     -    72 |
 KOKB |     -     -    64     -    11     -     -     -     -   -65 |
 KOUR |     -     -     -   -28   -10     -     -     -     -    10 |
 KSTU |     -     -     -     -   -48     -   -34     -     -   100 |
 KUNM |     -     -     -     -     -     -  -209     -     -   295 |
 LPGS |     -     -     -     -     X     -    56     -     -   -80 |
 MAC1 |     -     -     -   494  -230     -    43     -     -   192 |
 MAS1 |     -     -   -11  -180   -86     -    73     -     -     0 |
 MCM4 |     -     -     -     -     3     -     -     -     -    -3 |
 MDO1 |     -     -    64   -29   141     -     -     -     -  -207 |
 MEDI |     -     -   -36     -     -     -     -     -     -    30 |
 METS |     -     -   144     -     -     -     X     -     -  -123 |
 MIZU |     -     -   -38     -     -     -     -     -     -    32 |
 MKEA |     -     -     -   130   -68     -   -57     -     -   155 |
 NKLG |     -     -     -     -   -77     -     -     -     -    84 |
 NLIB |     -     -    97     -     -     -   -25     -     -   -36 |
 NOT1 |     -     -    20     -     -     -     -     -     -   -17 |
 NPLD |     -     -    87     -     -     -     -     -     -   -74 |
 NRC2 |     -     -     0  -324    91     -     X     -     -   -99 |
 NTUS |     -     -     -     -     -     -  -146     -     -   206 |
 NYA1 |     -     -     -     -   -59     -    61     -     -   -22 |
 NYAL |     -     -   -86   728     -     -     -     -     -    73 |
 OS0G |     -     -    12   -40    -5     -     -     -     -    -4 |
 PERT |     -     -   367   -22   102     -  -117     -     -  -238 |
 PIE1 |     -     -   282     X     -     -     -     -     -  -240 |
 POTS |     -     -     -  -376   -26     -     -     -     -    28 |
 REYK |     -     -     -     -     -     -   -48     -     -    68 |
 RIOG |     -     -     -  -201   -20     -     -     -     -    22 |
 SANT |     -     -     -    17    -2     -     -     -     -     2 |
 SCH2 |     -     -   -19     -     -     -     -     -     -    16 |
 SELE |     -     -     -  -196     -     -   -39     -     -    55 |
 SFER |     -     -   -41     -     -     -     -     -     -    35 |
 STJO |     -     -   -32     -     -     -    12     -     -    10 |
 TIDB |     -     -   111  2432   -87     -     -     -     -     X |
 TRO1 |     -     -     -     -  -113     -     -     -     -   122 |
 TSKB |     -     -    17   578   -63     -     -     -     -    54 |
 TWTF |     -     -  -132     -     -     -     -     -     -   112 |
 USNO |     -     -   -51     -     -     -   147     -     -  -164 |
 USUD |     -     -     1   256     -     -     -     -     -    -1 |
 WSRT |     -     -    54     -     -     -     -     -     -   -46 |
 WTZR |     -     -    53  -280     -     -     -     -     -   -45 |
 WUHN |     -     -  -133  -250     -     -     -     -     -   113 |
 YAKT |     -     -   -34     -     -     -     -     -     -    29 |
 YELL |     -     -     -   329   -82     -   -11     -     -   113 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9188  9221    53   895    90  4044    74  8775     -    69 |  288   4.64
    2 |  4883  4916    95   647    79  3271    58  4849     -    96 |  288   3.36
    3 |  6508  6534   105  1500    75  6659    30  4948     -    56 |  276   2.25
    4 |  2216  2205    77   307    23   913    30  2145     -    80 |  288   0.93
    5 |  4364  4339    77   622    58  3341    37  4481     -    44 |  288   2.28
    6 | 15247 15187    61  1437    74 16070    47 14535     -    45 |  282  11.15
    7 |  1295  1327   114   429    71  1875    98  1086     -   108 |  276   0.39
    8 |  7547  7580    53   388    41 11271    28  6671     -    50 |  288   5.38
    9 |  2839  2842   184   476   102  2387    82  2498     -    64 |  288   1.79
   10 |  2746  2722   204   414    84  1414    59  2501     -    80 |  288   1.67
   13 |  2240  2287    37   500    35   634    31  2111     -    75 |  288   0.26
   14 |  1025  1042    77   504    38   625    29   847     -    75 |  288   0.19
   15 |  5214  5189   215     -    72  3734    72  5013     -   251 |  288   2.81
   16 |  1209  1281    70   750    38   868    84  1149     -    78 |  288   0.28
   17 |  3281     -   282  1844   206  4241   120  3502     -   198 |  288   1.72
   18 |  1817  1827   144   672    61  1166    52  1540     -     X |  287   0.36
   20 |  1054  1041    99   866    60   787    54   905     -    48 |  288   0.21
   21 |  1731  1722   170  1334   205  3426   139  1434     -   157 |  288   0.38
   22 |  6291  6346   113   410    82  4836   180  6451     -   116 |  288   6.54
   23 |  9661  9638   116   980   149  4840   124  9213     -   217 |  276   6.50
   24 |  2627  2631    69   238    42  1248    43  2514     -    58 |  288   2.50
   25 |  2674  2689    57   268    25  1777    38  2535     -    60 |  288   1.22
   26 |  1409  1395   100   736    68   895    39  1196     -    48 |  288   0.71
   27 |  5235  5230    61   585    42  5556    27  5327     -    82 |  288   1.30
   28 |  1067  1070   101   730    51  1334    49   812     -   131 |  288   0.37
   29 |  2405  2386    81   355    85  1236    26  2359     -    48 |  288   0.93
   30 | 11140 11135   142   321    42     -    45  8911     -   110 |  288   0.83
   31 |  2989  2943    61  1331    29  3882    39  2918     -    41 |  276   2.11
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    39     -     -     -    19     -     -    23 |  288   0.07
 ALGO |     -     -    49   427     -     -    21     -     -    34 |  288   0.05
 AMC2 |     -     -    99     -     -     -     -     -     -    85 |  275   0.09
 AOML |     -     -     -     -     -     -    20     -     -    29 |  286  33.27
 ARTU |     -     -     -     -    13     -    10     -     -     - |  287  10.42
 AUCK |     -     -     -   987     X     -    83     -     -   118 |  264  15.36
 BAHR |     -     -    57   493    29     -    34     -     -    40 |  288   0.49
 BJFS |     -     -    97     -     -     -     -     -     -    82 |  286    >>>
 BOR1 |     -     -   109     -     -     -     -     -     -    93 |  264   0.61
 BRMU |     -     -     -     -    42     -     -     -     -    45 |  286    >>>
 BRUS |     -     -    77     -     -     -    51     -     -    45 |  288   0.05
 CAS1 |     -     -     -   215    54     -    33     -     -    91 |  288   9.21
 CEDU |     -     -     -   145     -     -    46     -     -    65 |  288  18.46
 CHUR |     -     -    98     -     -     -     -     -     -    83 |  204   0.81
 COCO |     -     -     -   331    46     -    45     -     -   102 |  288   8.95
 CRO1 |     -     -    35     -     -     -    22     -     -    49 |  288  22.49
 DAVR |     -     -     -     -   214     -     -     -     -   232 |  253  16.21
 DRAO |     -     -    34     -     -     -     -     -     -    29 |  288   0.06
 FAIR |     -     -     X   322    98     -    75     -     -     X |  280   0.30
 FORT |     -     -   104   400    55     -    66     -     -   130 |  288   0.13
 GODZ |     -     -    77   647     -     -     -     -     -    66 |  283   0.12
 GOLD |     -     -     -   335     -     -    22     -     -    32 |  286  23.20
 GRAZ |     -     -    61   640     -     -     -     -     -    52 |  279  14.86
 GUAM |     -     -     -   419   129     -    84     -     -    92 |  282  16.53
 GUAT |     -     -     -     -    39     -     -     -     -    42 |  285    >>>
 HERS |     -     -    85     -     -     -     -     -     -    73 |  234  11.23
 HOB2 |     -     -   107   223     -     -    75     -     -   114 |  288   0.07
 HRAO |     -     -     -     -    35     -    32     -     -    25 |  288  24.20
 IISC |     -     -     -   631   145     -     -     -     -   157 |  260  33.59
 JPLM |     -     -    78     -     -     -     -     -     -    66 |  266  35.23
 KERG |     -     -    56    67    31     -    50     -     -    60 |  287   1.43
 KGN0 |     -     -    84     -     -     -     -     -     -    72 |  280   0.29
 KIRU |     -     -    64     -     -     -     -     -     -    54 |  258  14.66
 KIT3 |     -     -     -   331    54     -     -     -     -    58 |  280    >>>
 KOKB |     -     -   227     -   215     -     -     -     -   245 |  285   0.10
 KOUR |     -     -     -   514    38     -     -     -     -    41 |  286   1.37
 KSTU |     -     -     -     -    18     -    35     -     -    47 |  261  11.12
 KUNM |     -     -     -     -     -     -    27     -     -    38 |  286  44.26
 LPGS |     -     -     -     -     X     -    33     -     -    46 |  250  22.11
 MAC1 |     -     -     -   249    49     -    50     -     -    68 |  288  13.93
 MAS1 |     -     -    35   213    60     -    29     -     -   105 |  288   2.19
 MCM4 |     -     -     -     -    74     -     -     -     -    81 |  277   6.77
 MDO1 |     -     -    62   300    21     -     -     -     -    60 |  288   9.10
 MEDI |     -     -    99     -     -     -     -     -     -    84 |  273   0.70
 METS |     -     -   100     -     -     -     X     -     -    85 |  275   0.35
 MIZU |     -     -   110     -     -     -     -     -     -    93 |  246   0.34
 MKEA |     -     -     -   186    76     -    62     -     -   153 |  288  37.15
 NKLG |     -     -     -     -    28     -     -     -     -    31 |  287 157.14
 NLIB |     -     -   182     -     -     -   137     -     -   152 |  287   0.14
 NOT1 |     -     -    69     -     -     -     -     -     -    59 |  282    >>>
 NPLD |     -     -    77     -     -     -     -     -     -    65 |  280   0.08
 NRC2 |     -     -    38   448    63     -     X     -     -    58 |  288   0.02
 NTUS |     -     -     -     -     -     -    67     -     -    94 |  288  11.24
 NYA1 |     -     -     -     -    26     -    16     -     -    31 |  288   0.04
 NYAL |     -     -    40   158     -     -     -     -     -    34 |  288   0.06
 OS0G |     -     -   105   173    63     -     -     -     -    44 |  288   0.07
 PERT |     -     -   232   173    34     -   209     -     -   149 |  288  11.73
 PIE1 |     -     -    76     X     -     -     -     -     -    64 |  268   0.06
 POTS |     -     -     -   180    36     -     -     -     -    39 |  288  11.28
 REYK |     -     -     -     -     -     -    23     -     -    33 |  260  11.78
 RIOG |     -     -     -   565    58     -     -     -     -    63 |  280  16.03
 SANT |     -     -     -   532    36     -     -     -     -    39 |  288   7.78
 SCH2 |     -     -    91     -     -     -     -     -     -    77 |  231  29.32
 SELE |     -     -     -   480     -     -    17     -     -    25 |  286  39.53
 SFER |     -     -   105     -     -     -     -     -     -    89 |  276 423.09
 STJO |     -     -    30     -     -     -    47     -     -    73 |  288  16.38
 TIDB |     -     -    65   111    51     -     -     -     -     X |  269   0.09
 TRO1 |     -     -     -     -    75     -     -     -     -    81 |  286  11.38
 TSKB |     -     -    38   177    53     -     -     -     -    75 |  288   1.06
 TWTF |     -     -    74     -     -     -     -     -     -    63 |  286   0.30
 USNO |     -     -    49     -     -     -    27     -     -    45 |  288   0.02
 USUD |     -     -    57   152     -     -     -     -     -    49 |  275  14.24
 WSRT |     -     -    61     -     -     -     -     -     -    52 |  282   0.05
 WTZR |     -     -    72   196     -     -     -     -     -    61 |  285   0.18
 WUHN |     -     -   123   212     -     -     -     -     -   105 |  284  26.68
 YAKT |     -     -    36     -     -     -     -     -     -    31 |  288   1.36
 YELL |     -     -     -   237    63     -    33     -     -    45 |  286   0.07
 -----+-------------------------------------------------------------+--------------
 TOT  |  5465  5529   104   607    80  4782    66  5068     -    89 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

