
 GPS week: 1214   Day: 4   MJD: 52746                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2592      0    -0.07    -0.17     4.40     0.00
 cod |   288     0  24119    549    -0.03    -0.27     0.06    24.97
 emr |   288     0  20196     24  1042.55    39.97     0.07    19.99
 esa |   288     0  19123   1356    -0.44     1.24     0.11     9.83
 gfz |   288     0  19045    184    -0.16     0.71     0.06    24.67
 igu |    96     0   2688      0    -0.08    -0.22     4.51     0.00
 ngs |    96     0   2688      0    -0.09    -0.17     4.31     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30861    338   534.90     8.20     0.07    20.55

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  9244   -50   -87    27    24 20094  7889     -   105 |
    2 | -6720     3  -169   115     6 -4853 -6351     -    99 |
    3 | -2031    41   -79   167   -17 -1501 -2241     -   -31 |
    4 |   461    33  -164   -24   127  4199   199     -   -23 |
    5 | -3027    62  -250   258    64 -6899 -2681     -   -30 |
    6 |-10085    58  -205   204   101 -2269 -9781     -   -89 |
    7 | -1288   -70  -182   233   106  1061 -1330     -    24 |
    8 |  1349    -9  -270   245    62 13240   760     -    81 |
    9 | -1996   128  -233   121   106 -2383 -2410     -  -114 |
   10 |   497    23  -257   -73   289  7395  -545     -   -91 |
   11 |     -   -15   311    90  -205  1885  5276     -   -81 |
   13 |  5936   108    91  -117  -126  3869  5534     -   -13 |
   14 |  5227   205   -11   106   -82  4331  5244     -  -190 |
   15 | -3941    73  -112     -   156 -2748 -4070     -  -167 |
   16 |  4134   105   231   194  -319   765  4017     -   -62 |
   18 |  4856   105    18    12    92  2448  4586     -  -257 |
   20 |  2975    15   114    32   -90  2275  3088     -   -39 |
   21 |  1717    18    57   317    18 -2741  1888     -  -244 |
   22 |   668    24  -150   161   -35-17872  -407     -    81 |
   23 |  -841   171  -330   345    31 -2744  -575     -   -96 |
   24 | -3444     4  -188   -59   198 -2637 -3167     -   -31 |
   25 |  4465   102  -188   120    40  9158  3032     -   -47 |
   26 |   -39    89  -258  -146   215    50  -300     -   -46 |
   27 |  -771   -41  -213   168   144-15257  -895     -     4 |
   28 | -4487    29   159    40  -119 -5720 -3402     -   -67 |
   29 |  -787    80  -324    50   227  1466 -1174     -   -79 |
   30 |   598   127  -206   239    19  1939   300     -   -90 |
   31 | -2666    22   -65   -75   -13 -6548 -2478     -    88 |
 -----+-------------------------------------------------------+
 ALBH |     -  -159    13     -     -     -     -     -   183 |
 ALGO |     -   -29    43    57     -     -     -     -   -33 |
 AMC2 |     -   -94   117     -     -     -     -     -     0 |
 AOML |     -   -67     -     -     -     -     -     -    81 |
 AREQ |     -     -   -77   171    48     -     -     -   -64 |
 ARTU |     -    15     -     -   -15     -     -     -     - |
 ASC1 |     -   130     -     -   -53     -     -     -   -92 |
 AUCK |     -     -     -     X  -283     -     -     -   339 |
 BAHR |     -     7   131   -29   -90     -     -     -   -14 |
 BILI |     -    82     -     -   -83     -     -     -     - |
 BJFS |     -     -   124     -  -178     -     -     -    94 |
 BOGT |     -   226     -     X     -     -     -     -  -274 |
 BOR1 |     -     -    72     -     -     -     -     -   -70 |
 BRMU |     -     -     -     -    15     -     -     -   -18 |
 BRUS |     -     -    85     -     -     -     -     -   -82 |
 CAS1 |     -    76     -    70   -63     -     -     -   -50 |
 CEDU |     -    32     -  -234     -     -     -     -    72 |
 CHAT |     -     -     -  -109     -     -     -     -    52 |
 CHUR |     -     X   202     -     -     -     -     -  -196 |
 COCO |     -     1     -   -32     -     -     -     -    15 |
 CRO1 |     -   -83   145     -     -     -     -     -   -42 |
 DAVR |     -    60     -     -   -49     -     -     -   -16 |
 DRAO |     -   -21     2     -     -     -     -     -    23 |
 EISL |     -     -     -     -   -21     -     -     -    25 |
 FAIR |     -     -    54   -66   -73     -     -     -    63 |
 FORT |     -     -     -  -109   132     -     -     -  -103 |
 GLPS |     -   -14     -     -    14     -     -     -     - |
 GODE |     -   -58    74     -     -     -     -     -    -1 |
 GOLD |     -  -115     -  -103     -     -     -     -   220 |
 GRAZ |     -     -   115   -95     -     -     -     -   -67 |
 GUAM |     -     -     -  -356     X     -     -     -   170 |
 HERS |     -  -272   -66     -     -     -     -     -   392 |
 HOB2 |     -     -     6     -     -     -     -     -    -5 |
 HRAO |     -    14     -     -   -64     -     -     -    60 |
 IISC |     -     -     -    72  -104     -     -     -    91 |
 JPLM |     -     -    -2     -     -     -     -     -     2 |
 KERG |     -     -    39   -79     -     -     -     -     - |
 KGN0 |     -     -    10     -     -     -     -     -   -10 |
 KIRU |     -   -56    26    38     -     -     -     -    25 |
 KOKB |     -   -20    61     -  -149     -     -     -   143 |
 KOUR |     -    25     -  -315     -     -     -     -   120 |
 LPGS |     -   126     -  -262     -     -     -     -   -19 |
 MAC1 |     -   -22     -   110  -109     -     -     -   107 |
 MAS1 |     -     5    86     X   -78     -     -     -     4 |
 MATE |     -     -     -   -85     -     -     -     -    40 |
 MAW1 |     -   146     -     -  -124     -     -     -   -29 |
 MCM4 |     -     -     -     -   -20     -     -     -    24 |
 MDO1 |     -     -   122  -556    80     -     -     -    11 |
 MEDI |     -     -   114     -     -     -     -     -  -111 |
 METS |     -  -129   109     -     -     -     -     -    51 |
 MIZU |     -     -    -8     -     -     -     -     -     8 |
 MKEA |     -     6     -    17  -124     -     -     -   134 |
 NLIB |     -     -   177    67     -     -     -     -  -199 |
 NRC2 |     -    -8   157  -396    15     -     -     -    24 |
 NRIL |     -  -446     -     -   452     -     -     -     - |
 NSSP |     -    -4     -     -     -     -     -     -     4 |
 NYA1 |     -   112     -     -   -51     -     -     -   -76 |
 NYAL |     -     -    86    97     -     -     -     -  -130 |
 OHI2 |     -    12     -     -   -12     -     -     -     - |
 OS0G |     -   -13   181    60  -140     -     -     -   -21 |
 PERT |     -   113    91  -356   -44     -     -     -    -8 |
 PIE1 |     -     -    85   -82     -     -     -     -   -42 |
 PIMO |     -     -     -  -117    47     -     -     -     X |
 POL2 |     -     5     -     -     -     -     -     -    -6 |
 POTS |     -   -12     -     -    55     -     -     -   -52 |
 PTBB |     -    23     -     -     -     -     -     -   -27 |
 RBAY |     -  -183     -     -    98     -     -     -    71 |
 RIOG |     -     -     -    95     -     -     -     -   -45 |
 SANT |     -    20     -    25   -11     -     -     -   -21 |
 SCH2 |     -   -97   153     -     -     -     -     -   -25 |
 SFER |     -     -   -61     -     -     -     -     -    59 |
 STJO |     -  -136    96     -     -     -     -     -    72 |
 SUTH |     -   -70     -     -    38     -     -     -    39 |
 SUWN |     -     -   -79     -     -     -     -     -    77 |
 THU3 |     -    63     -     -   -64     -     -     -     - |
 TRO1 |     -  -184     -     -    88     -     -     -   118 |
 TROM |     -     -     -  -185     -     -     -     -    89 |
 TSKB |     -   -96   147   -34   -11     -     -     -     3 |
 TWTF |     -   -56   -34     -     -     -     -     -   102 |
 UNSA |     -     -     -     -    11     -     -     -   -13 |
 URUM |     -    -5     -     -     -     -     -     -     7 |
 USNO |     -   -50    50     -     -     -     -     -    11 |
 USUD |     -     -     4   -47     -     -     -     -    18 |
 VILL |     -   -19     -     X     -     -     -     -    23 |
 WES2 |     -     -   114  -231     -     -     -     -     - |
 WILL |     -     -   382     -     -     -     -     -  -372 |
 WTZR |     -  -176    99   381     -     -     -     -   -60 |
 WUHN |     -  -191     -  -391     -     -     -     -   416 |
 YAKT |     -   -48    -3     -     -     -     -     -    62 |
 YAR2 |     -    -1     -     -     -     -     -     -     1 |
 YELL |     -     X     -     2    11     -     -     -   -14 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6976    45    31   184    25  9923  6250     -    78 |  288   3.54
    2 |  3306    59    44   118    29  3622  3326     -    50 |  288   3.32
    3 |  2182    52    64   132    58  3242  2267     -    54 |  288   1.50
    4 |  2977   116    53   123    97  3478  2421     -    29 |  288   0.41
    5 |  6930    59    58    79    28  4595  5820     -    46 |  288   4.27
    6 | 10362    54    33    67    31  4572 10954     -    72 |  288   9.99
    7 |  1698    69    49   143    43   782  1517     -    53 |  288   0.67
    8 |  6508    46    67   107    37  9344  6961     -    45 |  288   4.16
    9 |  4788    41    32    78    21  3571  4718     -    27 |  288   2.70
   10 |  5127   156    41    96   121  3172  5200     -    45 |  288   1.78
   11 |     -   151    39   118    52  1607   979     -   202 |  288   0.35
   13 |  1623    51    40   116    24  1954  1430     -    79 |  288   0.29
   14 |  1811    30    41    47    52  2403  1655     -    72 |  288   0.45
   15 |  3025    72    71     -    32  2197  3239     -    45 |  288   1.60
   16 |   726    93    60    76    42   485   676     -   109 |  288   0.30
   18 |   951    72    59   125    31  1449   781     -    54 |  288   0.28
   20 |  1137    82    33   143    70  1583   940     -    63 |  288   0.24
   21 |  2551    85    62   117   162  1436  2090     -    98 |  288   0.73
   22 |  8566    66   170    80    60 10277  8711     -    89 |  288   7.73
   23 |  6287   115   219   101   219  4487  7350     -   142 |  288   6.65
   24 |  3960    54    24    79    30  2953  3485     -    89 |  288   2.16
   25 |  4468    39    60    58    17  4188  4185     -    31 |  288   1.40
   26 |  1221    70    68   101    48   899  1215     -    85 |  288   0.83
   27 |  1116    50    62    96    33  9413   904     -    77 |  288   1.00
   28 |  4097    59    63   171    24  3494  3595     -    45 |  288   0.37
   29 |  1275    44   111   110    90   583  1489     -    50 |  288   0.56
   30 |  1447    58    58    63    33  1068  1413     -    79 |  288   0.94
   31 |  2986    53    45    83    33  2933  2830     -    45 |  288   1.36
 -----+-------------------------------------------------------+--------------
 ALBH |     -   115    67     -     -     -     -     -   162 |  274    >>>
 ALGO |     -    43    18    68     -     -     -     -    40 |  288   0.10
 AMC2 |     -    35    45     -     -     -     -     -    30 |  288   0.08
 AOML |     -    24     -     -     -     -     -     -    29 |  282  30.76
 AREQ |     -     -    32    50    45     -     -     -    48 |  288  19.79
 ARTU |     -    38     -     -    39     -     -     -     - |  288  14.87
 ASC1 |     -    45     -     -    40     -     -     -    28 |  269    >>>
 AUCK |     -     -     -     X    44     -     -     -    53 |  249  11.63
 BAHR |     -    34    27    56    35     -     -     -    32 |  288   0.30
 BILI |     -    22     -     -    22     -     -     -     - |  284   8.59
 BJFS |     -     -   101     -    70     -     -     -    92 |  287    >>>
 BOGT |     -    70     -     X     -     -     -     -    85 |  285  23.30
 BOR1 |     -     -    97     -     -     -     -     -    95 |  285  24.76
 BRMU |     -     -     -     -    26     -     -     -    31 |  274    >>>
 BRUS |     -     -    59     -     -     -     -     -    57 |  286   0.11
 CAS1 |     -    20     -    91    22     -     -     -    31 |  288   7.40
 CEDU |     -    26     -    88     -     -     -     -    43 |  288  11.59
 CHAT |     -     -     -    44     -     -     -     -    21 |  285  12.47
 CHUR |     -     X    60     -     -     -     -     -    59 |  239   0.52
 COCO |     -    36     -   107     -     -     -     -    40 |  288  10.62
 CRO1 |     -    36    59     -     -     -     -     -    33 |  288  23.37
 DAVR |     -    75     -     -   108     -     -     -   104 |  288  14.66
 DRAO |     -    47    24     -     -     -     -     -    41 |  288   0.05
 EISL |     -     -     -     -    25     -     -     -    30 |  285  40.82
 FAIR |     -     -    57   148    72     -     -     -    86 |  286   0.22
 FORT |     -     -     -    99    42     -     -     -    64 |  288   0.18
 GLPS |     -    40     -     -    40     -     -     -     - |  272  26.98
 GODE |     -    57    57     -     -     -     -     -    61 |  272 439.24
 GOLD |     -    40     -    84     -     -     -     -    33 |  281  18.77
 GRAZ |     -     -    64   175     -     -     -     -    58 |  286  40.32
 GUAM |     -     -     -   265     X     -     -     -   127 |  184  17.03
 HERS |     -    42    66     -     -     -     -     -    36 |  264   6.24
 HOB2 |     -     -    85     -     -     -     -     -    82 |  215 182.12
 HRAO |     -    21     -     -    23     -     -     -    30 |  288  22.86
 IISC |     -     -     -   102   115     -     -     -   120 |  288  32.06
 JPLM |     -     -    76     -     -     -     -     -    74 |  273  57.62
 KERG |     -     -    48    97     -     -     -     -     - |  284   1.61
 KGN0 |     -     -    54     -     -     -     -     -    52 |  284   0.40
 KIRU |     -    41    71    45     -     -     -     -    40 |  288  10.22
 KOKB |     -    83   125     -    79     -     -     -    83 |  288   0.13
 KOUR |     -    27     -    70     -     -     -     -    28 |  288   1.57
 LPGS |     -    43     -    86     -     -     -     -    32 |  276  21.66
 MAC1 |     -    45     -   140    92     -     -     -    69 |  286  13.08
 MAS1 |     -    34    23     X    27     -     -     -    21 |  288   2.37
 MATE |     -     -     -    43     -     -     -     -    20 |  288   0.25
 MAW1 |     -    54     -     -    22     -     -     -    50 |  288  23.64
 MCM4 |     -     -     -     -    35     -     -     -    42 |  191   6.75
 MDO1 |     -     -    30   155    50     -     -     -    43 |  288   6.28
 MEDI |     -     -    61     -     -     -     -     -    60 |  286   0.55
 METS |     -    38    42     -     -     -     -     -    34 |  287   0.46
 MIZU |     -     -    85     -     -     -     -     -    82 |  283   0.44
 MKEA |     -    44     -   112    46     -     -     -    57 |  288  29.06
 NLIB |     -     -   129   217     -     -     -     -   106 |  275 200.53
 NRC2 |     -    23    23    49    20     -     -     -    36 |  288   0.04
 NRIL |     -    13     -     -    13     -     -     -     - |  205  11.06
 NSSP |     -    19     -     -     -     -     -     -    22 |  286  18.71
 NYA1 |     -    55     -     -    24     -     -     -    48 |  288   0.09
 NYAL |     -     -    25    51     -     -     -     -    17 |  288   0.10
 OHI2 |     -    48     -     -    49     -     -     -     - |  287   7.27
 OS0G |     -    29    85    69    24     -     -     -    30 |  288   0.23
 PERT |     -    43   111   141    37     -     -     -    49 |  288   3.64
 PIE1 |     -     -    66   103     -     -     -     -    34 |  288   0.16
 PIMO |     -     -     -   144    57     -     -     -     X |  246  19.00
 POL2 |     -    31     -     -     -     -     -     -    38 |  287  17.27
 POTS |     -    49     -     -    21     -     -     -    52 |  288  14.46
 PTBB |     -    51     -     -     -     -     -     -    61 |  286   0.11
 RBAY |     -   112     -     -    43     -     -     -   165 |  278  25.24
 RIOG |     -     -     -    73     -     -     -     -    35 |  162  11.74
 SANT |     -    65     -    73    95     -     -     -    45 |  288   5.80
 SCH2 |     -    24    62     -     -     -     -     -    51 |  288  82.20
 SFER |     -     -    65     -     -     -     -     -    63 |  281    >>>
 STJO |     -    57    20     -     -     -     -     -    70 |  288  64.89
 SUTH |     -    24     -     -    19     -     -     -    27 |  288  21.51
 SUWN |     -     -    55     -     -     -     -     -    53 |  280   1.95
 THU3 |     -    22     -     -    22     -     -     -     - |  288   9.37
 TRO1 |     -    42     -     -    19     -     -     -    61 |  288  10.60
 TROM |     -     -     -   119     -     -     -     -    57 |  201  12.21
 TSKB |     -    59    65    98    24     -     -     -    74 |  288   1.39
 TWTF |     -    52    68     -     -     -     -     -    54 |  288   0.60
 UNSA |     -     -     -     -    41     -     -     -    49 |  276  20.65
 URUM |     -    30     -     -     -     -     -     -    37 |  288  17.41
 USNO |     -    42    11     -     -     -     -     -    48 |  288   0.05
 USUD |     -     -    58    86     -     -     -     -    61 |  288  13.32
 VILL |     -    29     -     X     -     -     -     -    35 |  288   3.98
 WES2 |     -     -    61   123     -     -     -     -     - |  282   0.65
 WILL |     -     -    57     -     -     -     -     -    55 |  105 131.51
 WTZR |     -    38    71    71     -     -     -     -    24 |  288   0.26
 WUHN |     -    77     -    71     -     -     -     -   108 |  287  23.51
 YAKT |     -    35    36     -     -     -     -     -    47 |  288   0.88
 YAR2 |     -    26     -     -     -     -     -     -    32 |  286   4.44
 YELL |     -     X     -   149    77     -     -     -   143 |  288   0.10
 -----+-------------------------------------------------------+--------------
 TOT  |  4399    59    69   109    60  4506  4306     -    67 |


 BEST CLOCK FIT: NRC2   288   0.04 (ns) 

