
 GPS week: 1214   Day: 2   MJD: 52744                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2784      0     0.04    -0.08     5.13     0.00
 cod |   288     0  24753    323     0.06    -0.47     0.06    21.67
 emr |   288     0  19271    278   975.21    34.34     0.06    21.08
 esa |   286     0  19401   1445    -0.04     0.00     0.11    10.15
 gfz |   288     0  19503    524    -0.18    -0.25     0.06    21.66
 igu |    96     0   2688      0     0.02    -0.13     3.79     0.00
 ngs |    96     0   2784      0     0.03    -0.06     4.90     0.00
 usn |   288     0  29219    279   527.34     4.52     0.05    25.45

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   usn |
 -----+-------------------------------------------------+
    1 | -8897    17  -128   133    17 -2281 -8186    24 |
    2 | -3771    71  -189    29   -40   444 -3134   120 |
    3 | -7759    65  -118    53  -124  3222 -6644   127 |
    4 |    94    28   -78  -162   236  1574   275   -95 |
    5 | -3466    76  -244   -33   203  -981 -4242   -23 |
    6 |   928   -35  -225   318   232  5298   307  -110 |
    7 |   140    88   -68   -10    36   943   124   -45 |
    8 |  4246    72  -167    71   -26 15459  2933    71 |
    9 |  2021   126  -266   -56   261  2857  2321   -87 |
   10 | -2322    40  -170   -69   242  4420 -3010   -71 |
   11 |  7653   -16   193    81  -128  4090  6002   -70 |
   13 |  4703    16   166   -45   -79  1588  4695   -67 |
   14 |  3178   156    29   -36  -162  2194  3443    -6 |
   15 | -1825    35  -136     -   127 -3869 -1400   -25 |
   16 |   878   104   158   170  -374  -965  1091    31 |
   17 | -8192    21  -149     X   187     - -7487   -54 |
   18 |  3022   151    40    92   -41   896  3175  -165 |
   20 |  2041   -11   101   157   -93  1782  2142   -61 |
   21 |  7800  -246    76   394     X -2420  8471     4 |
   22 | -1149    69  -120   326  -293-15108 -2314   161 |
   23 |  4692    30     X   347   -65 -4562  4403  -116 |
   24 | -5244     5  -128  -144   262  3373 -4471   -64 |
   25 | -3160   108  -272   240    75 -7250 -2725   -25 |
   26 | -2376    50  -183  -101   201 -2140 -2203   -23 |
   27 | -1474    43  -138   128    -1-13699 -1328    28 |
   28 | 10496    71   240  -159  -140  5981  9703   -77 |
   29 | -1747   156  -163  -174   107  -634 -1518   -20 |
   30 | -3480   116  -254   161   192 -2647 -2931  -116 |
   31 |  2972    -7  -157   -53    41  2438  2508   123 |
 -----+-------------------------------------------------+
 ALBH |     -  -202   -21     -     -     -     -   190 |
 ALGO |     -     -    17     X     -     -     -   -14 |
 AMC2 |     -  -230   138     -     -     -     -    82 |
 AOML |     -   -59     -     -     -     -     -    51 |
 AREQ |     -     -   226   -59    78     -     -  -231 |
 ARTU |     -   -25     -     -    25     -     -     - |
 ASC1 |     -   275     -  -183   -90     -     -   -85 |
 AUCK |     -  -222     -     X   508     -     -  -238 |
 BAHR |     -   -48    78    73     8     -     -   -60 |
 BILI |     -     0     -     -     0     -     -     - |
 BJFS |     -     -   161     -  -156     -     -     - |
 BOGT |     -     X     -   163     -     -     -   -65 |
 BOR1 |     -     -   139     -     -     -     -  -115 |
 BRMU |     -     -     -   216  -101     -     -     - |
 BRUS |     -     -    -9     -     -     -     -     8 |
 CAS1 |     -    29     -   104  -127     -     -    42 |
 CEDU |     -    83     -     X     -     -     -   -71 |
 CHAT |     -   -72     -   228     -     -     -   -29 |
 CHUR |     -   160   178     -     -     -     -  -269 |
 COCO |     -  -144     -  -211    75     -     -   143 |
 CRO1 |     -    22    56     -     -     -     -   -65 |
 DAVR |     -    61     -     -   -64     -     -     3 |
 DRAO |     -    12    65     -     -     -     -   -64 |
 DWH1 |     -     -   164     -     -     -     -  -136 |
 FAIR |     -     -    -5    96   -53     -     -    10 |
 FORT |     -   226     -  -336   -34     -     -     1 |
 GODE |     -  -136    20    64     -     -     -    74 |
 GOLD |     -   -86     -   154     -     -     -     0 |
 GRAZ |     -     -    63  -150     -     -     -     4 |
 GUAM |     -    88     -  -417  -111     -     -   185 |
 GUAT |     -  -144     -     -    39     -     -    86 |
 HRAO |     -     -     -     -   -60     -     -    51 |
 IISC |     -     -     -     -  -288     -     -   245 |
 JPLM |     -     -   -40     -     -     -     -    33 |
 KIRU |     -  -121   102     -     -     -     -    18 |
 KOKB |     -  -157   106     -  -144     -     -   169 |
 KOUR |     -    18     -  -209     -     -     -    68 |
 LPGS |     -    93     -  -143     -     -     -   -18 |
 MAC1 |     -   -52     -    78  -154     -     -   145 |
 MAS1 |     -    10   121  -108   -68     -     -    -8 |
 MATE |     -     -     -   -90     -     -     -    36 |
 MAW1 |     -    67     -     -   -33     -     -   -29 |
 MCM4 |     -   160     -     -    77     -     -  -201 |
 MDO1 |     -     -    82  -204    23     -     -    -7 |
 MEDI |     -     -    88     -     -     -     -   -73 |
 METS |     -  -161    72     -     -     -     -    78 |
 MIZU |     -     -   -40     -     -     -     -    33 |
 MKEA |     -   -82     -    56  -112     -     -   141 |
 NRC2 |     -   -96    57    67    16     -     -    -6 |
 NRIL |     -    67     -     -   -67     -     -     - |
 NSSP |     -   -84     -     -     -     -     -    71 |
 NYA1 |     -    74     -     -   -78     -     -     4 |
 NYAL |     -     -    66    79     -     -     -   -86 |
 OHI2 |     -   122     -     -  -122     -     -     - |
 OS0G |     -     -    92    -3   -88     -     -    -1 |
 PERT |     -    82    79  -264   -15     -     -   -19 |
 PIE1 |     -     -   122  -243     -     -     -    -3 |
 PIMO |     -     -     -     -   886     -     -  -754 |
 POL2 |     -   -38     -     -     -     -     -    32 |
 POTS |     -   -69     -   -34   -53     -     -   118 |
 RBAY |     -     -     -     -    59     -     -   -50 |
 RIOG |     -    32     -   204  -125     -     -    -2 |
 SANT |     -     4     -     X     X     -     -    -4 |
 SCH2 |     -   -48   -36     -     -     -     -    70 |
 SFER |     -  -234     1     -     -     -     -   200 |
 STJO |     -     -     1     -     -     -     -    -1 |
 SUTH |     -  -105     -  -129     -     -     -   141 |
 THU3 |     -   -20     -     -    20     -     -     - |
 TIDB |     -    30  -100   130     6     -     -     X |
 TRO1 |     -  -143     -     -     3     -     -   120 |
 TROM |     -     -     -   138     -     -     -   -55 |
 TSKB |     -   -75   110    28   -55     -     -     8 |
 URUM |     -    28     -     -     -     -     -   -23 |
 USNO |     -   -99    53     -     -     -     -    40 |
 USUD |     -    -4   -73   143     -     -     -     6 |
 VILL |     -   124     -  -719     -     -     -   176 |
 WES2 |     -   -98   100     -     -     -     -     - |
 WILL |     -     -   -27     -     -     -     -    22 |
 WTZR |     -  -128   178  -134     -     -     -    15 |
 WUHN |     -     -     -    66    55     -     -   -72 |
 YAKT |     -   -75    21     -     -     -     -    47 |
 YAR2 |     -    19     -     -     -     -     -   -16 |
 YELL |     -     9     -    64    25     -     -   -54 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3731    40    43   112    28  3457  3392    29 |  288   3.72
    2 |  3233   100   114   175    71  2001  3160    28 |  288   2.43
    3 |  7277    52    33    61    71  4870  7184    35 |  288   1.92
    4 |  1535    46    26   173    36  1340  1522    50 |  288   0.79
    5 |  6787    90    44   176    30  3595  5762    20 |  288   3.27
    6 | 12908    66    91    69    31  5361 12363    28 |  288  10.28
    7 |  1747    64    39   185    43   448  1530    85 |  288   0.57
    8 |  7910    56    65    48    35  8826  6812    18 |  288   5.17
    9 |  2961    74    48    53    54  2976  2839    30 |  288   1.87
   10 |  9347   172    56   125    95  4003  8609    23 |  288   2.27
   11 |  2786    55    58   108    44  2925  1179    41 |  288   0.37
   13 |   747    42    53    48    54  1345   772    32 |  288   0.50
   14 |   624    52    37   100    19  1017   478    32 |  288   0.27
   15 |  4481    68    91     -    28  3085  4835    31 |  288   2.37
   16 |   858    66   107    81    58   791   761    34 |  288   0.27
   17 |  3093    71    81     X   149     -  3735    73 |  288   2.36
   18 |   898    71    52   116    69   654   890    38 |  288   0.39
   20 |   488    98    55    41    40  1061   486    32 |  288   0.22
   21 |  7371    55    36   154     X  1055  7133    51 |  288   0.63
   22 | 10867   136    57   173   136  7486 11029   150 |  288   8.83
   23 |  7621   155     X   175    85  5933  7467   142 |  288   7.68
   24 |  2937    53    24    68    27  3215  2788    53 |  288   2.14
   25 |  2537    54    41    98    23  3482  2018    24 |  288   1.86
   26 |  1674    63    56   125    42  2088  1772    54 |  288   0.46
   27 |  1015    61    47    35    44  7927   941    19 |  288   0.73
   28 |  3893    62    25    67    43  2582  3704    24 |  288   0.56
   29 |   850    42    60   205    30   926   842    66 |  288   0.47
   30 |  2396    76    35    53    71  2323  2073    19 |  288   1.19
   31 |  2391    50    51    87    44  1727  2560    50 |  288   1.68
 -----+-------------------------------------------------+--------------
 ALBH |     -    33    57     -     -     -     -    43 |  288   0.51
 ALGO |     -     -    12     X     -     -     -    10 |  288   0.04
 AMC2 |     -    29    53     -     -     -     -    29 |  288   0.08
 AOML |     -    44     -     -     -     -     -    38 |  277  28.15
 AREQ |     -     -    68    42    28     -     -    39 |  288  22.05
 ARTU |     -    23     -     -    23     -     -     - |  288  15.13
 ASC1 |     -    51     -    42    72     -     -    34 |  284    >>>
 AUCK |     -    97     -     X   128     -     -    59 |  264  15.03
 BAHR |     -    30    29    74    22     -     -    32 |  286   0.31
 BILI |     -    15     -     -    15     -     -     - |  286   8.87
 BJFS |     -     -   166     -   162     -     -     - |  281    >>>
 BOGT |     -     X     -    62     -     -     -    25 |  284  21.35
 BOR1 |     -     -    82     -     -     -     -    68 |  285   0.43
 BRMU |     -     -     -   229   107     -     -     - |   94    >>>
 BRUS |     -     -    38     -     -     -     -    32 |  286   0.13
 CAS1 |     -    50     -    51    99     -     -   126 |  288   8.13
 CEDU |     -   102     -     X     -     -     -    87 |  287  11.63
 CHAT |     -    42     -    51     -     -     -    38 |  287  13.32
 CHUR |     -    69    59     -     -     -     -    72 |  248   0.47
 COCO |     -    32     -    73    36     -     -    43 |  288  11.79
 CRO1 |     -    42    24     -     -     -     -    33 |  288  17.42
 DAVR |     -    95     -     -    35     -     -    90 |  288  17.39
 DRAO |     -    29    23     -     -     -     -    16 |  288   0.03
 DWH1 |     -     -    86     -     -     -     -    71 |  221   0.62
 FAIR |     -     -    19   118    28     -     -    27 |  288   0.15
 FORT |     -    41     -   117    31     -     -    56 |  288   0.18
 GODE |     -    31    63    97     -     -     -    37 |  288   0.16
 GOLD |     -    25     -   127     -     -     -    47 |  288  15.64
 GRAZ |     -     -    41   155     -     -     -    63 |  288    >>>
 GUAM |     -    32     -    59    24     -     -    29 |  288  14.64
 GUAT |     -    17     -     -    28     -     -    25 |  285    >>>
 HRAO |     -     -     -     -   106     -     -    90 |  279  23.07
 IISC |     -     -     -     -    47     -     -    40 |  266  34.48
 JPLM |     -     -    93     -     -     -     -    77 |  272  53.11
 KIRU |     -    44    89     -     -     -     -    42 |  288   8.96
 KOKB |     -    34   127     -    64     -     -    55 |  288   0.08
 KOUR |     -    45     -    45     -     -     -    30 |  288   1.47
 LPGS |     -    41     -    39     -     -     -    29 |  288  24.65
 MAC1 |     -    58     -    67    33     -     -    49 |  288  13.37
 MAS1 |     -    69    47    24    58     -     -    21 |  288   1.65
 MATE |     -     -     -   251     -     -     -   100 |  245   0.32
 MAW1 |     -    70     -     -    22     -     -    58 |  281  35.20
 MCM4 |     -    49     -     -    40     -     -    33 |  288  35.10
 MDO1 |     -     -    44   162   127     -     -    50 |  288 480.04
 MEDI |     -     -    46     -     -     -     -    38 |  286   0.14
 METS |     -    56    57     -     -     -     -    31 |  287   0.40
 MIZU |     -     -    50     -     -     -     -    42 |  277   0.61
 MKEA |     -    72     -    89    43     -     -    31 |  288  28.86
 NRC2 |     -    35    21    50    24     -     -    24 |  288   0.09
 NRIL |     -    18     -     -    18     -     -     - |  288  11.20
 NSSP |     -    29     -     -     -     -     -    25 |  286  20.87
 NYA1 |     -    72     -     -    55     -     -    32 |  287   0.15
 NYAL |     -     -    44   194     -     -     -    44 |  288   0.14
 OHI2 |     -    61     -     -    61     -     -     - |  288   8.11
 OS0G |     -     -    47    57    34     -     -    26 |  288   0.16
 PERT |     -    86    99    76    38     -     -    32 |  288   1.85
 PIE1 |     -     -    82    82     -     -     -    48 |  288  84.47
 PIMO |     -     -     -     -    48     -     -    41 |   73  16.26
 POL2 |     -    20     -     -     -     -     -    17 |  288  20.02
 POTS |     -    37     -    88    26     -     -    47 |  276  12.47
 RBAY |     -     -     -     -    53     -     -    45 |  280  30.16
 RIOG |     -    66     -    76    48     -     -    41 |  287  16.77
 SANT |     -    46     -     X     X     -     -    40 |  243   5.59
 SCH2 |     -    62    85     -     -     -     -    40 |  288  19.74
 SFER |     -    57    92     -     -     -     -    49 |  287   0.41
 STJO |     -     -    14     -     -     -     -    12 |  286  17.39
 SUTH |     -    26     -    76     -     -     -    21 |  288  23.29
 THU3 |     -    12     -     -    12     -     -     - |  288   8.99
 TIDB |     -    74    84    59    98     -     -     X |  279   0.10
 TRO1 |     -    54     -     -    27     -     -    64 |  288   9.95
 TROM |     -     -     -    69     -     -     -    28 |  284  10.76
 TSKB |     -    30    25    53    34     -     -    28 |  288   1.18
 URUM |     -    20     -     -     -     -     -    17 |  288  28.12
 USNO |     -    22    19     -     -     -     -    25 |  288   0.09
 USUD |     -    37    80    40     -     -     -    62 |  288  12.16
 VILL |     -    26     -    35     -     -     -    19 |  288   3.50
 WES2 |     -    98   101     -     -     -     -     - |  280   0.20
 WILL |     -     -    73     -     -     -     -    60 |  213 311.22
 WTZR |     -    59    52    57     -     -     -    21 |  288   0.23
 WUHN |     -     -     -    42    26     -     -    17 |  287  20.89
 YAKT |     -    21    23     -     -     -     -    11 |  288   0.66
 YAR2 |     -    42     -     -     -     -     -    35 |  286   4.56
 YELL |     -    23     -   212    34     -     -    86 |  288   0.12
 -----+-------------------------------------------------+--------------
 TOT  |  5129    62    64   108    61  3793  4898    50 |


 BEST CLOCK FIT: DRAO   288   0.03 (ns) 

