
 GPS week: 1213   Day: 5   MJD: 52740                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2776     14    -0.71     1.27     4.29     0.00
 cod |   288     0  23991    268    -0.69     1.03     0.06    21.83
 emr |   288     0  17361     30   829.46    39.23     0.07    18.86
 gfz |   288     0  16401    624    -0.78     0.16     0.07    19.08
 igu |    96     0   2492      0    -0.71     1.70     4.04     0.00
 jpl |   288     0  13097   1252     1.69    -2.09     0.07    17.16
 ngs |    96     0   2776     22    -0.60     1.08     4.13     0.00
 usn |   288     0  27900      0   503.84     8.06     0.05    23.07

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------+
    1 | -3854   -25   -44     9 -2150    82 -3427    20 |
    2 | -3648    42  -178    35  3844    26 -3099    66 |
    3 | -2974    67   -96    30  3002   -82 -2459    20 |
    4 | -2157     6  -116   193 -5215     1 -2093   -71 |
    5 |   674   117  -253    61  4913   197  -371   -31 |
    6 | -4656   153  -142    -6-10114    -3 -4192   -22 |
    7 |  -277    46  -122    69 -1152    97  -373   -35 |
    8 |  5545   109  -125    35  3173     X  4951   -30 |
    9 | -2656   175  -255    54  1693   113 -2176   -42 |
   10 |   367     8  -204    54   284   228   247    26 |
   11 |  1037   -94   333     4  -741  -204  1323  -121 |
   13 |  3826    -5   180   -31  2811   -43  4047  -102 |
   14 |  3263   183    17  -116   -71    64  3017  -115 |
   15 |  -265   102  -144   135  3994    19  -142   -98 |
   16 |  2688   138   140  -192  -112     X  2659   -93 |
   17 | -2746    68  -188   166     -   135 -3156  -100 |
   18 |  3241   108    16    85  1775    13  3269  -188 |
   20 |  2255  -160   200    12  1591   271  2429  -126 |
   21 | -2474  -289     -   258     -     X -1388    84 |
   22 | 21284    22  -243    -9 12157   133 20153   139 |
   23 | -5720    85  -317   188     -   238 -5117   -64 |
   24 | -1805    10  -143    89  5038    66 -1939     9 |
   25 | -2652   208  -134   -58  3469     4 -2582   -40 |
   26 | -1061   136  -217   133 -2299     1 -1162   -62 |
   27 |   605    50  -123    51-15541   118   466   -35 |
   28 | -1093    49   132   -47   150    -2  -929  -116 |
   29 |  -564   122  -226    66  -868    28  -428     4 |
   30 |  -221   160  -195   119 -2597   -81  -141   -61 |
   31 | -3089     4   -86    64 -7035   -47 -2967    30 |
 -----+-------------------------------------------------+
 ALBH |     -  -312   -50     -     -   235     -   168 |
 ALGO |     -   -89    36     -     -     -     -    54 |
 AOML |     -  -123     -     -     -    53     -    77 |
 AREQ |     -    18    44    17     -   -42     -   -36 |
 ARTU |     -   -36     -   -13     -    60     -     - |
 ASC1 |     -   246     -   -51     -     X     -  -191 |
 AUCK |     -    77     -     -     -     -     -   -73 |
 BJFS |     -     -   217  -215     -     -     -     - |
 BOGT |     -     -     -     -     -    76     -   -57 |
 BOR1 |     -     -   116     -     -     -     -   -95 |
 BRUS |     -     -    51     -     -   -26     -   -23 |
 CAS1 |     -    45     -   -73     -    53     -   -22 |
 CEDU |     -    29     -     -     -   -53     -    12 |
 CHAT |     -   -58     -     -     -     -     -    55 |
 CHUR |     -    44   103     -     -     -     -  -122 |
 COCO |     -    29     -    64     -  -107     -     - |
 CRO1 |     -     -   -34     -     -    45     -    -6 |
 DAVR |     -   -25     -    41     -     -     -    -7 |
 DRAO |     -    25    65     -     -     -     -   -76 |
 EISL |     -    44     -     -     -     -     -   -42 |
 FAIR |     -     -    -2  -111     -   100     -    19 |
 GODE |     -  -129    44     -     -     -     -    87 |
 GOLD |     -    70     -     -     -  -160     -    54 |
 GRAZ |     -     -    90     -     -     -     -   -74 |
 GUAM |     -     X     -     -     -  -216     -   161 |
 GUAT |     -     -     -     1     -     4     -    -3 |
 HOB2 |     -   -19    69     -     -     -     -   -36 |
 HOFN |     -     -     -     0     -     0     -     - |
 HRAO |     -    78     -   -75     -   -41     -    19 |
 IISC |     -   150     -  -195     -     -     -    21 |
 JPLM |     -     -    89  -155     -     -     -    56 |
 KERG |     -     -    49    97     -     -     -  -120 |
 KIRU |     -  -164   185     -     -     -     -     5 |
 KIT3 |     -     -     -     -     -   -58     -    43 |
 KOKB |     -     -    84  -131     -     -     -    41 |
 KOUR |     -    44     -     X     -     -     -   -42 |
 LPGS |     -   -67     -     -     -   -11     -    69 |
 MAC1 |     -  -105     -  -120     -   -84     -   263 |
 MADR |     -     -    34     -     -   -64     -    21 |
 MAS1 |     -   -20    95   -45     -    24     -   -40 |
 MAW1 |     -    47     -     -     -     9     -   -51 |
 MCM4 |     -   179     -     -     -     X     -  -169 |
 MDO1 |     -     -    63     -     -     -     -   -52 |
 METS |     -  -209   -45     -     -     -     -   236 |
 MIZU |     -     -   214     -     -  -279     -    61 |
 MKEA |     -     -     -   -69     -   -75     -   113 |
 NRC2 |     -   -14    76    -6     -     -     -   -44 |
 NRIL |     -    -4     -   -45     -    54     -     - |
 NSSP |     -  -143     -     -     -     -     -   135 |
 NYA1 |     -   -25     -     -     -     -     -    24 |
 NYAL |     -     -   157     -     -     -     -  -128 |
 OHI2 |     -    11     -   -99     -    96     -     - |
 OS0G |     -   -40   116    13     -     -     -   -68 |
 PERT |     -     -   169   -79     -   -72     -   -19 |
 PIE1 |     -   -32   101     -     -     X     -   -52 |
 POL2 |     -   -46     -     -     -     -     -    44 |
 POTS |     -   -95     -     -     -     -     -    90 |
 RBAY |     -     -     -  -219     -     -     -   182 |
 RIOG |     -    54     -   -57     -     -     -    -4 |
 SANT |     -   -14     -     -     -     -     -    13 |
 SCH2 |     -  -118    85     -     -     -     -    43 |
 SFER |     -  -250     9     -     -     -     -   228 |
 STJO |     -   -82    76     -     -     -     -    15 |
 SUTH |     -   -16     -     -     -     -     -    15 |
 THU3 |     -    27     -   -31     -     -     -     - |
 TLSE |     -   -45     -     -     -     -     -    43 |
 TRO1 |     -  -340     -    76     -     -     -   212 |
 TSKB |     -   -93   136     -     -     -     -   -24 |
 URUM |     -   -46     -     -     -     -     -    43 |
 USNO |     -   -46    96     -     -     -     -   -35 |
 VILL |     -    17     -     -     -     -     -   -16 |
 WILL |     -   -22     -     -     -     -     -    21 |
 WTZR |     -   -34     -     -     -     -     -    32 |
 WUHN |     -     -     -     X     -  -160     -   119 |
 YAKT |     -   -31    60     -     -   -91     -    49 |
 YAR2 |     -   -50     -     -     -     -     -    48 |
 YELL |     -    37     -     -     -     -     -   -35 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  5383    58    31    43  3460    95  5183    43 |  288   4.43
    2 |  3868    69    34    49  4185    76  4050    58 |  288   3.23
    3 |  4169    55    41    41  3126    83  4199    66 |  288   2.17
    4 |  1589    98    45    39  3697   111  1280   132 |  288   0.71
    5 |  9081    76    54    81  4381    60  8117    81 |  288   4.07
    6 | 12719    49    54    70  4839    75 11628    47 |  288  10.21
    7 |  1667    84    62    57  2011    79  1956    68 |  288   1.02
    8 |  3032    52    47    50  2105     X  2692    72 |  288   2.53
    9 |  2539    44    22    99  1405    66  2741    95 |  288   1.56
   10 |  3365   156    55    91  2696   158  3190    47 |  277   2.86
   11 |   641    48    62    42   433   170   698    41 |  288   0.35
   13 |  1611    81    47    55  1884    64  1723   132 |  288   0.59
   14 |  2173    65    26    87   446    94  1984    87 |  288   0.16
   15 |  4289    52    57    72  4437    40  4569    29 |  288   3.72
   16 |   851    74    56    46   433     X   822    75 |  288   0.25
   17 |  7479    61    34    61     -    74  7287    69 |  288   2.24
   18 |   770    63    46    49   400    71   824    47 |  288   0.36
   20 |   814    53    37    41   712    79   826    60 |  288   0.23
   21 |  3640    56     -   145     -     X  3579    75 |  288   0.87
   22 |  6961    84    91   120 10789   134  7501    87 |  288   7.05
   23 |  6077   108   148   169     -    88  6474    97 |  278   6.44
   24 |  2835    72    36    77  4295   106  2519    50 |  288   2.22
   25 |  1843    47    80    42  1457    87  1577    67 |  288   1.47
   26 |  2024    82    50    97  2233   152  1935    42 |  288   0.82
   27 |  1674    62    44    49 10890    73  1748    84 |  288   1.65
   28 |  1693    80    50    59  1255    69  1762    47 |  288   0.86
   29 |   755    48    49    39   978    71   801    72 |  288   0.44
   30 |   748    66    55    70  1905    70   930    42 |  288   0.59
   31 |  1433    52    29    28  4974   127  1394    68 |  288   0.82
 -----+-------------------------------------------------+--------------
 ALBH |     -    36    59     -     -    26     -    60 |  270  59.68
 ALGO |     -    23    25     -     -     -     -    38 |  288   0.03
 AOML |     -    22     -     -     -    34     -    23 |  288  32.20
 AREQ |     -    68   108    37     -    78     -    36 |  288  23.26
 ARTU |     -   141     -    82     -   103     -     - |  269  14.45
 ASC1 |     -    30     -    39     -     X     -    24 |  286    >>>
 AUCK |     -    14     -     -     -     -     -    13 |  264  12.77
 BJFS |     -     -   106   105     -     -     -     - |  278    >>>
 BOGT |     -     -     -     -     -    34     -    25 |  286  25.64
 BOR1 |     -     -    74     -     -     -     -    61 |  285   0.95
 BRUS |     -     -    47     -     -    30     -    30 |  288   0.07
 CAS1 |     -   103     -    52     -    29     -   126 |  288   8.04
 CEDU |     -    55     -     -     -    72     -    30 |  288  25.11
 CHAT |     -    24     -     -     -     -     -    23 |  285  11.82
 CHUR |     -    55    94     -     -     -     -    50 |  276   1.11
 COCO |     -    16     -    22     -    24     -     - |  288  11.26
 CRO1 |     -     -    38     -     -    47     -    62 |  288  20.97
 DAVR |     -    50     -    24     -     -     -    46 |  276  18.82
 DRAO |     -    19    24     -     -     -     -    15 |  288   0.07
 EISL |     -    21     -     -     -     -     -    20 |  227  27.26
 FAIR |     -     -    22    22     -    19     -    25 |  288   0.15
 GODE |     -    52   113     -     -     -     -    54 |  288   0.12
 GOLD |     -    27     -     -     -    40     -    19 |  288  18.63
 GRAZ |     -     -    38     -     -     -     -    31 |  283  33.73
 GUAM |     -     X     -     -     -   114     -    85 |  288  17.63
 GUAT |     -     -     -    28     -    23     -    28 |  287    >>>
 HOB2 |     -    29    62     -     -     -     -    40 |  288   0.09
 HOFN |     -     -     -    15     -    17     -     - |  287    >>>
 HRAO |     -    84     -    27     -    37     -    65 |  288  23.98
 IISC |     -    48     -    62     -     -     -    91 |  288  33.88
 JPLM |     -     -    45    31     -     -     -    52 |  288  25.72
 KERG |     -     -    52    48     -     -     -    52 |  282   1.42
 KIRU |     -    83   107     -     -     -     -    63 |  288  11.01
 KIT3 |     -     -     -     -     -    21     -    16 |  253  47.83
 KOKB |     -     -   103    59     -     -     -    63 |  288   0.10
 KOUR |     -    23     -     X     -     -     -    22 |  288   1.73
 LPGS |     -    39     -     -     -    35     -    24 |  264  26.30
 MAC1 |     -    25     -    26     -    33     -    27 |  288  14.09
 MADR |     -     -    75     -     -   124     -    75 |  273  16.64
 MAS1 |     -    37    39    52     -    37     -    49 |  285   1.36
 MAW1 |     -    46     -     -     -    37     -    28 |  287  30.83
 MCM4 |     -    52     -     -     -     X     -    49 |  245   7.89
 MDO1 |     -     -    70     -     -     -     -    57 |  288   8.63
 METS |     -    41    55     -     -     -     -    34 |  287   0.27
 MIZU |     -     -   182     -     -    77     -    90 |  252   0.36
 MKEA |     -     -     -    25     -    32     -    29 |  288  30.96
 NRC2 |     -    24    16    17     -     -     -    19 |  288   0.12
 NRIL |     -   108     -   125     -    41     -     - |  288  11.84
 NSSP |     -    19     -     -     -     -     -    18 |  286  16.83
 NYA1 |     -    24     -     -     -     -     -    23 |  286   0.06
 NYAL |     -     -    25     -     -     -     -    20 |  288   0.06
 OHI2 |     -    86     -    31     -    88     -     - |  288   8.27
 OS0G |     -    27    62    43     -     -     -    25 |  288   0.13
 PERT |     -     -   128    66     -    55     -    51 |  288   2.26
 PIE1 |     -    40    68     -     -     X     -    28 |  282   0.06
 POL2 |     -    23     -     -     -     -     -    22 |  284  15.93
 POTS |     -    32     -     -     -     -     -    30 |  262  14.24
 RBAY |     -     -     -   132     -     -     -   109 |  162  46.08
 RIOG |     -    42     -    30     -     -     -    45 |  286  14.45
 SANT |     -    39     -     -     -     -     -    37 |  288   7.08
 SCH2 |     -    62    77     -     -     -     -    37 |  288  16.87
 SFER |     -    44    89     -     -     -     -    44 |  287 376.38
 STJO |     -    36    14     -     -     -     -    37 |  288  46.73
 SUTH |     -    57     -     -     -     -     -    54 |  288  21.70
 THU3 |     -    33     -    38     -     -     -     - |  288   8.51
 TLSE |     -    30     -     -     -     -     -    28 |  284   0.54
 TRO1 |     -    70     -    34     -     -     -    64 |  285  16.90
 TSKB |     -    26    56     -     -     -     -    35 |  288   1.81
 URUM |     -    22     -     -     -     -     -    21 |  288  23.80
 USNO |     -    33    32     -     -     -     -    30 |  288   0.07
 VILL |     -    33     -     -     -     -     -    32 |  288   2.04
 WILL |     -    25     -     -     -     -     -    24 |  286   1.62
 WTZR |     -    20     -     -     -     -     -    19 |  287   0.13
 WUHN |     -     -     -     X     -    27     -    20 |  287  19.28
 YAKT |     -    21    27     -     -    35     -    31 |  288   0.75
 YAR2 |     -    21     -     -     -     -     -    20 |  226  45.88
 YELL |     -    15     -     -     -     -     -    14 |  288   0.09
 -----+-------------------------------------------------+--------------
 TOT  |  4293    58    66    65  4043    70  4127    55 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

