
 GPS week: 1213   Day: 2   MJD: 52737                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2772      0    -0.28     0.42     5.37     0.00
 cod |   288     0  21024      0     1.10    -1.34     0.05    34.22
 emr |   288     0  15505     63   714.43    38.30     0.06    24.26
 esa |   288     0  18177    668    -0.84     1.80     0.10    14.69
 gfz |   288     0  15606    334    -0.04     0.04     0.06    26.84
 igu |    96     0   2484      0    -0.32     0.46     4.35     0.00
 jpl |   288     0   9442      0   719.71   -19.95   489.65     0.00
 ngs |    96     0   2772      0    -0.29     0.48     5.28     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 | -3311   -30    51    97   -61  4626****** -3064     - |
    2 |  1502    -6   -65   144   -12  6790******   463     - |
    3 |  3907   -55   -36   190    -1 11035******  2519     - |
    4 |  -648   -25   -61  -175   182  2832******  -972     - |
    5 | -3473    -7  -210   132   132 -6762****** -1769     - |
    6 | -6959   147  -303    18    76   342****** -6586     - |
    7 |  -474    76  -121   159   -75 -1031******  -537     - |
    8 |  2260   -37   -42    94    34 -5594******  2202     - |
    9 | -5419    89  -316    -9   177  1230****** -6033     - |
   10 | -7176   154  -278     X    54 -1677****** -6690     - |
   11 |  3358   -96   359   -35  -184   402******  3455     - |
   13 |  4274   -10   162    55  -163  1881******  4223     - |
   14 |  4900    65    81  -220   -36   819******  4822     - |
   15 |  5757    96  -235     -    90 11582******  5089     - |
   16 |  2567    16   147    10  -166 -1985******  2459     - |
   17 |  1898    -7  -214     X   171 -8902******  2532     - |
   18 |  1418   -84   -54   -15   171   426******  1726     - |
   20 |  4368   -85   188   -22   -52  1749******  4431     - |
   21 | -6028   -43     -   306  -149     -     - -5204     - |
   22 | -2572   -28     5   125   -38 -2302****** -1823     - |
   23 |  1393    56  -390   200   191     -******  1238     - |
   24 |  3433   139  -208   -31    28  7673******  2329     - |
   25 |   381    75  -199    69    47 -1270******   529     - |
   26 |   645   105  -370    -5   204  -175******   459     - |
   27 | -1956   -40     8    64     9-17851****** -1874     - |
   28 |  6454    28   161   -79  -143  8050******  6594     - |
   29 | -4500   176  -321   -77   109     -****** -4309     - |
   30 | -5193    53  -237   152    57 -4952****** -5256     - |
   31 |  -893   -40    45    30    -7 -7783******  -976     - |
 -----+-------------------------------------------------------+
 ALBH |     -   -65    92     -     -     -******     -     - |
 ALGO |     -   -20   -10    63     -     -     -     -     - |
 AMC2 |     -  -106   150     -     -     -     -     -     - |
 AREQ |     -    70   -34    10   -63     -******     -     - |
 ARTU |     -    14     -     -   -18     -******     -     - |
 BAHR |     -     4   110    10  -110     -     -     -     - |
 CAS1 |     -   115     -  -137   -72     -******     -     - |
 CEDU |     -   -36     -    85     -     -******     -     - |
 CHAT |     -   -28     -    65     -     -     -     -     - |
 CHUR |     -  -246   347     -     -     -     -     -     - |
 COCO |     -    53     -  -234    60     -******     -     - |
 DAVR |     -    51     -     -   -65     -     -     -     - |
 DRAO |     -    15   -21     -     -     -     -     -     - |
 EISL |     -    -2     -    99   -52     -******     -     - |
 FAIR |     -     -     7   172   -89     -******     -     - |
 FORT |     -     -   -59    97     X     -     -     -     - |
 GODE |     -   -43   187  -206     -     -     -     -     - |
 GOLD |     -    45     -  -104     -     -******     -     - |
 GRAZ |     -  -139   215   -32     -     -     -     -     - |
 GUAM |     -    60     -  -140     -     -******     -     - |
 HOB2 |     -   -68   170  -405     -     -     -     -     - |
 IISC |     -    38     -   -88     -     -******     -     - |
 JPLM |     -     -    44     -   -39     -     -     -     - |
 KIRU |     -   -91   129     -     -     -     -     -     - |
 KOKB |     -   -96   136     -     -     -     -     -     - |
 KOUR |     -   -16     -    37     -     -     -     -     - |
 LPGS |     -    76     -  -177     -     -     -     -     - |
 MAC1 |     -   -10     -    39    -9     -******     -     - |
 MADR |     -   -65    91     -     -     -     -     -     - |
 MALI |     -     -     -   636  -348     -     -     -     - |
 MAS1 |     -   -49    44   168   -69     -     -     -     - |
 MKEA |     -     -     -   -98    54     -******     -     - |
 NRC2 |     -   -20   131  -281    61     -     -     -     - |
 NRIL |     -    26     -     -   -33     -******     -     - |
 NYAL |     -     -   -56    93     -     -     -     -     - |
 OHI2 |     -    39     -     -   -50     -******     -     - |
 OS0G |     -  -142    81   247   -27     -     -     -     - |
 PERT |     -   118   169  -353  -108     -     -     -     - |
 PIE1 |     -   -68   259  -252     -     -******     -     - |
 PIMO |     -     -     -   242  -132     -******     -     - |
 POTS |     -   -67     -   156     -     -     -     -     - |
 RESO |     -    58     -     -   -74     -     -     -     - |
 SANT |     -   -92     -   213     -     -     -     -     - |
 STJO |     -  -115   147     -    14     -     -     -     - |
 THTI |     -     -     -  -178    97     -     -     -     - |
 TIDB |     -    51     1    21   -78     -******     -     - |
 TIXI |     -    17     -     -   -22     -     -     -     - |
 TRO1 |     -  -115     -     -   147     -     -     -     - |
 TSKB |     -   -85   168   -79     -     -     -     -     - |
 USNO |     -   -38    53     -     -     -     -     -     - |
 VILL |     -   287     -  -669     -     -     -     -     - |
 WTZR |     -   -81     -   190     -     -     -     -     - |
 WUHN |     -     -     -  -340   186     -******     -     - |
 YAKT |     -   -23    33     -     -     -******     -     - |
 YELL |     -   -12     -    27     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5387    42    53    76    28  6013432080  5466     - |  288   3.99
    2 |  4735    72    45    41    52  3984392306  4324     - |  288   2.13
    3 |  5685    46    49    48    39  4619621240  4723     - |  288   2.13
    4 |  1382    53    31   241    85  1882621254  1599     - |  288   0.67
    5 | 10120    67    63    58    54  7145432084  9119     - |  288   7.39
    6 | 11237    38    38    55    28  5360421920 11348     - |  288  11.48
    7 |  1296    42    47   145    70  1386578268  1695     - |  288   0.46
    8 |  2593    50    57    46    46  5020432058  2773     - |  288   2.08
    9 |  9775    36    53    93    43  4921621271  9372     - |  288   2.93
   10 |  3727   125    53     X   151  1534598005  3846     - |  277   1.79
   11 |  1196    47    25    58    58   427578263  1285     - |  288   0.45
   13 |   705    45    54    53    37   684621242   868     - |  288   0.29
   14 |   857    41    48   114    41   533462410   958     - |  288   0.21
   15 |  4914    37    76     -    73  3529634994  5041     - |  287   2.89
   16 |  1941    67    60   145    75  1521621248  1879     - |  288   0.27
   17 |  6239    83   123     X    81  2689356153  6289     - |  260   2.66
   18 |  1261    28    55   178    41   636432086  1321     - |  288   0.34
   20 |   974    64    50   103    62   609462434  1099     - |  288   0.30
   21 | 10797   109     -   206   226     -     - 11797     - |  288   1.64
   22 | 10414    53   111   179    84  7437578359  9914     - |  288   7.74
   23 |  7920    87   100   153    83     -637262  7134     - |  288   5.87
   24 |  3734    45    60   157    47  5485432075  4067     - |  288   2.54
   25 |  3843    62    56   109    73  2941462425  3786     - |  288   2.47
   26 |  1638    37    64    54    41  1027421898  1457     - |  288   0.59
   27 |  1036    48    41    56    39 10346432057  1035     - |  288   1.31
   28 |  1424    69    41    46    65  4098578236  1444     - |  288   0.67
   29 |  1952    27    50    70    32     -627574  2159     - |  288   0.64
   30 |  3298    77    67    95    55  3796420315  3304     - |  288   0.66
   31 |  1717    39    66   185    50  5372621259  1837     - |  288   1.15
 -----+-------------------------------------------------------+--------------
 ALBH |     -    38    53     -     -     -469480     -     - |  280   0.13
 ALGO |     -    19    25    47     -     -     -     -     - |  288   0.05
 AMC2 |     -    32    45     -     -     -     -     -     - |  288   0.04
 AREQ |     -    33    77    40    37     -499791     -     - |  288  19.39
 ARTU |     -    20     -     -    26     -499777     -     - |  288  14.99
 BAHR |     -    33    42    44    25     -     -     -     - |  288   0.35
 CAS1 |     -    42     -    66    25     -499787     -     - |  288   8.48
 CEDU |     -    12     -    27     -     -418172     -     - |  176  12.83
 CHAT |     -    15     -    36     -     -     -     -     - |  287  13.09
 CHUR |     -    93   131     -     -     -     -     -     - |  150   1.26
 COCO |     -    18     -    86    53     -499759     -     - |  288  13.40
 DAVR |     -    16     -     -    21     -     -     -     - |  288  22.55
 DRAO |     -    20    28     -     -     -     -     -     - |  288   0.10
 EISL |     -    32     -    87    31     -499801     -     - |  288  82.96
 FAIR |     -     -    82   101    58     -487267     -     - |  274   0.52
 FORT |     -     -    47    77     X     -     -     -     - |  288   0.23
 GODE |     -    40    64    61     -     -     -     -     - |  288   0.09
 GOLD |     -    33     -    77     -     -499765     -     - |  288  18.95
 GRAZ |     -    48    94   189     -     -     -     -     - |  288  61.79
 GUAM |     -    48     -   111     -     -499744     -     - |  288  17.29
 HOB2 |     -    52    79   161     -     -     -     -     - |  281   0.08
 IISC |     -    18     -    41     -     -492871     -     - |  286  38.03
 JPLM |     -     -    77     -    70     -     -     -     - |  272  20.61
 KIRU |     -    27    38     -     -     -     -     -     - |  288  46.44
 KOKB |     -    58    81     -     -     -     -     -     - |  282   0.16
 KOUR |     -    10     -    23     -     -     -     -     - |  287   2.40
 LPGS |     -    22     -    52     -     -     -     -     - |  275  36.70
 MAC1 |     -    18     -    49    29     -499767     -     - |  288  16.40
 MADR |     -    91   128     -     -     -     -     -     - |  244  24.55
 MALI |     -     -     -   175    96     -     -     -     - |  202    >>>
 MAS1 |     -    28    25   101    35     -     -     -     - |  288   1.52
 MKEA |     -     -     -    41    23     -499764     -     - |  288  28.50
 NRC2 |     -    20    17    48    16     -     -     -     - |  288   0.08
 NRIL |     -    18     -     -    23     -682463     -     - |  133  14.73
 NYAL |     -     -    25    42     -     -     -     -     - |  288   0.08
 OHI2 |     -    28     -     -    36     -499790     -     - |  288   8.22
 OS0G |     -    37    62    69    25     -     -     -     - |  275   0.30
 PERT |     -    66   104    51    45     -     -     -     - |  288   3.77
 PIE1 |     -    45   117   115     -     -499775     -     - |  288   0.05
 PIMO |     -     -     -   113    62     -411779     -     - |  252  17.27
 POTS |     -    44     -   103     -     -     -     -     - |  276  12.60
 RESO |     -    12     -     -    15     -     -     -     - |  287   9.59
 SANT |     -    24     -    55     -     -     -     -     - |  288   8.70
 STJO |     -    32    63     -    24     -     -     -     - |  288  25.89
 THTI |     -     -     -    59    33     -     -     -     - |  281   9.12
 TIDB |     -    48    97    58    29     -499767     -     - |  288   0.11
 TIXI |     -    10     -     -    13     -     -     -     - |  278   9.06
 TRO1 |     -    21     -     -    26     -     -     -     - |  288  18.29
 TSKB |     -    37    45    81     -     -     -     -     - |  288   1.03
 USNO |     -    22    31     -     -     -     -     -     - |  288   0.08
 VILL |     -    30     -    71     -     -     -     -     - |  288   4.90
 WTZR |     -    20     -    47     -     -     -     -     - |  288   0.06
 WUHN |     -     -     -    39    21     -489574     -     - |  286  22.59
 YAKT |     -    19    26     -     -     -499775     -     - |  288   0.93
 YELL |     -    15     -    34     -     -     -     -     - |  287   0.15
 -----+-------------------------------------------------------+--------------
 TOT  |  5365    47    65    98    58  4353489652  5277     - |


 BEST CLOCK FIT: AMC2   288   0.04 (ns) 

