
 GPS week: 1210   Day: 0   MJD: 52714                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683      0     0.00     0.02     3.58     0.00
 cod |   288     0  24239    275    -0.26     0.15     0.07    24.12
 emr |   288     0  19983     11   675.00    39.91     0.08    20.55
 esa |   288     0  18727   2135    -0.70    -0.33     0.15     8.53
 gfz |   288     0  15876      0     0.09    -0.69     0.06    26.75
 igu |    96     0   2587      6    -0.04     0.32     3.42     0.00
 ngs |    96     0   2683      0     0.00     0.02     3.56     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29941    293   303.97    11.13     0.08    20.06

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  4393   106   -41  -186    -3  5855  3246     -   -19 |
    2 | -2495     X   -55   183    54  3611 -2160     -   -89 |
    3 | -4288   -42   -30   357   -17  3982 -4077     -   -48 |
    4 |   457    75  -144   -39   147  4526   621     -  -123 |
    5 | -7804   159  -147   121    -8 -4668 -7016     -   -92 |
    6 | -4291    45  -159   182   230 -1059 -4172     -  -265 |
    7 | -3071    40  -182    42   153 -1464 -3276     -   -80 |
    8 |  5733   101  -149    28    19   308  5738     -    -5 |
    9 | -3344   178  -236   255    14  -206 -3388     -  -100 |
   10 |   433    71   -96   279    14  3970   441     -  -134 |
   11 |  3542   -51   220    55   -91  1222  3392     -   -66 |
   13 |  3268    26    70  -173     3   196  3138     -   -52 |
   14 |  4808   152    80    28   -21  -910  4574     -  -248 |
   15 | -1602   151  -138     -    50   980 -1261     -  -107 |
   16 |  2230   -88   204   213    15     -  2261     -  -212 |
   17 | -1686   119  -154     X   165 -1027  -753     -  -206 |
   18 |  4735    -5    42   266   -15   781  4681     -  -130 |
   20 |  3342   -49   196    63     5  2448  3037     -  -175 |
   22 |  4750    20     6   171  -114  9481  4093     -    39 |
   23 | -2942   168  -102     X    47 -5878 -2261     -  -158 |
   24 |  3074   138  -136    49    71  8870  2707     -  -142 |
   25 |  -663   174    -5   151   -70 -1072  -697     -  -175 |
   26 | -1154    70  -173    37   150  3114 -1181     -  -122 |
   27 | -1882   142   -37    28  -116-18645 -1867     -    10 |
   28 |  -290    -4    44  -254   117 -6482  -328     -   -80 |
   29 | -2661   131  -198    99   112  -491 -2490     -  -146 |
   30 | -4181    91  -147    32   174 -1809 -4139     -  -207 |
   31 |  1424   -32   -42   417     8 -6692   997     -   -65 |
 -----+-------------------------------------------------------+
 ALBH |     -  -247    27     -     -     -     -     -   272 |
 AMC2 |     -  -196    86     -     -     -     -     -   149 |
 AOML |     -  -212     -     -     -     -     -     -   255 |
 AREQ |     -    95     1    17    -6     -     -     -  -113 |
 ARTU |     -    83     -     -   -75     -     -     -     - |
 ASC1 |     -   217     -  -468   -96     -     -     -     5 |
 AUCK |     -   120     -     X     -     -     -     -  -144 |
 BAHR |     -   -53   181   -42     -     -     -     -  -105 |
 BILI |     -   101     -     -   -91     -     -     -     - |
 BJFS |     -     -  -277     -     -     -     -     -   284 |
 BOGT |     -   180     -     -     -     -     -     -  -216 |
 BOR1 |     -    12    11     -     -     -     -     -   -26 |
 BRUS |     -  -206    63     -     -     -     -     -   183 |
 CAS1 |     -   -24     -    12    24     -     -     -    -7 |
 CEDU |     -   -20     -  -701     -     -     -     -   305 |
 CHAT |     -  -145     -    48     -     -     -     -   153 |
 CHUR |     -    21    91     -     -     -     -     -   -87 |
 COCO |     -    18     -  -286    87     -     -     -   -15 |
 CRO1 |     -    57    86     -     -     -     -     -  -151 |
 DAVR |     -    73     -     -   -22     -     -     -   -62 |
 DRAO |     -    40    99     -     -     -     -     -  -149 |
 DWH1 |     -     -   -75     -     -     -     -     -    77 |
 FAIR |     -     -   -45   264  -115     -     -     -    75 |
 FORT |     -     -     -     3     8     -     -     -   -12 |
 GODE |     -  -134    36   -25     -     -     -     -   136 |
 GOLD |     -     -     -  -189     -     -     -     -    81 |
 GRAZ |     -     -   107  -222     -     -     -     -   -31 |
 GUAM |     -    79     -  -100   -24     -     -     -    -7 |
 GUAT |     -     -     -     -  -398     -     -     -   530 |
 HOB2 |     -    76   102  -295     -     -     -     -   -70 |
 IRKT |     -     -    -4    11     -     -     -     -     - |
 JPLM |     -     -    85     -   -77     -     -     -    19 |
 KGN0 |     -     -  -327     -     -     -     -     -   335 |
 KIRU |     -  -172    58     -     -     -     -     -   144 |
 KOKB |     -     -    99     -   -22     -     -     -   -72 |
 KOSG |     -  -237     -     -     -     -     -     -   285 |
 KOUR |     -   -81     -   237     -     -     -     -    -4 |
 LPGS |     -   -67     -     X     -     -     -     -    81 |
 MAC1 |     -    58     -  -174  -130     -     -     -   177 |
 MAS1 |     -  -172   158   320   -21     -     -     -   -64 |
 MATE |     -     -     -   216     -     -     -     -   -92 |
 MAW1 |     -  -112     -     -   -67     -     -     -   228 |
 MCM4 |     -    63     -     -   147     -     -     -  -296 |
 MDO1 |     -    41    81  -610     -     -     -     -   128 |
 MEDI |     -     -    17     -     -     -     -     -   -17 |
 METS |     -  -172   121     -     -     -     -     -    84 |
 MIZU |     -     -  -112     -     -     -     -     -   115 |
 MKEA |     -    46     -  -310  -108     -     -     -   220 |
 NKLG |     -     -     -   294    49     -     -     -  -190 |
 NLIB |     -   -26    80     X     -     -     -     -   -50 |
 NRC2 |     -    25   136  -554   -69     -     -     -   160 |
 NTUS |     -  -135     -     -     -     -     -     -   162 |
 NYA1 |     -    16     -     -     -     -     -     -   -19 |
 NYAL |     -     -    96   131     -     -     -     -  -154 |
 OS0G |     -   -43   136    90   -13     -     -     -  -109 |
 PERT |     -     -   129     -   -11     -     -     -  -118 |
 PIE1 |     -   -37   134     1     -     -     -     -   -93 |
 POL2 |     -   -44     -     -     -     -     -     -    53 |
 POTS |     -  -220     -   111     -     -     -     -   219 |
 RBAY |     -     -     -     -   -49     -     -     -    65 |
 RIOG |     -   112     -     -    -7     -     -     -  -125 |
 SANT |     -    95     -     X     -     -     -     -  -114 |
 SCH2 |     -    -4  -131     -     -     -     -     -   131 |
 SELE |     -     -     -  -172     -     -     -     -    73 |
 SFER |     -     -  -108     -     -     -     -     -   111 |
 STJO |     -  -139    42     -     -     -     -     -   125 |
 SUTH |     -  -200     -    47     -     -     -     -   223 |
 THU3 |     -    43     -     -   -39     -     -     -     - |
 TRO1 |     -  -110     -     -   -17     -     -     -   156 |
 TROM |     -     -     -  -158     -     -     -     -    67 |
 TSKB |     -     -   104  -250     -     -     -     -     - |
 TWTF |     -     -  -439     -     -     -     -     -   450 |
 URUM |     -   112     -     -   -76     -     -     -   -33 |
 USN1 |     -     -   184     -     -     -     -     -  -189 |
 USNO |     -    16    83     -     -     -     -     -  -104 |
 USUD |     -     -   -24    96     -     -     -     -   -17 |
 VILL |     -   -65     -     -     -     -     -     -    79 |
 WILL |     -  -159   112     -     -     -     -     -    80 |
 WSRT |     -  -151   245     -     -     -     -     -   -70 |
 WTZR |     -  -103   201   124     -     -     -     -  -135 |
 WUHN |     -     -  -225   207   107     -     -     -     X |
 YAR2 |     -  -112     -     -     -     -     -     -   135 |
 YELL |     -    80     -  -137     -     -     -     -   -44 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6034    49    60   213    35  4911  6153     -    69 |  288   3.83
    2 |  3499     X    93   229   110  2808  3185     -   118 |  275   2.61
    3 |  2942    57    76   224    38  2306  2934     -    55 |  288   1.83
    4 |  2724    37   122    94   116  2891  2529     -    68 |  288   0.75
    5 |  3991   154    70   152   116  3629  3470     -    42 |  288   2.62
    6 |  7632    47    71   276    40  2154  7835     -    45 |  288   7.87
    7 |  2584    58    49   212    78   906  2195     -    57 |  288   0.50
    8 |  4286    81    42   186    43  1736  4211     -    73 |  288   2.78
    9 |  1892    56    35    56    32  1275  2085     -    59 |  288   1.94
   10 |  1657    76    21   146    72  3240  1685     -    40 |  288   1.40
   11 |   816    62    54   225    53  1191   786     -    28 |  288   0.42
   13 |  1451    55    34   211    60   535  1434     -   117 |  288   0.22
   14 |   863    49    48    93    50   609   736     -    62 |  288   0.23
   15 |  3208    56    39     -    34  2283  3315     -    55 |  288   1.81
   16 |  1298    50   101   171    71     -  1248     -    46 |  288   0.41
   17 |  3475    67    47     X    44  1732  3165     -   131 |  288   1.51
   18 |  1749    60    53   156    48   664  1608     -    62 |  288   0.43
   20 |  1186    74    49    88    31   925  1222     -    67 |  288   0.27
   22 |  8119   198   144    96    43  6168  8731     -   173 |  288   8.15
   23 |  7613    42    29     X    48  2715  6883     -    62 |  288   6.86
   24 |  2471    51    27   168    62  4419  2482     -    44 |  288   1.85
   25 |  2381    83    55   148    80  2616  2490     -    53 |  288   2.30
   26 |  1302    67    60   170    45  1340  1176     -    97 |  288   0.55
   27 |  1110    75    45   250    28 10825   939     -    71 |  288   1.08
   28 |  2874    74    41   115    23  3671  2885     -    60 |  288   0.50
   29 |  1863    58    40    83    34  1111  1802     -    57 |  288   1.04
   30 |   822   116   119   160    92  1006   766     -    76 |  288   0.91
   31 |  3000    54    34   181    41  5354  3364     -    49 |  288   1.09
 -----+-------------------------------------------------------+--------------
 ALBH |     -    59   103     -     -     -     -     -    50 |  288   0.28
 AMC2 |     -    61    54     -     -     -     -     -    96 |  288   0.04
 AOML |     -    35     -     -     -     -     -     -    43 |  285  36.30
 AREQ |     -    58    38   117    27     -     -     -    71 |  288  25.85
 ARTU |     -    16     -     -    14     -     -     -     - |  287  17.00
 ASC1 |     -    36     -   219    25     -     -     -    70 |  288    >>>
 AUCK |     -    45     -     X     -     -     -     -    54 |  264   8.31
 BAHR |     -    45    40   184     -     -     -     -    42 |  288   0.92
 BILI |     -    37     -     -    33     -     -     -     - |  285  10.31
 BJFS |     -     -    86     -     -     -     -     -    88 |  194    >>>
 BOGT |     -    51     -     -     -     -     -     -    61 |  284  29.70
 BOR1 |     -    61   124     -     -     -     -     -    77 |  288   0.41
 BRUS |     -    35    53     -     -     -     -     -    47 |  288   0.06
 CAS1 |     -    76     -   187   142     -     -     -   227 |  288   7.53
 CEDU |     -    41     -   100     -     -     -     -    62 |  288  12.57
 CHAT |     -    59     -   161     -     -     -     -    25 |  275   8.87
 CHUR |     -    47    75     -     -     -     -     -    67 |  284   0.65
 COCO |     -    17     -    94    23     -     -     -    39 |  288   9.87
 CRO1 |     -    99   150     -     -     -     -     -    74 |  286  19.92
 DAVR |     -   103     -     -    42     -     -     -   174 |  288  20.98
 DRAO |     -    34    20     -     -     -     -     -    39 |  288   0.08
 DWH1 |     -     -    74     -     -     -     -     -    75 |  267   0.97
 FAIR |     -     -    76   276    31     -     -     -    42 |  283   0.48
 FORT |     -     -     -   110    34     -     -     -    58 |  288   0.07
 GODE |     -    43   126   123     -     -     -     -    55 |  288   0.22
 GOLD |     -     -     -   133     -     -     -     -    57 |  280  25.42
 GRAZ |     -     -    92   213     -     -     -     -    81 |  286  15.31
 GUAM |     -   160     -    91    73     -     -     -    71 |  288  18.65
 GUAT |     -     -     -     -    33     -     -     -    44 |  286    >>>
 HOB2 |     -    42    54   113     -     -     -     -    33 |  288   0.09
 IRKT |     -     -    42   102     -     -     -     -     - |  282   0.26
 JPLM |     -     -   206     -    65     -     -     -   137 |  288  19.24
 KGN0 |     -     -   119     -     -     -     -     -   122 |  283   0.24
 KIRU |     -   144    76     -     -     -     -     -   103 |  274   9.09
 KOKB |     -     -   115     -    60     -     -     -    50 |  288   0.07
 KOSG |     -    37     -     -     -     -     -     -    45 |  286  39.25
 KOUR |     -    51     -   123     -     -     -     -    95 |  288   2.69
 LPGS |     -    51     -     X     -     -     -     -    62 |  262  95.80
 MAC1 |     -    99     -   142    72     -     -     -   214 |  288  13.17
 MAS1 |     -    28    18   106    33     -     -     -    45 |  288   2.15
 MATE |     -     -     -    51     -     -     -     -    22 |  268   0.14
 MAW1 |     -    56     -     -    47     -     -     -   107 |  288  36.76
 MCM4 |     -    44     -     -    55     -     -     -   104 |  287  64.88
 MDO1 |     -    44    45   106     -     -     -     -    40 |  288  27.98
 MEDI |     -     -    34     -     -     -     -     -    35 |  286   0.25
 METS |     -    65    72     -     -     -     -     -    29 |  287   1.19
 MIZU |     -     -    76     -     -     -     -     -    78 |  272   0.60
 MKEA |     -    60     -   166    88     -     -     -   111 |  288  42.25
 NKLG |     -     -     -   131    29     -     -     -    79 |  287 188.71
 NLIB |     -    96    94     X     -     -     -     -   130 |  283   0.13
 NRC2 |     -    55    31    71    26     -     -     -    24 |  288   0.02
 NTUS |     -    51     -     -     -     -     -     -    62 |  288   8.37
 NYA1 |     -    52     -     -     -     -     -     -    63 |  273   0.23
 NYAL |     -     -    19    80     -     -     -     -    40 |  288   0.21
 OS0G |     -    54    74    70    36     -     -     -    33 |  288   0.30
 PERT |     -     -   101     -    82     -     -     -   148 |  261    >>>
 PIE1 |     -    43    78    98     -     -     -     -    58 |  288   0.04
 POL2 |     -    26     -     -     -     -     -     -    31 |  282  22.88
 POTS |     -    23     -   137     -     -     -     -    67 |  278  12.29
 RBAY |     -     -     -     -   187     -     -     -   250 |  260 810.82
 RIOG |     -    81     -     -    28     -     -     -    86 |  285  12.06
 SANT |     -   101     -     X     -     -     -     -   121 |  277  10.75
 SCH2 |     -    46    78     -     -     -     -     -    36 |  288   4.95
 SELE |     -     -     -   103     -     -     -     -    44 |  286  38.66
 SFER |     -     -   117     -     -     -     -     -   120 |  284   0.44
 STJO |     -    40    31     -     -     -     -     -    30 |  288   5.70
 SUTH |     -    60     -    86     -     -     -     -    64 |  288  24.70
 THU3 |     -    43     -     -    38     -     -     -     - |  286   9.00
 TRO1 |     -    55     -     -    42     -     -     -    66 |  288   9.89
 TROM |     -     -     -   105     -     -     -     -    44 |  248   9.28
 TSKB |     -     -    37    89     -     -     -     -     - |  288   0.96
 TWTF |     -     -    81     -     -     -     -     -    83 |  286   0.27
 URUM |     -    26     -     -    35     -     -     -    30 |  288  24.15
 USN1 |     -     -    93     -     -     -     -     -    95 |  282   0.11
 USNO |     -    47    24     -     -     -     -     -    41 |  288   0.03
 USUD |     -     -   144   146     -     -     -     -    99 |  288  14.90
 VILL |     -    34     -     -     -     -     -     -    41 |  288   2.06
 WILL |     -    40    74     -     -     -     -     -    49 |  288   0.88
 WSRT |     -    30    48     -     -     -     -     -    35 |  288   0.04
 WTZR |     -    49    51    73     -     -     -     -    30 |  288   0.07
 WUHN |     -     -   127   136    67     -     -     -     X |  287  23.08
 YAR2 |     -    21     -     -     -     -     -     -    25 |  286   6.64
 YELL |     -   185     -   293     -     -     -     -   199 |  288   0.08
 -----+-------------------------------------------------------+--------------
 TOT  |  3578    69    78   153    62  3423  3557     -    84 |


 BEST CLOCK FIT: NRC2   288   0.02 (ns) 

