
 GPS week: 1203   Day: 3   MJD: 52668                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2577     14    -0.47     0.70     4.32     0.00
 cod |   288     0  20820     37    -0.69     0.57     0.08    16.42
 emr |   288     0  17734     77    -9.13    49.39     0.07    19.15
 esa |   288     0  14743    917     0.70    -0.61     0.12     9.42
 gfz |   288     0  14894     59     0.08    -0.66     0.04    30.59
 igu |    96     0   2481      0    -0.91     1.15     3.78     0.00
 jpl |   288     0  11970    320     1.15    -2.37     0.05    24.43
 ngs |    96     0   2577      9    -0.78     1.04     4.25     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 | -9269  -191   -17    52   153 -6010   -85 -7394     - |
    2 | -1988  -250  -106    76   235 -1032  -248 -2164     - |
    3 | -1031  -141  -192   -68   109  4205   155  -323     - |
    4 | -2771   135  -109     X   -40 -1543   385 -2874     - |
    5 |  -345    54  -112   235    89   291  -153  -600     - |
    6 | -1174    62  -256   240    54  8025    12 -1548     - |
    7 |  1595    21  -142    38    66  -978     X  1663     - |
    8 |  -355    -7     5   145    80   543  -178  -287     - |
    9 | -2229   123  -173    57   -50  -726   103 -1798     - |
   10 | -3051    89   -77    21    43  1898  -416 -2939     - |
   11 |  6438  -105    20    89    43  3381   -38  6134     - |
   13 |  4088   -48    -4   -17  -182   821   315  3942     - |
   14 |  3805    31   -14   258   -88  1875     2  3579     - |
   15 |  -311   232    28     -    41 17932  -265  -318     - |
   17 |  -242    70  -189     X    53 -8960     - -1349     - |
   18 |  4568    22    21   232   -96   577    -2  4717     - |
   20 |  6194  -119   -17   112    89  2510   -71  6119     - |
   22 |-10788   129   216     -   100     -  -408-10496     - |
   23 |  3688   226  -190   142   -45 11944   -11  3883     - |
   24 |  3184   123  -127     X     5  5948    73  2532     - |
   25 |   827    42  -130   218   -28 -4705   179   209     - |
   26 |   140    74  -217  -153  -102   752   361   144     - |
   27 |  1406  -161  -180    -6   198-18443    41  1121     - |
   28 | -4038    69   116  -180   -48 -3116   -63 -2977     - |
   29 |  4252     -  -227  -189    36 -1740   240  4276     - |
   30 | -4018   -12  -217   -74   -72 -3735   347 -3944     - |
   31 |  -203  -135  -142     2   154 -9377    58  -367     - |
 -----+-------------------------------------------------------+
 ALBH |     -    -7    16     -     -     -    -8     -     - |
 ALGO |     -   221   322  -738     -     -  -117     -     - |
 AMC2 |     -   -53   212     -     -     -  -129     -     - |
 AREQ |     -     -    61  -117    42     -   -55     -     - |
 ARTU |     -     -     -     -  -174     -   218     -     - |
 AUCK |     -   -32     -    56     -     -     -     -     - |
 BAHR |     -   -55    27    41     -     -     -     -     - |
 BILI |     -    73     -     -   -39     -     -     -     - |
 BOR1 |     -    17   -15     -     -     -     -     -     - |
 BRUS |     -     -   -24     -     -     -    19     -     - |
 CAS1 |     -    -8     -     -    27     -   -28     -     - |
 CHAT |     -    14     -   -25     -     -     -     -     - |
 COCO |     -     9     -     4    20     -   -33     -     - |
 CRO1 |     -     -   122     -     0     -   -96     -     - |
 DRAO |     -   -21    18     -     -     -     -     -     - |
 FAIR |     -     -    62  -163    -1     -    16     -     - |
 FORT |     -     -    23  -385    82     -    28     -     - |
 GODE |     -  -115   103    -4     -     -     -     -     - |
 GOLD |     -    70     -  -145     -     -    10     -     - |
 GUAM |     -  -231     -   689     -     -  -106     -     - |
 HOB2 |     -    18   306  -158     -     -  -174     -     - |
 HRAO |     -     9     -     -     -     -    -6     -     - |
 IRKT |     -     -   -42    84     -     -     -     -     - |
 JAB1 |     -   -59     -     -     -     -    40     -     - |
 JPLM |     -     -    20     -   -13     -     -     -     - |
 KARR |     -   -37     -     -    20     -     -     -     - |
 KERG |     -     -    18     -   -11     -     -     -     - |
 KIRU |     -  -117   100     -     -     -     -     -     - |
 KOKB |     -  -101    38     -    30     -     -     -     - |
 LPGS |     -     -     -  -267     -     -   103     -     - |
 MAC1 |     -    -3     -   303   -91     -     -     -     - |
 MAS1 |     -     -   114   -88   -45     -     -     -     - |
 MAW1 |     -   137     -     -   -84     -    13     -     - |
 MCM4 |     -   -39     -     -    21     -     X     -     - |
 MDO1 |     -   -61    52     -     -     -     -     -     - |
 MKEA |     -    47     -     -   -18     -    -8     -     - |
 NLIB |     -     -   289     -     -     -  -226     -     - |
 NRC2 |     -   158    39   267  -111     -  -100     -     - |
 NRIL |     -     -     -     -  -146     -   183     -     - |
 OS0G |     -     -   -33    66     -     -     -     -     - |
 PETP |     -    -8     -     -     -     -     6     -     - |
 PIE1 |     -    25   -51     -     -     -    21     -     - |
 PIMO |     -     -     -     -  -463     -   579     -     - |
 POTS |     -   -89     -   156     -     -     -     -     - |
 PRDS |     -   -29    25     -     -     -     -     -     - |
 RBAY |     -    56     -     -   -30     -     -     -     - |
 RIOG |     -    44     -    37   -34     -     -     -     - |
 SCH2 |     -   -15    13     -     -     -     -     -     - |
 SELE |     -   111     -  -191     -     -     0     -     - |
 SFER |     -  -136   116     -     -     -     -     -     - |
 STJO |     -   -53   109     -   -40     -     -     -     - |
 TLSE |     -   -90    77     -     -     -     -     -     - |
 TRO1 |     -    36     -     -   -19     -     -     -     - |
 TROM |     -     -     -   858     -     -  -331     -     - |
 TSKB |     -   -81    87   -36     -     -     -     -     - |
 USUD |     -   -97    52   115     -     -   -18     -     - |
 VILL |     -   235     -  -410     -     -     -     -     - |
 WES2 |     -   -20    17     -     -     -     -     -     - |
 WSRT |     -  -137   117     -     -     -     -     -     - |
 WTZR |     -  -126    89    39     -     -     -     -     - |
 WUHN |     -     -     4  -233    69     -     -     -     - |
 YAKT |     -  -170    82     -     -     -    50     -     - |
 YAR2 |     -     7     -     -     -     -    -5     -     - |
 YELL |     -   236     -  -411     -     -     -     -     - |
 ZWEN |     -    93     -     -   -50     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6761    88    54   150    25  3422    43  7219     - |  288   5.32
    2 |  2799    91    74    98    38  1621   103  2867     - |  288   2.60
    3 |  4927    43    70    84    46  3163    77  4486     - |  288   1.82
    4 |  2083   136    70     X    43   857   161  1960     - |  277   0.66
    5 |  4647    62    76   142    27  3320    53  4164     - |  288   3.81
    6 |  8382    65    41   149    50  4159    56  8355     - |  288   7.53
    7 |  1098    48    36   232    55   805     X  1199     - |  288   0.43
    8 |  3497   127    85   180    36  3023    74  3627     - |  286   2.78
    9 |  1945   131    39   147    43  1921    56  2316     - |  287   1.94
   10 |  2690    74    31    47    32  2275    86  2881     - |  288   2.43
   11 |   985    52    58   226    60  1608    42  1108     - |  288   0.32
   13 |  1445   112    43   199    21   688    58  1428     - |  288   0.34
   14 |  1258    68    68   125    37   651    55  1121     - |  288   0.25
   15 |  6209   211    67     -    39  9233    87  5897     - |  277   3.30
   17 |  6492   166   197     X    58  1833     -  5644     - |  277   1.40
   18 |  1256    51    50   121    54   438    51  1190     - |  288   0.26
   20 |   894    56    74   111    57  1144    48   890     - |  288   0.23
   22 |  9848   131    73     -    58     -    48  9179     - |  286   7.68
   23 |  7566    74    51    72    27  5887    25  7530     - |  288   6.61
   24 |  4624   150    56     X    44  4756    91  5190     - |  278   3.24
   25 |  4788   172    74   144   139  2770    81  5064     - |  287   1.34
   26 |   854    78    74   104    42   746    59   925     - |  288   0.66
   27 |  2664   129    63   125    58 10175    60  2647     - |  286   1.00
   28 |  3964    48    31    53    26  1468    78  3535     - |  288   0.97
   29 |  2124     -    80   101    38  1463    49  2092     - |  288   0.57
   30 |  1924    53    32    85    30  2705    54  1817     - |  288   0.86
   31 |  2468    76    37   106    78  5500    60  2293     - |  288   1.08
 -----+-------------------------------------------------------+--------------
 ALBH |     -    54   101     -     -     -    98     -     - |  288    >>>
 ALGO |     -    37    19    50     -     -    28     -     - |  288   0.08
 AMC2 |     -    37    81     -     -     -    53     -     - |  288   0.03
 AREQ |     -     -    33    72    20     -    32     -     - |  288  19.18
 ARTU |     -     -     -     -    12     -    15     -     - |  284  17.48
 AUCK |     -   134     -   234     -     -     -     -     - |  188  17.10
 BAHR |     -    58    27    95     -     -     -     -     - |  288   0.64
 BILI |     -    16     -     -     8     -     -     -     - |  287  10.47
 BOR1 |     -    51    44     -     -     -     -     -     - |  288   0.43
 BRUS |     -     -   133     -     -     -   104     -     - |  287   0.10
 CAS1 |     -    80     -     -    47     -    24     -     - |  288   8.60
 CHAT |     -    54     -    93     -     -     -     -     - |  287  14.90
 COCO |     -    50     -    94    26     -    39     -     - |  288  11.54
 CRO1 |     -     -    32     -    16     -    17     -     - |  288  22.91
 DRAO |     -    26    22     -     -     -     -     -     - |  288   0.20
 FAIR |     -     -    49   146    55     -    46     -     - |  279   0.33
 FORT |     -     -    39   108    36     -    34     -     - |  288   0.08
 GODE |     -    40    48    43     -     -     -     -     - |  287   0.15
 GOLD |     -   108     -    85     -     -    53     -     - |  288  21.07
 GUAM |     -    28     -    69     -     -    26     -     - |  221  15.44
 HOB2 |     -   115   147    55     -     -    48     -     - |  288   0.11
 HRAO |     -    32     -     -     -     -    21     -     - |  287   2.49
 IRKT |     -     -    40    81     -     -     -     -     - |  285   0.35
 JAB1 |     -    33     -     -     -     -    22     -     - |  288  38.23
 JPLM |     -     -    89     -    56     -     -     -     - |  279  23.53
 KARR |     -    54     -     -    29     -     -     -     - |  288  14.45
 KERG |     -     -    18     -    11     -     -     -     - |  287   1.28
 KIRU |     -    32    27     -     -     -     -     -     - |  232   1.84
 KOKB |     -    31    28     -    23     -     -     -     - |  288   0.04
 LPGS |     -     -     -   190     -     -    73     -     - |  180  24.29
 MAC1 |     -   100     -   186    29     -     -     -     - |  287  15.77
 MAS1 |     -     -    27    47    19     -     -     -     - |  288   4.23
 MAW1 |     -    97     -     -    38     -    78     -     - |  287  25.77
 MCM4 |     -    91     -     -    49     -     X     -     - |  286  27.90
 MDO1 |     -    29    25     -     -     -     -     -     - |  286  31.30
 MKEA |     -    44     -     -    27     -    30     -     - |  288  28.91
 NLIB |     -     -   168     -     -     -   131     -     - |  179   0.49
 NRC2 |     -    47    20    62    22     -    29     -     - |  288   0.06
 NRIL |     -     -     -     -    44     -    55     -     - |  257  16.51
 OS0G |     -     -    75   152     -     -     -     -     - |  286   0.38
 PETP |     -    17     -     -     -     -    11     -     - |  287  12.77
 PIE1 |     -    30    51     -     -     -    34     -     - |  288   0.05
 PIMO |     -     -     -     -    19     -    24     -     - |  122  11.06
 POTS |     -    18     -    32     -     -     -     -     - |  288  18.83
 PRDS |     -    45    39     -     -     -     -     -     - |  280   2.24
 RBAY |     -    25     -     -    13     -     -     -     - |  284  77.55
 RIOG |     -    89     -    83    31     -     -     -     - |  288  11.73
 SCH2 |     -    46    40     -     -     -     -     -     - |  248   9.53
 SELE |     -    38     -    48     -     -    31     -     - |  287  62.84
 SFER |     -    60    51     -     -     -     -     -     - |  282   0.49
 STJO |     -    36    32     -    20     -     -     -     - |  288   0.09
 TLSE |     -    68    58     -     -     -     -     -     - |  287   0.57
 TRO1 |     -    31     -     -    17     -     -     -     - |  288  13.42
 TROM |     -     -     -    19     -     -     7     -     - |  133  11.56
 TSKB |     -    32    23    61     -     -     -     -     - |  288   1.51
 USUD |     -    33    70    89     -     -    31     -     - |  288  16.72
 VILL |     -    99     -   172     -     -     -     -     - |  259  10.95
 WES2 |     -    57    49     -     -     -     -     -     - |  280   0.06
 WSRT |     -    90    77     -     -     -     -     -     - |  288   0.11
 WTZR |     -    53    82    82     -     -     -     -     - |  288   0.09
 WUHN |     -     -   148   114    62     -     -     -     - |  287  21.95
 YAKT |     -    43    85     -     -     -    42     -     - |  288   0.58
 YAR2 |     -    74     -     -     -     -    50     -     - |  288   3.77
 YELL |     -   102     -   178     -     -     -     -     - |  284   0.13
 ZWEN |     -    38     -     -    21     -     -     -     - |  288  20.56
 -----+-------------------------------------------------------+--------------
 TOT  |  4323    79    68   121    43  3778    54  4250     - |


 BEST CLOCK FIT: AMC2   288   0.03 (ns) 

