
 GPS week: 1196   Day: 6   MJD: 52622                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2585     93    -0.05     0.05     5.24     0.00
 cod |   288     0  25491    265    -6.20     5.72     0.06    19.67
 emr |   288     0  14461     12  1734.41    13.56     0.07    17.34
 esa |   288     0  18433   1235    -0.86     1.38     0.10    10.58
 gfz |   288     0  15815    314     0.04    -0.38     0.08    13.87
 igu |    96     0   2491     32    -7.26     1.29     4.78     0.00
 jpl |   288     0  14067    826    -1.00    -1.42     0.05    27.49
 ngs |    96     0   2585     86    -2.32     2.83     5.11     0.00
 usn |   288     0  27477   3093   415.50   -51.65     0.10    11.06

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |  2508    13  -137   460   156  5113  -100  1809  -297 |
    2 |  3891  -107    27   178   312  4988   -91  3361  -295 |
    3 |  4484   -88  -141   176   238 12077   225  4597  -378 |
    4 | -5780    45  -253   -94  -132 -2150   442 -5273     X |
    5 | -5745   164  -240   163   205   995  -215 -4380   -50 |
    6 |   -31    91  -213   -26   283  5741    99   248  -288 |
    7 | -2178   189  -132   136   199 -3040  -392 -1979     X |
    8 |  2129   139    17   155  -116 -1798  -185  1828   -54 |
    9 |  3968    39  -250   155   -67   965   199  3421     X |
   10 | -1922   241   -25   389    64 -4103  -624 -1397  -116 |
   11 |  2964  -102   165    96    17  -170   109  3020  -397 |
   13 |  2920    20     1  -198  -199 -3434   548  3383  -302 |
   14 |   786   -50    89    -3   -50 -1323    39  1126   -35 |
   15 |  4441    74    -8     -   100  8621  -225  3342    23 |
   17 | -4000   270   -32     X   105 -6322  -361 -3964   -91 |
   18 |  4040    72   -30   259  -246   570    94  4392   -84 |
   20 |  3801    56    23   107  -114  -345   -74  3875     X |
   22 |-37269  -240   142   309   694 24938  -674-30828  -106 |
   23 | -1752   208  -108    -5    36 -3818   -20 -1479  -234 |
   24 | -1554   135  -162    -5   -34  5103    52 -1693     X |
   25 |  3312  -194   -53   -91   330  4432   308  2614  -262 |
   26 |   968    87  -311  -106  -143   262   555  1080   -86 |
   27 |   442   -42    -6    27    57-17414   146   838  -185 |
   28 |  -216    34    62     2  -101 -2582   -20   255    -9 |
   29 | -6313   -17  -317   -47   107     -   351 -6133     X |
   30 | -4067   -25  -244     3    46 -5708   463 -3518  -180 |
   31 | -5934  -157    36   152   290-12790   -15 -6263  -269 |
 -----+-------------------------------------------------------+
 ALBH |     -   -64   118  -240     -     -     0     -   165 |
 ALGO |     -   -42   147     X     -     -   -38     -   -61 |
 AMC2 |     -   -67   114     -     -     -  -174     -   375 |
 AOML |     -  -113     -     -     -     -     -     -   201 |
 ARTU |     -    33     -   -51    -9     -     -     -     - |
 AUCK |     -   -43     -     2     X     -     -     -    74 |
 BAHR |     -    37    73   -14    35     -   -25     -  -148 |
 BILI |     -    54     -     -  -113     -    19     -     - |
 BJFS |     -     -     -     -  -308     -     -     -   387 |
 BOGT |     -   184     -  -340     -     -    49     -  -121 |
 BOR1 |     -   -20     -     -     -     -     -     -    36 |
 BRMU |     -   205     -  -552   134     -     -     -     X |
 CHAT |     -   -69     -    31  -116     -     -     -   238 |
 CHUR |     -    16    81     -     -     -     -     -  -124 |
 CRO1 |     -     -   207     -     -     -   -39     -  -196 |
 DAEJ |     -  -292   331     -     -     -     -     -     X |
 DRAO |     -   -22    77     -     -     -     -     -   -83 |
 EISL |     -     -     -   194  -229     -   -15     -   139 |
 FAIR |     -     -    43    63  -121     -   -10     -    48 |
 FORT |     -     -   -12     X  -122     -   220     -  -376 |
 GODE |     -   -42    46  -220     -     -     -     -   216 |
 GOLD |     -   -56     -  -135     -     -   -48     -   351 |
 GUAT |     -     -     -     -  -225     -   130     -   -34 |
 HERS |     -  -305     -     -     -     -     -     -   543 |
 HOFN |     -     -     -     -    17     -    -8     -     - |
 HRAO |     -    92     -     -     -     -   -66     -     X |
 IISC |     -   -90     -   -57     -     -   139     -  -134 |
 JPLM |     -     -   -79     -  -172     -     -     -   339 |
 KGN0 |     -     -  -118     -     -     -     -     -   185 |
 KIRU |     -  -187   222   -63     -     -   -69     -   217 |
 KOKB |     -   -92   197     -  -115     -     -     -     - |
 KOSG |     -  -165     -     -     -     -     -     -   293 |
 KOUR |     -   -55     -   146     -     -    67     -  -211 |
 KSTU |     -   -18     -     -     -     -     -     -    31 |
 LPGS |     -     -     -     -     -     -    82     -  -204 |
 MADR |     -   -43    49     -     -     -     -     -     X |
 MALI |     -   139     -     -  -241     -     -     -    75 |
 MAS1 |     -    20    83    17    17     -     -     -  -202 |
 MATE |     -   122     -   107     -     -     -     -  -319 |
 MCM4 |     -   368     -     -  -388     -     X     -  -164 |
 MDO1 |     -   -30    60     -     -     -     -     -   -41 |
 MEDI |     -   -60     -     -     -     -     -     -   106 |
 METS |     -   -98     -     -     -     -     -     -   174 |
 MKEA |     -    -2     -   -66   -43     -    54     -   -14 |
 NLIB |     -     -     -   -89     -     -    77     -  -107 |
 NRC2 |     -    58   155  -357   -24     -   -65     -   189 |
 NRIL |     -     -     -     -  -105     -    53     -     - |
 NTUS |     -   -28     -     -     -     -     -     -    50 |
 NYA1 |     -    -9     -     -     -     -     -     -    17 |
 NYAL |     -     -     -    97     -     -     -     -   -92 |
 OHI2 |     -   205     -     -   -82     -  -104     -     - |
 OS0G |     -    40     -    49     -     -     -     -  -119 |
 PERT |     -    18    32   -37    86     -   -62     -     - |
 PIE1 |     -    11     -   113     -     -     X     -  -128 |
 POTS |     -   -77     -   -89     -     -     -     -   221 |
 RBAY |     -     -     -     -   177     -     -     -  -222 |
 RIOG |     -    57     -   145  -179     -     -     -   -16 |
 SELE |     -    86     -  -330     -     -    18     -   119 |
 SFER |     -  -107     -     X     -     -     -     -   191 |
 STJO |     -   -94   101     -     -     -   -93     -   243 |
 SUTH |     -   -55     -    95     -     -     -     -     6 |
 THU3 |     -   -50     -     -    71     -     -     -     - |
 TIDB |     -   -67    62   -71  -153     -     X     -   283 |
 TRO1 |     -  -180     -     -    45     -     -     -   286 |
 TROM |     -     -     -   -67     -     -     -     -    64 |
 TSKB |     -   -10   121  -105     -     -     -     -   -71 |
 TWTF |     -  -252     -     -     -     -     -     -   448 |
 URUM |     -   -48     -     -     -     -     -     -    86 |
 USN1 |     -     -     -     -     -     -  -203     -   506 |
 USNO |     -    14    52   161     -     -   -12     -  -232 |
 USUD |     -   -31     -    57     -     -     -     -     0 |
 VILL |     -   234     -  -448     -     -     -     -    11 |
 WILL |     -   -88     -     -     -     -     -     -   157 |
 WTZR |     -   152     -  -316     -     -     -     -    32 |
 WUHN |     -    36     -   215   361     -  -157     -  -330 |
 YAKT |     -   -67     -     -     -     -   -65     -   281 |
 YELL |     -    34     -   142     -     -   -75     -   -10 |
 YSSK |     -   -15     -     -     -     -    11     -     - |
 ZWEN |     -     X     -     -  -186     -   152     -  -149 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8048    87    79   138   158  3629    51  8363   122 |  281   4.32
    2 |  7870    52    48    50   135  6703    87  7459    90 |  288   1.96
    3 |  4296    55    48   102    62  6564    33  4110    72 |  288   3.91
    4 |  1180    98    59    55   142  1562    68  1225     X |  288   0.93
    5 |  9003    61    39    76   125  5864    70  8310    96 |  288   3.24
    6 | 15363    79    99    75    37  4648    57 15232    74 |  288  10.09
    7 |  1599    53    42   124    54  1888    70  1505     X |  288   0.50
    8 |  4711    47    33    42    33  1920    43  4731    36 |  288   3.29
    9 |  4043    48    60   118    46  2548    51  3958     X |  288   2.21
   10 |  2718    90    75   149   108  1602   100  3077   199 |  288   2.01
   11 |  1396    98   104   238    94  1082    91  1198   170 |  288   0.25
   13 |  1717    73    58    55    91  1255    92  1795   249 |  288   0.30
   14 |  1514    91   101    82    69  1510    83  1414    92 |  288   0.27
   15 |  6159    62    37     -    89  3350    50  5685   109 |  288   1.82
   17 |  5213    58    37     X    94  4389    71  4958    77 |  288   2.08
   18 |  1083    60    67   183    46  1136    53  1175    63 |  288   0.32
   20 |  1174    72    63    37    55  1259    64  1157     X |  288   0.23
   22 |  1331   113   109    96   271 14691   208  5209   198 |  288   4.94
   23 |  6829    67   103   150    86  5753    53  6721   140 |  288   7.16
   24 |  4229    64    61    64    87  4938    31  4106     X |  288   2.05
   25 |  5995   113    62    33    51  1821    75  5974    70 |  288   2.78
   26 |   866   154    71   180    75  1116    87   706   177 |  283   0.90
   27 |  2983    44    55    63    36 11270    48  2905   101 |  288   1.46
   28 |   845    33    59    45    68  1458    65  1000   155 |  288   0.51
   29 |  1448   142    72   139    98     -    80  1280     X |  286   0.98
   30 |  2121    58    43    74   140  2410    93  1750    61 |  288   0.50
   31 |  4402    78   100   134    97  6143    26  3538   145 |  288   1.32
 -----+-------------------------------------------------------+--------------
 ALBH |     -    56   135   114     -     -    35     -    50 |  288   0.13
 ALGO |     -    34    25     X     -     -    15     -    32 |  288   0.05
 AMC2 |     -    24    54     -     -     -    24     -    30 |  288   0.07
 AOML |     -    34     -     -     -     -     -     -    61 |  284  38.73
 ARTU |     -    30     -    37    21     -     -     -     - |  288  21.02
 AUCK |     -    31     -   117     X     -     -     -    99 |  288  17.76
 BAHR |     -    36    25    36    28     -    21     -    37 |  288   0.33
 BILI |     -    32     -     -    26     -    26     -     - |  287  12.91
 BJFS |     -     -     -     -    96     -     -     -   121 |  277    >>>
 BOGT |     -    60     -    81     -     -    45     -    69 |  288  32.48
 BOR1 |     -    20     -     -     -     -     -     -    36 |  286   0.55
 BRMU |     -    21     -    62    28     -     -     -     X |  288  22.39
 CHAT |     -    39     -    71    36     -     -     -   107 |  263  11.31
 CHUR |     -    43    85     -     -     -     -     -    46 |  286   0.49
 CRO1 |     -     -   159     -     -     -    68     -    75 |  288  26.58
 DAEJ |     -    67    76     -     -     -     -     -     X |  281   3.09
 DRAO |     -    44    24     -     -     -     -     -    48 |  288   0.15
 EISL |     -     -     -    82    44     -    68     -    82 |  288  56.31
 FAIR |     -     -    20    62    18     -    14     -    26 |  288   0.07
 FORT |     -     -    27     X    41     -    19     -    26 |  288   0.06
 GODE |     -    39   125    79     -     -     -     -    74 |  288   0.08
 GOLD |     -    46     -   127     -     -    26     -    41 |  288  24.28
 GUAT |     -     -     -     -    26     -    21     -    40 |  216    >>>
 HERS |     -    32     -     -     -     -     -     -    57 |  262  14.55
 HOFN |     -     -     -     -    63     -    32     -     - |  285    >>>
 HRAO |     -    39     -     -     -     -    28     -     X |  286   4.20
 IISC |     -    35     -    36     -     -    14     -    71 |  288  28.09
 JPLM |     -     -    91     -    90     -     -     -    47 |  288  16.80
 KGN0 |     -     -    63     -     -     -     -     -    98 |  280   0.43
 KIRU |     -    66    29    65     -     -    24     -   163 |  287   1.98
 KOKB |     -    45    27     -    43     -     -     -     - |  288   0.07
 KOSG |     -    17     -     -     -     -     -     -    31 |  288  39.97
 KOUR |     -    54     -   173     -     -    43     -    67 |  287   4.49
 KSTU |     -   107     -     -     -     -     -     -   190 |  274  12.99
 LPGS |     -     -     -     -     -     -    20     -    49 |  288  27.75
 MADR |     -    68    78     -     -     -     -     -     X |  288  18.05
 MALI |     -    22     -     -    28     -     -     -    37 |  288  47.25
 MAS1 |     -    38    41   174    59     -     -     -    52 |  288   2.33
 MATE |     -    44     -    72     -     -     -     -   106 |  287    >>>
 MCM4 |     -    83     -     -    56     -     X     -   105 |  288  38.19
 MDO1 |     -    69    50     -     -     -     -     -   165 |  276 139.84
 MEDI |     -    17     -     -     -     -     -     -    29 |  286   0.17
 METS |     -    24     -     -     -     -     -     -    43 |  285   0.26
 MKEA |     -    58     -   119    36     -    43     -    73 |  288  39.87
 NLIB |     -     -     -    68     -     -    26     -    21 |  288   0.04
 NRC2 |     -    23    17    37    22     -    23     -    18 |  288   0.03
 NRIL |     -     -     -     -    40     -    20     -     - |  287  13.86
 NTUS |     -    34     -     -     -     -     -     -    61 |  288   9.71
 NYA1 |     -    23     -     -     -     -     -     -    41 |  285   0.06
 NYAL |     -     -     -   125     -     -     -     -   120 |  287   0.08
 OHI2 |     -    87     -     -    43     -    51     -     - |  288   9.37
 OS0G |     -    39     -    27     -     -     -     -    57 |  288   0.14
 PERT |     -    40    24    70    32     -    51     -     - |  288  13.56
 PIE1 |     -    36     -    59     -     -     X     -    26 |  288   0.03
 POTS |     -    64     -    80     -     -     -     -   165 |  277  15.97
 RBAY |     -     -     -     -    73     -     -     -    91 |  247 108.21
 RIOG |     -    53     -    96    83     -     -     -    44 |  282  14.66
 SELE |     -    32     -    29     -     -    17     -    67 |  273  31.39
 SFER |     -    22     -     X     -     -     -     -    38 |  284   0.37
 STJO |     -    26    13     -     -     -    24     -    25 |  288   0.06
 SUTH |     -    33     -    48     -     -     -     -    60 |  288  25.78
 THU3 |     -    15     -     -    21     -     -     -     - |  285   9.94
 TIDB |     -    28    43    50    28     -     X     -    96 |  246   0.11
 TRO1 |     -    61     -     -    34     -     -     -   120 |  285  13.57
 TROM |     -     -     -    78     -     -     -     -    75 |  250  10.97
 TSKB |     -    32    29    72     -     -     -     -    57 |  288   2.13
 TWTF |     -    59     -     -     -     -     -     -   106 |  285   0.36
 URUM |     -    20     -     -     -     -     -     -    35 |  288  25.41
 USN1 |     -     -     -     -     -     -    12     -    29 |  286   0.02
 USNO |     -    50    24    37     -     -    17     -    33 |  288   0.03
 USUD |     -    23     -    67     -     -     -     -    52 |  288  23.43
 VILL |     -    99     -   199     -     -     -     -    78 |  288   1.47
 WILL |     -    14     -     -     -     -     -     -    26 |  286   1.54
 WTZR |     -    40     -    35     -     -     -     -    48 |  288   0.11
 WUHN |     -    22     -    40    88     -    41     -    88 |  287  18.72
 YAKT |     -    39     -     -     -     -    55     -   105 |  288   0.52
 YELL |     -   114     -    91     -     -    25     -   241 |  288   0.05
 YSSK |     -    49     -     -     -     -    35     -     - |  287  14.14
 ZWEN |     -     X     -     -    97     -    32     -   197 |  268  30.18
 -----+-------------------------------------------------------+--------------
 TOT  |  5243    60    68    98    80  4781    50  5105    96 |


 BEST CLOCK FIT: USN1   286   0.02 (ns) 

