
 GPS week: 1196   Day: 1   MJD: 52617                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2586     96     0.01    -0.12     4.67     0.00
 cod |   288     0  26329    253     6.04   -12.68     0.07    14.56
 emr |   288     0  20134     78  1653.48    19.71     0.08    12.94
 esa |   288     0  18584    658     0.35     0.32     0.08    11.83
 gfz |   288     0  15834      0    -0.09    -0.60     0.06    18.01
 igu |    96     0   2492     96  -410.33  3454.31     4.33     0.00
 jpl |   288     0  13765   1076     0.80     0.03     0.05    26.43
 usn |   288     0  30580    724   669.89   -48.55     0.07    16.22

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   usn |
 -----+-------------------------------------------------+
    1 | -6069   100   -10     -    34     -   -80   -62 |
    2 | -7874 -1010   154   411   452 -1168   -64   -45 |
    3 | -3066    29  -229   124   309  2265   162  -390 |
    4 | -5943    -9  -189   -67   -44  1099   483  -191 |
    5 |  7992  1047  -356    92  -193 17898  -276  -200 |
    6 |  3432   202  -256   161    26  6483   172  -257 |
    7 |  4538    -2   -37   146   252  -855  -368   -73 |
    8 |  1880   101    84    59    64  6820  -146  -147 |
    9 |  2919    87  -207   227   -10  2599   187  -199 |
   10 |  2450   153    20   140   116 -4977  -503    45 |
   11 |  3505   116    66    36  -109  4726   152  -193 |
   13 |  5033   -10   -49   -74  -134  1960   591  -170 |
   14 |  3503    42    59   138   -14  1575   -28  -144 |
   15 | -4709   180  -173     -   172  3211  -302    -3 |
   17 |  2181   294  -147   295    10-41961  -158  -226 |
   18 |  3897    82  -112   482  -105  2518    81  -268 |
   20 |  5328    12    67   181   -90  3499     3   -98 |
   22 |     X    -2  -177   314   674     X  -676  -145 |
   23 |  2872   198  -136   -51   195  8515    69  -355 |
   24 |  1328   150  -177   -41    15  4394   138   -77 |
   25 | -6973   -24  -288   136   217 -1977   304  -325 |
   26 | -4477    20  -311  -142   132 -1838   488  -233 |
   27 | -3235    11   -52   -56   168-16075   139  -220 |
   28 |  -202   219   203   -67  -183  4872   103  -186 |
   29 |   557    -7  -282     X    86  2041   298  -176 |
   30 | -1707   -61  -311    84    76  2419   438  -217 |
   31 | -7367    98   -26   100    41 -8032    62  -240 |
 -----+-------------------------------------------------+
 ALBH |     -   -95  -102     -     -     -    10   150 |
 ALGO |     -     -  -293   808     -     -   -42  -287 |
 AMC2 |     -  -193     0     -     -     -     X   175 |
 AOML |     -  -301     -     -     -     -     -   270 |
 ASC1 |     -  -117     -     -     -     -     -   105 |
 AUCK |     -     -     -   459  -546     -     -   271 |
 BAHR |     -    59    68  -109    32     -    17   -89 |
 BILI |     -    36     -     -   -32     -     2     - |
 BJFS |     -     -   125     -   -90     -     -     - |
 BOGT |     -   493     -  -202     -     -  -186    13 |
 BOR1 |     -     -   158     -     -     -     -  -126 |
 BRMU |     -    94     -  -523   202     -     -    73 |
 BRUS |     -     -    12     -     -     -   -91   140 |
 CAS1 |     -     1     -     -     -     -     -    -1 |
 CEDU |     -  -191     -  -463     -     -     -   513 |
 CHAT |     -   105     -   -59  -145     -     -   110 |
 CHUR |     -    96    73     -     -     -     -  -144 |
 COCO |     -   100     -  -139     -     -     -    13 |
 CRO1 |     -  -101     -     -     -     -    70   -31 |
 DAEJ |     -     -   287     -     -     -   579 -1220 |
 DRAO |     -    50    62     -     -     -     -   -94 |
 EISL |     -  -240     -     X    73     -     X    96 |
 FAIR |     -    -9    -4     3   -63     -   -17   107 |
 FORT |     -     X     -  -541   196     -   159   -84 |
 GODE |     -  -217    41    50     -     -     -   127 |
 GOLD |     -   -90     -     -     -     -   -51   165 |
 GRAZ |     -     -   113    36     -     -     -  -113 |
 GUAT |     -    14     -     -  -216     -     9   214 |
 HERS |     -  -436  -276     -     -     -     -   595 |
 HOB2 |     -    86   350  -307     -     -     -  -120 |
 HOFN |     -     -     -     -   121     -   -82     - |
 HRAO |     -   -13     -     -     -     -  -245   443 |
 IISC |     -  -105     -   -44  -203     -   214     1 |
 JPLM |     -     -   -83     -   -77     -     -   151 |
 KERG |     -   -16    54     -    49     -     -   -83 |
 KIRU |     -  -256   110   100     -     -  -100   234 |
 KIT3 |     -  -130     -     -     -     -     -   117 |
 KOKB |     -  -139   241     -   -65     -     -     - |
 KOSG |     -  -266     -     -     -     -     -   239 |
 KOUR |     -   -55     -   -35     -     -    11    56 |
 KSTU |     -  -218     -     -     -     -     -   196 |
 KUNM |     -   -34     -     -     -     -     -    30 |
 LPGS |     -    -7     -     -     -     -   -30    55 |
 MAC1 |     -  -212     -  -192     -     -     -   334 |
 MADR |     -    -1     1     -     -     -     -     X |
 MALI |     -   632     -     - -1135     -     -   722 |
 MAS1 |     -    53   143   -68  -119     -     -    21 |
 MATE |     -     -     -    21     -     -     -   -15 |
 MAW1 |     -  -280     -     -     -     -     -   251 |
 MCM4 |     -   193     -     -   -50     -     X  -100 |
 MDO1 |     -    93   125  -162     -     -     -   -65 |
 MEDI |     -     -   -67     -     -     -     -    54 |
 METS |     -     -   -64     -     -     -     -    51 |
 MIZU |     -     -    63     -     -     -     -   -50 |
 MKEA |     -    65     -   -67  -108     -    73    -9 |
 NKLG |     -  -140     -   172   -54     -     -    58 |
 NLIB |     -   -66    40    -7     -     -    80   -98 |
 NOT1 |     -     -  -318     -     -     -     -   254 |
 NRC2 |     -    65   196  -806    66     -   -85   426 |
 NRIL |     -     -     -     -   -56     -    38     - |
 OS0G |     -     -   156    34     -     -     -  -148 |
 PERT |     -   -57   273     8   -36     -   -79     - |
 PIE1 |     -    65   222   -87     -     -    29  -218 |
 POTS |     -  -129     -  -171     8     -     -   234 |
 RABT |     -   114     -     -     -     -   -63     - |
 RBAY |     -    24     -     -   254     -     -  -400 |
 REYK |     -  -190     -     -     -     -     -   171 |
 RIOG |     -   179     -    13   -58     -     -  -108 |
 SANT |     -    57     -   148     -     -     -  -159 |
 SCH2 |     -     -   -34     -     -     -     -    27 |
 SELE |     -   -93     -    67     -     -    -6    45 |
 SFER |     -   -59   -11     -     -     -     -    61 |
 STJO |     -     -    66     -     -     -  -169   224 |
 SUTH |     -  -141     -  -274     -     -     -   353 |
 THTI |     -     -     -     2   168     -     -  -188 |
 THU3 |     -    13     -     -   -10     -     -     - |
 TIDB |     -    81    46   -85   -42     -     X     X |
 TLSE |     -  -187   -16     -     -     -     -   182 |
 TSKB |     -    76   100   -13     -     -     -  -139 |
 TWTF |     -     -   -36     -     -     -     -    28 |
 USN1 |     -     -   488     -     -     -  -445   344 |
 USNO |     -    28   166     -     -     -   -25  -116 |
 USUD |     -   -27   109   -22     -     -     -   -46 |
 VILL |     -     -     -    12     -     -     -    -9 |
 WILL |     -   -36   -22     -     -     -     -    50 |
 WTZR |     -    20   295  -267     -     -     -   -59 |
 YAKT |     -     4   -56     -     -     -   -53   126 |
 YAR2 |     -  -312     -     -     -     -     -   280 |
 YELL |     -   114     -   101     -     -   -39  -112 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 | 10901   161    65     -   125     -    40    52 |  280   4.71
    2 |  3956   108    75    57   100  2788   115    71 |  288   2.61
    3 |  3007    46    69    59    92  2313    56    73 |  288   1.29
    4 |  1979    94    62   128    53   545    86    39 |  288   0.77
    5 |  4165   128    46    97    63  8021    40    45 |  288   2.40
    6 | 11970    60   100    44    57  4488    35    97 |  288   9.70
    7 |  2202    63    71    82    40  1392    89    33 |  288   0.69
    8 |  6925    41    82    98    80  4461    33    77 |  288   4.12
    9 |  2893    82    52    61    46  2079    73   115 |  288   1.95
   10 |  4419    80    85    67    81  3336    76    87 |  288   2.62
   11 |  1073    86    81    65    48  2118    46    97 |  288   0.55
   13 |   924    79    53    61   105  1310    80    55 |  288   0.26
   14 |  2204    75    54    85    34   423    49    66 |  288   0.19
   15 |  3825    80    60     -    36  2545    96    37 |  288   2.10
   17 |  3743   105    50   114    43 13009    28    34 |  288   1.35
   18 |  1305    77    44   120    47   729    39    69 |  288   0.34
   20 |   870    96    57    86    31  1370    53    51 |  288   0.18
   22 |     X    94   102   102   104     X   128   126 |  288  51.49
   23 |  7988   119   105   162    62  3737    73   237 |  288   6.87
   24 |  3795   109    61   129    96  1869    60    91 |  288   2.32
   25 |  4477    79    67    90    31  2037    45    69 |  288   1.31
   26 |   970   113   112   212   146   871    72    85 |  284   0.40
   27 |  2232    65    53    48    33 10254    55    57 |  288   1.28
   28 |  2931    47    80   116    96  2696    73   130 |  288   0.47
   29 |  2783   108   118     X    95   962   145   117 |  282   0.76
   30 |  3861    84    48    40   123  2829    73    62 |  288   0.60
   31 |  3483    73    87    80    94  3152    49    82 |  288   1.31
 -----+-------------------------------------------------+--------------
 ALBH |     -    44   145     -     -     -    50    35 |  288   0.11
 ALGO |     -     -    27    44     -     -    28    29 |  288   0.09
 AMC2 |     -    41    69     -     -     -     X    35 |  288   0.07
 AOML |     -    34     -     -     -     -     -    31 |  286  27.28
 ASC1 |     -    99     -     -     -     -     -    89 |  263    >>>
 AUCK |     -     -     -    68    31     -     -    28 |  288  26.15
 BAHR |     -    52    23    42    23     -    26    23 |  288   0.43
 BILI |     -    49     -     -    26     -    37     - |  287  13.67
 BJFS |     -     -    53     -    38     -     -     - |  278    >>>
 BOGT |     -    64     -   113     -     -    26    39 |  288  38.46
 BOR1 |     -     -    46     -     -     -     -    37 |  284   0.67
 BRMU |     -    49     -    53    35     -     -    33 |  288  20.57
 BRUS |     -     -    51     -     -     -    21    33 |  288   0.05
 CAS1 |     -    31     -     -     -     -     -    28 |  288   9.16
 CEDU |     -    37     -    30     -     -     -    34 |  288  14.89
 CHAT |     -    36     -    66    39     -     -    36 |  287  12.69
 CHUR |     -    40    75     -     -     -     -    31 |  288   0.53
 COCO |     -    54     -    42     -     -     -    42 |  288  11.48
 CRO1 |     -    88     -     -     -     -    45    29 |  285  26.53
 DAEJ |     -     -   184     -     -     -    80   212 |  265   4.73
 DRAO |     -    25    25     -     -     -     -    21 |  288   0.12
 EISL |     -   109     -     X    32     -     X    66 |  284  55.87
 FAIR |     -    54    22    45    21     -    32    35 |  288   0.08
 FORT |     -     X     -    77    99     -    56    47 |  288   0.33
 GODE |     -    37    65    34     -     -     -    25 |  288   0.12
 GOLD |     -    38     -     -     -     -    28    26 |  288  17.94
 GRAZ |     -     -    85   200     -     -     -    86 |  287    >>>
 GUAT |     -    17     -     -    40     -    17    34 |  288    >>>
 HERS |     -    64    86     -     -     -     -    47 |  264  25.57
 HOB2 |     -    66   142    72     -     -     -    40 |  288   0.07
 HOFN |     -     -     -     -    22     -    15     - |  285    >>>
 HRAO |     -    58     -     -     -     -    33    42 |  288   2.46
 IISC |     -    41     -    49    24     -    32    41 |  288  29.62
 JPLM |     -     -    92     -    49     -     -    34 |  288  18.30
 KERG |     -   121    57     -    31     -     -    76 |  287   1.49
 KIRU |     -    79    66    41     -     -    33    56 |  288   3.28
 KIT3 |     -   136     -     -     -     -     -   122 |  251  16.03
 KOKB |     -    35    28     -    27     -     -     - |  288   0.07
 KOSG |     -    54     -     -     -     -     -    49 |  288  55.54
 KOUR |     -    56     -   142     -     -    38    89 |  286   1.76
 KSTU |     -   166     -     -     -     -     -   149 |  279  11.98
 KUNM |     -    17     -     -     -     -     -    15 |  281  37.48
 LPGS |     -    51     -     -     -     -    33    39 |  285  21.54
 MAC1 |     -   203     -   130     -     -     -    96 |  285  24.88
 MADR |     -    74    83     -     -     -     -     X |  287  19.52
 MALI |     -    37     -     -    32     -     -    54 |  288 603.45
 MAS1 |     -    52    55    55    44     -     -    34 |  288   2.59
 MATE |     -     -     -    32     -     -     -    23 |  288   0.17
 MAW1 |     -    47     -     -     -     -     -    42 |  192  30.17
 MCM4 |     -    69     -     -   109     -     X   128 |  274    >>>
 MDO1 |     -    33    31    34     -     -     -    32 |  288  29.58
 MEDI |     -     -    37     -     -     -     -    30 |  286   0.12
 METS |     -     -    32     -     -     -     -    26 |  285   5.45
 MIZU |     -     -    58     -     -     -     -    47 |  271   0.36
 MKEA |     -    44     -    46    43     -    28    31 |  288  50.31
 NKLG |     -    60     -    78    31     -     -    27 |  287 367.91
 NLIB |     -    38   117    38     -     -    33    33 |  288   0.05
 NOT1 |     -     -    78     -     -     -     -    62 |  286    >>>
 NRC2 |     -    47    46    43    34     -    19    20 |  288   0.05
 NRIL |     -     -     -     -    25     -    17     - |  288  12.86
 OS0G |     -     -    38    31     -     -     -    24 |  288   0.36
 PERT |     -    30   188    59    39     -    59     - |  288  16.72
 PIE1 |     -    26   109    58     -     -    33    34 |  288   0.07
 POTS |     -    39     -    34    15     -     -    34 |  288  16.84
 RABT |     -    36     -     -     -     -    20     - |  255  22.06
 RBAY |     -   123     -     -    94     -     -    37 |  223 106.85
 REYK |     -    37     -     -     -     -     -    34 |  287  14.75
 RIOG |     -    50     -    88    58     -     -    94 |  284  17.20
 SANT |     -    33     -    41     -     -     -    45 |  288   8.45
 SCH2 |     -     -    35     -     -     -     -    28 |  284  14.82
 SELE |     -    32     -    63     -     -    26    31 |  288  34.84
 SFER |     -    83   137     -     -     -     -    54 |  284   0.39
 STJO |     -     -    32     -     -     -    19    23 |  288   0.18
 SUTH |     -    53     -    43     -     -     -    65 |  288  17.57
 THTI |     -     -     -    54    38     -     -    56 |  287   1.68
 THU3 |     -    29     -     -    24     -     -     - |  288   8.33
 TIDB |     -    47    52    69    22     -     X     X |  226   0.13
 TLSE |     -    75    72     -     -     -     -    40 |  288   0.88
 TSKB |     -    48    60    47     -     -     -    33 |  288   0.65
 TWTF |     -     -    86     -     -     -     -    68 |  286   0.35
 USN1 |     -     -    62     -     -     -    32    27 |  288   0.06
 USNO |     -    27    39     -     -     -    18    30 |  288   0.04
 USUD |     -    83   144    72     -     -     -   132 |  288  17.99
 VILL |     -     -     -   107     -     -     -    78 |  288   4.42
 WILL |     -    41    97     -     -     -     -    50 |  287   1.98
 WTZR |     -    58    52    34     -     -     -    38 |  288   0.13
 YAKT |     -    53   100     -     -     -    53    42 |  288   0.54
 YAR2 |     -    29     -     -     -     -     -    26 |  285   3.87
 YELL |     -    40     -    43     -     -    27    29 |  288   0.04
 -----+-------------------------------------------------+--------------
 TOT  |  4670    73    79    82    64  4332    49    66 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

